<img width="1024" height="683" src="https://dev.sitesmart.io/phace/wp-content/uploads/2024/01/AdobeStock_359201348-1024x683.jpeg" alt="" srcset="https://dev.sitesmart.io/phace/wp-content/uploads/2024/01/AdobeStock_359201348-1024x683.jpeg 1024w, https://dev.sitesmart.io/phace/wp-content/uploads/2024/01/AdobeStock_359201348-300x200.jpeg 300w, https://dev.sitesmart.io/phace/wp-content/uploads/2024/01/AdobeStock_359201348-768x512.jpeg 768w, https://dev.sitesmart.io/phace/wp-content/uploads/2024/01/AdobeStock_359201348-1536x1024.jpeg 1536w, https://dev.sitesmart.io/phace/wp-content/uploads/2024/01/AdobeStock_359201348-2048x1365.jpeg 2048w, https://dev.sitesmart.io/phace/wp-content/uploads/2024/01/elementor/thumbs/AdobeStock_359201348-scaled-qi5ha743m3k11k00x4zjwzxpnrw5qkqydf23ddnw4g.jpeg 360w" sizes="(max-width: 1024px) 100vw, 1024px" />															
			<h2>Water Mains Laying, a key service offered by Phace Contracts Ltd</h2>		
		<p>Situated in Dungannon, we extend our professional services across the entirety of Northern Ireland, showcasing over 20 years of proficiency in the water utility sector..</p><p><strong>Understanding Water Mains Laying</strong><br />Water mains laying is a critical process in establishing a robust and reliable water supply network. This service involves the installation, maintenance, and replacement of the main pipelines that distribute water from treatment plants to various locations, including residential, commercial, and industrial areas. Our approach ensures a seamless supply of water, adhering to the highest standards of safety and efficiency.</p>		
			<a href="https://dev.sitesmart.io/phace/contact/">
						Enquire Today
					</a>
			<h2>Water Mains Laying, a key service offered by Phace Contracts Ltd</h2>		
		<p>We at Phace Contracts Ltd are dedicated to providing comprehensive water mains laying services, which include:</p>		
				<h3>
						Installation and Replacement of New Water Mains					
				</h3>
									<p>
						Implementing and replacing new water distribution networks with precision and care, ensuring long-term reliability and efficiency.
					</p>
				<h3>
						Advanced Techniques &amp; Materials					
				</h3>
									<p>
						Utilising the latest techniques and high-quality materials for durable and sustainable water mains infrastructure.
					</p>
				<h3>
						Compliance with Industry Regulations					
				</h3>
									<p>
						Strict adherence to industry standards and regulatory compliance, ensuring the safety and quality of the water supply					</p>
			<h2>High-Quality Cranes for Construction Projects in Northern Ireland</h2>		
		<p>KBO Hire is your trusted source for top-tier cranes tailored to your construction needs in Northern Ireland. Whether you require a cherry picker or a telescopic boom, we've got you covered. Our fleet includes mobile cranes ranging from 35T to 200T, ensuring we meet the demands of your project.&nbsp;</p>		
			<a href="https://dev.sitesmart.io/kbo/crane-hire/">
						CRANE HIRE
					</a>