<div class="wp-block-uagb-container uagb-block-217d307e alignfull uagb-is-root-container"><div class="uagb-container-inner-blocks-wrap">
<div class="wp-block-uagb-container uagb-block-83e35309">
<div class="wp-block-uagb-info-box uagb-block-1417ab23 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h6 class="uagb-ifb-title-prefix">Our Story</h6><h2 class="uagb-ifb-title">About Our Company and Our People</h2></div></div></div>
</div>



<div class="wp-block-uagb-container uagb-block-de429113">
<div class="wp-block-uagb-info-box uagb-block-438e9a5b uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"></div><p class="uagb-ifb-desc">We believe that everyone has the potential to achieve greatness and fulfill their dreams. That's why we are committed to providing innovative solutions and exceptional services that empower individuals to overcome obstacles and turn their aspirations into reality. With a strong focus on customer satisfaction and a team of experienced professionals, we strive to deliver unparalleled results and make a positive impact in the lives of our clients. Join us on this journey of empowerment, and let us help you make your dreams come true.</p></div></div>
</div>
</div></div>
";}s:8:"id-77201";a:10:{s:5:"title";s:8:"About 01";s:3:"url";s:47:"https://websitedemos.net/astra-blocks/about-01/";s:3:"tag";a:0:{}s:8:"category";i:825;s:16:"primary-category";s:0:"";s:4:"type";s:5:"block";s:12:"page-builder";s:9:"gutenberg";s:16:"required-plugins";a:0:{}s:10:"stylesheet";s:46311:".wp-block-uagb-container{display:flex;position:relative;box-sizing:border-box;transition-property:box-shadow;transition-duration:0.2s;transition-timing-function:ease}.wp-block-uagb-container .spectra-container-link-overlay{bottom:0;left:0;position:absolute;right:0;top:0;z-index:10}.wp-block-uagb-container.uagb-is-root-container{margin-left:auto;margin-right:auto}.wp-block-uagb-container.alignfull.uagb-is-root-container .uagb-container-inner-blocks-wrap{display:flex;position:relative;box-sizing:border-box;margin-left:auto !important;margin-right:auto !important}.wp-block-uagb-container .uagb-container__video-wrap{height:100%;width:100%;top:0;left:0;position:absolute;overflow:hidden;-webkit-transition:opacity 1s;-o-transition:opacity 1s;transition:opacity 1s}.wp-block-uagb-container .uagb-container__video-wrap video{max-width:100%;width:100%;height:100%;margin:0;line-height:1;border:none;display:inline-block;vertical-align:baseline;-o-object-fit:cover;object-fit:cover;background-size:cover}.st-block-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap>*:not(.wp-block-uagb-container):not(.wp-block-uagb-column):not(.wp-block-uagb-container):not(.wp-block-uagb-section):not(.uagb-container__shape):not(.uagb-container__video-wrap):not(.wp-block-spectra-pro-register):not(.wp-block-spectra-pro-login):not(.uagb-slider-container):not(.spectra-image-gallery__control-lightbox),.st-block-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap,.st-block-container .wp-block-uagb-container>*:not(.wp-block-uagb-container):not(.wp-block-uagb-column):not(.wp-block-uagb-container):not(.wp-block-uagb-section):not(.uagb-container__shape):not(.uagb-container__video-wrap):not(.wp-block-uagb-image):not(.wp-block-spectra-pro-register):not(.wp-block-spectra-pro-login):not(.uagb-slider-container):not(.spectra-container-link-overlay):not(.spectra-image-gallery__control-lightbox):not(.wp-block-uagb-lottie):not(.uagb-faq__outer-wrap){min-width:unset !important;width:100%;position:relative}.st-block-container .ast-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap>.wp-block-uagb-container>ul,.st-block-container .ast-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap>.wp-block-uagb-container ol,.st-block-container .ast-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap>ul,.st-block-container .ast-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap ol{max-width:-webkit-fill-available;margin-block-start:0;margin-block-end:0;margin-left:20px}.ast-plain-container .editor-styles-wrapper .block-editor-block-list__layout.is-root-container .uagb-is-root-container.wp-block-uagb-container.alignwide{margin-left:auto;margin-right:auto}.uagb-container__shape{overflow:hidden;position:absolute;left:0;width:100%;line-height:0;direction:ltr}.uagb-container__shape-top{top:-3px}.uagb-container__shape-bottom{bottom:-3px}.uagb-container__shape.uagb-container__invert.uagb-container__shape-bottom,.uagb-container__shape.uagb-container__invert.uagb-container__shape-top{-webkit-transform:rotate(180deg);-ms-transform:rotate(180deg);transform:rotate(180deg)}.uagb-container__shape.uagb-container__shape-flip svg{transform:translateX(-50%) rotateY(180deg)}.uagb-container__shape svg{display:block;width:-webkit-calc(100% + 1.3px);width:calc(100% + 1.3px);position:relative;left:50%;-webkit-transform:translateX(-50%);-ms-transform:translateX(-50%);transform:translateX(-50%)}.uagb-container__shape .uagb-container__shape-fill{-webkit-transform-origin:center;-ms-transform-origin:center;transform-origin:center;-webkit-transform:rotateY(0deg);transform:rotateY(0deg)}.uagb-container__shape.uagb-container__shape-above-content{z-index:9;pointer-events:none}.nv-single-page-wrap .nv-content-wrap.entry-content .wp-block-uagb-container.alignfull{margin-left:calc(50% - 50vw);margin-right:calc(50% - 50vw)}@media only screen and (max-width: 767px){.wp-block-uagb-container .wp-block-uagb-advanced-heading{width:-webkit-fill-available !important}}
.uagb-ifb-content>svg *{-webkit-transition:all 0.2s;-o-transition:all 0.2s;transition:all 0.2s}.uagb-ifb-content>svg,.uagb-ifb-content{display:inline-block}.uagb-ifb-content>svg{vertical-align:middle;width:inherit;height:inherit;font-style:initial}.uagb-ifb-content .uagb-ifb-icon-wrap svg{box-sizing:content-box;width:inherit;height:inherit}.uagb-ifb-button-wrapper:empty{display:none}div.uagb-ifb-button-wrapper a.uagb-infobox-cta-link,div.uagb-ifb-cta a.uagb-infobox-cta-link,.entry .entry-content a.uagb-infobox-cta-link,a.uagb-infobox-link-wrap,.entry .entry-content a.uagb-infobox-link-wrap{text-decoration:none;align-items:center}.uagb-infobox-icon-left-title.uagb-infobox-image-valign-middle .uagb-ifb-title-wrap,.uagb-infobox-icon-right-title.uagb-infobox-image-valign-middle .uagb-ifb-title-wrap,.uagb-infobox-image-valign-middle .uagb-ifb-icon-wrap,.uagb-infobox-image-valign-middle .uagb-ifb-image-content,.uagb-infobox-icon-left.uagb-infobox-image-valign-middle .uagb-ifb-content,.uagb-infobox-icon-right.uagb-infobox-image-valign-middle .uagb-ifb-content{-ms-flex-item-align:center;-webkit-align-self:center;align-self:center}.uagb-infobox-icon-left-title.uagb-infobox-image-valign-top .uagb-ifb-title-wrap,.uagb-infobox-icon-right-title.uagb-infobox-image-valign-top .uagb-ifb-title-wrap,.uagb-infobox-image-valign-top .uagb-ifb-icon-wrap,.uagb-infobox-image-valign-top .uagb-ifb-image-content,.uagb-infobox-icon-left.uagb-infobox-image-valign-top .uagb-ifb-content,.uagb-infobox-icon-right.uagb-infobox-image-valign-top .uagb-ifb-content{-webkit-align-self:self-start;align-self:self-start}.uagb-infobox-left{justify-content:flex-start;text-align:left;-webkit-box-pack:start;-ms-flex-pack:start;-webkit-justify-content:flex-start;-moz-box-pack:start}.uagb-infobox-center{justify-content:center;text-align:center;-webkit-box-pack:center;-ms-flex-pack:center;-webkit-justify-content:center;-moz-box-pack:center}.uagb-infobox-right{justify-content:flex-end;text-align:right;-webkit-box-pack:end;-ms-flex-pack:end;-webkit-justify-content:flex-end;-moz-box-pack:end}.uagb-infobox-icon-above-title.uagb-infobox__content-wrap,.uagb-infobox-icon-below-title.uagb-infobox__content-wrap{display:block;width:100%}.uagb-infobox-icon-left-title .uagb-ifb-content>svg,.uagb-infobox-icon-left .uagb-ifb-content>svg{margin-right:10px}.uagb-infobox-icon-right-title .uagb-ifb-content>svg,.uagb-infobox-icon-right .uagb-ifb-content>svg{margin-left:10px}.uagb-infobox-icon-left.uagb-infobox__content-wrap,.uagb-infobox-icon-right.uagb-infobox__content-wrap,.uagb-infobox-icon-left-title .uagb-ifb-left-title-image,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image{display:-webkit-box;display:-ms-flexbox;display:-webkit-flex;display:-moz-box;display:flex;-js-display:flex}.uagb-infobox-icon-left-title .uagb-ifb-left-title-image .uagb-ifb-image-content,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image .uagb-ifb-image-content,.uagb-infobox-icon-left .uagb-ifb-image-content,.uagb-infobox-icon-right .uagb-ifb-image-content{flex-shrink:0;line-height:0}.uagb-infobox-icon-left-title .uagb-ifb-left-title-image .uagb-ifb-title-wrap,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image .uagb-ifb-title-wrap,.uagb-infobox-icon-left .uagb-ifb-content,.uagb-infobox-icon-right .uagb-ifb-content{flex-grow:1}.uagb-infobox-icon-right.uagb-infobox__content-wrap,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image{-webkit-box-pack:end;-ms-flex-pack:end;-webkit-justify-content:flex-end;-moz-box-pack:end;justify-content:flex-end}.uagb-ifb-content img{position:relative;display:inline-block;line-height:0;width:auto;height:auto !important;max-width:100%;border-radius:inherit;-webkit-box-sizing:content-box;-moz-box-sizing:content-box;-webkit-border-radius:inherit}.uagb-infobox-module-link{position:absolute;top:0;right:0;bottom:0;left:0;z-index:4;width:100%;height:100%}.uagb-edit-mode .uagb-infobox-module-link{z-index:2}.uagb-infobox-link-icon-after{margin-right:0;margin-left:5px}.uagb-infobox-link-icon-before{margin-right:5px;margin-left:0}.uagb-infobox-link-icon{-webkit-transition:all 200ms linear;transition:all 200ms linear}.uagb-infobox__content-wrap{box-sizing:border-box;position:relative;width:100%;word-break:break-word;z-index:1}.uagb-ifb-separator{display:inline-block;margin:0;border-top-color:#333;border-top-style:solid;border-top-width:2px;line-height:0}.uagb-ifb-button-wrapper{line-height:1}.uagb-ifb-button-wrapper.uagb-ifb-button-type-text .uagb-infobox-cta-link.wp-block-button__link{background-color:unset;border:none}.uagb-ifb-button-wrapper.uagb-ifb-button-type-text .uagb-infobox-cta-link.wp-block-button__link:hover{background-color:unset;border-color:unset}.uagb-ifb-button-wrapper .uagb-infobox-cta-link{cursor:pointer}.uagb-ifb-button-wrapper .wp-block-button__link svg{fill:currentColor}.uagb-infobox__content-wrap a{-webkit-box-shadow:none;box-shadow:none;text-decoration:none}.uagb-ifb-title-wrap{width:100%}.uagb-ifb-title{margin-block-start:0}.uagb-ifb-title-wrap .uagb-ifb-title-prefix{display:block;padding:0;margin:0}.uagb-infobox__content-wrap.uagb-infobox__content-wrap{position:relative}.uagb-ifb-content{width:100%}.uagb-infobox__content-wrap.uagb-infobox,.uagb-ifb-content,.uagb-ifb-title-wrap,.uagb-ifb-title-prefix *,svg.dashicon.dashicons-upload{z-index:1}a.uagb-infobox-link-wrap{color:inherit}.uagb-ifb-content p:empty{display:none}.uagb-infobox__content-wrap .uagb-ifb-content img{display:inline-block;max-width:100%}.uagb-infobox__content-wrap .uagb-ifb-content svg{display:inline-block}.uagb-infobox__content-wrap .uagb-ifb-icon-wrap,.uagb-infobox-icon-left .uagb-ifb-image-content,.uagb-infobox-icon-right .uagb-ifb-image-content{box-sizing:content-box}.uagb-infobox-cta-link>svg{vertical-align:middle;width:15px;height:15px;font-size:15px}.uagb-infobox-cta-link{display:inline-flex}.block-editor-page #wpwrap .uagb-infobox-cta-link svg,.uagb-infobox-cta-link svg{font-style:normal}.uagb-infobox-icon-left-title .uagb-ifb-icon-wrap,.uagb-infobox-icon-left .uagb-ifb-icon-wrap{margin-right:10px;line-height:0}.uagb-infobox-icon-right-title .uagb-ifb-icon-wrap,.uagb-infobox-icon-right .uagb-ifb-icon-wrap{margin-left:10px;line-height:0}.uagb-infobox-icon-left .uagb-ifb-left-right-wrap,.uagb-infobox-icon-right .uagb-ifb-left-right-wrap,.uagb-infobox-icon-left-title .uagb-ifb-left-title-image,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image{display:-webkit-box;display:-ms-flexbox;display:flex}.uagb-infobox-icon-right .uagb-ifb-left-right-wrap,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image{-webkit-box-pack:end;-ms-flex-pack:end;-webkit-justify-content:flex-end;-moz-box-pack:end;justify-content:flex-end}a.uagb-infbox__link-to-all{position:absolute;top:0;left:0;z-index:3;width:100%;height:100%;box-shadow:none;text-decoration:none;-webkit-box-shadow:none}@media only screen and (max-width: 976px){.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-image-content{padding:0;margin-bottom:20px}.uagb-infobox-stacked-tablet.uagb-reverse-order-tablet.uagb-infobox__content-wrap{display:-webkit-inline-box;display:-ms-inline-flexbox;display:-webkit-inline-flex;display:-moz-inline-box;display:inline-flex;flex-direction:column-reverse;-js-display:inline-flex;-webkit-box-orient:vertical;-webkit-box-direction:reverse;-ms-flex-direction:column-reverse;-webkit-flex-direction:column-reverse;-moz-box-orient:vertical;-moz-box-direction:reverse}.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-content,.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-icon-wrap,.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-image-content{display:block;width:100%;text-align:center}.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-icon-wrap,.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-image-content{margin-right:0;margin-left:0}.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap{display:inline-block}.uagb-infobox-icon-left-title.uagb-infobox-stacked-tablet .uagb-ifb-image-content,.uagb-infobox-icon-left-title.uagb-infobox-stacked-tablet .uagb-ifb-icon-wrap,.uagb-infobox-icon-left.uagb-infobox-stacked-tablet .uagb-ifb-image-content,.uagb-infobox-icon-left.uagb-infobox-stacked-tablet .uagb-ifb-icon-wrap{margin-right:0}.uagb-infobox-icon-right-title.uagb-infobox-stacked-tablet .uagb-ifb-image-content,.uagb-infobox-icon-right-title.uagb-infobox-stacked-tablet .uagb-ifb-icon-wrap,.uagb-infobox-icon-right.uagb-infobox-stacked-tablet .uagb-ifb-image-content,.uagb-infobox-icon-right.uagb-infobox-stacked-tablet .uagb-ifb-icon-wrap{margin-left:0}.uagb-infobox-icon-left-title .uagb-ifb-separator{margin:10px 0}}@media screen and (max-width: 767px){.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap{display:inline-block}.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-image-content,.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-icon-wrap{padding:0;margin-bottom:20px;margin-right:0;margin-left:0}.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap.uagb-reverse-order-mobile{display:-webkit-inline-box;display:-ms-inline-flexbox;display:-webkit-inline-flex;display:-moz-inline-box;display:inline-flex;flex-direction:column-reverse;-js-display:inline-flex;-webkit-box-orient:vertical;-webkit-box-direction:reverse;-ms-flex-direction:column-reverse;-webkit-flex-direction:column-reverse;-moz-box-orient:vertical;-moz-box-direction:reverse}.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-image-content,.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-icon-wrap,.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-content{display:block;width:100%;text-align:center}.uagb-infobox-icon-left-title.uagb-infobox-stacked-mobile .uagb-ifb-image-content,.uagb-infobox-icon-left-title.uagb-infobox-stacked-mobile .uagb-ifb-icon-wrap,.uagb-infobox-icon-left.uagb-infobox-stacked-mobile .uagb-ifb-image-content,.uagb-infobox-icon-left.uagb-infobox-stacked-mobile .uagb-ifb-icon-wrap{margin-right:0}.uagb-infobox-icon-right-title.uagb-infobox-stacked-mobile .uagb-ifb-image-content,.uagb-infobox-icon-right-title.uagb-infobox-stacked-mobile .uagb-ifb-icon-wrap,.uagb-infobox-icon-right.uagb-infobox-stacked-mobile .uagb-ifb-image-content,.uagb-infobox-icon-right.uagb-infobox-stacked-mobile .uagb-ifb-icon-wrap{margin-left:0}.uagb-infobox-icon-left-title .uagb-ifb-separator{margin:10px 0}}.uagb-ifb-icon svg{width:inherit;height:inherit;vertical-align:middle}.uagb-ifb-button-icon{height:15px;width:15px;font-size:15px;vertical-align:middle}.uagb-ifb-button-icon svg{height:inherit;width:inherit;display:inline-block}.uagb-ifb-button-icon.uagb-ifb-align-icon-after{float:right}.uagb-ifb-cta-button{display:inline-block}.uagb-disable-link{pointer-events:none}
.wp-block-uagb-container.uagb-is-root-container .uagb-block-a8da75ca{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-a8da75ca .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-a8da75ca .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-a8da75ca .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-a8da75ca .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-a8da75ca .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-a8da75ca > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 48px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-a8da75ca{box-shadow: 0px 0px   #00000070 ;padding-top: 112px;padding-bottom: 112px;padding-left: 40px;padding-right: 40px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 48px;column-gap: 0px;overflow: visible;border-color: inherit;background-color: var(--ast-global-color-4);;}.uagb-block-50f73676 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-50f73676 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-50f73676 .uagb-ifb-icon svg{fill: #333;}.uagb-block-50f73676.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-50f73676 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-50f73676 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-50f73676.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-50f73676.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-50f73676 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-50f73676 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-50f73676 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-50f73676 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-50f73676.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-50f73676.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-50f73676.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-50f73676.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-50f73676 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-50f73676.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-50f73676.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;}.uagb-block-50f73676 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-50f73676 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-50f73676 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-50f73676 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-50f73676.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-50f73676.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-50f73676 .uagb-infobox__content-wrap{text-align: center;}.uagb-block-50f73676.uagb-infobox-icon-above-title{text-align: center;}.uagb-block-50f73676.uagb-infobox__content-wrap{padding-top: 0%;padding-right: 15%;padding-bottom: 0%;padding-left: 15%;}.uagb-block-50f73676 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-50f73676.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-50f73676 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-50f73676 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-50f73676.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-5cb09876{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-5cb09876 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-5cb09876 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-5cb09876 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-5cb09876 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-5cb09876 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-5cb09876 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 72px;}.wp-block-uagb-container.uagb-block-5cb09876{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 72px;overflow: visible;border-color: inherit;background-color: ;;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-6df8007b{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-block-6df8007b .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-6df8007b .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-6df8007b .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-6df8007b .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-6df8007b .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-6df8007b > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-6df8007b{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-639cdfa3 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-639cdfa3 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-639cdfa3 .uagb-ifb-icon svg{fill: #333;}.uagb-block-639cdfa3.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-639cdfa3 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-639cdfa3 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-639cdfa3.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-639cdfa3.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-639cdfa3 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-639cdfa3 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-639cdfa3 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-639cdfa3 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-639cdfa3.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-639cdfa3.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-639cdfa3.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-639cdfa3.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-639cdfa3 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-639cdfa3.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 10px;}.uagb-block-639cdfa3.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-639cdfa3 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-639cdfa3 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-639cdfa3 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-639cdfa3 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-639cdfa3.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-639cdfa3.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-639cdfa3 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-639cdfa3.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-639cdfa3.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-639cdfa3 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-639cdfa3.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-639cdfa3 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-639cdfa3 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-639cdfa3.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-3f5c70ec{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-block-3f5c70ec .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-3f5c70ec .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-3f5c70ec .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-3f5c70ec .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-3f5c70ec .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-3f5c70ec > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-3f5c70ec{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-0e3992a1 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-0e3992a1 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-0e3992a1 .uagb-ifb-icon svg{fill: #333;}.uagb-block-0e3992a1.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-0e3992a1 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-0e3992a1 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-0e3992a1.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-0e3992a1.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-0e3992a1 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-0e3992a1 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-0e3992a1 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-0e3992a1 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-0e3992a1.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-0e3992a1.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-0e3992a1.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-0e3992a1.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-0e3992a1 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-0e3992a1.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 10px;}.uagb-block-0e3992a1.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-0e3992a1 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-0e3992a1 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-0e3992a1 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-0e3992a1 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-0e3992a1.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-0e3992a1.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-0e3992a1 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-0e3992a1.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-0e3992a1.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-0e3992a1 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-0e3992a1.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-0e3992a1 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-0e3992a1 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-0e3992a1.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}@media only screen and (max-width: 976px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-a8da75ca{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-a8da75ca > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-a8da75ca{padding-top: 80px;padding-bottom: 80px;padding-left: 32px;padding-right: 32px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;background-color: var(--ast-global-color-4);;}.uagb-block-50f73676.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-50f73676.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-50f73676.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-50f73676.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-50f73676 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-50f73676 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-50f73676 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-50f73676 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-50f73676 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-50f73676.uagb-infobox__content-wrap{padding-top: 0%;padding-right: 8%;padding-bottom: 0%;padding-left: 8%;}.uagb-block-50f73676 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-50f73676.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-50f73676 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-50f73676 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-50f73676.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-5cb09876{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-5cb09876 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;column-gap: 40px;}.wp-block-uagb-container.uagb-block-5cb09876{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;column-gap: 40px;background-color: ;;align-items: stretch;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-6df8007b{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-6df8007b > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-6df8007b{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;}.uagb-block-639cdfa3.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-639cdfa3.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-639cdfa3.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-639cdfa3.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-639cdfa3 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-639cdfa3 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-639cdfa3 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-639cdfa3 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-639cdfa3 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-639cdfa3.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-639cdfa3 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-639cdfa3.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-639cdfa3 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-639cdfa3 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-639cdfa3.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-3f5c70ec{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-3f5c70ec > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-3f5c70ec{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;}.uagb-block-0e3992a1.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-0e3992a1.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-0e3992a1.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-0e3992a1.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-0e3992a1 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-0e3992a1 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-0e3992a1 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-0e3992a1 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-0e3992a1 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-0e3992a1.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-0e3992a1 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-0e3992a1.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-0e3992a1 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-0e3992a1 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-0e3992a1.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}}@media only screen and (max-width: 767px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-a8da75ca{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-a8da75ca > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 36px;}.wp-block-uagb-container.uagb-block-a8da75ca{padding-top: 64px;padding-bottom: 64px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 36px;background-color: var(--ast-global-color-4);;}.uagb-block-50f73676.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-50f73676.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-50f73676.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-50f73676 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-50f73676 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-50f73676.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-50f73676 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-50f73676 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-50f73676 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-50f73676.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-50f73676 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-50f73676.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-50f73676 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-50f73676 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-50f73676.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-5cb09876{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-5cb09876 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;flex-wrap: wrap;row-gap: 14px;}.wp-block-uagb-container.uagb-block-5cb09876{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 14px;background-color: ;;align-items: stretch;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-6df8007b{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-6df8007b > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-6df8007b{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;flex-wrap: wrap;}.uagb-block-639cdfa3.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-639cdfa3.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-639cdfa3.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-639cdfa3 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-639cdfa3 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-639cdfa3.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-639cdfa3 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-639cdfa3 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-639cdfa3 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-639cdfa3.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-639cdfa3 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-639cdfa3.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-639cdfa3 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-639cdfa3 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-639cdfa3.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-3f5c70ec{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-3f5c70ec > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-3f5c70ec{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;flex-wrap: wrap;}.uagb-block-0e3992a1.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-0e3992a1.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-0e3992a1.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-0e3992a1 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-0e3992a1 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-0e3992a1.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-0e3992a1 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-0e3992a1 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-0e3992a1 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-0e3992a1.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-0e3992a1 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-0e3992a1.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-0e3992a1 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-0e3992a1 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-0e3992a1.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}}";s:7:"content";s:2176:"
<div class="wp-block-uagb-container uagb-block-a8da75ca alignfull uagb-is-root-container"><div class="uagb-container-inner-blocks-wrap">
<div class="wp-block-uagb-info-box uagb-block-50f73676 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h2 class="uagb-ifb-title">Discover Our Journey So Far</h2></div><p class="uagb-ifb-desc">We are a leading company dedicated to empowering individuals to achieve their dreams through innovative solutions and exceptional services.</p></div></div>



<div class="wp-block-uagb-container uagb-block-5cb09876">
<div class="wp-block-uagb-container uagb-block-6df8007b">
<div class="wp-block-uagb-info-box uagb-block-639cdfa3 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"></div><p class="uagb-ifb-desc">Our company is built on the foundation of empowering individuals and helping them unlock their full potential. We understand that each person is unique and has their own dreams and aspirations. That's why we offer personalized solutions and support tailored to each individual's needs and goals. Our dedicated team of experts is always ready to go the extra mile to ensure the success and satisfaction of our clients.</p></div></div>
</div>



<div class="wp-block-uagb-container uagb-block-3f5c70ec">
<div class="wp-block-uagb-info-box uagb-block-0e3992a1 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"></div><p class="uagb-ifb-desc">With years of experience in the industry, our company has established a strong reputation for excellence and reliability. We have a proven track record of delivering outstanding results and have helped countless individuals achieve their dreams. Our commitment to continuous learning and innovation ensures that we stay ahead of the curve and provide the best solutions for our clients. Choose our company and let us be your partner in success.</p></div></div>
</div>
</div>
</div></div>
";}s:8:"id-75799";a:10:{s:5:"title";s:17:"Call To Action 10";s:3:"url";s:56:"https://websitedemos.net/astra-blocks/call-to-action-10/";s:3:"tag";a:0:{}s:8:"category";i:832;s:16:"primary-category";s:0:"";s:4:"type";s:5:"block";s:12:"page-builder";s:9:"gutenberg";s:16:"required-plugins";a:0:{}s:10:"stylesheet";s:34954:".wp-block-uagb-container{display:flex;position:relative;box-sizing:border-box;transition-property:box-shadow;transition-duration:0.2s;transition-timing-function:ease}.wp-block-uagb-container .spectra-container-link-overlay{bottom:0;left:0;position:absolute;right:0;top:0;z-index:10}.wp-block-uagb-container.uagb-is-root-container{margin-left:auto;margin-right:auto}.wp-block-uagb-container.alignfull.uagb-is-root-container .uagb-container-inner-blocks-wrap{display:flex;position:relative;box-sizing:border-box;margin-left:auto !important;margin-right:auto !important}.wp-block-uagb-container .uagb-container__video-wrap{height:100%;width:100%;top:0;left:0;position:absolute;overflow:hidden;-webkit-transition:opacity 1s;-o-transition:opacity 1s;transition:opacity 1s}.wp-block-uagb-container .uagb-container__video-wrap video{max-width:100%;width:100%;height:100%;margin:0;line-height:1;border:none;display:inline-block;vertical-align:baseline;-o-object-fit:cover;object-fit:cover;background-size:cover}.st-block-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap>*:not(.wp-block-uagb-container):not(.wp-block-uagb-column):not(.wp-block-uagb-container):not(.wp-block-uagb-section):not(.uagb-container__shape):not(.uagb-container__video-wrap):not(.wp-block-spectra-pro-register):not(.wp-block-spectra-pro-login):not(.uagb-slider-container):not(.spectra-image-gallery__control-lightbox),.st-block-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap,.st-block-container .wp-block-uagb-container>*:not(.wp-block-uagb-container):not(.wp-block-uagb-column):not(.wp-block-uagb-container):not(.wp-block-uagb-section):not(.uagb-container__shape):not(.uagb-container__video-wrap):not(.wp-block-uagb-image):not(.wp-block-spectra-pro-register):not(.wp-block-spectra-pro-login):not(.uagb-slider-container):not(.spectra-container-link-overlay):not(.spectra-image-gallery__control-lightbox):not(.wp-block-uagb-lottie):not(.uagb-faq__outer-wrap){min-width:unset !important;width:100%;position:relative}.st-block-container .ast-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap>.wp-block-uagb-container>ul,.st-block-container .ast-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap>.wp-block-uagb-container ol,.st-block-container .ast-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap>ul,.st-block-container .ast-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap ol{max-width:-webkit-fill-available;margin-block-start:0;margin-block-end:0;margin-left:20px}.ast-plain-container .editor-styles-wrapper .block-editor-block-list__layout.is-root-container .uagb-is-root-container.wp-block-uagb-container.alignwide{margin-left:auto;margin-right:auto}.uagb-container__shape{overflow:hidden;position:absolute;left:0;width:100%;line-height:0;direction:ltr}.uagb-container__shape-top{top:-3px}.uagb-container__shape-bottom{bottom:-3px}.uagb-container__shape.uagb-container__invert.uagb-container__shape-bottom,.uagb-container__shape.uagb-container__invert.uagb-container__shape-top{-webkit-transform:rotate(180deg);-ms-transform:rotate(180deg);transform:rotate(180deg)}.uagb-container__shape.uagb-container__shape-flip svg{transform:translateX(-50%) rotateY(180deg)}.uagb-container__shape svg{display:block;width:-webkit-calc(100% + 1.3px);width:calc(100% + 1.3px);position:relative;left:50%;-webkit-transform:translateX(-50%);-ms-transform:translateX(-50%);transform:translateX(-50%)}.uagb-container__shape .uagb-container__shape-fill{-webkit-transform-origin:center;-ms-transform-origin:center;transform-origin:center;-webkit-transform:rotateY(0deg);transform:rotateY(0deg)}.uagb-container__shape.uagb-container__shape-above-content{z-index:9;pointer-events:none}.nv-single-page-wrap .nv-content-wrap.entry-content .wp-block-uagb-container.alignfull{margin-left:calc(50% - 50vw);margin-right:calc(50% - 50vw)}@media only screen and (max-width: 767px){.wp-block-uagb-container .wp-block-uagb-advanced-heading{width:-webkit-fill-available !important}}
.uagb-ifb-content>svg *{-webkit-transition:all 0.2s;-o-transition:all 0.2s;transition:all 0.2s}.uagb-ifb-content>svg,.uagb-ifb-content{display:inline-block}.uagb-ifb-content>svg{vertical-align:middle;width:inherit;height:inherit;font-style:initial}.uagb-ifb-content .uagb-ifb-icon-wrap svg{box-sizing:content-box;width:inherit;height:inherit}.uagb-ifb-button-wrapper:empty{display:none}div.uagb-ifb-button-wrapper a.uagb-infobox-cta-link,div.uagb-ifb-cta a.uagb-infobox-cta-link,.entry .entry-content a.uagb-infobox-cta-link,a.uagb-infobox-link-wrap,.entry .entry-content a.uagb-infobox-link-wrap{text-decoration:none;align-items:center}.uagb-infobox-icon-left-title.uagb-infobox-image-valign-middle .uagb-ifb-title-wrap,.uagb-infobox-icon-right-title.uagb-infobox-image-valign-middle .uagb-ifb-title-wrap,.uagb-infobox-image-valign-middle .uagb-ifb-icon-wrap,.uagb-infobox-image-valign-middle .uagb-ifb-image-content,.uagb-infobox-icon-left.uagb-infobox-image-valign-middle .uagb-ifb-content,.uagb-infobox-icon-right.uagb-infobox-image-valign-middle .uagb-ifb-content{-ms-flex-item-align:center;-webkit-align-self:center;align-self:center}.uagb-infobox-icon-left-title.uagb-infobox-image-valign-top .uagb-ifb-title-wrap,.uagb-infobox-icon-right-title.uagb-infobox-image-valign-top .uagb-ifb-title-wrap,.uagb-infobox-image-valign-top .uagb-ifb-icon-wrap,.uagb-infobox-image-valign-top .uagb-ifb-image-content,.uagb-infobox-icon-left.uagb-infobox-image-valign-top .uagb-ifb-content,.uagb-infobox-icon-right.uagb-infobox-image-valign-top .uagb-ifb-content{-webkit-align-self:self-start;align-self:self-start}.uagb-infobox-left{justify-content:flex-start;text-align:left;-webkit-box-pack:start;-ms-flex-pack:start;-webkit-justify-content:flex-start;-moz-box-pack:start}.uagb-infobox-center{justify-content:center;text-align:center;-webkit-box-pack:center;-ms-flex-pack:center;-webkit-justify-content:center;-moz-box-pack:center}.uagb-infobox-right{justify-content:flex-end;text-align:right;-webkit-box-pack:end;-ms-flex-pack:end;-webkit-justify-content:flex-end;-moz-box-pack:end}.uagb-infobox-icon-above-title.uagb-infobox__content-wrap,.uagb-infobox-icon-below-title.uagb-infobox__content-wrap{display:block;width:100%}.uagb-infobox-icon-left-title .uagb-ifb-content>svg,.uagb-infobox-icon-left .uagb-ifb-content>svg{margin-right:10px}.uagb-infobox-icon-right-title .uagb-ifb-content>svg,.uagb-infobox-icon-right .uagb-ifb-content>svg{margin-left:10px}.uagb-infobox-icon-left.uagb-infobox__content-wrap,.uagb-infobox-icon-right.uagb-infobox__content-wrap,.uagb-infobox-icon-left-title .uagb-ifb-left-title-image,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image{display:-webkit-box;display:-ms-flexbox;display:-webkit-flex;display:-moz-box;display:flex;-js-display:flex}.uagb-infobox-icon-left-title .uagb-ifb-left-title-image .uagb-ifb-image-content,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image .uagb-ifb-image-content,.uagb-infobox-icon-left .uagb-ifb-image-content,.uagb-infobox-icon-right .uagb-ifb-image-content{flex-shrink:0;line-height:0}.uagb-infobox-icon-left-title .uagb-ifb-left-title-image .uagb-ifb-title-wrap,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image .uagb-ifb-title-wrap,.uagb-infobox-icon-left .uagb-ifb-content,.uagb-infobox-icon-right .uagb-ifb-content{flex-grow:1}.uagb-infobox-icon-right.uagb-infobox__content-wrap,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image{-webkit-box-pack:end;-ms-flex-pack:end;-webkit-justify-content:flex-end;-moz-box-pack:end;justify-content:flex-end}.uagb-ifb-content img{position:relative;display:inline-block;line-height:0;width:auto;height:auto !important;max-width:100%;border-radius:inherit;-webkit-box-sizing:content-box;-moz-box-sizing:content-box;-webkit-border-radius:inherit}.uagb-infobox-module-link{position:absolute;top:0;right:0;bottom:0;left:0;z-index:4;width:100%;height:100%}.uagb-edit-mode .uagb-infobox-module-link{z-index:2}.uagb-infobox-link-icon-after{margin-right:0;margin-left:5px}.uagb-infobox-link-icon-before{margin-right:5px;margin-left:0}.uagb-infobox-link-icon{-webkit-transition:all 200ms linear;transition:all 200ms linear}.uagb-infobox__content-wrap{box-sizing:border-box;position:relative;width:100%;word-break:break-word;z-index:1}.uagb-ifb-separator{display:inline-block;margin:0;border-top-color:#333;border-top-style:solid;border-top-width:2px;line-height:0}.uagb-ifb-button-wrapper{line-height:1}.uagb-ifb-button-wrapper.uagb-ifb-button-type-text .uagb-infobox-cta-link.wp-block-button__link{background-color:unset;border:none}.uagb-ifb-button-wrapper.uagb-ifb-button-type-text .uagb-infobox-cta-link.wp-block-button__link:hover{background-color:unset;border-color:unset}.uagb-ifb-button-wrapper .uagb-infobox-cta-link{cursor:pointer}.uagb-ifb-button-wrapper .wp-block-button__link svg{fill:currentColor}.uagb-infobox__content-wrap a{-webkit-box-shadow:none;box-shadow:none;text-decoration:none}.uagb-ifb-title-wrap{width:100%}.uagb-ifb-title{margin-block-start:0}.uagb-ifb-title-wrap .uagb-ifb-title-prefix{display:block;padding:0;margin:0}.uagb-infobox__content-wrap.uagb-infobox__content-wrap{position:relative}.uagb-ifb-content{width:100%}.uagb-infobox__content-wrap.uagb-infobox,.uagb-ifb-content,.uagb-ifb-title-wrap,.uagb-ifb-title-prefix *,svg.dashicon.dashicons-upload{z-index:1}a.uagb-infobox-link-wrap{color:inherit}.uagb-ifb-content p:empty{display:none}.uagb-infobox__content-wrap .uagb-ifb-content img{display:inline-block;max-width:100%}.uagb-infobox__content-wrap .uagb-ifb-content svg{display:inline-block}.uagb-infobox__content-wrap .uagb-ifb-icon-wrap,.uagb-infobox-icon-left .uagb-ifb-image-content,.uagb-infobox-icon-right .uagb-ifb-image-content{box-sizing:content-box}.uagb-infobox-cta-link>svg{vertical-align:middle;width:15px;height:15px;font-size:15px}.uagb-infobox-cta-link{display:inline-flex}.block-editor-page #wpwrap .uagb-infobox-cta-link svg,.uagb-infobox-cta-link svg{font-style:normal}.uagb-infobox-icon-left-title .uagb-ifb-icon-wrap,.uagb-infobox-icon-left .uagb-ifb-icon-wrap{margin-right:10px;line-height:0}.uagb-infobox-icon-right-title .uagb-ifb-icon-wrap,.uagb-infobox-icon-right .uagb-ifb-icon-wrap{margin-left:10px;line-height:0}.uagb-infobox-icon-left .uagb-ifb-left-right-wrap,.uagb-infobox-icon-right .uagb-ifb-left-right-wrap,.uagb-infobox-icon-left-title .uagb-ifb-left-title-image,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image{display:-webkit-box;display:-ms-flexbox;display:flex}.uagb-infobox-icon-right .uagb-ifb-left-right-wrap,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image{-webkit-box-pack:end;-ms-flex-pack:end;-webkit-justify-content:flex-end;-moz-box-pack:end;justify-content:flex-end}a.uagb-infbox__link-to-all{position:absolute;top:0;left:0;z-index:3;width:100%;height:100%;box-shadow:none;text-decoration:none;-webkit-box-shadow:none}@media only screen and (max-width: 976px){.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-image-content{padding:0;margin-bottom:20px}.uagb-infobox-stacked-tablet.uagb-reverse-order-tablet.uagb-infobox__content-wrap{display:-webkit-inline-box;display:-ms-inline-flexbox;display:-webkit-inline-flex;display:-moz-inline-box;display:inline-flex;flex-direction:column-reverse;-js-display:inline-flex;-webkit-box-orient:vertical;-webkit-box-direction:reverse;-ms-flex-direction:column-reverse;-webkit-flex-direction:column-reverse;-moz-box-orient:vertical;-moz-box-direction:reverse}.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-content,.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-icon-wrap,.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-image-content{display:block;width:100%;text-align:center}.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-icon-wrap,.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-image-content{margin-right:0;margin-left:0}.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap{display:inline-block}.uagb-infobox-icon-left-title.uagb-infobox-stacked-tablet .uagb-ifb-image-content,.uagb-infobox-icon-left-title.uagb-infobox-stacked-tablet .uagb-ifb-icon-wrap,.uagb-infobox-icon-left.uagb-infobox-stacked-tablet .uagb-ifb-image-content,.uagb-infobox-icon-left.uagb-infobox-stacked-tablet .uagb-ifb-icon-wrap{margin-right:0}.uagb-infobox-icon-right-title.uagb-infobox-stacked-tablet .uagb-ifb-image-content,.uagb-infobox-icon-right-title.uagb-infobox-stacked-tablet .uagb-ifb-icon-wrap,.uagb-infobox-icon-right.uagb-infobox-stacked-tablet .uagb-ifb-image-content,.uagb-infobox-icon-right.uagb-infobox-stacked-tablet .uagb-ifb-icon-wrap{margin-left:0}.uagb-infobox-icon-left-title .uagb-ifb-separator{margin:10px 0}}@media screen and (max-width: 767px){.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap{display:inline-block}.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-image-content,.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-icon-wrap{padding:0;margin-bottom:20px;margin-right:0;margin-left:0}.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap.uagb-reverse-order-mobile{display:-webkit-inline-box;display:-ms-inline-flexbox;display:-webkit-inline-flex;display:-moz-inline-box;display:inline-flex;flex-direction:column-reverse;-js-display:inline-flex;-webkit-box-orient:vertical;-webkit-box-direction:reverse;-ms-flex-direction:column-reverse;-webkit-flex-direction:column-reverse;-moz-box-orient:vertical;-moz-box-direction:reverse}.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-image-content,.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-icon-wrap,.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-content{display:block;width:100%;text-align:center}.uagb-infobox-icon-left-title.uagb-infobox-stacked-mobile .uagb-ifb-image-content,.uagb-infobox-icon-left-title.uagb-infobox-stacked-mobile .uagb-ifb-icon-wrap,.uagb-infobox-icon-left.uagb-infobox-stacked-mobile .uagb-ifb-image-content,.uagb-infobox-icon-left.uagb-infobox-stacked-mobile .uagb-ifb-icon-wrap{margin-right:0}.uagb-infobox-icon-right-title.uagb-infobox-stacked-mobile .uagb-ifb-image-content,.uagb-infobox-icon-right-title.uagb-infobox-stacked-mobile .uagb-ifb-icon-wrap,.uagb-infobox-icon-right.uagb-infobox-stacked-mobile .uagb-ifb-image-content,.uagb-infobox-icon-right.uagb-infobox-stacked-mobile .uagb-ifb-icon-wrap{margin-left:0}.uagb-infobox-icon-left-title .uagb-ifb-separator{margin:10px 0}}.uagb-ifb-icon svg{width:inherit;height:inherit;vertical-align:middle}.uagb-ifb-button-icon{height:15px;width:15px;font-size:15px;vertical-align:middle}.uagb-ifb-button-icon svg{height:inherit;width:inherit;display:inline-block}.uagb-ifb-button-icon.uagb-ifb-align-icon-after{float:right}.uagb-ifb-cta-button{display:inline-block}.uagb-disable-link{pointer-events:none}
.uagb-buttons__outer-wrap .uagb-buttons__wrap{display:inline-flex;width:100%}.uagb-buttons__outer-wrap.uagb-btn__small-btn .uagb-buttons-repeater{padding:5px 10px}.uagb-buttons__outer-wrap.uagb-btn__medium-btn .uagb-buttons-repeater{padding:12px 24px}.uagb-buttons__outer-wrap.uagb-btn__large-btn .uagb-buttons-repeater{padding:20px 30px}.uagb-buttons__outer-wrap.uagb-btn__extralarge-btn .uagb-buttons-repeater{padding:30px 65px}@media (max-width: 976px){.uagb-buttons__outer-wrap.uagb-btn-tablet__small-btn .uagb-buttons-repeater{padding:5px 10px}.uagb-buttons__outer-wrap.uagb-btn-tablet__medium-btn .uagb-buttons-repeater{padding:12px 24px}.uagb-buttons__outer-wrap.uagb-btn-tablet__large-btn .uagb-buttons-repeater{padding:20px 30px}.uagb-buttons__outer-wrap.uagb-btn-tablet__extralarge-btn .uagb-buttons-repeater{padding:30px 65px}}@media (max-width: 767px){.uagb-buttons__outer-wrap.uagb-btn-mobile__small-btn .uagb-buttons-repeater{padding:5px 10px}.uagb-buttons__outer-wrap.uagb-btn-mobile__medium-btn .uagb-buttons-repeater{padding:12px 24px}.uagb-buttons__outer-wrap.uagb-btn-mobile__large-btn .uagb-buttons-repeater{padding:20px 30px}.uagb-buttons__outer-wrap.uagb-btn-mobile__extralarge-btn .uagb-buttons-repeater{padding:30px 65px}}
.uagb-buttons__outer-wrap .uagb-buttons-repeater{display:flex;justify-content:center;align-items:center;transition:box-shadow 0.2s ease}.uagb-buttons__outer-wrap .uagb-buttons-repeater a.uagb-button__link{display:flex;justify-content:center}.uagb-buttons__outer-wrap .uagb-buttons-repeater .uagb-button__icon{font-size:inherit;display:flex;align-items:center}.uagb-buttons__outer-wrap .uagb-buttons-repeater .uagb-button__icon svg{fill:currentColor;width:inherit;height:inherit}
.wp-block-uagb-container.uagb-is-root-container .uagb-block-ec802e59{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-ec802e59 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-ec802e59 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-ec802e59 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-ec802e59 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-ec802e59 .uagb-container__video-wrap video{opacity: 0.3;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-ec802e59 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 768px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: stretch;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-ec802e59{box-shadow: 0px 0px   #00000070 ;padding-top: 112px;padding-bottom: 112px;padding-left: 40px;padding-right: 40px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;background-repeat: no-repeat;background-position: 50% 50%;background-size: cover;background-attachment: scroll;background-image: url(https://websitedemos.net/wp-content/uploads/2023/10/natures-01.jpg);;background-clip: padding-box;}.wp-block-uagb-container.uagb-block-ec802e59::before{content: "";position: absolute;pointer-events: none;top: -0px;left: -0px;width: calc(100% + 0px + 0px);height: calc(100% + 0px + 0px);border-color: inherit;background: var(--ast-global-color-7);opacity: 0.7;}.uagb-block-2eea1fe1 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-2eea1fe1 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-2eea1fe1 .uagb-ifb-icon svg{fill: #333;}.uagb-block-2eea1fe1.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-2eea1fe1 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-2eea1fe1 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-2eea1fe1.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-2eea1fe1.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-2eea1fe1 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-2eea1fe1 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-2eea1fe1 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-2eea1fe1 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-2eea1fe1.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-2eea1fe1.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-2eea1fe1.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-2eea1fe1.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-2eea1fe1 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{color: #ffffff;margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-2eea1fe1.wp-block-uagb-info-box .uagb-ifb-title{color: #ffffff;margin-bottom: 40px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-2eea1fe1.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-2eea1fe1 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-2eea1fe1 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-2eea1fe1 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-2eea1fe1 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-2eea1fe1.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-2eea1fe1.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-2eea1fe1 .uagb-infobox__content-wrap{text-align: center;}.uagb-block-2eea1fe1.uagb-infobox-icon-above-title{text-align: center;}.uagb-block-2eea1fe1.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-2eea1fe1 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-2eea1fe1.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-2eea1fe1 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-2eea1fe1 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-2eea1fe1.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-aba0ff05.wp-block-uagb-buttons.uagb-buttons__outer-wrap .uagb-buttons__wrap {column-gap: 20px;}.uagb-block-aba0ff05.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: center;align-items: center;}.wp-block-uagb-buttons .uagb-block-cc41c321.wp-block-uagb-buttons-child .uagb-buttons-repeater{background: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-cc41c321 .wp-block-button__link{background: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-cc41c321 .wp-block-button__link:hover{background: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-cc41c321 .wp-block-button__link:focus{background: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-cc41c321 .uagb-button__wrapper .uagb-buttons-repeater{color: #ffffff;margin-top: 0px;margin-bottom: 0px;margin-left: 0px;margin-right: 0px;}.wp-block-uagb-buttons .uagb-block-cc41c321 .wp-block-button__link.has-text-color:hover .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-cc41c321 .wp-block-button__link.has-text-color:focus .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-cc41c321 .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-cc41c321 .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link:hover{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-cc41c321 .uagb-buttons-repeater.wp-block-button__link{border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-style: none;}.wp-block-uagb-buttons .uagb-block-cc41c321.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-style: none;}.wp-block-uagb-buttons .uagb-block-cc41c321 .uagb-buttons-repeater .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-cc41c321 .uagb-buttons-repeater:hover .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-cc41c321 .uagb-buttons-repeater:focus .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-cc41c321 .uagb-buttons-repeater .uagb-button__icon > svg{width: 15px;height: 15px;fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-cc41c321 .uagb-buttons-repeater:hover .uagb-button__icon > svg{fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-cc41c321 .uagb-buttons-repeater:focus .uagb-button__icon > svg{fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-cc41c321 .uagb-buttons-repeater .uagb-button__icon-position-after{margin-left: 8px;}.wp-block-uagb-buttons .uagb-block-cc41c321 .uagb-buttons-repeater .uagb-button__icon-position-before{margin-right: 8px;}.wp-block-uagb-buttons .uagb-block-cc41c321 .uagb-button__link{text-transform: normal;text-decoration: none;}.wp-block-uagb-buttons .uagb-block-63f00eb8 .wp-block-button__link{background: transparent;}.wp-block-uagb-buttons .uagb-block-63f00eb8 .wp-block-button__link:hover{background: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-63f00eb8 .wp-block-button__link:focus{background: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-63f00eb8 .uagb-button__wrapper .uagb-buttons-repeater{color: #ffffff;margin-top: 0px;margin-bottom: 0px;margin-left: 0px;margin-right: 0px;}.wp-block-uagb-buttons .uagb-block-63f00eb8 .wp-block-button__link.has-text-color:hover .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-63f00eb8 .wp-block-button__link.has-text-color:focus .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-63f00eb8 .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-63f00eb8 .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link:hover{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-63f00eb8 .uagb-buttons-repeater.wp-block-button__link{border-top-width: 1px;border-left-width: 1px;border-right-width: 1px;border-bottom-width: 1px;border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-color: #ffffff;border-style: solid;}.wp-block-uagb-buttons .uagb-block-63f00eb8 .uagb-buttons-repeater.wp-block-button__link:hover{border-color: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-63f00eb8 .uagb-buttons-repeater.wp-block-button__link:focus{border-color: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-63f00eb8.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-top-width: 1px;border-left-width: 1px;border-right-width: 1px;border-bottom-width: 1px;border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-color: #ffffff;border-style: solid;}.wp-block-uagb-buttons .uagb-block-63f00eb8.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater:hover{border-color: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-63f00eb8 .uagb-buttons-repeater .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-63f00eb8 .uagb-buttons-repeater:hover .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-63f00eb8 .uagb-buttons-repeater:focus .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-63f00eb8 .uagb-buttons-repeater .uagb-button__icon > svg{width: 15px;height: 15px;fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-63f00eb8 .uagb-buttons-repeater:hover .uagb-button__icon > svg{fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-63f00eb8 .uagb-buttons-repeater:focus .uagb-button__icon > svg{fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-63f00eb8 .uagb-buttons-repeater .uagb-button__icon-position-after{margin-left: 8px;}.wp-block-uagb-buttons .uagb-block-63f00eb8 .uagb-buttons-repeater .uagb-button__icon-position-before{margin-right: 8px;}.wp-block-uagb-buttons .uagb-block-63f00eb8 .uagb-button__link{text-transform: normal;text-decoration: none;}@media only screen and (max-width: 976px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-ec802e59{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-ec802e59 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-ec802e59{padding-top: 80px;padding-bottom: 80px;padding-left: 32px;padding-right: 32px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;background-clip: padding-box;}.wp-block-uagb-container.uagb-block-ec802e59::before{top: -0px;left: -0px;width: calc(100% + 0px + 0px);height: calc(100% + 0px + 0px);}.uagb-block-2eea1fe1 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-2eea1fe1.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 32px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-2eea1fe1.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-2eea1fe1.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-2eea1fe1.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-2eea1fe1 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-2eea1fe1 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-2eea1fe1 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-2eea1fe1 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-2eea1fe1 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-2eea1fe1.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-2eea1fe1 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-2eea1fe1.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-2eea1fe1 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-2eea1fe1 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-2eea1fe1.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-aba0ff05.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: center;align-items: center;}.wp-block-uagb-buttons .uagb-block-cc41c321.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-style: none;}.wp-block-uagb-buttons .uagb-block-63f00eb8.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-top-width: 1px;border-left-width: 1px;border-right-width: 1px;border-bottom-width: 1px;border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-style: solid;border-color: #ffffff;}}@media only screen and (max-width: 767px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-ec802e59{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-ec802e59 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-ec802e59{padding-top: 64px;padding-bottom: 64px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;background-clip: padding-box;}.wp-block-uagb-container.uagb-block-ec802e59::before{top: -0px;left: -0px;width: calc(100% + 0px + 0px);height: calc(100% + 0px + 0px);}.uagb-block-2eea1fe1 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-2eea1fe1.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 32px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-2eea1fe1.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-2eea1fe1.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-2eea1fe1 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-2eea1fe1 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-2eea1fe1.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-2eea1fe1 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-2eea1fe1 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-2eea1fe1 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-2eea1fe1.uagb-infobox-icon-above-title{text-align: center;}.uagb-block-2eea1fe1.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-2eea1fe1 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-2eea1fe1.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-2eea1fe1 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-2eea1fe1 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-2eea1fe1.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-aba0ff05.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: center;align-items: center;}.wp-block-uagb-buttons .uagb-block-cc41c321.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-style: none;}.wp-block-uagb-buttons .uagb-block-63f00eb8.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-style: solid;border-color: #ffffff;}}";s:7:"content";s:1403:"
<div class="wp-block-uagb-container uagb-block-ec802e59 alignfull uagb-is-root-container"><div class="uagb-container-inner-blocks-wrap">
<div class="wp-block-uagb-info-box uagb-block-2eea1fe1 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h6 class="uagb-ifb-title-prefix">Take Action Now</h6><h2 class="uagb-ifb-title">Unlock your potential and transform your life today!</h2></div></div></div>



<div class="wp-block-uagb-buttons uagb-buttons__outer-wrap uagb-btn__default-btn uagb-btn-tablet__default-btn uagb-btn-mobile__default-btn uagb-block-aba0ff05"><div class="uagb-buttons__wrap uagb-buttons-layout-wrap">
<div class="wp-block-uagb-buttons-child uagb-buttons__outer-wrap uagb-block-cc41c321 wp-block-button"><div class="uagb-button__wrapper"><a class="uagb-buttons-repeater wp-block-button__link" href="#" onclick="return false;" rel="follow noopener" target="_self"><div class="uagb-button__link">Get Started</div></a></div></div>



<div class="wp-block-uagb-buttons-child uagb-buttons__outer-wrap uagb-block-63f00eb8 wp-block-button"><div class="uagb-button__wrapper"><a class="uagb-buttons-repeater wp-block-button__link" href="#" onclick="return false;" rel="follow noopener" target="_self"><div class="uagb-button__link">Learn More</div></a></div></div>
</div></div>
</div></div>
";}s:8:"id-75819";a:10:{s:5:"title";s:17:"Call To Action 11";s:3:"url";s:56:"https://websitedemos.net/astra-blocks/call-to-action-11/";s:3:"tag";a:0:{}s:8:"category";i:832;s:16:"primary-category";s:0:"";s:4:"type";s:5:"block";s:12:"page-builder";s:9:"gutenberg";s:16:"required-plugins";a:0:{}s:10:"stylesheet";s:45162:".wp-block-uagb-container{display:flex;position:relative;box-sizing:border-box;transition-property:box-shadow;transition-duration:0.2s;transition-timing-function:ease}.wp-block-uagb-container .spectra-container-link-overlay{bottom:0;left:0;position:absolute;right:0;top:0;z-index:10}.wp-block-uagb-container.uagb-is-root-container{margin-left:auto;margin-right:auto}.wp-block-uagb-container.alignfull.uagb-is-root-container .uagb-container-inner-blocks-wrap{display:flex;position:relative;box-sizing:border-box;margin-left:auto !important;margin-right:auto !important}.wp-block-uagb-container .uagb-container__video-wrap{height:100%;width:100%;top:0;left:0;position:absolute;overflow:hidden;-webkit-transition:opacity 1s;-o-transition:opacity 1s;transition:opacity 1s}.wp-block-uagb-container .uagb-container__video-wrap video{max-width:100%;width:100%;height:100%;margin:0;line-height:1;border:none;display:inline-block;vertical-align:baseline;-o-object-fit:cover;object-fit:cover;background-size:cover}.st-block-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap>*:not(.wp-block-uagb-container):not(.wp-block-uagb-column):not(.wp-block-uagb-container):not(.wp-block-uagb-section):not(.uagb-container__shape):not(.uagb-container__video-wrap):not(.wp-block-spectra-pro-register):not(.wp-block-spectra-pro-login):not(.uagb-slider-container):not(.spectra-image-gallery__control-lightbox),.st-block-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap,.st-block-container .wp-block-uagb-container>*:not(.wp-block-uagb-container):not(.wp-block-uagb-column):not(.wp-block-uagb-container):not(.wp-block-uagb-section):not(.uagb-container__shape):not(.uagb-container__video-wrap):not(.wp-block-uagb-image):not(.wp-block-spectra-pro-register):not(.wp-block-spectra-pro-login):not(.uagb-slider-container):not(.spectra-container-link-overlay):not(.spectra-image-gallery__control-lightbox):not(.wp-block-uagb-lottie):not(.uagb-faq__outer-wrap){min-width:unset !important;width:100%;position:relative}.st-block-container .ast-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap>.wp-block-uagb-container>ul,.st-block-container .ast-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap>.wp-block-uagb-container ol,.st-block-container .ast-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap>ul,.st-block-container .ast-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap ol{max-width:-webkit-fill-available;margin-block-start:0;margin-block-end:0;margin-left:20px}.ast-plain-container .editor-styles-wrapper .block-editor-block-list__layout.is-root-container .uagb-is-root-container.wp-block-uagb-container.alignwide{margin-left:auto;margin-right:auto}.uagb-container__shape{overflow:hidden;position:absolute;left:0;width:100%;line-height:0;direction:ltr}.uagb-container__shape-top{top:-3px}.uagb-container__shape-bottom{bottom:-3px}.uagb-container__shape.uagb-container__invert.uagb-container__shape-bottom,.uagb-container__shape.uagb-container__invert.uagb-container__shape-top{-webkit-transform:rotate(180deg);-ms-transform:rotate(180deg);transform:rotate(180deg)}.uagb-container__shape.uagb-container__shape-flip svg{transform:translateX(-50%) rotateY(180deg)}.uagb-container__shape svg{display:block;width:-webkit-calc(100% + 1.3px);width:calc(100% + 1.3px);position:relative;left:50%;-webkit-transform:translateX(-50%);-ms-transform:translateX(-50%);transform:translateX(-50%)}.uagb-container__shape .uagb-container__shape-fill{-webkit-transform-origin:center;-ms-transform-origin:center;transform-origin:center;-webkit-transform:rotateY(0deg);transform:rotateY(0deg)}.uagb-container__shape.uagb-container__shape-above-content{z-index:9;pointer-events:none}.nv-single-page-wrap .nv-content-wrap.entry-content .wp-block-uagb-container.alignfull{margin-left:calc(50% - 50vw);margin-right:calc(50% - 50vw)}@media only screen and (max-width: 767px){.wp-block-uagb-container .wp-block-uagb-advanced-heading{width:-webkit-fill-available !important}}
.uagb-ifb-content>svg *{-webkit-transition:all 0.2s;-o-transition:all 0.2s;transition:all 0.2s}.uagb-ifb-content>svg,.uagb-ifb-content{display:inline-block}.uagb-ifb-content>svg{vertical-align:middle;width:inherit;height:inherit;font-style:initial}.uagb-ifb-content .uagb-ifb-icon-wrap svg{box-sizing:content-box;width:inherit;height:inherit}.uagb-ifb-button-wrapper:empty{display:none}div.uagb-ifb-button-wrapper a.uagb-infobox-cta-link,div.uagb-ifb-cta a.uagb-infobox-cta-link,.entry .entry-content a.uagb-infobox-cta-link,a.uagb-infobox-link-wrap,.entry .entry-content a.uagb-infobox-link-wrap{text-decoration:none;align-items:center}.uagb-infobox-icon-left-title.uagb-infobox-image-valign-middle .uagb-ifb-title-wrap,.uagb-infobox-icon-right-title.uagb-infobox-image-valign-middle .uagb-ifb-title-wrap,.uagb-infobox-image-valign-middle .uagb-ifb-icon-wrap,.uagb-infobox-image-valign-middle .uagb-ifb-image-content,.uagb-infobox-icon-left.uagb-infobox-image-valign-middle .uagb-ifb-content,.uagb-infobox-icon-right.uagb-infobox-image-valign-middle .uagb-ifb-content{-ms-flex-item-align:center;-webkit-align-self:center;align-self:center}.uagb-infobox-icon-left-title.uagb-infobox-image-valign-top .uagb-ifb-title-wrap,.uagb-infobox-icon-right-title.uagb-infobox-image-valign-top .uagb-ifb-title-wrap,.uagb-infobox-image-valign-top .uagb-ifb-icon-wrap,.uagb-infobox-image-valign-top .uagb-ifb-image-content,.uagb-infobox-icon-left.uagb-infobox-image-valign-top .uagb-ifb-content,.uagb-infobox-icon-right.uagb-infobox-image-valign-top .uagb-ifb-content{-webkit-align-self:self-start;align-self:self-start}.uagb-infobox-left{justify-content:flex-start;text-align:left;-webkit-box-pack:start;-ms-flex-pack:start;-webkit-justify-content:flex-start;-moz-box-pack:start}.uagb-infobox-center{justify-content:center;text-align:center;-webkit-box-pack:center;-ms-flex-pack:center;-webkit-justify-content:center;-moz-box-pack:center}.uagb-infobox-right{justify-content:flex-end;text-align:right;-webkit-box-pack:end;-ms-flex-pack:end;-webkit-justify-content:flex-end;-moz-box-pack:end}.uagb-infobox-icon-above-title.uagb-infobox__content-wrap,.uagb-infobox-icon-below-title.uagb-infobox__content-wrap{display:block;width:100%}.uagb-infobox-icon-left-title .uagb-ifb-content>svg,.uagb-infobox-icon-left .uagb-ifb-content>svg{margin-right:10px}.uagb-infobox-icon-right-title .uagb-ifb-content>svg,.uagb-infobox-icon-right .uagb-ifb-content>svg{margin-left:10px}.uagb-infobox-icon-left.uagb-infobox__content-wrap,.uagb-infobox-icon-right.uagb-infobox__content-wrap,.uagb-infobox-icon-left-title .uagb-ifb-left-title-image,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image{display:-webkit-box;display:-ms-flexbox;display:-webkit-flex;display:-moz-box;display:flex;-js-display:flex}.uagb-infobox-icon-left-title .uagb-ifb-left-title-image .uagb-ifb-image-content,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image .uagb-ifb-image-content,.uagb-infobox-icon-left .uagb-ifb-image-content,.uagb-infobox-icon-right .uagb-ifb-image-content{flex-shrink:0;line-height:0}.uagb-infobox-icon-left-title .uagb-ifb-left-title-image .uagb-ifb-title-wrap,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image .uagb-ifb-title-wrap,.uagb-infobox-icon-left .uagb-ifb-content,.uagb-infobox-icon-right .uagb-ifb-content{flex-grow:1}.uagb-infobox-icon-right.uagb-infobox__content-wrap,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image{-webkit-box-pack:end;-ms-flex-pack:end;-webkit-justify-content:flex-end;-moz-box-pack:end;justify-content:flex-end}.uagb-ifb-content img{position:relative;display:inline-block;line-height:0;width:auto;height:auto !important;max-width:100%;border-radius:inherit;-webkit-box-sizing:content-box;-moz-box-sizing:content-box;-webkit-border-radius:inherit}.uagb-infobox-module-link{position:absolute;top:0;right:0;bottom:0;left:0;z-index:4;width:100%;height:100%}.uagb-edit-mode .uagb-infobox-module-link{z-index:2}.uagb-infobox-link-icon-after{margin-right:0;margin-left:5px}.uagb-infobox-link-icon-before{margin-right:5px;margin-left:0}.uagb-infobox-link-icon{-webkit-transition:all 200ms linear;transition:all 200ms linear}.uagb-infobox__content-wrap{box-sizing:border-box;position:relative;width:100%;word-break:break-word;z-index:1}.uagb-ifb-separator{display:inline-block;margin:0;border-top-color:#333;border-top-style:solid;border-top-width:2px;line-height:0}.uagb-ifb-button-wrapper{line-height:1}.uagb-ifb-button-wrapper.uagb-ifb-button-type-text .uagb-infobox-cta-link.wp-block-button__link{background-color:unset;border:none}.uagb-ifb-button-wrapper.uagb-ifb-button-type-text .uagb-infobox-cta-link.wp-block-button__link:hover{background-color:unset;border-color:unset}.uagb-ifb-button-wrapper .uagb-infobox-cta-link{cursor:pointer}.uagb-ifb-button-wrapper .wp-block-button__link svg{fill:currentColor}.uagb-infobox__content-wrap a{-webkit-box-shadow:none;box-shadow:none;text-decoration:none}.uagb-ifb-title-wrap{width:100%}.uagb-ifb-title{margin-block-start:0}.uagb-ifb-title-wrap .uagb-ifb-title-prefix{display:block;padding:0;margin:0}.uagb-infobox__content-wrap.uagb-infobox__content-wrap{position:relative}.uagb-ifb-content{width:100%}.uagb-infobox__content-wrap.uagb-infobox,.uagb-ifb-content,.uagb-ifb-title-wrap,.uagb-ifb-title-prefix *,svg.dashicon.dashicons-upload{z-index:1}a.uagb-infobox-link-wrap{color:inherit}.uagb-ifb-content p:empty{display:none}.uagb-infobox__content-wrap .uagb-ifb-content img{display:inline-block;max-width:100%}.uagb-infobox__content-wrap .uagb-ifb-content svg{display:inline-block}.uagb-infobox__content-wrap .uagb-ifb-icon-wrap,.uagb-infobox-icon-left .uagb-ifb-image-content,.uagb-infobox-icon-right .uagb-ifb-image-content{box-sizing:content-box}.uagb-infobox-cta-link>svg{vertical-align:middle;width:15px;height:15px;font-size:15px}.uagb-infobox-cta-link{display:inline-flex}.block-editor-page #wpwrap .uagb-infobox-cta-link svg,.uagb-infobox-cta-link svg{font-style:normal}.uagb-infobox-icon-left-title .uagb-ifb-icon-wrap,.uagb-infobox-icon-left .uagb-ifb-icon-wrap{margin-right:10px;line-height:0}.uagb-infobox-icon-right-title .uagb-ifb-icon-wrap,.uagb-infobox-icon-right .uagb-ifb-icon-wrap{margin-left:10px;line-height:0}.uagb-infobox-icon-left .uagb-ifb-left-right-wrap,.uagb-infobox-icon-right .uagb-ifb-left-right-wrap,.uagb-infobox-icon-left-title .uagb-ifb-left-title-image,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image{display:-webkit-box;display:-ms-flexbox;display:flex}.uagb-infobox-icon-right .uagb-ifb-left-right-wrap,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image{-webkit-box-pack:end;-ms-flex-pack:end;-webkit-justify-content:flex-end;-moz-box-pack:end;justify-content:flex-end}a.uagb-infbox__link-to-all{position:absolute;top:0;left:0;z-index:3;width:100%;height:100%;box-shadow:none;text-decoration:none;-webkit-box-shadow:none}@media only screen and (max-width: 976px){.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-image-content{padding:0;margin-bottom:20px}.uagb-infobox-stacked-tablet.uagb-reverse-order-tablet.uagb-infobox__content-wrap{display:-webkit-inline-box;display:-ms-inline-flexbox;display:-webkit-inline-flex;display:-moz-inline-box;display:inline-flex;flex-direction:column-reverse;-js-display:inline-flex;-webkit-box-orient:vertical;-webkit-box-direction:reverse;-ms-flex-direction:column-reverse;-webkit-flex-direction:column-reverse;-moz-box-orient:vertical;-moz-box-direction:reverse}.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-content,.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-icon-wrap,.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-image-content{display:block;width:100%;text-align:center}.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-icon-wrap,.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-image-content{margin-right:0;margin-left:0}.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap{display:inline-block}.uagb-infobox-icon-left-title.uagb-infobox-stacked-tablet .uagb-ifb-image-content,.uagb-infobox-icon-left-title.uagb-infobox-stacked-tablet .uagb-ifb-icon-wrap,.uagb-infobox-icon-left.uagb-infobox-stacked-tablet .uagb-ifb-image-content,.uagb-infobox-icon-left.uagb-infobox-stacked-tablet .uagb-ifb-icon-wrap{margin-right:0}.uagb-infobox-icon-right-title.uagb-infobox-stacked-tablet .uagb-ifb-image-content,.uagb-infobox-icon-right-title.uagb-infobox-stacked-tablet .uagb-ifb-icon-wrap,.uagb-infobox-icon-right.uagb-infobox-stacked-tablet .uagb-ifb-image-content,.uagb-infobox-icon-right.uagb-infobox-stacked-tablet .uagb-ifb-icon-wrap{margin-left:0}.uagb-infobox-icon-left-title .uagb-ifb-separator{margin:10px 0}}@media screen and (max-width: 767px){.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap{display:inline-block}.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-image-content,.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-icon-wrap{padding:0;margin-bottom:20px;margin-right:0;margin-left:0}.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap.uagb-reverse-order-mobile{display:-webkit-inline-box;display:-ms-inline-flexbox;display:-webkit-inline-flex;display:-moz-inline-box;display:inline-flex;flex-direction:column-reverse;-js-display:inline-flex;-webkit-box-orient:vertical;-webkit-box-direction:reverse;-ms-flex-direction:column-reverse;-webkit-flex-direction:column-reverse;-moz-box-orient:vertical;-moz-box-direction:reverse}.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-image-content,.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-icon-wrap,.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-content{display:block;width:100%;text-align:center}.uagb-infobox-icon-left-title.uagb-infobox-stacked-mobile .uagb-ifb-image-content,.uagb-infobox-icon-left-title.uagb-infobox-stacked-mobile .uagb-ifb-icon-wrap,.uagb-infobox-icon-left.uagb-infobox-stacked-mobile .uagb-ifb-image-content,.uagb-infobox-icon-left.uagb-infobox-stacked-mobile .uagb-ifb-icon-wrap{margin-right:0}.uagb-infobox-icon-right-title.uagb-infobox-stacked-mobile .uagb-ifb-image-content,.uagb-infobox-icon-right-title.uagb-infobox-stacked-mobile .uagb-ifb-icon-wrap,.uagb-infobox-icon-right.uagb-infobox-stacked-mobile .uagb-ifb-image-content,.uagb-infobox-icon-right.uagb-infobox-stacked-mobile .uagb-ifb-icon-wrap{margin-left:0}.uagb-infobox-icon-left-title .uagb-ifb-separator{margin:10px 0}}.uagb-ifb-icon svg{width:inherit;height:inherit;vertical-align:middle}.uagb-ifb-button-icon{height:15px;width:15px;font-size:15px;vertical-align:middle}.uagb-ifb-button-icon svg{height:inherit;width:inherit;display:inline-block}.uagb-ifb-button-icon.uagb-ifb-align-icon-after{float:right}.uagb-ifb-cta-button{display:inline-block}.uagb-disable-link{pointer-events:none}
.uagb-buttons__outer-wrap .uagb-buttons__wrap{display:inline-flex;width:100%}.uagb-buttons__outer-wrap.uagb-btn__small-btn .uagb-buttons-repeater{padding:5px 10px}.uagb-buttons__outer-wrap.uagb-btn__medium-btn .uagb-buttons-repeater{padding:12px 24px}.uagb-buttons__outer-wrap.uagb-btn__large-btn .uagb-buttons-repeater{padding:20px 30px}.uagb-buttons__outer-wrap.uagb-btn__extralarge-btn .uagb-buttons-repeater{padding:30px 65px}@media (max-width: 976px){.uagb-buttons__outer-wrap.uagb-btn-tablet__small-btn .uagb-buttons-repeater{padding:5px 10px}.uagb-buttons__outer-wrap.uagb-btn-tablet__medium-btn .uagb-buttons-repeater{padding:12px 24px}.uagb-buttons__outer-wrap.uagb-btn-tablet__large-btn .uagb-buttons-repeater{padding:20px 30px}.uagb-buttons__outer-wrap.uagb-btn-tablet__extralarge-btn .uagb-buttons-repeater{padding:30px 65px}}@media (max-width: 767px){.uagb-buttons__outer-wrap.uagb-btn-mobile__small-btn .uagb-buttons-repeater{padding:5px 10px}.uagb-buttons__outer-wrap.uagb-btn-mobile__medium-btn .uagb-buttons-repeater{padding:12px 24px}.uagb-buttons__outer-wrap.uagb-btn-mobile__large-btn .uagb-buttons-repeater{padding:20px 30px}.uagb-buttons__outer-wrap.uagb-btn-mobile__extralarge-btn .uagb-buttons-repeater{padding:30px 65px}}
.uagb-buttons__outer-wrap .uagb-buttons-repeater{display:flex;justify-content:center;align-items:center;transition:box-shadow 0.2s ease}.uagb-buttons__outer-wrap .uagb-buttons-repeater a.uagb-button__link{display:flex;justify-content:center}.uagb-buttons__outer-wrap .uagb-buttons-repeater .uagb-button__icon{font-size:inherit;display:flex;align-items:center}.uagb-buttons__outer-wrap .uagb-buttons-repeater .uagb-button__icon svg{fill:currentColor;width:inherit;height:inherit}
.wp-block-uagb-container.uagb-is-root-container .uagb-block-ea80f84b{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-ea80f84b .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-ea80f84b .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-ea80f84b .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-ea80f84b .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-ea80f84b .uagb-container__video-wrap video{opacity: 0.3;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-ea80f84b > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 72px;}.wp-block-uagb-container.uagb-block-ea80f84b{box-shadow: 0px 0px   #00000070 ;padding-top: 112px;padding-bottom: 112px;padding-left: 40px;padding-right: 40px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 72px;overflow: visible;border-color: inherit;background-repeat: no-repeat;background-position: 50% 50%;background-size: cover;background-attachment: scroll;background-image: url(https://websitedemos.net/wp-content/uploads/2023/10/natures-01.jpg);;background-clip: padding-box;}.wp-block-uagb-container.uagb-block-ea80f84b::before{content: "";position: absolute;pointer-events: none;top: -0px;left: -0px;width: calc(100% + 0px + 0px);height: calc(100% + 0px + 0px);border-color: inherit;background: var(--ast-global-color-7);opacity: 0.7;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-2a119a5f{max-width: 60%;width: 100%;}.wp-block-uagb-container.uagb-block-2a119a5f .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-2a119a5f .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-2a119a5f .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-2a119a5f .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-2a119a5f .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-2a119a5f > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-2a119a5f{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;}.uagb-block-38496ba6 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-38496ba6 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-38496ba6 .uagb-ifb-icon svg{fill: #333;}.uagb-block-38496ba6.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-38496ba6 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-38496ba6 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-38496ba6.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-38496ba6.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-38496ba6 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-38496ba6 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-38496ba6 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-38496ba6 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-38496ba6.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-38496ba6.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-38496ba6.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-38496ba6.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-38496ba6 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-38496ba6.wp-block-uagb-info-box .uagb-ifb-title{color: #ffffff;margin-bottom: 24px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-38496ba6.wp-block-uagb-info-box .uagb-ifb-desc{color: #ffffff;margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-38496ba6 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-38496ba6 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-38496ba6 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-38496ba6 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-38496ba6.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-38496ba6.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-38496ba6 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-38496ba6.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-38496ba6.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-38496ba6 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-38496ba6.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-38496ba6 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-38496ba6 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-38496ba6.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-2e54e655{max-width: 40%;width: 100%;}.wp-block-uagb-container.uagb-block-2e54e655 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-2e54e655 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-2e54e655 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-2e54e655 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-2e54e655 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-2e54e655 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-2e54e655{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;}.uagb-block-a031b8de.wp-block-uagb-buttons.uagb-buttons__outer-wrap .uagb-buttons__wrap {column-gap: 20px;}.uagb-block-a031b8de.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: right;align-items: center;}.wp-block-uagb-buttons .uagb-block-edf0762e .wp-block-button__link{background: transparent;}.wp-block-uagb-buttons .uagb-block-edf0762e .wp-block-button__link:hover{background: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-edf0762e .wp-block-button__link:focus{background: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-edf0762e .uagb-button__wrapper .uagb-buttons-repeater{color: #ffffff;margin-top: 0px;margin-bottom: 0px;margin-left: 0px;margin-right: 0px;}.wp-block-uagb-buttons .uagb-block-edf0762e .wp-block-button__link.has-text-color:hover .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-edf0762e .wp-block-button__link.has-text-color:focus .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-edf0762e .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-edf0762e .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link:hover{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-edf0762e .uagb-buttons-repeater.wp-block-button__link{border-top-width: 1px;border-left-width: 1px;border-right-width: 1px;border-bottom-width: 1px;border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-color: #ffffff;border-style: solid;}.wp-block-uagb-buttons .uagb-block-edf0762e .uagb-buttons-repeater.wp-block-button__link:hover{border-color: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-edf0762e .uagb-buttons-repeater.wp-block-button__link:focus{border-color: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-edf0762e.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-top-width: 1px;border-left-width: 1px;border-right-width: 1px;border-bottom-width: 1px;border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-color: #ffffff;border-style: solid;}.wp-block-uagb-buttons .uagb-block-edf0762e.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater:hover{border-color: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-edf0762e .uagb-buttons-repeater .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-edf0762e .uagb-buttons-repeater:hover .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-edf0762e .uagb-buttons-repeater:focus .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-edf0762e .uagb-buttons-repeater .uagb-button__icon > svg{width: 15px;height: 15px;fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-edf0762e .uagb-buttons-repeater:hover .uagb-button__icon > svg{fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-edf0762e .uagb-buttons-repeater:focus .uagb-button__icon > svg{fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-edf0762e .uagb-buttons-repeater .uagb-button__icon-position-after{margin-left: 8px;}.wp-block-uagb-buttons .uagb-block-edf0762e .uagb-buttons-repeater .uagb-button__icon-position-before{margin-right: 8px;}.wp-block-uagb-buttons .uagb-block-edf0762e .uagb-button__link{text-transform: normal;text-decoration: none;}.wp-block-uagb-buttons .uagb-block-065070d6.wp-block-uagb-buttons-child .uagb-buttons-repeater{background: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-065070d6 .wp-block-button__link{background: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-065070d6 .wp-block-button__link:hover{background: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-065070d6 .wp-block-button__link:focus{background: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-065070d6 .uagb-button__wrapper .uagb-buttons-repeater{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-065070d6 .wp-block-button__link.has-text-color:hover .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-065070d6 .wp-block-button__link.has-text-color:focus .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-065070d6 .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-065070d6 .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link:hover{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-065070d6 .uagb-buttons-repeater.wp-block-button__link{border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-style: none;}.wp-block-uagb-buttons .uagb-block-065070d6.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-style: none;}.wp-block-uagb-buttons .uagb-block-065070d6 .uagb-buttons-repeater .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-065070d6 .uagb-buttons-repeater:hover .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-065070d6 .uagb-buttons-repeater:focus .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-065070d6 .uagb-buttons-repeater .uagb-button__icon > svg{width: 15px;height: 15px;fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-065070d6 .uagb-buttons-repeater:hover .uagb-button__icon > svg{fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-065070d6 .uagb-buttons-repeater:focus .uagb-button__icon > svg{fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-065070d6 .uagb-buttons-repeater .uagb-button__icon-position-after{margin-left: 8px;}.wp-block-uagb-buttons .uagb-block-065070d6 .uagb-buttons-repeater .uagb-button__icon-position-before{margin-right: 8px;}.wp-block-uagb-buttons .uagb-block-065070d6 .uagb-button__link{text-transform: normal;text-decoration: none;}@media only screen and (max-width: 976px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-ea80f84b{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-ea80f84b > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 48px;}.wp-block-uagb-container.uagb-block-ea80f84b{padding-top: 80px;padding-bottom: 80px;padding-left: 32px;padding-right: 32px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 48px;background-clip: padding-box;}.wp-block-uagb-container.uagb-block-ea80f84b::before{top: -0px;left: -0px;width: calc(100% + 0px + 0px);height: calc(100% + 0px + 0px);}.wp-block-uagb-container.uagb-block-ea80f84b.wp-block-uagb-container > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-uagb-image ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not( .spectra-container-link-overlay ):not(.spectra-image-gallery__control-lightbox):not(.wp-block-uagb-lottie):not(.uagb-container-inner-blocks-wrap){width: 100%;}.wp-block-uagb-container.uagb-block-ea80f84b.wp-block-uagb-container > .uagb-container-inner-blocks-wrap > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not(.spectra-image-gallery__control-lightbox){width: 100%;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-2a119a5f{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-2a119a5f > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: flex-start;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-2a119a5f{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;flex-direction: row;align-items: flex-start;justify-content: flex-start;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-block-2a119a5f.wp-block-uagb-container > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-uagb-image ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not( .spectra-container-link-overlay ):not(.spectra-image-gallery__control-lightbox):not(.wp-block-uagb-lottie):not(.uagb-container-inner-blocks-wrap){width: 100%;}.wp-block-uagb-container.uagb-block-2a119a5f.wp-block-uagb-container > .uagb-container-inner-blocks-wrap > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not(.spectra-image-gallery__control-lightbox){width: 100%;}.uagb-block-38496ba6.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 24px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-38496ba6.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-38496ba6.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-38496ba6.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-38496ba6.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-38496ba6 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-38496ba6 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-38496ba6 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-38496ba6 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-38496ba6 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-38496ba6.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-38496ba6.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-38496ba6 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-38496ba6.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-38496ba6 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-38496ba6 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-38496ba6.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-2e54e655{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-2e54e655 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: flex-start;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-2e54e655{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;flex-direction: row;align-items: flex-start;justify-content: flex-start;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-block-2e54e655.wp-block-uagb-container > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-uagb-image ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not( .spectra-container-link-overlay ):not(.spectra-image-gallery__control-lightbox):not(.wp-block-uagb-lottie):not(.uagb-container-inner-blocks-wrap){width: 100%;}.wp-block-uagb-container.uagb-block-2e54e655.wp-block-uagb-container > .uagb-container-inner-blocks-wrap > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not(.spectra-image-gallery__control-lightbox){width: 100%;}.uagb-block-a031b8de.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: center;align-items: center;}.wp-block-uagb-buttons .uagb-block-edf0762e.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-top-width: 1px;border-left-width: 1px;border-right-width: 1px;border-bottom-width: 1px;border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-style: solid;border-color: #ffffff;}.wp-block-uagb-buttons .uagb-block-065070d6.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-style: none;}}@media only screen and (max-width: 767px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-ea80f84b{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-ea80f84b > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-ea80f84b{padding-top: 64px;padding-bottom: 64px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;background-clip: padding-box;}.wp-block-uagb-container.uagb-block-ea80f84b::before{top: -0px;left: -0px;width: calc(100% + 0px + 0px);height: calc(100% + 0px + 0px);}.wp-block-uagb-container.uagb-is-root-container .uagb-block-2a119a5f{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-2a119a5f > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-2a119a5f{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;flex-wrap: wrap;}.uagb-block-38496ba6.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-38496ba6.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 36px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-38496ba6.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-38496ba6.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-38496ba6 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-38496ba6 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-38496ba6.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-38496ba6 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-38496ba6 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-38496ba6 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-38496ba6.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-38496ba6.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-38496ba6 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-38496ba6.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-38496ba6 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-38496ba6 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-38496ba6.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-2e54e655{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-2e54e655 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: flex-start;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-2e54e655{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;flex-direction: row;align-items: flex-start;justify-content: flex-start;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-block-2e54e655.wp-block-uagb-container > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-uagb-image ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not( .spectra-container-link-overlay ):not(.spectra-image-gallery__control-lightbox):not(.wp-block-uagb-lottie):not(.uagb-container-inner-blocks-wrap){width: 100%;}.wp-block-uagb-container.uagb-block-2e54e655.wp-block-uagb-container > .uagb-container-inner-blocks-wrap > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not(.spectra-image-gallery__control-lightbox){width: 100%;}.uagb-block-a031b8de.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-edf0762e.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-top-width: 1px;border-left-width: 1px;border-right-width: 1px;border-bottom-width: 1px;border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-style: solid;border-color: #ffffff;}.wp-block-uagb-buttons .uagb-block-065070d6.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-style: none;}}";s:7:"content";s:1684:"
<div class="wp-block-uagb-container uagb-block-ea80f84b alignfull uagb-is-root-container"><div class="uagb-container-inner-blocks-wrap">
<div class="wp-block-uagb-container uagb-block-2a119a5f">
<div class="wp-block-uagb-info-box uagb-block-38496ba6 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h2 class="uagb-ifb-title">Unlock your potential and transform your life today!</h2></div><p class="uagb-ifb-desc">Don't wait any longer. Take action today and embark on an exciting journey to achieve your goals. Let us guide you through the process and help you unleash your true potential.</p></div></div>
</div>



<div class="wp-block-uagb-container uagb-block-2e54e655">
<div class="wp-block-uagb-buttons uagb-buttons__outer-wrap uagb-btn__default-btn uagb-btn-tablet__default-btn uagb-btn-mobile__default-btn uagb-block-a031b8de"><div class="uagb-buttons__wrap uagb-buttons-layout-wrap">
<div class="wp-block-uagb-buttons-child uagb-buttons__outer-wrap uagb-block-edf0762e wp-block-button"><div class="uagb-button__wrapper"><a class="uagb-buttons-repeater wp-block-button__link" href="#" onclick="return false;" rel="follow noopener" target="_self"><div class="uagb-button__link">Learn More</div></a></div></div>



<div class="wp-block-uagb-buttons-child uagb-buttons__outer-wrap uagb-block-065070d6 wp-block-button"><div class="uagb-button__wrapper"><a class="uagb-buttons-repeater wp-block-button__link" href="#" onclick="return false;" rel="follow noopener" target="_self"><div class="uagb-button__link">Get Started</div></a></div></div>
</div></div>
</div>
</div></div>
";}s:8:"id-75681";a:10:{s:5:"title";s:17:"Call To Action 05";s:3:"url";s:56:"https://websitedemos.net/astra-blocks/call-to-action-05/";s:3:"tag";a:0:{}s:8:"category";i:832;s:16:"primary-category";s:0:"";s:4:"type";s:5:"block";s:12:"page-builder";s:9:"gutenberg";s:16:"required-plugins";a:0:{}s:10:"stylesheet";s:39176:".wp-block-uagb-container{display:flex;position:relative;box-sizing:border-box;transition-property:box-shadow;transition-duration:0.2s;transition-timing-function:ease}.wp-block-uagb-container .spectra-container-link-overlay{bottom:0;left:0;position:absolute;right:0;top:0;z-index:10}.wp-block-uagb-container.uagb-is-root-container{margin-left:auto;margin-right:auto}.wp-block-uagb-container.alignfull.uagb-is-root-container .uagb-container-inner-blocks-wrap{display:flex;position:relative;box-sizing:border-box;margin-left:auto !important;margin-right:auto !important}.wp-block-uagb-container .uagb-container__video-wrap{height:100%;width:100%;top:0;left:0;position:absolute;overflow:hidden;-webkit-transition:opacity 1s;-o-transition:opacity 1s;transition:opacity 1s}.wp-block-uagb-container .uagb-container__video-wrap video{max-width:100%;width:100%;height:100%;margin:0;line-height:1;border:none;display:inline-block;vertical-align:baseline;-o-object-fit:cover;object-fit:cover;background-size:cover}.st-block-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap>*:not(.wp-block-uagb-container):not(.wp-block-uagb-column):not(.wp-block-uagb-container):not(.wp-block-uagb-section):not(.uagb-container__shape):not(.uagb-container__video-wrap):not(.wp-block-spectra-pro-register):not(.wp-block-spectra-pro-login):not(.uagb-slider-container):not(.spectra-image-gallery__control-lightbox),.st-block-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap,.st-block-container .wp-block-uagb-container>*:not(.wp-block-uagb-container):not(.wp-block-uagb-column):not(.wp-block-uagb-container):not(.wp-block-uagb-section):not(.uagb-container__shape):not(.uagb-container__video-wrap):not(.wp-block-uagb-image):not(.wp-block-spectra-pro-register):not(.wp-block-spectra-pro-login):not(.uagb-slider-container):not(.spectra-container-link-overlay):not(.spectra-image-gallery__control-lightbox):not(.wp-block-uagb-lottie):not(.uagb-faq__outer-wrap){min-width:unset !important;width:100%;position:relative}.st-block-container .ast-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap>.wp-block-uagb-container>ul,.st-block-container .ast-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap>.wp-block-uagb-container ol,.st-block-container .ast-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap>ul,.st-block-container .ast-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap ol{max-width:-webkit-fill-available;margin-block-start:0;margin-block-end:0;margin-left:20px}.ast-plain-container .editor-styles-wrapper .block-editor-block-list__layout.is-root-container .uagb-is-root-container.wp-block-uagb-container.alignwide{margin-left:auto;margin-right:auto}.uagb-container__shape{overflow:hidden;position:absolute;left:0;width:100%;line-height:0;direction:ltr}.uagb-container__shape-top{top:-3px}.uagb-container__shape-bottom{bottom:-3px}.uagb-container__shape.uagb-container__invert.uagb-container__shape-bottom,.uagb-container__shape.uagb-container__invert.uagb-container__shape-top{-webkit-transform:rotate(180deg);-ms-transform:rotate(180deg);transform:rotate(180deg)}.uagb-container__shape.uagb-container__shape-flip svg{transform:translateX(-50%) rotateY(180deg)}.uagb-container__shape svg{display:block;width:-webkit-calc(100% + 1.3px);width:calc(100% + 1.3px);position:relative;left:50%;-webkit-transform:translateX(-50%);-ms-transform:translateX(-50%);transform:translateX(-50%)}.uagb-container__shape .uagb-container__shape-fill{-webkit-transform-origin:center;-ms-transform-origin:center;transform-origin:center;-webkit-transform:rotateY(0deg);transform:rotateY(0deg)}.uagb-container__shape.uagb-container__shape-above-content{z-index:9;pointer-events:none}.nv-single-page-wrap .nv-content-wrap.entry-content .wp-block-uagb-container.alignfull{margin-left:calc(50% - 50vw);margin-right:calc(50% - 50vw)}@media only screen and (max-width: 767px){.wp-block-uagb-container .wp-block-uagb-advanced-heading{width:-webkit-fill-available !important}}
.uagb-ifb-content>svg *{-webkit-transition:all 0.2s;-o-transition:all 0.2s;transition:all 0.2s}.uagb-ifb-content>svg,.uagb-ifb-content{display:inline-block}.uagb-ifb-content>svg{vertical-align:middle;width:inherit;height:inherit;font-style:initial}.uagb-ifb-content .uagb-ifb-icon-wrap svg{box-sizing:content-box;width:inherit;height:inherit}.uagb-ifb-button-wrapper:empty{display:none}div.uagb-ifb-button-wrapper a.uagb-infobox-cta-link,div.uagb-ifb-cta a.uagb-infobox-cta-link,.entry .entry-content a.uagb-infobox-cta-link,a.uagb-infobox-link-wrap,.entry .entry-content a.uagb-infobox-link-wrap{text-decoration:none;align-items:center}.uagb-infobox-icon-left-title.uagb-infobox-image-valign-middle .uagb-ifb-title-wrap,.uagb-infobox-icon-right-title.uagb-infobox-image-valign-middle .uagb-ifb-title-wrap,.uagb-infobox-image-valign-middle .uagb-ifb-icon-wrap,.uagb-infobox-image-valign-middle .uagb-ifb-image-content,.uagb-infobox-icon-left.uagb-infobox-image-valign-middle .uagb-ifb-content,.uagb-infobox-icon-right.uagb-infobox-image-valign-middle .uagb-ifb-content{-ms-flex-item-align:center;-webkit-align-self:center;align-self:center}.uagb-infobox-icon-left-title.uagb-infobox-image-valign-top .uagb-ifb-title-wrap,.uagb-infobox-icon-right-title.uagb-infobox-image-valign-top .uagb-ifb-title-wrap,.uagb-infobox-image-valign-top .uagb-ifb-icon-wrap,.uagb-infobox-image-valign-top .uagb-ifb-image-content,.uagb-infobox-icon-left.uagb-infobox-image-valign-top .uagb-ifb-content,.uagb-infobox-icon-right.uagb-infobox-image-valign-top .uagb-ifb-content{-webkit-align-self:self-start;align-self:self-start}.uagb-infobox-left{justify-content:flex-start;text-align:left;-webkit-box-pack:start;-ms-flex-pack:start;-webkit-justify-content:flex-start;-moz-box-pack:start}.uagb-infobox-center{justify-content:center;text-align:center;-webkit-box-pack:center;-ms-flex-pack:center;-webkit-justify-content:center;-moz-box-pack:center}.uagb-infobox-right{justify-content:flex-end;text-align:right;-webkit-box-pack:end;-ms-flex-pack:end;-webkit-justify-content:flex-end;-moz-box-pack:end}.uagb-infobox-icon-above-title.uagb-infobox__content-wrap,.uagb-infobox-icon-below-title.uagb-infobox__content-wrap{display:block;width:100%}.uagb-infobox-icon-left-title .uagb-ifb-content>svg,.uagb-infobox-icon-left .uagb-ifb-content>svg{margin-right:10px}.uagb-infobox-icon-right-title .uagb-ifb-content>svg,.uagb-infobox-icon-right .uagb-ifb-content>svg{margin-left:10px}.uagb-infobox-icon-left.uagb-infobox__content-wrap,.uagb-infobox-icon-right.uagb-infobox__content-wrap,.uagb-infobox-icon-left-title .uagb-ifb-left-title-image,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image{display:-webkit-box;display:-ms-flexbox;display:-webkit-flex;display:-moz-box;display:flex;-js-display:flex}.uagb-infobox-icon-left-title .uagb-ifb-left-title-image .uagb-ifb-image-content,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image .uagb-ifb-image-content,.uagb-infobox-icon-left .uagb-ifb-image-content,.uagb-infobox-icon-right .uagb-ifb-image-content{flex-shrink:0;line-height:0}.uagb-infobox-icon-left-title .uagb-ifb-left-title-image .uagb-ifb-title-wrap,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image .uagb-ifb-title-wrap,.uagb-infobox-icon-left .uagb-ifb-content,.uagb-infobox-icon-right .uagb-ifb-content{flex-grow:1}.uagb-infobox-icon-right.uagb-infobox__content-wrap,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image{-webkit-box-pack:end;-ms-flex-pack:end;-webkit-justify-content:flex-end;-moz-box-pack:end;justify-content:flex-end}.uagb-ifb-content img{position:relative;display:inline-block;line-height:0;width:auto;height:auto !important;max-width:100%;border-radius:inherit;-webkit-box-sizing:content-box;-moz-box-sizing:content-box;-webkit-border-radius:inherit}.uagb-infobox-module-link{position:absolute;top:0;right:0;bottom:0;left:0;z-index:4;width:100%;height:100%}.uagb-edit-mode .uagb-infobox-module-link{z-index:2}.uagb-infobox-link-icon-after{margin-right:0;margin-left:5px}.uagb-infobox-link-icon-before{margin-right:5px;margin-left:0}.uagb-infobox-link-icon{-webkit-transition:all 200ms linear;transition:all 200ms linear}.uagb-infobox__content-wrap{box-sizing:border-box;position:relative;width:100%;word-break:break-word;z-index:1}.uagb-ifb-separator{display:inline-block;margin:0;border-top-color:#333;border-top-style:solid;border-top-width:2px;line-height:0}.uagb-ifb-button-wrapper{line-height:1}.uagb-ifb-button-wrapper.uagb-ifb-button-type-text .uagb-infobox-cta-link.wp-block-button__link{background-color:unset;border:none}.uagb-ifb-button-wrapper.uagb-ifb-button-type-text .uagb-infobox-cta-link.wp-block-button__link:hover{background-color:unset;border-color:unset}.uagb-ifb-button-wrapper .uagb-infobox-cta-link{cursor:pointer}.uagb-ifb-button-wrapper .wp-block-button__link svg{fill:currentColor}.uagb-infobox__content-wrap a{-webkit-box-shadow:none;box-shadow:none;text-decoration:none}.uagb-ifb-title-wrap{width:100%}.uagb-ifb-title{margin-block-start:0}.uagb-ifb-title-wrap .uagb-ifb-title-prefix{display:block;padding:0;margin:0}.uagb-infobox__content-wrap.uagb-infobox__content-wrap{position:relative}.uagb-ifb-content{width:100%}.uagb-infobox__content-wrap.uagb-infobox,.uagb-ifb-content,.uagb-ifb-title-wrap,.uagb-ifb-title-prefix *,svg.dashicon.dashicons-upload{z-index:1}a.uagb-infobox-link-wrap{color:inherit}.uagb-ifb-content p:empty{display:none}.uagb-infobox__content-wrap .uagb-ifb-content img{display:inline-block;max-width:100%}.uagb-infobox__content-wrap .uagb-ifb-content svg{display:inline-block}.uagb-infobox__content-wrap .uagb-ifb-icon-wrap,.uagb-infobox-icon-left .uagb-ifb-image-content,.uagb-infobox-icon-right .uagb-ifb-image-content{box-sizing:content-box}.uagb-infobox-cta-link>svg{vertical-align:middle;width:15px;height:15px;font-size:15px}.uagb-infobox-cta-link{display:inline-flex}.block-editor-page #wpwrap .uagb-infobox-cta-link svg,.uagb-infobox-cta-link svg{font-style:normal}.uagb-infobox-icon-left-title .uagb-ifb-icon-wrap,.uagb-infobox-icon-left .uagb-ifb-icon-wrap{margin-right:10px;line-height:0}.uagb-infobox-icon-right-title .uagb-ifb-icon-wrap,.uagb-infobox-icon-right .uagb-ifb-icon-wrap{margin-left:10px;line-height:0}.uagb-infobox-icon-left .uagb-ifb-left-right-wrap,.uagb-infobox-icon-right .uagb-ifb-left-right-wrap,.uagb-infobox-icon-left-title .uagb-ifb-left-title-image,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image{display:-webkit-box;display:-ms-flexbox;display:flex}.uagb-infobox-icon-right .uagb-ifb-left-right-wrap,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image{-webkit-box-pack:end;-ms-flex-pack:end;-webkit-justify-content:flex-end;-moz-box-pack:end;justify-content:flex-end}a.uagb-infbox__link-to-all{position:absolute;top:0;left:0;z-index:3;width:100%;height:100%;box-shadow:none;text-decoration:none;-webkit-box-shadow:none}@media only screen and (max-width: 976px){.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-image-content{padding:0;margin-bottom:20px}.uagb-infobox-stacked-tablet.uagb-reverse-order-tablet.uagb-infobox__content-wrap{display:-webkit-inline-box;display:-ms-inline-flexbox;display:-webkit-inline-flex;display:-moz-inline-box;display:inline-flex;flex-direction:column-reverse;-js-display:inline-flex;-webkit-box-orient:vertical;-webkit-box-direction:reverse;-ms-flex-direction:column-reverse;-webkit-flex-direction:column-reverse;-moz-box-orient:vertical;-moz-box-direction:reverse}.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-content,.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-icon-wrap,.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-image-content{display:block;width:100%;text-align:center}.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-icon-wrap,.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-image-content{margin-right:0;margin-left:0}.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap{display:inline-block}.uagb-infobox-icon-left-title.uagb-infobox-stacked-tablet .uagb-ifb-image-content,.uagb-infobox-icon-left-title.uagb-infobox-stacked-tablet .uagb-ifb-icon-wrap,.uagb-infobox-icon-left.uagb-infobox-stacked-tablet .uagb-ifb-image-content,.uagb-infobox-icon-left.uagb-infobox-stacked-tablet .uagb-ifb-icon-wrap{margin-right:0}.uagb-infobox-icon-right-title.uagb-infobox-stacked-tablet .uagb-ifb-image-content,.uagb-infobox-icon-right-title.uagb-infobox-stacked-tablet .uagb-ifb-icon-wrap,.uagb-infobox-icon-right.uagb-infobox-stacked-tablet .uagb-ifb-image-content,.uagb-infobox-icon-right.uagb-infobox-stacked-tablet .uagb-ifb-icon-wrap{margin-left:0}.uagb-infobox-icon-left-title .uagb-ifb-separator{margin:10px 0}}@media screen and (max-width: 767px){.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap{display:inline-block}.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-image-content,.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-icon-wrap{padding:0;margin-bottom:20px;margin-right:0;margin-left:0}.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap.uagb-reverse-order-mobile{display:-webkit-inline-box;display:-ms-inline-flexbox;display:-webkit-inline-flex;display:-moz-inline-box;display:inline-flex;flex-direction:column-reverse;-js-display:inline-flex;-webkit-box-orient:vertical;-webkit-box-direction:reverse;-ms-flex-direction:column-reverse;-webkit-flex-direction:column-reverse;-moz-box-orient:vertical;-moz-box-direction:reverse}.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-image-content,.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-icon-wrap,.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-content{display:block;width:100%;text-align:center}.uagb-infobox-icon-left-title.uagb-infobox-stacked-mobile .uagb-ifb-image-content,.uagb-infobox-icon-left-title.uagb-infobox-stacked-mobile .uagb-ifb-icon-wrap,.uagb-infobox-icon-left.uagb-infobox-stacked-mobile .uagb-ifb-image-content,.uagb-infobox-icon-left.uagb-infobox-stacked-mobile .uagb-ifb-icon-wrap{margin-right:0}.uagb-infobox-icon-right-title.uagb-infobox-stacked-mobile .uagb-ifb-image-content,.uagb-infobox-icon-right-title.uagb-infobox-stacked-mobile .uagb-ifb-icon-wrap,.uagb-infobox-icon-right.uagb-infobox-stacked-mobile .uagb-ifb-image-content,.uagb-infobox-icon-right.uagb-infobox-stacked-mobile .uagb-ifb-icon-wrap{margin-left:0}.uagb-infobox-icon-left-title .uagb-ifb-separator{margin:10px 0}}.uagb-ifb-icon svg{width:inherit;height:inherit;vertical-align:middle}.uagb-ifb-button-icon{height:15px;width:15px;font-size:15px;vertical-align:middle}.uagb-ifb-button-icon svg{height:inherit;width:inherit;display:inline-block}.uagb-ifb-button-icon.uagb-ifb-align-icon-after{float:right}.uagb-ifb-cta-button{display:inline-block}.uagb-disable-link{pointer-events:none}
.uagb-buttons__outer-wrap .uagb-buttons__wrap{display:inline-flex;width:100%}.uagb-buttons__outer-wrap.uagb-btn__small-btn .uagb-buttons-repeater{padding:5px 10px}.uagb-buttons__outer-wrap.uagb-btn__medium-btn .uagb-buttons-repeater{padding:12px 24px}.uagb-buttons__outer-wrap.uagb-btn__large-btn .uagb-buttons-repeater{padding:20px 30px}.uagb-buttons__outer-wrap.uagb-btn__extralarge-btn .uagb-buttons-repeater{padding:30px 65px}@media (max-width: 976px){.uagb-buttons__outer-wrap.uagb-btn-tablet__small-btn .uagb-buttons-repeater{padding:5px 10px}.uagb-buttons__outer-wrap.uagb-btn-tablet__medium-btn .uagb-buttons-repeater{padding:12px 24px}.uagb-buttons__outer-wrap.uagb-btn-tablet__large-btn .uagb-buttons-repeater{padding:20px 30px}.uagb-buttons__outer-wrap.uagb-btn-tablet__extralarge-btn .uagb-buttons-repeater{padding:30px 65px}}@media (max-width: 767px){.uagb-buttons__outer-wrap.uagb-btn-mobile__small-btn .uagb-buttons-repeater{padding:5px 10px}.uagb-buttons__outer-wrap.uagb-btn-mobile__medium-btn .uagb-buttons-repeater{padding:12px 24px}.uagb-buttons__outer-wrap.uagb-btn-mobile__large-btn .uagb-buttons-repeater{padding:20px 30px}.uagb-buttons__outer-wrap.uagb-btn-mobile__extralarge-btn .uagb-buttons-repeater{padding:30px 65px}}
.uagb-buttons__outer-wrap .uagb-buttons-repeater{display:flex;justify-content:center;align-items:center;transition:box-shadow 0.2s ease}.uagb-buttons__outer-wrap .uagb-buttons-repeater a.uagb-button__link{display:flex;justify-content:center}.uagb-buttons__outer-wrap .uagb-buttons-repeater .uagb-button__icon{font-size:inherit;display:flex;align-items:center}.uagb-buttons__outer-wrap .uagb-buttons-repeater .uagb-button__icon svg{fill:currentColor;width:inherit;height:inherit}
.wp-block-uagb-container.uagb-is-root-container .uagb-block-93c02078{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-93c02078 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-93c02078 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-93c02078 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-93c02078 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-93c02078 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-93c02078 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-93c02078{box-shadow: 0px 0px   #00000070 ;padding-top: 112px;padding-bottom: 112px;padding-left: 40px;padding-right: 40px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;background-color: var(--ast-global-color-4);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-bab1eeaa{max-width: 60%;width: 100%;}.wp-block-uagb-container.uagb-block-bab1eeaa .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-bab1eeaa .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-bab1eeaa .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-bab1eeaa .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-bab1eeaa .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-bab1eeaa > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: stretch;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-bab1eeaa{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: stretch;justify-content: center;flex-wrap: nowrap;}.uagb-block-ec9ed791 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-ec9ed791 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-ec9ed791 .uagb-ifb-icon svg{fill: #333;}.uagb-block-ec9ed791.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-ec9ed791 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-ec9ed791 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-ec9ed791.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-ec9ed791.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-ec9ed791 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-ec9ed791 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-ec9ed791 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-ec9ed791 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-ec9ed791.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-ec9ed791.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-ec9ed791.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-ec9ed791.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-ec9ed791 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-ec9ed791.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 24px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-ec9ed791.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-ec9ed791 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-ec9ed791 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-ec9ed791 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-ec9ed791 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-ec9ed791.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-ec9ed791.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-ec9ed791 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-ec9ed791.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-ec9ed791.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-ec9ed791 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-ec9ed791.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-ec9ed791 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-ec9ed791 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-ec9ed791.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-ebe3b368{max-width: 40%;width: 100%;}.wp-block-uagb-container.uagb-block-ebe3b368 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-ebe3b368 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-ebe3b368 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-ebe3b368 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-ebe3b368 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-ebe3b368 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: stretch;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-ebe3b368{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: stretch;justify-content: center;flex-wrap: nowrap;}.uagb-block-083e1685.wp-block-uagb-buttons.uagb-buttons__outer-wrap .uagb-buttons__wrap {column-gap: 20px;}.uagb-block-083e1685.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: right;align-items: center;}.wp-block-uagb-buttons .uagb-block-a6b91cc9 .wp-block-button__link{background: transparent;}.wp-block-uagb-buttons .uagb-block-a6b91cc9 .wp-block-button__link:hover{background: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-a6b91cc9 .wp-block-button__link:focus{background: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-a6b91cc9 .uagb-button__wrapper .uagb-buttons-repeater{color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-a6b91cc9 .wp-block-button__link.has-text-color:hover .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-a6b91cc9 .wp-block-button__link.has-text-color:focus .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-a6b91cc9 .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-a6b91cc9 .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link:hover{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-a6b91cc9 .uagb-buttons-repeater.wp-block-button__link{border-top-width: 1px;border-left-width: 1px;border-right-width: 1px;border-bottom-width: 1px;border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-color: var(--ast-global-color-2);border-style: solid;}.wp-block-uagb-buttons .uagb-block-a6b91cc9 .uagb-buttons-repeater.wp-block-button__link:hover{border-color: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-a6b91cc9 .uagb-buttons-repeater.wp-block-button__link:focus{border-color: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-a6b91cc9.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-top-width: 1px;border-left-width: 1px;border-right-width: 1px;border-bottom-width: 1px;border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-color: var(--ast-global-color-2);border-style: solid;}.wp-block-uagb-buttons .uagb-block-a6b91cc9.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater:hover{border-color: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-a6b91cc9 .uagb-buttons-repeater .uagb-button__link{color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-a6b91cc9 .uagb-buttons-repeater:hover .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-a6b91cc9 .uagb-buttons-repeater:focus .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-a6b91cc9 .uagb-buttons-repeater .uagb-button__icon > svg{width: 15px;height: 15px;fill: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-a6b91cc9 .uagb-buttons-repeater:hover .uagb-button__icon > svg{fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-a6b91cc9 .uagb-buttons-repeater:focus .uagb-button__icon > svg{fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-a6b91cc9 .uagb-buttons-repeater .uagb-button__icon-position-after{margin-left: 8px;}.wp-block-uagb-buttons .uagb-block-a6b91cc9 .uagb-buttons-repeater .uagb-button__icon-position-before{margin-right: 8px;}.wp-block-uagb-buttons .uagb-block-a6b91cc9 .uagb-button__link{text-transform: normal;text-decoration: none;}.wp-block-uagb-buttons .uagb-block-9761f4bb.wp-block-uagb-buttons-child .uagb-buttons-repeater{background: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-9761f4bb .wp-block-button__link{background: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-9761f4bb .wp-block-button__link:hover{background: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-9761f4bb .wp-block-button__link:focus{background: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-9761f4bb .uagb-button__wrapper .uagb-buttons-repeater{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-9761f4bb .wp-block-button__link.has-text-color:hover .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-9761f4bb .wp-block-button__link.has-text-color:focus .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-9761f4bb .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-9761f4bb .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link:hover{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-9761f4bb .uagb-buttons-repeater.wp-block-button__link{border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-style: none;}.wp-block-uagb-buttons .uagb-block-9761f4bb.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-style: none;}.wp-block-uagb-buttons .uagb-block-9761f4bb .uagb-buttons-repeater .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-9761f4bb .uagb-buttons-repeater:hover .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-9761f4bb .uagb-buttons-repeater:focus .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-9761f4bb .uagb-buttons-repeater .uagb-button__icon > svg{width: 15px;height: 15px;fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-9761f4bb .uagb-buttons-repeater:hover .uagb-button__icon > svg{fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-9761f4bb .uagb-buttons-repeater:focus .uagb-button__icon > svg{fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-9761f4bb .uagb-buttons-repeater .uagb-button__icon-position-after{margin-left: 8px;}.wp-block-uagb-buttons .uagb-block-9761f4bb .uagb-buttons-repeater .uagb-button__icon-position-before{margin-right: 8px;}.wp-block-uagb-buttons .uagb-block-9761f4bb .uagb-button__link{text-transform: normal;text-decoration: none;}@media only screen and (max-width: 976px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-93c02078{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-93c02078 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 0px;column-gap: 48px;}.wp-block-uagb-container.uagb-block-93c02078{padding-top: 80px;padding-bottom: 80px;padding-left: 32px;padding-right: 32px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 48px;background-color: var(--ast-global-color-4);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-bab1eeaa{max-width: 60%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-bab1eeaa > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-bab1eeaa{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;}.uagb-block-ec9ed791.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 24px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-ec9ed791.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-ec9ed791.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-ec9ed791.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-ec9ed791.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-ec9ed791 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-ec9ed791 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-ec9ed791 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-ec9ed791 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-ec9ed791 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-ec9ed791.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-ec9ed791.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-ec9ed791 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-ec9ed791.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-ec9ed791 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-ec9ed791 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-ec9ed791.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-ebe3b368{max-width: 40%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-ebe3b368 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-ebe3b368{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;}.uagb-block-083e1685.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: center;align-items: center;}.wp-block-uagb-buttons .uagb-block-a6b91cc9.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-style: solid;border-color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-9761f4bb.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-style: none;}}@media only screen and (max-width: 767px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-93c02078{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-93c02078 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-93c02078{padding-top: 64px;padding-bottom: 64px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;background-color: var(--ast-global-color-4);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-bab1eeaa{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-bab1eeaa > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-bab1eeaa{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;flex-wrap: wrap;}.uagb-block-ec9ed791.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-ec9ed791.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 36px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-ec9ed791.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-ec9ed791.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-ec9ed791 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-ec9ed791 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-ec9ed791.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-ec9ed791 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-ec9ed791 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-ec9ed791 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-ec9ed791.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-ec9ed791 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-ec9ed791.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-ec9ed791 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-ec9ed791 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-ec9ed791.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-ebe3b368{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-ebe3b368 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-ebe3b368{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;flex-wrap: wrap;}.uagb-block-083e1685.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-a6b91cc9.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-style: solid;border-color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-9761f4bb.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-style: none;}}";s:7:"content";s:1684:"
<div class="wp-block-uagb-container uagb-block-93c02078 alignfull uagb-is-root-container"><div class="uagb-container-inner-blocks-wrap">
<div class="wp-block-uagb-container uagb-block-bab1eeaa">
<div class="wp-block-uagb-info-box uagb-block-ec9ed791 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h2 class="uagb-ifb-title">Unlock your potential and transform your life today!</h2></div><p class="uagb-ifb-desc">Don't wait any longer. Take action today and embark on an exciting journey to achieve your goals. Let us guide you through the process and help you unleash your true potential.</p></div></div>
</div>



<div class="wp-block-uagb-container uagb-block-ebe3b368">
<div class="wp-block-uagb-buttons uagb-buttons__outer-wrap uagb-btn__default-btn uagb-btn-tablet__default-btn uagb-btn-mobile__default-btn uagb-block-083e1685"><div class="uagb-buttons__wrap uagb-buttons-layout-wrap">
<div class="wp-block-uagb-buttons-child uagb-buttons__outer-wrap uagb-block-a6b91cc9 wp-block-button"><div class="uagb-button__wrapper"><a class="uagb-buttons-repeater wp-block-button__link" href="#" onclick="return false;" rel="follow noopener" target="_self"><div class="uagb-button__link">Learn More</div></a></div></div>



<div class="wp-block-uagb-buttons-child uagb-buttons__outer-wrap uagb-block-9761f4bb wp-block-button"><div class="uagb-button__wrapper"><a class="uagb-buttons-repeater wp-block-button__link" href="#" onclick="return false;" rel="follow noopener" target="_self"><div class="uagb-button__link">Get Started</div></a></div></div>
</div></div>
</div>
</div></div>
";}s:8:"id-75846";a:10:{s:5:"title";s:17:"Call To Action 12";s:3:"url";s:56:"https://websitedemos.net/astra-blocks/call-to-action-12/";s:3:"tag";a:0:{}s:8:"category";i:832;s:16:"primary-category";s:0:"";s:4:"type";s:5:"block";s:12:"page-builder";s:9:"gutenberg";s:16:"required-plugins";a:0:{}s:10:"stylesheet";s:44615:".wp-block-uagb-container{display:flex;position:relative;box-sizing:border-box;transition-property:box-shadow;transition-duration:0.2s;transition-timing-function:ease}.wp-block-uagb-container .spectra-container-link-overlay{bottom:0;left:0;position:absolute;right:0;top:0;z-index:10}.wp-block-uagb-container.uagb-is-root-container{margin-left:auto;margin-right:auto}.wp-block-uagb-container.alignfull.uagb-is-root-container .uagb-container-inner-blocks-wrap{display:flex;position:relative;box-sizing:border-box;margin-left:auto !important;margin-right:auto !important}.wp-block-uagb-container .uagb-container__video-wrap{height:100%;width:100%;top:0;left:0;position:absolute;overflow:hidden;-webkit-transition:opacity 1s;-o-transition:opacity 1s;transition:opacity 1s}.wp-block-uagb-container .uagb-container__video-wrap video{max-width:100%;width:100%;height:100%;margin:0;line-height:1;border:none;display:inline-block;vertical-align:baseline;-o-object-fit:cover;object-fit:cover;background-size:cover}.st-block-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap>*:not(.wp-block-uagb-container):not(.wp-block-uagb-column):not(.wp-block-uagb-container):not(.wp-block-uagb-section):not(.uagb-container__shape):not(.uagb-container__video-wrap):not(.wp-block-spectra-pro-register):not(.wp-block-spectra-pro-login):not(.uagb-slider-container):not(.spectra-image-gallery__control-lightbox),.st-block-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap,.st-block-container .wp-block-uagb-container>*:not(.wp-block-uagb-container):not(.wp-block-uagb-column):not(.wp-block-uagb-container):not(.wp-block-uagb-section):not(.uagb-container__shape):not(.uagb-container__video-wrap):not(.wp-block-uagb-image):not(.wp-block-spectra-pro-register):not(.wp-block-spectra-pro-login):not(.uagb-slider-container):not(.spectra-container-link-overlay):not(.spectra-image-gallery__control-lightbox):not(.wp-block-uagb-lottie):not(.uagb-faq__outer-wrap){min-width:unset !important;width:100%;position:relative}.st-block-container .ast-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap>.wp-block-uagb-container>ul,.st-block-container .ast-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap>.wp-block-uagb-container ol,.st-block-container .ast-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap>ul,.st-block-container .ast-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap ol{max-width:-webkit-fill-available;margin-block-start:0;margin-block-end:0;margin-left:20px}.ast-plain-container .editor-styles-wrapper .block-editor-block-list__layout.is-root-container .uagb-is-root-container.wp-block-uagb-container.alignwide{margin-left:auto;margin-right:auto}.uagb-container__shape{overflow:hidden;position:absolute;left:0;width:100%;line-height:0;direction:ltr}.uagb-container__shape-top{top:-3px}.uagb-container__shape-bottom{bottom:-3px}.uagb-container__shape.uagb-container__invert.uagb-container__shape-bottom,.uagb-container__shape.uagb-container__invert.uagb-container__shape-top{-webkit-transform:rotate(180deg);-ms-transform:rotate(180deg);transform:rotate(180deg)}.uagb-container__shape.uagb-container__shape-flip svg{transform:translateX(-50%) rotateY(180deg)}.uagb-container__shape svg{display:block;width:-webkit-calc(100% + 1.3px);width:calc(100% + 1.3px);position:relative;left:50%;-webkit-transform:translateX(-50%);-ms-transform:translateX(-50%);transform:translateX(-50%)}.uagb-container__shape .uagb-container__shape-fill{-webkit-transform-origin:center;-ms-transform-origin:center;transform-origin:center;-webkit-transform:rotateY(0deg);transform:rotateY(0deg)}.uagb-container__shape.uagb-container__shape-above-content{z-index:9;pointer-events:none}.nv-single-page-wrap .nv-content-wrap.entry-content .wp-block-uagb-container.alignfull{margin-left:calc(50% - 50vw);margin-right:calc(50% - 50vw)}@media only screen and (max-width: 767px){.wp-block-uagb-container .wp-block-uagb-advanced-heading{width:-webkit-fill-available !important}}
.uagb-ifb-content>svg *{-webkit-transition:all 0.2s;-o-transition:all 0.2s;transition:all 0.2s}.uagb-ifb-content>svg,.uagb-ifb-content{display:inline-block}.uagb-ifb-content>svg{vertical-align:middle;width:inherit;height:inherit;font-style:initial}.uagb-ifb-content .uagb-ifb-icon-wrap svg{box-sizing:content-box;width:inherit;height:inherit}.uagb-ifb-button-wrapper:empty{display:none}div.uagb-ifb-button-wrapper a.uagb-infobox-cta-link,div.uagb-ifb-cta a.uagb-infobox-cta-link,.entry .entry-content a.uagb-infobox-cta-link,a.uagb-infobox-link-wrap,.entry .entry-content a.uagb-infobox-link-wrap{text-decoration:none;align-items:center}.uagb-infobox-icon-left-title.uagb-infobox-image-valign-middle .uagb-ifb-title-wrap,.uagb-infobox-icon-right-title.uagb-infobox-image-valign-middle .uagb-ifb-title-wrap,.uagb-infobox-image-valign-middle .uagb-ifb-icon-wrap,.uagb-infobox-image-valign-middle .uagb-ifb-image-content,.uagb-infobox-icon-left.uagb-infobox-image-valign-middle .uagb-ifb-content,.uagb-infobox-icon-right.uagb-infobox-image-valign-middle .uagb-ifb-content{-ms-flex-item-align:center;-webkit-align-self:center;align-self:center}.uagb-infobox-icon-left-title.uagb-infobox-image-valign-top .uagb-ifb-title-wrap,.uagb-infobox-icon-right-title.uagb-infobox-image-valign-top .uagb-ifb-title-wrap,.uagb-infobox-image-valign-top .uagb-ifb-icon-wrap,.uagb-infobox-image-valign-top .uagb-ifb-image-content,.uagb-infobox-icon-left.uagb-infobox-image-valign-top .uagb-ifb-content,.uagb-infobox-icon-right.uagb-infobox-image-valign-top .uagb-ifb-content{-webkit-align-self:self-start;align-self:self-start}.uagb-infobox-left{justify-content:flex-start;text-align:left;-webkit-box-pack:start;-ms-flex-pack:start;-webkit-justify-content:flex-start;-moz-box-pack:start}.uagb-infobox-center{justify-content:center;text-align:center;-webkit-box-pack:center;-ms-flex-pack:center;-webkit-justify-content:center;-moz-box-pack:center}.uagb-infobox-right{justify-content:flex-end;text-align:right;-webkit-box-pack:end;-ms-flex-pack:end;-webkit-justify-content:flex-end;-moz-box-pack:end}.uagb-infobox-icon-above-title.uagb-infobox__content-wrap,.uagb-infobox-icon-below-title.uagb-infobox__content-wrap{display:block;width:100%}.uagb-infobox-icon-left-title .uagb-ifb-content>svg,.uagb-infobox-icon-left .uagb-ifb-content>svg{margin-right:10px}.uagb-infobox-icon-right-title .uagb-ifb-content>svg,.uagb-infobox-icon-right .uagb-ifb-content>svg{margin-left:10px}.uagb-infobox-icon-left.uagb-infobox__content-wrap,.uagb-infobox-icon-right.uagb-infobox__content-wrap,.uagb-infobox-icon-left-title .uagb-ifb-left-title-image,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image{display:-webkit-box;display:-ms-flexbox;display:-webkit-flex;display:-moz-box;display:flex;-js-display:flex}.uagb-infobox-icon-left-title .uagb-ifb-left-title-image .uagb-ifb-image-content,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image .uagb-ifb-image-content,.uagb-infobox-icon-left .uagb-ifb-image-content,.uagb-infobox-icon-right .uagb-ifb-image-content{flex-shrink:0;line-height:0}.uagb-infobox-icon-left-title .uagb-ifb-left-title-image .uagb-ifb-title-wrap,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image .uagb-ifb-title-wrap,.uagb-infobox-icon-left .uagb-ifb-content,.uagb-infobox-icon-right .uagb-ifb-content{flex-grow:1}.uagb-infobox-icon-right.uagb-infobox__content-wrap,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image{-webkit-box-pack:end;-ms-flex-pack:end;-webkit-justify-content:flex-end;-moz-box-pack:end;justify-content:flex-end}.uagb-ifb-content img{position:relative;display:inline-block;line-height:0;width:auto;height:auto !important;max-width:100%;border-radius:inherit;-webkit-box-sizing:content-box;-moz-box-sizing:content-box;-webkit-border-radius:inherit}.uagb-infobox-module-link{position:absolute;top:0;right:0;bottom:0;left:0;z-index:4;width:100%;height:100%}.uagb-edit-mode .uagb-infobox-module-link{z-index:2}.uagb-infobox-link-icon-after{margin-right:0;margin-left:5px}.uagb-infobox-link-icon-before{margin-right:5px;margin-left:0}.uagb-infobox-link-icon{-webkit-transition:all 200ms linear;transition:all 200ms linear}.uagb-infobox__content-wrap{box-sizing:border-box;position:relative;width:100%;word-break:break-word;z-index:1}.uagb-ifb-separator{display:inline-block;margin:0;border-top-color:#333;border-top-style:solid;border-top-width:2px;line-height:0}.uagb-ifb-button-wrapper{line-height:1}.uagb-ifb-button-wrapper.uagb-ifb-button-type-text .uagb-infobox-cta-link.wp-block-button__link{background-color:unset;border:none}.uagb-ifb-button-wrapper.uagb-ifb-button-type-text .uagb-infobox-cta-link.wp-block-button__link:hover{background-color:unset;border-color:unset}.uagb-ifb-button-wrapper .uagb-infobox-cta-link{cursor:pointer}.uagb-ifb-button-wrapper .wp-block-button__link svg{fill:currentColor}.uagb-infobox__content-wrap a{-webkit-box-shadow:none;box-shadow:none;text-decoration:none}.uagb-ifb-title-wrap{width:100%}.uagb-ifb-title{margin-block-start:0}.uagb-ifb-title-wrap .uagb-ifb-title-prefix{display:block;padding:0;margin:0}.uagb-infobox__content-wrap.uagb-infobox__content-wrap{position:relative}.uagb-ifb-content{width:100%}.uagb-infobox__content-wrap.uagb-infobox,.uagb-ifb-content,.uagb-ifb-title-wrap,.uagb-ifb-title-prefix *,svg.dashicon.dashicons-upload{z-index:1}a.uagb-infobox-link-wrap{color:inherit}.uagb-ifb-content p:empty{display:none}.uagb-infobox__content-wrap .uagb-ifb-content img{display:inline-block;max-width:100%}.uagb-infobox__content-wrap .uagb-ifb-content svg{display:inline-block}.uagb-infobox__content-wrap .uagb-ifb-icon-wrap,.uagb-infobox-icon-left .uagb-ifb-image-content,.uagb-infobox-icon-right .uagb-ifb-image-content{box-sizing:content-box}.uagb-infobox-cta-link>svg{vertical-align:middle;width:15px;height:15px;font-size:15px}.uagb-infobox-cta-link{display:inline-flex}.block-editor-page #wpwrap .uagb-infobox-cta-link svg,.uagb-infobox-cta-link svg{font-style:normal}.uagb-infobox-icon-left-title .uagb-ifb-icon-wrap,.uagb-infobox-icon-left .uagb-ifb-icon-wrap{margin-right:10px;line-height:0}.uagb-infobox-icon-right-title .uagb-ifb-icon-wrap,.uagb-infobox-icon-right .uagb-ifb-icon-wrap{margin-left:10px;line-height:0}.uagb-infobox-icon-left .uagb-ifb-left-right-wrap,.uagb-infobox-icon-right .uagb-ifb-left-right-wrap,.uagb-infobox-icon-left-title .uagb-ifb-left-title-image,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image{display:-webkit-box;display:-ms-flexbox;display:flex}.uagb-infobox-icon-right .uagb-ifb-left-right-wrap,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image{-webkit-box-pack:end;-ms-flex-pack:end;-webkit-justify-content:flex-end;-moz-box-pack:end;justify-content:flex-end}a.uagb-infbox__link-to-all{position:absolute;top:0;left:0;z-index:3;width:100%;height:100%;box-shadow:none;text-decoration:none;-webkit-box-shadow:none}@media only screen and (max-width: 976px){.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-image-content{padding:0;margin-bottom:20px}.uagb-infobox-stacked-tablet.uagb-reverse-order-tablet.uagb-infobox__content-wrap{display:-webkit-inline-box;display:-ms-inline-flexbox;display:-webkit-inline-flex;display:-moz-inline-box;display:inline-flex;flex-direction:column-reverse;-js-display:inline-flex;-webkit-box-orient:vertical;-webkit-box-direction:reverse;-ms-flex-direction:column-reverse;-webkit-flex-direction:column-reverse;-moz-box-orient:vertical;-moz-box-direction:reverse}.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-content,.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-icon-wrap,.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-image-content{display:block;width:100%;text-align:center}.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-icon-wrap,.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-image-content{margin-right:0;margin-left:0}.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap{display:inline-block}.uagb-infobox-icon-left-title.uagb-infobox-stacked-tablet .uagb-ifb-image-content,.uagb-infobox-icon-left-title.uagb-infobox-stacked-tablet .uagb-ifb-icon-wrap,.uagb-infobox-icon-left.uagb-infobox-stacked-tablet .uagb-ifb-image-content,.uagb-infobox-icon-left.uagb-infobox-stacked-tablet .uagb-ifb-icon-wrap{margin-right:0}.uagb-infobox-icon-right-title.uagb-infobox-stacked-tablet .uagb-ifb-image-content,.uagb-infobox-icon-right-title.uagb-infobox-stacked-tablet .uagb-ifb-icon-wrap,.uagb-infobox-icon-right.uagb-infobox-stacked-tablet .uagb-ifb-image-content,.uagb-infobox-icon-right.uagb-infobox-stacked-tablet .uagb-ifb-icon-wrap{margin-left:0}.uagb-infobox-icon-left-title .uagb-ifb-separator{margin:10px 0}}@media screen and (max-width: 767px){.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap{display:inline-block}.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-image-content,.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-icon-wrap{padding:0;margin-bottom:20px;margin-right:0;margin-left:0}.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap.uagb-reverse-order-mobile{display:-webkit-inline-box;display:-ms-inline-flexbox;display:-webkit-inline-flex;display:-moz-inline-box;display:inline-flex;flex-direction:column-reverse;-js-display:inline-flex;-webkit-box-orient:vertical;-webkit-box-direction:reverse;-ms-flex-direction:column-reverse;-webkit-flex-direction:column-reverse;-moz-box-orient:vertical;-moz-box-direction:reverse}.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-image-content,.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-icon-wrap,.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-content{display:block;width:100%;text-align:center}.uagb-infobox-icon-left-title.uagb-infobox-stacked-mobile .uagb-ifb-image-content,.uagb-infobox-icon-left-title.uagb-infobox-stacked-mobile .uagb-ifb-icon-wrap,.uagb-infobox-icon-left.uagb-infobox-stacked-mobile .uagb-ifb-image-content,.uagb-infobox-icon-left.uagb-infobox-stacked-mobile .uagb-ifb-icon-wrap{margin-right:0}.uagb-infobox-icon-right-title.uagb-infobox-stacked-mobile .uagb-ifb-image-content,.uagb-infobox-icon-right-title.uagb-infobox-stacked-mobile .uagb-ifb-icon-wrap,.uagb-infobox-icon-right.uagb-infobox-stacked-mobile .uagb-ifb-image-content,.uagb-infobox-icon-right.uagb-infobox-stacked-mobile .uagb-ifb-icon-wrap{margin-left:0}.uagb-infobox-icon-left-title .uagb-ifb-separator{margin:10px 0}}.uagb-ifb-icon svg{width:inherit;height:inherit;vertical-align:middle}.uagb-ifb-button-icon{height:15px;width:15px;font-size:15px;vertical-align:middle}.uagb-ifb-button-icon svg{height:inherit;width:inherit;display:inline-block}.uagb-ifb-button-icon.uagb-ifb-align-icon-after{float:right}.uagb-ifb-cta-button{display:inline-block}.uagb-disable-link{pointer-events:none}
.uagb-buttons__outer-wrap .uagb-buttons__wrap{display:inline-flex;width:100%}.uagb-buttons__outer-wrap.uagb-btn__small-btn .uagb-buttons-repeater{padding:5px 10px}.uagb-buttons__outer-wrap.uagb-btn__medium-btn .uagb-buttons-repeater{padding:12px 24px}.uagb-buttons__outer-wrap.uagb-btn__large-btn .uagb-buttons-repeater{padding:20px 30px}.uagb-buttons__outer-wrap.uagb-btn__extralarge-btn .uagb-buttons-repeater{padding:30px 65px}@media (max-width: 976px){.uagb-buttons__outer-wrap.uagb-btn-tablet__small-btn .uagb-buttons-repeater{padding:5px 10px}.uagb-buttons__outer-wrap.uagb-btn-tablet__medium-btn .uagb-buttons-repeater{padding:12px 24px}.uagb-buttons__outer-wrap.uagb-btn-tablet__large-btn .uagb-buttons-repeater{padding:20px 30px}.uagb-buttons__outer-wrap.uagb-btn-tablet__extralarge-btn .uagb-buttons-repeater{padding:30px 65px}}@media (max-width: 767px){.uagb-buttons__outer-wrap.uagb-btn-mobile__small-btn .uagb-buttons-repeater{padding:5px 10px}.uagb-buttons__outer-wrap.uagb-btn-mobile__medium-btn .uagb-buttons-repeater{padding:12px 24px}.uagb-buttons__outer-wrap.uagb-btn-mobile__large-btn .uagb-buttons-repeater{padding:20px 30px}.uagb-buttons__outer-wrap.uagb-btn-mobile__extralarge-btn .uagb-buttons-repeater{padding:30px 65px}}
.uagb-buttons__outer-wrap .uagb-buttons-repeater{display:flex;justify-content:center;align-items:center;transition:box-shadow 0.2s ease}.uagb-buttons__outer-wrap .uagb-buttons-repeater a.uagb-button__link{display:flex;justify-content:center}.uagb-buttons__outer-wrap .uagb-buttons-repeater .uagb-button__icon{font-size:inherit;display:flex;align-items:center}.uagb-buttons__outer-wrap .uagb-buttons-repeater .uagb-button__icon svg{fill:currentColor;width:inherit;height:inherit}
.wp-block-uagb-container.uagb-is-root-container .uagb-block-03aa1b0b{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-03aa1b0b .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-03aa1b0b .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-03aa1b0b .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-03aa1b0b .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-03aa1b0b .uagb-container__video-wrap video{opacity: 0.3;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-03aa1b0b > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 72px;}.wp-block-uagb-container.uagb-block-03aa1b0b{box-shadow: 0px 0px   #00000070 ;padding-top: 112px;padding-bottom: 112px;padding-left: 40px;padding-right: 40px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 72px;overflow: visible;border-color: inherit;background-repeat: no-repeat;background-position: 50% 50%;background-size: cover;background-attachment: scroll;background-image: url(https://websitedemos.net/wp-content/uploads/2023/10/natures-01.jpg);;background-clip: padding-box;}.wp-block-uagb-container.uagb-block-03aa1b0b::before{content: "";position: absolute;pointer-events: none;top: -0px;left: -0px;width: calc(100% + 0px + 0px);height: calc(100% + 0px + 0px);border-color: inherit;background: var(--ast-global-color-7);opacity: 0.7;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-bca57f74{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-bca57f74 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-bca57f74 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-bca57f74 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-bca57f74 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-bca57f74 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-bca57f74 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: flex-start;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-bca57f74{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: flex-start;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-e4e64def .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-e4e64def .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-e4e64def .uagb-ifb-icon svg{fill: #333;}.uagb-block-e4e64def.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-e4e64def .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-e4e64def .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-e4e64def.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-e4e64def.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-e4e64def .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-e4e64def .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-e4e64def .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-e4e64def .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-e4e64def.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-e4e64def.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-e4e64def.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-e4e64def.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-e4e64def .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-e4e64def.wp-block-uagb-info-box .uagb-ifb-title{color: #ffffff;margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-e4e64def.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 20px;}.uagb-block-e4e64def .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-e4e64def .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-e4e64def .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-e4e64def .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-e4e64def.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-e4e64def.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-e4e64def .uagb-infobox__content-wrap{text-align: left;}.uagb-block-e4e64def.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-e4e64def.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-e4e64def .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-e4e64def.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-e4e64def .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-e4e64def .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-e4e64def.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-7d0698a7{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-7d0698a7 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-7d0698a7 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-7d0698a7 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-7d0698a7 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-7d0698a7 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-7d0698a7 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: flex-start;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-7d0698a7{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: flex-start;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-f29ad988 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-f29ad988 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-f29ad988 .uagb-ifb-icon svg{fill: #333;}.uagb-block-f29ad988.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-f29ad988 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-f29ad988 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-f29ad988.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-f29ad988.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-f29ad988 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-f29ad988 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-f29ad988 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-f29ad988 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-f29ad988.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-f29ad988.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-f29ad988.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-f29ad988.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-f29ad988 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-f29ad988.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-f29ad988.wp-block-uagb-info-box .uagb-ifb-desc{color: #ffffff;margin-bottom: 40px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-f29ad988 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-f29ad988 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-f29ad988 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-f29ad988 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-f29ad988.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-f29ad988.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-f29ad988 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-f29ad988.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-f29ad988.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-f29ad988 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-f29ad988.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-f29ad988 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-f29ad988 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-f29ad988.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-a2490583.wp-block-uagb-buttons.uagb-buttons__outer-wrap .uagb-buttons__wrap {column-gap: 10px;}.uagb-block-a2490583.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.uagb-block-a2490583 .uagb-button__wrapper{margin-top: 0px;margin-bottom: 0px;margin-left: 0px;margin-right: 0px;}.wp-block-uagb-buttons .uagb-block-2c1e865e.wp-block-uagb-buttons-child .uagb-buttons-repeater{background: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-2c1e865e .wp-block-button__link{background: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-2c1e865e .wp-block-button__link:hover{background: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-2c1e865e .wp-block-button__link:focus{background: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-2c1e865e .uagb-button__wrapper .uagb-buttons-repeater{color: #ffffff;margin-top: 0px;margin-bottom: 0px;margin-left: 0px;margin-right: 0px;}.wp-block-uagb-buttons .uagb-block-2c1e865e .wp-block-button__link.has-text-color:hover .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-2c1e865e .wp-block-button__link.has-text-color:focus .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-2c1e865e .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-2c1e865e .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link:hover{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-2c1e865e .uagb-buttons-repeater.wp-block-button__link{border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-color: #333;border-style: none;}.wp-block-uagb-buttons .uagb-block-2c1e865e .uagb-buttons-repeater.wp-block-button__link:hover{border-color: #333;}.wp-block-uagb-buttons .uagb-block-2c1e865e .uagb-buttons-repeater.wp-block-button__link:focus{border-color: #333;}.wp-block-uagb-buttons .uagb-block-2c1e865e.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-color: #333;border-style: none;}.wp-block-uagb-buttons .uagb-block-2c1e865e.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater:hover{border-color: #333;}.wp-block-uagb-buttons .uagb-block-2c1e865e .uagb-buttons-repeater .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-2c1e865e .uagb-buttons-repeater:hover .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-2c1e865e .uagb-buttons-repeater:focus .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-2c1e865e .uagb-buttons-repeater .uagb-button__icon > svg{width: 15px;height: 15px;fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-2c1e865e .uagb-buttons-repeater:hover .uagb-button__icon > svg{fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-2c1e865e .uagb-buttons-repeater:focus .uagb-button__icon > svg{fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-2c1e865e .uagb-buttons-repeater .uagb-button__icon-position-after{margin-left: 8px;}.wp-block-uagb-buttons .uagb-block-2c1e865e .uagb-buttons-repeater .uagb-button__icon-position-before{margin-right: 8px;}.wp-block-uagb-buttons .uagb-block-2c1e865e .uagb-button__link{text-transform: normal;text-decoration: none;}@media only screen and (max-width: 976px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-03aa1b0b{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-03aa1b0b > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: flex-start;justify-content: flex-start;row-gap: 0px;column-gap: 40px;}.wp-block-uagb-container.uagb-block-03aa1b0b{padding-top: 80px;padding-bottom: 80px;padding-left: 32px;padding-right: 32px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 40px;background-clip: padding-box;}.wp-block-uagb-container.uagb-block-03aa1b0b::before{top: -0px;left: -0px;width: calc(100% + 0px + 0px);height: calc(100% + 0px + 0px);}.wp-block-uagb-container.uagb-block-03aa1b0b.wp-block-uagb-container > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-uagb-image ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not( .spectra-container-link-overlay ):not(.spectra-image-gallery__control-lightbox):not(.wp-block-uagb-lottie):not(.uagb-container-inner-blocks-wrap){width: 100%;}.wp-block-uagb-container.uagb-block-03aa1b0b.wp-block-uagb-container > .uagb-container-inner-blocks-wrap > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not(.spectra-image-gallery__control-lightbox){width: 100%;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-bca57f74{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-bca57f74 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-bca57f74{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;}.uagb-block-e4e64def.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-e4e64def.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-e4e64def.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-e4e64def.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-e4e64def .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-e4e64def .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-e4e64def .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-e4e64def .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-e4e64def .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-e4e64def.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-e4e64def .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-e4e64def.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-e4e64def .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-e4e64def .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-e4e64def.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-7d0698a7{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-7d0698a7 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-7d0698a7{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;}.uagb-block-f29ad988.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 32px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-f29ad988.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-f29ad988.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-f29ad988.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-f29ad988 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-f29ad988 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-f29ad988 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-f29ad988 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-f29ad988 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-f29ad988.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-f29ad988.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-f29ad988 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-f29ad988.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-f29ad988 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-f29ad988 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-f29ad988.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-a2490583.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-2c1e865e.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-style: none;border-color: #333;}}@media only screen and (max-width: 767px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-03aa1b0b{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-03aa1b0b > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-03aa1b0b{padding-top: 64px;padding-bottom: 64px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;background-clip: padding-box;}.wp-block-uagb-container.uagb-block-03aa1b0b::before{top: -0px;left: -0px;width: calc(100% + 0px + 0px);height: calc(100% + 0px + 0px);}.wp-block-uagb-container.uagb-is-root-container .uagb-block-bca57f74{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-bca57f74 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-bca57f74{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;flex-wrap: wrap;}.uagb-block-e4e64def.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 24px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-e4e64def.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-e4e64def.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-e4e64def .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-e4e64def .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-e4e64def.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-e4e64def .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-e4e64def .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-e4e64def .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-e4e64def.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-e4e64def.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-e4e64def .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-e4e64def.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-e4e64def .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-e4e64def .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-e4e64def.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-7d0698a7{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-7d0698a7 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-7d0698a7{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;flex-wrap: wrap;}.uagb-block-f29ad988.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 32px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-f29ad988.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-f29ad988.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-f29ad988 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-f29ad988 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-f29ad988.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-f29ad988 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-f29ad988 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-f29ad988 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-f29ad988.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-f29ad988 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-f29ad988.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-f29ad988 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-f29ad988 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-f29ad988.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-a2490583.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-2c1e865e.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-style: none;border-color: #333;}}";s:7:"content";s:1585:"
<div class="wp-block-uagb-container uagb-block-03aa1b0b alignfull uagb-is-root-container"><div class="uagb-container-inner-blocks-wrap">
<div class="wp-block-uagb-container uagb-block-bca57f74">
<div class="wp-block-uagb-info-box uagb-block-e4e64def uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h2 class="uagb-ifb-title">Unlock your potential and transform your life today!</h2></div></div></div>
</div>



<div class="wp-block-uagb-container uagb-block-7d0698a7">
<div class="wp-block-uagb-info-box uagb-block-f29ad988 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"></div><p class="uagb-ifb-desc">Don't wait any longer. Take action today and embark on an exciting journey to achieve your goals. Let us guide you through the process and help you unleash your true potential.</p></div></div>



<div class="wp-block-uagb-buttons uagb-buttons__outer-wrap uagb-btn__default-btn uagb-btn-tablet__default-btn uagb-btn-mobile__default-btn uagb-block-a2490583"><div class="uagb-buttons__wrap uagb-buttons-layout-wrap">
<div class="wp-block-uagb-buttons-child uagb-buttons__outer-wrap uagb-block-2c1e865e wp-block-button"><div class="uagb-button__wrapper"><a class="uagb-buttons-repeater wp-block-button__link" href="#" onclick="return false;" rel="follow noopener" target="_self"><div class="uagb-button__link">Get Started</div></a></div></div>
</div></div>
</div>
</div></div>
";}s:8:"id-75699";a:10:{s:5:"title";s:17:"Call To Action 06";s:3:"url";s:56:"https://websitedemos.net/astra-blocks/call-to-action-06/";s:3:"tag";a:0:{}s:8:"category";i:832;s:16:"primary-category";s:0:"";s:4:"type";s:5:"block";s:12:"page-builder";s:9:"gutenberg";s:16:"required-plugins";a:0:{}s:10:"stylesheet";s:45252:".wp-block-uagb-container{display:flex;position:relative;box-sizing:border-box;transition-property:box-shadow;transition-duration:0.2s;transition-timing-function:ease}.wp-block-uagb-container .spectra-container-link-overlay{bottom:0;left:0;position:absolute;right:0;top:0;z-index:10}.wp-block-uagb-container.uagb-is-root-container{margin-left:auto;margin-right:auto}.wp-block-uagb-container.alignfull.uagb-is-root-container .uagb-container-inner-blocks-wrap{display:flex;position:relative;box-sizing:border-box;margin-left:auto !important;margin-right:auto !important}.wp-block-uagb-container .uagb-container__video-wrap{height:100%;width:100%;top:0;left:0;position:absolute;overflow:hidden;-webkit-transition:opacity 1s;-o-transition:opacity 1s;transition:opacity 1s}.wp-block-uagb-container .uagb-container__video-wrap video{max-width:100%;width:100%;height:100%;margin:0;line-height:1;border:none;display:inline-block;vertical-align:baseline;-o-object-fit:cover;object-fit:cover;background-size:cover}.st-block-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap>*:not(.wp-block-uagb-container):not(.wp-block-uagb-column):not(.wp-block-uagb-container):not(.wp-block-uagb-section):not(.uagb-container__shape):not(.uagb-container__video-wrap):not(.wp-block-spectra-pro-register):not(.wp-block-spectra-pro-login):not(.uagb-slider-container):not(.spectra-image-gallery__control-lightbox),.st-block-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap,.st-block-container .wp-block-uagb-container>*:not(.wp-block-uagb-container):not(.wp-block-uagb-column):not(.wp-block-uagb-container):not(.wp-block-uagb-section):not(.uagb-container__shape):not(.uagb-container__video-wrap):not(.wp-block-uagb-image):not(.wp-block-spectra-pro-register):not(.wp-block-spectra-pro-login):not(.uagb-slider-container):not(.spectra-container-link-overlay):not(.spectra-image-gallery__control-lightbox):not(.wp-block-uagb-lottie):not(.uagb-faq__outer-wrap){min-width:unset !important;width:100%;position:relative}.st-block-container .ast-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap>.wp-block-uagb-container>ul,.st-block-container .ast-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap>.wp-block-uagb-container ol,.st-block-container .ast-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap>ul,.st-block-container .ast-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap ol{max-width:-webkit-fill-available;margin-block-start:0;margin-block-end:0;margin-left:20px}.ast-plain-container .editor-styles-wrapper .block-editor-block-list__layout.is-root-container .uagb-is-root-container.wp-block-uagb-container.alignwide{margin-left:auto;margin-right:auto}.uagb-container__shape{overflow:hidden;position:absolute;left:0;width:100%;line-height:0;direction:ltr}.uagb-container__shape-top{top:-3px}.uagb-container__shape-bottom{bottom:-3px}.uagb-container__shape.uagb-container__invert.uagb-container__shape-bottom,.uagb-container__shape.uagb-container__invert.uagb-container__shape-top{-webkit-transform:rotate(180deg);-ms-transform:rotate(180deg);transform:rotate(180deg)}.uagb-container__shape.uagb-container__shape-flip svg{transform:translateX(-50%) rotateY(180deg)}.uagb-container__shape svg{display:block;width:-webkit-calc(100% + 1.3px);width:calc(100% + 1.3px);position:relative;left:50%;-webkit-transform:translateX(-50%);-ms-transform:translateX(-50%);transform:translateX(-50%)}.uagb-container__shape .uagb-container__shape-fill{-webkit-transform-origin:center;-ms-transform-origin:center;transform-origin:center;-webkit-transform:rotateY(0deg);transform:rotateY(0deg)}.uagb-container__shape.uagb-container__shape-above-content{z-index:9;pointer-events:none}.nv-single-page-wrap .nv-content-wrap.entry-content .wp-block-uagb-container.alignfull{margin-left:calc(50% - 50vw);margin-right:calc(50% - 50vw)}@media only screen and (max-width: 767px){.wp-block-uagb-container .wp-block-uagb-advanced-heading{width:-webkit-fill-available !important}}
.uagb-ifb-content>svg *{-webkit-transition:all 0.2s;-o-transition:all 0.2s;transition:all 0.2s}.uagb-ifb-content>svg,.uagb-ifb-content{display:inline-block}.uagb-ifb-content>svg{vertical-align:middle;width:inherit;height:inherit;font-style:initial}.uagb-ifb-content .uagb-ifb-icon-wrap svg{box-sizing:content-box;width:inherit;height:inherit}.uagb-ifb-button-wrapper:empty{display:none}div.uagb-ifb-button-wrapper a.uagb-infobox-cta-link,div.uagb-ifb-cta a.uagb-infobox-cta-link,.entry .entry-content a.uagb-infobox-cta-link,a.uagb-infobox-link-wrap,.entry .entry-content a.uagb-infobox-link-wrap{text-decoration:none;align-items:center}.uagb-infobox-icon-left-title.uagb-infobox-image-valign-middle .uagb-ifb-title-wrap,.uagb-infobox-icon-right-title.uagb-infobox-image-valign-middle .uagb-ifb-title-wrap,.uagb-infobox-image-valign-middle .uagb-ifb-icon-wrap,.uagb-infobox-image-valign-middle .uagb-ifb-image-content,.uagb-infobox-icon-left.uagb-infobox-image-valign-middle .uagb-ifb-content,.uagb-infobox-icon-right.uagb-infobox-image-valign-middle .uagb-ifb-content{-ms-flex-item-align:center;-webkit-align-self:center;align-self:center}.uagb-infobox-icon-left-title.uagb-infobox-image-valign-top .uagb-ifb-title-wrap,.uagb-infobox-icon-right-title.uagb-infobox-image-valign-top .uagb-ifb-title-wrap,.uagb-infobox-image-valign-top .uagb-ifb-icon-wrap,.uagb-infobox-image-valign-top .uagb-ifb-image-content,.uagb-infobox-icon-left.uagb-infobox-image-valign-top .uagb-ifb-content,.uagb-infobox-icon-right.uagb-infobox-image-valign-top .uagb-ifb-content{-webkit-align-self:self-start;align-self:self-start}.uagb-infobox-left{justify-content:flex-start;text-align:left;-webkit-box-pack:start;-ms-flex-pack:start;-webkit-justify-content:flex-start;-moz-box-pack:start}.uagb-infobox-center{justify-content:center;text-align:center;-webkit-box-pack:center;-ms-flex-pack:center;-webkit-justify-content:center;-moz-box-pack:center}.uagb-infobox-right{justify-content:flex-end;text-align:right;-webkit-box-pack:end;-ms-flex-pack:end;-webkit-justify-content:flex-end;-moz-box-pack:end}.uagb-infobox-icon-above-title.uagb-infobox__content-wrap,.uagb-infobox-icon-below-title.uagb-infobox__content-wrap{display:block;width:100%}.uagb-infobox-icon-left-title .uagb-ifb-content>svg,.uagb-infobox-icon-left .uagb-ifb-content>svg{margin-right:10px}.uagb-infobox-icon-right-title .uagb-ifb-content>svg,.uagb-infobox-icon-right .uagb-ifb-content>svg{margin-left:10px}.uagb-infobox-icon-left.uagb-infobox__content-wrap,.uagb-infobox-icon-right.uagb-infobox__content-wrap,.uagb-infobox-icon-left-title .uagb-ifb-left-title-image,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image{display:-webkit-box;display:-ms-flexbox;display:-webkit-flex;display:-moz-box;display:flex;-js-display:flex}.uagb-infobox-icon-left-title .uagb-ifb-left-title-image .uagb-ifb-image-content,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image .uagb-ifb-image-content,.uagb-infobox-icon-left .uagb-ifb-image-content,.uagb-infobox-icon-right .uagb-ifb-image-content{flex-shrink:0;line-height:0}.uagb-infobox-icon-left-title .uagb-ifb-left-title-image .uagb-ifb-title-wrap,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image .uagb-ifb-title-wrap,.uagb-infobox-icon-left .uagb-ifb-content,.uagb-infobox-icon-right .uagb-ifb-content{flex-grow:1}.uagb-infobox-icon-right.uagb-infobox__content-wrap,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image{-webkit-box-pack:end;-ms-flex-pack:end;-webkit-justify-content:flex-end;-moz-box-pack:end;justify-content:flex-end}.uagb-ifb-content img{position:relative;display:inline-block;line-height:0;width:auto;height:auto !important;max-width:100%;border-radius:inherit;-webkit-box-sizing:content-box;-moz-box-sizing:content-box;-webkit-border-radius:inherit}.uagb-infobox-module-link{position:absolute;top:0;right:0;bottom:0;left:0;z-index:4;width:100%;height:100%}.uagb-edit-mode .uagb-infobox-module-link{z-index:2}.uagb-infobox-link-icon-after{margin-right:0;margin-left:5px}.uagb-infobox-link-icon-before{margin-right:5px;margin-left:0}.uagb-infobox-link-icon{-webkit-transition:all 200ms linear;transition:all 200ms linear}.uagb-infobox__content-wrap{box-sizing:border-box;position:relative;width:100%;word-break:break-word;z-index:1}.uagb-ifb-separator{display:inline-block;margin:0;border-top-color:#333;border-top-style:solid;border-top-width:2px;line-height:0}.uagb-ifb-button-wrapper{line-height:1}.uagb-ifb-button-wrapper.uagb-ifb-button-type-text .uagb-infobox-cta-link.wp-block-button__link{background-color:unset;border:none}.uagb-ifb-button-wrapper.uagb-ifb-button-type-text .uagb-infobox-cta-link.wp-block-button__link:hover{background-color:unset;border-color:unset}.uagb-ifb-button-wrapper .uagb-infobox-cta-link{cursor:pointer}.uagb-ifb-button-wrapper .wp-block-button__link svg{fill:currentColor}.uagb-infobox__content-wrap a{-webkit-box-shadow:none;box-shadow:none;text-decoration:none}.uagb-ifb-title-wrap{width:100%}.uagb-ifb-title{margin-block-start:0}.uagb-ifb-title-wrap .uagb-ifb-title-prefix{display:block;padding:0;margin:0}.uagb-infobox__content-wrap.uagb-infobox__content-wrap{position:relative}.uagb-ifb-content{width:100%}.uagb-infobox__content-wrap.uagb-infobox,.uagb-ifb-content,.uagb-ifb-title-wrap,.uagb-ifb-title-prefix *,svg.dashicon.dashicons-upload{z-index:1}a.uagb-infobox-link-wrap{color:inherit}.uagb-ifb-content p:empty{display:none}.uagb-infobox__content-wrap .uagb-ifb-content img{display:inline-block;max-width:100%}.uagb-infobox__content-wrap .uagb-ifb-content svg{display:inline-block}.uagb-infobox__content-wrap .uagb-ifb-icon-wrap,.uagb-infobox-icon-left .uagb-ifb-image-content,.uagb-infobox-icon-right .uagb-ifb-image-content{box-sizing:content-box}.uagb-infobox-cta-link>svg{vertical-align:middle;width:15px;height:15px;font-size:15px}.uagb-infobox-cta-link{display:inline-flex}.block-editor-page #wpwrap .uagb-infobox-cta-link svg,.uagb-infobox-cta-link svg{font-style:normal}.uagb-infobox-icon-left-title .uagb-ifb-icon-wrap,.uagb-infobox-icon-left .uagb-ifb-icon-wrap{margin-right:10px;line-height:0}.uagb-infobox-icon-right-title .uagb-ifb-icon-wrap,.uagb-infobox-icon-right .uagb-ifb-icon-wrap{margin-left:10px;line-height:0}.uagb-infobox-icon-left .uagb-ifb-left-right-wrap,.uagb-infobox-icon-right .uagb-ifb-left-right-wrap,.uagb-infobox-icon-left-title .uagb-ifb-left-title-image,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image{display:-webkit-box;display:-ms-flexbox;display:flex}.uagb-infobox-icon-right .uagb-ifb-left-right-wrap,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image{-webkit-box-pack:end;-ms-flex-pack:end;-webkit-justify-content:flex-end;-moz-box-pack:end;justify-content:flex-end}a.uagb-infbox__link-to-all{position:absolute;top:0;left:0;z-index:3;width:100%;height:100%;box-shadow:none;text-decoration:none;-webkit-box-shadow:none}@media only screen and (max-width: 976px){.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-image-content{padding:0;margin-bottom:20px}.uagb-infobox-stacked-tablet.uagb-reverse-order-tablet.uagb-infobox__content-wrap{display:-webkit-inline-box;display:-ms-inline-flexbox;display:-webkit-inline-flex;display:-moz-inline-box;display:inline-flex;flex-direction:column-reverse;-js-display:inline-flex;-webkit-box-orient:vertical;-webkit-box-direction:reverse;-ms-flex-direction:column-reverse;-webkit-flex-direction:column-reverse;-moz-box-orient:vertical;-moz-box-direction:reverse}.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-content,.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-icon-wrap,.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-image-content{display:block;width:100%;text-align:center}.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-icon-wrap,.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-image-content{margin-right:0;margin-left:0}.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap{display:inline-block}.uagb-infobox-icon-left-title.uagb-infobox-stacked-tablet .uagb-ifb-image-content,.uagb-infobox-icon-left-title.uagb-infobox-stacked-tablet .uagb-ifb-icon-wrap,.uagb-infobox-icon-left.uagb-infobox-stacked-tablet .uagb-ifb-image-content,.uagb-infobox-icon-left.uagb-infobox-stacked-tablet .uagb-ifb-icon-wrap{margin-right:0}.uagb-infobox-icon-right-title.uagb-infobox-stacked-tablet .uagb-ifb-image-content,.uagb-infobox-icon-right-title.uagb-infobox-stacked-tablet .uagb-ifb-icon-wrap,.uagb-infobox-icon-right.uagb-infobox-stacked-tablet .uagb-ifb-image-content,.uagb-infobox-icon-right.uagb-infobox-stacked-tablet .uagb-ifb-icon-wrap{margin-left:0}.uagb-infobox-icon-left-title .uagb-ifb-separator{margin:10px 0}}@media screen and (max-width: 767px){.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap{display:inline-block}.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-image-content,.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-icon-wrap{padding:0;margin-bottom:20px;margin-right:0;margin-left:0}.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap.uagb-reverse-order-mobile{display:-webkit-inline-box;display:-ms-inline-flexbox;display:-webkit-inline-flex;display:-moz-inline-box;display:inline-flex;flex-direction:column-reverse;-js-display:inline-flex;-webkit-box-orient:vertical;-webkit-box-direction:reverse;-ms-flex-direction:column-reverse;-webkit-flex-direction:column-reverse;-moz-box-orient:vertical;-moz-box-direction:reverse}.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-image-content,.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-icon-wrap,.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-content{display:block;width:100%;text-align:center}.uagb-infobox-icon-left-title.uagb-infobox-stacked-mobile .uagb-ifb-image-content,.uagb-infobox-icon-left-title.uagb-infobox-stacked-mobile .uagb-ifb-icon-wrap,.uagb-infobox-icon-left.uagb-infobox-stacked-mobile .uagb-ifb-image-content,.uagb-infobox-icon-left.uagb-infobox-stacked-mobile .uagb-ifb-icon-wrap{margin-right:0}.uagb-infobox-icon-right-title.uagb-infobox-stacked-mobile .uagb-ifb-image-content,.uagb-infobox-icon-right-title.uagb-infobox-stacked-mobile .uagb-ifb-icon-wrap,.uagb-infobox-icon-right.uagb-infobox-stacked-mobile .uagb-ifb-image-content,.uagb-infobox-icon-right.uagb-infobox-stacked-mobile .uagb-ifb-icon-wrap{margin-left:0}.uagb-infobox-icon-left-title .uagb-ifb-separator{margin:10px 0}}.uagb-ifb-icon svg{width:inherit;height:inherit;vertical-align:middle}.uagb-ifb-button-icon{height:15px;width:15px;font-size:15px;vertical-align:middle}.uagb-ifb-button-icon svg{height:inherit;width:inherit;display:inline-block}.uagb-ifb-button-icon.uagb-ifb-align-icon-after{float:right}.uagb-ifb-cta-button{display:inline-block}.uagb-disable-link{pointer-events:none}
.uagb-buttons__outer-wrap .uagb-buttons__wrap{display:inline-flex;width:100%}.uagb-buttons__outer-wrap.uagb-btn__small-btn .uagb-buttons-repeater{padding:5px 10px}.uagb-buttons__outer-wrap.uagb-btn__medium-btn .uagb-buttons-repeater{padding:12px 24px}.uagb-buttons__outer-wrap.uagb-btn__large-btn .uagb-buttons-repeater{padding:20px 30px}.uagb-buttons__outer-wrap.uagb-btn__extralarge-btn .uagb-buttons-repeater{padding:30px 65px}@media (max-width: 976px){.uagb-buttons__outer-wrap.uagb-btn-tablet__small-btn .uagb-buttons-repeater{padding:5px 10px}.uagb-buttons__outer-wrap.uagb-btn-tablet__medium-btn .uagb-buttons-repeater{padding:12px 24px}.uagb-buttons__outer-wrap.uagb-btn-tablet__large-btn .uagb-buttons-repeater{padding:20px 30px}.uagb-buttons__outer-wrap.uagb-btn-tablet__extralarge-btn .uagb-buttons-repeater{padding:30px 65px}}@media (max-width: 767px){.uagb-buttons__outer-wrap.uagb-btn-mobile__small-btn .uagb-buttons-repeater{padding:5px 10px}.uagb-buttons__outer-wrap.uagb-btn-mobile__medium-btn .uagb-buttons-repeater{padding:12px 24px}.uagb-buttons__outer-wrap.uagb-btn-mobile__large-btn .uagb-buttons-repeater{padding:20px 30px}.uagb-buttons__outer-wrap.uagb-btn-mobile__extralarge-btn .uagb-buttons-repeater{padding:30px 65px}}
.uagb-buttons__outer-wrap .uagb-buttons-repeater{display:flex;justify-content:center;align-items:center;transition:box-shadow 0.2s ease}.uagb-buttons__outer-wrap .uagb-buttons-repeater a.uagb-button__link{display:flex;justify-content:center}.uagb-buttons__outer-wrap .uagb-buttons-repeater .uagb-button__icon{font-size:inherit;display:flex;align-items:center}.uagb-buttons__outer-wrap .uagb-buttons-repeater .uagb-button__icon svg{fill:currentColor;width:inherit;height:inherit}
.wp-block-uagb-container.uagb-is-root-container .uagb-block-3e55f029{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-3e55f029 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-3e55f029 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-3e55f029 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-3e55f029 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-3e55f029 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-3e55f029 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 48px;}.wp-block-uagb-container.uagb-block-3e55f029{box-shadow: 0px 0px   #00000070 ;padding-top: 112px;padding-bottom: 112px;padding-left: 40px;padding-right: 40px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 48px;overflow: visible;border-style: none;border-color: inherit;background-color: var(--ast-global-color-4);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-77ebfeea{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-block-77ebfeea .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-77ebfeea .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-77ebfeea .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-77ebfeea .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-77ebfeea .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-77ebfeea > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-77ebfeea{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-21a1db5c .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-21a1db5c .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-21a1db5c .uagb-ifb-icon svg{fill: #333;}.uagb-block-21a1db5c.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-21a1db5c .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-21a1db5c .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-21a1db5c.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-21a1db5c.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-21a1db5c .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-21a1db5c .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-21a1db5c .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-21a1db5c .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-21a1db5c.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-21a1db5c.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-21a1db5c.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-21a1db5c.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-21a1db5c .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-21a1db5c.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-21a1db5c.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 20px;}.uagb-block-21a1db5c .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-21a1db5c .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-21a1db5c .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-21a1db5c .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-21a1db5c.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-21a1db5c.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-21a1db5c .uagb-infobox__content-wrap{text-align: left;}.uagb-block-21a1db5c.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-21a1db5c.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-21a1db5c .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-21a1db5c.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-21a1db5c .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-21a1db5c .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-21a1db5c.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-0fadaa1d{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-block-0fadaa1d .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-0fadaa1d .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-0fadaa1d .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-0fadaa1d .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-0fadaa1d .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-0fadaa1d > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: flex-start;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-0fadaa1d{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: flex-start;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-c9d84d1d .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-c9d84d1d .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-c9d84d1d .uagb-ifb-icon svg{fill: #333;}.uagb-block-c9d84d1d.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-c9d84d1d .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-c9d84d1d .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-c9d84d1d.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-c9d84d1d.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-c9d84d1d .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-c9d84d1d .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-c9d84d1d .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-c9d84d1d .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-c9d84d1d.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-c9d84d1d.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-c9d84d1d.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-c9d84d1d.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-c9d84d1d .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-c9d84d1d.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 10px;}.uagb-block-c9d84d1d.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 32px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-c9d84d1d .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-c9d84d1d .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-c9d84d1d .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-c9d84d1d .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-c9d84d1d.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-c9d84d1d.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-c9d84d1d .uagb-infobox__content-wrap{text-align: left;}.uagb-block-c9d84d1d.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-c9d84d1d.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-c9d84d1d .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-c9d84d1d.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-c9d84d1d .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-c9d84d1d .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-c9d84d1d.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-a3dd5555.wp-block-uagb-buttons.uagb-buttons__outer-wrap .uagb-buttons__wrap {column-gap: 10px;}.uagb-block-a3dd5555.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.uagb-block-a3dd5555 .uagb-button__wrapper{margin-top: 0px;margin-bottom: 0px;margin-left: 0px;margin-right: 0px;}.wp-block-uagb-buttons .uagb-block-e3b79dde.wp-block-uagb-buttons-child .uagb-buttons-repeater{background: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-e3b79dde .wp-block-button__link{background: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-e3b79dde .wp-block-button__link:hover{background: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-e3b79dde .wp-block-button__link:focus{background: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-e3b79dde .uagb-button__wrapper .uagb-buttons-repeater{color: #ffffff;margin-top: 0px;margin-bottom: 0px;margin-left: 0px;margin-right: 0px;}.wp-block-uagb-buttons .uagb-block-e3b79dde .wp-block-button__link.has-text-color:hover .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-e3b79dde .wp-block-button__link.has-text-color:focus .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-e3b79dde .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-e3b79dde .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link:hover{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-e3b79dde .uagb-buttons-repeater.wp-block-button__link{border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-color: #333;border-style: none;}.wp-block-uagb-buttons .uagb-block-e3b79dde .uagb-buttons-repeater.wp-block-button__link:hover{border-color: #333;}.wp-block-uagb-buttons .uagb-block-e3b79dde .uagb-buttons-repeater.wp-block-button__link:focus{border-color: #333;}.wp-block-uagb-buttons .uagb-block-e3b79dde.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-color: #333;border-style: none;}.wp-block-uagb-buttons .uagb-block-e3b79dde.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater:hover{border-color: #333;}.wp-block-uagb-buttons .uagb-block-e3b79dde .uagb-buttons-repeater .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-e3b79dde .uagb-buttons-repeater:hover .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-e3b79dde .uagb-buttons-repeater:focus .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-e3b79dde .uagb-buttons-repeater .uagb-button__icon > svg{width: 15px;height: 15px;fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-e3b79dde .uagb-buttons-repeater:hover .uagb-button__icon > svg{fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-e3b79dde .uagb-buttons-repeater:focus .uagb-button__icon > svg{fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-e3b79dde .uagb-buttons-repeater .uagb-button__icon-position-after{margin-left: 8px;}.wp-block-uagb-buttons .uagb-block-e3b79dde .uagb-buttons-repeater .uagb-button__icon-position-before{margin-right: 8px;}.wp-block-uagb-buttons .uagb-block-e3b79dde .uagb-button__link{text-transform: normal;text-decoration: none;}@media only screen and (max-width: 976px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-3e55f029{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-3e55f029 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: flex-start;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 48px;}.wp-block-uagb-container.uagb-block-3e55f029{padding-top: 80px;padding-bottom: 80px;padding-left: 32px;padding-right: 32px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 48px;border-style: none;background-color: var(--ast-global-color-4);;}.wp-block-uagb-container.uagb-block-3e55f029.wp-block-uagb-container > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-uagb-image ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not( .spectra-container-link-overlay ):not(.spectra-image-gallery__control-lightbox):not(.wp-block-uagb-lottie):not(.uagb-container-inner-blocks-wrap){width: 100%;}.wp-block-uagb-container.uagb-block-3e55f029.wp-block-uagb-container > .uagb-container-inner-blocks-wrap > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not(.spectra-image-gallery__control-lightbox){width: 100%;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-77ebfeea{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-77ebfeea > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-77ebfeea{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;}.uagb-block-21a1db5c.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-21a1db5c.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-21a1db5c.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-21a1db5c.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-21a1db5c .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-21a1db5c .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-21a1db5c .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-21a1db5c .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-21a1db5c .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-21a1db5c.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-21a1db5c.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-21a1db5c .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-21a1db5c.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-21a1db5c .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-21a1db5c .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-21a1db5c.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-0fadaa1d{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-0fadaa1d > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-0fadaa1d{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;}.uagb-block-c9d84d1d.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 32px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-c9d84d1d.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-c9d84d1d.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-c9d84d1d.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-c9d84d1d .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-c9d84d1d .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-c9d84d1d .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-c9d84d1d .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-c9d84d1d .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-c9d84d1d.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-c9d84d1d.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-c9d84d1d .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-c9d84d1d.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-c9d84d1d .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-c9d84d1d .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-c9d84d1d.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-a3dd5555.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-e3b79dde.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-style: none;border-color: #333;}}@media only screen and (max-width: 767px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-3e55f029{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-3e55f029 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: flex-start;justify-content: flex-start;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-3e55f029{padding-top: 64px;padding-bottom: 64px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;border-style: none;background-color: var(--ast-global-color-4);;}.wp-block-uagb-container.uagb-block-3e55f029.wp-block-uagb-container > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-uagb-image ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not( .spectra-container-link-overlay ):not(.spectra-image-gallery__control-lightbox):not(.wp-block-uagb-lottie):not(.uagb-container-inner-blocks-wrap){width: 100%;}.wp-block-uagb-container.uagb-block-3e55f029.wp-block-uagb-container > .uagb-container-inner-blocks-wrap > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not(.spectra-image-gallery__control-lightbox){width: 100%;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-77ebfeea{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-77ebfeea > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-77ebfeea{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;flex-wrap: wrap;}.uagb-block-21a1db5c.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 28px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-21a1db5c.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-21a1db5c.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-21a1db5c .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-21a1db5c .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-21a1db5c.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-21a1db5c .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-21a1db5c .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-21a1db5c .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-21a1db5c.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-21a1db5c.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-21a1db5c .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-21a1db5c.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-21a1db5c .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-21a1db5c .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-21a1db5c.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-0fadaa1d{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-0fadaa1d > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-0fadaa1d{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;flex-wrap: wrap;}.uagb-block-c9d84d1d.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 32px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-c9d84d1d.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-c9d84d1d.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-c9d84d1d .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-c9d84d1d .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-c9d84d1d.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-c9d84d1d .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-c9d84d1d .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-c9d84d1d .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-c9d84d1d.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-c9d84d1d.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-c9d84d1d .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-c9d84d1d.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-c9d84d1d .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-c9d84d1d .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-c9d84d1d.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-a3dd5555.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-e3b79dde.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-style: none;border-color: #333;}}";s:7:"content";s:1585:"
<div class="wp-block-uagb-container uagb-block-3e55f029 alignfull uagb-is-root-container"><div class="uagb-container-inner-blocks-wrap">
<div class="wp-block-uagb-container uagb-block-77ebfeea">
<div class="wp-block-uagb-info-box uagb-block-21a1db5c uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h2 class="uagb-ifb-title">Unlock your potential and transform your life today!</h2></div></div></div>
</div>



<div class="wp-block-uagb-container uagb-block-0fadaa1d">
<div class="wp-block-uagb-info-box uagb-block-c9d84d1d uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"></div><p class="uagb-ifb-desc">Don't wait any longer. Take action today and embark on an exciting journey to achieve your goals. Let us guide you through the process and help you unleash your true potential.</p></div></div>



<div class="wp-block-uagb-buttons uagb-buttons__outer-wrap uagb-btn__default-btn uagb-btn-tablet__default-btn uagb-btn-mobile__default-btn uagb-block-a3dd5555"><div class="uagb-buttons__wrap uagb-buttons-layout-wrap">
<div class="wp-block-uagb-buttons-child uagb-buttons__outer-wrap uagb-block-e3b79dde wp-block-button"><div class="uagb-button__wrapper"><a class="uagb-buttons-repeater wp-block-button__link" href="#" onclick="return false;" rel="follow noopener" target="_self"><div class="uagb-button__link">Get Started</div></a></div></div>
</div></div>
</div>
</div></div>
";}s:8:"id-75732";a:10:{s:5:"title";s:17:"Call To Action 07";s:3:"url";s:56:"https://websitedemos.net/astra-blocks/call-to-action-07/";s:3:"tag";a:0:{}s:8:"category";i:832;s:16:"primary-category";s:0:"";s:4:"type";s:5:"block";s:12:"page-builder";s:9:"gutenberg";s:16:"required-plugins";a:0:{}s:10:"stylesheet";s:52582:".wp-block-uagb-container{display:flex;position:relative;box-sizing:border-box;transition-property:box-shadow;transition-duration:0.2s;transition-timing-function:ease}.wp-block-uagb-container .spectra-container-link-overlay{bottom:0;left:0;position:absolute;right:0;top:0;z-index:10}.wp-block-uagb-container.uagb-is-root-container{margin-left:auto;margin-right:auto}.wp-block-uagb-container.alignfull.uagb-is-root-container .uagb-container-inner-blocks-wrap{display:flex;position:relative;box-sizing:border-box;margin-left:auto !important;margin-right:auto !important}.wp-block-uagb-container .uagb-container__video-wrap{height:100%;width:100%;top:0;left:0;position:absolute;overflow:hidden;-webkit-transition:opacity 1s;-o-transition:opacity 1s;transition:opacity 1s}.wp-block-uagb-container .uagb-container__video-wrap video{max-width:100%;width:100%;height:100%;margin:0;line-height:1;border:none;display:inline-block;vertical-align:baseline;-o-object-fit:cover;object-fit:cover;background-size:cover}.st-block-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap>*:not(.wp-block-uagb-container):not(.wp-block-uagb-column):not(.wp-block-uagb-container):not(.wp-block-uagb-section):not(.uagb-container__shape):not(.uagb-container__video-wrap):not(.wp-block-spectra-pro-register):not(.wp-block-spectra-pro-login):not(.uagb-slider-container):not(.spectra-image-gallery__control-lightbox),.st-block-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap,.st-block-container .wp-block-uagb-container>*:not(.wp-block-uagb-container):not(.wp-block-uagb-column):not(.wp-block-uagb-container):not(.wp-block-uagb-section):not(.uagb-container__shape):not(.uagb-container__video-wrap):not(.wp-block-uagb-image):not(.wp-block-spectra-pro-register):not(.wp-block-spectra-pro-login):not(.uagb-slider-container):not(.spectra-container-link-overlay):not(.spectra-image-gallery__control-lightbox):not(.wp-block-uagb-lottie):not(.uagb-faq__outer-wrap){min-width:unset !important;width:100%;position:relative}.st-block-container .ast-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap>.wp-block-uagb-container>ul,.st-block-container .ast-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap>.wp-block-uagb-container ol,.st-block-container .ast-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap>ul,.st-block-container .ast-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap ol{max-width:-webkit-fill-available;margin-block-start:0;margin-block-end:0;margin-left:20px}.ast-plain-container .editor-styles-wrapper .block-editor-block-list__layout.is-root-container .uagb-is-root-container.wp-block-uagb-container.alignwide{margin-left:auto;margin-right:auto}.uagb-container__shape{overflow:hidden;position:absolute;left:0;width:100%;line-height:0;direction:ltr}.uagb-container__shape-top{top:-3px}.uagb-container__shape-bottom{bottom:-3px}.uagb-container__shape.uagb-container__invert.uagb-container__shape-bottom,.uagb-container__shape.uagb-container__invert.uagb-container__shape-top{-webkit-transform:rotate(180deg);-ms-transform:rotate(180deg);transform:rotate(180deg)}.uagb-container__shape.uagb-container__shape-flip svg{transform:translateX(-50%) rotateY(180deg)}.uagb-container__shape svg{display:block;width:-webkit-calc(100% + 1.3px);width:calc(100% + 1.3px);position:relative;left:50%;-webkit-transform:translateX(-50%);-ms-transform:translateX(-50%);transform:translateX(-50%)}.uagb-container__shape .uagb-container__shape-fill{-webkit-transform-origin:center;-ms-transform-origin:center;transform-origin:center;-webkit-transform:rotateY(0deg);transform:rotateY(0deg)}.uagb-container__shape.uagb-container__shape-above-content{z-index:9;pointer-events:none}.nv-single-page-wrap .nv-content-wrap.entry-content .wp-block-uagb-container.alignfull{margin-left:calc(50% - 50vw);margin-right:calc(50% - 50vw)}@media only screen and (max-width: 767px){.wp-block-uagb-container .wp-block-uagb-advanced-heading{width:-webkit-fill-available !important}}
.uagb-ifb-content>svg *{-webkit-transition:all 0.2s;-o-transition:all 0.2s;transition:all 0.2s}.uagb-ifb-content>svg,.uagb-ifb-content{display:inline-block}.uagb-ifb-content>svg{vertical-align:middle;width:inherit;height:inherit;font-style:initial}.uagb-ifb-content .uagb-ifb-icon-wrap svg{box-sizing:content-box;width:inherit;height:inherit}.uagb-ifb-button-wrapper:empty{display:none}div.uagb-ifb-button-wrapper a.uagb-infobox-cta-link,div.uagb-ifb-cta a.uagb-infobox-cta-link,.entry .entry-content a.uagb-infobox-cta-link,a.uagb-infobox-link-wrap,.entry .entry-content a.uagb-infobox-link-wrap{text-decoration:none;align-items:center}.uagb-infobox-icon-left-title.uagb-infobox-image-valign-middle .uagb-ifb-title-wrap,.uagb-infobox-icon-right-title.uagb-infobox-image-valign-middle .uagb-ifb-title-wrap,.uagb-infobox-image-valign-middle .uagb-ifb-icon-wrap,.uagb-infobox-image-valign-middle .uagb-ifb-image-content,.uagb-infobox-icon-left.uagb-infobox-image-valign-middle .uagb-ifb-content,.uagb-infobox-icon-right.uagb-infobox-image-valign-middle .uagb-ifb-content{-ms-flex-item-align:center;-webkit-align-self:center;align-self:center}.uagb-infobox-icon-left-title.uagb-infobox-image-valign-top .uagb-ifb-title-wrap,.uagb-infobox-icon-right-title.uagb-infobox-image-valign-top .uagb-ifb-title-wrap,.uagb-infobox-image-valign-top .uagb-ifb-icon-wrap,.uagb-infobox-image-valign-top .uagb-ifb-image-content,.uagb-infobox-icon-left.uagb-infobox-image-valign-top .uagb-ifb-content,.uagb-infobox-icon-right.uagb-infobox-image-valign-top .uagb-ifb-content{-webkit-align-self:self-start;align-self:self-start}.uagb-infobox-left{justify-content:flex-start;text-align:left;-webkit-box-pack:start;-ms-flex-pack:start;-webkit-justify-content:flex-start;-moz-box-pack:start}.uagb-infobox-center{justify-content:center;text-align:center;-webkit-box-pack:center;-ms-flex-pack:center;-webkit-justify-content:center;-moz-box-pack:center}.uagb-infobox-right{justify-content:flex-end;text-align:right;-webkit-box-pack:end;-ms-flex-pack:end;-webkit-justify-content:flex-end;-moz-box-pack:end}.uagb-infobox-icon-above-title.uagb-infobox__content-wrap,.uagb-infobox-icon-below-title.uagb-infobox__content-wrap{display:block;width:100%}.uagb-infobox-icon-left-title .uagb-ifb-content>svg,.uagb-infobox-icon-left .uagb-ifb-content>svg{margin-right:10px}.uagb-infobox-icon-right-title .uagb-ifb-content>svg,.uagb-infobox-icon-right .uagb-ifb-content>svg{margin-left:10px}.uagb-infobox-icon-left.uagb-infobox__content-wrap,.uagb-infobox-icon-right.uagb-infobox__content-wrap,.uagb-infobox-icon-left-title .uagb-ifb-left-title-image,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image{display:-webkit-box;display:-ms-flexbox;display:-webkit-flex;display:-moz-box;display:flex;-js-display:flex}.uagb-infobox-icon-left-title .uagb-ifb-left-title-image .uagb-ifb-image-content,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image .uagb-ifb-image-content,.uagb-infobox-icon-left .uagb-ifb-image-content,.uagb-infobox-icon-right .uagb-ifb-image-content{flex-shrink:0;line-height:0}.uagb-infobox-icon-left-title .uagb-ifb-left-title-image .uagb-ifb-title-wrap,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image .uagb-ifb-title-wrap,.uagb-infobox-icon-left .uagb-ifb-content,.uagb-infobox-icon-right .uagb-ifb-content{flex-grow:1}.uagb-infobox-icon-right.uagb-infobox__content-wrap,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image{-webkit-box-pack:end;-ms-flex-pack:end;-webkit-justify-content:flex-end;-moz-box-pack:end;justify-content:flex-end}.uagb-ifb-content img{position:relative;display:inline-block;line-height:0;width:auto;height:auto !important;max-width:100%;border-radius:inherit;-webkit-box-sizing:content-box;-moz-box-sizing:content-box;-webkit-border-radius:inherit}.uagb-infobox-module-link{position:absolute;top:0;right:0;bottom:0;left:0;z-index:4;width:100%;height:100%}.uagb-edit-mode .uagb-infobox-module-link{z-index:2}.uagb-infobox-link-icon-after{margin-right:0;margin-left:5px}.uagb-infobox-link-icon-before{margin-right:5px;margin-left:0}.uagb-infobox-link-icon{-webkit-transition:all 200ms linear;transition:all 200ms linear}.uagb-infobox__content-wrap{box-sizing:border-box;position:relative;width:100%;word-break:break-word;z-index:1}.uagb-ifb-separator{display:inline-block;margin:0;border-top-color:#333;border-top-style:solid;border-top-width:2px;line-height:0}.uagb-ifb-button-wrapper{line-height:1}.uagb-ifb-button-wrapper.uagb-ifb-button-type-text .uagb-infobox-cta-link.wp-block-button__link{background-color:unset;border:none}.uagb-ifb-button-wrapper.uagb-ifb-button-type-text .uagb-infobox-cta-link.wp-block-button__link:hover{background-color:unset;border-color:unset}.uagb-ifb-button-wrapper .uagb-infobox-cta-link{cursor:pointer}.uagb-ifb-button-wrapper .wp-block-button__link svg{fill:currentColor}.uagb-infobox__content-wrap a{-webkit-box-shadow:none;box-shadow:none;text-decoration:none}.uagb-ifb-title-wrap{width:100%}.uagb-ifb-title{margin-block-start:0}.uagb-ifb-title-wrap .uagb-ifb-title-prefix{display:block;padding:0;margin:0}.uagb-infobox__content-wrap.uagb-infobox__content-wrap{position:relative}.uagb-ifb-content{width:100%}.uagb-infobox__content-wrap.uagb-infobox,.uagb-ifb-content,.uagb-ifb-title-wrap,.uagb-ifb-title-prefix *,svg.dashicon.dashicons-upload{z-index:1}a.uagb-infobox-link-wrap{color:inherit}.uagb-ifb-content p:empty{display:none}.uagb-infobox__content-wrap .uagb-ifb-content img{display:inline-block;max-width:100%}.uagb-infobox__content-wrap .uagb-ifb-content svg{display:inline-block}.uagb-infobox__content-wrap .uagb-ifb-icon-wrap,.uagb-infobox-icon-left .uagb-ifb-image-content,.uagb-infobox-icon-right .uagb-ifb-image-content{box-sizing:content-box}.uagb-infobox-cta-link>svg{vertical-align:middle;width:15px;height:15px;font-size:15px}.uagb-infobox-cta-link{display:inline-flex}.block-editor-page #wpwrap .uagb-infobox-cta-link svg,.uagb-infobox-cta-link svg{font-style:normal}.uagb-infobox-icon-left-title .uagb-ifb-icon-wrap,.uagb-infobox-icon-left .uagb-ifb-icon-wrap{margin-right:10px;line-height:0}.uagb-infobox-icon-right-title .uagb-ifb-icon-wrap,.uagb-infobox-icon-right .uagb-ifb-icon-wrap{margin-left:10px;line-height:0}.uagb-infobox-icon-left .uagb-ifb-left-right-wrap,.uagb-infobox-icon-right .uagb-ifb-left-right-wrap,.uagb-infobox-icon-left-title .uagb-ifb-left-title-image,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image{display:-webkit-box;display:-ms-flexbox;display:flex}.uagb-infobox-icon-right .uagb-ifb-left-right-wrap,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image{-webkit-box-pack:end;-ms-flex-pack:end;-webkit-justify-content:flex-end;-moz-box-pack:end;justify-content:flex-end}a.uagb-infbox__link-to-all{position:absolute;top:0;left:0;z-index:3;width:100%;height:100%;box-shadow:none;text-decoration:none;-webkit-box-shadow:none}@media only screen and (max-width: 976px){.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-image-content{padding:0;margin-bottom:20px}.uagb-infobox-stacked-tablet.uagb-reverse-order-tablet.uagb-infobox__content-wrap{display:-webkit-inline-box;display:-ms-inline-flexbox;display:-webkit-inline-flex;display:-moz-inline-box;display:inline-flex;flex-direction:column-reverse;-js-display:inline-flex;-webkit-box-orient:vertical;-webkit-box-direction:reverse;-ms-flex-direction:column-reverse;-webkit-flex-direction:column-reverse;-moz-box-orient:vertical;-moz-box-direction:reverse}.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-content,.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-icon-wrap,.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-image-content{display:block;width:100%;text-align:center}.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-icon-wrap,.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-image-content{margin-right:0;margin-left:0}.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap{display:inline-block}.uagb-infobox-icon-left-title.uagb-infobox-stacked-tablet .uagb-ifb-image-content,.uagb-infobox-icon-left-title.uagb-infobox-stacked-tablet .uagb-ifb-icon-wrap,.uagb-infobox-icon-left.uagb-infobox-stacked-tablet .uagb-ifb-image-content,.uagb-infobox-icon-left.uagb-infobox-stacked-tablet .uagb-ifb-icon-wrap{margin-right:0}.uagb-infobox-icon-right-title.uagb-infobox-stacked-tablet .uagb-ifb-image-content,.uagb-infobox-icon-right-title.uagb-infobox-stacked-tablet .uagb-ifb-icon-wrap,.uagb-infobox-icon-right.uagb-infobox-stacked-tablet .uagb-ifb-image-content,.uagb-infobox-icon-right.uagb-infobox-stacked-tablet .uagb-ifb-icon-wrap{margin-left:0}.uagb-infobox-icon-left-title .uagb-ifb-separator{margin:10px 0}}@media screen and (max-width: 767px){.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap{display:inline-block}.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-image-content,.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-icon-wrap{padding:0;margin-bottom:20px;margin-right:0;margin-left:0}.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap.uagb-reverse-order-mobile{display:-webkit-inline-box;display:-ms-inline-flexbox;display:-webkit-inline-flex;display:-moz-inline-box;display:inline-flex;flex-direction:column-reverse;-js-display:inline-flex;-webkit-box-orient:vertical;-webkit-box-direction:reverse;-ms-flex-direction:column-reverse;-webkit-flex-direction:column-reverse;-moz-box-orient:vertical;-moz-box-direction:reverse}.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-image-content,.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-icon-wrap,.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-content{display:block;width:100%;text-align:center}.uagb-infobox-icon-left-title.uagb-infobox-stacked-mobile .uagb-ifb-image-content,.uagb-infobox-icon-left-title.uagb-infobox-stacked-mobile .uagb-ifb-icon-wrap,.uagb-infobox-icon-left.uagb-infobox-stacked-mobile .uagb-ifb-image-content,.uagb-infobox-icon-left.uagb-infobox-stacked-mobile .uagb-ifb-icon-wrap{margin-right:0}.uagb-infobox-icon-right-title.uagb-infobox-stacked-mobile .uagb-ifb-image-content,.uagb-infobox-icon-right-title.uagb-infobox-stacked-mobile .uagb-ifb-icon-wrap,.uagb-infobox-icon-right.uagb-infobox-stacked-mobile .uagb-ifb-image-content,.uagb-infobox-icon-right.uagb-infobox-stacked-mobile .uagb-ifb-icon-wrap{margin-left:0}.uagb-infobox-icon-left-title .uagb-ifb-separator{margin:10px 0}}.uagb-ifb-icon svg{width:inherit;height:inherit;vertical-align:middle}.uagb-ifb-button-icon{height:15px;width:15px;font-size:15px;vertical-align:middle}.uagb-ifb-button-icon svg{height:inherit;width:inherit;display:inline-block}.uagb-ifb-button-icon.uagb-ifb-align-icon-after{float:right}.uagb-ifb-cta-button{display:inline-block}.uagb-disable-link{pointer-events:none}
.uagb-buttons__outer-wrap .uagb-buttons__wrap{display:inline-flex;width:100%}.uagb-buttons__outer-wrap.uagb-btn__small-btn .uagb-buttons-repeater{padding:5px 10px}.uagb-buttons__outer-wrap.uagb-btn__medium-btn .uagb-buttons-repeater{padding:12px 24px}.uagb-buttons__outer-wrap.uagb-btn__large-btn .uagb-buttons-repeater{padding:20px 30px}.uagb-buttons__outer-wrap.uagb-btn__extralarge-btn .uagb-buttons-repeater{padding:30px 65px}@media (max-width: 976px){.uagb-buttons__outer-wrap.uagb-btn-tablet__small-btn .uagb-buttons-repeater{padding:5px 10px}.uagb-buttons__outer-wrap.uagb-btn-tablet__medium-btn .uagb-buttons-repeater{padding:12px 24px}.uagb-buttons__outer-wrap.uagb-btn-tablet__large-btn .uagb-buttons-repeater{padding:20px 30px}.uagb-buttons__outer-wrap.uagb-btn-tablet__extralarge-btn .uagb-buttons-repeater{padding:30px 65px}}@media (max-width: 767px){.uagb-buttons__outer-wrap.uagb-btn-mobile__small-btn .uagb-buttons-repeater{padding:5px 10px}.uagb-buttons__outer-wrap.uagb-btn-mobile__medium-btn .uagb-buttons-repeater{padding:12px 24px}.uagb-buttons__outer-wrap.uagb-btn-mobile__large-btn .uagb-buttons-repeater{padding:20px 30px}.uagb-buttons__outer-wrap.uagb-btn-mobile__extralarge-btn .uagb-buttons-repeater{padding:30px 65px}}
.uagb-buttons__outer-wrap .uagb-buttons-repeater{display:flex;justify-content:center;align-items:center;transition:box-shadow 0.2s ease}.uagb-buttons__outer-wrap .uagb-buttons-repeater a.uagb-button__link{display:flex;justify-content:center}.uagb-buttons__outer-wrap .uagb-buttons-repeater .uagb-button__icon{font-size:inherit;display:flex;align-items:center}.uagb-buttons__outer-wrap .uagb-buttons-repeater .uagb-button__icon svg{fill:currentColor;width:inherit;height:inherit}
.wp-block-uagb-container.uagb-is-root-container .uagb-block-b6f034ba{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-b6f034ba .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-b6f034ba .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-b6f034ba .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-b6f034ba .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-b6f034ba .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-b6f034ba > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-b6f034ba{box-shadow: 0px 0px   #00000070 ;padding-top: 112px;padding-bottom: 112px;padding-left: 40px;padding-right: 40px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-style: none;border-color: var(--ast-global-color-6);background-color: var(--ast-global-color-4);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-f0cd766b{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-f0cd766b .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-f0cd766b .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-f0cd766b .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-f0cd766b .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-f0cd766b .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-f0cd766b > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-f0cd766b{box-shadow: 0px 0px   #00000070 ;padding-top: 48px;padding-bottom: 48px;padding-left: 48px;padding-right: 48px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-top-width: 0px;border-left-width: 0px;border-right-width: 0px;border-bottom-width: 0px;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: solid;border-color: var(--ast-global-color-6);background-color: var(--ast-global-color-5);;}.wp-block-uagb-container.wp-block-uagb-container.uagb-block-f0cd766b:hover{border-color: var(--ast-global-color-6);}.wp-block-uagb-container.uagb-is-root-container .uagb-block-0f80aa76{max-width: 60%;width: 100%;}.wp-block-uagb-container.uagb-block-0f80aa76 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-0f80aa76 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-0f80aa76 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-0f80aa76 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-0f80aa76 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-0f80aa76 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-0f80aa76{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;}.uagb-block-117b20e6 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-117b20e6 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-117b20e6 .uagb-ifb-icon svg{fill: #333;}.uagb-block-117b20e6.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-117b20e6 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-117b20e6 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-117b20e6.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-117b20e6.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-117b20e6 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-117b20e6 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-117b20e6 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-117b20e6 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-117b20e6.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-117b20e6.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-117b20e6.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-117b20e6.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-117b20e6 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-117b20e6.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 24px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-117b20e6.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-117b20e6 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-117b20e6 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-117b20e6 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-117b20e6 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-117b20e6.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-117b20e6.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-117b20e6 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-117b20e6.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-117b20e6.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-117b20e6 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-117b20e6.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-117b20e6 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-117b20e6 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-117b20e6.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-c9f5da85{max-width: 40%;width: 100%;}.wp-block-uagb-container.uagb-block-c9f5da85 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-c9f5da85 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-c9f5da85 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-c9f5da85 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-c9f5da85 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-c9f5da85 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-c9f5da85{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;}.uagb-block-78cd7b63.wp-block-uagb-buttons.uagb-buttons__outer-wrap .uagb-buttons__wrap {column-gap: 20px;}.uagb-block-78cd7b63.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: right;align-items: center;}.wp-block-uagb-buttons .uagb-block-32c93563 .wp-block-button__link{background: transparent;}.wp-block-uagb-buttons .uagb-block-32c93563 .wp-block-button__link:hover{background: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-32c93563 .wp-block-button__link:focus{background: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-32c93563 .uagb-button__wrapper .uagb-buttons-repeater{color: var(--ast-global-color-2);margin-top: 0px;margin-bottom: 0px;margin-left: 0px;margin-right: 0px;}.wp-block-uagb-buttons .uagb-block-32c93563 .wp-block-button__link.has-text-color:hover .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-32c93563 .wp-block-button__link.has-text-color:focus .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-32c93563 .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-32c93563 .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link:hover{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-32c93563 .uagb-buttons-repeater.wp-block-button__link{border-top-width: 1px;border-left-width: 1px;border-right-width: 1px;border-bottom-width: 1px;border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-color: var(--ast-global-color-2);border-style: solid;}.wp-block-uagb-buttons .uagb-block-32c93563 .uagb-buttons-repeater.wp-block-button__link:hover{border-color: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-32c93563 .uagb-buttons-repeater.wp-block-button__link:focus{border-color: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-32c93563.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-top-width: 1px;border-left-width: 1px;border-right-width: 1px;border-bottom-width: 1px;border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-color: var(--ast-global-color-2);border-style: solid;}.wp-block-uagb-buttons .uagb-block-32c93563.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater:hover{border-color: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-32c93563 .uagb-buttons-repeater .uagb-button__link{color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-32c93563 .uagb-buttons-repeater:hover .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-32c93563 .uagb-buttons-repeater:focus .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-32c93563 .uagb-buttons-repeater .uagb-button__icon > svg{width: 15px;height: 15px;fill: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-32c93563 .uagb-buttons-repeater:hover .uagb-button__icon > svg{fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-32c93563 .uagb-buttons-repeater:focus .uagb-button__icon > svg{fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-32c93563 .uagb-buttons-repeater .uagb-button__icon-position-after{margin-left: 8px;}.wp-block-uagb-buttons .uagb-block-32c93563 .uagb-buttons-repeater .uagb-button__icon-position-before{margin-right: 8px;}.wp-block-uagb-buttons .uagb-block-32c93563 .uagb-button__link{text-transform: normal;text-decoration: none;}.wp-block-uagb-buttons .uagb-block-cee01ce9.wp-block-uagb-buttons-child .uagb-buttons-repeater{background: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-cee01ce9 .wp-block-button__link{background: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-cee01ce9 .wp-block-button__link:hover{background: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-cee01ce9 .wp-block-button__link:focus{background: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-cee01ce9 .uagb-button__wrapper .uagb-buttons-repeater{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-cee01ce9 .wp-block-button__link.has-text-color:hover .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-cee01ce9 .wp-block-button__link.has-text-color:focus .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-cee01ce9 .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-cee01ce9 .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link:hover{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-cee01ce9 .uagb-buttons-repeater.wp-block-button__link{border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-style: none;}.wp-block-uagb-buttons .uagb-block-cee01ce9.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-style: none;}.wp-block-uagb-buttons .uagb-block-cee01ce9 .uagb-buttons-repeater .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-cee01ce9 .uagb-buttons-repeater:hover .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-cee01ce9 .uagb-buttons-repeater:focus .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-cee01ce9 .uagb-buttons-repeater .uagb-button__icon > svg{width: 15px;height: 15px;fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-cee01ce9 .uagb-buttons-repeater:hover .uagb-button__icon > svg{fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-cee01ce9 .uagb-buttons-repeater:focus .uagb-button__icon > svg{fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-cee01ce9 .uagb-buttons-repeater .uagb-button__icon-position-after{margin-left: 8px;}.wp-block-uagb-buttons .uagb-block-cee01ce9 .uagb-buttons-repeater .uagb-button__icon-position-before{margin-right: 8px;}.wp-block-uagb-buttons .uagb-block-cee01ce9 .uagb-button__link{text-transform: normal;text-decoration: none;}@media only screen and (max-width: 976px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-b6f034ba{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-b6f034ba > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-b6f034ba{padding-top: 80px;padding-bottom: 80px;padding-left: 32px;padding-right: 32px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;border-style: none;border-color: var(--ast-global-color-6);background-color: var(--ast-global-color-4);;}.wp-block-uagb-container.uagb-block-b6f034ba.wp-block-uagb-container > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-uagb-image ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not( .spectra-container-link-overlay ):not(.spectra-image-gallery__control-lightbox):not(.wp-block-uagb-lottie):not(.uagb-container-inner-blocks-wrap){width: 100%;}.wp-block-uagb-container.uagb-block-b6f034ba.wp-block-uagb-container > .uagb-container-inner-blocks-wrap > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not(.spectra-image-gallery__control-lightbox){width: 100%;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-f0cd766b{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-f0cd766b > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 100%);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-f0cd766b{padding-top: 24px;padding-bottom: 24px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;border-style: solid;border-color: var(--ast-global-color-6);background-color: var(--ast-global-color-5);;}.wp-block-uagb-container.uagb-block-f0cd766b.wp-block-uagb-container > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-uagb-image ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not( .spectra-container-link-overlay ):not(.spectra-image-gallery__control-lightbox):not(.wp-block-uagb-lottie):not(.uagb-container-inner-blocks-wrap){width: 100%;}.wp-block-uagb-container.uagb-block-f0cd766b.wp-block-uagb-container > .uagb-container-inner-blocks-wrap > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not(.spectra-image-gallery__control-lightbox){width: 100%;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-0f80aa76{max-width: 60%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-0f80aa76 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: flex-start;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-0f80aa76{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;flex-direction: row;align-items: stretch;justify-content: flex-start;}.wp-block-uagb-container.uagb-block-0f80aa76.wp-block-uagb-container > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-uagb-image ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not( .spectra-container-link-overlay ):not(.spectra-image-gallery__control-lightbox):not(.wp-block-uagb-lottie):not(.uagb-container-inner-blocks-wrap){width: 100%;}.wp-block-uagb-container.uagb-block-0f80aa76.wp-block-uagb-container > .uagb-container-inner-blocks-wrap > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not(.spectra-image-gallery__control-lightbox){width: 100%;}.uagb-block-117b20e6.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 24px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-117b20e6.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-117b20e6.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-117b20e6.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-117b20e6.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-117b20e6 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-117b20e6 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-117b20e6 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-117b20e6 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-117b20e6 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-117b20e6.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-117b20e6.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-117b20e6 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-117b20e6.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-117b20e6 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-117b20e6 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-117b20e6.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-c9f5da85{max-width: 40%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-c9f5da85 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-c9f5da85{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;flex-direction: row;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-block-c9f5da85.wp-block-uagb-container > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-uagb-image ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not( .spectra-container-link-overlay ):not(.spectra-image-gallery__control-lightbox):not(.wp-block-uagb-lottie):not(.uagb-container-inner-blocks-wrap){width: 100%;}.wp-block-uagb-container.uagb-block-c9f5da85.wp-block-uagb-container > .uagb-container-inner-blocks-wrap > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not(.spectra-image-gallery__control-lightbox){width: 100%;}.uagb-block-78cd7b63.wp-block-uagb-buttons.uagb-buttons__outer-wrap .uagb-buttons__wrap{column-gap: 10px;}.uagb-block-78cd7b63.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: center;align-items: center;}.wp-block-uagb-buttons .uagb-block-32c93563.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-top-width: 1px;border-left-width: 1px;border-right-width: 1px;border-bottom-width: 1px;border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-style: solid;border-color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-cee01ce9.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-style: none;}}@media only screen and (max-width: 767px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-b6f034ba{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-b6f034ba > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-b6f034ba{padding-top: 64px;padding-bottom: 64px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;border-style: none;border-color: var(--ast-global-color-6);background-color: var(--ast-global-color-4);;}.wp-block-uagb-container.uagb-block-b6f034ba.wp-block-uagb-container > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-uagb-image ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not( .spectra-container-link-overlay ):not(.spectra-image-gallery__control-lightbox):not(.wp-block-uagb-lottie):not(.uagb-container-inner-blocks-wrap){width: 100%;}.wp-block-uagb-container.uagb-block-b6f034ba.wp-block-uagb-container > .uagb-container-inner-blocks-wrap > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not(.spectra-image-gallery__control-lightbox){width: 100%;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-f0cd766b{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-f0cd766b > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: flex-start;flex-wrap: wrap;align-content: flex-start;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-f0cd766b{padding-top: 24px;padding-bottom: 24px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;border-style: solid;border-color: var(--ast-global-color-6);background-color: var(--ast-global-color-5);;}.wp-block-uagb-container.uagb-block-f0cd766b.wp-block-uagb-container > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-uagb-image ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not( .spectra-container-link-overlay ):not(.spectra-image-gallery__control-lightbox):not(.wp-block-uagb-lottie):not(.uagb-container-inner-blocks-wrap){width: 100%;}.wp-block-uagb-container.uagb-block-f0cd766b.wp-block-uagb-container > .uagb-container-inner-blocks-wrap > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not(.spectra-image-gallery__control-lightbox){width: 100%;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-0f80aa76{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-0f80aa76 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: flex-start;justify-content: flex-start;flex-wrap: wrap;align-content: flex-start;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-0f80aa76{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;flex-direction: row;align-items: flex-start;justify-content: flex-start;flex-wrap: wrap;align-content: flex-start;}.wp-block-uagb-container.uagb-block-0f80aa76.wp-block-uagb-container > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-uagb-image ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not( .spectra-container-link-overlay ):not(.spectra-image-gallery__control-lightbox):not(.wp-block-uagb-lottie):not(.uagb-container-inner-blocks-wrap){width: 100%;}.wp-block-uagb-container.uagb-block-0f80aa76.wp-block-uagb-container > .uagb-container-inner-blocks-wrap > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not(.spectra-image-gallery__control-lightbox){width: 100%;}.uagb-block-117b20e6.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-117b20e6.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 36px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-117b20e6.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-117b20e6.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-117b20e6 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-117b20e6 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-117b20e6.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-117b20e6 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-117b20e6 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-117b20e6 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-117b20e6.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-117b20e6.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-117b20e6 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-117b20e6.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-117b20e6 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-117b20e6 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-117b20e6.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-c9f5da85{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-c9f5da85 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: flex-start;flex-wrap: wrap;align-content: flex-start;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-c9f5da85{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;flex-direction: row;align-items: stretch;justify-content: flex-start;flex-wrap: wrap;align-content: flex-start;}.wp-block-uagb-container.uagb-block-c9f5da85.wp-block-uagb-container > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-uagb-image ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not( .spectra-container-link-overlay ):not(.spectra-image-gallery__control-lightbox):not(.wp-block-uagb-lottie):not(.uagb-container-inner-blocks-wrap){width: 100%;}.wp-block-uagb-container.uagb-block-c9f5da85.wp-block-uagb-container > .uagb-container-inner-blocks-wrap > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not(.spectra-image-gallery__control-lightbox){width: 100%;}.uagb-block-78cd7b63.wp-block-uagb-buttons.uagb-buttons__outer-wrap .uagb-buttons__wrap{column-gap: 10px;}.uagb-block-78cd7b63.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-32c93563.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-top-width: 1px;border-left-width: 1px;border-right-width: 1px;border-bottom-width: 1px;border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-style: solid;border-color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-cee01ce9.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-style: none;}}";s:7:"content";s:1834:"
<div class="wp-block-uagb-container uagb-block-b6f034ba alignfull uagb-is-root-container"><div class="uagb-container-inner-blocks-wrap">
<div class="wp-block-uagb-container uagb-block-f0cd766b alignfull uagb-is-root-container"><div class="uagb-container-inner-blocks-wrap">
<div class="wp-block-uagb-container uagb-block-0f80aa76">
<div class="wp-block-uagb-info-box uagb-block-117b20e6 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h2 class="uagb-ifb-title">Unlock your potential and transform your life today!</h2></div><p class="uagb-ifb-desc">Don't wait any longer. Take action today and embark on an exciting journey to achieve your goals. Let us guide you through the process and help you unleash your true potential.</p></div></div>
</div>



<div class="wp-block-uagb-container uagb-block-c9f5da85">
<div class="wp-block-uagb-buttons uagb-buttons__outer-wrap uagb-btn__default-btn uagb-btn-tablet__default-btn uagb-btn-mobile__default-btn uagb-block-78cd7b63"><div class="uagb-buttons__wrap uagb-buttons-layout-wrap">
<div class="wp-block-uagb-buttons-child uagb-buttons__outer-wrap uagb-block-32c93563 wp-block-button"><div class="uagb-button__wrapper"><a class="uagb-buttons-repeater wp-block-button__link" href="#" onclick="return false;" rel="follow noopener" target="_self"><div class="uagb-button__link">Learn More</div></a></div></div>



<div class="wp-block-uagb-buttons-child uagb-buttons__outer-wrap uagb-block-cee01ce9 wp-block-button"><div class="uagb-button__wrapper"><a class="uagb-buttons-repeater wp-block-button__link" href="#" onclick="return false;" rel="follow noopener" target="_self"><div class="uagb-button__link">Get Started</div></a></div></div>
</div></div>
</div>
</div></div>
</div></div>
";}s:8:"id-75640";a:10:{s:5:"title";s:17:"Call To Action 02";s:3:"url";s:56:"https://websitedemos.net/astra-blocks/call-to-action-02/";s:3:"tag";a:0:{}s:8:"category";i:832;s:16:"primary-category";s:0:"";s:4:"type";s:5:"block";s:12:"page-builder";s:9:"gutenberg";s:16:"required-plugins";a:0:{}s:10:"stylesheet";s:50808:".wp-block-uagb-container{display:flex;position:relative;box-sizing:border-box;transition-property:box-shadow;transition-duration:0.2s;transition-timing-function:ease}.wp-block-uagb-container .spectra-container-link-overlay{bottom:0;left:0;position:absolute;right:0;top:0;z-index:10}.wp-block-uagb-container.uagb-is-root-container{margin-left:auto;margin-right:auto}.wp-block-uagb-container.alignfull.uagb-is-root-container .uagb-container-inner-blocks-wrap{display:flex;position:relative;box-sizing:border-box;margin-left:auto !important;margin-right:auto !important}.wp-block-uagb-container .uagb-container__video-wrap{height:100%;width:100%;top:0;left:0;position:absolute;overflow:hidden;-webkit-transition:opacity 1s;-o-transition:opacity 1s;transition:opacity 1s}.wp-block-uagb-container .uagb-container__video-wrap video{max-width:100%;width:100%;height:100%;margin:0;line-height:1;border:none;display:inline-block;vertical-align:baseline;-o-object-fit:cover;object-fit:cover;background-size:cover}.st-block-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap>*:not(.wp-block-uagb-container):not(.wp-block-uagb-column):not(.wp-block-uagb-container):not(.wp-block-uagb-section):not(.uagb-container__shape):not(.uagb-container__video-wrap):not(.wp-block-spectra-pro-register):not(.wp-block-spectra-pro-login):not(.uagb-slider-container):not(.spectra-image-gallery__control-lightbox),.st-block-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap,.st-block-container .wp-block-uagb-container>*:not(.wp-block-uagb-container):not(.wp-block-uagb-column):not(.wp-block-uagb-container):not(.wp-block-uagb-section):not(.uagb-container__shape):not(.uagb-container__video-wrap):not(.wp-block-uagb-image):not(.wp-block-spectra-pro-register):not(.wp-block-spectra-pro-login):not(.uagb-slider-container):not(.spectra-container-link-overlay):not(.spectra-image-gallery__control-lightbox):not(.wp-block-uagb-lottie):not(.uagb-faq__outer-wrap){min-width:unset !important;width:100%;position:relative}.st-block-container .ast-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap>.wp-block-uagb-container>ul,.st-block-container .ast-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap>.wp-block-uagb-container ol,.st-block-container .ast-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap>ul,.st-block-container .ast-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap ol{max-width:-webkit-fill-available;margin-block-start:0;margin-block-end:0;margin-left:20px}.ast-plain-container .editor-styles-wrapper .block-editor-block-list__layout.is-root-container .uagb-is-root-container.wp-block-uagb-container.alignwide{margin-left:auto;margin-right:auto}.uagb-container__shape{overflow:hidden;position:absolute;left:0;width:100%;line-height:0;direction:ltr}.uagb-container__shape-top{top:-3px}.uagb-container__shape-bottom{bottom:-3px}.uagb-container__shape.uagb-container__invert.uagb-container__shape-bottom,.uagb-container__shape.uagb-container__invert.uagb-container__shape-top{-webkit-transform:rotate(180deg);-ms-transform:rotate(180deg);transform:rotate(180deg)}.uagb-container__shape.uagb-container__shape-flip svg{transform:translateX(-50%) rotateY(180deg)}.uagb-container__shape svg{display:block;width:-webkit-calc(100% + 1.3px);width:calc(100% + 1.3px);position:relative;left:50%;-webkit-transform:translateX(-50%);-ms-transform:translateX(-50%);transform:translateX(-50%)}.uagb-container__shape .uagb-container__shape-fill{-webkit-transform-origin:center;-ms-transform-origin:center;transform-origin:center;-webkit-transform:rotateY(0deg);transform:rotateY(0deg)}.uagb-container__shape.uagb-container__shape-above-content{z-index:9;pointer-events:none}.nv-single-page-wrap .nv-content-wrap.entry-content .wp-block-uagb-container.alignfull{margin-left:calc(50% - 50vw);margin-right:calc(50% - 50vw)}@media only screen and (max-width: 767px){.wp-block-uagb-container .wp-block-uagb-advanced-heading{width:-webkit-fill-available !important}}
.wp-block-uagb-image{display:flex}.wp-block-uagb-image__figure{position:relative;display:flex;flex-direction:column;max-width:100%;height:auto;margin:0}.wp-block-uagb-image__figure img{height:auto;display:flex;max-width:100%;transition:box-shadow 0.2s ease}.wp-block-uagb-image__figure>a{display:inline-block}.wp-block-uagb-image__figure figcaption{text-align:center;margin-top:0.5em;margin-bottom:1em}.wp-block-uagb-image--align-left{text-align:left}.wp-block-uagb-image--align-right{text-align:right}.wp-block-uagb-image--align-center{text-align:center}.wp-block-uagb-image--align-full .wp-block-uagb-image__figure{margin-left:calc(50% - 50vw);margin-right:calc(50% - 50vw);max-width:100vw;width:100vw;height:auto}.wp-block-uagb-image--align-full .wp-block-uagb-image__figure img{height:auto;width:100% !important}.wp-block-uagb-image--align-wide .wp-block-uagb-image__figure img{height:auto;width:100%}.wp-block-uagb-image--layout-overlay__color-wrapper{position:absolute;left:0;top:0;right:0;bottom:0;opacity:0.2;background:rgba(0,0,0,0.5);transition:opacity 0.35s ease-in-out}.wp-block-uagb-image--layout-overlay-link{position:absolute;left:0;right:0;bottom:0;top:0}.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity:1}.wp-block-uagb-image--layout-overlay__inner{position:absolute;left:15px;right:15px;bottom:15px;top:15px;display:flex;align-items:center;justify-content:center;flex-direction:column;border-color:#fff;transition:0.35s ease-in-out}.wp-block-uagb-image--layout-overlay__inner.top-left,.wp-block-uagb-image--layout-overlay__inner.top-center,.wp-block-uagb-image--layout-overlay__inner.top-right{justify-content:flex-start}.wp-block-uagb-image--layout-overlay__inner.bottom-left,.wp-block-uagb-image--layout-overlay__inner.bottom-center,.wp-block-uagb-image--layout-overlay__inner.bottom-right{justify-content:flex-end}.wp-block-uagb-image--layout-overlay__inner.top-left,.wp-block-uagb-image--layout-overlay__inner.center-left,.wp-block-uagb-image--layout-overlay__inner.bottom-left{align-items:flex-start}.wp-block-uagb-image--layout-overlay__inner.top-right,.wp-block-uagb-image--layout-overlay__inner.center-right,.wp-block-uagb-image--layout-overlay__inner.bottom-right{align-items:flex-end}.wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{color:#fff;transition:transform 0.35s, opacity 0.35s ease-in-out;transform:translate3d(0, 24px, 0)}.wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width:30%;border-top-width:2px;border-top-color:#fff;border-top-style:solid;margin-bottom:10px;opacity:0;transition:transform 0.4s, opacity 0.4s ease-in-out;transform:translate3d(0, 30px, 0)}.wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity:0;overflow:visible;color:#fff;transition:transform 0.45s, opacity 0.45s ease-in-out;transform:translate3d(0, 35px, 0)}.wp-block-uagb-image--layout-overlay__inner:hover .uagb-image-heading,.wp-block-uagb-image--layout-overlay__inner:hover .uagb-image-separator,.wp-block-uagb-image--layout-overlay__inner:hover .uagb-image-caption{opacity:1;transform:translate3d(0, 0, 0)}.wp-block-uagb-image--effect-zoomin .wp-block-uagb-image__figure img,.wp-block-uagb-image--effect-zoomin .wp-block-uagb-image__figure .wp-block-uagb-image--layout-overlay__color-wrapper{transform:scale(1);transition:transform 0.35s ease-in-out}.wp-block-uagb-image--effect-zoomin .wp-block-uagb-image__figure:hover img,.wp-block-uagb-image--effect-zoomin .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{transform:scale(1.05)}.wp-block-uagb-image--effect-slide .wp-block-uagb-image__figure img,.wp-block-uagb-image--effect-slide .wp-block-uagb-image__figure .wp-block-uagb-image--layout-overlay__color-wrapper{width:calc(100% + 40px) !important;max-width:none !important;transform:translate3d(-40px, 0, 0);transition:transform 0.35s ease-in-out}.wp-block-uagb-image--effect-slide .wp-block-uagb-image__figure:hover img,.wp-block-uagb-image--effect-slide .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{transform:translate3d(0, 0, 0)}.wp-block-uagb-image--effect-grayscale img{filter:grayscale(0%);transition:0.35s ease-in-out}.wp-block-uagb-image--effect-grayscale:hover img{filter:grayscale(100%)}.wp-block-uagb-image--effect-blur img{filter:blur(0);transition:0.35s ease-in-out}.wp-block-uagb-image--effect-blur:hover img{filter:blur(3px)}
.uagb-ifb-content>svg *{-webkit-transition:all 0.2s;-o-transition:all 0.2s;transition:all 0.2s}.uagb-ifb-content>svg,.uagb-ifb-content{display:inline-block}.uagb-ifb-content>svg{vertical-align:middle;width:inherit;height:inherit;font-style:initial}.uagb-ifb-content .uagb-ifb-icon-wrap svg{box-sizing:content-box;width:inherit;height:inherit}.uagb-ifb-button-wrapper:empty{display:none}div.uagb-ifb-button-wrapper a.uagb-infobox-cta-link,div.uagb-ifb-cta a.uagb-infobox-cta-link,.entry .entry-content a.uagb-infobox-cta-link,a.uagb-infobox-link-wrap,.entry .entry-content a.uagb-infobox-link-wrap{text-decoration:none;align-items:center}.uagb-infobox-icon-left-title.uagb-infobox-image-valign-middle .uagb-ifb-title-wrap,.uagb-infobox-icon-right-title.uagb-infobox-image-valign-middle .uagb-ifb-title-wrap,.uagb-infobox-image-valign-middle .uagb-ifb-icon-wrap,.uagb-infobox-image-valign-middle .uagb-ifb-image-content,.uagb-infobox-icon-left.uagb-infobox-image-valign-middle .uagb-ifb-content,.uagb-infobox-icon-right.uagb-infobox-image-valign-middle .uagb-ifb-content{-ms-flex-item-align:center;-webkit-align-self:center;align-self:center}.uagb-infobox-icon-left-title.uagb-infobox-image-valign-top .uagb-ifb-title-wrap,.uagb-infobox-icon-right-title.uagb-infobox-image-valign-top .uagb-ifb-title-wrap,.uagb-infobox-image-valign-top .uagb-ifb-icon-wrap,.uagb-infobox-image-valign-top .uagb-ifb-image-content,.uagb-infobox-icon-left.uagb-infobox-image-valign-top .uagb-ifb-content,.uagb-infobox-icon-right.uagb-infobox-image-valign-top .uagb-ifb-content{-webkit-align-self:self-start;align-self:self-start}.uagb-infobox-left{justify-content:flex-start;text-align:left;-webkit-box-pack:start;-ms-flex-pack:start;-webkit-justify-content:flex-start;-moz-box-pack:start}.uagb-infobox-center{justify-content:center;text-align:center;-webkit-box-pack:center;-ms-flex-pack:center;-webkit-justify-content:center;-moz-box-pack:center}.uagb-infobox-right{justify-content:flex-end;text-align:right;-webkit-box-pack:end;-ms-flex-pack:end;-webkit-justify-content:flex-end;-moz-box-pack:end}.uagb-infobox-icon-above-title.uagb-infobox__content-wrap,.uagb-infobox-icon-below-title.uagb-infobox__content-wrap{display:block;width:100%}.uagb-infobox-icon-left-title .uagb-ifb-content>svg,.uagb-infobox-icon-left .uagb-ifb-content>svg{margin-right:10px}.uagb-infobox-icon-right-title .uagb-ifb-content>svg,.uagb-infobox-icon-right .uagb-ifb-content>svg{margin-left:10px}.uagb-infobox-icon-left.uagb-infobox__content-wrap,.uagb-infobox-icon-right.uagb-infobox__content-wrap,.uagb-infobox-icon-left-title .uagb-ifb-left-title-image,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image{display:-webkit-box;display:-ms-flexbox;display:-webkit-flex;display:-moz-box;display:flex;-js-display:flex}.uagb-infobox-icon-left-title .uagb-ifb-left-title-image .uagb-ifb-image-content,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image .uagb-ifb-image-content,.uagb-infobox-icon-left .uagb-ifb-image-content,.uagb-infobox-icon-right .uagb-ifb-image-content{flex-shrink:0;line-height:0}.uagb-infobox-icon-left-title .uagb-ifb-left-title-image .uagb-ifb-title-wrap,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image .uagb-ifb-title-wrap,.uagb-infobox-icon-left .uagb-ifb-content,.uagb-infobox-icon-right .uagb-ifb-content{flex-grow:1}.uagb-infobox-icon-right.uagb-infobox__content-wrap,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image{-webkit-box-pack:end;-ms-flex-pack:end;-webkit-justify-content:flex-end;-moz-box-pack:end;justify-content:flex-end}.uagb-ifb-content img{position:relative;display:inline-block;line-height:0;width:auto;height:auto !important;max-width:100%;border-radius:inherit;-webkit-box-sizing:content-box;-moz-box-sizing:content-box;-webkit-border-radius:inherit}.uagb-infobox-module-link{position:absolute;top:0;right:0;bottom:0;left:0;z-index:4;width:100%;height:100%}.uagb-edit-mode .uagb-infobox-module-link{z-index:2}.uagb-infobox-link-icon-after{margin-right:0;margin-left:5px}.uagb-infobox-link-icon-before{margin-right:5px;margin-left:0}.uagb-infobox-link-icon{-webkit-transition:all 200ms linear;transition:all 200ms linear}.uagb-infobox__content-wrap{box-sizing:border-box;position:relative;width:100%;word-break:break-word;z-index:1}.uagb-ifb-separator{display:inline-block;margin:0;border-top-color:#333;border-top-style:solid;border-top-width:2px;line-height:0}.uagb-ifb-button-wrapper{line-height:1}.uagb-ifb-button-wrapper.uagb-ifb-button-type-text .uagb-infobox-cta-link.wp-block-button__link{background-color:unset;border:none}.uagb-ifb-button-wrapper.uagb-ifb-button-type-text .uagb-infobox-cta-link.wp-block-button__link:hover{background-color:unset;border-color:unset}.uagb-ifb-button-wrapper .uagb-infobox-cta-link{cursor:pointer}.uagb-ifb-button-wrapper .wp-block-button__link svg{fill:currentColor}.uagb-infobox__content-wrap a{-webkit-box-shadow:none;box-shadow:none;text-decoration:none}.uagb-ifb-title-wrap{width:100%}.uagb-ifb-title{margin-block-start:0}.uagb-ifb-title-wrap .uagb-ifb-title-prefix{display:block;padding:0;margin:0}.uagb-infobox__content-wrap.uagb-infobox__content-wrap{position:relative}.uagb-ifb-content{width:100%}.uagb-infobox__content-wrap.uagb-infobox,.uagb-ifb-content,.uagb-ifb-title-wrap,.uagb-ifb-title-prefix *,svg.dashicon.dashicons-upload{z-index:1}a.uagb-infobox-link-wrap{color:inherit}.uagb-ifb-content p:empty{display:none}.uagb-infobox__content-wrap .uagb-ifb-content img{display:inline-block;max-width:100%}.uagb-infobox__content-wrap .uagb-ifb-content svg{display:inline-block}.uagb-infobox__content-wrap .uagb-ifb-icon-wrap,.uagb-infobox-icon-left .uagb-ifb-image-content,.uagb-infobox-icon-right .uagb-ifb-image-content{box-sizing:content-box}.uagb-infobox-cta-link>svg{vertical-align:middle;width:15px;height:15px;font-size:15px}.uagb-infobox-cta-link{display:inline-flex}.block-editor-page #wpwrap .uagb-infobox-cta-link svg,.uagb-infobox-cta-link svg{font-style:normal}.uagb-infobox-icon-left-title .uagb-ifb-icon-wrap,.uagb-infobox-icon-left .uagb-ifb-icon-wrap{margin-right:10px;line-height:0}.uagb-infobox-icon-right-title .uagb-ifb-icon-wrap,.uagb-infobox-icon-right .uagb-ifb-icon-wrap{margin-left:10px;line-height:0}.uagb-infobox-icon-left .uagb-ifb-left-right-wrap,.uagb-infobox-icon-right .uagb-ifb-left-right-wrap,.uagb-infobox-icon-left-title .uagb-ifb-left-title-image,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image{display:-webkit-box;display:-ms-flexbox;display:flex}.uagb-infobox-icon-right .uagb-ifb-left-right-wrap,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image{-webkit-box-pack:end;-ms-flex-pack:end;-webkit-justify-content:flex-end;-moz-box-pack:end;justify-content:flex-end}a.uagb-infbox__link-to-all{position:absolute;top:0;left:0;z-index:3;width:100%;height:100%;box-shadow:none;text-decoration:none;-webkit-box-shadow:none}@media only screen and (max-width: 976px){.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-image-content{padding:0;margin-bottom:20px}.uagb-infobox-stacked-tablet.uagb-reverse-order-tablet.uagb-infobox__content-wrap{display:-webkit-inline-box;display:-ms-inline-flexbox;display:-webkit-inline-flex;display:-moz-inline-box;display:inline-flex;flex-direction:column-reverse;-js-display:inline-flex;-webkit-box-orient:vertical;-webkit-box-direction:reverse;-ms-flex-direction:column-reverse;-webkit-flex-direction:column-reverse;-moz-box-orient:vertical;-moz-box-direction:reverse}.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-content,.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-icon-wrap,.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-image-content{display:block;width:100%;text-align:center}.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-icon-wrap,.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-image-content{margin-right:0;margin-left:0}.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap{display:inline-block}.uagb-infobox-icon-left-title.uagb-infobox-stacked-tablet .uagb-ifb-image-content,.uagb-infobox-icon-left-title.uagb-infobox-stacked-tablet .uagb-ifb-icon-wrap,.uagb-infobox-icon-left.uagb-infobox-stacked-tablet .uagb-ifb-image-content,.uagb-infobox-icon-left.uagb-infobox-stacked-tablet .uagb-ifb-icon-wrap{margin-right:0}.uagb-infobox-icon-right-title.uagb-infobox-stacked-tablet .uagb-ifb-image-content,.uagb-infobox-icon-right-title.uagb-infobox-stacked-tablet .uagb-ifb-icon-wrap,.uagb-infobox-icon-right.uagb-infobox-stacked-tablet .uagb-ifb-image-content,.uagb-infobox-icon-right.uagb-infobox-stacked-tablet .uagb-ifb-icon-wrap{margin-left:0}.uagb-infobox-icon-left-title .uagb-ifb-separator{margin:10px 0}}@media screen and (max-width: 767px){.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap{display:inline-block}.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-image-content,.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-icon-wrap{padding:0;margin-bottom:20px;margin-right:0;margin-left:0}.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap.uagb-reverse-order-mobile{display:-webkit-inline-box;display:-ms-inline-flexbox;display:-webkit-inline-flex;display:-moz-inline-box;display:inline-flex;flex-direction:column-reverse;-js-display:inline-flex;-webkit-box-orient:vertical;-webkit-box-direction:reverse;-ms-flex-direction:column-reverse;-webkit-flex-direction:column-reverse;-moz-box-orient:vertical;-moz-box-direction:reverse}.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-image-content,.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-icon-wrap,.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-content{display:block;width:100%;text-align:center}.uagb-infobox-icon-left-title.uagb-infobox-stacked-mobile .uagb-ifb-image-content,.uagb-infobox-icon-left-title.uagb-infobox-stacked-mobile .uagb-ifb-icon-wrap,.uagb-infobox-icon-left.uagb-infobox-stacked-mobile .uagb-ifb-image-content,.uagb-infobox-icon-left.uagb-infobox-stacked-mobile .uagb-ifb-icon-wrap{margin-right:0}.uagb-infobox-icon-right-title.uagb-infobox-stacked-mobile .uagb-ifb-image-content,.uagb-infobox-icon-right-title.uagb-infobox-stacked-mobile .uagb-ifb-icon-wrap,.uagb-infobox-icon-right.uagb-infobox-stacked-mobile .uagb-ifb-image-content,.uagb-infobox-icon-right.uagb-infobox-stacked-mobile .uagb-ifb-icon-wrap{margin-left:0}.uagb-infobox-icon-left-title .uagb-ifb-separator{margin:10px 0}}.uagb-ifb-icon svg{width:inherit;height:inherit;vertical-align:middle}.uagb-ifb-button-icon{height:15px;width:15px;font-size:15px;vertical-align:middle}.uagb-ifb-button-icon svg{height:inherit;width:inherit;display:inline-block}.uagb-ifb-button-icon.uagb-ifb-align-icon-after{float:right}.uagb-ifb-cta-button{display:inline-block}.uagb-disable-link{pointer-events:none}
.uagb-buttons__outer-wrap .uagb-buttons__wrap{display:inline-flex;width:100%}.uagb-buttons__outer-wrap.uagb-btn__small-btn .uagb-buttons-repeater{padding:5px 10px}.uagb-buttons__outer-wrap.uagb-btn__medium-btn .uagb-buttons-repeater{padding:12px 24px}.uagb-buttons__outer-wrap.uagb-btn__large-btn .uagb-buttons-repeater{padding:20px 30px}.uagb-buttons__outer-wrap.uagb-btn__extralarge-btn .uagb-buttons-repeater{padding:30px 65px}@media (max-width: 976px){.uagb-buttons__outer-wrap.uagb-btn-tablet__small-btn .uagb-buttons-repeater{padding:5px 10px}.uagb-buttons__outer-wrap.uagb-btn-tablet__medium-btn .uagb-buttons-repeater{padding:12px 24px}.uagb-buttons__outer-wrap.uagb-btn-tablet__large-btn .uagb-buttons-repeater{padding:20px 30px}.uagb-buttons__outer-wrap.uagb-btn-tablet__extralarge-btn .uagb-buttons-repeater{padding:30px 65px}}@media (max-width: 767px){.uagb-buttons__outer-wrap.uagb-btn-mobile__small-btn .uagb-buttons-repeater{padding:5px 10px}.uagb-buttons__outer-wrap.uagb-btn-mobile__medium-btn .uagb-buttons-repeater{padding:12px 24px}.uagb-buttons__outer-wrap.uagb-btn-mobile__large-btn .uagb-buttons-repeater{padding:20px 30px}.uagb-buttons__outer-wrap.uagb-btn-mobile__extralarge-btn .uagb-buttons-repeater{padding:30px 65px}}
.uagb-buttons__outer-wrap .uagb-buttons-repeater{display:flex;justify-content:center;align-items:center;transition:box-shadow 0.2s ease}.uagb-buttons__outer-wrap .uagb-buttons-repeater a.uagb-button__link{display:flex;justify-content:center}.uagb-buttons__outer-wrap .uagb-buttons-repeater .uagb-button__icon{font-size:inherit;display:flex;align-items:center}.uagb-buttons__outer-wrap .uagb-buttons-repeater .uagb-button__icon svg{fill:currentColor;width:inherit;height:inherit}
.wp-block-uagb-container.uagb-is-root-container .uagb-block-9fe35c46{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-9fe35c46 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-9fe35c46 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-9fe35c46 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-9fe35c46 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-9fe35c46 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-9fe35c46 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 48px;}.wp-block-uagb-container.uagb-block-9fe35c46{box-shadow: 0px 0px   #00000070 ;padding-top: 112px;padding-bottom: 112px;padding-left: 40px;padding-right: 40px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 48px;overflow: visible;border-color: inherit;background-color: var(--ast-global-color-4);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-b923c04a{max-width: 48%;width: 100%;}.wp-block-uagb-container.uagb-block-b923c04a .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-b923c04a .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-b923c04a .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-b923c04a .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-b923c04a .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-b923c04a > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: stretch;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-b923c04a{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: stretch;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-981acbbe.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-981acbbe .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-981acbbe.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-981acbbe.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;text-align: center;}.uagb-block-981acbbe.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-981acbbe.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-981acbbe.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-981acbbe.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-981acbbe.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-981acbbe.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-981acbbe.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-981acbbe.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-981acbbe.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 580px;height: 423px;}.uagb-block-981acbbe.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-981acbbe.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-981acbbe.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-981acbbe.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-ac214759{max-width: 52%;width: 100%;}.wp-block-uagb-container.uagb-block-ac214759 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-ac214759 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-ac214759 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-ac214759 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-ac214759 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-ac214759 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-ac214759{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;}.uagb-block-d7a334c0 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-d7a334c0 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-d7a334c0 .uagb-ifb-icon svg{fill: #333;}.uagb-block-d7a334c0.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-d7a334c0 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-d7a334c0 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-d7a334c0.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-d7a334c0.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-d7a334c0 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-d7a334c0 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-d7a334c0 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-d7a334c0 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-d7a334c0.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-d7a334c0.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-d7a334c0.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-d7a334c0.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-d7a334c0 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-d7a334c0.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 28px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-d7a334c0.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 32px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-d7a334c0 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-d7a334c0 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-d7a334c0 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-d7a334c0 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-d7a334c0.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-d7a334c0.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-d7a334c0 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-d7a334c0.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-d7a334c0.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-d7a334c0 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-d7a334c0.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-d7a334c0 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-d7a334c0 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-d7a334c0.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-0e0caf32.wp-block-uagb-buttons.uagb-buttons__outer-wrap .uagb-buttons__wrap {column-gap: 10px;}.uagb-block-0e0caf32.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-24a67a18.wp-block-uagb-buttons-child .uagb-buttons-repeater{background: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-24a67a18 .wp-block-button__link{background: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-24a67a18 .wp-block-button__link:hover{background: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-24a67a18 .wp-block-button__link:focus{background: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-24a67a18 .uagb-button__wrapper .uagb-buttons-repeater{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-24a67a18 .wp-block-button__link.has-text-color:hover .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-24a67a18 .wp-block-button__link.has-text-color:focus .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-24a67a18 .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-24a67a18 .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link:hover{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-24a67a18 .uagb-buttons-repeater.wp-block-button__link{border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-color: #333;border-style: none;}.wp-block-uagb-buttons .uagb-block-24a67a18 .uagb-buttons-repeater.wp-block-button__link:hover{border-color: #333;}.wp-block-uagb-buttons .uagb-block-24a67a18 .uagb-buttons-repeater.wp-block-button__link:focus{border-color: #333;}.wp-block-uagb-buttons .uagb-block-24a67a18.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-color: #333;border-style: none;}.wp-block-uagb-buttons .uagb-block-24a67a18.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater:hover{border-color: #333;}.wp-block-uagb-buttons .uagb-block-24a67a18 .uagb-buttons-repeater .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-24a67a18 .uagb-buttons-repeater:hover .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-24a67a18 .uagb-buttons-repeater:focus .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-24a67a18 .uagb-buttons-repeater .uagb-button__icon > svg{width: 15px;height: 15px;fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-24a67a18 .uagb-buttons-repeater:hover .uagb-button__icon > svg{fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-24a67a18 .uagb-buttons-repeater:focus .uagb-button__icon > svg{fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-24a67a18 .uagb-buttons-repeater .uagb-button__icon-position-after{margin-left: 8px;}.wp-block-uagb-buttons .uagb-block-24a67a18 .uagb-buttons-repeater .uagb-button__icon-position-before{margin-right: 8px;}.wp-block-uagb-buttons .uagb-block-24a67a18 .uagb-button__link{text-transform: normal;text-decoration: none;}@media only screen and (max-width: 976px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-9fe35c46{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-9fe35c46 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 40px;}.wp-block-uagb-container.uagb-block-9fe35c46{padding-top: 80px;padding-bottom: 80px;padding-left: 32px;padding-right: 32px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 40px;background-color: var(--ast-global-color-4);;}.wp-block-uagb-container.uagb-block-9fe35c46.wp-block-uagb-container > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-uagb-image ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not( .spectra-container-link-overlay ):not(.spectra-image-gallery__control-lightbox):not(.wp-block-uagb-lottie):not(.uagb-container-inner-blocks-wrap){width: 100%;}.wp-block-uagb-container.uagb-block-9fe35c46.wp-block-uagb-container > .uagb-container-inner-blocks-wrap > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not(.spectra-image-gallery__control-lightbox){width: 100%;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-b923c04a{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-b923c04a > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-b923c04a{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;flex-direction: row;align-items: stretch;justify-content: flex-start;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-block-b923c04a.wp-block-uagb-container > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-uagb-image ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not( .spectra-container-link-overlay ):not(.spectra-image-gallery__control-lightbox):not(.wp-block-uagb-lottie):not(.uagb-container-inner-blocks-wrap){width: 100%;}.wp-block-uagb-container.uagb-block-b923c04a.wp-block-uagb-container > .uagb-container-inner-blocks-wrap > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not(.spectra-image-gallery__control-lightbox){width: 100%;}.uagb-block-981acbbe.wp-block-uagb-image--layout-default figure img{border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-981acbbe.wp-block-uagb-image--layout-overlay figure img{border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-981acbbe.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 564px;height: 423px;}.uagb-block-981acbbe.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-981acbbe .wp-block-uagb-image__figure{align-items: flex-start;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-ac214759{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-ac214759 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: flex-start;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-ac214759{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;flex-direction: column;align-items: flex-start;justify-content: flex-start;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-block-ac214759.wp-block-uagb-container > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-uagb-image ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not( .spectra-container-link-overlay ):not(.spectra-image-gallery__control-lightbox):not(.wp-block-uagb-lottie):not(.uagb-container-inner-blocks-wrap){width: 100%;}.wp-block-uagb-container.uagb-block-ac214759.wp-block-uagb-container > .uagb-container-inner-blocks-wrap > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not(.spectra-image-gallery__control-lightbox){width: 100%;}.uagb-block-d7a334c0.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 28px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-d7a334c0.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 32px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-d7a334c0.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-d7a334c0.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-d7a334c0.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-d7a334c0 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-d7a334c0 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-d7a334c0 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-d7a334c0 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-d7a334c0 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-d7a334c0.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-d7a334c0.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-d7a334c0 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-d7a334c0.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-d7a334c0 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-d7a334c0 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-d7a334c0.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-0e0caf32.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-24a67a18.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-style: none;border-color: #333;}}@media only screen and (max-width: 767px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-9fe35c46{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-9fe35c46 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: flex-start;justify-content: flex-start;flex-wrap: wrap;align-content: flex-start;row-gap: 40px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-9fe35c46{padding-top: 64px;padding-bottom: 64px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 40px;column-gap: 0px;background-color: var(--ast-global-color-4);;}.wp-block-uagb-container.uagb-block-9fe35c46.wp-block-uagb-container > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-uagb-image ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not( .spectra-container-link-overlay ):not(.spectra-image-gallery__control-lightbox):not(.wp-block-uagb-lottie):not(.uagb-container-inner-blocks-wrap){width: 100%;}.wp-block-uagb-container.uagb-block-9fe35c46.wp-block-uagb-container > .uagb-container-inner-blocks-wrap > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not(.spectra-image-gallery__control-lightbox){width: 100%;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-b923c04a{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-b923c04a > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-b923c04a{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;flex-wrap: wrap;}.uagb-block-981acbbe.wp-block-uagb-image--layout-default figure img{border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-981acbbe.wp-block-uagb-image--layout-overlay figure img{border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-981acbbe.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 300px;}.uagb-block-981acbbe.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-981acbbe .wp-block-uagb-image__figure{align-items: flex-start;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-ac214759{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-ac214759 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: flex-start;justify-content: flex-start;flex-wrap: wrap;align-content: flex-start;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-ac214759{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;flex-direction: row;align-items: flex-start;justify-content: flex-start;flex-wrap: wrap;align-content: flex-start;}.wp-block-uagb-container.uagb-block-ac214759.wp-block-uagb-container > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-uagb-image ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not( .spectra-container-link-overlay ):not(.spectra-image-gallery__control-lightbox):not(.wp-block-uagb-lottie):not(.uagb-container-inner-blocks-wrap){width: 100%;}.wp-block-uagb-container.uagb-block-ac214759.wp-block-uagb-container > .uagb-container-inner-blocks-wrap > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not(.spectra-image-gallery__control-lightbox){width: 100%;}.uagb-block-d7a334c0.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 24px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-d7a334c0.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 32px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-d7a334c0.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-d7a334c0.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-d7a334c0 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-d7a334c0 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-d7a334c0.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-d7a334c0 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-d7a334c0 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-d7a334c0 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-d7a334c0.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-d7a334c0.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-d7a334c0 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-d7a334c0.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-d7a334c0 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-d7a334c0 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-d7a334c0.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-0e0caf32.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-24a67a18.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-style: none;border-color: #333;}}.uag-blocks-common-selector{z-index:var(--z-index-desktop) !important}@media (max-width: 976px){.uag-blocks-common-selector{z-index:var(--z-index-tablet) !important}}@media (max-width: 767px){.uag-blocks-common-selector{z-index:var(--z-index-mobile) !important}}
";s:7:"content";s:1854:"
<div class="wp-block-uagb-container uagb-block-9fe35c46 alignfull uagb-is-root-container"><div class="uagb-container-inner-blocks-wrap">
<div class="wp-block-uagb-container uagb-block-b923c04a">
<div class="wp-block-uagb-image alignleft uagb-block-981acbbe wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-left"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/10/natures-02.jpg " sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/10/natures-02.jpg" alt="" class="uag-image-80574" width="580" height="423" title="" loading="lazy"/></figure></div>
</div>



<div class="wp-block-uagb-container uagb-block-ac214759">
<div class="wp-block-uagb-info-box uagb-block-d7a334c0 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h2 class="uagb-ifb-title">Unlock your potential and transform your life today!</h2></div><p class="uagb-ifb-desc">Don't wait any longer. Take action today and embark on an exciting journey to achieve your goals. Let us guide you through the process and help you unleash your true potential.</p></div></div>



<div class="wp-block-uagb-buttons uagb-buttons__outer-wrap uagb-btn__default-btn uagb-btn-tablet__default-btn uagb-btn-mobile__default-btn uagb-block-0e0caf32"><div class="uagb-buttons__wrap uagb-buttons-layout-wrap">
<div class="wp-block-uagb-buttons-child uagb-buttons__outer-wrap uagb-block-24a67a18 wp-block-button"><div class="uagb-button__wrapper"><a class="uagb-buttons-repeater wp-block-button__link" href="#" onclick="return false;" rel="follow noopener" target="_self"><div class="uagb-button__link">Get Started</div></a></div></div>
</div></div>
</div>
</div></div>
";}s:8:"id-75755";a:10:{s:5:"title";s:17:"Call To Action 08";s:3:"url";s:56:"https://websitedemos.net/astra-blocks/call-to-action-08/";s:3:"tag";a:0:{}s:8:"category";i:832;s:16:"primary-category";s:0:"";s:4:"type";s:5:"block";s:12:"page-builder";s:9:"gutenberg";s:16:"required-plugins";a:0:{}s:10:"stylesheet";s:48783:".wp-block-uagb-container{display:flex;position:relative;box-sizing:border-box;transition-property:box-shadow;transition-duration:0.2s;transition-timing-function:ease}.wp-block-uagb-container .spectra-container-link-overlay{bottom:0;left:0;position:absolute;right:0;top:0;z-index:10}.wp-block-uagb-container.uagb-is-root-container{margin-left:auto;margin-right:auto}.wp-block-uagb-container.alignfull.uagb-is-root-container .uagb-container-inner-blocks-wrap{display:flex;position:relative;box-sizing:border-box;margin-left:auto !important;margin-right:auto !important}.wp-block-uagb-container .uagb-container__video-wrap{height:100%;width:100%;top:0;left:0;position:absolute;overflow:hidden;-webkit-transition:opacity 1s;-o-transition:opacity 1s;transition:opacity 1s}.wp-block-uagb-container .uagb-container__video-wrap video{max-width:100%;width:100%;height:100%;margin:0;line-height:1;border:none;display:inline-block;vertical-align:baseline;-o-object-fit:cover;object-fit:cover;background-size:cover}.st-block-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap>*:not(.wp-block-uagb-container):not(.wp-block-uagb-column):not(.wp-block-uagb-container):not(.wp-block-uagb-section):not(.uagb-container__shape):not(.uagb-container__video-wrap):not(.wp-block-spectra-pro-register):not(.wp-block-spectra-pro-login):not(.uagb-slider-container):not(.spectra-image-gallery__control-lightbox),.st-block-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap,.st-block-container .wp-block-uagb-container>*:not(.wp-block-uagb-container):not(.wp-block-uagb-column):not(.wp-block-uagb-container):not(.wp-block-uagb-section):not(.uagb-container__shape):not(.uagb-container__video-wrap):not(.wp-block-uagb-image):not(.wp-block-spectra-pro-register):not(.wp-block-spectra-pro-login):not(.uagb-slider-container):not(.spectra-container-link-overlay):not(.spectra-image-gallery__control-lightbox):not(.wp-block-uagb-lottie):not(.uagb-faq__outer-wrap){min-width:unset !important;width:100%;position:relative}.st-block-container .ast-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap>.wp-block-uagb-container>ul,.st-block-container .ast-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap>.wp-block-uagb-container ol,.st-block-container .ast-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap>ul,.st-block-container .ast-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap ol{max-width:-webkit-fill-available;margin-block-start:0;margin-block-end:0;margin-left:20px}.ast-plain-container .editor-styles-wrapper .block-editor-block-list__layout.is-root-container .uagb-is-root-container.wp-block-uagb-container.alignwide{margin-left:auto;margin-right:auto}.uagb-container__shape{overflow:hidden;position:absolute;left:0;width:100%;line-height:0;direction:ltr}.uagb-container__shape-top{top:-3px}.uagb-container__shape-bottom{bottom:-3px}.uagb-container__shape.uagb-container__invert.uagb-container__shape-bottom,.uagb-container__shape.uagb-container__invert.uagb-container__shape-top{-webkit-transform:rotate(180deg);-ms-transform:rotate(180deg);transform:rotate(180deg)}.uagb-container__shape.uagb-container__shape-flip svg{transform:translateX(-50%) rotateY(180deg)}.uagb-container__shape svg{display:block;width:-webkit-calc(100% + 1.3px);width:calc(100% + 1.3px);position:relative;left:50%;-webkit-transform:translateX(-50%);-ms-transform:translateX(-50%);transform:translateX(-50%)}.uagb-container__shape .uagb-container__shape-fill{-webkit-transform-origin:center;-ms-transform-origin:center;transform-origin:center;-webkit-transform:rotateY(0deg);transform:rotateY(0deg)}.uagb-container__shape.uagb-container__shape-above-content{z-index:9;pointer-events:none}.nv-single-page-wrap .nv-content-wrap.entry-content .wp-block-uagb-container.alignfull{margin-left:calc(50% - 50vw);margin-right:calc(50% - 50vw)}@media only screen and (max-width: 767px){.wp-block-uagb-container .wp-block-uagb-advanced-heading{width:-webkit-fill-available !important}}
.uagb-ifb-content>svg *{-webkit-transition:all 0.2s;-o-transition:all 0.2s;transition:all 0.2s}.uagb-ifb-content>svg,.uagb-ifb-content{display:inline-block}.uagb-ifb-content>svg{vertical-align:middle;width:inherit;height:inherit;font-style:initial}.uagb-ifb-content .uagb-ifb-icon-wrap svg{box-sizing:content-box;width:inherit;height:inherit}.uagb-ifb-button-wrapper:empty{display:none}div.uagb-ifb-button-wrapper a.uagb-infobox-cta-link,div.uagb-ifb-cta a.uagb-infobox-cta-link,.entry .entry-content a.uagb-infobox-cta-link,a.uagb-infobox-link-wrap,.entry .entry-content a.uagb-infobox-link-wrap{text-decoration:none;align-items:center}.uagb-infobox-icon-left-title.uagb-infobox-image-valign-middle .uagb-ifb-title-wrap,.uagb-infobox-icon-right-title.uagb-infobox-image-valign-middle .uagb-ifb-title-wrap,.uagb-infobox-image-valign-middle .uagb-ifb-icon-wrap,.uagb-infobox-image-valign-middle .uagb-ifb-image-content,.uagb-infobox-icon-left.uagb-infobox-image-valign-middle .uagb-ifb-content,.uagb-infobox-icon-right.uagb-infobox-image-valign-middle .uagb-ifb-content{-ms-flex-item-align:center;-webkit-align-self:center;align-self:center}.uagb-infobox-icon-left-title.uagb-infobox-image-valign-top .uagb-ifb-title-wrap,.uagb-infobox-icon-right-title.uagb-infobox-image-valign-top .uagb-ifb-title-wrap,.uagb-infobox-image-valign-top .uagb-ifb-icon-wrap,.uagb-infobox-image-valign-top .uagb-ifb-image-content,.uagb-infobox-icon-left.uagb-infobox-image-valign-top .uagb-ifb-content,.uagb-infobox-icon-right.uagb-infobox-image-valign-top .uagb-ifb-content{-webkit-align-self:self-start;align-self:self-start}.uagb-infobox-left{justify-content:flex-start;text-align:left;-webkit-box-pack:start;-ms-flex-pack:start;-webkit-justify-content:flex-start;-moz-box-pack:start}.uagb-infobox-center{justify-content:center;text-align:center;-webkit-box-pack:center;-ms-flex-pack:center;-webkit-justify-content:center;-moz-box-pack:center}.uagb-infobox-right{justify-content:flex-end;text-align:right;-webkit-box-pack:end;-ms-flex-pack:end;-webkit-justify-content:flex-end;-moz-box-pack:end}.uagb-infobox-icon-above-title.uagb-infobox__content-wrap,.uagb-infobox-icon-below-title.uagb-infobox__content-wrap{display:block;width:100%}.uagb-infobox-icon-left-title .uagb-ifb-content>svg,.uagb-infobox-icon-left .uagb-ifb-content>svg{margin-right:10px}.uagb-infobox-icon-right-title .uagb-ifb-content>svg,.uagb-infobox-icon-right .uagb-ifb-content>svg{margin-left:10px}.uagb-infobox-icon-left.uagb-infobox__content-wrap,.uagb-infobox-icon-right.uagb-infobox__content-wrap,.uagb-infobox-icon-left-title .uagb-ifb-left-title-image,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image{display:-webkit-box;display:-ms-flexbox;display:-webkit-flex;display:-moz-box;display:flex;-js-display:flex}.uagb-infobox-icon-left-title .uagb-ifb-left-title-image .uagb-ifb-image-content,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image .uagb-ifb-image-content,.uagb-infobox-icon-left .uagb-ifb-image-content,.uagb-infobox-icon-right .uagb-ifb-image-content{flex-shrink:0;line-height:0}.uagb-infobox-icon-left-title .uagb-ifb-left-title-image .uagb-ifb-title-wrap,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image .uagb-ifb-title-wrap,.uagb-infobox-icon-left .uagb-ifb-content,.uagb-infobox-icon-right .uagb-ifb-content{flex-grow:1}.uagb-infobox-icon-right.uagb-infobox__content-wrap,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image{-webkit-box-pack:end;-ms-flex-pack:end;-webkit-justify-content:flex-end;-moz-box-pack:end;justify-content:flex-end}.uagb-ifb-content img{position:relative;display:inline-block;line-height:0;width:auto;height:auto !important;max-width:100%;border-radius:inherit;-webkit-box-sizing:content-box;-moz-box-sizing:content-box;-webkit-border-radius:inherit}.uagb-infobox-module-link{position:absolute;top:0;right:0;bottom:0;left:0;z-index:4;width:100%;height:100%}.uagb-edit-mode .uagb-infobox-module-link{z-index:2}.uagb-infobox-link-icon-after{margin-right:0;margin-left:5px}.uagb-infobox-link-icon-before{margin-right:5px;margin-left:0}.uagb-infobox-link-icon{-webkit-transition:all 200ms linear;transition:all 200ms linear}.uagb-infobox__content-wrap{box-sizing:border-box;position:relative;width:100%;word-break:break-word;z-index:1}.uagb-ifb-separator{display:inline-block;margin:0;border-top-color:#333;border-top-style:solid;border-top-width:2px;line-height:0}.uagb-ifb-button-wrapper{line-height:1}.uagb-ifb-button-wrapper.uagb-ifb-button-type-text .uagb-infobox-cta-link.wp-block-button__link{background-color:unset;border:none}.uagb-ifb-button-wrapper.uagb-ifb-button-type-text .uagb-infobox-cta-link.wp-block-button__link:hover{background-color:unset;border-color:unset}.uagb-ifb-button-wrapper .uagb-infobox-cta-link{cursor:pointer}.uagb-ifb-button-wrapper .wp-block-button__link svg{fill:currentColor}.uagb-infobox__content-wrap a{-webkit-box-shadow:none;box-shadow:none;text-decoration:none}.uagb-ifb-title-wrap{width:100%}.uagb-ifb-title{margin-block-start:0}.uagb-ifb-title-wrap .uagb-ifb-title-prefix{display:block;padding:0;margin:0}.uagb-infobox__content-wrap.uagb-infobox__content-wrap{position:relative}.uagb-ifb-content{width:100%}.uagb-infobox__content-wrap.uagb-infobox,.uagb-ifb-content,.uagb-ifb-title-wrap,.uagb-ifb-title-prefix *,svg.dashicon.dashicons-upload{z-index:1}a.uagb-infobox-link-wrap{color:inherit}.uagb-ifb-content p:empty{display:none}.uagb-infobox__content-wrap .uagb-ifb-content img{display:inline-block;max-width:100%}.uagb-infobox__content-wrap .uagb-ifb-content svg{display:inline-block}.uagb-infobox__content-wrap .uagb-ifb-icon-wrap,.uagb-infobox-icon-left .uagb-ifb-image-content,.uagb-infobox-icon-right .uagb-ifb-image-content{box-sizing:content-box}.uagb-infobox-cta-link>svg{vertical-align:middle;width:15px;height:15px;font-size:15px}.uagb-infobox-cta-link{display:inline-flex}.block-editor-page #wpwrap .uagb-infobox-cta-link svg,.uagb-infobox-cta-link svg{font-style:normal}.uagb-infobox-icon-left-title .uagb-ifb-icon-wrap,.uagb-infobox-icon-left .uagb-ifb-icon-wrap{margin-right:10px;line-height:0}.uagb-infobox-icon-right-title .uagb-ifb-icon-wrap,.uagb-infobox-icon-right .uagb-ifb-icon-wrap{margin-left:10px;line-height:0}.uagb-infobox-icon-left .uagb-ifb-left-right-wrap,.uagb-infobox-icon-right .uagb-ifb-left-right-wrap,.uagb-infobox-icon-left-title .uagb-ifb-left-title-image,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image{display:-webkit-box;display:-ms-flexbox;display:flex}.uagb-infobox-icon-right .uagb-ifb-left-right-wrap,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image{-webkit-box-pack:end;-ms-flex-pack:end;-webkit-justify-content:flex-end;-moz-box-pack:end;justify-content:flex-end}a.uagb-infbox__link-to-all{position:absolute;top:0;left:0;z-index:3;width:100%;height:100%;box-shadow:none;text-decoration:none;-webkit-box-shadow:none}@media only screen and (max-width: 976px){.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-image-content{padding:0;margin-bottom:20px}.uagb-infobox-stacked-tablet.uagb-reverse-order-tablet.uagb-infobox__content-wrap{display:-webkit-inline-box;display:-ms-inline-flexbox;display:-webkit-inline-flex;display:-moz-inline-box;display:inline-flex;flex-direction:column-reverse;-js-display:inline-flex;-webkit-box-orient:vertical;-webkit-box-direction:reverse;-ms-flex-direction:column-reverse;-webkit-flex-direction:column-reverse;-moz-box-orient:vertical;-moz-box-direction:reverse}.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-content,.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-icon-wrap,.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-image-content{display:block;width:100%;text-align:center}.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-icon-wrap,.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-image-content{margin-right:0;margin-left:0}.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap{display:inline-block}.uagb-infobox-icon-left-title.uagb-infobox-stacked-tablet .uagb-ifb-image-content,.uagb-infobox-icon-left-title.uagb-infobox-stacked-tablet .uagb-ifb-icon-wrap,.uagb-infobox-icon-left.uagb-infobox-stacked-tablet .uagb-ifb-image-content,.uagb-infobox-icon-left.uagb-infobox-stacked-tablet .uagb-ifb-icon-wrap{margin-right:0}.uagb-infobox-icon-right-title.uagb-infobox-stacked-tablet .uagb-ifb-image-content,.uagb-infobox-icon-right-title.uagb-infobox-stacked-tablet .uagb-ifb-icon-wrap,.uagb-infobox-icon-right.uagb-infobox-stacked-tablet .uagb-ifb-image-content,.uagb-infobox-icon-right.uagb-infobox-stacked-tablet .uagb-ifb-icon-wrap{margin-left:0}.uagb-infobox-icon-left-title .uagb-ifb-separator{margin:10px 0}}@media screen and (max-width: 767px){.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap{display:inline-block}.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-image-content,.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-icon-wrap{padding:0;margin-bottom:20px;margin-right:0;margin-left:0}.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap.uagb-reverse-order-mobile{display:-webkit-inline-box;display:-ms-inline-flexbox;display:-webkit-inline-flex;display:-moz-inline-box;display:inline-flex;flex-direction:column-reverse;-js-display:inline-flex;-webkit-box-orient:vertical;-webkit-box-direction:reverse;-ms-flex-direction:column-reverse;-webkit-flex-direction:column-reverse;-moz-box-orient:vertical;-moz-box-direction:reverse}.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-image-content,.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-icon-wrap,.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-content{display:block;width:100%;text-align:center}.uagb-infobox-icon-left-title.uagb-infobox-stacked-mobile .uagb-ifb-image-content,.uagb-infobox-icon-left-title.uagb-infobox-stacked-mobile .uagb-ifb-icon-wrap,.uagb-infobox-icon-left.uagb-infobox-stacked-mobile .uagb-ifb-image-content,.uagb-infobox-icon-left.uagb-infobox-stacked-mobile .uagb-ifb-icon-wrap{margin-right:0}.uagb-infobox-icon-right-title.uagb-infobox-stacked-mobile .uagb-ifb-image-content,.uagb-infobox-icon-right-title.uagb-infobox-stacked-mobile .uagb-ifb-icon-wrap,.uagb-infobox-icon-right.uagb-infobox-stacked-mobile .uagb-ifb-image-content,.uagb-infobox-icon-right.uagb-infobox-stacked-mobile .uagb-ifb-icon-wrap{margin-left:0}.uagb-infobox-icon-left-title .uagb-ifb-separator{margin:10px 0}}.uagb-ifb-icon svg{width:inherit;height:inherit;vertical-align:middle}.uagb-ifb-button-icon{height:15px;width:15px;font-size:15px;vertical-align:middle}.uagb-ifb-button-icon svg{height:inherit;width:inherit;display:inline-block}.uagb-ifb-button-icon.uagb-ifb-align-icon-after{float:right}.uagb-ifb-cta-button{display:inline-block}.uagb-disable-link{pointer-events:none}
.uagb-buttons__outer-wrap .uagb-buttons__wrap{display:inline-flex;width:100%}.uagb-buttons__outer-wrap.uagb-btn__small-btn .uagb-buttons-repeater{padding:5px 10px}.uagb-buttons__outer-wrap.uagb-btn__medium-btn .uagb-buttons-repeater{padding:12px 24px}.uagb-buttons__outer-wrap.uagb-btn__large-btn .uagb-buttons-repeater{padding:20px 30px}.uagb-buttons__outer-wrap.uagb-btn__extralarge-btn .uagb-buttons-repeater{padding:30px 65px}@media (max-width: 976px){.uagb-buttons__outer-wrap.uagb-btn-tablet__small-btn .uagb-buttons-repeater{padding:5px 10px}.uagb-buttons__outer-wrap.uagb-btn-tablet__medium-btn .uagb-buttons-repeater{padding:12px 24px}.uagb-buttons__outer-wrap.uagb-btn-tablet__large-btn .uagb-buttons-repeater{padding:20px 30px}.uagb-buttons__outer-wrap.uagb-btn-tablet__extralarge-btn .uagb-buttons-repeater{padding:30px 65px}}@media (max-width: 767px){.uagb-buttons__outer-wrap.uagb-btn-mobile__small-btn .uagb-buttons-repeater{padding:5px 10px}.uagb-buttons__outer-wrap.uagb-btn-mobile__medium-btn .uagb-buttons-repeater{padding:12px 24px}.uagb-buttons__outer-wrap.uagb-btn-mobile__large-btn .uagb-buttons-repeater{padding:20px 30px}.uagb-buttons__outer-wrap.uagb-btn-mobile__extralarge-btn .uagb-buttons-repeater{padding:30px 65px}}
.uagb-buttons__outer-wrap .uagb-buttons-repeater{display:flex;justify-content:center;align-items:center;transition:box-shadow 0.2s ease}.uagb-buttons__outer-wrap .uagb-buttons-repeater a.uagb-button__link{display:flex;justify-content:center}.uagb-buttons__outer-wrap .uagb-buttons-repeater .uagb-button__icon{font-size:inherit;display:flex;align-items:center}.uagb-buttons__outer-wrap .uagb-buttons-repeater .uagb-button__icon svg{fill:currentColor;width:inherit;height:inherit}
.wp-block-uagb-container.uagb-is-root-container .uagb-block-8d6078cf{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-8d6078cf .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-8d6078cf .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-8d6078cf .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-8d6078cf .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-8d6078cf .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-8d6078cf > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 72px;}.wp-block-uagb-container.uagb-block-8d6078cf{box-shadow: 0px 0px   #00000070 ;padding-top: 112px;padding-bottom: 112px;padding-left: 40px;padding-right: 40px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 72px;overflow: visible;border-color: inherit;background-color: var(--ast-global-color-4);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-b9121c40{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-b9121c40 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-b9121c40 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-b9121c40 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-b9121c40 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-b9121c40 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-b9121c40 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 72px;}.wp-block-uagb-container.uagb-block-b9121c40{box-shadow: 0px 0px   #00000070 ;padding-top: 48px;padding-bottom: 48px;padding-left: 48px;padding-right: 48px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 72px;overflow: visible;border-top-width: 0px;border-left-width: 0px;border-right-width: 0px;border-bottom-width: 0px;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: solid;border-color: var(--ast-global-color-6);background-color: var(--ast-global-color-5);;}.wp-block-uagb-container.wp-block-uagb-container.uagb-block-b9121c40:hover{border-color: var(--ast-global-color-6);}.wp-block-uagb-container.uagb-is-root-container .uagb-block-2c90cadd{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-block-2c90cadd .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-2c90cadd .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-2c90cadd .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-2c90cadd .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-2c90cadd .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-2c90cadd > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: flex-start;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-2c90cadd{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: flex-start;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-7a9c0ee1 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-7a9c0ee1 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-7a9c0ee1 .uagb-ifb-icon svg{fill: #333;}.uagb-block-7a9c0ee1.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-7a9c0ee1 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-7a9c0ee1 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-7a9c0ee1.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-7a9c0ee1.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-7a9c0ee1 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-7a9c0ee1 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-7a9c0ee1 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-7a9c0ee1 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-7a9c0ee1.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-7a9c0ee1.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-7a9c0ee1.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-7a9c0ee1.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-7a9c0ee1 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-7a9c0ee1.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-7a9c0ee1.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 20px;}.uagb-block-7a9c0ee1 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-7a9c0ee1 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-7a9c0ee1 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-7a9c0ee1 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-7a9c0ee1.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-7a9c0ee1.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-7a9c0ee1 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-7a9c0ee1.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-7a9c0ee1.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-7a9c0ee1 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-7a9c0ee1.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-7a9c0ee1 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-7a9c0ee1 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-7a9c0ee1.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-6daec00a{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-block-6daec00a .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-6daec00a .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-6daec00a .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-6daec00a .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-6daec00a .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-6daec00a > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: flex-start;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-6daec00a{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: flex-start;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-484b5d38 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-484b5d38 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-484b5d38 .uagb-ifb-icon svg{fill: #333;}.uagb-block-484b5d38.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-484b5d38 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-484b5d38 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-484b5d38.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-484b5d38.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-484b5d38 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-484b5d38 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-484b5d38 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-484b5d38 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-484b5d38.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-484b5d38.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-484b5d38.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-484b5d38.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-484b5d38 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-484b5d38.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 10px;}.uagb-block-484b5d38.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-2);margin-bottom: 40px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-484b5d38 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-484b5d38 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-484b5d38 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-484b5d38 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-484b5d38.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-484b5d38.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-484b5d38 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-484b5d38.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-484b5d38.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-484b5d38 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-484b5d38.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-484b5d38 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-484b5d38 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-484b5d38.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-61ea4832.wp-block-uagb-buttons.uagb-buttons__outer-wrap .uagb-buttons__wrap {column-gap: 10px;}.uagb-block-61ea4832.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-064f5a43.wp-block-uagb-buttons-child .uagb-buttons-repeater{background: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-064f5a43 .wp-block-button__link{background: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-064f5a43 .wp-block-button__link:hover{background: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-064f5a43 .wp-block-button__link:focus{background: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-064f5a43 .uagb-button__wrapper .uagb-buttons-repeater{color: #ffffff;margin-top: 0px;margin-bottom: 0px;margin-left: 0px;margin-right: 0px;}.wp-block-uagb-buttons .uagb-block-064f5a43 .wp-block-button__link.has-text-color:hover .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-064f5a43 .wp-block-button__link.has-text-color:focus .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-064f5a43 .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-064f5a43 .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link:hover{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-064f5a43 .uagb-buttons-repeater.wp-block-button__link{border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-color: #333;border-style: none;}.wp-block-uagb-buttons .uagb-block-064f5a43 .uagb-buttons-repeater.wp-block-button__link:hover{border-color: #333;}.wp-block-uagb-buttons .uagb-block-064f5a43 .uagb-buttons-repeater.wp-block-button__link:focus{border-color: #333;}.wp-block-uagb-buttons .uagb-block-064f5a43.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-color: #333;border-style: none;}.wp-block-uagb-buttons .uagb-block-064f5a43.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater:hover{border-color: #333;}.wp-block-uagb-buttons .uagb-block-064f5a43 .uagb-buttons-repeater .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-064f5a43 .uagb-buttons-repeater:hover .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-064f5a43 .uagb-buttons-repeater:focus .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-064f5a43 .uagb-buttons-repeater .uagb-button__icon > svg{width: 15px;height: 15px;fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-064f5a43 .uagb-buttons-repeater:hover .uagb-button__icon > svg{fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-064f5a43 .uagb-buttons-repeater:focus .uagb-button__icon > svg{fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-064f5a43 .uagb-buttons-repeater .uagb-button__icon-position-after{margin-left: 8px;}.wp-block-uagb-buttons .uagb-block-064f5a43 .uagb-buttons-repeater .uagb-button__icon-position-before{margin-right: 8px;}.wp-block-uagb-buttons .uagb-block-064f5a43 .uagb-button__link{text-transform: normal;text-decoration: none;}@media only screen and (max-width: 976px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-8d6078cf{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-8d6078cf > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: flex-start;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-8d6078cf{padding-top: 80px;padding-bottom: 80px;padding-left: 32px;padding-right: 32px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;background-color: var(--ast-global-color-4);;}.wp-block-uagb-container.uagb-block-8d6078cf.wp-block-uagb-container > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-uagb-image ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not( .spectra-container-link-overlay ):not(.spectra-image-gallery__control-lightbox):not(.wp-block-uagb-lottie):not(.uagb-container-inner-blocks-wrap){width: 100%;}.wp-block-uagb-container.uagb-block-8d6078cf.wp-block-uagb-container > .uagb-container-inner-blocks-wrap > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not(.spectra-image-gallery__control-lightbox){width: 100%;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-b9121c40{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-b9121c40 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: flex-start;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 48px;}.wp-block-uagb-container.uagb-block-b9121c40{padding-top: 24px;padding-bottom: 24px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 48px;border-style: solid;border-color: var(--ast-global-color-6);background-color: var(--ast-global-color-5);;}.wp-block-uagb-container.uagb-block-b9121c40.wp-block-uagb-container > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-uagb-image ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not( .spectra-container-link-overlay ):not(.spectra-image-gallery__control-lightbox):not(.wp-block-uagb-lottie):not(.uagb-container-inner-blocks-wrap){width: 100%;}.wp-block-uagb-container.uagb-block-b9121c40.wp-block-uagb-container > .uagb-container-inner-blocks-wrap > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not(.spectra-image-gallery__control-lightbox){width: 100%;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-2c90cadd{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-2c90cadd > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-2c90cadd{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;}.uagb-block-7a9c0ee1.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-7a9c0ee1.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7a9c0ee1.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-7a9c0ee1.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-7a9c0ee1 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-7a9c0ee1 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-7a9c0ee1 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-7a9c0ee1 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7a9c0ee1 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7a9c0ee1.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-7a9c0ee1.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-7a9c0ee1 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-7a9c0ee1.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-7a9c0ee1 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-7a9c0ee1 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-7a9c0ee1.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-6daec00a{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-6daec00a > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-6daec00a{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;}.uagb-block-484b5d38.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 40px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-484b5d38.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-484b5d38.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-484b5d38.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-484b5d38 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-484b5d38 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-484b5d38 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-484b5d38 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-484b5d38 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-484b5d38.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-484b5d38.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-484b5d38 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-484b5d38.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-484b5d38 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-484b5d38 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-484b5d38.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-61ea4832.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-064f5a43 .uagb-buttons-repeater.wp-block-button__link{margin-top: 0px;margin-bottom: 0px;margin-left: 0px;margin-right: 0px;}.wp-block-uagb-buttons .uagb-block-064f5a43.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-style: none;border-color: #333;}.wp-block-uagb-buttons .uagb-block-064f5a43 .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link{margin-top: 0px;margin-bottom: 0px;margin-left: 0px;margin-right: 0px;}}@media only screen and (max-width: 767px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-8d6078cf{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-8d6078cf > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-8d6078cf{padding-top: 64px;padding-bottom: 64px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;background-color: var(--ast-global-color-4);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-b9121c40{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-b9121c40 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-b9121c40{padding-top: 24px;padding-bottom: 24px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;border-style: solid;border-color: var(--ast-global-color-6);background-color: var(--ast-global-color-5);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-2c90cadd{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-2c90cadd > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-2c90cadd{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;flex-wrap: wrap;}.uagb-block-7a9c0ee1.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-7a9c0ee1.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7a9c0ee1.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-7a9c0ee1 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7a9c0ee1 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7a9c0ee1.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-7a9c0ee1 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-7a9c0ee1 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-7a9c0ee1 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-7a9c0ee1.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-7a9c0ee1.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-7a9c0ee1 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-7a9c0ee1.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-7a9c0ee1 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-7a9c0ee1 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-7a9c0ee1.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-6daec00a{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-6daec00a > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-6daec00a{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;flex-wrap: wrap;}.uagb-block-484b5d38.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 36px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-484b5d38.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-484b5d38.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-484b5d38 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-484b5d38 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-484b5d38.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-484b5d38 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-484b5d38 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-484b5d38 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-484b5d38.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-484b5d38 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-484b5d38.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-484b5d38 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-484b5d38 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-484b5d38.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-61ea4832.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-064f5a43.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-style: none;border-color: #333;}}";s:7:"content";s:1735:"
<div class="wp-block-uagb-container uagb-block-8d6078cf alignfull uagb-is-root-container"><div class="uagb-container-inner-blocks-wrap">
<div class="wp-block-uagb-container uagb-block-b9121c40 alignfull uagb-is-root-container"><div class="uagb-container-inner-blocks-wrap">
<div class="wp-block-uagb-container uagb-block-2c90cadd">
<div class="wp-block-uagb-info-box uagb-block-7a9c0ee1 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h2 class="uagb-ifb-title">Unlock your potential and transform your life today!</h2></div></div></div>
</div>



<div class="wp-block-uagb-container uagb-block-6daec00a">
<div class="wp-block-uagb-info-box uagb-block-484b5d38 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"></div><p class="uagb-ifb-desc">Don't wait any longer. Take action today and embark on an exciting journey to achieve your goals. Let us guide you through the process and help you unleash your true potential.</p></div></div>



<div class="wp-block-uagb-buttons uagb-buttons__outer-wrap uagb-btn__default-btn uagb-btn-tablet__default-btn uagb-btn-mobile__default-btn uagb-block-61ea4832"><div class="uagb-buttons__wrap uagb-buttons-layout-wrap">
<div class="wp-block-uagb-buttons-child uagb-buttons__outer-wrap uagb-block-064f5a43 wp-block-button"><div class="uagb-button__wrapper"><a class="uagb-buttons-repeater wp-block-button__link" href="#" onclick="return false;" rel="follow noopener" target="_self"><div class="uagb-button__link">Get Started</div></a></div></div>
</div></div>
</div>
</div></div>
</div></div>
";}s:8:"id-75657";a:10:{s:5:"title";s:17:"Call To Action 04";s:3:"url";s:56:"https://websitedemos.net/astra-blocks/call-to-action-04/";s:3:"tag";a:0:{}s:8:"category";i:832;s:16:"primary-category";s:0:"";s:4:"type";s:5:"block";s:12:"page-builder";s:9:"gutenberg";s:16:"required-plugins";a:0:{}s:10:"stylesheet";s:36446:".wp-block-uagb-container{display:flex;position:relative;box-sizing:border-box;transition-property:box-shadow;transition-duration:0.2s;transition-timing-function:ease}.wp-block-uagb-container .spectra-container-link-overlay{bottom:0;left:0;position:absolute;right:0;top:0;z-index:10}.wp-block-uagb-container.uagb-is-root-container{margin-left:auto;margin-right:auto}.wp-block-uagb-container.alignfull.uagb-is-root-container .uagb-container-inner-blocks-wrap{display:flex;position:relative;box-sizing:border-box;margin-left:auto !important;margin-right:auto !important}.wp-block-uagb-container .uagb-container__video-wrap{height:100%;width:100%;top:0;left:0;position:absolute;overflow:hidden;-webkit-transition:opacity 1s;-o-transition:opacity 1s;transition:opacity 1s}.wp-block-uagb-container .uagb-container__video-wrap video{max-width:100%;width:100%;height:100%;margin:0;line-height:1;border:none;display:inline-block;vertical-align:baseline;-o-object-fit:cover;object-fit:cover;background-size:cover}.st-block-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap>*:not(.wp-block-uagb-container):not(.wp-block-uagb-column):not(.wp-block-uagb-container):not(.wp-block-uagb-section):not(.uagb-container__shape):not(.uagb-container__video-wrap):not(.wp-block-spectra-pro-register):not(.wp-block-spectra-pro-login):not(.uagb-slider-container):not(.spectra-image-gallery__control-lightbox),.st-block-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap,.st-block-container .wp-block-uagb-container>*:not(.wp-block-uagb-container):not(.wp-block-uagb-column):not(.wp-block-uagb-container):not(.wp-block-uagb-section):not(.uagb-container__shape):not(.uagb-container__video-wrap):not(.wp-block-uagb-image):not(.wp-block-spectra-pro-register):not(.wp-block-spectra-pro-login):not(.uagb-slider-container):not(.spectra-container-link-overlay):not(.spectra-image-gallery__control-lightbox):not(.wp-block-uagb-lottie):not(.uagb-faq__outer-wrap){min-width:unset !important;width:100%;position:relative}.st-block-container .ast-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap>.wp-block-uagb-container>ul,.st-block-container .ast-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap>.wp-block-uagb-container ol,.st-block-container .ast-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap>ul,.st-block-container .ast-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap ol{max-width:-webkit-fill-available;margin-block-start:0;margin-block-end:0;margin-left:20px}.ast-plain-container .editor-styles-wrapper .block-editor-block-list__layout.is-root-container .uagb-is-root-container.wp-block-uagb-container.alignwide{margin-left:auto;margin-right:auto}.uagb-container__shape{overflow:hidden;position:absolute;left:0;width:100%;line-height:0;direction:ltr}.uagb-container__shape-top{top:-3px}.uagb-container__shape-bottom{bottom:-3px}.uagb-container__shape.uagb-container__invert.uagb-container__shape-bottom,.uagb-container__shape.uagb-container__invert.uagb-container__shape-top{-webkit-transform:rotate(180deg);-ms-transform:rotate(180deg);transform:rotate(180deg)}.uagb-container__shape.uagb-container__shape-flip svg{transform:translateX(-50%) rotateY(180deg)}.uagb-container__shape svg{display:block;width:-webkit-calc(100% + 1.3px);width:calc(100% + 1.3px);position:relative;left:50%;-webkit-transform:translateX(-50%);-ms-transform:translateX(-50%);transform:translateX(-50%)}.uagb-container__shape .uagb-container__shape-fill{-webkit-transform-origin:center;-ms-transform-origin:center;transform-origin:center;-webkit-transform:rotateY(0deg);transform:rotateY(0deg)}.uagb-container__shape.uagb-container__shape-above-content{z-index:9;pointer-events:none}.nv-single-page-wrap .nv-content-wrap.entry-content .wp-block-uagb-container.alignfull{margin-left:calc(50% - 50vw);margin-right:calc(50% - 50vw)}@media only screen and (max-width: 767px){.wp-block-uagb-container .wp-block-uagb-advanced-heading{width:-webkit-fill-available !important}}
.uagb-ifb-content>svg *{-webkit-transition:all 0.2s;-o-transition:all 0.2s;transition:all 0.2s}.uagb-ifb-content>svg,.uagb-ifb-content{display:inline-block}.uagb-ifb-content>svg{vertical-align:middle;width:inherit;height:inherit;font-style:initial}.uagb-ifb-content .uagb-ifb-icon-wrap svg{box-sizing:content-box;width:inherit;height:inherit}.uagb-ifb-button-wrapper:empty{display:none}div.uagb-ifb-button-wrapper a.uagb-infobox-cta-link,div.uagb-ifb-cta a.uagb-infobox-cta-link,.entry .entry-content a.uagb-infobox-cta-link,a.uagb-infobox-link-wrap,.entry .entry-content a.uagb-infobox-link-wrap{text-decoration:none;align-items:center}.uagb-infobox-icon-left-title.uagb-infobox-image-valign-middle .uagb-ifb-title-wrap,.uagb-infobox-icon-right-title.uagb-infobox-image-valign-middle .uagb-ifb-title-wrap,.uagb-infobox-image-valign-middle .uagb-ifb-icon-wrap,.uagb-infobox-image-valign-middle .uagb-ifb-image-content,.uagb-infobox-icon-left.uagb-infobox-image-valign-middle .uagb-ifb-content,.uagb-infobox-icon-right.uagb-infobox-image-valign-middle .uagb-ifb-content{-ms-flex-item-align:center;-webkit-align-self:center;align-self:center}.uagb-infobox-icon-left-title.uagb-infobox-image-valign-top .uagb-ifb-title-wrap,.uagb-infobox-icon-right-title.uagb-infobox-image-valign-top .uagb-ifb-title-wrap,.uagb-infobox-image-valign-top .uagb-ifb-icon-wrap,.uagb-infobox-image-valign-top .uagb-ifb-image-content,.uagb-infobox-icon-left.uagb-infobox-image-valign-top .uagb-ifb-content,.uagb-infobox-icon-right.uagb-infobox-image-valign-top .uagb-ifb-content{-webkit-align-self:self-start;align-self:self-start}.uagb-infobox-left{justify-content:flex-start;text-align:left;-webkit-box-pack:start;-ms-flex-pack:start;-webkit-justify-content:flex-start;-moz-box-pack:start}.uagb-infobox-center{justify-content:center;text-align:center;-webkit-box-pack:center;-ms-flex-pack:center;-webkit-justify-content:center;-moz-box-pack:center}.uagb-infobox-right{justify-content:flex-end;text-align:right;-webkit-box-pack:end;-ms-flex-pack:end;-webkit-justify-content:flex-end;-moz-box-pack:end}.uagb-infobox-icon-above-title.uagb-infobox__content-wrap,.uagb-infobox-icon-below-title.uagb-infobox__content-wrap{display:block;width:100%}.uagb-infobox-icon-left-title .uagb-ifb-content>svg,.uagb-infobox-icon-left .uagb-ifb-content>svg{margin-right:10px}.uagb-infobox-icon-right-title .uagb-ifb-content>svg,.uagb-infobox-icon-right .uagb-ifb-content>svg{margin-left:10px}.uagb-infobox-icon-left.uagb-infobox__content-wrap,.uagb-infobox-icon-right.uagb-infobox__content-wrap,.uagb-infobox-icon-left-title .uagb-ifb-left-title-image,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image{display:-webkit-box;display:-ms-flexbox;display:-webkit-flex;display:-moz-box;display:flex;-js-display:flex}.uagb-infobox-icon-left-title .uagb-ifb-left-title-image .uagb-ifb-image-content,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image .uagb-ifb-image-content,.uagb-infobox-icon-left .uagb-ifb-image-content,.uagb-infobox-icon-right .uagb-ifb-image-content{flex-shrink:0;line-height:0}.uagb-infobox-icon-left-title .uagb-ifb-left-title-image .uagb-ifb-title-wrap,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image .uagb-ifb-title-wrap,.uagb-infobox-icon-left .uagb-ifb-content,.uagb-infobox-icon-right .uagb-ifb-content{flex-grow:1}.uagb-infobox-icon-right.uagb-infobox__content-wrap,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image{-webkit-box-pack:end;-ms-flex-pack:end;-webkit-justify-content:flex-end;-moz-box-pack:end;justify-content:flex-end}.uagb-ifb-content img{position:relative;display:inline-block;line-height:0;width:auto;height:auto !important;max-width:100%;border-radius:inherit;-webkit-box-sizing:content-box;-moz-box-sizing:content-box;-webkit-border-radius:inherit}.uagb-infobox-module-link{position:absolute;top:0;right:0;bottom:0;left:0;z-index:4;width:100%;height:100%}.uagb-edit-mode .uagb-infobox-module-link{z-index:2}.uagb-infobox-link-icon-after{margin-right:0;margin-left:5px}.uagb-infobox-link-icon-before{margin-right:5px;margin-left:0}.uagb-infobox-link-icon{-webkit-transition:all 200ms linear;transition:all 200ms linear}.uagb-infobox__content-wrap{box-sizing:border-box;position:relative;width:100%;word-break:break-word;z-index:1}.uagb-ifb-separator{display:inline-block;margin:0;border-top-color:#333;border-top-style:solid;border-top-width:2px;line-height:0}.uagb-ifb-button-wrapper{line-height:1}.uagb-ifb-button-wrapper.uagb-ifb-button-type-text .uagb-infobox-cta-link.wp-block-button__link{background-color:unset;border:none}.uagb-ifb-button-wrapper.uagb-ifb-button-type-text .uagb-infobox-cta-link.wp-block-button__link:hover{background-color:unset;border-color:unset}.uagb-ifb-button-wrapper .uagb-infobox-cta-link{cursor:pointer}.uagb-ifb-button-wrapper .wp-block-button__link svg{fill:currentColor}.uagb-infobox__content-wrap a{-webkit-box-shadow:none;box-shadow:none;text-decoration:none}.uagb-ifb-title-wrap{width:100%}.uagb-ifb-title{margin-block-start:0}.uagb-ifb-title-wrap .uagb-ifb-title-prefix{display:block;padding:0;margin:0}.uagb-infobox__content-wrap.uagb-infobox__content-wrap{position:relative}.uagb-ifb-content{width:100%}.uagb-infobox__content-wrap.uagb-infobox,.uagb-ifb-content,.uagb-ifb-title-wrap,.uagb-ifb-title-prefix *,svg.dashicon.dashicons-upload{z-index:1}a.uagb-infobox-link-wrap{color:inherit}.uagb-ifb-content p:empty{display:none}.uagb-infobox__content-wrap .uagb-ifb-content img{display:inline-block;max-width:100%}.uagb-infobox__content-wrap .uagb-ifb-content svg{display:inline-block}.uagb-infobox__content-wrap .uagb-ifb-icon-wrap,.uagb-infobox-icon-left .uagb-ifb-image-content,.uagb-infobox-icon-right .uagb-ifb-image-content{box-sizing:content-box}.uagb-infobox-cta-link>svg{vertical-align:middle;width:15px;height:15px;font-size:15px}.uagb-infobox-cta-link{display:inline-flex}.block-editor-page #wpwrap .uagb-infobox-cta-link svg,.uagb-infobox-cta-link svg{font-style:normal}.uagb-infobox-icon-left-title .uagb-ifb-icon-wrap,.uagb-infobox-icon-left .uagb-ifb-icon-wrap{margin-right:10px;line-height:0}.uagb-infobox-icon-right-title .uagb-ifb-icon-wrap,.uagb-infobox-icon-right .uagb-ifb-icon-wrap{margin-left:10px;line-height:0}.uagb-infobox-icon-left .uagb-ifb-left-right-wrap,.uagb-infobox-icon-right .uagb-ifb-left-right-wrap,.uagb-infobox-icon-left-title .uagb-ifb-left-title-image,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image{display:-webkit-box;display:-ms-flexbox;display:flex}.uagb-infobox-icon-right .uagb-ifb-left-right-wrap,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image{-webkit-box-pack:end;-ms-flex-pack:end;-webkit-justify-content:flex-end;-moz-box-pack:end;justify-content:flex-end}a.uagb-infbox__link-to-all{position:absolute;top:0;left:0;z-index:3;width:100%;height:100%;box-shadow:none;text-decoration:none;-webkit-box-shadow:none}@media only screen and (max-width: 976px){.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-image-content{padding:0;margin-bottom:20px}.uagb-infobox-stacked-tablet.uagb-reverse-order-tablet.uagb-infobox__content-wrap{display:-webkit-inline-box;display:-ms-inline-flexbox;display:-webkit-inline-flex;display:-moz-inline-box;display:inline-flex;flex-direction:column-reverse;-js-display:inline-flex;-webkit-box-orient:vertical;-webkit-box-direction:reverse;-ms-flex-direction:column-reverse;-webkit-flex-direction:column-reverse;-moz-box-orient:vertical;-moz-box-direction:reverse}.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-content,.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-icon-wrap,.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-image-content{display:block;width:100%;text-align:center}.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-icon-wrap,.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-image-content{margin-right:0;margin-left:0}.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap{display:inline-block}.uagb-infobox-icon-left-title.uagb-infobox-stacked-tablet .uagb-ifb-image-content,.uagb-infobox-icon-left-title.uagb-infobox-stacked-tablet .uagb-ifb-icon-wrap,.uagb-infobox-icon-left.uagb-infobox-stacked-tablet .uagb-ifb-image-content,.uagb-infobox-icon-left.uagb-infobox-stacked-tablet .uagb-ifb-icon-wrap{margin-right:0}.uagb-infobox-icon-right-title.uagb-infobox-stacked-tablet .uagb-ifb-image-content,.uagb-infobox-icon-right-title.uagb-infobox-stacked-tablet .uagb-ifb-icon-wrap,.uagb-infobox-icon-right.uagb-infobox-stacked-tablet .uagb-ifb-image-content,.uagb-infobox-icon-right.uagb-infobox-stacked-tablet .uagb-ifb-icon-wrap{margin-left:0}.uagb-infobox-icon-left-title .uagb-ifb-separator{margin:10px 0}}@media screen and (max-width: 767px){.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap{display:inline-block}.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-image-content,.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-icon-wrap{padding:0;margin-bottom:20px;margin-right:0;margin-left:0}.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap.uagb-reverse-order-mobile{display:-webkit-inline-box;display:-ms-inline-flexbox;display:-webkit-inline-flex;display:-moz-inline-box;display:inline-flex;flex-direction:column-reverse;-js-display:inline-flex;-webkit-box-orient:vertical;-webkit-box-direction:reverse;-ms-flex-direction:column-reverse;-webkit-flex-direction:column-reverse;-moz-box-orient:vertical;-moz-box-direction:reverse}.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-image-content,.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-icon-wrap,.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-content{display:block;width:100%;text-align:center}.uagb-infobox-icon-left-title.uagb-infobox-stacked-mobile .uagb-ifb-image-content,.uagb-infobox-icon-left-title.uagb-infobox-stacked-mobile .uagb-ifb-icon-wrap,.uagb-infobox-icon-left.uagb-infobox-stacked-mobile .uagb-ifb-image-content,.uagb-infobox-icon-left.uagb-infobox-stacked-mobile .uagb-ifb-icon-wrap{margin-right:0}.uagb-infobox-icon-right-title.uagb-infobox-stacked-mobile .uagb-ifb-image-content,.uagb-infobox-icon-right-title.uagb-infobox-stacked-mobile .uagb-ifb-icon-wrap,.uagb-infobox-icon-right.uagb-infobox-stacked-mobile .uagb-ifb-image-content,.uagb-infobox-icon-right.uagb-infobox-stacked-mobile .uagb-ifb-icon-wrap{margin-left:0}.uagb-infobox-icon-left-title .uagb-ifb-separator{margin:10px 0}}.uagb-ifb-icon svg{width:inherit;height:inherit;vertical-align:middle}.uagb-ifb-button-icon{height:15px;width:15px;font-size:15px;vertical-align:middle}.uagb-ifb-button-icon svg{height:inherit;width:inherit;display:inline-block}.uagb-ifb-button-icon.uagb-ifb-align-icon-after{float:right}.uagb-ifb-cta-button{display:inline-block}.uagb-disable-link{pointer-events:none}
.uagb-buttons__outer-wrap .uagb-buttons__wrap{display:inline-flex;width:100%}.uagb-buttons__outer-wrap.uagb-btn__small-btn .uagb-buttons-repeater{padding:5px 10px}.uagb-buttons__outer-wrap.uagb-btn__medium-btn .uagb-buttons-repeater{padding:12px 24px}.uagb-buttons__outer-wrap.uagb-btn__large-btn .uagb-buttons-repeater{padding:20px 30px}.uagb-buttons__outer-wrap.uagb-btn__extralarge-btn .uagb-buttons-repeater{padding:30px 65px}@media (max-width: 976px){.uagb-buttons__outer-wrap.uagb-btn-tablet__small-btn .uagb-buttons-repeater{padding:5px 10px}.uagb-buttons__outer-wrap.uagb-btn-tablet__medium-btn .uagb-buttons-repeater{padding:12px 24px}.uagb-buttons__outer-wrap.uagb-btn-tablet__large-btn .uagb-buttons-repeater{padding:20px 30px}.uagb-buttons__outer-wrap.uagb-btn-tablet__extralarge-btn .uagb-buttons-repeater{padding:30px 65px}}@media (max-width: 767px){.uagb-buttons__outer-wrap.uagb-btn-mobile__small-btn .uagb-buttons-repeater{padding:5px 10px}.uagb-buttons__outer-wrap.uagb-btn-mobile__medium-btn .uagb-buttons-repeater{padding:12px 24px}.uagb-buttons__outer-wrap.uagb-btn-mobile__large-btn .uagb-buttons-repeater{padding:20px 30px}.uagb-buttons__outer-wrap.uagb-btn-mobile__extralarge-btn .uagb-buttons-repeater{padding:30px 65px}}
.uagb-buttons__outer-wrap .uagb-buttons-repeater{display:flex;justify-content:center;align-items:center;transition:box-shadow 0.2s ease}.uagb-buttons__outer-wrap .uagb-buttons-repeater a.uagb-button__link{display:flex;justify-content:center}.uagb-buttons__outer-wrap .uagb-buttons-repeater .uagb-button__icon{font-size:inherit;display:flex;align-items:center}.uagb-buttons__outer-wrap .uagb-buttons-repeater .uagb-button__icon svg{fill:currentColor;width:inherit;height:inherit}
.wp-block-uagb-container.uagb-is-root-container .uagb-block-9177e64e{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-9177e64e .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-9177e64e .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-9177e64e .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-9177e64e .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-9177e64e .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-9177e64e > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 768px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: stretch;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-9177e64e{box-shadow: 0px 0px   #00000070 ;padding-top: 112px;padding-bottom: 112px;padding-left: 40px;padding-right: 40px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-style: none;border-color: inherit;background-color: var(--ast-global-color-4);;}.uagb-block-59ea9223 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-59ea9223 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-59ea9223 .uagb-ifb-icon svg{fill: #333;}.uagb-block-59ea9223.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-59ea9223 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-59ea9223 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-59ea9223.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-59ea9223.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-59ea9223 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-59ea9223 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-59ea9223 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-59ea9223 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-59ea9223.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-59ea9223.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-59ea9223.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-59ea9223.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-59ea9223 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{color: var(--ast-global-color-2);margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-59ea9223.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 40px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-59ea9223.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 40px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-59ea9223 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-59ea9223 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-59ea9223 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-59ea9223 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-59ea9223.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-59ea9223.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-59ea9223 .uagb-infobox__content-wrap{text-align: center;}.uagb-block-59ea9223.uagb-infobox-icon-above-title{text-align: center;}.uagb-block-59ea9223.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-59ea9223 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-59ea9223.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-59ea9223 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-59ea9223 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-59ea9223.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-a2a0f6ff.wp-block-uagb-buttons.uagb-buttons__outer-wrap .uagb-buttons__wrap {column-gap: 20px;}.uagb-block-a2a0f6ff.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: center;align-items: center;}.wp-block-uagb-buttons .uagb-block-09132039.wp-block-uagb-buttons-child .uagb-buttons-repeater{background: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-09132039 .wp-block-button__link{background: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-09132039 .wp-block-button__link:hover{background: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-09132039 .wp-block-button__link:focus{background: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-09132039 .uagb-button__wrapper .uagb-buttons-repeater{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-09132039 .wp-block-button__link.has-text-color:hover .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-09132039 .wp-block-button__link.has-text-color:focus .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-09132039 .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-09132039 .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link:hover{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-09132039 .uagb-buttons-repeater.wp-block-button__link{border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-style: none;}.wp-block-uagb-buttons .uagb-block-09132039.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-style: none;}.wp-block-uagb-buttons .uagb-block-09132039 .uagb-buttons-repeater .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-09132039 .uagb-buttons-repeater:hover .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-09132039 .uagb-buttons-repeater:focus .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-09132039 .uagb-buttons-repeater .uagb-button__icon > svg{width: 15px;height: 15px;fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-09132039 .uagb-buttons-repeater:hover .uagb-button__icon > svg{fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-09132039 .uagb-buttons-repeater:focus .uagb-button__icon > svg{fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-09132039 .uagb-buttons-repeater .uagb-button__icon-position-after{margin-left: 8px;}.wp-block-uagb-buttons .uagb-block-09132039 .uagb-buttons-repeater .uagb-button__icon-position-before{margin-right: 8px;}.wp-block-uagb-buttons .uagb-block-09132039 .uagb-button__link{text-transform: normal;text-decoration: none;}.wp-block-uagb-buttons .uagb-block-8e826ca9 .wp-block-button__link{background: transparent;}.wp-block-uagb-buttons .uagb-block-8e826ca9 .wp-block-button__link:hover{background: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-8e826ca9 .wp-block-button__link:focus{background: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-8e826ca9 .uagb-button__wrapper .uagb-buttons-repeater{color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-8e826ca9 .wp-block-button__link.has-text-color:hover .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-8e826ca9 .wp-block-button__link.has-text-color:focus .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-8e826ca9 .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-8e826ca9 .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link:hover{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-8e826ca9 .uagb-buttons-repeater.wp-block-button__link{border-top-width: 1px;border-left-width: 1px;border-right-width: 1px;border-bottom-width: 1px;border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-color: var(--ast-global-color-2);border-style: solid;}.wp-block-uagb-buttons .uagb-block-8e826ca9 .uagb-buttons-repeater.wp-block-button__link:hover{border-color: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-8e826ca9 .uagb-buttons-repeater.wp-block-button__link:focus{border-color: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-8e826ca9.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-top-width: 1px;border-left-width: 1px;border-right-width: 1px;border-bottom-width: 1px;border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-color: var(--ast-global-color-2);border-style: solid;}.wp-block-uagb-buttons .uagb-block-8e826ca9.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater:hover{border-color: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-8e826ca9 .uagb-buttons-repeater .uagb-button__link{color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-8e826ca9 .uagb-buttons-repeater:hover .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-8e826ca9 .uagb-buttons-repeater:focus .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-8e826ca9 .uagb-buttons-repeater .uagb-button__icon > svg{width: 15px;height: 15px;fill: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-8e826ca9 .uagb-buttons-repeater:hover .uagb-button__icon > svg{fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-8e826ca9 .uagb-buttons-repeater:focus .uagb-button__icon > svg{fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-8e826ca9 .uagb-buttons-repeater .uagb-button__icon-position-after{margin-left: 8px;}.wp-block-uagb-buttons .uagb-block-8e826ca9 .uagb-buttons-repeater .uagb-button__icon-position-before{margin-right: 8px;}.wp-block-uagb-buttons .uagb-block-8e826ca9 .uagb-button__link{text-transform: normal;text-decoration: none;}@media only screen and (max-width: 976px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-9177e64e{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-9177e64e > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: flex-start;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-9177e64e{padding-top: 80px;padding-bottom: 80px;padding-left: 32px;padding-right: 32px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;border-style: none;background-color: var(--ast-global-color-4);;}.wp-block-uagb-container.uagb-block-9177e64e.wp-block-uagb-container > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-uagb-image ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not( .spectra-container-link-overlay ):not(.spectra-image-gallery__control-lightbox):not(.wp-block-uagb-lottie):not(.uagb-container-inner-blocks-wrap){width: 100%;}.wp-block-uagb-container.uagb-block-9177e64e.wp-block-uagb-container > .uagb-container-inner-blocks-wrap > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not(.spectra-image-gallery__control-lightbox){width: 100%;}.uagb-block-59ea9223 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-59ea9223.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 40px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-59ea9223.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-59ea9223.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-59ea9223.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-59ea9223 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-59ea9223 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-59ea9223 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-59ea9223 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-59ea9223 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-59ea9223.uagb-infobox-icon-above-title{text-align: center;}.uagb-block-59ea9223.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-59ea9223 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-59ea9223.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-59ea9223 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-59ea9223 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-59ea9223.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-a2a0f6ff.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: center;align-items: center;}.wp-block-uagb-buttons .uagb-block-09132039.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-style: none;}.wp-block-uagb-buttons .uagb-block-8e826ca9.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-top-width: 1px;border-left-width: 1px;border-right-width: 1px;border-bottom-width: 1px;border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-style: solid;border-color: var(--ast-global-color-2);}}@media only screen and (max-width: 767px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-9177e64e{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-9177e64e > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: flex-start;justify-content: flex-start;flex-wrap: wrap;align-content: flex-start;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-9177e64e{padding-top: 64px;padding-bottom: 64px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;border-style: none;background-color: var(--ast-global-color-4);;}.wp-block-uagb-container.uagb-block-9177e64e.wp-block-uagb-container > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-uagb-image ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not( .spectra-container-link-overlay ):not(.spectra-image-gallery__control-lightbox):not(.wp-block-uagb-lottie):not(.uagb-container-inner-blocks-wrap){width: 100%;}.wp-block-uagb-container.uagb-block-9177e64e.wp-block-uagb-container > .uagb-container-inner-blocks-wrap > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not(.spectra-image-gallery__control-lightbox){width: 100%;}.uagb-block-59ea9223 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-59ea9223.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 36px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-59ea9223.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-59ea9223.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-59ea9223 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-59ea9223 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-59ea9223.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-59ea9223 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-59ea9223 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-59ea9223 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-59ea9223.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-59ea9223 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-59ea9223.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-59ea9223 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-59ea9223 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-59ea9223.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-a2a0f6ff.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: center;align-items: center;}.wp-block-uagb-buttons .uagb-block-09132039.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-style: none;}.wp-block-uagb-buttons .uagb-block-8e826ca9.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-style: solid;border-color: var(--ast-global-color-2);}}";s:7:"content";s:1403:"
