<div class="wp-block-uagb-container uagb-block-8c4383c7 alignfull uagb-is-root-container"><div class="uagb-container-inner-blocks-wrap">
<div class="wp-block-uagb-container uagb-block-82c2850c">
<div class="wp-block-uagb-container uagb-block-367bcf67">
<div class="wp-block-uagb-info-box uagb-block-7edef7ac uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h3 class="uagb-ifb-title">Innovative Solutions for Modern Challenges</h3></div></div></div>
</div>



<div class="wp-block-uagb-container uagb-block-e33c4310">
<div class="wp-block-uagb-info-box uagb-block-85e637d8 uagb-infobox__content-wrap  uagb-infobox-icon-left uagb-infobox-left uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h5 class="uagb-ifb-title">Feature 1</h5></div><p class="uagb-ifb-desc">This is a flexible section where you can share anything you want. It could be details or some information about feature one.</p><div class="uagb-ifb-separator"></div></div></div>



<div class="wp-block-uagb-info-box uagb-block-1088a645 uagb-infobox__content-wrap  uagb-infobox-icon-left uagb-infobox-left uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h5 class="uagb-ifb-title">Feature 2</h5></div><p class="uagb-ifb-desc">This is a flexible section where you can share anything you want. It could be details or some information about feature two.</p><div class="uagb-ifb-separator"></div></div></div>
</div>
</div>



<div class="wp-block-uagb-container uagb-block-c7857b8c">
<div class="wp-block-uagb-container uagb-block-a5a8b2be">
<div class="wp-block-uagb-image alignleft uagb-block-08e35c1d wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-left"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/10/natures-02.jpg " sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/10/natures-02.jpg" alt="" class="uag-image-80574" width="270" height="330" title="" loading="lazy"/></figure></div>



<div class="wp-block-uagb-image uagb-block-47adc349 wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-none"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/10/snow-mountains-02.jpg " sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/10/snow-mountains-02.jpg" alt="" class="uag-image-80578" width="270" height="270" title="" loading="lazy"/></figure></div>
</div>



<div class="wp-block-uagb-container uagb-block-f8c92167">
<div class="wp-block-uagb-image alignleft uagb-block-c480e35b wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-left"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/10/desserts-02.jpg " sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/10/desserts-02.jpg" alt="" class="uag-image-80570" width="270" height="270" title="" loading="lazy"/></figure></div>



<div class="wp-block-uagb-image uagb-block-0d2bc0ba wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-none"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/10/mountains-02.jpg " sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/10/mountains-02.jpg" alt="" class="uag-image-80572" width="270" height="330" title="" loading="lazy"/></figure></div>
</div>
</div>
</div></div>
";}s:8:"id-77835";a:10:{s:5:"title";s:11:"Features 12";s:3:"url";s:50:"https://websitedemos.net/astra-blocks/features-12/";s:3:"tag";a:0:{}s:8:"category";i:919;s:16:"primary-category";s:0:"";s:4:"type";s:5:"block";s:12:"page-builder";s:9:"gutenberg";s:16:"required-plugins";a:0:{}s:10:"stylesheet";s:40103:".wp-block-uagb-container.uagb-is-root-container .uagb-block-0875eb55{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-0875eb55 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-0875eb55 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-0875eb55 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-0875eb55 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-0875eb55 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-0875eb55 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: flex-start;justify-content: center;flex-wrap: nowrap;row-gap: 48px;column-gap: 20px;}.wp-block-uagb-container.uagb-block-0875eb55{box-shadow: 0px 0px   #00000070 ;padding-top: 112px;padding-bottom: 112px;padding-left: 40px;padding-right: 40px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 48px;column-gap: 20px;overflow: visible;border-color: inherit;background-color: var(--ast-global-color-4);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-0b5b2ce6{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-0b5b2ce6 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-0b5b2ce6 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-0b5b2ce6 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-0b5b2ce6 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-0b5b2ce6 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-0b5b2ce6 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: flex-start;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 48px;}.wp-block-uagb-container.uagb-block-0b5b2ce6{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 48px;overflow: visible;border-color: inherit;flex-direction: row;align-items: flex-start;justify-content: center;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-abcd4e61{max-width: 33%;width: 100%;}.wp-block-uagb-container.uagb-block-abcd4e61 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-abcd4e61 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-abcd4e61 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-abcd4e61 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-abcd4e61 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-abcd4e61 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-abcd4e61{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-47b7c002 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-47b7c002 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-47b7c002 .uagb-ifb-icon svg{fill: #333;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-47b7c002 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-47b7c002 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-47b7c002 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-47b7c002 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-47b7c002 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-47b7c002 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-47b7c002.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-47b7c002 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-47b7c002.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-47b7c002.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-47b7c002 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-47b7c002 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-47b7c002 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-47b7c002 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-47b7c002 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-47b7c002.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-47b7c002.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-47b7c002 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-47b7c002 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-47b7c002 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-62eb4ff6{max-width: 33%;width: 100%;}.wp-block-uagb-container.uagb-block-62eb4ff6 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-62eb4ff6 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-62eb4ff6 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-62eb4ff6 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-62eb4ff6 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-62eb4ff6 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-62eb4ff6{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-71fb9d58 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-71fb9d58 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-71fb9d58 .uagb-ifb-icon svg{fill: #333;}.uagb-block-71fb9d58.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-71fb9d58 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-71fb9d58 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-71fb9d58.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-71fb9d58.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-71fb9d58 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-71fb9d58 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-71fb9d58 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-71fb9d58 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-71fb9d58.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-71fb9d58.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-71fb9d58.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-71fb9d58.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-71fb9d58 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-71fb9d58.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-71fb9d58.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-71fb9d58 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-71fb9d58 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-71fb9d58 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-71fb9d58 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-71fb9d58.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-71fb9d58.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-71fb9d58 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-71fb9d58.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-71fb9d58.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-71fb9d58 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-71fb9d58.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-71fb9d58 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-71fb9d58 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-71fb9d58.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-e091bf2d{max-width: 33%;width: 100%;}.wp-block-uagb-container.uagb-block-e091bf2d .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-e091bf2d .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-e091bf2d .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-e091bf2d .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-e091bf2d .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-e091bf2d > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-e091bf2d{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-a221392c .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-a221392c .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-a221392c .uagb-ifb-icon svg{fill: #333;}.uagb-block-a221392c.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-a221392c .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-a221392c .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-a221392c.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-a221392c.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-a221392c .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-a221392c .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-a221392c .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-a221392c .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-a221392c.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-a221392c.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-a221392c.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-a221392c.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-a221392c .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-a221392c.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-a221392c.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-a221392c .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-a221392c .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-a221392c .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-a221392c .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-a221392c.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-a221392c.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-a221392c .uagb-infobox__content-wrap{text-align: left;}.uagb-block-a221392c.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-a221392c.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-a221392c .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-a221392c.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-a221392c .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-a221392c .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-a221392c.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-8f18566d{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-8f18566d .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-8f18566d .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-8f18566d .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-8f18566d .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-8f18566d .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-8f18566d > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 24px;}.wp-block-uagb-container.uagb-block-8f18566d{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 0px;column-gap: 24px;overflow: visible;border-color: inherit;flex-direction: row;align-items: center;justify-content: center;flex-wrap: nowrap;}.uagb-block-1ee3ae0d.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: center;justify-content: center;align-self: center;}.uagb-block-1ee3ae0d .wp-block-uagb-image__figure{align-items: center;}.uagb-block-1ee3ae0d.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-1ee3ae0d.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;text-align: center;}.uagb-block-1ee3ae0d.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-1ee3ae0d.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-1ee3ae0d.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-1ee3ae0d.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-1ee3ae0d.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-1ee3ae0d.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-1ee3ae0d.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-1ee3ae0d.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-1ee3ae0d.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 1200px;height: 350px;}.uagb-block-1ee3ae0d.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-1ee3ae0d.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-1ee3ae0d.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-1ee3ae0d.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}@media only screen and (max-width: 976px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-0875eb55{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-0875eb55 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;align-items: flex-start;row-gap: 40px;column-gap: 40px;}.wp-block-uagb-container.uagb-block-0875eb55{padding-top: 80px;padding-bottom: 80px;padding-left: 32px;padding-right: 32px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 40px;column-gap: 40px;background-color: var(--ast-global-color-4);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-0b5b2ce6{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-0b5b2ce6 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;row-gap: 40px;}.wp-block-uagb-container.uagb-block-0b5b2ce6{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 40px;align-items: stretch;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-abcd4e61{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-abcd4e61 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-abcd4e61{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;}.uagb-block-47b7c002.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-47b7c002.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-47b7c002 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-47b7c002 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-47b7c002 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-47b7c002 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-47b7c002 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-47b7c002.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-47b7c002 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-47b7c002 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-47b7c002 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-62eb4ff6{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-62eb4ff6 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-62eb4ff6{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;}.uagb-block-71fb9d58.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-71fb9d58.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-71fb9d58.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-71fb9d58.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-71fb9d58.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-71fb9d58 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-71fb9d58 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-71fb9d58 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-71fb9d58 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-71fb9d58 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-71fb9d58.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-71fb9d58 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-71fb9d58.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-71fb9d58 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-71fb9d58 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-71fb9d58.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-e091bf2d{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-e091bf2d > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-e091bf2d{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;}.uagb-block-a221392c.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-a221392c.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-a221392c.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-a221392c.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-a221392c.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-a221392c .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-a221392c .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-a221392c .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-a221392c .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-a221392c .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-a221392c.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-a221392c .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-a221392c.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-a221392c .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-a221392c .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-a221392c.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-8f18566d{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-8f18566d > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;column-gap: 20px;}.wp-block-uagb-container.uagb-block-8f18566d{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;column-gap: 20px;}.uagb-block-1ee3ae0d.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 1200px;height: 350px;}}@media only screen and (max-width: 767px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-0875eb55{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-0875eb55 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;flex-wrap: wrap;row-gap: 36px;}.wp-block-uagb-container.uagb-block-0875eb55{padding-top: 64px;padding-bottom: 64px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 36px;background-color: var(--ast-global-color-4);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-0b5b2ce6{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-0b5b2ce6 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;flex-wrap: wrap;row-gap: 20px;}.wp-block-uagb-container.uagb-block-0b5b2ce6{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 20px;align-items: stretch;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-abcd4e61{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-abcd4e61 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-abcd4e61{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;flex-wrap: wrap;}.uagb-block-47b7c002.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-47b7c002.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-47b7c002 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-47b7c002 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-47b7c002 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-47b7c002 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-47b7c002 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-47b7c002.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-47b7c002 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-47b7c002 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-47b7c002 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-62eb4ff6{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-62eb4ff6 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-62eb4ff6{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;flex-wrap: wrap;}.uagb-block-71fb9d58.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-71fb9d58.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-71fb9d58.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-71fb9d58.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-71fb9d58 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-71fb9d58 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-71fb9d58.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-71fb9d58 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-71fb9d58 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-71fb9d58 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-71fb9d58.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-71fb9d58 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-71fb9d58.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-71fb9d58 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-71fb9d58 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-71fb9d58.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-e091bf2d{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-e091bf2d > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-e091bf2d{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;flex-wrap: wrap;}.uagb-block-a221392c.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-a221392c.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-a221392c.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-a221392c.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-a221392c .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-a221392c .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-a221392c.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-a221392c .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-a221392c .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-a221392c .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-a221392c.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-a221392c .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-a221392c.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-a221392c .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-a221392c .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-a221392c.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-8f18566d{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-8f18566d > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 24px;}.wp-block-uagb-container.uagb-block-8f18566d{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 24px;flex-wrap: wrap;}.uagb-block-1ee3ae0d.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 300px;}}";s:7:"content";s:2125:"
<div class="wp-block-uagb-container uagb-block-0875eb55 alignfull uagb-is-root-container"><div class="uagb-container-inner-blocks-wrap">
<div class="wp-block-uagb-container uagb-block-0b5b2ce6">
<div class="wp-block-uagb-container uagb-block-abcd4e61">
<div class="wp-block-uagb-info-box uagb-block-47b7c002 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h4 class="uagb-ifb-title">Innovative Solutions for Modern Challenges</h4></div></div></div>
</div>



<div class="wp-block-uagb-container uagb-block-62eb4ff6">
<div class="wp-block-uagb-info-box uagb-block-71fb9d58 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h5 class="uagb-ifb-title">Feature 1</h5></div><p class="uagb-ifb-desc">This is a flexible section where you can share anything you want. It could be details or some information about feature one.</p></div></div>
</div>



<div class="wp-block-uagb-container uagb-block-e091bf2d">
<div class="wp-block-uagb-info-box uagb-block-a221392c uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h5 class="uagb-ifb-title">Feature 2</h5></div><p class="uagb-ifb-desc">This is a flexible section where you can share anything you want. It could be details or some information about feature two.</p></div></div>
</div>
</div>



<div class="wp-block-uagb-container uagb-block-8f18566d">
<div class="wp-block-uagb-image aligncenter uagb-block-1ee3ae0d wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-center"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/10/natures-01.jpg " sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/10/natures-01.jpg" alt="" class="uag-image-80573" width="1200" height="350" title="" loading="lazy"/></figure></div>
</div>
</div></div>
";}s:8:"id-76145";a:10:{s:5:"title";s:7:"Team 01";s:3:"url";s:46:"https://websitedemos.net/astra-blocks/team-01/";s:3:"tag";a:0:{}s:8:"category";i:829;s:16:"primary-category";s:0:"";s:4:"type";s:5:"block";s:12:"page-builder";s:9:"gutenberg";s:16:"required-plugins";a:0:{}s:10:"stylesheet";s:48768:".wp-block-uagb-container.uagb-is-root-container .uagb-block-573dc06d{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-573dc06d .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-573dc06d .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-573dc06d .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-573dc06d .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-573dc06d .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-573dc06d > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 48px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-573dc06d{box-shadow: 0px 0px   #00000070 ;padding-top: 112px;padding-bottom: 112px;padding-left: 40px;padding-right: 40px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 48px;column-gap: 0px;overflow: visible;border-color: inherit;background-color: var(--ast-global-color-4);;}.uagb-block-7edef7ac .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-7edef7ac .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-7edef7ac .uagb-ifb-icon svg{fill: #333;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-7edef7ac .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-7edef7ac .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-7edef7ac .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-7edef7ac .uagb-ifb-title-wrap .uagb-ifb-title-prefix{color: var(--ast-global-color-0);margin-bottom: 10px;margin-top: 5px;margin-left: 0px;margin-right: 0px;}.uagb-block-7edef7ac.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-7edef7ac.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0%;margin-top: 0%;margin-left: 15%;margin-right: 15%;}.uagb-block-7edef7ac .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-7edef7ac .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-7edef7ac .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-7edef7ac .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-7edef7ac .uagb-infobox__content-wrap{text-align: center;}.uagb-block-7edef7ac.uagb-infobox-icon-above-title{text-align: center;}.uagb-block-7edef7ac.uagb-infobox__content-wrap{padding-top: 0%;padding-right: 0%;padding-bottom: 0%;padding-left: 0%;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-13533f4b{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-13533f4b .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-13533f4b .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-13533f4b .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-13533f4b .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-13533f4b .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-13533f4b > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 48px;}.wp-block-uagb-container.uagb-block-13533f4b{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 48px;overflow: visible;border-color: inherit;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-ae135cd8{max-width: 33%;width: 100%;}.wp-block-uagb-container.uagb-block-ae135cd8 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-ae135cd8 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-ae135cd8 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-ae135cd8 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-ae135cd8 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-ae135cd8 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 16px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-ae135cd8{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 16px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-a6a9fd5f.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-a6a9fd5f .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-a6a9fd5f.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-a6a9fd5f.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;text-align: center;}.uagb-block-a6a9fd5f.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-a6a9fd5f.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-a6a9fd5f.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-a6a9fd5f.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-a6a9fd5f.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-a6a9fd5f.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-a6a9fd5f.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-a6a9fd5f.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-a6a9fd5f.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 368px;height: 460px;}.uagb-block-a6a9fd5f.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-a6a9fd5f.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-a6a9fd5f.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-a6a9fd5f.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-82b9f747 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-82b9f747 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-82b9f747 .uagb-ifb-icon svg{fill: #333;}.uagb-block-82b9f747.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-82b9f747 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-82b9f747 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-82b9f747.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-82b9f747.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-82b9f747 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-82b9f747 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-82b9f747 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-82b9f747 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-82b9f747.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-82b9f747.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-82b9f747.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-82b9f747.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-82b9f747 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-82b9f747.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 4px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-82b9f747.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-82b9f747 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-82b9f747 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-82b9f747 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-82b9f747 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-82b9f747.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-82b9f747.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-82b9f747 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-82b9f747.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-82b9f747 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-82b9f747.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-82b9f747 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-82b9f747 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-82b9f747.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-3bd77aa2{max-width: 33%;width: 100%;}.wp-block-uagb-container.uagb-block-3bd77aa2 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-3bd77aa2 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-3bd77aa2 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-3bd77aa2 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-3bd77aa2 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-3bd77aa2 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 16px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-3bd77aa2{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 16px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-a0bdf96c.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;}.uagb-block-a0bdf96c.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-a0bdf96c.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;text-align: center;}.uagb-block-a0bdf96c.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-a0bdf96c.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-a0bdf96c.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-a0bdf96c.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-a0bdf96c.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-a0bdf96c.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-a0bdf96c.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-a0bdf96c.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-a0bdf96c.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 368px;height: 460px;}.uagb-block-a0bdf96c.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-a0bdf96c.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-a0bdf96c.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-a0bdf96c.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-e6dd03d4 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-e6dd03d4 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-e6dd03d4 .uagb-ifb-icon svg{fill: #333;}.uagb-block-e6dd03d4.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-e6dd03d4 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-e6dd03d4 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-e6dd03d4.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-e6dd03d4.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-e6dd03d4 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-e6dd03d4 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-e6dd03d4 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-e6dd03d4 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-e6dd03d4.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-e6dd03d4.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-e6dd03d4.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-e6dd03d4.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-e6dd03d4 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-e6dd03d4.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 4px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-e6dd03d4.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-e6dd03d4 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-e6dd03d4 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-e6dd03d4 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-e6dd03d4 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-e6dd03d4.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-e6dd03d4.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-e6dd03d4 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-e6dd03d4.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-e6dd03d4 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-e6dd03d4.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-e6dd03d4 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-e6dd03d4 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-e6dd03d4.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-b30185e1{max-width: 33%;width: 100%;}.wp-block-uagb-container.uagb-block-b30185e1 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-b30185e1 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-b30185e1 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-b30185e1 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-b30185e1 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-b30185e1 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 16px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-b30185e1{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 16px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-054607b6.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;}.uagb-block-054607b6.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-054607b6.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;text-align: center;}.uagb-block-054607b6.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-054607b6.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-054607b6.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-054607b6.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-054607b6.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-054607b6.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-054607b6.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-054607b6.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-054607b6.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 368px;height: 460px;}.uagb-block-054607b6.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-054607b6.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-054607b6.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-054607b6.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-a0382e85 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-a0382e85 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-a0382e85 .uagb-ifb-icon svg{fill: #333;}.uagb-block-a0382e85.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-a0382e85 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-a0382e85 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-a0382e85.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-a0382e85.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-a0382e85 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-a0382e85 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-a0382e85 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-a0382e85 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-a0382e85.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-a0382e85.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-a0382e85.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-a0382e85.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-a0382e85 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-a0382e85.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 4px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-a0382e85.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-a0382e85 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-a0382e85 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-a0382e85 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-a0382e85 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-a0382e85.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-a0382e85.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-a0382e85 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-a0382e85.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-a0382e85 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-a0382e85.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-a0382e85 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-a0382e85 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-a0382e85.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}@media only screen and (max-width: 976px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-573dc06d{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-573dc06d > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 40px;column-gap: 40px;}.wp-block-uagb-container.uagb-block-573dc06d{padding-top: 80px;padding-bottom: 80px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 40px;column-gap: 40px;background-color: var(--ast-global-color-4);;}.uagb-block-7edef7ac.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-7edef7ac.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0%;margin-top: 0%;margin-left: 8%;margin-right: 8%;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-7edef7ac .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-7edef7ac .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-7edef7ac .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap{padding-top: 0%;padding-right: 0%;padding-bottom: 0%;padding-left: 0%;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-13533f4b{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-13533f4b > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;column-gap: 24px;}.wp-block-uagb-container.uagb-block-13533f4b{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;column-gap: 24px;align-items: stretch;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-ae135cd8{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-ae135cd8 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-ae135cd8{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;}.uagb-block-a6a9fd5f.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 224px;height: 300px;}.uagb-block-a6a9fd5f.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;}.uagb-block-82b9f747.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-82b9f747.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-82b9f747.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-82b9f747 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-82b9f747 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-82b9f747 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-82b9f747 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-82b9f747 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-82b9f747 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-82b9f747.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-82b9f747 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-82b9f747 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-82b9f747.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-3bd77aa2{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-3bd77aa2 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-3bd77aa2{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;}.uagb-block-a0bdf96c.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 224px;height: 300px;}.uagb-block-a0bdf96c.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;}.uagb-block-e6dd03d4.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-e6dd03d4.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-e6dd03d4.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-e6dd03d4 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-e6dd03d4 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-e6dd03d4 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-e6dd03d4 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-e6dd03d4 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-e6dd03d4 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-e6dd03d4.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-e6dd03d4 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-e6dd03d4 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-e6dd03d4.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-b30185e1{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-b30185e1 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-b30185e1{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;}.uagb-block-054607b6.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 224px;height: 300px;}.uagb-block-054607b6.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;}.uagb-block-a0382e85.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-a0382e85.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-a0382e85.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-a0382e85 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-a0382e85 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-a0382e85 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-a0382e85 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-a0382e85 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-a0382e85 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-a0382e85.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-a0382e85 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-a0382e85 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-a0382e85.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}}@media only screen and (max-width: 767px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-573dc06d{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-573dc06d > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 36px;}.wp-block-uagb-container.uagb-block-573dc06d{padding-top: 64px;padding-bottom: 64px;padding-left: 20px;padding-right: 20px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 36px;background-color: var(--ast-global-color-4);;}.uagb-block-7edef7ac.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-7edef7ac.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-7edef7ac .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-7edef7ac .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-7edef7ac .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-7edef7ac.uagb-infobox-icon-above-title{text-align: center;}.uagb-block-7edef7ac.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-13533f4b{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-13533f4b > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;flex-wrap: wrap;row-gap: 24px;}.wp-block-uagb-container.uagb-block-13533f4b{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;align-items: stretch;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-ae135cd8{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-ae135cd8 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-ae135cd8{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;flex-wrap: wrap;}.uagb-block-a6a9fd5f.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 400px;}.uagb-block-a6a9fd5f.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;}.uagb-block-82b9f747.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-82b9f747.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-82b9f747 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-82b9f747 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-82b9f747.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-82b9f747 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-82b9f747 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-82b9f747 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-82b9f747 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-82b9f747.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-82b9f747 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-82b9f747 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-82b9f747.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-3bd77aa2{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-3bd77aa2 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-3bd77aa2{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;flex-wrap: wrap;}.uagb-block-a0bdf96c.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 400px;}.uagb-block-a0bdf96c.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;}.uagb-block-e6dd03d4.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-e6dd03d4.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-e6dd03d4 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-e6dd03d4 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-e6dd03d4.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-e6dd03d4 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-e6dd03d4 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-e6dd03d4 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-e6dd03d4 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-e6dd03d4.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-e6dd03d4 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-e6dd03d4 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-e6dd03d4.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-b30185e1{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-b30185e1 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-b30185e1{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;flex-wrap: wrap;}.uagb-block-054607b6.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 400px;}.uagb-block-054607b6.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;}.uagb-block-a0382e85.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-a0382e85.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-a0382e85 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-a0382e85 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-a0382e85.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-a0382e85 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-a0382e85 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-a0382e85 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-a0382e85 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-a0382e85.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-a0382e85 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-a0382e85 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-a0382e85.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}}";s:7:"content";s:3377:"
<div class="wp-block-uagb-container uagb-block-573dc06d alignfull uagb-is-root-container"><div class="uagb-container-inner-blocks-wrap">
<div class="wp-block-uagb-info-box uagb-block-7edef7ac uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h2 class="uagb-ifb-title">Meet Our Talented Team</h2></div><p class="uagb-ifb-desc">Our passionate and dedicated team brings together a diverse range of skills and expertise to deliver exceptional results. From creative visionaries to meticulous strategists, we work seamlessly together to meet and exceed our clients' expectations.</p></div></div>



<div class="wp-block-uagb-container uagb-block-13533f4b">
<div class="wp-block-uagb-container uagb-block-ae135cd8">
<div class="wp-block-uagb-image alignleft uagb-block-a6a9fd5f wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-left"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/09/team-skip-01.jpg " sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/09/team-skip-01.jpg" alt="" class="uag-image-77912" width="368" height="460" title="" loading="lazy"/></figure></div>



<div class="wp-block-uagb-info-box uagb-block-82b9f747 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h5 class="uagb-ifb-title">Jane Cooper</h5></div><p class="uagb-ifb-desc">CEO</p></div></div>
</div>



<div class="wp-block-uagb-container uagb-block-3bd77aa2">
<div class="wp-block-uagb-image uagb-block-a0bdf96c wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-none"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/09/team-skip-24.jpg " sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/09/team-skip-24.jpg" alt="" class="uag-image-78344" width="368" height="460" title="" loading="lazy"/></figure></div>



<div class="wp-block-uagb-info-box uagb-block-e6dd03d4 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h5 class="uagb-ifb-title">Wade Warren</h5></div><p class="uagb-ifb-desc">Director</p></div></div>
</div>



<div class="wp-block-uagb-container uagb-block-b30185e1">
<div class="wp-block-uagb-image uagb-block-054607b6 wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-none"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/09/team-skip-03.jpg " sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/09/team-skip-03.jpg" alt="" class="uag-image-77914" width="368" height="460" title="" loading="lazy"/></figure></div>



<div class="wp-block-uagb-info-box uagb-block-a0382e85 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h5 class="uagb-ifb-title">Esther Howard</h5></div><p class="uagb-ifb-desc">Manager</p></div></div>
</div>
</div>
</div></div>
";}s:8:"id-77800";a:10:{s:5:"title";s:11:"Features 11";s:3:"url";s:50:"https://websitedemos.net/astra-blocks/features-11/";s:3:"tag";a:0:{}s:8:"category";i:919;s:16:"primary-category";s:0:"";s:4:"type";s:5:"block";s:12:"page-builder";s:9:"gutenberg";s:16:"required-plugins";a:0:{}s:10:"stylesheet";s:80701:".wp-block-uagb-container.uagb-is-root-container .uagb-block-0875eb55{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-0875eb55 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-0875eb55 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-0875eb55 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-0875eb55 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-0875eb55 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-0875eb55 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 48px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-0875eb55{box-shadow: 0px 0px   #00000070 ;padding-top: 112px;padding-bottom: 112px;padding-left: 40px;padding-right: 40px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 48px;column-gap: 0px;overflow: visible;border-color: inherit;background-color: var(--ast-global-color-4);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-abcd4e61{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-abcd4e61 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-abcd4e61 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-abcd4e61 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-abcd4e61 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-abcd4e61 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-abcd4e61 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: flex-start;justify-content: center;flex-wrap: nowrap;row-gap: 20px;column-gap: 72px;}.wp-block-uagb-container.uagb-block-abcd4e61{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 20px;column-gap: 72px;overflow: visible;border-color: inherit;flex-direction: row;align-items: flex-start;justify-content: center;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-abdc6ea4{max-width: 35%;width: 100%;}.wp-block-uagb-container.uagb-block-abdc6ea4 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-abdc6ea4 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-abdc6ea4 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-abdc6ea4 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-abdc6ea4 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-abdc6ea4 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 20px;column-gap: 20px;}.wp-block-uagb-container.uagb-block-abdc6ea4{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 20px;column-gap: 20px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-47b7c002 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-47b7c002 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-47b7c002 .uagb-ifb-icon svg{fill: #333;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-47b7c002 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-47b7c002 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-47b7c002 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-47b7c002 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-47b7c002 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-47b7c002 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-47b7c002.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-47b7c002 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{color: var(--ast-global-color-2);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-47b7c002.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-47b7c002.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-47b7c002 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-47b7c002 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-47b7c002 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-47b7c002 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-47b7c002 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-47b7c002.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-47b7c002.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-47b7c002 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-47b7c002 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-47b7c002 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-52776d36{max-width: 65%;width: 100%;}.wp-block-uagb-container.uagb-block-52776d36 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-52776d36 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-52776d36 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-52776d36 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-52776d36 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-52776d36 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 20px;column-gap: 20px;}.wp-block-uagb-container.uagb-block-52776d36{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 20px;column-gap: 20px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-66b80bf0 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-66b80bf0 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-66b80bf0 .uagb-ifb-icon svg{fill: #333;}.uagb-block-66b80bf0.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-66b80bf0 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-66b80bf0 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-66b80bf0.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-66b80bf0.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-66b80bf0 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-66b80bf0 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-66b80bf0 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-66b80bf0 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-66b80bf0.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-66b80bf0.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-66b80bf0.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-66b80bf0.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-66b80bf0 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{color: #612af7;margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-66b80bf0.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-66b80bf0.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-66b80bf0 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-66b80bf0 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-66b80bf0 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-66b80bf0 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-66b80bf0.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-66b80bf0.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-66b80bf0 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-66b80bf0.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-66b80bf0.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-66b80bf0 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-66b80bf0.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-66b80bf0 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-66b80bf0 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-66b80bf0.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-9eb3f23e{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-9eb3f23e .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-9eb3f23e .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-9eb3f23e .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-9eb3f23e .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-9eb3f23e .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-9eb3f23e > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 24px;}.wp-block-uagb-container.uagb-block-9eb3f23e{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 24px;overflow: visible;border-color: inherit;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-b9e7fc0e{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-b9e7fc0e .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-b9e7fc0e .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-b9e7fc0e .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-b9e7fc0e .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-b9e7fc0e .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-b9e7fc0e > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;row-gap: 24px;column-gap: 24px;}.wp-block-uagb-container.uagb-block-b9e7fc0e{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 24px;column-gap: 24px;overflow: visible;border-color: inherit;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-00d358af{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-00d358af .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-00d358af .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-00d358af .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-00d358af .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-00d358af .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-00d358af > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-00d358af{box-shadow: 0px 0px   #00000070 ;padding-top: 32px;padding-bottom: 32px;padding-left: 32px;padding-right: 32px;margin-top:  !important;margin-bottom:  !important;row-gap: 0px;column-gap: 0px;overflow: visible;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-color: inherit;background-color: var(--ast-global-color-5);;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-aee69c7a .uagb-ifb-icon{width: 20px;line-height: 20px;}.uagb-block-aee69c7a .uagb-ifb-icon > span{font-size: 20px;width: 20px;line-height: 20px;color: var(--ast-global-color-2);}.uagb-block-aee69c7a .uagb-ifb-icon svg{fill: var(--ast-global-color-2);}.uagb-block-aee69c7a.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 20px;height: 20px;line-height: 20px;font-size: 20px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-aee69c7a .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 20px;font-size: 20px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-aee69c7a .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 20px;height: 20px;line-height: 20px;padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-aee69c7a.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-aee69c7a.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-aee69c7a .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 20px;line-height: 20px;font-size: 20px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-aee69c7a .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 20px;line-height: 20px;font-size: 20px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-aee69c7a .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-aee69c7a .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-aee69c7a.uagb-infobox__content-wrap img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;border-radius: 0px;}.uagb-block-aee69c7a.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;border-radius: 0px;}.uagb-block-aee69c7a.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;border-radius: 0px;}.uagb-block-aee69c7a.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;border-radius: 0px;}.uagb-block-aee69c7a .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-aee69c7a.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 16px;margin-top: 20px;margin-left: 0px;margin-right: 0px;}.uagb-block-aee69c7a.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-aee69c7a .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-aee69c7a .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-aee69c7a .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-aee69c7a .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-aee69c7a.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-aee69c7a.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-aee69c7a .uagb-iconbox-icon-wrap.uagb-infobox-shape-circle{background-color: var(--ast-global-color-4);border-radius: 50%;}.uagb-block-aee69c7a .uagb-iconbox-icon-wrap.uagb-infobox-shape-squre{background-color: var(--ast-global-color-4);}.uagb-block-aee69c7a .uagb-iconbox-icon-wrap:hover{background-color:  !important;}.uagb-block-aee69c7a .uagb-infobox__content-wrap{text-align: left;}.uagb-block-aee69c7a.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-aee69c7a.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-aee69c7a .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-aee69c7a.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-aee69c7a .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-aee69c7a .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-aee69c7a.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-f4941fce{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-f4941fce .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-f4941fce .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-f4941fce .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-f4941fce .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-f4941fce .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-f4941fce > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-f4941fce{box-shadow: 0px 0px   #00000070 ;padding-top: 32px;padding-bottom: 32px;padding-left: 32px;padding-right: 32px;margin-top:  !important;margin-bottom:  !important;row-gap: 0px;column-gap: 0px;overflow: visible;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-color: inherit;background-color: var(--ast-global-color-5);;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-9bed4bc2 .uagb-ifb-icon{width: 20px;line-height: 20px;}.uagb-block-9bed4bc2 .uagb-ifb-icon > span{font-size: 20px;width: 20px;line-height: 20px;color: var(--ast-global-color-2);}.uagb-block-9bed4bc2 .uagb-ifb-icon svg{fill: var(--ast-global-color-2);}.uagb-block-9bed4bc2.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 20px;height: 20px;line-height: 20px;font-size: 20px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-9bed4bc2 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 20px;font-size: 20px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-9bed4bc2 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 20px;height: 20px;line-height: 20px;padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-9bed4bc2.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-9bed4bc2.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-9bed4bc2 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 20px;line-height: 20px;font-size: 20px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-9bed4bc2 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 20px;line-height: 20px;font-size: 20px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-9bed4bc2 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-9bed4bc2 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-9bed4bc2.uagb-infobox__content-wrap img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;border-radius: 0px;}.uagb-block-9bed4bc2.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;border-radius: 0px;}.uagb-block-9bed4bc2.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;border-radius: 0px;}.uagb-block-9bed4bc2.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;border-radius: 0px;}.uagb-block-9bed4bc2 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-9bed4bc2.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 16px;margin-top: 20px;margin-left: 0px;margin-right: 0px;}.uagb-block-9bed4bc2.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-9bed4bc2 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-9bed4bc2 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-9bed4bc2 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-9bed4bc2 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-9bed4bc2.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-9bed4bc2.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-9bed4bc2 .uagb-iconbox-icon-wrap.uagb-infobox-shape-circle{background-color: var(--ast-global-color-4);border-radius: 50%;}.uagb-block-9bed4bc2 .uagb-iconbox-icon-wrap.uagb-infobox-shape-squre{background-color: var(--ast-global-color-4);}.uagb-block-9bed4bc2 .uagb-iconbox-icon-wrap:hover{background-color:  !important;}.uagb-block-9bed4bc2 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-9bed4bc2.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-9bed4bc2.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-9bed4bc2 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-9bed4bc2.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-9bed4bc2 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-9bed4bc2 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-9bed4bc2.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-6bd0974d{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-6bd0974d .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-6bd0974d .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-6bd0974d .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-6bd0974d .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-6bd0974d .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-6bd0974d > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;row-gap: 24px;column-gap: 24px;}.wp-block-uagb-container.uagb-block-6bd0974d{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 24px;column-gap: 24px;overflow: visible;border-color: inherit;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-0a904b1c{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-0a904b1c .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-0a904b1c .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-0a904b1c .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-0a904b1c .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-0a904b1c .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-0a904b1c > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-0a904b1c{box-shadow: 0px 0px   #00000070 ;padding-top: 32px;padding-bottom: 32px;padding-left: 32px;padding-right: 32px;margin-top:  !important;margin-bottom:  !important;row-gap: 0px;column-gap: 0px;overflow: visible;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-color: inherit;background-color: var(--ast-global-color-5);;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-e170ec55 .uagb-ifb-icon{width: 20px;line-height: 20px;}.uagb-block-e170ec55 .uagb-ifb-icon > span{font-size: 20px;width: 20px;line-height: 20px;color: var(--ast-global-color-2);}.uagb-block-e170ec55 .uagb-ifb-icon svg{fill: var(--ast-global-color-2);}.uagb-block-e170ec55.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 20px;height: 20px;line-height: 20px;font-size: 20px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-e170ec55 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 20px;font-size: 20px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-e170ec55 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 20px;height: 20px;line-height: 20px;padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-e170ec55.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-e170ec55.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-e170ec55 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 20px;line-height: 20px;font-size: 20px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-e170ec55 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 20px;line-height: 20px;font-size: 20px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-e170ec55 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-e170ec55 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-e170ec55.uagb-infobox__content-wrap img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;border-radius: 0px;}.uagb-block-e170ec55.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;border-radius: 0px;}.uagb-block-e170ec55.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;border-radius: 0px;}.uagb-block-e170ec55.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;border-radius: 0px;}.uagb-block-e170ec55 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-e170ec55.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 16px;margin-top: 20px;margin-left: 0px;margin-right: 0px;}.uagb-block-e170ec55.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-e170ec55 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-e170ec55 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-e170ec55 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-e170ec55 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-e170ec55.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-e170ec55.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-e170ec55 .uagb-iconbox-icon-wrap.uagb-infobox-shape-circle{background-color: var(--ast-global-color-4);border-radius: 50%;}.uagb-block-e170ec55 .uagb-iconbox-icon-wrap.uagb-infobox-shape-squre{background-color: var(--ast-global-color-4);}.uagb-block-e170ec55 .uagb-iconbox-icon-wrap:hover{background-color:  !important;}.uagb-block-e170ec55 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-e170ec55.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-e170ec55.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-e170ec55 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-e170ec55.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-e170ec55 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-e170ec55 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-e170ec55.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-3d76f5b1{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-3d76f5b1 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-3d76f5b1 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-3d76f5b1 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-3d76f5b1 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-3d76f5b1 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-3d76f5b1 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-3d76f5b1{box-shadow: 0px 0px   #00000070 ;padding-top: 32px;padding-bottom: 32px;padding-left: 32px;padding-right: 32px;margin-top:  !important;margin-bottom:  !important;row-gap: 0px;column-gap: 0px;overflow: visible;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-color: inherit;background-color: var(--ast-global-color-5);;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-ead7767b .uagb-ifb-icon{width: 20px;line-height: 20px;}.uagb-block-ead7767b .uagb-ifb-icon > span{font-size: 20px;width: 20px;line-height: 20px;color: var(--ast-global-color-2);}.uagb-block-ead7767b .uagb-ifb-icon svg{fill: var(--ast-global-color-2);}.uagb-block-ead7767b.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 20px;height: 20px;line-height: 20px;font-size: 20px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-ead7767b .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 20px;font-size: 20px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-ead7767b .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 20px;height: 20px;line-height: 20px;padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-ead7767b.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-ead7767b.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-ead7767b .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 20px;line-height: 20px;font-size: 20px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-ead7767b .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 20px;line-height: 20px;font-size: 20px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-ead7767b .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-ead7767b .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-ead7767b.uagb-infobox__content-wrap img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;border-radius: 0px;}.uagb-block-ead7767b.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;border-radius: 0px;}.uagb-block-ead7767b.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;border-radius: 0px;}.uagb-block-ead7767b.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;border-radius: 0px;}.uagb-block-ead7767b .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-ead7767b.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 16px;margin-top: 20px;margin-left: 0px;margin-right: 0px;}.uagb-block-ead7767b.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-ead7767b .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-ead7767b .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-ead7767b .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-ead7767b .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-ead7767b.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-ead7767b.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-ead7767b .uagb-iconbox-icon-wrap.uagb-infobox-shape-circle{background-color: var(--ast-global-color-4);border-radius: 50%;}.uagb-block-ead7767b .uagb-iconbox-icon-wrap.uagb-infobox-shape-squre{background-color: var(--ast-global-color-4);}.uagb-block-ead7767b .uagb-iconbox-icon-wrap:hover{background-color:  !important;}.uagb-block-ead7767b .uagb-infobox__content-wrap{text-align: left;}.uagb-block-ead7767b.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-ead7767b.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-ead7767b .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-ead7767b.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-ead7767b .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-ead7767b .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-ead7767b.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}@media only screen and (max-width: 976px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-0875eb55{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-0875eb55 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;align-items: flex-start;row-gap: 40px;column-gap: 40px;}.wp-block-uagb-container.uagb-block-0875eb55{padding-top: 80px;padding-bottom: 80px;padding-left: 32px;padding-right: 32px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 40px;column-gap: 40px;background-color: var(--ast-global-color-4);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-abcd4e61{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-abcd4e61 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;column-gap: 40px;}.wp-block-uagb-container.uagb-block-abcd4e61{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;column-gap: 40px;align-items: stretch;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-abdc6ea4{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-abdc6ea4 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-abdc6ea4{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;}.uagb-block-47b7c002.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-47b7c002.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-47b7c002 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-47b7c002 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-47b7c002 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-47b7c002 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-47b7c002 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-47b7c002.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-47b7c002 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-47b7c002 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-47b7c002 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-52776d36{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-52776d36 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-52776d36{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;}.uagb-block-66b80bf0.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-66b80bf0.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-66b80bf0.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-66b80bf0.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-66b80bf0.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-66b80bf0 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-66b80bf0 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-66b80bf0 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-66b80bf0 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-66b80bf0 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-66b80bf0.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-66b80bf0 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-66b80bf0.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-66b80bf0 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-66b80bf0 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-66b80bf0.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-9eb3f23e{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-9eb3f23e > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: stretch;row-gap: 24px;column-gap: 24px;}.wp-block-uagb-container.uagb-block-9eb3f23e{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 24px;flex-direction: column;align-items: stretch;}.wp-block-uagb-container.uagb-block-9eb3f23e.wp-block-uagb-container > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-uagb-image ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not( .spectra-container-link-overlay ):not(.spectra-image-gallery__control-lightbox):not(.wp-block-uagb-lottie):not(.uagb-container-inner-blocks-wrap){width: 100%;}.wp-block-uagb-container.uagb-block-9eb3f23e.wp-block-uagb-container > .uagb-container-inner-blocks-wrap > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not(.spectra-image-gallery__control-lightbox){width: 100%;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-b9e7fc0e{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-b9e7fc0e > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;}.wp-block-uagb-container.uagb-block-b9e7fc0e{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;align-items: stretch;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-00d358af{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-00d358af > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-00d358af{padding-top: 24px;padding-bottom: 24px;padding-left: 24px;padding-right: 24px;margin-top:  !important;margin-bottom:  !important;background-color: var(--ast-global-color-5);;}.uagb-block-aee69c7a.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 20px;margin-left: 0px;margin-right: 0px;}.uagb-block-aee69c7a.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-aee69c7a.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 14px;height: 14px;line-height: 14px;font-size: 14px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-aee69c7a.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 14px;font-size: 14px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-aee69c7a.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-aee69c7a.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-aee69c7a.uagb-infobox__content-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-aee69c7a .uagb-ifb-content > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-aee69c7a .uagb-infobox-icon-right:hover > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-aee69c7a .uagb-infobox-icon-left:hover > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-aee69c7a.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-aee69c7a.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-aee69c7a .uagb-ifb-icon{width: 14px;line-height: 14px;}.uagb-block-aee69c7a .uagb-ifb-icon > span{font-size: 14px;width: 14px;line-height: 14px;}.uagb-block-aee69c7a .uagb-iconbox-icon-wrap{width: 14px;height: 14px;line-height: 14px;}.uagb-block-aee69c7a .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 14px;line-height: 14px;font-size: 14px;}.uagb-block-aee69c7a .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 14px;line-height: 14px;font-size: 14px;}.uagb-block-aee69c7a.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-aee69c7a .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-aee69c7a.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-aee69c7a .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-aee69c7a .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-aee69c7a.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-f4941fce{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-f4941fce > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-f4941fce{padding-top: 24px;padding-bottom: 24px;padding-left: 24px;padding-right: 24px;margin-top:  !important;margin-bottom:  !important;background-color: var(--ast-global-color-5);;}.uagb-block-9bed4bc2.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 20px;margin-left: 0px;margin-right: 0px;}.uagb-block-9bed4bc2.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-9bed4bc2.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 14px;height: 14px;line-height: 14px;font-size: 14px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-9bed4bc2.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 14px;font-size: 14px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-9bed4bc2.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-9bed4bc2.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-9bed4bc2.uagb-infobox__content-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-9bed4bc2 .uagb-ifb-content > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-9bed4bc2 .uagb-infobox-icon-right:hover > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-9bed4bc2 .uagb-infobox-icon-left:hover > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-9bed4bc2.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-9bed4bc2.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-9bed4bc2 .uagb-ifb-icon{width: 14px;line-height: 14px;}.uagb-block-9bed4bc2 .uagb-ifb-icon > span{font-size: 14px;width: 14px;line-height: 14px;}.uagb-block-9bed4bc2 .uagb-iconbox-icon-wrap{width: 14px;height: 14px;line-height: 14px;}.uagb-block-9bed4bc2 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 14px;line-height: 14px;font-size: 14px;}.uagb-block-9bed4bc2 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 14px;line-height: 14px;font-size: 14px;}.uagb-block-9bed4bc2.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-9bed4bc2 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-9bed4bc2.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-9bed4bc2 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-9bed4bc2 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-9bed4bc2.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-6bd0974d{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-6bd0974d > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;}.wp-block-uagb-container.uagb-block-6bd0974d{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;align-items: stretch;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-0a904b1c{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-0a904b1c > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-0a904b1c{padding-top: 24px;padding-bottom: 24px;padding-left: 24px;padding-right: 24px;margin-top:  !important;margin-bottom:  !important;background-color: var(--ast-global-color-5);;}.uagb-block-e170ec55.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 20px;margin-left: 0px;margin-right: 0px;}.uagb-block-e170ec55.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-e170ec55.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 14px;height: 14px;line-height: 14px;font-size: 14px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-e170ec55.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 14px;font-size: 14px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-e170ec55.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-e170ec55.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-e170ec55.uagb-infobox__content-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-e170ec55 .uagb-ifb-content > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-e170ec55 .uagb-infobox-icon-right:hover > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-e170ec55 .uagb-infobox-icon-left:hover > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-e170ec55.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-e170ec55.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-e170ec55 .uagb-ifb-icon{width: 14px;line-height: 14px;}.uagb-block-e170ec55 .uagb-ifb-icon > span{font-size: 14px;width: 14px;line-height: 14px;}.uagb-block-e170ec55 .uagb-iconbox-icon-wrap{width: 14px;height: 14px;line-height: 14px;}.uagb-block-e170ec55 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 14px;line-height: 14px;font-size: 14px;}.uagb-block-e170ec55 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 14px;line-height: 14px;font-size: 14px;}.uagb-block-e170ec55.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-e170ec55 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-e170ec55.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-e170ec55 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-e170ec55 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-e170ec55.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-3d76f5b1{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-3d76f5b1 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-3d76f5b1{padding-top: 24px;padding-bottom: 24px;padding-left: 24px;padding-right: 24px;margin-top:  !important;margin-bottom:  !important;background-color: var(--ast-global-color-5);;}.uagb-block-ead7767b.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 20px;margin-left: 0px;margin-right: 0px;}.uagb-block-ead7767b.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-ead7767b.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 14px;height: 14px;line-height: 14px;font-size: 14px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-ead7767b.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 14px;font-size: 14px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-ead7767b.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-ead7767b.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-ead7767b.uagb-infobox__content-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-ead7767b .uagb-ifb-content > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-ead7767b .uagb-infobox-icon-right:hover > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-ead7767b .uagb-infobox-icon-left:hover > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-ead7767b.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-ead7767b.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-ead7767b .uagb-ifb-icon{width: 14px;line-height: 14px;}.uagb-block-ead7767b .uagb-ifb-icon > span{font-size: 14px;width: 14px;line-height: 14px;}.uagb-block-ead7767b .uagb-iconbox-icon-wrap{width: 14px;height: 14px;line-height: 14px;}.uagb-block-ead7767b .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 14px;line-height: 14px;font-size: 14px;}.uagb-block-ead7767b .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 14px;line-height: 14px;font-size: 14px;}.uagb-block-ead7767b.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-ead7767b .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-ead7767b.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-ead7767b .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-ead7767b .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-ead7767b.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}}@media only screen and (max-width: 767px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-0875eb55{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-0875eb55 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;flex-wrap: wrap;row-gap: 36px;}.wp-block-uagb-container.uagb-block-0875eb55{padding-top: 64px;padding-bottom: 64px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 36px;background-color: var(--ast-global-color-4);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-abcd4e61{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-abcd4e61 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;flex-wrap: wrap;row-gap: 12px;}.wp-block-uagb-container.uagb-block-abcd4e61{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 12px;align-items: stretch;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-abdc6ea4{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-abdc6ea4 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-abdc6ea4{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;flex-wrap: wrap;}.uagb-block-47b7c002.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-47b7c002.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-47b7c002 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-47b7c002 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-47b7c002 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-47b7c002 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-47b7c002 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-47b7c002.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-47b7c002 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-47b7c002 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-47b7c002 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-52776d36{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-52776d36 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-52776d36{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;flex-wrap: wrap;}.uagb-block-66b80bf0.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-66b80bf0.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-66b80bf0.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-66b80bf0.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-66b80bf0 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-66b80bf0 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-66b80bf0.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-66b80bf0 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-66b80bf0 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-66b80bf0 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-66b80bf0.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-66b80bf0 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-66b80bf0.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-66b80bf0 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-66b80bf0 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-66b80bf0.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-9eb3f23e{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-9eb3f23e > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;flex-wrap: wrap;row-gap: 24px;}.wp-block-uagb-container.uagb-block-9eb3f23e{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;align-items: stretch;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-b9e7fc0e{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-b9e7fc0e > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-b9e7fc0e{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;align-items: stretch;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-00d358af{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-00d358af > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-00d358af{padding-top: 32px;padding-bottom: 32px;padding-left: 32px;padding-right: 32px;margin-top:  !important;margin-bottom:  !important;background-color: var(--ast-global-color-5);;flex-wrap: wrap;}.uagb-block-aee69c7a.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 20px;margin-left: 0px;margin-right: 0px;}.uagb-block-aee69c7a.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-aee69c7a.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 14px;height: 14px;line-height: 14px;font-size: 14px;}.uagb-block-aee69c7a.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 14px;font-size: 14px;}.uagb-block-aee69c7a .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 14px;line-height: 14px;font-size: 14px;}.uagb-block-aee69c7a .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 14px;line-height: 14px;font-size: 14px;}.uagb-block-aee69c7a.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-aee69c7a .uagb-ifb-icon{width: 14px;line-height: 14px;}.uagb-block-aee69c7a .uagb-ifb-icon > span{font-size: 14px;width: 14px;line-height: 14px;}.uagb-block-aee69c7a .uagb-iconbox-icon-wrap{width: 14px;height: 14px;line-height: 14px;}.uagb-block-aee69c7a.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-aee69c7a .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-aee69c7a.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-aee69c7a .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-aee69c7a .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-aee69c7a.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-f4941fce{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-f4941fce > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-f4941fce{padding-top: 32px;padding-bottom: 32px;padding-left: 32px;padding-right: 32px;margin-top:  !important;margin-bottom:  !important;background-color: var(--ast-global-color-5);;flex-wrap: wrap;}.uagb-block-9bed4bc2.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 20px;margin-left: 0px;margin-right: 0px;}.uagb-block-9bed4bc2.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-9bed4bc2.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 14px;height: 14px;line-height: 14px;font-size: 14px;}.uagb-block-9bed4bc2.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 14px;font-size: 14px;}.uagb-block-9bed4bc2 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 14px;line-height: 14px;font-size: 14px;}.uagb-block-9bed4bc2 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 14px;line-height: 14px;font-size: 14px;}.uagb-block-9bed4bc2.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-9bed4bc2 .uagb-ifb-icon{width: 14px;line-height: 14px;}.uagb-block-9bed4bc2 .uagb-ifb-icon > span{font-size: 14px;width: 14px;line-height: 14px;}.uagb-block-9bed4bc2 .uagb-iconbox-icon-wrap{width: 14px;height: 14px;line-height: 14px;}.uagb-block-9bed4bc2.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-9bed4bc2 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-9bed4bc2.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-9bed4bc2 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-9bed4bc2 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-9bed4bc2.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-6bd0974d{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-6bd0974d > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-6bd0974d{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;align-items: stretch;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-0a904b1c{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-0a904b1c > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-0a904b1c{padding-top: 32px;padding-bottom: 32px;padding-left: 32px;padding-right: 32px;margin-top:  !important;margin-bottom:  !important;background-color: var(--ast-global-color-5);;flex-wrap: wrap;}.uagb-block-e170ec55.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 20px;margin-left: 0px;margin-right: 0px;}.uagb-block-e170ec55.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-e170ec55.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 14px;height: 14px;line-height: 14px;font-size: 14px;}.uagb-block-e170ec55.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 14px;font-size: 14px;}.uagb-block-e170ec55 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 14px;line-height: 14px;font-size: 14px;}.uagb-block-e170ec55 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 14px;line-height: 14px;font-size: 14px;}.uagb-block-e170ec55.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-e170ec55 .uagb-ifb-icon{width: 14px;line-height: 14px;}.uagb-block-e170ec55 .uagb-ifb-icon > span{font-size: 14px;width: 14px;line-height: 14px;}.uagb-block-e170ec55 .uagb-iconbox-icon-wrap{width: 14px;height: 14px;line-height: 14px;}.uagb-block-e170ec55.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-e170ec55 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-e170ec55.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-e170ec55 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-e170ec55 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-e170ec55.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-3d76f5b1{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-3d76f5b1 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-3d76f5b1{padding-top: 32px;padding-bottom: 32px;padding-left: 32px;padding-right: 32px;margin-top:  !important;margin-bottom:  !important;background-color: var(--ast-global-color-5);;flex-wrap: wrap;}.uagb-block-ead7767b.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 20px;margin-left: 0px;margin-right: 0px;}.uagb-block-ead7767b.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-ead7767b.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 14px;height: 14px;line-height: 14px;font-size: 14px;}.uagb-block-ead7767b.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 14px;font-size: 14px;}.uagb-block-ead7767b .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 14px;line-height: 14px;font-size: 14px;}.uagb-block-ead7767b .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 14px;line-height: 14px;font-size: 14px;}.uagb-block-ead7767b.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-ead7767b .uagb-ifb-icon{width: 14px;line-height: 14px;}.uagb-block-ead7767b .uagb-ifb-icon > span{font-size: 14px;width: 14px;line-height: 14px;}.uagb-block-ead7767b .uagb-iconbox-icon-wrap{width: 14px;height: 14px;line-height: 14px;}.uagb-block-ead7767b.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-ead7767b .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-ead7767b.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-ead7767b .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-ead7767b .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-ead7767b.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}}";s:7:"content";s:4845:"
<div class="wp-block-uagb-container uagb-block-0875eb55 alignfull uagb-is-root-container"><div class="uagb-container-inner-blocks-wrap">
<div class="wp-block-uagb-container uagb-block-abcd4e61">
<div class="wp-block-uagb-container uagb-block-abdc6ea4">
<div class="wp-block-uagb-info-box uagb-block-47b7c002 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h6 class="uagb-ifb-title-prefix">Unleash the Power</h6></div></div></div>
</div>



<div class="wp-block-uagb-container uagb-block-52776d36">
<div class="wp-block-uagb-info-box uagb-block-66b80bf0 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h4 class="uagb-ifb-title">Innovative Solutions for Modern Challenges</h4></div></div></div>
</div>
</div>



<div class="wp-block-uagb-container uagb-block-9eb3f23e">
<div class="wp-block-uagb-container uagb-block-b9e7fc0e">
<div class="wp-block-uagb-container uagb-block-00d358af">
<div class="wp-block-uagb-info-box uagb-block-aee69c7a uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-icon-wrap"><div class="uagb-iconbox-icon-wrap uagb-infobox-shape-circle"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 448 512"><path d="M438.6 105.4C451.1 117.9 451.1 138.1 438.6 150.6L182.6 406.6C170.1 419.1 149.9 419.1 137.4 406.6L9.372 278.6C-3.124 266.1-3.124 245.9 9.372 233.4C21.87 220.9 42.13 220.9 54.63 233.4L159.1 338.7L393.4 105.4C405.9 92.88 426.1 92.88 438.6 105.4H438.6z"></path></svg></div></div><div class="uagb-ifb-title-wrap"><h5 class="uagb-ifb-title">Feature 1</h5></div><p class="uagb-ifb-desc">This is a flexible section where you can share anything you want. It could be details or some information about feature one.</p></div></div>
</div>



<div class="wp-block-uagb-container uagb-block-f4941fce">
<div class="wp-block-uagb-info-box uagb-block-9bed4bc2 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-icon-wrap"><div class="uagb-iconbox-icon-wrap uagb-infobox-shape-circle"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 448 512"><path d="M438.6 105.4C451.1 117.9 451.1 138.1 438.6 150.6L182.6 406.6C170.1 419.1 149.9 419.1 137.4 406.6L9.372 278.6C-3.124 266.1-3.124 245.9 9.372 233.4C21.87 220.9 42.13 220.9 54.63 233.4L159.1 338.7L393.4 105.4C405.9 92.88 426.1 92.88 438.6 105.4H438.6z"></path></svg></div></div><div class="uagb-ifb-title-wrap"><h5 class="uagb-ifb-title">Feature 2</h5></div><p class="uagb-ifb-desc">This is a flexible section where you can share anything you want. It could be details or some information about feature two.</p></div></div>
</div>
</div>



<div class="wp-block-uagb-container uagb-block-6bd0974d">
<div class="wp-block-uagb-container uagb-block-0a904b1c">
<div class="wp-block-uagb-info-box uagb-block-e170ec55 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-icon-wrap"><div class="uagb-iconbox-icon-wrap uagb-infobox-shape-circle"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 448 512"><path d="M438.6 105.4C451.1 117.9 451.1 138.1 438.6 150.6L182.6 406.6C170.1 419.1 149.9 419.1 137.4 406.6L9.372 278.6C-3.124 266.1-3.124 245.9 9.372 233.4C21.87 220.9 42.13 220.9 54.63 233.4L159.1 338.7L393.4 105.4C405.9 92.88 426.1 92.88 438.6 105.4H438.6z"></path></svg></div></div><div class="uagb-ifb-title-wrap"><h5 class="uagb-ifb-title">Feature 3</h5></div><p class="uagb-ifb-desc">This is a flexible section where you can share anything you want. It could be details or some information about feature three.</p></div></div>
</div>



<div class="wp-block-uagb-container uagb-block-3d76f5b1">
<div class="wp-block-uagb-info-box uagb-block-ead7767b uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-icon-wrap"><div class="uagb-iconbox-icon-wrap uagb-infobox-shape-circle"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 448 512"><path d="M438.6 105.4C451.1 117.9 451.1 138.1 438.6 150.6L182.6 406.6C170.1 419.1 149.9 419.1 137.4 406.6L9.372 278.6C-3.124 266.1-3.124 245.9 9.372 233.4C21.87 220.9 42.13 220.9 54.63 233.4L159.1 338.7L393.4 105.4C405.9 92.88 426.1 92.88 438.6 105.4H438.6z"></path></svg></div></div><div class="uagb-ifb-title-wrap"><h5 class="uagb-ifb-title">Feature 4</h5></div><p class="uagb-ifb-desc">This is a flexible section where you can share anything you want. It could be details or some information about feature four.</p></div></div>
</div>
</div>
</div>
</div></div>
";}s:8:"id-77784";a:10:{s:5:"title";s:11:"Features 10";s:3:"url";s:50:"https://websitedemos.net/astra-blocks/features-10/";s:3:"tag";a:0:{}s:8:"category";i:919;s:16:"primary-category";s:0:"";s:4:"type";s:5:"block";s:12:"page-builder";s:9:"gutenberg";s:16:"required-plugins";a:0:{}s:10:"stylesheet";s:68147:".wp-block-uagb-container.uagb-is-root-container .uagb-block-0875eb55{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-0875eb55 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-0875eb55 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-0875eb55 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-0875eb55 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-0875eb55 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-0875eb55 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 72px;}.wp-block-uagb-container.uagb-block-0875eb55{box-shadow: 0px 0px   #00000070 ;padding-top: 112px;padding-bottom: 112px;padding-left: 40px;padding-right: 40px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 72px;overflow: visible;border-color: inherit;background-color: var(--ast-global-color-4);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-abcd4e61{max-width: 35%;width: 100%;}.wp-block-uagb-container.uagb-block-abcd4e61 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-abcd4e61 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-abcd4e61 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-abcd4e61 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-abcd4e61 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-abcd4e61 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-abcd4e61{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 40px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-47b7c002 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-47b7c002 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-47b7c002 .uagb-ifb-icon svg{fill: #333;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-47b7c002 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-47b7c002 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-47b7c002 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-47b7c002 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-47b7c002 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-47b7c002 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-47b7c002.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-47b7c002 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{color: var(--ast-global-color-2);margin-bottom: 24px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-47b7c002.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-47b7c002.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-47b7c002 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-47b7c002 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-47b7c002 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-47b7c002 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-47b7c002 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-47b7c002.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-47b7c002.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-47b7c002 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-47b7c002 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-47b7c002 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-9eb3f23e{max-width: 65%;width: 100%;}.wp-block-uagb-container.uagb-block-9eb3f23e .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-9eb3f23e .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-9eb3f23e .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-9eb3f23e .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-9eb3f23e .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-9eb3f23e > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-9eb3f23e{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-f837bf6f{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-f837bf6f .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-f837bf6f .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-f837bf6f .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-f837bf6f .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-f837bf6f .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-f837bf6f > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 24px;}.wp-block-uagb-container.uagb-block-f837bf6f{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 24px;overflow: visible;border-color: inherit;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-3d76f5b1{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-block-3d76f5b1 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-3d76f5b1 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-3d76f5b1 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-3d76f5b1 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-3d76f5b1 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-3d76f5b1 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-3d76f5b1{box-shadow: 0px 0px   #00000070 ;padding-top: 48px;padding-bottom: 48px;padding-left: 48px;padding-right: 48px;margin-top:  !important;margin-bottom:  !important;row-gap: 0px;column-gap: 0px;overflow: visible;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-color: inherit;background-color: var(--ast-global-color-5);;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-ead7767b .uagb-ifb-icon{width: 20px;line-height: 20px;}.uagb-block-ead7767b .uagb-ifb-icon > span{font-size: 20px;width: 20px;line-height: 20px;color: var(--ast-global-color-2);}.uagb-block-ead7767b .uagb-ifb-icon svg{fill: var(--ast-global-color-2);}.uagb-block-ead7767b.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 20px;height: 20px;line-height: 20px;font-size: 20px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-ead7767b .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 20px;font-size: 20px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-ead7767b .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 20px;height: 20px;line-height: 20px;padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-ead7767b.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-ead7767b.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-ead7767b .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 20px;line-height: 20px;font-size: 20px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-ead7767b .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 20px;line-height: 20px;font-size: 20px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-ead7767b .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-ead7767b .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-ead7767b.uagb-infobox__content-wrap img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;border-radius: 0px;}.uagb-block-ead7767b.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;border-radius: 0px;}.uagb-block-ead7767b.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;border-radius: 0px;}.uagb-block-ead7767b.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;border-radius: 0px;}.uagb-block-ead7767b .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-ead7767b.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 16px;margin-top: 20px;margin-left: 0px;margin-right: 0px;}.uagb-block-ead7767b.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-ead7767b .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-ead7767b .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-ead7767b .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-ead7767b .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-ead7767b.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-ead7767b.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-ead7767b .uagb-iconbox-icon-wrap.uagb-infobox-shape-circle{background-color: var(--ast-global-color-4);border-radius: 50%;}.uagb-block-ead7767b .uagb-iconbox-icon-wrap.uagb-infobox-shape-squre{background-color: var(--ast-global-color-4);}.uagb-block-ead7767b .uagb-iconbox-icon-wrap:hover{background-color:  !important;}.uagb-block-ead7767b .uagb-infobox__content-wrap{text-align: left;}.uagb-block-ead7767b.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-ead7767b.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-ead7767b .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-ead7767b.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-ead7767b .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-ead7767b .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-ead7767b.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-3309ba02{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-block-3309ba02 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-3309ba02 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-3309ba02 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-3309ba02 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-3309ba02 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-3309ba02 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-3309ba02{box-shadow: 0px 0px   #00000070 ;padding-top: 48px;padding-bottom: 48px;padding-left: 48px;padding-right: 48px;margin-top:  !important;margin-bottom:  !important;row-gap: 0px;column-gap: 0px;overflow: visible;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-color: inherit;background-color: var(--ast-global-color-5);;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-f8c4a024 .uagb-ifb-icon{width: 20px;line-height: 20px;}.uagb-block-f8c4a024 .uagb-ifb-icon > span{font-size: 20px;width: 20px;line-height: 20px;color: var(--ast-global-color-2);}.uagb-block-f8c4a024 .uagb-ifb-icon svg{fill: var(--ast-global-color-2);}.uagb-block-f8c4a024.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 20px;height: 20px;line-height: 20px;font-size: 20px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-f8c4a024 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 20px;font-size: 20px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-f8c4a024 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 20px;height: 20px;line-height: 20px;padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-f8c4a024.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-f8c4a024.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-f8c4a024 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 20px;line-height: 20px;font-size: 20px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-f8c4a024 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 20px;line-height: 20px;font-size: 20px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-f8c4a024 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-f8c4a024 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-f8c4a024.uagb-infobox__content-wrap img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;border-radius: 0px;}.uagb-block-f8c4a024.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;border-radius: 0px;}.uagb-block-f8c4a024.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;border-radius: 0px;}.uagb-block-f8c4a024.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;border-radius: 0px;}.uagb-block-f8c4a024 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-f8c4a024.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 16px;margin-top: 20px;margin-left: 0px;margin-right: 0px;}.uagb-block-f8c4a024.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-f8c4a024 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-f8c4a024 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-f8c4a024 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-f8c4a024 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-f8c4a024.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-f8c4a024.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-f8c4a024 .uagb-iconbox-icon-wrap.uagb-infobox-shape-circle{background-color: var(--ast-global-color-4);border-radius: 50%;}.uagb-block-f8c4a024 .uagb-iconbox-icon-wrap.uagb-infobox-shape-squre{background-color: var(--ast-global-color-4);}.uagb-block-f8c4a024 .uagb-iconbox-icon-wrap:hover{background-color:  !important;}.uagb-block-f8c4a024 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-f8c4a024.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-f8c4a024.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-f8c4a024 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-f8c4a024.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-f8c4a024 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-f8c4a024 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-f8c4a024.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-93c870fe{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-93c870fe .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-93c870fe .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-93c870fe .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-93c870fe .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-93c870fe .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-93c870fe > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 24px;}.wp-block-uagb-container.uagb-block-93c870fe{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 24px;overflow: visible;border-color: inherit;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-0a904b1c{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-block-0a904b1c .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-0a904b1c .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-0a904b1c .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-0a904b1c .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-0a904b1c .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-0a904b1c > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-0a904b1c{box-shadow: 0px 0px   #00000070 ;padding-top: 48px;padding-bottom: 48px;padding-left: 48px;padding-right: 48px;margin-top:  !important;margin-bottom:  !important;row-gap: 0px;column-gap: 0px;overflow: visible;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-color: inherit;background-color: var(--ast-global-color-5);;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-e170ec55 .uagb-ifb-icon{width: 20px;line-height: 20px;}.uagb-block-e170ec55 .uagb-ifb-icon > span{font-size: 20px;width: 20px;line-height: 20px;color: var(--ast-global-color-2);}.uagb-block-e170ec55 .uagb-ifb-icon svg{fill: var(--ast-global-color-2);}.uagb-block-e170ec55.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 20px;height: 20px;line-height: 20px;font-size: 20px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-e170ec55 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 20px;font-size: 20px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-e170ec55 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 20px;height: 20px;line-height: 20px;padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-e170ec55.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-e170ec55.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-e170ec55 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 20px;line-height: 20px;font-size: 20px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-e170ec55 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 20px;line-height: 20px;font-size: 20px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-e170ec55 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-e170ec55 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-e170ec55.uagb-infobox__content-wrap img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;border-radius: 0px;}.uagb-block-e170ec55.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;border-radius: 0px;}.uagb-block-e170ec55.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;border-radius: 0px;}.uagb-block-e170ec55.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;border-radius: 0px;}.uagb-block-e170ec55 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-e170ec55.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 16px;margin-top: 20px;margin-left: 0px;margin-right: 0px;}.uagb-block-e170ec55.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-e170ec55 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-e170ec55 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-e170ec55 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-e170ec55 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-e170ec55.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-e170ec55.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-e170ec55 .uagb-iconbox-icon-wrap.uagb-infobox-shape-circle{background-color: var(--ast-global-color-4);border-radius: 50%;}.uagb-block-e170ec55 .uagb-iconbox-icon-wrap.uagb-infobox-shape-squre{background-color: var(--ast-global-color-4);}.uagb-block-e170ec55 .uagb-iconbox-icon-wrap:hover{background-color:  !important;}.uagb-block-e170ec55 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-e170ec55.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-e170ec55.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-e170ec55 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-e170ec55.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-e170ec55 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-e170ec55 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-e170ec55.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-f374e0ef{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-block-f374e0ef .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-f374e0ef .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-f374e0ef .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-f374e0ef .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-f374e0ef .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-f374e0ef > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-f374e0ef{box-shadow: 0px 0px   #00000070 ;padding-top: 48px;padding-bottom: 48px;padding-left: 48px;padding-right: 48px;margin-top:  !important;margin-bottom:  !important;row-gap: 0px;column-gap: 0px;overflow: visible;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-color: inherit;background-color: var(--ast-global-color-5);;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-f86e6c55 .uagb-ifb-icon{width: 20px;line-height: 20px;}.uagb-block-f86e6c55 .uagb-ifb-icon > span{font-size: 20px;width: 20px;line-height: 20px;color: var(--ast-global-color-2);}.uagb-block-f86e6c55 .uagb-ifb-icon svg{fill: var(--ast-global-color-2);}.uagb-block-f86e6c55.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 20px;height: 20px;line-height: 20px;font-size: 20px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-f86e6c55 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 20px;font-size: 20px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-f86e6c55 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 20px;height: 20px;line-height: 20px;padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-f86e6c55.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-f86e6c55.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-f86e6c55 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 20px;line-height: 20px;font-size: 20px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-f86e6c55 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 20px;line-height: 20px;font-size: 20px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-f86e6c55 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-f86e6c55 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-f86e6c55.uagb-infobox__content-wrap img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;border-radius: 0px;}.uagb-block-f86e6c55.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;border-radius: 0px;}.uagb-block-f86e6c55.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;border-radius: 0px;}.uagb-block-f86e6c55.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;border-radius: 0px;}.uagb-block-f86e6c55 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-f86e6c55.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 16px;margin-top: 20px;margin-left: 0px;margin-right: 0px;}.uagb-block-f86e6c55.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-f86e6c55 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-f86e6c55 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-f86e6c55 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-f86e6c55 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-f86e6c55.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-f86e6c55.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-f86e6c55 .uagb-iconbox-icon-wrap.uagb-infobox-shape-circle{background-color: var(--ast-global-color-4);border-radius: 50%;}.uagb-block-f86e6c55 .uagb-iconbox-icon-wrap.uagb-infobox-shape-squre{background-color: var(--ast-global-color-4);}.uagb-block-f86e6c55 .uagb-iconbox-icon-wrap:hover{background-color:  !important;}.uagb-block-f86e6c55 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-f86e6c55.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-f86e6c55.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-f86e6c55 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-f86e6c55.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-f86e6c55 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-f86e6c55 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-f86e6c55.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}@media only screen and (max-width: 976px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-0875eb55{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-0875eb55 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;column-gap: 40px;}.wp-block-uagb-container.uagb-block-0875eb55{padding-top: 80px;padding-bottom: 80px;padding-left: 32px;padding-right: 32px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;column-gap: 40px;background-color: var(--ast-global-color-4);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-abcd4e61{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-abcd4e61 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-abcd4e61{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;}.uagb-block-47b7c002 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 12px;}.uagb-block-47b7c002.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-47b7c002.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-47b7c002 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-47b7c002 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-47b7c002 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-47b7c002 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-47b7c002 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-47b7c002.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-47b7c002 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-47b7c002 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-47b7c002 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-9eb3f23e{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-9eb3f23e > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;align-items: center;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-9eb3f23e{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;align-items: center;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-f837bf6f{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-f837bf6f > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;row-gap: 0px;column-gap: 24px;}.wp-block-uagb-container.uagb-block-f837bf6f{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 24px;align-items: stretch;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-3d76f5b1{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-3d76f5b1 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-3d76f5b1{padding-top: 24px;padding-bottom: 24px;padding-left: 24px;padding-right: 24px;margin-top:  !important;margin-bottom:  !important;background-color: var(--ast-global-color-5);;}.uagb-block-ead7767b.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 20px;margin-left: 0px;margin-right: 0px;}.uagb-block-ead7767b.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-ead7767b.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 14px;height: 14px;line-height: 14px;font-size: 14px;padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-ead7767b.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 14px;font-size: 14px;padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-ead7767b.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-ead7767b.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-ead7767b.uagb-infobox__content-wrap > svg{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-ead7767b .uagb-ifb-content > svg{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-ead7767b .uagb-infobox-icon-right:hover > svg{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-ead7767b .uagb-infobox-icon-left:hover > svg{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-ead7767b.uagb-infobox__content-wrap img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-ead7767b.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-ead7767b .uagb-ifb-icon{width: 14px;line-height: 14px;}.uagb-block-ead7767b .uagb-ifb-icon > span{font-size: 14px;width: 14px;line-height: 14px;}.uagb-block-ead7767b .uagb-iconbox-icon-wrap{width: 14px;height: 14px;line-height: 14px;}.uagb-block-ead7767b .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 14px;line-height: 14px;font-size: 14px;}.uagb-block-ead7767b .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 14px;line-height: 14px;font-size: 14px;}.uagb-block-ead7767b.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-ead7767b .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-ead7767b.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-ead7767b .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-ead7767b .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-ead7767b.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-3309ba02{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-3309ba02 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-3309ba02{padding-top: 24px;padding-bottom: 24px;padding-left: 24px;padding-right: 24px;margin-top:  !important;margin-bottom:  !important;background-color: var(--ast-global-color-5);;}.uagb-block-f8c4a024.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 20px;margin-left: 0px;margin-right: 0px;}.uagb-block-f8c4a024.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-f8c4a024.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 14px;height: 14px;line-height: 14px;font-size: 14px;padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-f8c4a024.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 14px;font-size: 14px;padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-f8c4a024.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-f8c4a024.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-f8c4a024.uagb-infobox__content-wrap > svg{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-f8c4a024 .uagb-ifb-content > svg{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-f8c4a024 .uagb-infobox-icon-right:hover > svg{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-f8c4a024 .uagb-infobox-icon-left:hover > svg{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-f8c4a024.uagb-infobox__content-wrap img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-f8c4a024.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-f8c4a024 .uagb-ifb-icon{width: 14px;line-height: 14px;}.uagb-block-f8c4a024 .uagb-ifb-icon > span{font-size: 14px;width: 14px;line-height: 14px;}.uagb-block-f8c4a024 .uagb-iconbox-icon-wrap{width: 14px;height: 14px;line-height: 14px;}.uagb-block-f8c4a024 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 14px;line-height: 14px;font-size: 14px;}.uagb-block-f8c4a024 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 14px;line-height: 14px;font-size: 14px;}.uagb-block-f8c4a024.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-f8c4a024 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-f8c4a024.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-f8c4a024 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-f8c4a024 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-f8c4a024.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-93c870fe{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-93c870fe > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;row-gap: 0px;column-gap: 24px;}.wp-block-uagb-container.uagb-block-93c870fe{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 24px;align-items: stretch;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-0a904b1c{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-0a904b1c > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-0a904b1c{padding-top: 24px;padding-bottom: 24px;padding-left: 24px;padding-right: 24px;margin-top:  !important;margin-bottom:  !important;background-color: var(--ast-global-color-5);;}.uagb-block-e170ec55.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 20px;margin-left: 0px;margin-right: 0px;}.uagb-block-e170ec55.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-e170ec55.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 14px;height: 14px;line-height: 14px;font-size: 14px;padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-e170ec55.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 14px;font-size: 14px;padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-e170ec55.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-e170ec55.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-e170ec55.uagb-infobox__content-wrap > svg{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-e170ec55 .uagb-ifb-content > svg{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-e170ec55 .uagb-infobox-icon-right:hover > svg{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-e170ec55 .uagb-infobox-icon-left:hover > svg{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-e170ec55.uagb-infobox__content-wrap img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-e170ec55.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-e170ec55 .uagb-ifb-icon{width: 14px;line-height: 14px;}.uagb-block-e170ec55 .uagb-ifb-icon > span{font-size: 14px;width: 14px;line-height: 14px;}.uagb-block-e170ec55 .uagb-iconbox-icon-wrap{width: 14px;height: 14px;line-height: 14px;}.uagb-block-e170ec55 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 14px;line-height: 14px;font-size: 14px;}.uagb-block-e170ec55 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 14px;line-height: 14px;font-size: 14px;}.uagb-block-e170ec55.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-e170ec55 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-e170ec55.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-e170ec55 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-e170ec55 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-e170ec55.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-f374e0ef{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-f374e0ef > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-f374e0ef{padding-top: 24px;padding-bottom: 24px;padding-left: 24px;padding-right: 24px;margin-top:  !important;margin-bottom:  !important;background-color: var(--ast-global-color-5);;}.uagb-block-f86e6c55.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 20px;margin-left: 0px;margin-right: 0px;}.uagb-block-f86e6c55.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-f86e6c55.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 14px;height: 14px;line-height: 14px;font-size: 14px;padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-f86e6c55.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 14px;font-size: 14px;padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-f86e6c55.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-f86e6c55.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-f86e6c55.uagb-infobox__content-wrap > svg{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-f86e6c55 .uagb-ifb-content > svg{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-f86e6c55 .uagb-infobox-icon-right:hover > svg{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-f86e6c55 .uagb-infobox-icon-left:hover > svg{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-f86e6c55.uagb-infobox__content-wrap img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-f86e6c55.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-f86e6c55 .uagb-ifb-icon{width: 14px;line-height: 14px;}.uagb-block-f86e6c55 .uagb-ifb-icon > span{font-size: 14px;width: 14px;line-height: 14px;}.uagb-block-f86e6c55 .uagb-iconbox-icon-wrap{width: 14px;height: 14px;line-height: 14px;}.uagb-block-f86e6c55 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 14px;line-height: 14px;font-size: 14px;}.uagb-block-f86e6c55 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 14px;line-height: 14px;font-size: 14px;}.uagb-block-f86e6c55.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-f86e6c55 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-f86e6c55.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-f86e6c55 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-f86e6c55 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-f86e6c55.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}}@media only screen and (max-width: 767px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-0875eb55{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-0875eb55 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;flex-wrap: wrap;row-gap: 40px;}.wp-block-uagb-container.uagb-block-0875eb55{padding-top: 64px;padding-bottom: 64px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 40px;background-color: var(--ast-global-color-4);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-abcd4e61{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-abcd4e61 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-abcd4e61{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;flex-wrap: wrap;}.uagb-block-47b7c002 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 12px;}.uagb-block-47b7c002.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-47b7c002.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-47b7c002 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-47b7c002 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-47b7c002 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-47b7c002 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-47b7c002 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-47b7c002.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-47b7c002 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-47b7c002 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-47b7c002 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-9eb3f23e{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-9eb3f23e > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: center;flex-wrap: wrap;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-9eb3f23e{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;align-items: center;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-f837bf6f{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-f837bf6f > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;flex-wrap: wrap;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-f837bf6f{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;align-items: stretch;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-3d76f5b1{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-3d76f5b1 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-3d76f5b1{padding-top: 32px;padding-bottom: 32px;padding-left: 32px;padding-right: 32px;margin-top:  !important;margin-bottom:  !important;background-color: var(--ast-global-color-5);;flex-wrap: wrap;}.uagb-block-ead7767b.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 20px;margin-left: 0px;margin-right: 0px;}.uagb-block-ead7767b.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-ead7767b.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 14px;height: 14px;line-height: 14px;font-size: 14px;}.uagb-block-ead7767b.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 14px;font-size: 14px;}.uagb-block-ead7767b .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 14px;line-height: 14px;font-size: 14px;}.uagb-block-ead7767b .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 14px;line-height: 14px;font-size: 14px;}.uagb-block-ead7767b.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-ead7767b .uagb-ifb-icon{width: 14px;line-height: 14px;}.uagb-block-ead7767b .uagb-ifb-icon > span{font-size: 14px;width: 14px;line-height: 14px;}.uagb-block-ead7767b .uagb-iconbox-icon-wrap{width: 14px;height: 14px;line-height: 14px;}.uagb-block-ead7767b.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-ead7767b .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-ead7767b.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-ead7767b .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-ead7767b .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-ead7767b.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-3309ba02{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-3309ba02 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-3309ba02{padding-top: 32px;padding-bottom: 32px;padding-left: 32px;padding-right: 32px;margin-top:  !important;margin-bottom:  !important;background-color: var(--ast-global-color-5);;flex-wrap: wrap;}.uagb-block-f8c4a024.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 20px;margin-left: 0px;margin-right: 0px;}.uagb-block-f8c4a024.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-f8c4a024.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 14px;height: 14px;line-height: 14px;font-size: 14px;}.uagb-block-f8c4a024.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 14px;font-size: 14px;}.uagb-block-f8c4a024 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 14px;line-height: 14px;font-size: 14px;}.uagb-block-f8c4a024 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 14px;line-height: 14px;font-size: 14px;}.uagb-block-f8c4a024.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-f8c4a024 .uagb-ifb-icon{width: 14px;line-height: 14px;}.uagb-block-f8c4a024 .uagb-ifb-icon > span{font-size: 14px;width: 14px;line-height: 14px;}.uagb-block-f8c4a024 .uagb-iconbox-icon-wrap{width: 14px;height: 14px;line-height: 14px;}.uagb-block-f8c4a024.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-f8c4a024 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-f8c4a024.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-f8c4a024 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-f8c4a024 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-f8c4a024.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-93c870fe{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-93c870fe > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;flex-wrap: wrap;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-93c870fe{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;align-items: stretch;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-0a904b1c{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-0a904b1c > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-0a904b1c{padding-top: 32px;padding-bottom: 32px;padding-left: 32px;padding-right: 32px;margin-top:  !important;margin-bottom:  !important;background-color: var(--ast-global-color-5);;flex-wrap: wrap;}.uagb-block-e170ec55.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 20px;margin-left: 0px;margin-right: 0px;}.uagb-block-e170ec55.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-e170ec55.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 14px;height: 14px;line-height: 14px;font-size: 14px;}.uagb-block-e170ec55.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 14px;font-size: 14px;}.uagb-block-e170ec55 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 14px;line-height: 14px;font-size: 14px;}.uagb-block-e170ec55 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 14px;line-height: 14px;font-size: 14px;}.uagb-block-e170ec55.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-e170ec55 .uagb-ifb-icon{width: 14px;line-height: 14px;}.uagb-block-e170ec55 .uagb-ifb-icon > span{font-size: 14px;width: 14px;line-height: 14px;}.uagb-block-e170ec55 .uagb-iconbox-icon-wrap{width: 14px;height: 14px;line-height: 14px;}.uagb-block-e170ec55.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-e170ec55 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-e170ec55.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-e170ec55 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-e170ec55 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-e170ec55.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-f374e0ef{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-f374e0ef > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-f374e0ef{padding-top: 32px;padding-bottom: 32px;padding-left: 32px;padding-right: 32px;margin-top:  !important;margin-bottom:  !important;background-color: var(--ast-global-color-5);;flex-wrap: wrap;}.uagb-block-f86e6c55.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 20px;margin-left: 0px;margin-right: 0px;}.uagb-block-f86e6c55.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-f86e6c55.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 14px;height: 14px;line-height: 14px;font-size: 14px;}.uagb-block-f86e6c55.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 14px;font-size: 14px;}.uagb-block-f86e6c55 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 14px;line-height: 14px;font-size: 14px;}.uagb-block-f86e6c55 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 14px;line-height: 14px;font-size: 14px;}.uagb-block-f86e6c55.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-f86e6c55 .uagb-ifb-icon{width: 14px;line-height: 14px;}.uagb-block-f86e6c55 .uagb-ifb-icon > span{font-size: 14px;width: 14px;line-height: 14px;}.uagb-block-f86e6c55 .uagb-iconbox-icon-wrap{width: 14px;height: 14px;line-height: 14px;}.uagb-block-f86e6c55.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-f86e6c55 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-f86e6c55.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-f86e6c55 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-f86e6c55 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-f86e6c55.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}}";s:7:"content";s:4486:"
<div class="wp-block-uagb-container uagb-block-0875eb55 alignfull uagb-is-root-container"><div class="uagb-container-inner-blocks-wrap">
<div class="wp-block-uagb-container uagb-block-abcd4e61">
<div class="wp-block-uagb-info-box uagb-block-47b7c002 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h6 class="uagb-ifb-title-prefix">Unleash the Power</h6><h3 class="uagb-ifb-title">Innovative Solutions for Modern Challenges</h3></div></div></div>
</div>



<div class="wp-block-uagb-container uagb-block-9eb3f23e">
<div class="wp-block-uagb-container uagb-block-f837bf6f">
<div class="wp-block-uagb-container uagb-block-3d76f5b1">
<div class="wp-block-uagb-info-box uagb-block-ead7767b uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-icon-wrap"><div class="uagb-iconbox-icon-wrap uagb-infobox-shape-circle"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 448 512"><path d="M438.6 105.4C451.1 117.9 451.1 138.1 438.6 150.6L182.6 406.6C170.1 419.1 149.9 419.1 137.4 406.6L9.372 278.6C-3.124 266.1-3.124 245.9 9.372 233.4C21.87 220.9 42.13 220.9 54.63 233.4L159.1 338.7L393.4 105.4C405.9 92.88 426.1 92.88 438.6 105.4H438.6z"></path></svg></div></div><div class="uagb-ifb-title-wrap"><h5 class="uagb-ifb-title">Feature 1</h5></div><p class="uagb-ifb-desc">This is a flexible section where you can share anything you want. It could be details or some information about feature one.</p></div></div>
</div>



<div class="wp-block-uagb-container uagb-block-3309ba02">
<div class="wp-block-uagb-info-box uagb-block-f8c4a024 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-icon-wrap"><div class="uagb-iconbox-icon-wrap uagb-infobox-shape-circle"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 448 512"><path d="M438.6 105.4C451.1 117.9 451.1 138.1 438.6 150.6L182.6 406.6C170.1 419.1 149.9 419.1 137.4 406.6L9.372 278.6C-3.124 266.1-3.124 245.9 9.372 233.4C21.87 220.9 42.13 220.9 54.63 233.4L159.1 338.7L393.4 105.4C405.9 92.88 426.1 92.88 438.6 105.4H438.6z"></path></svg></div></div><div class="uagb-ifb-title-wrap"><h5 class="uagb-ifb-title">Feature 2</h5></div><p class="uagb-ifb-desc">This is a flexible section where you can share anything you want. It could be details or some information about feature two.</p></div></div>
</div>
</div>



<div class="wp-block-uagb-container uagb-block-93c870fe">
<div class="wp-block-uagb-container uagb-block-0a904b1c">
<div class="wp-block-uagb-info-box uagb-block-e170ec55 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-icon-wrap"><div class="uagb-iconbox-icon-wrap uagb-infobox-shape-circle"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 448 512"><path d="M438.6 105.4C451.1 117.9 451.1 138.1 438.6 150.6L182.6 406.6C170.1 419.1 149.9 419.1 137.4 406.6L9.372 278.6C-3.124 266.1-3.124 245.9 9.372 233.4C21.87 220.9 42.13 220.9 54.63 233.4L159.1 338.7L393.4 105.4C405.9 92.88 426.1 92.88 438.6 105.4H438.6z"></path></svg></div></div><div class="uagb-ifb-title-wrap"><h5 class="uagb-ifb-title">Feature 3</h5></div><p class="uagb-ifb-desc">This is a flexible section where you can share anything you want. It could be details or some information about feature three.</p></div></div>
</div>



<div class="wp-block-uagb-container uagb-block-f374e0ef">
<div class="wp-block-uagb-info-box uagb-block-f86e6c55 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-icon-wrap"><div class="uagb-iconbox-icon-wrap uagb-infobox-shape-circle"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 448 512"><path d="M438.6 105.4C451.1 117.9 451.1 138.1 438.6 150.6L182.6 406.6C170.1 419.1 149.9 419.1 137.4 406.6L9.372 278.6C-3.124 266.1-3.124 245.9 9.372 233.4C21.87 220.9 42.13 220.9 54.63 233.4L159.1 338.7L393.4 105.4C405.9 92.88 426.1 92.88 438.6 105.4H438.6z"></path></svg></div></div><div class="uagb-ifb-title-wrap"><h5 class="uagb-ifb-title">Feature 4</h5></div><p class="uagb-ifb-desc">This is a flexible section where you can share anything you want. It could be details or some information about feature four.</p></div></div>
</div>
</div>
</div>
</div></div>
";}s:8:"id-77725";a:10:{s:5:"title";s:11:"Features 09";s:3:"url";s:50:"https://websitedemos.net/astra-blocks/features-09/";s:3:"tag";a:0:{}s:8:"category";i:919;s:16:"primary-category";s:0:"";s:4:"type";s:5:"block";s:12:"page-builder";s:9:"gutenberg";s:16:"required-plugins";a:0:{}s:10:"stylesheet";s:49679:".wp-block-uagb-container.uagb-is-root-container .uagb-block-0875eb55{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-0875eb55 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-0875eb55 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-0875eb55 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-0875eb55 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-0875eb55 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-0875eb55 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 40px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-0875eb55{box-shadow: 0px 0px   #00000070 ;padding-top: 112px;padding-bottom: 112px;padding-left: 40px;padding-right: 40px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 40px;column-gap: 0px;overflow: visible;border-color: inherit;background-color: var(--ast-global-color-4);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-abcd4e61{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-abcd4e61 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-abcd4e61 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-abcd4e61 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-abcd4e61 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-abcd4e61 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-abcd4e61 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-abcd4e61{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;}.uagb-block-47b7c002 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-47b7c002 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-47b7c002 .uagb-ifb-icon svg{fill: #333;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-47b7c002 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-47b7c002 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-47b7c002 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-47b7c002 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-47b7c002 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-47b7c002 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-47b7c002.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-47b7c002 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-47b7c002.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-47b7c002.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0%;margin-top: 0%;margin-left: 15%;margin-right: 15%;}.uagb-block-47b7c002 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-47b7c002 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-47b7c002 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-47b7c002 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-47b7c002 .uagb-infobox__content-wrap{text-align: center;}.uagb-block-47b7c002.uagb-infobox-icon-above-title{text-align: center;}.uagb-block-47b7c002.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-47b7c002 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-47b7c002 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-47b7c002 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-f837bf6f{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-f837bf6f .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-f837bf6f .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-f837bf6f .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-f837bf6f .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-f837bf6f .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-f837bf6f > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 48px;}.wp-block-uagb-container.uagb-block-f837bf6f{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 48px;overflow: visible;border-color: inherit;flex-direction: row;align-items: center;justify-content: center;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-27788532{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-27788532 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-27788532 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-27788532 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-27788532 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-27788532 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-27788532 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-27788532{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-ead7767b .uagb-ifb-icon{width: 20px;line-height: 20px;}.uagb-block-ead7767b .uagb-ifb-icon > span{font-size: 20px;width: 20px;line-height: 20px;color: var(--ast-global-color-2);}.uagb-block-ead7767b .uagb-ifb-icon svg{fill: var(--ast-global-color-2);}.uagb-block-ead7767b.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 20px;height: 20px;line-height: 20px;font-size: 20px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-ead7767b .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 20px;font-size: 20px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-ead7767b .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 20px;height: 20px;line-height: 20px;padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-ead7767b.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-ead7767b.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-ead7767b .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 20px;line-height: 20px;font-size: 20px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-ead7767b .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 20px;line-height: 20px;font-size: 20px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-ead7767b .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-ead7767b .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-ead7767b.uagb-infobox__content-wrap img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;border-radius: 0px;}.uagb-block-ead7767b.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;border-radius: 0px;}.uagb-block-ead7767b.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;border-radius: 0px;}.uagb-block-ead7767b.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;border-radius: 0px;}.uagb-block-ead7767b .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-ead7767b.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 16px;margin-top: 20px;margin-left: 0px;margin-right: 0px;}.uagb-block-ead7767b.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-ead7767b .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-ead7767b .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-ead7767b .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-ead7767b .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-ead7767b.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-ead7767b.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-ead7767b .uagb-iconbox-icon-wrap.uagb-infobox-shape-circle{background-color: var(--ast-global-color-5);border-radius: 50%;}.uagb-block-ead7767b .uagb-iconbox-icon-wrap.uagb-infobox-shape-squre{background-color: var(--ast-global-color-5);}.uagb-block-ead7767b .uagb-iconbox-icon-wrap:hover{background-color:  !important;}.uagb-block-ead7767b .uagb-infobox__content-wrap{text-align: center;}.uagb-block-ead7767b.uagb-infobox-icon-above-title{text-align: center;}.uagb-block-ead7767b.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-ead7767b .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-ead7767b.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-ead7767b .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-ead7767b .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-ead7767b.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-200adade{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-200adade .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-200adade .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-200adade .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-200adade .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-200adade .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-200adade > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-200adade{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-14c90ca5 .uagb-ifb-icon{width: 20px;line-height: 20px;}.uagb-block-14c90ca5 .uagb-ifb-icon > span{font-size: 20px;width: 20px;line-height: 20px;color: var(--ast-global-color-2);}.uagb-block-14c90ca5 .uagb-ifb-icon svg{fill: var(--ast-global-color-2);}.uagb-block-14c90ca5.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 20px;height: 20px;line-height: 20px;font-size: 20px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-14c90ca5 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 20px;font-size: 20px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-14c90ca5 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 20px;height: 20px;line-height: 20px;padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-14c90ca5.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-14c90ca5.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-14c90ca5 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 20px;line-height: 20px;font-size: 20px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-14c90ca5 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 20px;line-height: 20px;font-size: 20px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-14c90ca5 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-14c90ca5 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-14c90ca5.uagb-infobox__content-wrap img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;border-radius: 0px;}.uagb-block-14c90ca5.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;border-radius: 0px;}.uagb-block-14c90ca5.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;border-radius: 0px;}.uagb-block-14c90ca5.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;border-radius: 0px;}.uagb-block-14c90ca5 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-14c90ca5.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 16px;margin-top: 20px;margin-left: 0px;margin-right: 0px;}.uagb-block-14c90ca5.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-14c90ca5 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-14c90ca5 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-14c90ca5 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-14c90ca5 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-14c90ca5.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-14c90ca5.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-14c90ca5 .uagb-iconbox-icon-wrap.uagb-infobox-shape-circle{background-color: var(--ast-global-color-5);border-radius: 50%;}.uagb-block-14c90ca5 .uagb-iconbox-icon-wrap.uagb-infobox-shape-squre{background-color: var(--ast-global-color-5);}.uagb-block-14c90ca5 .uagb-iconbox-icon-wrap:hover{background-color:  !important;}.uagb-block-14c90ca5 .uagb-infobox__content-wrap{text-align: center;}.uagb-block-14c90ca5.uagb-infobox-icon-above-title{text-align: center;}.uagb-block-14c90ca5.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-14c90ca5 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-14c90ca5.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-14c90ca5 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-14c90ca5 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-14c90ca5.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-fd033695{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-fd033695 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-fd033695 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-fd033695 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-fd033695 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-fd033695 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-fd033695 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-fd033695{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-caa994d6 .uagb-ifb-icon{width: 20px;line-height: 20px;}.uagb-block-caa994d6 .uagb-ifb-icon > span{font-size: 20px;width: 20px;line-height: 20px;color: var(--ast-global-color-2);}.uagb-block-caa994d6 .uagb-ifb-icon svg{fill: var(--ast-global-color-2);}.uagb-block-caa994d6.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 20px;height: 20px;line-height: 20px;font-size: 20px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-caa994d6 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 20px;font-size: 20px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-caa994d6 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 20px;height: 20px;line-height: 20px;padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-caa994d6.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-caa994d6.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-caa994d6 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 20px;line-height: 20px;font-size: 20px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-caa994d6 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 20px;line-height: 20px;font-size: 20px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.uagb-block-caa994d6 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-caa994d6 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-caa994d6.uagb-infobox__content-wrap img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;border-radius: 0px;}.uagb-block-caa994d6.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;border-radius: 0px;}.uagb-block-caa994d6.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;border-radius: 0px;}.uagb-block-caa994d6.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;border-radius: 0px;}.uagb-block-caa994d6 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-caa994d6.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 16px;margin-top: 20px;margin-left: 0px;margin-right: 0px;}.uagb-block-caa994d6.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-caa994d6 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-caa994d6 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-caa994d6 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-caa994d6 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-caa994d6.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-caa994d6.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-caa994d6 .uagb-iconbox-icon-wrap.uagb-infobox-shape-circle{background-color: var(--ast-global-color-5);border-radius: 50%;}.uagb-block-caa994d6 .uagb-iconbox-icon-wrap.uagb-infobox-shape-squre{background-color: var(--ast-global-color-5);}.uagb-block-caa994d6 .uagb-iconbox-icon-wrap:hover{background-color:  !important;}.uagb-block-caa994d6 .uagb-infobox__content-wrap{text-align: center;}.uagb-block-caa994d6.uagb-infobox-icon-above-title{text-align: center;}.uagb-block-caa994d6.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-caa994d6 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-caa994d6.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-caa994d6 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-caa994d6 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-caa994d6.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}@media only screen and (max-width: 976px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-0875eb55{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-0875eb55 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;column-gap: 40px;}.wp-block-uagb-container.uagb-block-0875eb55{padding-top: 80px;padding-bottom: 80px;padding-left: 32px;padding-right: 32px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;column-gap: 40px;background-color: var(--ast-global-color-4);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-abcd4e61{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-abcd4e61 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-abcd4e61{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;}.uagb-block-47b7c002.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-47b7c002.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0%;margin-top: 0%;margin-left: 8%;margin-right: 8%;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-47b7c002 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-47b7c002 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-47b7c002 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-47b7c002 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-47b7c002 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-47b7c002.uagb-infobox__content-wrap{padding-top: 0%;padding-right: 0%;padding-bottom: 0%;padding-left: 0%;}.uagb-block-47b7c002 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-47b7c002 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-47b7c002 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-f837bf6f{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-f837bf6f > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 32px;}.wp-block-uagb-container.uagb-block-f837bf6f{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 32px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-27788532{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-27788532 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-27788532{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;}.uagb-block-ead7767b.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 20px;margin-left: 0px;margin-right: 0px;}.uagb-block-ead7767b.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-ead7767b.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 14px;height: 14px;line-height: 14px;font-size: 14px;padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-ead7767b.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 14px;font-size: 14px;padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-ead7767b.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-ead7767b.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-ead7767b.uagb-infobox__content-wrap > svg{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-ead7767b .uagb-ifb-content > svg{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-ead7767b .uagb-infobox-icon-right:hover > svg{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-ead7767b .uagb-infobox-icon-left:hover > svg{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-ead7767b.uagb-infobox__content-wrap img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-ead7767b.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-ead7767b .uagb-ifb-icon{width: 14px;line-height: 14px;}.uagb-block-ead7767b .uagb-ifb-icon > span{font-size: 14px;width: 14px;line-height: 14px;}.uagb-block-ead7767b .uagb-iconbox-icon-wrap{width: 14px;height: 14px;line-height: 14px;}.uagb-block-ead7767b .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 14px;line-height: 14px;font-size: 14px;}.uagb-block-ead7767b .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 14px;line-height: 14px;font-size: 14px;}.uagb-block-ead7767b.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-ead7767b .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-ead7767b.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-ead7767b .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-ead7767b .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-ead7767b.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-200adade{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-200adade > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-200adade{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;}.uagb-block-14c90ca5.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 20px;margin-left: 0px;margin-right: 0px;}.uagb-block-14c90ca5.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-14c90ca5.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 14px;height: 14px;line-height: 14px;font-size: 14px;padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-14c90ca5.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 14px;font-size: 14px;padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-14c90ca5.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-14c90ca5.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-14c90ca5.uagb-infobox__content-wrap > svg{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-14c90ca5 .uagb-ifb-content > svg{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-14c90ca5 .uagb-infobox-icon-right:hover > svg{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-14c90ca5 .uagb-infobox-icon-left:hover > svg{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-14c90ca5.uagb-infobox__content-wrap img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-14c90ca5.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-14c90ca5 .uagb-ifb-icon{width: 14px;line-height: 14px;}.uagb-block-14c90ca5 .uagb-ifb-icon > span{font-size: 14px;width: 14px;line-height: 14px;}.uagb-block-14c90ca5 .uagb-iconbox-icon-wrap{width: 14px;height: 14px;line-height: 14px;}.uagb-block-14c90ca5 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 14px;line-height: 14px;font-size: 14px;}.uagb-block-14c90ca5 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 14px;line-height: 14px;font-size: 14px;}.uagb-block-14c90ca5.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-14c90ca5 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-14c90ca5.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-14c90ca5 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-14c90ca5 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-14c90ca5.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-fd033695{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-fd033695 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-fd033695{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;}.uagb-block-caa994d6.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 20px;margin-left: 0px;margin-right: 0px;}.uagb-block-caa994d6.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-caa994d6.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 14px;height: 14px;line-height: 14px;font-size: 14px;padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-caa994d6.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 14px;font-size: 14px;padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-caa994d6.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-caa994d6.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-caa994d6.uagb-infobox__content-wrap > svg{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-caa994d6 .uagb-ifb-content > svg{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-caa994d6 .uagb-infobox-icon-right:hover > svg{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-caa994d6 .uagb-infobox-icon-left:hover > svg{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-caa994d6.uagb-infobox__content-wrap img{padding-left: 10px;padding-right: 10px;padding-top: 10px;padding-bottom: 10px;}.uagb-block-caa994d6.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-caa994d6 .uagb-ifb-icon{width: 14px;line-height: 14px;}.uagb-block-caa994d6 .uagb-ifb-icon > span{font-size: 14px;width: 14px;line-height: 14px;}.uagb-block-caa994d6 .uagb-iconbox-icon-wrap{width: 14px;height: 14px;line-height: 14px;}.uagb-block-caa994d6 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 14px;line-height: 14px;font-size: 14px;}.uagb-block-caa994d6 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 14px;line-height: 14px;font-size: 14px;}.uagb-block-caa994d6.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-caa994d6 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-caa994d6.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-caa994d6 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-caa994d6 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-caa994d6.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}}@media only screen and (max-width: 767px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-0875eb55{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-0875eb55 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;flex-wrap: wrap;row-gap: 48px;}.wp-block-uagb-container.uagb-block-0875eb55{padding-top: 64px;padding-bottom: 64px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 48px;background-color: var(--ast-global-color-4);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-abcd4e61{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-abcd4e61 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-abcd4e61{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;flex-wrap: wrap;}.uagb-block-47b7c002.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-47b7c002.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-47b7c002 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-47b7c002 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-47b7c002 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-47b7c002 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-47b7c002 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-47b7c002.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-47b7c002 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-47b7c002 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-47b7c002 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-47b7c002.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-f837bf6f{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-f837bf6f > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 48px;}.wp-block-uagb-container.uagb-block-f837bf6f{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 48px;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-27788532{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-27788532 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-27788532{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;flex-wrap: wrap;}.uagb-block-ead7767b.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 20px;margin-left: 0px;margin-right: 0px;}.uagb-block-ead7767b.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-ead7767b.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 14px;height: 14px;line-height: 14px;font-size: 14px;}.uagb-block-ead7767b.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 14px;font-size: 14px;}.uagb-block-ead7767b .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 14px;line-height: 14px;font-size: 14px;}.uagb-block-ead7767b .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 14px;line-height: 14px;font-size: 14px;}.uagb-block-ead7767b.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-ead7767b .uagb-ifb-icon{width: 14px;line-height: 14px;}.uagb-block-ead7767b .uagb-ifb-icon > span{font-size: 14px;width: 14px;line-height: 14px;}.uagb-block-ead7767b .uagb-iconbox-icon-wrap{width: 14px;height: 14px;line-height: 14px;}.uagb-block-ead7767b.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-ead7767b .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-ead7767b.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-ead7767b .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-ead7767b .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-ead7767b.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-200adade{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-200adade > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-200adade{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;flex-wrap: wrap;}.uagb-block-14c90ca5.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 20px;margin-left: 0px;margin-right: 0px;}.uagb-block-14c90ca5.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-14c90ca5.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 14px;height: 14px;line-height: 14px;font-size: 14px;}.uagb-block-14c90ca5.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 14px;font-size: 14px;}.uagb-block-14c90ca5 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 14px;line-height: 14px;font-size: 14px;}.uagb-block-14c90ca5 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 14px;line-height: 14px;font-size: 14px;}.uagb-block-14c90ca5.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-14c90ca5 .uagb-ifb-icon{width: 14px;line-height: 14px;}.uagb-block-14c90ca5 .uagb-ifb-icon > span{font-size: 14px;width: 14px;line-height: 14px;}.uagb-block-14c90ca5 .uagb-iconbox-icon-wrap{width: 14px;height: 14px;line-height: 14px;}.uagb-block-14c90ca5.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-14c90ca5 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-14c90ca5.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-14c90ca5 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-14c90ca5 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-14c90ca5.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-fd033695{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-fd033695 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-fd033695{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;flex-wrap: wrap;}.uagb-block-caa994d6.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 20px;margin-left: 0px;margin-right: 0px;}.uagb-block-caa994d6.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-caa994d6.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 14px;height: 14px;line-height: 14px;font-size: 14px;}.uagb-block-caa994d6.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 14px;font-size: 14px;}.uagb-block-caa994d6 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 14px;line-height: 14px;font-size: 14px;}.uagb-block-caa994d6 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 14px;line-height: 14px;font-size: 14px;}.uagb-block-caa994d6.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-caa994d6 .uagb-ifb-icon{width: 14px;line-height: 14px;}.uagb-block-caa994d6 .uagb-ifb-icon > span{font-size: 14px;width: 14px;line-height: 14px;}.uagb-block-caa994d6 .uagb-iconbox-icon-wrap{width: 14px;height: 14px;line-height: 14px;}.uagb-block-caa994d6.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-caa994d6 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-caa994d6.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-caa994d6 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-caa994d6 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-caa994d6.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}}";s:7:"content";s:3540:"
<div class="wp-block-uagb-container uagb-block-0875eb55 alignfull uagb-is-root-container"><div class="uagb-container-inner-blocks-wrap">
<div class="wp-block-uagb-container uagb-block-abcd4e61">
<div class="wp-block-uagb-info-box uagb-block-47b7c002 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h3 class="uagb-ifb-title">Innovative Solutions for Modern Challenges</h3></div><p class="uagb-ifb-desc">Discover groundbreaking features designed to tackle tomorrow's challenges head-on. Explore innovative solutions shaping the future landscape.</p></div></div>
</div>



<div class="wp-block-uagb-container uagb-block-f837bf6f">
<div class="wp-block-uagb-container uagb-block-27788532">
<div class="wp-block-uagb-info-box uagb-block-ead7767b uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-icon-wrap"><div class="uagb-iconbox-icon-wrap uagb-infobox-shape-circle"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 448 512"><path d="M438.6 105.4C451.1 117.9 451.1 138.1 438.6 150.6L182.6 406.6C170.1 419.1 149.9 419.1 137.4 406.6L9.372 278.6C-3.124 266.1-3.124 245.9 9.372 233.4C21.87 220.9 42.13 220.9 54.63 233.4L159.1 338.7L393.4 105.4C405.9 92.88 426.1 92.88 438.6 105.4H438.6z"></path></svg></div></div><div class="uagb-ifb-title-wrap"><h5 class="uagb-ifb-title">Feature 1</h5></div><p class="uagb-ifb-desc">This is a flexible section where you can share anything you want. It could be details or some information about feature one.</p></div></div>
</div>



<div class="wp-block-uagb-container uagb-block-200adade">
<div class="wp-block-uagb-info-box uagb-block-14c90ca5 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-icon-wrap"><div class="uagb-iconbox-icon-wrap uagb-infobox-shape-circle"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 448 512"><path d="M438.6 105.4C451.1 117.9 451.1 138.1 438.6 150.6L182.6 406.6C170.1 419.1 149.9 419.1 137.4 406.6L9.372 278.6C-3.124 266.1-3.124 245.9 9.372 233.4C21.87 220.9 42.13 220.9 54.63 233.4L159.1 338.7L393.4 105.4C405.9 92.88 426.1 92.88 438.6 105.4H438.6z"></path></svg></div></div><div class="uagb-ifb-title-wrap"><h5 class="uagb-ifb-title">Feature 2</h5></div><p class="uagb-ifb-desc">This is a flexible section where you can share anything you want. It could be details or some information about feature two.</p></div></div>
</div>



<div class="wp-block-uagb-container uagb-block-fd033695">
<div class="wp-block-uagb-info-box uagb-block-caa994d6 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-icon-wrap"><div class="uagb-iconbox-icon-wrap uagb-infobox-shape-circle"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 448 512"><path d="M438.6 105.4C451.1 117.9 451.1 138.1 438.6 150.6L182.6 406.6C170.1 419.1 149.9 419.1 137.4 406.6L9.372 278.6C-3.124 266.1-3.124 245.9 9.372 233.4C21.87 220.9 42.13 220.9 54.63 233.4L159.1 338.7L393.4 105.4C405.9 92.88 426.1 92.88 438.6 105.4H438.6z"></path></svg></div></div><div class="uagb-ifb-title-wrap"><h5 class="uagb-ifb-title">Feature 3</h5></div><p class="uagb-ifb-desc">This is a flexible section where you can share anything you want. It could be details or some information about feature three.</p></div></div>
</div>
</div>
</div></div>
";}}