a:30:{s:8:"id-83065";a:10:{s:5:"title";s:11:"Features 18";s:3:"url";s:50:"https://websitedemos.net/astra-blocks/features-18/";s:3:"tag";a:0:{}s:8:"category";i:919;s:16:"primary-category";s:0:"";s:4:"type";s:5:"block";s:12:"page-builder";s:9:"gutenberg";s:16:"required-plugins";a:0:{}s:10:"stylesheet";s:34363:".wp-block-uagb-container.uagb-is-root-container .uagb-block-735ab7a4{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-735ab7a4 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-735ab7a4 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-735ab7a4 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-735ab7a4 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-735ab7a4 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-735ab7a4 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: stretch;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-735ab7a4{box-shadow: 0px 0px   #00000070 ;padding-top: 112px;padding-bottom: 112px;padding-left: 40px;padding-right: 40px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;background-color: var(--ast-global-color-4);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-fe20f437{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-fe20f437 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-fe20f437 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-fe20f437 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-fe20f437 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-fe20f437 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-fe20f437 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 72px;}.wp-block-uagb-container.uagb-block-fe20f437{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 72px;overflow: visible;border-color: inherit;flex-direction: row;align-items: stretch;justify-content: flex-start;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-b9c87728{max-width: 40%;width: 100%;}.wp-block-uagb-container.uagb-block-b9c87728 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-b9c87728 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-b9c87728 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-b9c87728 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-b9c87728 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-b9c87728 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: flex-start;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 25px;}.wp-block-uagb-container.uagb-block-b9c87728{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 25px;overflow: visible;border-color: inherit;flex-direction: row;align-items: flex-start;justify-content: flex-start;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-00e41575{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-block-00e41575 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-00e41575 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-00e41575 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-00e41575 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-00e41575 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-00e41575 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 20px;column-gap: 20px;}.wp-block-uagb-container.uagb-block-00e41575{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 20px;column-gap: 20px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;}.uagb-block-d08a1321.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-d08a1321 .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-d08a1321.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-d08a1321.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;text-align: center;}.uagb-block-d08a1321.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-d08a1321.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-d08a1321.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-d08a1321.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-d08a1321.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-d08a1321.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-d08a1321.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-d08a1321.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-d08a1321.wp-block-uagb-image .wp-block-uagb-image__figure img{width: 600px;height: 350px;}.uagb-block-d08a1321.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-d08a1321.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-d08a1321.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-d08a1321.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-775ea8ba{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-block-775ea8ba .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-775ea8ba .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-775ea8ba .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-775ea8ba .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-775ea8ba .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-775ea8ba > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 20px;column-gap: 20px;}.wp-block-uagb-container.uagb-block-775ea8ba{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 20px;column-gap: 20px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;}.uagb-block-f6bd693f.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-f6bd693f .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-f6bd693f.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-f6bd693f.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;text-align: center;}.uagb-block-f6bd693f.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-f6bd693f.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-f6bd693f.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-f6bd693f.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-f6bd693f.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-f6bd693f.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-f6bd693f.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-f6bd693f.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-f6bd693f.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 400px;}.uagb-block-f6bd693f.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-f6bd693f.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-f6bd693f.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-f6bd693f.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-500da319{max-width: 60%;width: 100%;}.wp-block-uagb-container.uagb-block-500da319 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-500da319 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-500da319 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-500da319 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-500da319 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-500da319 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: flex-start;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-500da319{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 50px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: flex-start;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-77670cc3 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-77670cc3 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-77670cc3 .uagb-ifb-icon svg{fill: #333;}.uagb-block-77670cc3.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-77670cc3 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-77670cc3 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-77670cc3.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-77670cc3.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-77670cc3 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-77670cc3 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-77670cc3 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-77670cc3 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-77670cc3.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-77670cc3.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-77670cc3.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-77670cc3.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-77670cc3 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{color: var(--ast-global-color-2);margin-bottom: 24px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-77670cc3.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-77670cc3.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 32px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-77670cc3 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-77670cc3 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-77670cc3 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-77670cc3 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-77670cc3.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-77670cc3.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-77670cc3 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-77670cc3.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-77670cc3.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-77670cc3 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-77670cc3.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-77670cc3 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-77670cc3 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-77670cc3.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-icon-list.uagb-block-377e53fa .uagb-icon-list__source-image{width: 16px;}.wp-block-uagb-icon-list.uagb-block-377e53fa .wp-block-uagb-icon-list-child .uagb-icon-list__source-wrap svg{width: 16px;height: 16px;font-size: 16px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.wp-block-uagb-icon-list.uagb-block-377e53fa .wp-block-uagb-icon-list-child .uagb-icon-list__source-wrap{padding: 0px;border-radius: 0px;border-width: 0px;align-self: center;}.wp-block-uagb-icon-list.uagb-block-377e53fa .wp-block-uagb-icon-list-child .uagb-icon-list__label{text-decoration: !important;line-height: em;color: var(--ast-global-color-3);}.wp-block-uagb-icon-list.uagb-block-377e53fa .uagb-icon-list__wrap{display: flex;flex-direction: column;justify-content: center;-webkit-box-pack: center;-ms-flex-pack: center;-webkit-box-align: flex-start;-ms-flex-align: flex-start;align-items: flex-start;}.wp-block-uagb-icon-list.uagb-block-377e53fa .wp-block-uagb-icon-list-child:hover .uagb-icon-list__source-wrap svg{color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.wp-block-uagb-icon-list.uagb-block-377e53fa .uagb-icon-list__label{text-align: left;}.wp-block-uagb-icon-list.uagb-block-377e53fa .wp-block-uagb-icon-list-child{text-decoration: !important;line-height: em;}.wp-block-uagb-icon-list.uagb-block-377e53fa.wp-block-uagb-icon-list .wp-block-uagb-icon-list-child{margin-left: 0;margin-right: 0;margin-bottom: 10px;}.wp-block-uagb-icon-list.uagb-block-377e53fa .uagb-icon-list__source-wrap{margin-right: 15px;}.uagb-block-0af144e3.wp-block-uagb-icon-list-child .uagb-icon-list__source-wrap{background:  !important;border-color:  !important;}.uagb-block-0af144e3.wp-block-uagb-icon-list-child:hover .uagb-icon-list__source-wrap{background:  !important;border-color:  !important;}.uagb-block-179f09b8.wp-block-uagb-icon-list-child .uagb-icon-list__source-wrap{background:  !important;border-color:  !important;}.uagb-block-179f09b8.wp-block-uagb-icon-list-child:hover .uagb-icon-list__source-wrap{background:  !important;border-color:  !important;}.uagb-block-8b64cfe9.wp-block-uagb-icon-list-child .uagb-icon-list__source-wrap{background:  !important;border-color:  !important;}.uagb-block-8b64cfe9.wp-block-uagb-icon-list-child:hover .uagb-icon-list__source-wrap{background:  !important;border-color:  !important;}.uagb-block-81548909.wp-block-uagb-icon-list-child .uagb-icon-list__source-wrap{background:  !important;border-color:  !important;}.uagb-block-81548909.wp-block-uagb-icon-list-child:hover .uagb-icon-list__source-wrap{background:  !important;border-color:  !important;}@media only screen and (max-width: 976px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-735ab7a4{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-735ab7a4 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;justify-content: flex-start;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-735ab7a4{padding-top: 80px;padding-bottom: 80px;padding-left: 40px;padding-right: 40px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;background-color: var(--ast-global-color-4);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-fe20f437{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-fe20f437 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 0px;column-gap: 48px;}.wp-block-uagb-container.uagb-block-fe20f437{padding-top: -1px;padding-bottom: -1px;padding-left: -1px;padding-right: -1px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 48px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-b9c87728{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-b9c87728 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 0px;column-gap: 20px;}.wp-block-uagb-container.uagb-block-b9c87728{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 20px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-00e41575{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-00e41575 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-00e41575{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;}.uagb-block-d08a1321.wp-block-uagb-image--layout-default figure img{border-style: none;}.uagb-block-d08a1321.wp-block-uagb-image--layout-overlay figure img{border-style: none;}.uagb-block-d08a1321.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 250px;}.uagb-block-d08a1321.wp-block-uagb-image{text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-d08a1321 .wp-block-uagb-image__figure{align-items: flex-start;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-775ea8ba{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-775ea8ba > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-775ea8ba{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;}.uagb-block-f6bd693f.wp-block-uagb-image--layout-default figure img{border-style: none;}.uagb-block-f6bd693f.wp-block-uagb-image--layout-overlay figure img{border-style: none;}.uagb-block-f6bd693f.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 360px;}.uagb-block-f6bd693f.wp-block-uagb-image{text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-f6bd693f .wp-block-uagb-image__figure{align-items: flex-start;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-500da319{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-500da319 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-500da319{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 50px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;}.uagb-block-77670cc3 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-77670cc3.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-77670cc3.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 25px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-77670cc3.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-77670cc3.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-77670cc3.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-77670cc3 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-77670cc3 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-77670cc3 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-77670cc3 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-77670cc3 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-77670cc3 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-77670cc3.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-77670cc3 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-77670cc3 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-77670cc3.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-icon-list.uagb-block-377e53fa .uagb-icon-list__source-image{width: 16px;}.wp-block-uagb-icon-list.uagb-block-377e53fa .wp-block-uagb-icon-list-child .uagb-icon-list__source-wrap svg{width: 16px;height: 16px;font-size: 16px;}.wp-block-uagb-icon-list.uagb-block-377e53fa .wp-block-uagb-icon-list-child .uagb-icon-list__source-wrap {padding: 0px;border-width: 0px;align-self: center;}.wp-block-uagb-icon-list.uagb-block-377e53fa .uagb-icon-list__wrap{display: flex;flex-direction: column;justify-content: center;-webkit-box-pack: center;-ms-flex-pack: center;-webkit-box-align: flex-start;-ms-flex-align: flex-start;align-items: flex-start;}.wp-block-uagb-icon-list.uagb-block-377e53fa.wp-block-uagb-icon-list .wp-block-uagb-icon-list-child{margin-left: 0;margin-right: 0;margin-bottom: 10px;}}@media only screen and (max-width: 767px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-735ab7a4{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-735ab7a4 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-735ab7a4{padding-top: 64px;padding-bottom: 64px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;background-color: var(--ast-global-color-4);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-fe20f437{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-fe20f437 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 40px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-fe20f437{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 40px;column-gap: 0px;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-b9c87728{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-b9c87728 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-b9c87728{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-00e41575{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-00e41575 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-00e41575{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;flex-wrap: wrap;}.uagb-block-d08a1321.wp-block-uagb-image--layout-default figure img{border-style: none;}.uagb-block-d08a1321.wp-block-uagb-image--layout-overlay figure img{border-style: none;}.uagb-block-d08a1321.wp-block-uagb-image .wp-block-uagb-image__figure img{width: 600px;height: 300px;}.uagb-block-d08a1321.wp-block-uagb-image{text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-d08a1321 .wp-block-uagb-image__figure{align-items: flex-start;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-775ea8ba{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-775ea8ba > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-775ea8ba{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;flex-wrap: wrap;}.uagb-block-f6bd693f.wp-block-uagb-image--layout-default figure img{border-style: none;}.uagb-block-f6bd693f.wp-block-uagb-image--layout-overlay figure img{border-style: none;}.uagb-block-f6bd693f.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 300px;}.uagb-block-f6bd693f.wp-block-uagb-image{text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-f6bd693f .wp-block-uagb-image__figure{align-items: flex-start;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-500da319{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-500da319 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-500da319{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;flex-wrap: wrap;}.uagb-block-77670cc3.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-77670cc3.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-77670cc3 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-77670cc3 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-77670cc3.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-77670cc3 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-77670cc3 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-77670cc3 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-77670cc3 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-77670cc3.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-77670cc3 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-77670cc3 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-77670cc3.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-icon-list.uagb-block-377e53fa .uagb-icon-list__source-image{width: 16px;}.wp-block-uagb-icon-list.uagb-block-377e53fa .wp-block-uagb-icon-list-child .uagb-icon-list__source-wrap svg{width: 16px;height: 16px;font-size: 16px;}.wp-block-uagb-icon-list.uagb-block-377e53fa .wp-block-uagb-icon-list-child .uagb-icon-list__source-wrap{padding: 0px;border-width: 0px;align-self: center;}.wp-block-uagb-icon-list.uagb-block-377e53fa .uagb-icon-list__wrap{display: flex;flex-direction: column;justify-content: center;-webkit-box-pack: center;-ms-flex-pack: center;-webkit-box-align: flex-start;-ms-flex-align: flex-start;align-items: flex-start;}.wp-block-uagb-icon-list.uagb-block-377e53fa.wp-block-uagb-icon-list .wp-block-uagb-icon-list-child{margin-left: 0;margin-right: 0;margin-bottom: 10px;}}";s:7:"content";s:4587:"
<div class="wp-block-uagb-container uagb-block-735ab7a4 alignfull uagb-is-root-container"><div class="uagb-container-inner-blocks-wrap">
<div class="wp-block-uagb-container uagb-block-fe20f437">
<div class="wp-block-uagb-container uagb-block-b9c87728">
<div class="wp-block-uagb-container uagb-block-00e41575">
<div class="wp-block-uagb-image alignleft uagb-block-d08a1321 wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-left"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/10/desserts-02.jpg ,https://websitedemos.net/wp-content/uploads/2023/10/desserts-02.jpg 780w, https://websitedemos.net/wp-content/uploads/2023/10/desserts-02.jpg 360w" sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/10/desserts-02.jpg" alt="" class="uag-image-80570" width="600" height="350" title="" loading="lazy"/></figure></div>
</div>



<div class="wp-block-uagb-container uagb-block-775ea8ba">
<div class="wp-block-uagb-image alignleft uagb-block-f6bd693f wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-left"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/10/snow-mountains-02.jpg ,https://websitedemos.net/wp-content/uploads/2023/10/snow-mountains-02.jpg 780w, https://websitedemos.net/wp-content/uploads/2023/10/snow-mountains-02.jpg 360w" sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/10/snow-mountains-02.jpg" alt="" class="uag-image-80578" width="600" height="400" title="" loading="lazy"/></figure></div>
</div>
</div>



<div class="wp-block-uagb-container uagb-block-500da319">
<div class="wp-block-uagb-info-box uagb-block-77670cc3 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h6 class="uagb-ifb-title-prefix">Unleash the Power</h6><h3 class="uagb-ifb-title">Innovative Solutions for Modern Challenges</h3></div><p class="uagb-ifb-desc">We offer a comprehensive range of advanced features designed to streamline your processes and boost efficiency. From intuitive user interface to seamless integration, our software provides everything you need to optimize your workflow and achieve exceptional results.</p></div></div>



<div class="wp-block-uagb-icon-list uagb-block-377e53fa"><div class="uagb-icon-list__wrap">
<div class="wp-block-uagb-icon-list-child uagb-block-0af144e3"><span class="uagb-icon-list__source-wrap"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 448 512"><path d="M438.6 105.4C451.1 117.9 451.1 138.1 438.6 150.6L182.6 406.6C170.1 419.1 149.9 419.1 137.4 406.6L9.372 278.6C-3.124 266.1-3.124 245.9 9.372 233.4C21.87 220.9 42.13 220.9 54.63 233.4L159.1 338.7L393.4 105.4C405.9 92.88 426.1 92.88 438.6 105.4H438.6z"></path></svg></span><span class="uagb-icon-list__label">Feature 1</span></div>



<div class="wp-block-uagb-icon-list-child uagb-block-179f09b8"><span class="uagb-icon-list__source-wrap"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 448 512"><path d="M438.6 105.4C451.1 117.9 451.1 138.1 438.6 150.6L182.6 406.6C170.1 419.1 149.9 419.1 137.4 406.6L9.372 278.6C-3.124 266.1-3.124 245.9 9.372 233.4C21.87 220.9 42.13 220.9 54.63 233.4L159.1 338.7L393.4 105.4C405.9 92.88 426.1 92.88 438.6 105.4H438.6z"></path></svg></span><span class="uagb-icon-list__label">Feature 2</span></div>



<div class="wp-block-uagb-icon-list-child uagb-block-8b64cfe9"><span class="uagb-icon-list__source-wrap"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 448 512"><path d="M438.6 105.4C451.1 117.9 451.1 138.1 438.6 150.6L182.6 406.6C170.1 419.1 149.9 419.1 137.4 406.6L9.372 278.6C-3.124 266.1-3.124 245.9 9.372 233.4C21.87 220.9 42.13 220.9 54.63 233.4L159.1 338.7L393.4 105.4C405.9 92.88 426.1 92.88 438.6 105.4H438.6z"></path></svg></span><span class="uagb-icon-list__label">Feature 3</span></div>



<div class="wp-block-uagb-icon-list-child uagb-block-81548909"><span class="uagb-icon-list__source-wrap"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 448 512"><path d="M438.6 105.4C451.1 117.9 451.1 138.1 438.6 150.6L182.6 406.6C170.1 419.1 149.9 419.1 137.4 406.6L9.372 278.6C-3.124 266.1-3.124 245.9 9.372 233.4C21.87 220.9 42.13 220.9 54.63 233.4L159.1 338.7L393.4 105.4C405.9 92.88 426.1 92.88 438.6 105.4H438.6z"></path></svg></span><span class="uagb-icon-list__label">Feature 4</span></div>
</div></div>
</div>
</div>
</div></div>
";}s:8:"id-83049";a:10:{s:5:"title";s:7:"Hero 12";s:3:"url";s:46:"https://websitedemos.net/astra-blocks/hero-12/";s:3:"tag";a:0:{}s:8:"category";i:831;s:16:"primary-category";s:0:"";s:4:"type";s:5:"block";s:12:"page-builder";s:9:"gutenberg";s:16:"required-plugins";a:0:{}s:10:"stylesheet";s:41893:".wp-block-uagb-container.uagb-is-root-container .uagb-block-c5e8f702{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-c5e8f702 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-c5e8f702 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-c5e8f702 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-c5e8f702 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-c5e8f702 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-c5e8f702 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 72px;}.wp-block-uagb-container.uagb-block-c5e8f702{box-shadow: 0px 0px   #00000070 ;padding-top: 112px;padding-bottom: 112px;padding-left: 40px;padding-right: 40px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 72px;overflow: visible;border-color: inherit;background-color: var(--ast-global-color-4);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-c34f02a8{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-block-c34f02a8 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-c34f02a8 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-c34f02a8 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-c34f02a8 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-c34f02a8 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-c34f02a8 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: flex-start;justify-content: center;flex-wrap: nowrap;row-gap: 72px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-c34f02a8{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 72px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: flex-start;justify-content: center;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-63e55a0a{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-63e55a0a .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-63e55a0a .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-63e55a0a .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-63e55a0a .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-63e55a0a .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-63e55a0a > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 32px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-63e55a0a{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 32px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;}.uagb-block-f47639b5 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-f47639b5 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-f47639b5 .uagb-ifb-icon svg{fill: #333;}.uagb-block-f47639b5.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-f47639b5 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-f47639b5 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-f47639b5.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-f47639b5.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-f47639b5 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-f47639b5 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-f47639b5 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-f47639b5 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-f47639b5.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-f47639b5.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-f47639b5.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-f47639b5.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-f47639b5 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{color: var(--ast-global-color-2);margin-bottom: 24px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-f47639b5.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-f47639b5.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-f47639b5 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-f47639b5 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-f47639b5 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-f47639b5 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-f47639b5.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-f47639b5.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-f47639b5 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-f47639b5.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-f47639b5 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-f47639b5.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-f47639b5 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-f47639b5 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-f47639b5.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-e91bf028.wp-block-uagb-buttons.uagb-buttons__outer-wrap .uagb-buttons__wrap {column-gap: 0px;}.uagb-block-e91bf028.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-a1e7d68f.wp-block-uagb-buttons-child .uagb-buttons-repeater{background: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-a1e7d68f .wp-block-button__link{background: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-a1e7d68f .wp-block-button__link:hover{background: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-a1e7d68f .wp-block-button__link:focus{background: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-a1e7d68f .uagb-button__wrapper .uagb-buttons-repeater{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-a1e7d68f .wp-block-button__link.has-text-color:hover .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-a1e7d68f .wp-block-button__link.has-text-color:focus .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-a1e7d68f .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-a1e7d68f .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link:hover{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-a1e7d68f .uagb-buttons-repeater.wp-block-button__link{border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-color: #333;border-style: none;}.wp-block-uagb-buttons .uagb-block-a1e7d68f .uagb-buttons-repeater.wp-block-button__link:hover{border-color: #333;}.wp-block-uagb-buttons .uagb-block-a1e7d68f .uagb-buttons-repeater.wp-block-button__link:focus{border-color: #333;}.wp-block-uagb-buttons .uagb-block-a1e7d68f.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-color: #333;border-style: none;}.wp-block-uagb-buttons .uagb-block-a1e7d68f.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater:hover{border-color: #333;}.wp-block-uagb-buttons .uagb-block-a1e7d68f .uagb-buttons-repeater .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-a1e7d68f .uagb-buttons-repeater:hover .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-a1e7d68f .uagb-buttons-repeater:focus .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-a1e7d68f .uagb-buttons-repeater .uagb-button__icon > svg{width: 15px;height: 15px;fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-a1e7d68f .uagb-buttons-repeater:hover .uagb-button__icon > svg{fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-a1e7d68f .uagb-buttons-repeater:focus .uagb-button__icon > svg{fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-a1e7d68f .uagb-buttons-repeater .uagb-button__icon-position-after{margin-left: 8px;}.wp-block-uagb-buttons .uagb-block-a1e7d68f .uagb-buttons-repeater .uagb-button__icon-position-before{margin-right: 8px;}.wp-block-uagb-buttons .uagb-block-a1e7d68f .uagb-button__link{text-transform: normal;text-decoration: none;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-033a0d16{max-width: 80%;width: 100%;}.wp-block-uagb-container.uagb-block-033a0d16 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-033a0d16 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-033a0d16 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-033a0d16 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-033a0d16 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-033a0d16 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: flex-start;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 24px;}.wp-block-uagb-container.uagb-block-033a0d16{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 24px;overflow: visible;border-color: inherit;flex-direction: row;align-items: flex-start;justify-content: center;flex-wrap: nowrap;}.uagb-block-419ca3c2 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-419ca3c2 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-419ca3c2 .uagb-ifb-icon svg{fill: #333;}.uagb-block-419ca3c2.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-419ca3c2 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-419ca3c2 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-419ca3c2.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-419ca3c2.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-419ca3c2 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-419ca3c2 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-419ca3c2 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-419ca3c2 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-419ca3c2.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-419ca3c2.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-419ca3c2.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-419ca3c2.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-419ca3c2 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-419ca3c2.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 4px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-419ca3c2.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-419ca3c2 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-419ca3c2 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-419ca3c2 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-419ca3c2 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-419ca3c2.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-419ca3c2.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-419ca3c2 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-419ca3c2.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-419ca3c2.uagb-infobox__content-wrap{padding-top: 0%;padding-right: 10%;padding-bottom: 0%;padding-left: 0%;}.uagb-block-419ca3c2 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-419ca3c2.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-419ca3c2 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-419ca3c2 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-419ca3c2.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-1c9647e3 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-1c9647e3 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-1c9647e3 .uagb-ifb-icon svg{fill: #333;}.uagb-block-1c9647e3.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-1c9647e3 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-1c9647e3 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-1c9647e3.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-1c9647e3.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-1c9647e3 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-1c9647e3 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-1c9647e3 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-1c9647e3 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-1c9647e3.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-1c9647e3.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-1c9647e3.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-1c9647e3.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-1c9647e3 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-1c9647e3.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 4px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-1c9647e3.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-1c9647e3 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-1c9647e3 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-1c9647e3 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-1c9647e3 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-1c9647e3.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-1c9647e3.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-1c9647e3 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-1c9647e3.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-1c9647e3.uagb-infobox__content-wrap{padding-top: 0%;padding-right: 10%;padding-bottom: 0%;padding-left: 0%;}.uagb-block-1c9647e3 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-1c9647e3.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-1c9647e3 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-1c9647e3 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-1c9647e3.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-699445d0{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-block-699445d0 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-699445d0 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-699445d0 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-699445d0 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-699445d0 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-699445d0 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-699445d0{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-c4adcefd.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-c4adcefd .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-c4adcefd.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-c4adcefd.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;text-align: center;}.uagb-block-c4adcefd.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-c4adcefd.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-c4adcefd.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-c4adcefd.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-c4adcefd.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-c4adcefd.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-c4adcefd.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-c4adcefd.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-c4adcefd.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 500px;}.uagb-block-c4adcefd.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-c4adcefd.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-c4adcefd.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-c4adcefd.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}@media only screen and (max-width: 976px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-c5e8f702{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-c5e8f702 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;column-gap: 40px;}.wp-block-uagb-container.uagb-block-c5e8f702{padding-top: 80px;padding-bottom: 80px;padding-left: 32px;padding-right: 32px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;column-gap: 40px;background-color: var(--ast-global-color-4);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-c34f02a8{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-c34f02a8 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 40px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-c34f02a8{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 40px;column-gap: 0px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-63e55a0a{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-63e55a0a > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-63e55a0a{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;}.uagb-block-f47639b5 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-f47639b5.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-f47639b5.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-f47639b5.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-f47639b5.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-f47639b5.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-f47639b5 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-f47639b5 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-f47639b5 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-f47639b5 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-f47639b5 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-f47639b5.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-f47639b5 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-f47639b5.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-f47639b5 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-f47639b5 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-f47639b5.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-e91bf028.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-a1e7d68f.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-style: none;border-color: #333;}.wp-block-uagb-buttons .uagb-block-a1e7d68f .uagb-buttons-repeater.wp-block-button__link{border-style: none;border-color: #333;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-033a0d16{max-width: 75%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-033a0d16 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 0px;column-gap: 32px;}.wp-block-uagb-container.uagb-block-033a0d16{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 32px;}.uagb-block-419ca3c2.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-419ca3c2.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-419ca3c2.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-419ca3c2 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-419ca3c2 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-419ca3c2 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-419ca3c2 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-419ca3c2 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-419ca3c2 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-419ca3c2.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-419ca3c2 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-419ca3c2 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-419ca3c2.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-1c9647e3.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-1c9647e3.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-1c9647e3.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-1c9647e3 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-1c9647e3 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-1c9647e3 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-1c9647e3 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-1c9647e3 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-1c9647e3 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-1c9647e3.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-1c9647e3 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-1c9647e3 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-1c9647e3.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-699445d0{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-699445d0 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-699445d0{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;}.uagb-block-c4adcefd.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 450px;}}@media only screen and (max-width: 767px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-c5e8f702{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-c5e8f702 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;flex-wrap: wrap;row-gap: 40px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-c5e8f702{padding-top: 64px;padding-bottom: 64px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 40px;column-gap: 0px;background-color: var(--ast-global-color-4);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-c34f02a8{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-c34f02a8 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 32px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-c34f02a8{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 32px;column-gap: 0px;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-63e55a0a{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-63e55a0a > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-63e55a0a{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;flex-wrap: wrap;}.uagb-block-f47639b5 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-f47639b5.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-f47639b5.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-f47639b5.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-f47639b5 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-f47639b5 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-f47639b5.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-f47639b5 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-f47639b5 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-f47639b5 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-f47639b5 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-f47639b5.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-f47639b5 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-f47639b5 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-f47639b5.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-e91bf028.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-a1e7d68f.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-style: none;border-color: #333;}.wp-block-uagb-buttons .uagb-block-a1e7d68f .uagb-buttons-repeater.wp-block-button__link{border-style: none;border-color: #333;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-033a0d16{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-033a0d16 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;flex-wrap: nowrap;row-gap: 0px;column-gap: 20px;}.wp-block-uagb-container.uagb-block-033a0d16{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 1px !important;margin-bottom: 1px !important;margin-left: 1px;margin-right: 1px;row-gap: 0px;column-gap: 20px;flex-direction: row;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-block-033a0d16.wp-block-uagb-container > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-uagb-image ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not( .spectra-container-link-overlay ):not(.spectra-image-gallery__control-lightbox):not(.wp-block-uagb-lottie):not(.uagb-container-inner-blocks-wrap){width: 100%;}.wp-block-uagb-container.uagb-block-033a0d16.wp-block-uagb-container > .uagb-container-inner-blocks-wrap > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not(.spectra-image-gallery__control-lightbox){width: 100%;}.uagb-block-419ca3c2.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-419ca3c2.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-419ca3c2 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-419ca3c2 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-419ca3c2.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-419ca3c2 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-419ca3c2 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-419ca3c2 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-419ca3c2 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-419ca3c2.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-419ca3c2 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-419ca3c2 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-419ca3c2.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-1c9647e3.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-1c9647e3.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-1c9647e3 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-1c9647e3 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-1c9647e3.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-1c9647e3 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-1c9647e3 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-1c9647e3 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-1c9647e3 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-1c9647e3.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-1c9647e3 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-1c9647e3 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-1c9647e3.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-699445d0{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-699445d0 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-699445d0{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;flex-wrap: wrap;}.uagb-block-c4adcefd.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 350px;}}";s:7:"content";s:2657:"
<div class="wp-block-uagb-container uagb-block-c5e8f702 alignfull uagb-is-root-container"><div class="uagb-container-inner-blocks-wrap">
<div class="wp-block-uagb-container uagb-block-c34f02a8">
<div class="wp-block-uagb-container uagb-block-63e55a0a">
<div class="wp-block-uagb-info-box uagb-block-f47639b5 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h1 class="uagb-ifb-title">Achieve Your Goals with Our Expert Guidance</h1></div><p class="uagb-ifb-desc">We provide comprehensive solutions and support to help you reach new heights.</p></div></div>



<div class="wp-block-uagb-buttons uagb-buttons__outer-wrap uagb-btn__default-btn uagb-btn-tablet__default-btn uagb-btn-mobile__default-btn uagb-block-e91bf028"><div class="uagb-buttons__wrap uagb-buttons-layout-wrap">
<div class="wp-block-uagb-buttons-child uagb-buttons__outer-wrap uagb-block-a1e7d68f wp-block-button"><div class="uagb-button__wrapper"><a class="uagb-buttons-repeater wp-block-button__link" aria-label="" href="#" rel="follow noopener" target="_self"><div class="uagb-button__link">Get Started</div></a></div></div>
</div></div>
</div>



<div class="wp-block-uagb-container uagb-block-033a0d16">
<div class="wp-block-uagb-info-box uagb-block-419ca3c2 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h4 class="uagb-ifb-title">4.8</h4></div><p class="uagb-ifb-desc">Average user rating</p></div></div>



<div class="wp-block-uagb-info-box uagb-block-1c9647e3 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h4 class="uagb-ifb-title">12+</h4></div><p class="uagb-ifb-desc">Years of experience</p></div></div>
</div>
</div>



<div class="wp-block-uagb-container uagb-block-699445d0">
<div class="wp-block-uagb-image alignleft uagb-block-c4adcefd wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-left"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/10/desserts-01-1024x683.jpg ,https://websitedemos.net/wp-content/uploads/2023/10/desserts-01.jpg 780w, https://websitedemos.net/wp-content/uploads/2023/10/desserts-01.jpg 360w" sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/10/desserts-01-1024x683.jpg" alt="" class="uag-image-80569" width="600" height="500" title="" loading="lazy"/></figure></div>
</div>
</div></div>
";}s:8:"id-83007";a:10:{s:5:"title";s:11:"Services 21";s:3:"url";s:50:"https://websitedemos.net/astra-blocks/services-21/";s:3:"tag";a:0:{}s:8:"category";i:952;s:16:"primary-category";s:0:"";s:4:"type";s:5:"block";s:12:"page-builder";s:9:"gutenberg";s:16:"required-plugins";a:0:{}s:10:"stylesheet";s:38840:".wp-block-uagb-container.uagb-is-root-container .uagb-block-d673aca5{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-d673aca5 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-d673aca5 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-d673aca5 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-d673aca5 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-d673aca5 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-d673aca5 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 72px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-d673aca5{box-shadow: 0px 0px   #00000070 ;padding-top: 112px;padding-bottom: 112px;padding-left: 40px;padding-right: 40px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 72px;column-gap: 0px;overflow: visible;border-color: inherit;background-color: var(--ast-global-color-4);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-a90b2c2e{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-a90b2c2e .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-a90b2c2e .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-a90b2c2e .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-a90b2c2e .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-a90b2c2e .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-a90b2c2e > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 72px;}.wp-block-uagb-container.uagb-block-a90b2c2e{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 72px;overflow: visible;border-color: inherit;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-c7857b8c{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-block-c7857b8c .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-c7857b8c .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-c7857b8c .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-c7857b8c .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-c7857b8c .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-c7857b8c > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: flex-start;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-c7857b8c{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: row;align-items: flex-start;justify-content: center;flex-wrap: nowrap;}.uagb-block-955803d2.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-955803d2 .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-955803d2.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-955803d2.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;text-align: center;}.uagb-block-955803d2.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-955803d2.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-955803d2.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-955803d2.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-955803d2.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-955803d2.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-955803d2.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-955803d2.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-955803d2.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 400px;}.uagb-block-955803d2.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-955803d2.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-955803d2.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-955803d2.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-d4a03254{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-block-d4a03254 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-d4a03254 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-d4a03254 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-d4a03254 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-d4a03254 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-d4a03254 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 32px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-d4a03254{box-shadow: 0px 0px   #00000070 ;padding-top: 48px;padding-bottom: 48px;padding-left: 48px;padding-right: 48px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 32px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;}.uagb-block-7edef7ac .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-7edef7ac .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-7edef7ac .uagb-ifb-icon svg{fill: #333;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-7edef7ac .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-7edef7ac .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-7edef7ac .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-7edef7ac .uagb-ifb-title-wrap .uagb-ifb-title-prefix{color: var(--ast-global-color-2);margin-bottom: 24px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-7edef7ac.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-7edef7ac.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-7edef7ac .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-7edef7ac .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-7edef7ac .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-7edef7ac .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-7edef7ac .uagb-infobox__content-wrap{text-align: left;}.uagb-block-7edef7ac.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-7edef7ac.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-2d05d023{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-2d05d023 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-2d05d023 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-2d05d023 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-2d05d023 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-2d05d023 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-2d05d023 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 72px;}.wp-block-uagb-container.uagb-block-2d05d023{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 72px;overflow: visible;border-color: inherit;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-19d29b90{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-block-19d29b90 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-19d29b90 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-19d29b90 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-19d29b90 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-19d29b90 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-19d29b90 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: flex-start;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-19d29b90{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: row;align-items: flex-start;justify-content: center;flex-wrap: nowrap;}.uagb-block-5eabafd7.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-5eabafd7 .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-5eabafd7.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-5eabafd7.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;text-align: center;}.uagb-block-5eabafd7.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-5eabafd7.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-5eabafd7.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-5eabafd7.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-5eabafd7.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-5eabafd7.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-5eabafd7.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-5eabafd7.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-5eabafd7.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 400px;}.uagb-block-5eabafd7.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-5eabafd7.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-5eabafd7.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-5eabafd7.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-0e3e6aff{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-block-0e3e6aff .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-0e3e6aff .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-0e3e6aff .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-0e3e6aff .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-0e3e6aff .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-0e3e6aff > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 32px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-0e3e6aff{box-shadow: 0px 0px   #00000070 ;padding-top: 48px;padding-bottom: 48px;padding-left: 48px;padding-right: 48px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 32px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;}.uagb-block-3cbb165c .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-3cbb165c .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-3cbb165c .uagb-ifb-icon svg{fill: #333;}.uagb-block-3cbb165c.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-3cbb165c .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-3cbb165c .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-3cbb165c.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-3cbb165c.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-3cbb165c .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-3cbb165c .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-3cbb165c .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-3cbb165c .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-3cbb165c.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-3cbb165c.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-3cbb165c.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-3cbb165c.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-3cbb165c .uagb-ifb-title-wrap .uagb-ifb-title-prefix{color: var(--ast-global-color-2);margin-bottom: 24px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-3cbb165c.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-3cbb165c.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-3cbb165c .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-3cbb165c .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-3cbb165c .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-3cbb165c .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-3cbb165c.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-3cbb165c.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-3cbb165c .uagb-infobox__content-wrap{text-align: left;}.uagb-block-3cbb165c.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-3cbb165c.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-3cbb165c .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-3cbb165c.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-3cbb165c .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-3cbb165c .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-3cbb165c.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}@media only screen and (max-width: 976px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-d673aca5{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-d673aca5 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 40px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-d673aca5{padding-top: 80px;padding-bottom: 80px;padding-left: 32px;padding-right: 32px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 40px;column-gap: 0px;background-color: var(--ast-global-color-4);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-a90b2c2e{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-a90b2c2e > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;row-gap: 0px;column-gap: 40px;}.wp-block-uagb-container.uagb-block-a90b2c2e{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 40px;align-items: stretch;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-c7857b8c{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-c7857b8c > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-c7857b8c{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;}.uagb-block-955803d2.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 450px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-d4a03254{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-d4a03254 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-d4a03254{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;}.uagb-block-7edef7ac .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-7edef7ac.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-7edef7ac.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-7edef7ac .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-7edef7ac .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-7edef7ac .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-2d05d023{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-2d05d023 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;row-gap: 0px;column-gap: 40px;}.wp-block-uagb-container.uagb-block-2d05d023{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 40px;align-items: stretch;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-19d29b90{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-19d29b90 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-19d29b90{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;}.uagb-block-5eabafd7.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 450px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-0e3e6aff{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-0e3e6aff > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-0e3e6aff{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;}.uagb-block-3cbb165c .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-3cbb165c.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-3cbb165c.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-3cbb165c.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-3cbb165c.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-3cbb165c.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-3cbb165c .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-3cbb165c .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-3cbb165c .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-3cbb165c .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-3cbb165c .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-3cbb165c .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-3cbb165c.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-3cbb165c .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-3cbb165c .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-3cbb165c.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}}@media only screen and (max-width: 767px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-d673aca5{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-d673aca5 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 40px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-d673aca5{padding-top: 64px;padding-bottom: 64px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 40px;column-gap: 0px;background-color: var(--ast-global-color-4);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-a90b2c2e{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-a90b2c2e > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;flex-wrap: wrap;row-gap: 30px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-a90b2c2e{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 30px;column-gap: 0px;align-items: stretch;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-c7857b8c{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-c7857b8c > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-c7857b8c{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;flex-wrap: wrap;}.uagb-block-955803d2.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 300px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-d4a03254{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-d4a03254 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-d4a03254{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;flex-wrap: wrap;}.uagb-block-7edef7ac.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-7edef7ac .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-7edef7ac .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-7edef7ac .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-2d05d023{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-2d05d023 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;flex-wrap: wrap;row-gap: 30px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-2d05d023{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 30px;column-gap: 0px;align-items: stretch;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-19d29b90{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-19d29b90 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-19d29b90{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;flex-wrap: wrap;}.uagb-block-5eabafd7.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 300px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-0e3e6aff{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-0e3e6aff > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-0e3e6aff{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;flex-wrap: wrap;}.uagb-block-3cbb165c.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-3cbb165c.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-3cbb165c.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-3cbb165c .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-3cbb165c .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-3cbb165c.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-3cbb165c .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-3cbb165c .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-3cbb165c .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-3cbb165c .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-3cbb165c.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-3cbb165c .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-3cbb165c .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-3cbb165c.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}}";s:7:"content";s:2786:"
<div class="wp-block-uagb-container uagb-block-d673aca5 alignfull uagb-is-root-container"><div class="uagb-container-inner-blocks-wrap">
<div class="wp-block-uagb-container uagb-block-a90b2c2e">
<div class="wp-block-uagb-container uagb-block-c7857b8c">
<div class="wp-block-uagb-image alignleft uagb-block-955803d2 wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-left"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/10/natures-02.jpg ,https://websitedemos.net/wp-content/uploads/2023/10/natures-02.jpg 780w" sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/10/natures-02.jpg" alt="" class="uag-image-80574" width="600" height="400" title="" loading="lazy"/></figure></div>
</div>



<div class="wp-block-uagb-container uagb-block-d4a03254">
<div class="wp-block-uagb-info-box uagb-block-7edef7ac uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h6 class="uagb-ifb-title-prefix">01</h6><h3 class="uagb-ifb-title">Service 1</h3></div><p class="uagb-ifb-desc">Share some details here for Service one. This is a flexible section where you can share anything you want. It could be details or some information about your service.</p></div></div>
</div>
</div>



<div class="wp-block-uagb-container uagb-block-2d05d023">
<div class="wp-block-uagb-container uagb-block-19d29b90">
<div class="wp-block-uagb-image alignleft uagb-block-5eabafd7 wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-left"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/10/desserts-01-1024x683.jpg ,https://websitedemos.net/wp-content/uploads/2023/10/desserts-01.jpg 780w, https://websitedemos.net/wp-content/uploads/2023/10/desserts-01.jpg 360w" sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/10/desserts-01-1024x683.jpg" alt="" class="uag-image-80569" width="600" height="400" title="" loading="lazy"/></figure></div>
</div>



<div class="wp-block-uagb-container uagb-block-0e3e6aff">
<div class="wp-block-uagb-info-box uagb-block-3cbb165c uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h6 class="uagb-ifb-title-prefix">02</h6><h3 class="uagb-ifb-title">Service 2</h3></div><p class="uagb-ifb-desc">Share some details here for Service two. This is a flexible section where you can share anything you want. It could be details or some information about your services.</p></div></div>
</div>
</div>
</div></div>
";}s:8:"id-82976";a:10:{s:5:"title";s:11:"Services 20";s:3:"url";s:50:"https://websitedemos.net/astra-blocks/services-20/";s:3:"tag";a:0:{}s:8:"category";i:952;s:16:"primary-category";s:0:"";s:4:"type";s:5:"block";s:12:"page-builder";s:9:"gutenberg";s:16:"required-plugins";a:0:{}s:10:"stylesheet";s:46124:".wp-block-uagb-container.uagb-is-root-container .uagb-block-d331ca0d{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-d331ca0d .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-d331ca0d .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-d331ca0d .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-d331ca0d .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-d331ca0d .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-block-d331ca0d{box-shadow: 0px 0px   #00000070 ;padding-top: 112px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 72px;column-gap: 0px;overflow: visible;border-color: inherit;background-color: var(--ast-global-color-4);;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-e20e1c6f{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-e20e1c6f .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-e20e1c6f .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-e20e1c6f .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-e20e1c6f .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-e20e1c6f .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-e20e1c6f > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-e20e1c6f{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 40px;padding-right: 40px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;}.uagb-block-a4aa452a .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-a4aa452a .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-a4aa452a .uagb-ifb-icon svg{fill: #333;}.uagb-block-a4aa452a.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-a4aa452a .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-a4aa452a .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-a4aa452a.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-a4aa452a.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-a4aa452a .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-a4aa452a .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-a4aa452a .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-a4aa452a .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-a4aa452a.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-a4aa452a.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-a4aa452a.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-a4aa452a.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-a4aa452a .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-a4aa452a.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-a4aa452a.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 20px;}.uagb-block-a4aa452a .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-a4aa452a .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-a4aa452a .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-a4aa452a .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-a4aa452a.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-a4aa452a.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-a4aa452a .uagb-infobox__content-wrap{text-align: center;}.uagb-block-a4aa452a.uagb-infobox-icon-above-title{text-align: center;}.uagb-block-a4aa452a.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-a4aa452a .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-a4aa452a.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-a4aa452a .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-a4aa452a .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-a4aa452a.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-a1b58370{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-a1b58370 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-a1b58370 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-a1b58370 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-a1b58370 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-a1b58370 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-a1b58370 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-a1b58370{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-c2078e23{max-width: 34%;width: 100%;}.wp-block-uagb-container.uagb-block-c2078e23 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-c2078e23 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-c2078e23 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-c2078e23 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-c2078e23 .uagb-container__video-wrap video{opacity: 0.3;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-c2078e23 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-end;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-c2078e23{box-shadow: 0px 0px   #00000070 ;padding-top: 370px;padding-bottom: 48px;padding-left: 48px;padding-right: 48px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;background-repeat: no-repeat;background-position: 50% 50%;background-size: cover;background-attachment: scroll;background-image: url(https://websitedemos.net/wp-content/uploads/2023/10/natures-01.jpg);;background-clip: padding-box;flex-direction: column;align-items: center;justify-content: flex-end;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-block-c2078e23::before{content: "";position: absolute;pointer-events: none;top: -0px;left: -0px;width: calc(100% + 0px + 0px);height: calc(100% + 0px + 0px);border-color: inherit;background: var(--ast-global-color-7);opacity: 0.7;}.uagb-block-3087b66d .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-3087b66d .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-3087b66d .uagb-ifb-icon svg{fill: #333;}.uagb-block-3087b66d.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-3087b66d .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-3087b66d .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-3087b66d.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-3087b66d.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-3087b66d .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-3087b66d .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-3087b66d .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-3087b66d .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-3087b66d.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-3087b66d.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-3087b66d.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-3087b66d.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-3087b66d .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-3087b66d.wp-block-uagb-info-box .uagb-ifb-title{color: #ffffff;margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-3087b66d.wp-block-uagb-info-box .uagb-ifb-desc{color: #ffffff;margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-3087b66d .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-3087b66d .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-3087b66d .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-3087b66d .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-3087b66d.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-3087b66d.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-3087b66d .uagb-infobox__content-wrap{text-align: left;}.uagb-block-3087b66d.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-3087b66d.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-3087b66d .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-3087b66d.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-3087b66d .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-3087b66d .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-3087b66d.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-7730a673{max-width: 34%;width: 100%;}.wp-block-uagb-container.uagb-block-7730a673 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-7730a673 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-7730a673 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-7730a673 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-7730a673 .uagb-container__video-wrap video{opacity: 0.3;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-7730a673 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-end;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-7730a673{box-shadow: 0px 0px   #00000070 ;padding-top: 370px;padding-bottom: 48px;padding-left: 48px;padding-right: 48px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;background-repeat: no-repeat;background-position: 50% 50%;background-size: cover;background-attachment: scroll;background-image: url(https://websitedemos.net/wp-content/uploads/2023/10/rivers-01.jpg);;background-clip: padding-box;flex-direction: column;align-items: center;justify-content: flex-end;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-block-7730a673::before{content: "";position: absolute;pointer-events: none;top: -0px;left: -0px;width: calc(100% + 0px + 0px);height: calc(100% + 0px + 0px);border-color: inherit;background: var(--ast-global-color-7);opacity: 0.7;}.uagb-block-e1370d61 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-e1370d61 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-e1370d61 .uagb-ifb-icon svg{fill: #333;}.uagb-block-e1370d61.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-e1370d61 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-e1370d61 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-e1370d61.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-e1370d61.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-e1370d61 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-e1370d61 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-e1370d61 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-e1370d61 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-e1370d61.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-e1370d61.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-e1370d61.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-e1370d61.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-e1370d61 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-e1370d61.wp-block-uagb-info-box .uagb-ifb-title{color: #ffffff;margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-e1370d61.wp-block-uagb-info-box .uagb-ifb-desc{color: #ffffff;margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-e1370d61 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-e1370d61 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-e1370d61 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-e1370d61 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-e1370d61.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-e1370d61.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-e1370d61 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-e1370d61.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-e1370d61.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-e1370d61 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-e1370d61.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-e1370d61 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-e1370d61 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-e1370d61.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-2d34091f{max-width: 34%;width: 100%;}.wp-block-uagb-container.uagb-block-2d34091f .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-2d34091f .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-2d34091f .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-2d34091f .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-2d34091f .uagb-container__video-wrap video{opacity: 0.3;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-2d34091f > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-end;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-2d34091f{box-shadow: 0px 0px   #00000070 ;padding-top: 370px;padding-bottom: 48px;padding-left: 48px;padding-right: 48px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;background-repeat: no-repeat;background-position: 50% 50%;background-size: cover;background-attachment: scroll;background-image: url(https://websitedemos.net/wp-content/uploads/2023/10/snow-mountains-01.jpg);;background-clip: padding-box;flex-direction: column;align-items: center;justify-content: flex-end;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-block-2d34091f::before{content: "";position: absolute;pointer-events: none;top: -0px;left: -0px;width: calc(100% + 0px + 0px);height: calc(100% + 0px + 0px);border-color: inherit;background: var(--ast-global-color-7);opacity: 0.7;}.uagb-block-06920d60 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-06920d60 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-06920d60 .uagb-ifb-icon svg{fill: #333;}.uagb-block-06920d60.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-06920d60 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-06920d60 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-06920d60.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-06920d60.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-06920d60 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-06920d60 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-06920d60 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-06920d60 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-06920d60.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-06920d60.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-06920d60.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-06920d60.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-06920d60 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-06920d60.wp-block-uagb-info-box .uagb-ifb-title{color: #ffffff;margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-06920d60.wp-block-uagb-info-box .uagb-ifb-desc{color: #ffffff;margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-06920d60 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-06920d60 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-06920d60 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-06920d60 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-06920d60.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-06920d60.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-06920d60 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-06920d60.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-06920d60.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-06920d60 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-06920d60.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-06920d60 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-06920d60 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-06920d60.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}@media only screen and (max-width: 976px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-d331ca0d{width: 100%;}.wp-block-uagb-container.uagb-block-d331ca0d{padding-top: 80px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 40px;column-gap: 0px;background-color: var(--ast-global-color-4);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-e20e1c6f{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-e20e1c6f > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-e20e1c6f{padding-top: 0px;padding-bottom: 0px;padding-left: 40px;padding-right: 40px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;}.uagb-block-a4aa452a.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-a4aa452a.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-a4aa452a.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-a4aa452a .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-a4aa452a .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-a4aa452a .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-a4aa452a .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-a4aa452a .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-a4aa452a .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-a4aa452a.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-a4aa452a .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-a4aa452a .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-a4aa452a.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-a1b58370{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-a1b58370 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-a1b58370{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;align-items: stretch;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-c2078e23{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-c2078e23 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-c2078e23{padding-top: 280px;padding-bottom: 24px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;background-clip: padding-box;}.wp-block-uagb-container.uagb-block-c2078e23::before{top: -0px;left: -0px;width: calc(100% + 0px + 0px);height: calc(100% + 0px + 0px);}.uagb-block-3087b66d.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-3087b66d.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-3087b66d.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-3087b66d.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-3087b66d.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-3087b66d .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-3087b66d .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-3087b66d .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-3087b66d .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-3087b66d .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-3087b66d.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-3087b66d .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-3087b66d.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-3087b66d .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-3087b66d .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-3087b66d.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-7730a673{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-7730a673 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-7730a673{padding-top: 280px;padding-bottom: 24px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;background-clip: padding-box;}.wp-block-uagb-container.uagb-block-7730a673::before{top: -0px;left: -0px;width: calc(100% + 0px + 0px);height: calc(100% + 0px + 0px);}.uagb-block-e1370d61.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-e1370d61.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-e1370d61.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-e1370d61.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-e1370d61.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-e1370d61 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-e1370d61 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-e1370d61 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-e1370d61 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-e1370d61 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-e1370d61.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-e1370d61 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-e1370d61.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-e1370d61 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-e1370d61 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-e1370d61.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-2d34091f{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-2d34091f > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-2d34091f{padding-top: 280px;padding-bottom: 24px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;background-clip: padding-box;}.wp-block-uagb-container.uagb-block-2d34091f::before{top: -0px;left: -0px;width: calc(100% + 0px + 0px);height: calc(100% + 0px + 0px);}.uagb-block-06920d60.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-06920d60.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-06920d60.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-06920d60.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-06920d60.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-06920d60 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-06920d60 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-06920d60 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-06920d60 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-06920d60 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-06920d60.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-06920d60 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-06920d60.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-06920d60 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-06920d60 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-06920d60.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}}@media only screen and (max-width: 767px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-d331ca0d{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-d331ca0d{padding-top: 64px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 40px;column-gap: 0px;background-color: var(--ast-global-color-4);;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-e20e1c6f{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-e20e1c6f > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-e20e1c6f{padding-top: 0px;padding-bottom: 0px;padding-left: 40px;padding-right: 40px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;flex-wrap: wrap;}.uagb-block-a4aa452a.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-a4aa452a.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-a4aa452a .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-a4aa452a .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-a4aa452a.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-a4aa452a .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-a4aa452a .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-a4aa452a .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-a4aa452a .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-a4aa452a.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-a4aa452a .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-a4aa452a .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-a4aa452a.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-a1b58370{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-a1b58370 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-a1b58370{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;align-items: stretch;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-c2078e23{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-c2078e23 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-c2078e23{padding-top: 240px;padding-bottom: 24px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;background-clip: padding-box;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-c2078e23::before{top: -0px;left: -0px;width: calc(100% + 0px + 0px);height: calc(100% + 0px + 0px);}.uagb-block-3087b66d.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-3087b66d.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-3087b66d.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-3087b66d.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-3087b66d .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-3087b66d .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-3087b66d.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-3087b66d .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-3087b66d .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-3087b66d .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-3087b66d.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-3087b66d .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-3087b66d.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-3087b66d .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-3087b66d .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-3087b66d.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-7730a673{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-7730a673 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-7730a673{padding-top: 240px;padding-bottom: 24px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;background-clip: padding-box;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-7730a673::before{top: -0px;left: -0px;width: calc(100% + 0px + 0px);height: calc(100% + 0px + 0px);}.uagb-block-e1370d61.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-e1370d61.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-e1370d61.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-e1370d61.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-e1370d61 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-e1370d61 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-e1370d61.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-e1370d61 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-e1370d61 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-e1370d61 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-e1370d61.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-e1370d61 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-e1370d61.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-e1370d61 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-e1370d61 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-e1370d61.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-2d34091f{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-2d34091f > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-2d34091f{padding-top: 240px;padding-bottom: 24px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;background-clip: padding-box;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-2d34091f::before{top: -0px;left: -0px;width: calc(100% + 0px + 0px);height: calc(100% + 0px + 0px);}.uagb-block-06920d60.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-06920d60.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-06920d60.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-06920d60.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-06920d60 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-06920d60 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-06920d60.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-06920d60 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-06920d60 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-06920d60 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-06920d60.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-06920d60 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-06920d60.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-06920d60 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-06920d60 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-06920d60.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}}";s:7:"content";s:1995:"
<div class="wp-block-uagb-container uagb-block-d331ca0d alignfull uagb-is-root-container">
<div class="wp-block-uagb-container uagb-block-e20e1c6f">
<div class="wp-block-uagb-info-box uagb-block-a4aa452a uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h2 class="uagb-ifb-title">Innovative Solutions for Growth</h2></div></div></div>
</div>



<div class="wp-block-uagb-container uagb-block-a1b58370">
<div class="wp-block-uagb-container uagb-block-c2078e23">
<div class="wp-block-uagb-info-box uagb-block-3087b66d uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h5 class="uagb-ifb-title">Service 1</h5></div><p class="uagb-ifb-desc">This is a flexible section where you can share anything you want. It could be details or some information about your service one.</p></div></div>
</div>



<div class="wp-block-uagb-container uagb-block-7730a673">
<div class="wp-block-uagb-info-box uagb-block-e1370d61 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h5 class="uagb-ifb-title">Service 2</h5></div><p class="uagb-ifb-desc">This is a flexible section where you can share anything you want. It could be details or some information about your service two.</p></div></div>
</div>



<div class="wp-block-uagb-container uagb-block-2d34091f">
<div class="wp-block-uagb-info-box uagb-block-06920d60 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h5 class="uagb-ifb-title">Service 3</h5></div><p class="uagb-ifb-desc">This is a flexible section where you can share anything you want. It could be details or some information about your service 3.</p></div></div>
</div>
</div>
</div>
";}s:8:"id-82961";a:10:{s:5:"title";s:11:"Features 17";s:3:"url";s:50:"https://websitedemos.net/astra-blocks/features-17/";s:3:"tag";a:0:{}s:8:"category";i:919;s:16:"primary-category";s:0:"";s:4:"type";s:5:"block";s:12:"page-builder";s:9:"gutenberg";s:16:"required-plugins";a:0:{}s:10:"stylesheet";s:26026:".wp-block-uagb-container.uagb-is-root-container .uagb-block-01667a90{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-01667a90 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-01667a90 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-01667a90 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-01667a90 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-01667a90 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-01667a90 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: stretch;justify-content: flex-start;flex-wrap: nowrap;row-gap: 48px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-01667a90{box-shadow: 0px 0px   #00000070 ;padding-top: 112px;padding-bottom: 112px;padding-left: 40px;padding-right: 40px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 48px;column-gap: 0px;overflow: visible;border-color: inherit;background-color: var(--ast-global-color-4);;}.uagb-block-eac94e97 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-eac94e97 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-eac94e97 .uagb-ifb-icon svg{fill: #333;}.uagb-block-eac94e97.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-eac94e97 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-eac94e97 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-eac94e97.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-eac94e97.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-eac94e97 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-eac94e97 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-eac94e97 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-eac94e97 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-eac94e97.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-eac94e97.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-eac94e97.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-eac94e97.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-eac94e97 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-eac94e97.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-eac94e97.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0%;margin-top: 0%;margin-left: 15%;margin-right: 15%;}.uagb-block-eac94e97 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-eac94e97 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-eac94e97 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-eac94e97 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-eac94e97.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-eac94e97.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-eac94e97 .uagb-infobox__content-wrap{text-align: center;}.uagb-block-eac94e97.uagb-infobox-icon-above-title{text-align: center;}.uagb-block-eac94e97.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-eac94e97 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-eac94e97.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-eac94e97 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-eac94e97 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-eac94e97.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-921e631d{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-921e631d .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-921e631d .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-921e631d .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-921e631d .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-921e631d .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-921e631d > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: flex-start;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 72px;}.wp-block-uagb-container.uagb-block-921e631d{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 72px;overflow: visible;border-color: inherit;flex-direction: row;align-items: flex-start;justify-content: flex-start;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-e966301f{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-block-e966301f .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-e966301f .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-e966301f .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-e966301f .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-e966301f .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-e966301f > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: flex-start;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-e966301f{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;background-color: ;;flex-direction: column;align-items: flex-start;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-86cc8dfd .uagb-icon svg{width: 20px;height: 20px;font-size: 20px;fill: var(--ast-global-color-2);}.uagb-block-86cc8dfd .uagb-icon-active svg{width: 20px;height: 20px;font-size: 20px;fill: var(--ast-global-color-2);}.uagb-block-86cc8dfd .uagb-faq-child__outer-wrap{margin-bottom: 20px;}.uagb-block-86cc8dfd .uagb-faq-item{background-color: var(--ast-global-color-5);border-top-left-radius: 0px;border-top-right-radius: 0px;border-bottom-left-radius: 0px;border-bottom-right-radius: 0px;border-color: #D2D2D2;border-style: none;}.uagb-block-86cc8dfd .uagb-faq-item .uagb-question{color: var(--ast-global-color-2);}.uagb-block-86cc8dfd .uagb-faq-questions-button{padding-top: 24px;padding-bottom: 24px;padding-right: 24px;padding-left: 24px;background-color: var(--ast-global-color-5);}.uagb-block-86cc8dfd .uagb-faq-content{padding-top: 0px;padding-bottom: 24px;padding-right: 24px;padding-left: 24px;}.uagb-block-86cc8dfd .uagb-faq-content span{margin-top: 0px;margin-bottom: 24px;margin-right: 24px;margin-left: 24px;}.uagb-block-86cc8dfd.uagb-faq-icon-row .uagb-faq-item .uagb-faq-icon-wrap{margin-right: 10px;}.uagb-block-86cc8dfd.uagb-faq-icon-row-reverse .uagb-faq-item .uagb-faq-icon-wrap{margin-left: 10px;}.uagb-block-86cc8dfd.wp-block-uagb-faq .uagb-faq-item .uagb-faq-icon-wrap{border-top-left-radius: 0px;border-top-right-radius: 0px;border-bottom-left-radius: 0px;border-bottom-right-radius: 0px;}.uagb-block-86cc8dfd .uagb-faq-item:hover .uagb-icon svg{fill: var(--ast-global-color-2);}.uagb-block-86cc8dfd .uagb-faq-item .uagb-faq-questions-button.uagb-faq-questions{flex-direction: row;}.uagb-block-86cc8dfd .uagb-faq-item .uagb-faq-content{color: var(--ast-global-color-3);}.uagb-block-86cc8dfd .wp-block-uagb-faq-child.uagb-faq-child__outer-wrap .uagb-faq-content {display: none;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-b4fb47ae{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-block-b4fb47ae .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-b4fb47ae .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-b4fb47ae .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-b4fb47ae .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-b4fb47ae .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-b4fb47ae > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: flex-start;justify-content: flex-start;flex-wrap: nowrap;row-gap: 20px;column-gap: 20px;}.wp-block-uagb-container.uagb-block-b4fb47ae{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 20px;column-gap: 20px;overflow: visible;border-color: inherit;flex-direction: column;align-items: flex-start;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-1b57a46d.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-1b57a46d .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-1b57a46d.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-1b57a46d.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;text-align: center;}.uagb-block-1b57a46d.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-1b57a46d.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-1b57a46d.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-1b57a46d.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-1b57a46d.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-1b57a46d.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-1b57a46d.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-1b57a46d.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-1b57a46d.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 400px;}.uagb-block-1b57a46d.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-1b57a46d.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-1b57a46d.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-1b57a46d.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-19db1842.wp-block-uagb-buttons.uagb-buttons__outer-wrap .uagb-buttons__wrap {column-gap: 10px;}.uagb-block-19db1842.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: center;align-items: center;}.uagb-block-19db1842 .uagb-button__wrapper{margin-top: 0px;margin-bottom: 0px;margin-left: 0px;margin-right: 0px;}.wp-block-uagb-buttons .uagb-block-3d516b68 .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-3d516b68 .uagb-buttons-repeater .uagb-button__icon > svg{width: 15px;height: 15px;}.wp-block-uagb-buttons .uagb-block-3d516b68 .uagb-buttons-repeater .uagb-button__icon-position-after{margin-left: 8px;}.wp-block-uagb-buttons .uagb-block-3d516b68 .uagb-buttons-repeater .uagb-button__icon-position-before{margin-right: 8px;}@media only screen and (max-width: 976px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-01667a90{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-01667a90 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 40px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-01667a90{padding-top: 80px;padding-bottom: 80px;padding-left: 32px;padding-right: 32px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 40px;column-gap: 0px;background-color: var(--ast-global-color-4);;}.uagb-block-eac94e97.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-eac94e97.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0%;margin-top: 0%;margin-left: 8%;margin-right: 8%;}.uagb-block-eac94e97.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-eac94e97.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-eac94e97.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-eac94e97 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-eac94e97 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-eac94e97 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-eac94e97 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-eac94e97 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-eac94e97.uagb-infobox__content-wrap{padding-top: 0%;padding-right: 0%;padding-bottom: 0%;padding-left: 0%;}.uagb-block-eac94e97 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-eac94e97.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-eac94e97 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-eac94e97 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-eac94e97.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-921e631d{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-921e631d > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 0px;column-gap: 30px;}.wp-block-uagb-container.uagb-block-921e631d{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 30px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-e966301f{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-e966301f > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-e966301f{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;background-color: ;;}.uagb-block-86cc8dfd.uagb-faq-icon-row .uagb-faq-item .uagb-faq-icon-wrap{margin-right: 10px;}.uagb-block-86cc8dfd.uagb-faq-icon-row-reverse .uagb-faq-item .uagb-faq-icon-wrap{margin-left: 10px;}.uagb-block-86cc8dfd .uagb-faq-questions-button{padding-top: 10px;padding-bottom: 10px;padding-right: 10px;padding-left: 10px;}.uagb-block-86cc8dfd .uagb-faq-content{padding-top: 0px;padding-bottom: 0px;padding-right: 10px;padding-left: 10px;}.uagb-block-86cc8dfd .uagb-faq-content span{margin-top: 0px;margin-bottom: 0px;margin-right: 10px;margin-left: 10px;}.uagb-block-86cc8dfd .uagb-icon svg{width: 16px;height: 16px;font-size: 16px;}.uagb-block-86cc8dfd .uagb-icon-active svg{width: 16px;height: 16px;font-size: 16px;}.uagb-block-86cc8dfd .uagb-faq-item{border-style: none;border-color: #D2D2D2;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-b4fb47ae{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-b4fb47ae > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-b4fb47ae{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;}.uagb-block-1b57a46d.wp-block-uagb-image--layout-default figure img{border-style: none;}.uagb-block-1b57a46d.wp-block-uagb-image--layout-overlay figure img{border-style: none;}.uagb-block-1b57a46d.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 450px;}.uagb-block-1b57a46d.wp-block-uagb-image{text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-1b57a46d .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-19db1842.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: center;align-items: center;}}@media only screen and (max-width: 767px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-01667a90{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-01667a90 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-01667a90{padding-top: 64px;padding-bottom: 64px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;background-color: var(--ast-global-color-4);;}.uagb-block-eac94e97.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-eac94e97.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-eac94e97.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-eac94e97.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-eac94e97 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-eac94e97 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-eac94e97.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-eac94e97 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-eac94e97 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-eac94e97 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-eac94e97.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-eac94e97 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-eac94e97.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-eac94e97 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-eac94e97 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-eac94e97.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-921e631d{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-921e631d > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-921e631d{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-e966301f{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-e966301f > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-e966301f{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;background-color: ;;flex-wrap: wrap;}.uagb-block-86cc8dfd.uagb-faq-icon-row .uagb-faq-item .uagb-faq-icon-wrap{margin-right: 10px;}.uagb-block-86cc8dfd .uagb-faq-item{border-style: none;border-color: #D2D2D2;}.uagb-block-86cc8dfd.uagb-faq-icon-row-reverse .uagb-faq-item .uagb-faq-icon-wrap{margin-left: 10px;}.uagb-block-86cc8dfd .uagb-faq-questions-button{padding-top: 10px;padding-bottom: 10px;padding-right: 10px;padding-left: 0px;}.uagb-block-86cc8dfd .uagb-faq-content{padding-top: 0px;padding-bottom: 0px;padding-right: 0px;padding-left: 0px;}.uagb-block-86cc8dfd .uagb-faq-content span{margin-top: 0px;margin-bottom: 0px;margin-right: 0px;margin-left: 0px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-b4fb47ae{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-b4fb47ae > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-b4fb47ae{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;flex-wrap: wrap;}.uagb-block-1b57a46d.wp-block-uagb-image--layout-default figure img{border-style: none;}.uagb-block-1b57a46d.wp-block-uagb-image--layout-overlay figure img{border-style: none;}.uagb-block-1b57a46d.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 200px;}.uagb-block-1b57a46d.wp-block-uagb-image{text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-1b57a46d .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-19db1842.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: center;align-items: center;}}";s:7:"content";s:6977:"
<div class="wp-block-uagb-container uagb-block-01667a90 alignfull uagb-is-root-container"><div class="uagb-container-inner-blocks-wrap">
<div class="wp-block-uagb-info-box uagb-block-eac94e97 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h2 class="uagb-ifb-title">Innovative Solutions for Modern Challenges</h2></div><p class="uagb-ifb-desc">Discover groundbreaking features designed to tackle tomorrow's challenges head-on. Explore innovative solutions shaping the future landscape.</p></div></div>



<div class="wp-block-uagb-container uagb-block-921e631d">
<div class="wp-block-uagb-container uagb-block-e966301f">
<div class="wp-block-uagb-faq uagb-faq__outer-wrap uagb-block-86cc8dfd uagb-faq-icon-row uagb-faq-layout-accordion uagb-faq-expand-first-true uagb-faq-inactive-other-true uagb-faq__wrap uagb-buttons-layout-wrap uagb-faq-equal-height" data-faqtoggle="true" role="tablist">
<div class="wp-block-uagb-faq-child uagb-faq-child__outer-wrap uagb-faq-item uagb-block-46f9f068" role="tab" tabindex="0"><div class="uagb-faq-questions-button uagb-faq-questions"><span class="uagb-icon uagb-faq-icon-wrap"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 448 512"><path d="M438.6 105.4C451.1 117.9 451.1 138.1 438.6 150.6L182.6 406.6C170.1 419.1 149.9 419.1 137.4 406.6L9.372 278.6C-3.124 266.1-3.124 245.9 9.372 233.4C21.87 220.9 42.13 220.9 54.63 233.4L159.1 338.7L393.4 105.4C405.9 92.88 426.1 92.88 438.6 105.4H438.6z"></path></svg></span><span class="uagb-icon-active uagb-faq-icon-wrap"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 448 512"><path d="M438.6 105.4C451.1 117.9 451.1 138.1 438.6 150.6L182.6 406.6C170.1 419.1 149.9 419.1 137.4 406.6L9.372 278.6C-3.124 266.1-3.124 245.9 9.372 233.4C21.87 220.9 42.13 220.9 54.63 233.4L159.1 338.7L393.4 105.4C405.9 92.88 426.1 92.88 438.6 105.4H438.6z"></path></svg></span><h5 class="uagb-question">Feature 1</h5></div><p class="uagb-faq-content">This is a flexible section where you can share anything you want. It could be details or some information about feature one.</p></div>



<div class="wp-block-uagb-faq-child uagb-faq-child__outer-wrap uagb-faq-item uagb-block-bb891317" role="tab" tabindex="0"><div class="uagb-faq-questions-button uagb-faq-questions"><span class="uagb-icon uagb-faq-icon-wrap"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 448 512"><path d="M438.6 105.4C451.1 117.9 451.1 138.1 438.6 150.6L182.6 406.6C170.1 419.1 149.9 419.1 137.4 406.6L9.372 278.6C-3.124 266.1-3.124 245.9 9.372 233.4C21.87 220.9 42.13 220.9 54.63 233.4L159.1 338.7L393.4 105.4C405.9 92.88 426.1 92.88 438.6 105.4H438.6z"></path></svg></span><span class="uagb-icon-active uagb-faq-icon-wrap"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 448 512"><path d="M438.6 105.4C451.1 117.9 451.1 138.1 438.6 150.6L182.6 406.6C170.1 419.1 149.9 419.1 137.4 406.6L9.372 278.6C-3.124 266.1-3.124 245.9 9.372 233.4C21.87 220.9 42.13 220.9 54.63 233.4L159.1 338.7L393.4 105.4C405.9 92.88 426.1 92.88 438.6 105.4H438.6z"></path></svg></span><h5 class="uagb-question">Feature 2</h5></div><p class="uagb-faq-content">This is a flexible section where you can share anything you want. It could be details or some information about feature two.</p></div>



<div class="wp-block-uagb-faq-child uagb-faq-child__outer-wrap uagb-faq-item uagb-block-9ffddea4" role="tab" tabindex="0"><div class="uagb-faq-questions-button uagb-faq-questions"><span class="uagb-icon uagb-faq-icon-wrap"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 448 512"><path d="M438.6 105.4C451.1 117.9 451.1 138.1 438.6 150.6L182.6 406.6C170.1 419.1 149.9 419.1 137.4 406.6L9.372 278.6C-3.124 266.1-3.124 245.9 9.372 233.4C21.87 220.9 42.13 220.9 54.63 233.4L159.1 338.7L393.4 105.4C405.9 92.88 426.1 92.88 438.6 105.4H438.6z"></path></svg></span><span class="uagb-icon-active uagb-faq-icon-wrap"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 448 512"><path d="M438.6 105.4C451.1 117.9 451.1 138.1 438.6 150.6L182.6 406.6C170.1 419.1 149.9 419.1 137.4 406.6L9.372 278.6C-3.124 266.1-3.124 245.9 9.372 233.4C21.87 220.9 42.13 220.9 54.63 233.4L159.1 338.7L393.4 105.4C405.9 92.88 426.1 92.88 438.6 105.4H438.6z"></path></svg></span><h5 class="uagb-question">Feature 3</h5></div><p class="uagb-faq-content">This is a flexible section where you can share anything you want. It could be details or some information about feature three.</p></div>



<div class="wp-block-uagb-faq-child uagb-faq-child__outer-wrap uagb-faq-item uagb-block-a2992c7f" role="tab" tabindex="0"><div class="uagb-faq-questions-button uagb-faq-questions"><span class="uagb-icon uagb-faq-icon-wrap"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 448 512"><path d="M438.6 105.4C451.1 117.9 451.1 138.1 438.6 150.6L182.6 406.6C170.1 419.1 149.9 419.1 137.4 406.6L9.372 278.6C-3.124 266.1-3.124 245.9 9.372 233.4C21.87 220.9 42.13 220.9 54.63 233.4L159.1 338.7L393.4 105.4C405.9 92.88 426.1 92.88 438.6 105.4H438.6z"></path></svg></span><span class="uagb-icon-active uagb-faq-icon-wrap"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 448 512"><path d="M438.6 105.4C451.1 117.9 451.1 138.1 438.6 150.6L182.6 406.6C170.1 419.1 149.9 419.1 137.4 406.6L9.372 278.6C-3.124 266.1-3.124 245.9 9.372 233.4C21.87 220.9 42.13 220.9 54.63 233.4L159.1 338.7L393.4 105.4C405.9 92.88 426.1 92.88 438.6 105.4H438.6z"></path></svg></span><h5 class="uagb-question">Feature 4</h5></div><p class="uagb-faq-content">This is a flexible section where you can share anything you want. It could be details or some information about feature four.</p></div>
</div>
</div>



<div class="wp-block-uagb-container uagb-block-b4fb47ae">
<div class="wp-block-uagb-image alignleft uagb-block-1b57a46d wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-left"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/09/about-04.jpg ,https://websitedemos.net/wp-content/uploads/2023/09/about-04-300x200.jpg 780w, https://websitedemos.net/wp-content/uploads/2023/09/about-04.jpg 360w" sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/09/about-04.jpg" alt="" class="uag-image-77404" width="600" height="400" title="" loading="lazy"/></figure></div>
</div>
</div>



<div class="wp-block-uagb-buttons uagb-buttons__outer-wrap uagb-btn__default-btn uagb-btn-tablet__default-btn uagb-btn-mobile__default-btn uagb-block-19db1842"><div class="uagb-buttons__wrap uagb-buttons-layout-wrap">
<div class="wp-block-uagb-buttons-child uagb-buttons__outer-wrap uagb-block-3d516b68 wp-block-button"><div class="uagb-button__wrapper"><a class="uagb-buttons-repeater wp-block-button__link" href="#" onclick="return false;" rel="follow noopener" target="_self"><div class="uagb-button__link">Get Started</div></a></div></div>
</div></div>
</div></div>
";}s:8:"id-82955";a:10:{s:5:"title";s:11:"Services 19";s:3:"url";s:52:"https://websitedemos.net/astra-blocks/services-12-2/";s:3:"tag";a:0:{}s:8:"category";i:952;s:16:"primary-category";s:0:"";s:4:"type";s:5:"block";s:12:"page-builder";s:9:"gutenberg";s:16:"required-plugins";a:0:{}s:10:"stylesheet";s:55849:".wp-block-uagb-container.uagb-is-root-container .uagb-block-d673aca5{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-d673aca5 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-d673aca5 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-d673aca5 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-d673aca5 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-d673aca5 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-d673aca5 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 72px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-d673aca5{box-shadow: 0px 0px   #00000070 ;padding-top: 112px;padding-bottom: 112px;padding-left: 40px;padding-right: 40px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 72px;column-gap: 0px;overflow: visible;border-color: inherit;background-color: var(--ast-global-color-4);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-a90b2c2e{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-a90b2c2e .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-a90b2c2e .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-a90b2c2e .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-a90b2c2e .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-a90b2c2e .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-a90b2c2e > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 72px;}.wp-block-uagb-container.uagb-block-a90b2c2e{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 72px;overflow: visible;border-color: inherit;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-c7857b8c{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-block-c7857b8c .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-c7857b8c .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-c7857b8c .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-c7857b8c .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-c7857b8c .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-c7857b8c > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: flex-start;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-c7857b8c{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: row;align-items: flex-start;justify-content: center;flex-wrap: nowrap;}.uagb-block-955803d2.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-955803d2 .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-955803d2.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-955803d2.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;text-align: center;}.uagb-block-955803d2.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-955803d2.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-955803d2.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-955803d2.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-955803d2.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-955803d2.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-955803d2.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-955803d2.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-955803d2.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 400px;}.uagb-block-955803d2.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-955803d2.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-955803d2.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-955803d2.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-d4a03254{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-block-d4a03254 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-d4a03254 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-d4a03254 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-d4a03254 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-d4a03254 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-d4a03254 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-d4a03254{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 40px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: row;align-items: center;justify-content: center;flex-wrap: nowrap;}.uagb-block-7edef7ac .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-7edef7ac .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-7edef7ac .uagb-ifb-icon svg{fill: #333;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-7edef7ac .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-7edef7ac .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-7edef7ac .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-7edef7ac .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-7edef7ac.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-7edef7ac.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-7edef7ac .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-7edef7ac .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-7edef7ac .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-7edef7ac .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-7edef7ac .uagb-infobox__content-wrap{text-align: left;}.uagb-block-7edef7ac.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-7edef7ac.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-93361178{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-93361178 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-93361178 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-93361178 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-93361178 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-93361178 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-93361178 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 72px;}.wp-block-uagb-container.uagb-block-93361178{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 72px;overflow: visible;border-color: inherit;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-39eb0265{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-block-39eb0265 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-39eb0265 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-39eb0265 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-39eb0265 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-39eb0265 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-39eb0265 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-39eb0265{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 40px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: row;align-items: center;justify-content: center;flex-wrap: nowrap;}.uagb-block-d4eb7bd1 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-d4eb7bd1 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-d4eb7bd1 .uagb-ifb-icon svg{fill: #333;}.uagb-block-d4eb7bd1.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-d4eb7bd1 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-d4eb7bd1 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-d4eb7bd1.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-d4eb7bd1.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-d4eb7bd1 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-d4eb7bd1 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-d4eb7bd1 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-d4eb7bd1 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-d4eb7bd1.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-d4eb7bd1.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-d4eb7bd1.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-d4eb7bd1.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-d4eb7bd1 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-d4eb7bd1.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-d4eb7bd1.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-d4eb7bd1 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-d4eb7bd1 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-d4eb7bd1 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-d4eb7bd1 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-d4eb7bd1.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-d4eb7bd1.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-d4eb7bd1 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-d4eb7bd1.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-d4eb7bd1.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-d4eb7bd1 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-d4eb7bd1.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-d4eb7bd1 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-d4eb7bd1 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-d4eb7bd1.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-93bb1e06{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-block-93bb1e06 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-93bb1e06 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-93bb1e06 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-93bb1e06 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-93bb1e06 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-93bb1e06 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: flex-start;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-93bb1e06{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: row;align-items: flex-start;justify-content: center;flex-wrap: nowrap;}.uagb-block-e9abc450.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-e9abc450 .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-e9abc450.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-e9abc450.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;text-align: center;}.uagb-block-e9abc450.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-e9abc450.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-e9abc450.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-e9abc450.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-e9abc450.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-e9abc450.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-e9abc450.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-e9abc450.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-e9abc450.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 400px;}.uagb-block-e9abc450.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-e9abc450.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-e9abc450.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-e9abc450.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-3cfe296c{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-3cfe296c .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-3cfe296c .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-3cfe296c .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-3cfe296c .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-3cfe296c .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-3cfe296c > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 72px;}.wp-block-uagb-container.uagb-block-3cfe296c{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 72px;overflow: visible;border-color: inherit;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-7d14a26a{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-block-7d14a26a .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-7d14a26a .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-7d14a26a .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-7d14a26a .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-7d14a26a .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-7d14a26a > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: flex-start;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-7d14a26a{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: row;align-items: flex-start;justify-content: center;flex-wrap: nowrap;}.uagb-block-a57a4cda.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-a57a4cda .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-a57a4cda.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-a57a4cda.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;text-align: center;}.uagb-block-a57a4cda.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-a57a4cda.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-a57a4cda.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-a57a4cda.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-a57a4cda.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-a57a4cda.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-a57a4cda.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-a57a4cda.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-a57a4cda.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 400px;}.uagb-block-a57a4cda.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-a57a4cda.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-a57a4cda.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-a57a4cda.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-f12d3066{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-block-f12d3066 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-f12d3066 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-f12d3066 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-f12d3066 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-f12d3066 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-f12d3066 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-f12d3066{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 40px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: row;align-items: center;justify-content: center;flex-wrap: nowrap;}.uagb-block-7299beba .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-7299beba .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-7299beba .uagb-ifb-icon svg{fill: #333;}.uagb-block-7299beba.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-7299beba .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-7299beba .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-7299beba.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-7299beba.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-7299beba .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-7299beba .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-7299beba .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-7299beba .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-7299beba.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-7299beba.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-7299beba.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-7299beba.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-7299beba .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-7299beba.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-7299beba.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-7299beba .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-7299beba .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-7299beba .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-7299beba .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-7299beba.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-7299beba.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-7299beba .uagb-infobox__content-wrap{text-align: left;}.uagb-block-7299beba.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-7299beba.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-7299beba .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-7299beba.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-7299beba .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-7299beba .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-7299beba.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}@media only screen and (max-width: 976px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-d673aca5{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-d673aca5 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 40px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-d673aca5{padding-top: 80px;padding-bottom: 80px;padding-left: 32px;padding-right: 32px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 40px;column-gap: 0px;background-color: var(--ast-global-color-4);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-a90b2c2e{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-a90b2c2e > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;row-gap: 0px;column-gap: 40px;}.wp-block-uagb-container.uagb-block-a90b2c2e{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 40px;align-items: stretch;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-c7857b8c{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-c7857b8c > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-c7857b8c{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;}.uagb-block-955803d2.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 300px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-d4a03254{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-d4a03254 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-d4a03254{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;}.uagb-block-7edef7ac.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-7edef7ac .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-7edef7ac .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-7edef7ac .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-93361178{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-93361178 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;row-gap: 0px;column-gap: 40px;}.wp-block-uagb-container.uagb-block-93361178{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 40px;align-items: stretch;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-39eb0265{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-39eb0265 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-39eb0265{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;}.uagb-block-d4eb7bd1.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-d4eb7bd1.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-d4eb7bd1.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-d4eb7bd1.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-d4eb7bd1 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-d4eb7bd1 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-d4eb7bd1 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-d4eb7bd1 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-d4eb7bd1 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-d4eb7bd1 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-d4eb7bd1.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-d4eb7bd1 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-d4eb7bd1 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-d4eb7bd1.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-93bb1e06{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-93bb1e06 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-93bb1e06{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;}.uagb-block-e9abc450.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 300px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-3cfe296c{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-3cfe296c > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;row-gap: 0px;column-gap: 40px;}.wp-block-uagb-container.uagb-block-3cfe296c{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 40px;align-items: stretch;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-7d14a26a{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-7d14a26a > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-7d14a26a{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;}.uagb-block-a57a4cda.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 300px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-f12d3066{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-f12d3066 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-f12d3066{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;}.uagb-block-7299beba.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-7299beba.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7299beba.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-7299beba.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-7299beba .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-7299beba .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-7299beba .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-7299beba .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7299beba .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7299beba .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-7299beba.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-7299beba .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-7299beba .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-7299beba.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}}@media only screen and (max-width: 767px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-d673aca5{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-d673aca5 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 40px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-d673aca5{padding-top: 64px;padding-bottom: 64px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 40px;column-gap: 0px;background-color: var(--ast-global-color-4);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-a90b2c2e{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-a90b2c2e > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;flex-wrap: wrap;row-gap: 30px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-a90b2c2e{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 30px;column-gap: 0px;align-items: stretch;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-c7857b8c{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-c7857b8c > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-c7857b8c{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;flex-wrap: wrap;}.uagb-block-955803d2.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 250px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-d4a03254{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-d4a03254 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-d4a03254{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;flex-wrap: wrap;}.uagb-block-7edef7ac.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-7edef7ac .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-7edef7ac .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-7edef7ac .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-93361178{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-93361178 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;flex-wrap: wrap-reverse;row-gap: 30px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-93361178{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 30px;column-gap: 0px;align-items: stretch;flex-wrap: wrap-reverse;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-39eb0265{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-39eb0265 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-39eb0265{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;flex-wrap: wrap;}.uagb-block-d4eb7bd1.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-d4eb7bd1.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-d4eb7bd1.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-d4eb7bd1 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-d4eb7bd1 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-d4eb7bd1.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-d4eb7bd1 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-d4eb7bd1 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-d4eb7bd1 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-d4eb7bd1 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-d4eb7bd1.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-d4eb7bd1 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-d4eb7bd1 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-d4eb7bd1.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-93bb1e06{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-93bb1e06 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-93bb1e06{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;flex-wrap: wrap;}.uagb-block-e9abc450.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 250px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-3cfe296c{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-3cfe296c > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;flex-wrap: wrap;row-gap: 30px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-3cfe296c{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 30px;column-gap: 0px;align-items: stretch;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-7d14a26a{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-7d14a26a > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-7d14a26a{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;flex-wrap: wrap;}.uagb-block-a57a4cda.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 250px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-f12d3066{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-f12d3066 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-f12d3066{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;flex-wrap: wrap;}.uagb-block-7299beba.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-7299beba.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7299beba.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-7299beba .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7299beba .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7299beba.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-7299beba .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-7299beba .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-7299beba .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-7299beba .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-7299beba.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-7299beba .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-7299beba .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-7299beba.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}}";s:7:"content";s:4048:"
<div class="wp-block-uagb-container uagb-block-d673aca5 alignfull uagb-is-root-container"><div class="uagb-container-inner-blocks-wrap">
<div class="wp-block-uagb-container uagb-block-a90b2c2e">
<div class="wp-block-uagb-container uagb-block-c7857b8c">
<div class="wp-block-uagb-image alignleft uagb-block-955803d2 wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-left"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/10/natures-02.jpg ,https://websitedemos.net/wp-content/uploads/2023/10/natures-02.jpg 780w" sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/10/natures-02.jpg" alt="" class="uag-image-80574" width="600" height="400" title="" loading="lazy"/></figure></div>
</div>



<div class="wp-block-uagb-container uagb-block-d4a03254">
<div class="wp-block-uagb-info-box uagb-block-7edef7ac uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h3 class="uagb-ifb-title">Service 1</h3></div><p class="uagb-ifb-desc">Share some details here for Service one. This is a flexible section where you can share anything you want. It could be details or some information about your service.</p></div></div>
</div>
</div>



<div class="wp-block-uagb-container uagb-block-93361178">
<div class="wp-block-uagb-container uagb-block-39eb0265">
<div class="wp-block-uagb-info-box uagb-block-d4eb7bd1 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h3 class="uagb-ifb-title">Service 2</h3></div><p class="uagb-ifb-desc">Share some details here for Service two. This is a flexible section where you can share anything you want. It could be details or some information about your services.</p></div></div>
</div>



<div class="wp-block-uagb-container uagb-block-93bb1e06">
<div class="wp-block-uagb-image alignleft uagb-block-e9abc450 wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-left"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/10/rivers-01-1024x683.jpg ,https://websitedemos.net/wp-content/uploads/2023/10/rivers-01.jpg 780w, https://websitedemos.net/wp-content/uploads/2023/10/rivers-01.jpg 360w" sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/10/rivers-01-1024x683.jpg" alt="" class="uag-image-80575" width="600" height="400" title="" loading="lazy"/></figure></div>
</div>
</div>



<div class="wp-block-uagb-container uagb-block-3cfe296c">
<div class="wp-block-uagb-container uagb-block-7d14a26a">
<div class="wp-block-uagb-image alignleft uagb-block-a57a4cda wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-left"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/10/snow-mountains-01-1024x683.jpg ,https://websitedemos.net/wp-content/uploads/2023/10/snow-mountains-01.jpg 780w, https://websitedemos.net/wp-content/uploads/2023/10/snow-mountains-01.jpg 360w" sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/10/snow-mountains-01-1024x683.jpg" alt="" class="uag-image-80577" width="600" height="400" title="" loading="lazy"/></figure></div>
</div>



<div class="wp-block-uagb-container uagb-block-f12d3066">
<div class="wp-block-uagb-info-box uagb-block-7299beba uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h3 class="uagb-ifb-title">Service 3</h3></div><p class="uagb-ifb-desc">Share some details here for Service three. This is a flexible section where you can share anything you want. It could be details or some information about your services.</p></div></div>
</div>
</div>
</div></div>
";}s:8:"id-82932";a:10:{s:5:"title";s:11:"Services 18";s:3:"url";s:50:"https://websitedemos.net/astra-blocks/services-18/";s:3:"tag";a:0:{}s:8:"category";i:952;s:16:"primary-category";s:0:"";s:4:"type";s:5:"block";s:12:"page-builder";s:9:"gutenberg";s:16:"required-plugins";a:0:{}s:10:"stylesheet";s:69567:".wp-block-uagb-container.uagb-is-root-container .uagb-block-323c7320{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-323c7320 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-323c7320 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-323c7320 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-323c7320 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-323c7320 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-323c7320 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 72px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-323c7320{box-shadow: 0px 0px   #00000070 ;padding-top: 112px;padding-bottom: 112px;padding-left: 40px;padding-right: 40px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 72px;column-gap: 0px;overflow: visible;border-color: inherit;background-color: var(--ast-global-color-4);;}.uagb-block-9fbe867d .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-9fbe867d .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-9fbe867d .uagb-ifb-icon svg{fill: #333;}.uagb-block-9fbe867d.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-9fbe867d .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-9fbe867d .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-9fbe867d.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-9fbe867d.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-9fbe867d .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-9fbe867d .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-9fbe867d .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-9fbe867d .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-9fbe867d.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-9fbe867d.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-9fbe867d.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-9fbe867d.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-9fbe867d .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-9fbe867d.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-9fbe867d.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0%;margin-top: 0%;margin-left: 15%;margin-right: 15%;}.uagb-block-9fbe867d .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-9fbe867d .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-9fbe867d .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-9fbe867d .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-9fbe867d.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-9fbe867d.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-9fbe867d .uagb-infobox__content-wrap{text-align: center;}.uagb-block-9fbe867d.uagb-infobox-icon-above-title{text-align: center;}.uagb-block-9fbe867d.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-9fbe867d .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-9fbe867d.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-9fbe867d .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-9fbe867d .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-9fbe867d.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-682319ac{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-682319ac .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-682319ac .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-682319ac .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-682319ac .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-682319ac .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-682319ac > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 48px;}.wp-block-uagb-container.uagb-block-682319ac{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 48px;overflow: visible;border-color: inherit;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-71e8fff3{max-width: 33%;width: 100%;}.wp-block-uagb-container.uagb-block-71e8fff3 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-71e8fff3 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-71e8fff3 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-71e8fff3 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-71e8fff3 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-71e8fff3 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: stretch;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-71e8fff3{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-color: inherit;background-color: ;;flex-direction: column;align-items: stretch;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-75ccde33.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-75ccde33 .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-75ccde33.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-75ccde33.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;text-align: center;}.uagb-block-75ccde33.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-75ccde33.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-75ccde33.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-75ccde33.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-75ccde33.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-75ccde33.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-75ccde33.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-75ccde33.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-75ccde33.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 368px;height: 450px;}.uagb-block-75ccde33.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-75ccde33.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-75ccde33.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-75ccde33.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-9ee67bb3{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-9ee67bb3 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-9ee67bb3 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-9ee67bb3 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-9ee67bb3 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-9ee67bb3 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-9ee67bb3 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 28px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-9ee67bb3{box-shadow: 0px 0px   #00000070 ;padding-top: 20px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 28px;column-gap: 0px;overflow: visible;border-top-left-radius: 0px;border-top-right-radius: 0px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-2ab09e50 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-2ab09e50 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-2ab09e50 .uagb-ifb-icon svg{fill: #333;}.uagb-block-2ab09e50.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-2ab09e50 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-2ab09e50 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-2ab09e50.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-2ab09e50.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-2ab09e50 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-2ab09e50 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-2ab09e50 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-2ab09e50 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-2ab09e50.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-2ab09e50.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-2ab09e50.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-2ab09e50.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-2ab09e50 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-2ab09e50.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-2ab09e50.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-2ab09e50 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-2ab09e50 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-2ab09e50 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-2ab09e50 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-2ab09e50.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-2ab09e50.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-2ab09e50 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-2ab09e50.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-2ab09e50.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-2ab09e50 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-2ab09e50.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-2ab09e50 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-2ab09e50 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-2ab09e50.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-64373be9.wp-block-uagb-buttons.uagb-buttons__outer-wrap .uagb-buttons__wrap {column-gap: 0px;}.uagb-block-64373be9.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-15570a3f .wp-block-button__link{background: transparent;}.wp-block-uagb-buttons .uagb-block-15570a3f .wp-block-button__link:hover{background: transparent;}.wp-block-uagb-buttons .uagb-block-15570a3f .wp-block-button__link:focus{background: transparent;}.wp-block-uagb-buttons .uagb-block-15570a3f .uagb-button__wrapper .uagb-buttons-repeater{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;color: var(--ast-global-color-2);margin-top: 0px;margin-bottom: 0px;margin-left: 0px;margin-right: 0px;}.wp-block-uagb-buttons .uagb-block-15570a3f .wp-block-button__link.has-text-color:hover .uagb-button__link{color: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-15570a3f .wp-block-button__link.has-text-color:focus .uagb-button__link{color: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-15570a3f .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link{margin-top: 0px;margin-bottom: 0px;margin-left: 0px;margin-right: 0px;box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-15570a3f .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link:hover{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-15570a3f .uagb-buttons-repeater .uagb-button__link{color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-15570a3f .uagb-buttons-repeater:hover .uagb-button__link{color: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-15570a3f .uagb-buttons-repeater:focus .uagb-button__link{color: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-15570a3f .uagb-buttons-repeater .uagb-button__icon > svg{width: 15px;height: 15px;fill: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-15570a3f .uagb-buttons-repeater:hover .uagb-button__icon > svg{fill: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-15570a3f .uagb-buttons-repeater:focus .uagb-button__icon > svg{fill: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-15570a3f .uagb-buttons-repeater .uagb-button__icon-position-after{margin-left: 8px;}.wp-block-uagb-buttons .uagb-block-15570a3f .uagb-buttons-repeater .uagb-button__icon-position-before{margin-right: 8px;}.wp-block-uagb-buttons .uagb-block-15570a3f .uagb-button__link{text-transform: normal;text-decoration: none;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-a767bc2d{max-width: 33%;width: 100%;}.wp-block-uagb-container.uagb-block-a767bc2d .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-a767bc2d .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-a767bc2d .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-a767bc2d .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-a767bc2d .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-a767bc2d > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: stretch;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-a767bc2d{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-color: inherit;background-color: ;;flex-direction: column;align-items: stretch;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-b2504f0e.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-b2504f0e .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-b2504f0e.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-b2504f0e.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;text-align: center;}.uagb-block-b2504f0e.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-b2504f0e.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-b2504f0e.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-b2504f0e.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-b2504f0e.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-b2504f0e.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-b2504f0e.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-b2504f0e.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-b2504f0e.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 368px;height: 450px;}.uagb-block-b2504f0e.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-b2504f0e.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-b2504f0e.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-b2504f0e.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-9aef83d0{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-9aef83d0 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-9aef83d0 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-9aef83d0 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-9aef83d0 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-9aef83d0 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-9aef83d0 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 28px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-9aef83d0{box-shadow: 0px 0px   #00000070 ;padding-top: 20px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 28px;column-gap: 0px;overflow: visible;border-top-left-radius: 0px;border-top-right-radius: 0px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-7e10dc31 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-7e10dc31 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-7e10dc31 .uagb-ifb-icon svg{fill: #333;}.uagb-block-7e10dc31.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-7e10dc31 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-7e10dc31 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-7e10dc31.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-7e10dc31.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-7e10dc31 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-7e10dc31 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-7e10dc31 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-7e10dc31 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-7e10dc31.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-7e10dc31.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-7e10dc31.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-7e10dc31.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-7e10dc31 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-7e10dc31.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-7e10dc31.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-7e10dc31 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-7e10dc31 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-7e10dc31 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-7e10dc31 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-7e10dc31.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-7e10dc31.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-7e10dc31 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-7e10dc31.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-7e10dc31.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-7e10dc31 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-7e10dc31.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-7e10dc31 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-7e10dc31 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-7e10dc31.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-66047323.wp-block-uagb-buttons.uagb-buttons__outer-wrap .uagb-buttons__wrap {column-gap: 0px;}.uagb-block-66047323.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-5658abd4 .wp-block-button__link{background: transparent;}.wp-block-uagb-buttons .uagb-block-5658abd4 .wp-block-button__link:hover{background: transparent;}.wp-block-uagb-buttons .uagb-block-5658abd4 .wp-block-button__link:focus{background: transparent;}.wp-block-uagb-buttons .uagb-block-5658abd4 .uagb-button__wrapper .uagb-buttons-repeater{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;color: var(--ast-global-color-2);margin-top: 0px;margin-bottom: 0px;margin-left: 0px;margin-right: 0px;}.wp-block-uagb-buttons .uagb-block-5658abd4 .wp-block-button__link.has-text-color:hover .uagb-button__link{color: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-5658abd4 .wp-block-button__link.has-text-color:focus .uagb-button__link{color: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-5658abd4 .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link{margin-top: 0px;margin-bottom: 0px;margin-left: 0px;margin-right: 0px;box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-5658abd4 .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link:hover{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-5658abd4 .uagb-buttons-repeater .uagb-button__link{color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-5658abd4 .uagb-buttons-repeater:hover .uagb-button__link{color: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-5658abd4 .uagb-buttons-repeater:focus .uagb-button__link{color: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-5658abd4 .uagb-buttons-repeater .uagb-button__icon > svg{width: 15px;height: 15px;fill: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-5658abd4 .uagb-buttons-repeater:hover .uagb-button__icon > svg{fill: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-5658abd4 .uagb-buttons-repeater:focus .uagb-button__icon > svg{fill: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-5658abd4 .uagb-buttons-repeater .uagb-button__icon-position-after{margin-left: 8px;}.wp-block-uagb-buttons .uagb-block-5658abd4 .uagb-buttons-repeater .uagb-button__icon-position-before{margin-right: 8px;}.wp-block-uagb-buttons .uagb-block-5658abd4 .uagb-button__link{text-transform: normal;text-decoration: none;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-1add9e25{max-width: 33%;width: 100%;}.wp-block-uagb-container.uagb-block-1add9e25 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-1add9e25 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-1add9e25 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-1add9e25 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-1add9e25 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-1add9e25 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: stretch;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-1add9e25{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-color: inherit;background-color: ;;flex-direction: column;align-items: stretch;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-cf6d3a59.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-cf6d3a59 .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-cf6d3a59.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-cf6d3a59.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;text-align: center;}.uagb-block-cf6d3a59.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-cf6d3a59.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-cf6d3a59.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-cf6d3a59.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-cf6d3a59.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-cf6d3a59.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-cf6d3a59.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-cf6d3a59.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-cf6d3a59.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 368px;height: 450px;}.uagb-block-cf6d3a59.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-cf6d3a59.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-cf6d3a59.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-cf6d3a59.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-8e1bc111{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-8e1bc111 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-8e1bc111 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-8e1bc111 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-8e1bc111 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-8e1bc111 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-8e1bc111 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 28px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-8e1bc111{box-shadow: 0px 0px   #00000070 ;padding-top: 20px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 28px;column-gap: 0px;overflow: visible;border-top-left-radius: 0px;border-top-right-radius: 0px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-3ce36a5e .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-3ce36a5e .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-3ce36a5e .uagb-ifb-icon svg{fill: #333;}.uagb-block-3ce36a5e.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-3ce36a5e .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-3ce36a5e .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-3ce36a5e.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-3ce36a5e.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-3ce36a5e .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-3ce36a5e .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-3ce36a5e .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-3ce36a5e .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-3ce36a5e.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-3ce36a5e.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-3ce36a5e.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-3ce36a5e.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-3ce36a5e .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-3ce36a5e.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-3ce36a5e.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-3ce36a5e .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-3ce36a5e .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-3ce36a5e .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-3ce36a5e .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-3ce36a5e.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-3ce36a5e.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-3ce36a5e .uagb-infobox__content-wrap{text-align: left;}.uagb-block-3ce36a5e.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-3ce36a5e.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-3ce36a5e .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-3ce36a5e.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-3ce36a5e .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-3ce36a5e .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-3ce36a5e.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-7e724e0b.wp-block-uagb-buttons.uagb-buttons__outer-wrap .uagb-buttons__wrap {column-gap: 0px;}.uagb-block-7e724e0b.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-a3d0307e .wp-block-button__link{background: transparent;}.wp-block-uagb-buttons .uagb-block-a3d0307e .wp-block-button__link:hover{background: transparent;}.wp-block-uagb-buttons .uagb-block-a3d0307e .wp-block-button__link:focus{background: transparent;}.wp-block-uagb-buttons .uagb-block-a3d0307e .uagb-button__wrapper .uagb-buttons-repeater{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;color: var(--ast-global-color-2);margin-top: 0px;margin-bottom: 0px;margin-left: 0px;margin-right: 0px;}.wp-block-uagb-buttons .uagb-block-a3d0307e .wp-block-button__link.has-text-color:hover .uagb-button__link{color: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-a3d0307e .wp-block-button__link.has-text-color:focus .uagb-button__link{color: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-a3d0307e .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link{margin-top: 0px;margin-bottom: 0px;margin-left: 0px;margin-right: 0px;box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-a3d0307e .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link:hover{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-a3d0307e .uagb-buttons-repeater .uagb-button__link{color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-a3d0307e .uagb-buttons-repeater:hover .uagb-button__link{color: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-a3d0307e .uagb-buttons-repeater:focus .uagb-button__link{color: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-a3d0307e .uagb-buttons-repeater .uagb-button__icon > svg{width: 15px;height: 15px;fill: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-a3d0307e .uagb-buttons-repeater:hover .uagb-button__icon > svg{fill: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-a3d0307e .uagb-buttons-repeater:focus .uagb-button__icon > svg{fill: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-a3d0307e .uagb-buttons-repeater .uagb-button__icon-position-after{margin-left: 8px;}.wp-block-uagb-buttons .uagb-block-a3d0307e .uagb-buttons-repeater .uagb-button__icon-position-before{margin-right: 8px;}.wp-block-uagb-buttons .uagb-block-a3d0307e .uagb-button__link{text-transform: normal;text-decoration: none;}@media only screen and (max-width: 976px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-323c7320{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-323c7320 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 50px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-323c7320{padding-top: 80px;padding-bottom: 80px;padding-left: 32px;padding-right: 32px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 50px;column-gap: 0px;background-color: var(--ast-global-color-4);;}.uagb-block-9fbe867d.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-9fbe867d.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0%;margin-top: 0%;margin-left: 8%;margin-right: 8%;}.uagb-block-9fbe867d.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-9fbe867d.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-9fbe867d.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-9fbe867d .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-9fbe867d .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-9fbe867d .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-9fbe867d .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-9fbe867d .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-9fbe867d.uagb-infobox__content-wrap{padding-top: 0%;padding-right: 0%;padding-bottom: 0%;padding-left: 0%;}.uagb-block-9fbe867d .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-9fbe867d.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-9fbe867d .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-9fbe867d .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-9fbe867d.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-682319ac{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-682319ac > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;row-gap: 0px;column-gap: 32px;}.wp-block-uagb-container.uagb-block-682319ac{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 32px;align-items: stretch;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-71e8fff3{max-width: 47%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-71e8fff3 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-71e8fff3{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;background-color: ;;align-items: stretch;}.uagb-block-75ccde33.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 214px;height: 300px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-9ee67bb3{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-9ee67bb3 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-9ee67bb3{padding-top: 20px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;}.uagb-block-2ab09e50.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-2ab09e50.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-2ab09e50.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-2ab09e50.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-2ab09e50.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-2ab09e50 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-2ab09e50 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-2ab09e50 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-2ab09e50 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-2ab09e50 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-2ab09e50.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-2ab09e50 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-2ab09e50.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-2ab09e50 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-2ab09e50 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-2ab09e50.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-64373be9.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-15570a3f .uagb-buttons-repeater .uagb-button__icon > svg{fill: var(--ast-global-color-2);}.wp-block-uagb-container.uagb-is-root-container .uagb-block-a767bc2d{max-width: 47%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-a767bc2d > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-a767bc2d{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;background-color: ;;align-items: stretch;}.uagb-block-b2504f0e.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 214px;height: 300px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-9aef83d0{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-9aef83d0 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-9aef83d0{padding-top: 20px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;}.uagb-block-7e10dc31.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-7e10dc31.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-7e10dc31.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7e10dc31.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-7e10dc31.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-7e10dc31 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-7e10dc31 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-7e10dc31 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-7e10dc31 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7e10dc31 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7e10dc31.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-7e10dc31 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-7e10dc31.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-7e10dc31 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-7e10dc31 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-7e10dc31.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-66047323.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-5658abd4 .uagb-buttons-repeater .uagb-button__icon > svg{fill: var(--ast-global-color-2);}.wp-block-uagb-container.uagb-is-root-container .uagb-block-1add9e25{max-width: 47%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-1add9e25 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-1add9e25{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;background-color: ;;align-items: stretch;}.uagb-block-cf6d3a59.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 214px;height: 300px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-8e1bc111{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-8e1bc111 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-8e1bc111{padding-top: 20px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;}.uagb-block-3ce36a5e.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-3ce36a5e.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-3ce36a5e.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-3ce36a5e.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-3ce36a5e.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-3ce36a5e .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-3ce36a5e .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-3ce36a5e .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-3ce36a5e .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-3ce36a5e .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-3ce36a5e.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-3ce36a5e .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-3ce36a5e.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-3ce36a5e .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-3ce36a5e .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-3ce36a5e.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-7e724e0b.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-a3d0307e .uagb-buttons-repeater .uagb-button__icon > svg{fill: var(--ast-global-color-2);}}@media only screen and (max-width: 767px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-323c7320{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-323c7320 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 40px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-323c7320{padding-top: 64px;padding-bottom: 64px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 40px;column-gap: 0px;background-color: var(--ast-global-color-4);;}.uagb-block-9fbe867d.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-9fbe867d.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-9fbe867d.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-9fbe867d.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-9fbe867d .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-9fbe867d .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-9fbe867d.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-9fbe867d .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-9fbe867d .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-9fbe867d .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-9fbe867d.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-9fbe867d .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-9fbe867d.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-9fbe867d .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-9fbe867d .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-9fbe867d.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-682319ac{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-682319ac > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;flex-wrap: wrap;row-gap: 30px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-682319ac{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 30px;column-gap: 0px;align-items: stretch;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-71e8fff3{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-71e8fff3 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-71e8fff3{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;background-color: ;;align-items: stretch;flex-wrap: wrap;}.uagb-block-75ccde33.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 300px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-9ee67bb3{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-9ee67bb3 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-9ee67bb3{padding-top: 20px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;flex-wrap: wrap;}.uagb-block-2ab09e50.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-2ab09e50.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-2ab09e50.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-2ab09e50.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-2ab09e50 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-2ab09e50 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-2ab09e50.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-2ab09e50 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-2ab09e50 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-2ab09e50 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-2ab09e50.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-2ab09e50 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-2ab09e50.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-2ab09e50 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-2ab09e50 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-2ab09e50.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-64373be9.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-15570a3f .uagb-buttons-repeater .uagb-button__icon > svg{fill: var(--ast-global-color-2);}.wp-block-uagb-container.uagb-is-root-container .uagb-block-a767bc2d{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-a767bc2d > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-a767bc2d{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;background-color: ;;align-items: stretch;flex-wrap: wrap;}.uagb-block-b2504f0e.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 300px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-9aef83d0{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-9aef83d0 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-9aef83d0{padding-top: 20px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;flex-wrap: wrap;}.uagb-block-7e10dc31.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-7e10dc31.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-7e10dc31.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7e10dc31.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-7e10dc31 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7e10dc31 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7e10dc31.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-7e10dc31 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-7e10dc31 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-7e10dc31 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-7e10dc31.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-7e10dc31 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-7e10dc31.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-7e10dc31 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-7e10dc31 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-7e10dc31.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-66047323.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-5658abd4 .uagb-buttons-repeater .uagb-button__icon > svg{fill: var(--ast-global-color-2);}.wp-block-uagb-container.uagb-is-root-container .uagb-block-1add9e25{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-1add9e25 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-1add9e25{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;background-color: ;;align-items: stretch;flex-wrap: wrap;}.uagb-block-cf6d3a59.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 300px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-8e1bc111{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-8e1bc111 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-8e1bc111{padding-top: 20px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;flex-wrap: wrap;}.uagb-block-3ce36a5e.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-3ce36a5e.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-3ce36a5e.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-3ce36a5e.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-3ce36a5e .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-3ce36a5e .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-3ce36a5e.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-3ce36a5e .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-3ce36a5e .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-3ce36a5e .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-3ce36a5e.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-3ce36a5e .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-3ce36a5e.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-3ce36a5e .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-3ce36a5e .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-3ce36a5e.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-7e724e0b.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-a3d0307e .uagb-buttons-repeater .uagb-button__icon > svg{fill: var(--ast-global-color-2);}}";s:7:"content";s:7116:"
<div class="wp-block-uagb-container uagb-block-323c7320 alignfull uagb-is-root-container"><div class="uagb-container-inner-blocks-wrap">
<div class="wp-block-uagb-info-box uagb-block-9fbe867d uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h2 class="uagb-ifb-title">Innovative Solutions for Growth</h2></div><p class="uagb-ifb-desc">Explore our comprehensive selection of services that cater to a variety of needs, ensuring complete customer satisfaction.</p></div></div>



<div class="wp-block-uagb-container uagb-block-682319ac">
<div class="wp-block-uagb-container uagb-block-71e8fff3">
<div class="wp-block-uagb-image alignleft uagb-block-75ccde33 wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-left"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/10/natures-01-1024x683.jpg ,https://websitedemos.net/wp-content/uploads/2023/10/natures-02.jpg 780w, https://websitedemos.net/wp-content/uploads/2023/10/natures-02.jpg 360w" sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/10/natures-01-1024x683.jpg" alt="" class="uag-image-80573" width="368" height="450" title="" loading="lazy"/></figure></div>



<div class="wp-block-uagb-container uagb-block-9ee67bb3">
<div class="wp-block-uagb-info-box uagb-block-2ab09e50 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h4 class="uagb-ifb-title">Service 1</h4></div><p class="uagb-ifb-desc">This is a flexible section where you can share anything you want. It could be details or some information about your service one.</p></div></div>



<div class="wp-block-uagb-buttons uagb-buttons__outer-wrap uagb-btn__default-btn uagb-btn-tablet__default-btn uagb-btn-mobile__default-btn uagb-block-64373be9"><div class="uagb-buttons__wrap uagb-buttons-layout-wrap">
<div class="wp-block-uagb-buttons-child uagb-buttons__outer-wrap uagb-block-15570a3f wp-block-button"><div class="uagb-button__wrapper"><a class="uagb-buttons-repeater wp-block-button__link" href="#" onclick="return false;" rel="follow noopener" target="_self"><div class="uagb-button__link">Learn More</div><span class="uagb-button__icon uagb-button__icon-position-after"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 320 512"><path d="M96 480c-8.188 0-16.38-3.125-22.62-9.375c-12.5-12.5-12.5-32.75 0-45.25L242.8 256L73.38 86.63c-12.5-12.5-12.5-32.75 0-45.25s32.75-12.5 45.25 0l192 192c12.5 12.5 12.5 32.75 0 45.25l-192 192C112.4 476.9 104.2 480 96 480z"></path></svg></span></a></div></div>
</div></div>
</div>
</div>



<div class="wp-block-uagb-container uagb-block-a767bc2d">
<div class="wp-block-uagb-image alignleft uagb-block-b2504f0e wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-left"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/10/desserts-01-1024x683.jpg ,https://websitedemos.net/wp-content/uploads/2023/10/desserts-02.jpg 780w, https://websitedemos.net/wp-content/uploads/2023/10/desserts-02.jpg 360w" sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/10/desserts-01-1024x683.jpg" alt="" class="uag-image-80569" width="368" height="450" title="" loading="lazy"/></figure></div>



<div class="wp-block-uagb-container uagb-block-9aef83d0">
<div class="wp-block-uagb-info-box uagb-block-7e10dc31 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h4 class="uagb-ifb-title">Service 2</h4></div><p class="uagb-ifb-desc">This is a flexible section where you can share anything you want. It could be details or some information about your service two.</p></div></div>



<div class="wp-block-uagb-buttons uagb-buttons__outer-wrap uagb-btn__default-btn uagb-btn-tablet__default-btn uagb-btn-mobile__default-btn uagb-block-66047323"><div class="uagb-buttons__wrap uagb-buttons-layout-wrap">
<div class="wp-block-uagb-buttons-child uagb-buttons__outer-wrap uagb-block-5658abd4 wp-block-button"><div class="uagb-button__wrapper"><a class="uagb-buttons-repeater wp-block-button__link" href="#" onclick="return false;" rel="follow noopener" target="_self"><div class="uagb-button__link">Learn More</div><span class="uagb-button__icon uagb-button__icon-position-after"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 320 512"><path d="M96 480c-8.188 0-16.38-3.125-22.62-9.375c-12.5-12.5-12.5-32.75 0-45.25L242.8 256L73.38 86.63c-12.5-12.5-12.5-32.75 0-45.25s32.75-12.5 45.25 0l192 192c12.5 12.5 12.5 32.75 0 45.25l-192 192C112.4 476.9 104.2 480 96 480z"></path></svg></span></a></div></div>
</div></div>
</div>
</div>



<div class="wp-block-uagb-container uagb-block-1add9e25">
<div class="wp-block-uagb-image alignleft uagb-block-cf6d3a59 wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-left"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/10/rivers-01-1024x683.jpg ,https://websitedemos.net/wp-content/uploads/2023/10/rivers-01.jpg 780w, https://websitedemos.net/wp-content/uploads/2023/10/rivers-01.jpg 360w" sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/10/rivers-01-1024x683.jpg" alt="" class="uag-image-80575" width="368" height="450" title="" loading="lazy"/></figure></div>



<div class="wp-block-uagb-container uagb-block-8e1bc111">
<div class="wp-block-uagb-info-box uagb-block-3ce36a5e uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h4 class="uagb-ifb-title">Service 3</h4></div><p class="uagb-ifb-desc">This is a flexible section where you can share anything you want. It could be details or some information about your service 3.</p></div></div>



<div class="wp-block-uagb-buttons uagb-buttons__outer-wrap uagb-btn__default-btn uagb-btn-tablet__default-btn uagb-btn-mobile__default-btn uagb-block-7e724e0b"><div class="uagb-buttons__wrap uagb-buttons-layout-wrap">
<div class="wp-block-uagb-buttons-child uagb-buttons__outer-wrap uagb-block-a3d0307e wp-block-button"><div class="uagb-button__wrapper"><a class="uagb-buttons-repeater wp-block-button__link" href="#" onclick="return false;" rel="follow noopener" target="_self"><div class="uagb-button__link">Learn More</div><span class="uagb-button__icon uagb-button__icon-position-after"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 320 512"><path d="M96 480c-8.188 0-16.38-3.125-22.62-9.375c-12.5-12.5-12.5-32.75 0-45.25L242.8 256L73.38 86.63c-12.5-12.5-12.5-32.75 0-45.25s32.75-12.5 45.25 0l192 192c12.5 12.5 12.5 32.75 0 45.25l-192 192C112.4 476.9 104.2 480 96 480z"></path></svg></span></a></div></div>
</div></div>
</div>
</div>
</div>
</div></div>
";}s:8:"id-82907";a:10:{s:5:"title";s:11:"Services 17";s:3:"url";s:50:"https://websitedemos.net/astra-blocks/services-17/";s:3:"tag";a:0:{}s:8:"category";i:952;s:16:"primary-category";s:0:"";s:4:"type";s:5:"block";s:12:"page-builder";s:9:"gutenberg";s:16:"required-plugins";a:0:{}s:10:"stylesheet";s:87446:".wp-block-uagb-container.uagb-is-root-container .uagb-block-d673aca5{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-d673aca5 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-d673aca5 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-d673aca5 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-d673aca5 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-d673aca5 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-d673aca5 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 48px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-d673aca5{box-shadow: 0px 0px   #00000070 ;padding-top: 112px;padding-bottom: 112px;padding-left: 40px;padding-right: 40px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 48px;column-gap: 0px;overflow: visible;border-color: inherit;background-color: var(--ast-global-color-4);;}.uagb-block-f0818517 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-f0818517 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-f0818517 .uagb-ifb-icon svg{fill: #333;}.uagb-block-f0818517.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-f0818517 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-f0818517 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-f0818517.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-f0818517.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-f0818517 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-f0818517 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-f0818517 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-f0818517 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-f0818517.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-f0818517.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-f0818517.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-f0818517.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-f0818517 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-f0818517.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-f0818517.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0%;margin-top: 0%;margin-left: 15%;margin-right: 15%;}.uagb-block-f0818517 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-f0818517 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-f0818517 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-f0818517 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-f0818517.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-f0818517.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-f0818517 .uagb-infobox__content-wrap{text-align: center;}.uagb-block-f0818517.uagb-infobox-icon-above-title{text-align: center;}.uagb-block-f0818517.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-f0818517 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-f0818517.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-f0818517 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-f0818517 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-f0818517.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-589e2323{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-589e2323 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-589e2323 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-589e2323 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-589e2323 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-589e2323 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-589e2323 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 48px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-589e2323{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 48px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-7dfac154{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-7dfac154 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-7dfac154 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-7dfac154 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-7dfac154 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-7dfac154 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-7dfac154 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 48px;}.wp-block-uagb-container.uagb-block-7dfac154{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 48px;overflow: visible;border-color: inherit;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-a5ef8ac6{max-width: 48%;width: 100%;}.wp-block-uagb-container.uagb-block-a5ef8ac6 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-a5ef8ac6 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-a5ef8ac6 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-a5ef8ac6 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-a5ef8ac6 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-a5ef8ac6 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-a5ef8ac6{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;overflow: visible;border-top-left-radius: 0px;border-top-right-radius: 0px;border-bottom-left-radius: 0px;border-bottom-right-radius: 0px;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-b3700dc8.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-b3700dc8 .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-b3700dc8.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-b3700dc8.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;text-align: center;}.uagb-block-b3700dc8.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-b3700dc8.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-b3700dc8.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-b3700dc8.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-b3700dc8.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-b3700dc8.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-b3700dc8.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-b3700dc8.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-b3700dc8.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 364px;}.uagb-block-b3700dc8.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-b3700dc8.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-b3700dc8.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-b3700dc8.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-b4b7afb9 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-b4b7afb9 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-b4b7afb9 .uagb-ifb-icon svg{fill: #333;}.uagb-block-b4b7afb9.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-b4b7afb9 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-b4b7afb9 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-b4b7afb9.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-b4b7afb9.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-b4b7afb9 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-b4b7afb9 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-b4b7afb9 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-b4b7afb9 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-b4b7afb9.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-b4b7afb9.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-b4b7afb9.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-b4b7afb9.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-b4b7afb9 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-b4b7afb9.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-b4b7afb9.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 4px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-b4b7afb9 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-b4b7afb9 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-b4b7afb9 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-b4b7afb9 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-b4b7afb9.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-b4b7afb9.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-b4b7afb9 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-b4b7afb9.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-b4b7afb9 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-b4b7afb9.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-b4b7afb9 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-b4b7afb9 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-b4b7afb9.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-18b19803.wp-block-uagb-buttons.uagb-buttons__outer-wrap .uagb-buttons__wrap {column-gap: 10px;}.uagb-block-18b19803.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-2d62f56e .wp-block-button__link{background: transparent;}.wp-block-uagb-buttons .uagb-block-2d62f56e .wp-block-button__link:hover{background: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-2d62f56e .wp-block-button__link:focus{background: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-2d62f56e .uagb-button__wrapper .uagb-buttons-repeater{color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-2d62f56e .wp-block-button__link.has-text-color:hover .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-2d62f56e .wp-block-button__link.has-text-color:focus .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-2d62f56e .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-2d62f56e .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link:hover{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-2d62f56e .uagb-buttons-repeater.wp-block-button__link{border-top-width: 1px;border-left-width: 1px;border-right-width: 1px;border-bottom-width: 1px;border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-color: var(--ast-global-color-2);border-style: solid;}.wp-block-uagb-buttons .uagb-block-2d62f56e .uagb-buttons-repeater.wp-block-button__link:hover{border-color: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-2d62f56e .uagb-buttons-repeater.wp-block-button__link:focus{border-color: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-2d62f56e.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-top-width: 1px;border-left-width: 1px;border-right-width: 1px;border-bottom-width: 1px;border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-color: var(--ast-global-color-2);border-style: solid;}.wp-block-uagb-buttons .uagb-block-2d62f56e.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater:hover{border-color: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-2d62f56e .uagb-buttons-repeater .uagb-button__link{color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-2d62f56e .uagb-buttons-repeater:hover .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-2d62f56e .uagb-buttons-repeater:focus .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-2d62f56e .uagb-buttons-repeater .uagb-button__icon > svg{width: 15px;height: 15px;fill: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-2d62f56e .uagb-buttons-repeater:hover .uagb-button__icon > svg{fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-2d62f56e .uagb-buttons-repeater:focus .uagb-button__icon > svg{fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-2d62f56e .uagb-buttons-repeater .uagb-button__icon-position-after{margin-left: 8px;}.wp-block-uagb-buttons .uagb-block-2d62f56e .uagb-buttons-repeater .uagb-button__icon-position-before{margin-right: 8px;}.wp-block-uagb-buttons .uagb-block-2d62f56e .uagb-button__link{text-transform: normal;text-decoration: none;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-82db7f74{max-width: 48%;width: 100%;}.wp-block-uagb-container.uagb-block-82db7f74 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-82db7f74 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-82db7f74 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-82db7f74 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-82db7f74 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-82db7f74 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-82db7f74{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;overflow: visible;border-top-left-radius: 0px;border-top-right-radius: 0px;border-bottom-left-radius: 0px;border-bottom-right-radius: 0px;border-color: inherit;background-color: ;;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-10040e4e.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-10040e4e .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-10040e4e.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-10040e4e.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;text-align: center;}.uagb-block-10040e4e.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-10040e4e.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-10040e4e.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-10040e4e.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-10040e4e.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-10040e4e.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-10040e4e.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-10040e4e.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-10040e4e.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 364px;}.uagb-block-10040e4e.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-10040e4e.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-10040e4e.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-10040e4e.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-a53485a7 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-a53485a7 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-a53485a7 .uagb-ifb-icon svg{fill: #333;}.uagb-block-a53485a7.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-a53485a7 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-a53485a7 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-a53485a7.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-a53485a7.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-a53485a7 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-a53485a7 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-a53485a7 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-a53485a7 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-a53485a7.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-a53485a7.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-a53485a7.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-a53485a7.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-a53485a7 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-a53485a7.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-a53485a7.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 4px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-a53485a7 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-a53485a7 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-a53485a7 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-a53485a7 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-a53485a7.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-a53485a7.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-a53485a7 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-a53485a7.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-a53485a7 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-a53485a7.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-a53485a7 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-a53485a7 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-a53485a7.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-e2a12e89.wp-block-uagb-buttons.uagb-buttons__outer-wrap .uagb-buttons__wrap {column-gap: 10px;}.uagb-block-e2a12e89.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-fd545a20 .wp-block-button__link{background: transparent;}.wp-block-uagb-buttons .uagb-block-fd545a20 .wp-block-button__link:hover{background: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-fd545a20 .wp-block-button__link:focus{background: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-fd545a20 .uagb-button__wrapper .uagb-buttons-repeater{color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-fd545a20 .wp-block-button__link.has-text-color:hover .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-fd545a20 .wp-block-button__link.has-text-color:focus .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-fd545a20 .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-fd545a20 .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link:hover{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-fd545a20 .uagb-buttons-repeater.wp-block-button__link{border-top-width: 1px;border-left-width: 1px;border-right-width: 1px;border-bottom-width: 1px;border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-color: var(--ast-global-color-2);border-style: solid;}.wp-block-uagb-buttons .uagb-block-fd545a20 .uagb-buttons-repeater.wp-block-button__link:hover{border-color: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-fd545a20 .uagb-buttons-repeater.wp-block-button__link:focus{border-color: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-fd545a20.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-top-width: 1px;border-left-width: 1px;border-right-width: 1px;border-bottom-width: 1px;border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-color: var(--ast-global-color-2);border-style: solid;}.wp-block-uagb-buttons .uagb-block-fd545a20.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater:hover{border-color: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-fd545a20 .uagb-buttons-repeater .uagb-button__link{color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-fd545a20 .uagb-buttons-repeater:hover .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-fd545a20 .uagb-buttons-repeater:focus .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-fd545a20 .uagb-buttons-repeater .uagb-button__icon > svg{width: 15px;height: 15px;fill: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-fd545a20 .uagb-buttons-repeater:hover .uagb-button__icon > svg{fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-fd545a20 .uagb-buttons-repeater:focus .uagb-button__icon > svg{fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-fd545a20 .uagb-buttons-repeater .uagb-button__icon-position-after{margin-left: 8px;}.wp-block-uagb-buttons .uagb-block-fd545a20 .uagb-buttons-repeater .uagb-button__icon-position-before{margin-right: 8px;}.wp-block-uagb-buttons .uagb-block-fd545a20 .uagb-button__link{text-transform: normal;text-decoration: none;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-e9d5ec93{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-e9d5ec93 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-e9d5ec93 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-e9d5ec93 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-e9d5ec93 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-e9d5ec93 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-e9d5ec93 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 48px;}.wp-block-uagb-container.uagb-block-e9d5ec93{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 48px;overflow: visible;border-color: inherit;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-617755ef{max-width: 48%;width: 100%;}.wp-block-uagb-container.uagb-block-617755ef .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-617755ef .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-617755ef .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-617755ef .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-617755ef .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-617755ef > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-617755ef{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;overflow: visible;border-top-left-radius: 0px;border-top-right-radius: 0px;border-bottom-left-radius: 0px;border-bottom-right-radius: 0px;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-c39fc380.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-c39fc380 .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-c39fc380.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-c39fc380.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;text-align: center;}.uagb-block-c39fc380.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-c39fc380.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-c39fc380.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-c39fc380.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-c39fc380.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-c39fc380.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-c39fc380.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-c39fc380.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-c39fc380.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 364px;}.uagb-block-c39fc380.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-c39fc380.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-c39fc380.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-c39fc380.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-12ec7dd4 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-12ec7dd4 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-12ec7dd4 .uagb-ifb-icon svg{fill: #333;}.uagb-block-12ec7dd4.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-12ec7dd4 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-12ec7dd4 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-12ec7dd4.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-12ec7dd4.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-12ec7dd4 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-12ec7dd4 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-12ec7dd4 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-12ec7dd4 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-12ec7dd4.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-12ec7dd4.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-12ec7dd4.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-12ec7dd4.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-12ec7dd4 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-12ec7dd4.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-12ec7dd4.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 4px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-12ec7dd4 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-12ec7dd4 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-12ec7dd4 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-12ec7dd4 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-12ec7dd4.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-12ec7dd4.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-12ec7dd4 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-12ec7dd4.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-12ec7dd4 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-12ec7dd4.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-12ec7dd4 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-12ec7dd4 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-12ec7dd4.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-7737c438.wp-block-uagb-buttons.uagb-buttons__outer-wrap .uagb-buttons__wrap {column-gap: 10px;}.uagb-block-7737c438.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-a5a6b940 .wp-block-button__link{background: transparent;}.wp-block-uagb-buttons .uagb-block-a5a6b940 .wp-block-button__link:hover{background: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-a5a6b940 .wp-block-button__link:focus{background: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-a5a6b940 .uagb-button__wrapper .uagb-buttons-repeater{color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-a5a6b940 .wp-block-button__link.has-text-color:hover .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-a5a6b940 .wp-block-button__link.has-text-color:focus .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-a5a6b940 .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-a5a6b940 .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link:hover{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-a5a6b940 .uagb-buttons-repeater.wp-block-button__link{border-top-width: 1px;border-left-width: 1px;border-right-width: 1px;border-bottom-width: 1px;border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-color: var(--ast-global-color-2);border-style: solid;}.wp-block-uagb-buttons .uagb-block-a5a6b940 .uagb-buttons-repeater.wp-block-button__link:hover{border-color: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-a5a6b940 .uagb-buttons-repeater.wp-block-button__link:focus{border-color: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-a5a6b940.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-top-width: 1px;border-left-width: 1px;border-right-width: 1px;border-bottom-width: 1px;border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-color: var(--ast-global-color-2);border-style: solid;}.wp-block-uagb-buttons .uagb-block-a5a6b940.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater:hover{border-color: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-a5a6b940 .uagb-buttons-repeater .uagb-button__link{color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-a5a6b940 .uagb-buttons-repeater:hover .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-a5a6b940 .uagb-buttons-repeater:focus .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-a5a6b940 .uagb-buttons-repeater .uagb-button__icon > svg{width: 15px;height: 15px;fill: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-a5a6b940 .uagb-buttons-repeater:hover .uagb-button__icon > svg{fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-a5a6b940 .uagb-buttons-repeater:focus .uagb-button__icon > svg{fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-a5a6b940 .uagb-buttons-repeater .uagb-button__icon-position-after{margin-left: 8px;}.wp-block-uagb-buttons .uagb-block-a5a6b940 .uagb-buttons-repeater .uagb-button__icon-position-before{margin-right: 8px;}.wp-block-uagb-buttons .uagb-block-a5a6b940 .uagb-button__link{text-transform: normal;text-decoration: none;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-c218e93c{max-width: 48%;width: 100%;}.wp-block-uagb-container.uagb-block-c218e93c .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-c218e93c .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-c218e93c .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-c218e93c .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-c218e93c .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-c218e93c > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-c218e93c{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;overflow: visible;border-top-left-radius: 0px;border-top-right-radius: 0px;border-bottom-left-radius: 0px;border-bottom-right-radius: 0px;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-20d6f885.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-20d6f885 .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-20d6f885.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-20d6f885.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;text-align: center;}.uagb-block-20d6f885.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-20d6f885.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-20d6f885.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-20d6f885.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-20d6f885.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-20d6f885.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-20d6f885.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-20d6f885.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-20d6f885.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 364px;}.uagb-block-20d6f885.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-20d6f885.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-20d6f885.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-20d6f885.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-2d72936d .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-2d72936d .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-2d72936d .uagb-ifb-icon svg{fill: #333;}.uagb-block-2d72936d.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-2d72936d .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-2d72936d .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-2d72936d.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-2d72936d.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-2d72936d .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-2d72936d .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-2d72936d .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-2d72936d .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-2d72936d.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-2d72936d.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-2d72936d.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-2d72936d.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-2d72936d .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-2d72936d.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-2d72936d.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 4px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-2d72936d .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-2d72936d .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-2d72936d .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-2d72936d .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-2d72936d.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-2d72936d.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-2d72936d .uagb-infobox__content-wrap{text-align: left;}.uagb-block-2d72936d.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-2d72936d .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-2d72936d.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-2d72936d .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-2d72936d .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-2d72936d.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-eeb2b623.wp-block-uagb-buttons.uagb-buttons__outer-wrap .uagb-buttons__wrap {column-gap: 10px;}.uagb-block-eeb2b623.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-0a426d60 .wp-block-button__link{background: transparent;}.wp-block-uagb-buttons .uagb-block-0a426d60 .wp-block-button__link:hover{background: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-0a426d60 .wp-block-button__link:focus{background: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-0a426d60 .uagb-button__wrapper .uagb-buttons-repeater{color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-0a426d60 .wp-block-button__link.has-text-color:hover .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-0a426d60 .wp-block-button__link.has-text-color:focus .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-0a426d60 .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-0a426d60 .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link:hover{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-0a426d60 .uagb-buttons-repeater.wp-block-button__link{border-top-width: 1px;border-left-width: 1px;border-right-width: 1px;border-bottom-width: 1px;border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-color: var(--ast-global-color-2);border-style: solid;}.wp-block-uagb-buttons .uagb-block-0a426d60 .uagb-buttons-repeater.wp-block-button__link:hover{border-color: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-0a426d60 .uagb-buttons-repeater.wp-block-button__link:focus{border-color: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-0a426d60.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-top-width: 1px;border-left-width: 1px;border-right-width: 1px;border-bottom-width: 1px;border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-color: var(--ast-global-color-2);border-style: solid;}.wp-block-uagb-buttons .uagb-block-0a426d60.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater:hover{border-color: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-0a426d60 .uagb-buttons-repeater .uagb-button__link{color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-0a426d60 .uagb-buttons-repeater:hover .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-0a426d60 .uagb-buttons-repeater:focus .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-0a426d60 .uagb-buttons-repeater .uagb-button__icon > svg{width: 15px;height: 15px;fill: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-0a426d60 .uagb-buttons-repeater:hover .uagb-button__icon > svg{fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-0a426d60 .uagb-buttons-repeater:focus .uagb-button__icon > svg{fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-0a426d60 .uagb-buttons-repeater .uagb-button__icon-position-after{margin-left: 8px;}.wp-block-uagb-buttons .uagb-block-0a426d60 .uagb-buttons-repeater .uagb-button__icon-position-before{margin-right: 8px;}.wp-block-uagb-buttons .uagb-block-0a426d60 .uagb-button__link{text-transform: normal;text-decoration: none;}@media only screen and (max-width: 976px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-d673aca5{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-d673aca5 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 40px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-d673aca5{padding-top: 80px;padding-bottom: 80px;padding-left: 32px;padding-right: 32px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 40px;column-gap: 0px;background-color: var(--ast-global-color-4);;}.uagb-block-f0818517.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-f0818517.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0%;margin-top: 0%;margin-left: 8%;margin-right: 8%;}.uagb-block-f0818517.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-f0818517.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-f0818517.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-f0818517 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-f0818517 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-f0818517 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-f0818517 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-f0818517 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-f0818517.uagb-infobox__content-wrap{padding-top: 0%;padding-right: 0%;padding-bottom: 0%;padding-left: 0%;}.uagb-block-f0818517 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-f0818517.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-f0818517 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-f0818517 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-f0818517.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-589e2323{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-589e2323 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 40px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-589e2323{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 40px;column-gap: 0px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-7dfac154{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-7dfac154 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;row-gap: 0px;column-gap: 40px;}.wp-block-uagb-container.uagb-block-7dfac154{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 40px;align-items: stretch;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-a5ef8ac6{max-width: 47%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-a5ef8ac6 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-a5ef8ac6{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;}.uagb-block-b3700dc8.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 200px;}.uagb-block-b4b7afb9.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-b4b7afb9.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-b4b7afb9.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-b4b7afb9.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-b4b7afb9.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-b4b7afb9 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-b4b7afb9 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-b4b7afb9 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-b4b7afb9 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-b4b7afb9 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-b4b7afb9.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-b4b7afb9 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-b4b7afb9.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-b4b7afb9 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-b4b7afb9 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-b4b7afb9.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-18b19803.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-2d62f56e.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-style: solid;border-color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-2d62f56e .uagb-buttons-repeater.wp-block-button__link{border-style: solid;border-color: var(--ast-global-color-2);}.wp-block-uagb-container.uagb-is-root-container .uagb-block-82db7f74{max-width: 47%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-82db7f74 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-82db7f74{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;background-color: ;;}.uagb-block-10040e4e.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 200px;}.uagb-block-a53485a7.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-a53485a7.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-a53485a7.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-a53485a7.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-a53485a7.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-a53485a7 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-a53485a7 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-a53485a7 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-a53485a7 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-a53485a7 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-a53485a7.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-a53485a7 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-a53485a7.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-a53485a7 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-a53485a7 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-a53485a7.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-e2a12e89.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-fd545a20.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-style: solid;border-color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-fd545a20 .uagb-buttons-repeater.wp-block-button__link{border-style: solid;border-color: var(--ast-global-color-2);}.wp-block-uagb-container.uagb-is-root-container .uagb-block-e9d5ec93{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-e9d5ec93 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;row-gap: 0px;column-gap: 40px;}.wp-block-uagb-container.uagb-block-e9d5ec93{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 40px;align-items: stretch;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-617755ef{max-width: 47%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-617755ef > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-617755ef{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;}.uagb-block-c39fc380.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 200px;}.uagb-block-12ec7dd4.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-12ec7dd4.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-12ec7dd4.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-12ec7dd4.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-12ec7dd4.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-12ec7dd4 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-12ec7dd4 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-12ec7dd4 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-12ec7dd4 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-12ec7dd4 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-12ec7dd4.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-12ec7dd4 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-12ec7dd4.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-12ec7dd4 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-12ec7dd4 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-12ec7dd4.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-7737c438.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-a5a6b940.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-style: solid;border-color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-a5a6b940 .uagb-buttons-repeater.wp-block-button__link{border-style: solid;border-color: var(--ast-global-color-2);}.wp-block-uagb-container.uagb-is-root-container .uagb-block-c218e93c{max-width: 47%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-c218e93c > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-c218e93c{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;}.uagb-block-20d6f885.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 200px;}.uagb-block-2d72936d.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-2d72936d.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-2d72936d.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-2d72936d.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-2d72936d.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-2d72936d .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-2d72936d .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-2d72936d .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-2d72936d .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-2d72936d .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-2d72936d.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-2d72936d .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-2d72936d.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-2d72936d .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-2d72936d .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-2d72936d.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-eeb2b623.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-0a426d60.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-style: solid;border-color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-0a426d60 .uagb-buttons-repeater.wp-block-button__link{border-style: solid;border-color: var(--ast-global-color-2);}}@media only screen and (max-width: 767px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-d673aca5{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-d673aca5 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 40px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-d673aca5{padding-top: 64px;padding-bottom: 64px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 40px;column-gap: 0px;background-color: var(--ast-global-color-4);;}.uagb-block-f0818517.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-f0818517.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-f0818517.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-f0818517.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-f0818517 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-f0818517 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-f0818517.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-f0818517 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-f0818517 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-f0818517 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-f0818517.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-f0818517 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-f0818517.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-f0818517 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-f0818517 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-f0818517.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-589e2323{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-589e2323 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 30px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-589e2323{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 30px;column-gap: 0px;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-7dfac154{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-7dfac154 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;flex-wrap: wrap;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-7dfac154{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;align-items: stretch;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-a5ef8ac6{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-a5ef8ac6 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-a5ef8ac6{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;flex-wrap: wrap;}.uagb-block-b3700dc8.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 200px;}.uagb-block-b4b7afb9.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-b4b7afb9.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-b4b7afb9.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-b4b7afb9.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-b4b7afb9 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-b4b7afb9 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-b4b7afb9.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-b4b7afb9 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-b4b7afb9 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-b4b7afb9 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-b4b7afb9.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-b4b7afb9 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-b4b7afb9.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-b4b7afb9 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-b4b7afb9 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-b4b7afb9.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-18b19803.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-2d62f56e.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-style: solid;border-color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-2d62f56e .uagb-buttons-repeater.wp-block-button__link{border-style: solid;border-color: var(--ast-global-color-2);}.wp-block-uagb-container.uagb-is-root-container .uagb-block-82db7f74{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-82db7f74 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-82db7f74{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;background-color: ;;flex-wrap: wrap;}.uagb-block-10040e4e.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 200px;}.uagb-block-a53485a7.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-a53485a7.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-a53485a7.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-a53485a7.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-a53485a7 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-a53485a7 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-a53485a7.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-a53485a7 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-a53485a7 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-a53485a7 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-a53485a7.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-a53485a7 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-a53485a7.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-a53485a7 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-a53485a7 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-a53485a7.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-e2a12e89.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-fd545a20.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-style: solid;border-color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-fd545a20 .uagb-buttons-repeater.wp-block-button__link{border-style: solid;border-color: var(--ast-global-color-2);}.wp-block-uagb-container.uagb-is-root-container .uagb-block-e9d5ec93{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-e9d5ec93 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;flex-wrap: wrap;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-e9d5ec93{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;align-items: stretch;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-617755ef{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-617755ef > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-617755ef{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;flex-wrap: wrap;}.uagb-block-c39fc380.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 200px;}.uagb-block-12ec7dd4.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-12ec7dd4.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-12ec7dd4.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-12ec7dd4.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-12ec7dd4 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-12ec7dd4 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-12ec7dd4.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-12ec7dd4 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-12ec7dd4 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-12ec7dd4 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-12ec7dd4.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-12ec7dd4 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-12ec7dd4.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-12ec7dd4 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-12ec7dd4 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-12ec7dd4.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-7737c438.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-a5a6b940.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-style: solid;border-color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-a5a6b940 .uagb-buttons-repeater.wp-block-button__link{border-style: solid;border-color: var(--ast-global-color-2);}.wp-block-uagb-container.uagb-is-root-container .uagb-block-c218e93c{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-c218e93c > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-c218e93c{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;flex-wrap: wrap;}.uagb-block-20d6f885.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 200px;}.uagb-block-2d72936d.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-2d72936d.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-2d72936d.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-2d72936d.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-2d72936d .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-2d72936d .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-2d72936d.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-2d72936d .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-2d72936d .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-2d72936d .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-2d72936d.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-2d72936d .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-2d72936d.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-2d72936d .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-2d72936d .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-2d72936d.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-eeb2b623.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-0a426d60.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-style: solid;border-color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-0a426d60 .uagb-buttons-repeater.wp-block-button__link{border-style: solid;border-color: var(--ast-global-color-2);}}";s:7:"content";s:7678:"
<div class="wp-block-uagb-container uagb-block-d673aca5 alignfull uagb-is-root-container"><div class="uagb-container-inner-blocks-wrap">
<div class="wp-block-uagb-info-box uagb-block-f0818517 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h2 class="uagb-ifb-title">Innovative Solutions for Growth</h2></div><p class="uagb-ifb-desc">Explore our comprehensive selection of services that cater to a variety of needs, ensuring complete customer satisfaction.</p></div></div>



<div class="wp-block-uagb-container uagb-block-589e2323">
<div class="wp-block-uagb-container uagb-block-7dfac154">
<div class="wp-block-uagb-container uagb-block-a5ef8ac6">
<div class="wp-block-uagb-image alignleft uagb-block-b3700dc8 wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-left"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/10/natures-01-1024x683.jpg ,https://websitedemos.net/wp-content/uploads/2023/10/natures-01.jpg 780w, https://websitedemos.net/wp-content/uploads/2023/10/natures-01.jpg 360w" sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/10/natures-01-1024x683.jpg" alt="" class="uag-image-80573" width="600" height="364" title="" loading="lazy"/></figure></div>



<div class="wp-block-uagb-info-box uagb-block-b4b7afb9 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h5 class="uagb-ifb-title">Service 1</h5></div><p class="uagb-ifb-desc">This is a flexible section where you can share anything you want. It could be details or some information about your service one.</p></div></div>



<div class="wp-block-uagb-buttons uagb-buttons__outer-wrap uagb-btn__default-btn uagb-btn-tablet__default-btn uagb-btn-mobile__default-btn uagb-block-18b19803"><div class="uagb-buttons__wrap uagb-buttons-layout-wrap">
<div class="wp-block-uagb-buttons-child uagb-buttons__outer-wrap uagb-block-2d62f56e wp-block-button"><div class="uagb-button__wrapper"><a class="uagb-buttons-repeater wp-block-button__link" href="#" onclick="return false;" rel="follow noopener" target="_self"><div class="uagb-button__link">Get Started</div></a></div></div>
</div></div>
</div>



<div class="wp-block-uagb-container uagb-block-82db7f74">
<div class="wp-block-uagb-image alignleft uagb-block-10040e4e wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-left"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/10/desserts-01-1024x683.jpg ,https://websitedemos.net/wp-content/uploads/2023/10/desserts-01.jpg 780w, https://websitedemos.net/wp-content/uploads/2023/10/desserts-01.jpg 360w" sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/10/desserts-01-1024x683.jpg" alt="" class="uag-image-80569" width="600" height="364" title="" loading="lazy"/></figure></div>



<div class="wp-block-uagb-info-box uagb-block-a53485a7 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h5 class="uagb-ifb-title">Service 2</h5></div><p class="uagb-ifb-desc">This is a flexible section where you can share anything you want. It could be details or some information about your service two.</p></div></div>



<div class="wp-block-uagb-buttons uagb-buttons__outer-wrap uagb-btn__default-btn uagb-btn-tablet__default-btn uagb-btn-mobile__default-btn uagb-block-e2a12e89"><div class="uagb-buttons__wrap uagb-buttons-layout-wrap">
<div class="wp-block-uagb-buttons-child uagb-buttons__outer-wrap uagb-block-fd545a20 wp-block-button"><div class="uagb-button__wrapper"><a class="uagb-buttons-repeater wp-block-button__link" href="#" onclick="return false;" rel="follow noopener" target="_self"><div class="uagb-button__link">Get Started</div></a></div></div>
</div></div>
</div>
</div>



<div class="wp-block-uagb-container uagb-block-e9d5ec93">
<div class="wp-block-uagb-container uagb-block-617755ef">
<div class="wp-block-uagb-image alignleft uagb-block-c39fc380 wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-left"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/10/snow-mountains-01-1024x683.jpg ,https://websitedemos.net/wp-content/uploads/2023/10/snow-mountains-01.jpg 780w, https://websitedemos.net/wp-content/uploads/2023/10/snow-mountains-01.jpg 360w" sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/10/snow-mountains-01-1024x683.jpg" alt="" class="uag-image-80577" width="600" height="364" title="" loading="lazy"/></figure></div>



<div class="wp-block-uagb-info-box uagb-block-12ec7dd4 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h5 class="uagb-ifb-title">Service 3</h5></div><p class="uagb-ifb-desc">This is a flexible section where you can share anything you want. It could be details or some information about your service 3.</p></div></div>



<div class="wp-block-uagb-buttons uagb-buttons__outer-wrap uagb-btn__default-btn uagb-btn-tablet__default-btn uagb-btn-mobile__default-btn uagb-block-7737c438"><div class="uagb-buttons__wrap uagb-buttons-layout-wrap">
<div class="wp-block-uagb-buttons-child uagb-buttons__outer-wrap uagb-block-a5a6b940 wp-block-button"><div class="uagb-button__wrapper"><a class="uagb-buttons-repeater wp-block-button__link" href="#" onclick="return false;" rel="follow noopener" target="_self"><div class="uagb-button__link">Get Started</div></a></div></div>
</div></div>
</div>



<div class="wp-block-uagb-container uagb-block-c218e93c">
<div class="wp-block-uagb-image alignleft uagb-block-20d6f885 wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-left"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/10/mountains-01-1024x683.jpg ,https://websitedemos.net/wp-content/uploads/2023/10/mountains-01.jpg 780w, https://websitedemos.net/wp-content/uploads/2023/10/mountains-01.jpg 360w" sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/10/mountains-01-1024x683.jpg" alt="" class="uag-image-80571" width="600" height="364" title="" loading="lazy"/></figure></div>



<div class="wp-block-uagb-info-box uagb-block-2d72936d uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h5 class="uagb-ifb-title">Service 4</h5></div><p class="uagb-ifb-desc">This is a flexible section where you can share anything you want. It could be details or some information about your service 4.</p></div></div>



<div class="wp-block-uagb-buttons uagb-buttons__outer-wrap uagb-btn__default-btn uagb-btn-tablet__default-btn uagb-btn-mobile__default-btn uagb-block-eeb2b623"><div class="uagb-buttons__wrap uagb-buttons-layout-wrap">
<div class="wp-block-uagb-buttons-child uagb-buttons__outer-wrap uagb-block-0a426d60 wp-block-button"><div class="uagb-button__wrapper"><a class="uagb-buttons-repeater wp-block-button__link" href="#" onclick="return false;" rel="follow noopener" target="_self"><div class="uagb-button__link">Get Started</div></a></div></div>
</div></div>
</div>
</div>
</div>
</div></div>
";}s:8:"id-82845";a:10:{s:5:"title";s:11:"Services 16";s:3:"url";s:50:"https://websitedemos.net/astra-blocks/services-16/";s:3:"tag";a:0:{}s:8:"category";i:952;s:16:"primary-category";s:0:"";s:4:"type";s:5:"block";s:12:"page-builder";s:9:"gutenberg";s:16:"required-plugins";a:0:{}s:10:"stylesheet";s:50660:".wp-block-uagb-container.uagb-is-root-container .uagb-block-323c7320{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-323c7320 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-323c7320 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-323c7320 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-323c7320 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-323c7320 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-323c7320 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 72px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-323c7320{box-shadow: 0px 0px   #00000070 ;padding-top: 112px;padding-bottom: 112px;padding-left: 40px;padding-right: 40px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 72px;column-gap: 0px;overflow: visible;border-color: inherit;background-color: var(--ast-global-color-4);;}.uagb-block-9fbe867d .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-9fbe867d .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-9fbe867d .uagb-ifb-icon svg{fill: #333;}.uagb-block-9fbe867d.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-9fbe867d .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-9fbe867d .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-9fbe867d.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-9fbe867d.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-9fbe867d .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-9fbe867d .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-9fbe867d .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-9fbe867d .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-9fbe867d.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-9fbe867d.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-9fbe867d.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-9fbe867d.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-9fbe867d .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-9fbe867d.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-9fbe867d.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0%;margin-top: 0%;margin-left: 15%;margin-right: 15%;}.uagb-block-9fbe867d .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-9fbe867d .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-9fbe867d .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-9fbe867d .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-9fbe867d.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-9fbe867d.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-9fbe867d .uagb-infobox__content-wrap{text-align: center;}.uagb-block-9fbe867d.uagb-infobox-icon-above-title{text-align: center;}.uagb-block-9fbe867d.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-9fbe867d .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-9fbe867d.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-9fbe867d .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-9fbe867d .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-9fbe867d.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-682319ac{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-682319ac .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-682319ac .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-682319ac .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-682319ac .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-682319ac .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-682319ac > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 48px;}.wp-block-uagb-container.uagb-block-682319ac{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 48px;overflow: visible;border-color: inherit;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-71e8fff3{max-width: 48%;width: 100%;}.wp-block-uagb-container.uagb-block-71e8fff3 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-71e8fff3 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-71e8fff3 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-71e8fff3 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-71e8fff3 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-71e8fff3 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: stretch;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-71e8fff3{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-color: inherit;background-color: ;;flex-direction: column;align-items: stretch;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-75ccde33.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-75ccde33 .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-75ccde33.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-75ccde33.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;text-align: center;}.uagb-block-75ccde33.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-75ccde33.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-75ccde33.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-75ccde33.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-75ccde33.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-75ccde33.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-75ccde33.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-75ccde33.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-75ccde33.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 550px;}.uagb-block-75ccde33.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-75ccde33.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-75ccde33.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-75ccde33.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-9ee67bb3{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-9ee67bb3 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-9ee67bb3 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-9ee67bb3 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-9ee67bb3 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-9ee67bb3 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-9ee67bb3 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 28px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-9ee67bb3{box-shadow: 0px 0px   #00000070 ;padding-top: 20px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 28px;column-gap: 0px;overflow: visible;border-top-left-radius: 0px;border-top-right-radius: 0px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-2ab09e50 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-2ab09e50 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-2ab09e50 .uagb-ifb-icon svg{fill: #333;}.uagb-block-2ab09e50.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-2ab09e50 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-2ab09e50 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-2ab09e50.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-2ab09e50.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-2ab09e50 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-2ab09e50 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-2ab09e50 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-2ab09e50 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-2ab09e50.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-2ab09e50.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-2ab09e50.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-2ab09e50.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-2ab09e50 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-2ab09e50.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-2ab09e50.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-2ab09e50 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-2ab09e50 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-2ab09e50 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-2ab09e50 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-2ab09e50.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-2ab09e50.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-2ab09e50 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-2ab09e50.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-2ab09e50.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-2ab09e50 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-2ab09e50.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-2ab09e50 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-2ab09e50 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-2ab09e50.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-64373be9.wp-block-uagb-buttons.uagb-buttons__outer-wrap .uagb-buttons__wrap {column-gap: 0px;}.uagb-block-64373be9.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-15570a3f .wp-block-button__link{background: transparent;}.wp-block-uagb-buttons .uagb-block-15570a3f .wp-block-button__link:hover{background: transparent;}.wp-block-uagb-buttons .uagb-block-15570a3f .wp-block-button__link:focus{background: transparent;}.wp-block-uagb-buttons .uagb-block-15570a3f .uagb-button__wrapper .uagb-buttons-repeater{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;color: var(--ast-global-color-2);margin-top: 0px;margin-bottom: 0px;margin-left: 0px;margin-right: 0px;}.wp-block-uagb-buttons .uagb-block-15570a3f .wp-block-button__link.has-text-color:hover .uagb-button__link{color: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-15570a3f .wp-block-button__link.has-text-color:focus .uagb-button__link{color: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-15570a3f .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link{margin-top: 0px;margin-bottom: 0px;margin-left: 0px;margin-right: 0px;box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-15570a3f .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link:hover{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-15570a3f .uagb-buttons-repeater .uagb-button__link{color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-15570a3f .uagb-buttons-repeater:hover .uagb-button__link{color: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-15570a3f .uagb-buttons-repeater:focus .uagb-button__link{color: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-15570a3f .uagb-buttons-repeater .uagb-button__icon > svg{width: 15px;height: 15px;fill: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-15570a3f .uagb-buttons-repeater:hover .uagb-button__icon > svg{fill: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-15570a3f .uagb-buttons-repeater:focus .uagb-button__icon > svg{fill: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-15570a3f .uagb-buttons-repeater .uagb-button__icon-position-after{margin-left: 8px;}.wp-block-uagb-buttons .uagb-block-15570a3f .uagb-buttons-repeater .uagb-button__icon-position-before{margin-right: 8px;}.wp-block-uagb-buttons .uagb-block-15570a3f .uagb-button__link{text-transform: normal;text-decoration: none;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-a767bc2d{max-width: 48%;width: 100%;}.wp-block-uagb-container.uagb-block-a767bc2d .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-a767bc2d .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-a767bc2d .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-a767bc2d .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-a767bc2d .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-a767bc2d > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: stretch;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-a767bc2d{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-color: inherit;background-color: ;;flex-direction: column;align-items: stretch;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-b2504f0e.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-b2504f0e .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-b2504f0e.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-b2504f0e.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;text-align: center;}.uagb-block-b2504f0e.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-b2504f0e.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-b2504f0e.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-b2504f0e.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-b2504f0e.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-b2504f0e.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-b2504f0e.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-b2504f0e.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-b2504f0e.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 550px;}.uagb-block-b2504f0e.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-b2504f0e.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-b2504f0e.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-b2504f0e.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-9aef83d0{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-9aef83d0 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-9aef83d0 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-9aef83d0 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-9aef83d0 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-9aef83d0 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-9aef83d0 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 28px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-9aef83d0{box-shadow: 0px 0px   #00000070 ;padding-top: 20px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 28px;column-gap: 0px;overflow: visible;border-top-left-radius: 0px;border-top-right-radius: 0px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-7e10dc31 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-7e10dc31 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-7e10dc31 .uagb-ifb-icon svg{fill: #333;}.uagb-block-7e10dc31.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-7e10dc31 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-7e10dc31 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-7e10dc31.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-7e10dc31.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-7e10dc31 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-7e10dc31 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-7e10dc31 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-7e10dc31 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-7e10dc31.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-7e10dc31.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-7e10dc31.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-7e10dc31.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-7e10dc31 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-7e10dc31.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-7e10dc31.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-7e10dc31 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-7e10dc31 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-7e10dc31 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-7e10dc31 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-7e10dc31.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-7e10dc31.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-7e10dc31 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-7e10dc31.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-7e10dc31.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-7e10dc31 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-7e10dc31.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-7e10dc31 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-7e10dc31 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-7e10dc31.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-66047323.wp-block-uagb-buttons.uagb-buttons__outer-wrap .uagb-buttons__wrap {column-gap: 0px;}.uagb-block-66047323.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-5658abd4 .wp-block-button__link{background: transparent;}.wp-block-uagb-buttons .uagb-block-5658abd4 .wp-block-button__link:hover{background: transparent;}.wp-block-uagb-buttons .uagb-block-5658abd4 .wp-block-button__link:focus{background: transparent;}.wp-block-uagb-buttons .uagb-block-5658abd4 .uagb-button__wrapper .uagb-buttons-repeater{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;color: var(--ast-global-color-2);margin-top: 0px;margin-bottom: 0px;margin-left: 0px;margin-right: 0px;}.wp-block-uagb-buttons .uagb-block-5658abd4 .wp-block-button__link.has-text-color:hover .uagb-button__link{color: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-5658abd4 .wp-block-button__link.has-text-color:focus .uagb-button__link{color: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-5658abd4 .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link{margin-top: 0px;margin-bottom: 0px;margin-left: 0px;margin-right: 0px;box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-5658abd4 .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link:hover{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-5658abd4 .uagb-buttons-repeater .uagb-button__link{color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-5658abd4 .uagb-buttons-repeater:hover .uagb-button__link{color: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-5658abd4 .uagb-buttons-repeater:focus .uagb-button__link{color: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-5658abd4 .uagb-buttons-repeater .uagb-button__icon > svg{width: 15px;height: 15px;fill: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-5658abd4 .uagb-buttons-repeater:hover .uagb-button__icon > svg{fill: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-5658abd4 .uagb-buttons-repeater:focus .uagb-button__icon > svg{fill: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-5658abd4 .uagb-buttons-repeater .uagb-button__icon-position-after{margin-left: 8px;}.wp-block-uagb-buttons .uagb-block-5658abd4 .uagb-buttons-repeater .uagb-button__icon-position-before{margin-right: 8px;}.wp-block-uagb-buttons .uagb-block-5658abd4 .uagb-button__link{text-transform: normal;text-decoration: none;}@media only screen and (max-width: 976px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-323c7320{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-323c7320 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 50px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-323c7320{padding-top: 80px;padding-bottom: 80px;padding-left: 32px;padding-right: 32px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 50px;column-gap: 0px;background-color: var(--ast-global-color-4);;}.uagb-block-9fbe867d.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-9fbe867d.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0%;margin-top: 0%;margin-left: 8%;margin-right: 8%;}.uagb-block-9fbe867d.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-9fbe867d.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-9fbe867d.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-9fbe867d .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-9fbe867d .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-9fbe867d .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-9fbe867d .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-9fbe867d .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-9fbe867d.uagb-infobox__content-wrap{padding-top: 0%;padding-right: 0%;padding-bottom: 0%;padding-left: 0%;}.uagb-block-9fbe867d .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-9fbe867d.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-9fbe867d .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-9fbe867d .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-9fbe867d.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-682319ac{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-682319ac > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;row-gap: 0px;column-gap: 40px;}.wp-block-uagb-container.uagb-block-682319ac{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 40px;align-items: stretch;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-71e8fff3{max-width: 47%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-71e8fff3 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-71e8fff3{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;background-color: ;;align-items: stretch;}.uagb-block-75ccde33.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 300px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-9ee67bb3{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-9ee67bb3 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-9ee67bb3{padding-top: 20px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;}.uagb-block-2ab09e50.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-2ab09e50.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-2ab09e50.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-2ab09e50.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-2ab09e50.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-2ab09e50 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-2ab09e50 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-2ab09e50 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-2ab09e50 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-2ab09e50 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-2ab09e50.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-2ab09e50 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-2ab09e50.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-2ab09e50 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-2ab09e50 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-2ab09e50.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-64373be9.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-15570a3f .uagb-buttons-repeater .uagb-button__icon > svg{fill: var(--ast-global-color-2);}.wp-block-uagb-container.uagb-is-root-container .uagb-block-a767bc2d{max-width: 47%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-a767bc2d > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-a767bc2d{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;background-color: ;;align-items: stretch;}.uagb-block-b2504f0e.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 300px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-9aef83d0{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-9aef83d0 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-9aef83d0{padding-top: 20px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;}.uagb-block-7e10dc31.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-7e10dc31.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-7e10dc31.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7e10dc31.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-7e10dc31.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-7e10dc31 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-7e10dc31 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-7e10dc31 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-7e10dc31 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7e10dc31 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7e10dc31.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-7e10dc31 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-7e10dc31.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-7e10dc31 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-7e10dc31 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-7e10dc31.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-66047323.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-5658abd4 .uagb-buttons-repeater .uagb-button__icon > svg{fill: var(--ast-global-color-2);}}@media only screen and (max-width: 767px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-323c7320{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-323c7320 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 40px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-323c7320{padding-top: 64px;padding-bottom: 64px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 40px;column-gap: 0px;background-color: var(--ast-global-color-4);;}.uagb-block-9fbe867d.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-9fbe867d.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-9fbe867d.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-9fbe867d.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-9fbe867d .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-9fbe867d .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-9fbe867d.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-9fbe867d .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-9fbe867d .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-9fbe867d .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-9fbe867d.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-9fbe867d .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-9fbe867d.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-9fbe867d .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-9fbe867d .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-9fbe867d.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-682319ac{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-682319ac > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;flex-wrap: wrap;row-gap: 30px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-682319ac{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 30px;column-gap: 0px;align-items: stretch;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-71e8fff3{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-71e8fff3 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-71e8fff3{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;background-color: ;;align-items: stretch;flex-wrap: wrap;}.uagb-block-75ccde33.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 250px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-9ee67bb3{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-9ee67bb3 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-9ee67bb3{padding-top: 20px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;flex-wrap: wrap;}.uagb-block-2ab09e50.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-2ab09e50.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-2ab09e50.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-2ab09e50.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-2ab09e50 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-2ab09e50 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-2ab09e50.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-2ab09e50 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-2ab09e50 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-2ab09e50 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-2ab09e50.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-2ab09e50 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-2ab09e50.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-2ab09e50 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-2ab09e50 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-2ab09e50.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-64373be9.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-15570a3f .uagb-buttons-repeater .uagb-button__icon > svg{fill: var(--ast-global-color-2);}.wp-block-uagb-container.uagb-is-root-container .uagb-block-a767bc2d{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-a767bc2d > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-a767bc2d{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;background-color: ;;align-items: stretch;flex-wrap: wrap;}.uagb-block-b2504f0e.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 250px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-9aef83d0{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-9aef83d0 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-9aef83d0{padding-top: 20px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;flex-wrap: wrap;}.uagb-block-7e10dc31.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-7e10dc31.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-7e10dc31.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7e10dc31.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-7e10dc31 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7e10dc31 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7e10dc31.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-7e10dc31 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-7e10dc31 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-7e10dc31 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-7e10dc31.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-7e10dc31 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-7e10dc31.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-7e10dc31 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-7e10dc31 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-7e10dc31.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-66047323.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-5658abd4 .uagb-buttons-repeater .uagb-button__icon > svg{fill: var(--ast-global-color-2);}}";s:7:"content";s:4960:"
