a:30:{s:8:"id-77038";a:10:{s:5:"title";s:11:"Services 09";s:3:"url";s:50:"https://websitedemos.net/astra-blocks/services-09/";s:3:"tag";a:0:{}s:8:"category";i:952;s:16:"primary-category";s:0:"";s:4:"type";s:5:"block";s:12:"page-builder";s:9:"gutenberg";s:16:"required-plugins";a:0:{}s:10:"stylesheet";s:50828:".wp-block-uagb-container.uagb-is-root-container .uagb-block-323c7320{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-323c7320 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-323c7320 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-323c7320 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-323c7320 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-323c7320 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-323c7320 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 72px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-323c7320{box-shadow: 0px 0px   #00000070 ;padding-top: 112px;padding-bottom: 112px;padding-left: 40px;padding-right: 40px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 72px;column-gap: 0px;overflow: visible;border-color: inherit;background-color: var(--ast-global-color-4);;}.uagb-block-9fbe867d .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-9fbe867d .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-9fbe867d .uagb-ifb-icon svg{fill: #333;}.uagb-block-9fbe867d.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-9fbe867d .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-9fbe867d .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-9fbe867d.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-9fbe867d.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-9fbe867d .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-9fbe867d .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-9fbe867d .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-9fbe867d .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-9fbe867d.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-9fbe867d.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-9fbe867d.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-9fbe867d.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-9fbe867d .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-9fbe867d.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-9fbe867d.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0%;margin-top: 0%;margin-left: 15%;margin-right: 15%;}.uagb-block-9fbe867d .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-9fbe867d .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-9fbe867d .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-9fbe867d .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-9fbe867d.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-9fbe867d.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-9fbe867d .uagb-infobox__content-wrap{text-align: center;}.uagb-block-9fbe867d.uagb-infobox-icon-above-title{text-align: center;}.uagb-block-9fbe867d.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-9fbe867d .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-9fbe867d.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-9fbe867d .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-9fbe867d .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-9fbe867d.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-682319ac{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-682319ac .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-682319ac .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-682319ac .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-682319ac .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-682319ac .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-682319ac > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 48px;}.wp-block-uagb-container.uagb-block-682319ac{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 48px;overflow: visible;border-color: inherit;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-71e8fff3{max-width: 48%;width: 100%;}.wp-block-uagb-container.uagb-block-71e8fff3 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-71e8fff3 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-71e8fff3 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-71e8fff3 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-71e8fff3 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-71e8fff3 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: stretch;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-71e8fff3{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-color: inherit;background-color: var(--ast-global-color-5);;flex-direction: column;align-items: stretch;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-75ccde33.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-75ccde33 .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-75ccde33.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 0px;border-bottom-right-radius: 0px;}.uagb-block-75ccde33.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;text-align: center;}.uagb-block-75ccde33.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 0px;border-bottom-right-radius: 0px;}.uagb-block-75ccde33.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 0px;border-bottom-right-radius: 0px;}.uagb-block-75ccde33.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-75ccde33.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-75ccde33.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-75ccde33.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-75ccde33.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-75ccde33.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-75ccde33.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 400px;}.uagb-block-75ccde33.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-75ccde33.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-75ccde33.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-75ccde33.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-9ee67bb3{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-9ee67bb3 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-9ee67bb3 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-9ee67bb3 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-9ee67bb3 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-9ee67bb3 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-9ee67bb3 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 28px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-9ee67bb3{box-shadow: 0px 0px   #00000070 ;padding-top: 32px;padding-bottom: 32px;padding-left: 32px;padding-right: 32px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 28px;column-gap: 0px;overflow: visible;border-top-left-radius: 0px;border-top-right-radius: 0px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-2ab09e50 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-2ab09e50 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-2ab09e50 .uagb-ifb-icon svg{fill: #333;}.uagb-block-2ab09e50.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-2ab09e50 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-2ab09e50 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-2ab09e50.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-2ab09e50.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-2ab09e50 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-2ab09e50 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-2ab09e50 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-2ab09e50 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-2ab09e50.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-2ab09e50.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-2ab09e50.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-2ab09e50.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-2ab09e50 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-2ab09e50.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-2ab09e50.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-2ab09e50 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-2ab09e50 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-2ab09e50 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-2ab09e50 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-2ab09e50.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-2ab09e50.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-2ab09e50 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-2ab09e50.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-2ab09e50.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-2ab09e50 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-2ab09e50.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-2ab09e50 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-2ab09e50 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-2ab09e50.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-64373be9.wp-block-uagb-buttons.uagb-buttons__outer-wrap .uagb-buttons__wrap {column-gap: 0px;}.uagb-block-64373be9.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-15570a3f .wp-block-button__link{background: transparent;}.wp-block-uagb-buttons .uagb-block-15570a3f .wp-block-button__link:hover{background: transparent;}.wp-block-uagb-buttons .uagb-block-15570a3f .wp-block-button__link:focus{background: transparent;}.wp-block-uagb-buttons .uagb-block-15570a3f .uagb-button__wrapper .uagb-buttons-repeater{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;color: var(--ast-global-color-2);margin-top: 0px;margin-bottom: 0px;margin-left: 0px;margin-right: 0px;}.wp-block-uagb-buttons .uagb-block-15570a3f .wp-block-button__link.has-text-color:hover .uagb-button__link{color: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-15570a3f .wp-block-button__link.has-text-color:focus .uagb-button__link{color: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-15570a3f .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link{margin-top: 0px;margin-bottom: 0px;margin-left: 0px;margin-right: 0px;box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-15570a3f .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link:hover{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-15570a3f .uagb-buttons-repeater .uagb-button__link{color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-15570a3f .uagb-buttons-repeater:hover .uagb-button__link{color: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-15570a3f .uagb-buttons-repeater:focus .uagb-button__link{color: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-15570a3f .uagb-buttons-repeater .uagb-button__icon > svg{width: 15px;height: 15px;fill: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-15570a3f .uagb-buttons-repeater:hover .uagb-button__icon > svg{fill: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-15570a3f .uagb-buttons-repeater:focus .uagb-button__icon > svg{fill: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-15570a3f .uagb-buttons-repeater .uagb-button__icon-position-after{margin-left: 8px;}.wp-block-uagb-buttons .uagb-block-15570a3f .uagb-buttons-repeater .uagb-button__icon-position-before{margin-right: 8px;}.wp-block-uagb-buttons .uagb-block-15570a3f .uagb-button__link{text-transform: normal;text-decoration: none;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-a767bc2d{max-width: 48%;width: 100%;}.wp-block-uagb-container.uagb-block-a767bc2d .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-a767bc2d .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-a767bc2d .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-a767bc2d .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-a767bc2d .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-a767bc2d > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: stretch;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-a767bc2d{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-color: inherit;background-color: var(--ast-global-color-5);;flex-direction: column;align-items: stretch;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-b2504f0e.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-b2504f0e .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-b2504f0e.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 0px;border-bottom-right-radius: 0px;}.uagb-block-b2504f0e.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;text-align: center;}.uagb-block-b2504f0e.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 0px;border-bottom-right-radius: 0px;}.uagb-block-b2504f0e.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 0px;border-bottom-right-radius: 0px;}.uagb-block-b2504f0e.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-b2504f0e.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-b2504f0e.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-b2504f0e.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-b2504f0e.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-b2504f0e.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-b2504f0e.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 400px;}.uagb-block-b2504f0e.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-b2504f0e.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-b2504f0e.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-b2504f0e.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-9aef83d0{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-9aef83d0 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-9aef83d0 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-9aef83d0 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-9aef83d0 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-9aef83d0 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-9aef83d0 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 28px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-9aef83d0{box-shadow: 0px 0px   #00000070 ;padding-top: 32px;padding-bottom: 32px;padding-left: 32px;padding-right: 32px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 28px;column-gap: 0px;overflow: visible;border-top-left-radius: 0px;border-top-right-radius: 0px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-7e10dc31 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-7e10dc31 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-7e10dc31 .uagb-ifb-icon svg{fill: #333;}.uagb-block-7e10dc31.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-7e10dc31 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-7e10dc31 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-7e10dc31.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-7e10dc31.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-7e10dc31 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-7e10dc31 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-7e10dc31 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-7e10dc31 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-7e10dc31.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-7e10dc31.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-7e10dc31.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-7e10dc31.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-7e10dc31 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-7e10dc31.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-7e10dc31.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-7e10dc31 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-7e10dc31 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-7e10dc31 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-7e10dc31 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-7e10dc31.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-7e10dc31.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-7e10dc31 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-7e10dc31.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-7e10dc31.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-7e10dc31 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-7e10dc31.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-7e10dc31 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-7e10dc31 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-7e10dc31.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-66047323.wp-block-uagb-buttons.uagb-buttons__outer-wrap .uagb-buttons__wrap {column-gap: 0px;}.uagb-block-66047323.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-5658abd4 .wp-block-button__link{background: transparent;}.wp-block-uagb-buttons .uagb-block-5658abd4 .wp-block-button__link:hover{background: transparent;}.wp-block-uagb-buttons .uagb-block-5658abd4 .wp-block-button__link:focus{background: transparent;}.wp-block-uagb-buttons .uagb-block-5658abd4 .uagb-button__wrapper .uagb-buttons-repeater{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;color: var(--ast-global-color-2);margin-top: 0px;margin-bottom: 0px;margin-left: 0px;margin-right: 0px;}.wp-block-uagb-buttons .uagb-block-5658abd4 .wp-block-button__link.has-text-color:hover .uagb-button__link{color: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-5658abd4 .wp-block-button__link.has-text-color:focus .uagb-button__link{color: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-5658abd4 .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link{margin-top: 0px;margin-bottom: 0px;margin-left: 0px;margin-right: 0px;box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-5658abd4 .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link:hover{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-5658abd4 .uagb-buttons-repeater .uagb-button__link{color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-5658abd4 .uagb-buttons-repeater:hover .uagb-button__link{color: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-5658abd4 .uagb-buttons-repeater:focus .uagb-button__link{color: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-5658abd4 .uagb-buttons-repeater .uagb-button__icon > svg{width: 15px;height: 15px;fill: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-5658abd4 .uagb-buttons-repeater:hover .uagb-button__icon > svg{fill: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-5658abd4 .uagb-buttons-repeater:focus .uagb-button__icon > svg{fill: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-5658abd4 .uagb-buttons-repeater .uagb-button__icon-position-after{margin-left: 8px;}.wp-block-uagb-buttons .uagb-block-5658abd4 .uagb-buttons-repeater .uagb-button__icon-position-before{margin-right: 8px;}.wp-block-uagb-buttons .uagb-block-5658abd4 .uagb-button__link{text-transform: normal;text-decoration: none;}@media only screen and (max-width: 976px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-323c7320{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-323c7320 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 50px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-323c7320{padding-top: 80px;padding-bottom: 80px;padding-left: 32px;padding-right: 32px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 50px;column-gap: 0px;background-color: var(--ast-global-color-4);;}.uagb-block-9fbe867d.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-9fbe867d.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0%;margin-top: 0%;margin-left: 8%;margin-right: 8%;}.uagb-block-9fbe867d.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-9fbe867d.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-9fbe867d.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-9fbe867d .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-9fbe867d .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-9fbe867d .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-9fbe867d .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-9fbe867d .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-9fbe867d.uagb-infobox__content-wrap{padding-top: 0%;padding-right: 0%;padding-bottom: 0%;padding-left: 0%;}.uagb-block-9fbe867d .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-9fbe867d.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-9fbe867d .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-9fbe867d .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-9fbe867d.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-682319ac{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-682319ac > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;row-gap: 0px;column-gap: 40px;}.wp-block-uagb-container.uagb-block-682319ac{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 40px;align-items: stretch;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-71e8fff3{max-width: 47%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-71e8fff3 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-71e8fff3{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;background-color: var(--ast-global-color-5);;align-items: stretch;}.uagb-block-75ccde33.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 250px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-9ee67bb3{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-9ee67bb3 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-9ee67bb3{padding-top: 24px;padding-bottom: 24px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;}.uagb-block-2ab09e50.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-2ab09e50.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-2ab09e50.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-2ab09e50.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-2ab09e50.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-2ab09e50 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-2ab09e50 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-2ab09e50 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-2ab09e50 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-2ab09e50 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-2ab09e50.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-2ab09e50 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-2ab09e50.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-2ab09e50 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-2ab09e50 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-2ab09e50.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-64373be9.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-15570a3f .uagb-buttons-repeater .uagb-button__icon > svg{fill: var(--ast-global-color-2);}.wp-block-uagb-container.uagb-is-root-container .uagb-block-a767bc2d{max-width: 47%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-a767bc2d > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-a767bc2d{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;background-color: var(--ast-global-color-5);;align-items: stretch;}.uagb-block-b2504f0e.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 250px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-9aef83d0{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-9aef83d0 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-9aef83d0{padding-top: 24px;padding-bottom: 24px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;}.uagb-block-7e10dc31.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-7e10dc31.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-7e10dc31.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7e10dc31.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-7e10dc31.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-7e10dc31 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-7e10dc31 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-7e10dc31 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-7e10dc31 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7e10dc31 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7e10dc31.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-7e10dc31 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-7e10dc31.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-7e10dc31 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-7e10dc31 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-7e10dc31.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-66047323.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-5658abd4 .uagb-buttons-repeater .uagb-button__icon > svg{fill: var(--ast-global-color-2);}}@media only screen and (max-width: 767px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-323c7320{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-323c7320 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 40px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-323c7320{padding-top: 64px;padding-bottom: 64px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 40px;column-gap: 0px;background-color: var(--ast-global-color-4);;}.uagb-block-9fbe867d.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-9fbe867d.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-9fbe867d.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-9fbe867d.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-9fbe867d .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-9fbe867d .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-9fbe867d.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-9fbe867d .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-9fbe867d .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-9fbe867d .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-9fbe867d.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-9fbe867d .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-9fbe867d.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-9fbe867d .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-9fbe867d .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-9fbe867d.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-682319ac{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-682319ac > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;flex-wrap: wrap;row-gap: 30px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-682319ac{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 30px;column-gap: 0px;align-items: stretch;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-71e8fff3{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-71e8fff3 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-71e8fff3{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;background-color: var(--ast-global-color-5);;align-items: stretch;flex-wrap: wrap;}.uagb-block-75ccde33.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 200px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-9ee67bb3{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-9ee67bb3 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 20px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-9ee67bb3{padding-top: 24px;padding-bottom: 24px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 20px;column-gap: 0px;flex-wrap: wrap;}.uagb-block-2ab09e50.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-2ab09e50.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-2ab09e50.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-2ab09e50.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-2ab09e50 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-2ab09e50 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-2ab09e50.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-2ab09e50 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-2ab09e50 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-2ab09e50 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-2ab09e50.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-2ab09e50 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-2ab09e50.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-2ab09e50 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-2ab09e50 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-2ab09e50.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-64373be9.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-15570a3f .uagb-buttons-repeater .uagb-button__icon > svg{fill: var(--ast-global-color-2);}.wp-block-uagb-container.uagb-is-root-container .uagb-block-a767bc2d{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-a767bc2d > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-a767bc2d{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;background-color: var(--ast-global-color-5);;align-items: stretch;flex-wrap: wrap;}.uagb-block-b2504f0e.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 200px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-9aef83d0{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-9aef83d0 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 20px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-9aef83d0{padding-top: 24px;padding-bottom: 24px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 20px;column-gap: 0px;flex-wrap: wrap;}.uagb-block-7e10dc31.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-7e10dc31.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-7e10dc31.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7e10dc31.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-7e10dc31 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7e10dc31 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7e10dc31.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-7e10dc31 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-7e10dc31 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-7e10dc31 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-7e10dc31.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-7e10dc31 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-7e10dc31.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-7e10dc31 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-7e10dc31 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-7e10dc31.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-66047323.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-5658abd4 .uagb-buttons-repeater .uagb-button__icon > svg{fill: var(--ast-global-color-2);}}";s:7:"content";s:4968:"
<div class="wp-block-uagb-container uagb-block-323c7320 alignfull uagb-is-root-container"><div class="uagb-container-inner-blocks-wrap">
<div class="wp-block-uagb-info-box uagb-block-9fbe867d uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h2 class="uagb-ifb-title">Innovative Solutions for Growth</h2></div><p class="uagb-ifb-desc">Explore our comprehensive selection of services that cater to a variety of needs, ensuring complete customer satisfaction.</p></div></div>



<div class="wp-block-uagb-container uagb-block-682319ac">
<div class="wp-block-uagb-container uagb-block-71e8fff3">
<div class="wp-block-uagb-image alignleft uagb-block-75ccde33 wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-left"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/10/natures-01-1024x683.jpg ,https://websitedemos.net/wp-content/uploads/2023/10/natures-02.jpg 780w, https://websitedemos.net/wp-content/uploads/2023/10/natures-02.jpg 360w" sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/10/natures-01-1024x683.jpg" alt="" class="uag-image-80573" width="600" height="400" title="" loading="lazy"/></figure></div>



<div class="wp-block-uagb-container uagb-block-9ee67bb3">
<div class="wp-block-uagb-info-box uagb-block-2ab09e50 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h4 class="uagb-ifb-title">Service 1</h4></div><p class="uagb-ifb-desc">This is a flexible section where you can share anything you want. It could be details or some information about your service one.</p></div></div>



<div class="wp-block-uagb-buttons uagb-buttons__outer-wrap uagb-btn__default-btn uagb-btn-tablet__default-btn uagb-btn-mobile__default-btn uagb-block-64373be9"><div class="uagb-buttons__wrap uagb-buttons-layout-wrap">
<div class="wp-block-uagb-buttons-child uagb-buttons__outer-wrap uagb-block-15570a3f wp-block-button"><div class="uagb-button__wrapper"><a class="uagb-buttons-repeater wp-block-button__link" href="#" onclick="return false;" rel="follow noopener" target="_self"><div class="uagb-button__link">Learn More</div><span class="uagb-button__icon uagb-button__icon-position-after"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 320 512"><path d="M96 480c-8.188 0-16.38-3.125-22.62-9.375c-12.5-12.5-12.5-32.75 0-45.25L242.8 256L73.38 86.63c-12.5-12.5-12.5-32.75 0-45.25s32.75-12.5 45.25 0l192 192c12.5 12.5 12.5 32.75 0 45.25l-192 192C112.4 476.9 104.2 480 96 480z"></path></svg></span></a></div></div>
</div></div>
</div>
</div>



<div class="wp-block-uagb-container uagb-block-a767bc2d">
<div class="wp-block-uagb-image alignleft uagb-block-b2504f0e wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-left"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/10/desserts-01-1024x683.jpg ,https://websitedemos.net/wp-content/uploads/2023/10/desserts-02.jpg 780w, https://websitedemos.net/wp-content/uploads/2023/10/desserts-02.jpg 360w" sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/10/desserts-01-1024x683.jpg" alt="" class="uag-image-80569" width="600" height="400" title="" loading="lazy"/></figure></div>



<div class="wp-block-uagb-container uagb-block-9aef83d0">
<div class="wp-block-uagb-info-box uagb-block-7e10dc31 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h4 class="uagb-ifb-title">Service 2</h4></div><p class="uagb-ifb-desc">This is a flexible section where you can share anything you want. It could be details or some information about your service two.</p></div></div>



<div class="wp-block-uagb-buttons uagb-buttons__outer-wrap uagb-btn__default-btn uagb-btn-tablet__default-btn uagb-btn-mobile__default-btn uagb-block-66047323"><div class="uagb-buttons__wrap uagb-buttons-layout-wrap">
<div class="wp-block-uagb-buttons-child uagb-buttons__outer-wrap uagb-block-5658abd4 wp-block-button"><div class="uagb-button__wrapper"><a class="uagb-buttons-repeater wp-block-button__link" href="#" onclick="return false;" rel="follow noopener" target="_self"><div class="uagb-button__link">Learn More</div><span class="uagb-button__icon uagb-button__icon-position-after"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 320 512"><path d="M96 480c-8.188 0-16.38-3.125-22.62-9.375c-12.5-12.5-12.5-32.75 0-45.25L242.8 256L73.38 86.63c-12.5-12.5-12.5-32.75 0-45.25s32.75-12.5 45.25 0l192 192c12.5 12.5 12.5 32.75 0 45.25l-192 192C112.4 476.9 104.2 480 96 480z"></path></svg></span></a></div></div>
</div></div>
</div>
</div>
</div>
</div></div>
";}s:8:"id-77032";a:10:{s:5:"title";s:11:"Services 08";s:3:"url";s:50:"https://websitedemos.net/astra-blocks/services-08/";s:3:"tag";a:0:{}s:8:"category";i:952;s:16:"primary-category";s:0:"";s:4:"type";s:5:"block";s:12:"page-builder";s:9:"gutenberg";s:16:"required-plugins";a:0:{}s:10:"stylesheet";s:71748:".wp-block-uagb-container.uagb-is-root-container .uagb-block-c1b99237{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-c1b99237 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-c1b99237 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-c1b99237 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-c1b99237 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-c1b99237 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-c1b99237 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 48px;column-gap: 20px;}.wp-block-uagb-container.uagb-block-c1b99237{box-shadow: 0px 0px   #00000070 ;padding-top: 112px;padding-bottom: 112px;padding-left: 40px;padding-right: 40px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 48px;column-gap: 20px;overflow: visible;border-color: inherit;background-color: var(--ast-global-color-4);;}.uagb-block-6d775aeb .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-6d775aeb .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-6d775aeb .uagb-ifb-icon svg{fill: #333;}.uagb-block-6d775aeb.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-6d775aeb .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-6d775aeb .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-6d775aeb.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-6d775aeb.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-6d775aeb .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-6d775aeb .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-6d775aeb .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-6d775aeb .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-6d775aeb.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-6d775aeb.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-6d775aeb.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-6d775aeb.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-6d775aeb .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-6d775aeb.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-6d775aeb.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0%;margin-top: 0%;margin-left: 15%;margin-right: 15%;}.uagb-block-6d775aeb .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-6d775aeb .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-6d775aeb .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-6d775aeb .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-6d775aeb.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-6d775aeb.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-6d775aeb .uagb-infobox__content-wrap{text-align: center;}.uagb-block-6d775aeb.uagb-infobox-icon-above-title{text-align: center;}.uagb-block-6d775aeb.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-6d775aeb .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-6d775aeb.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-6d775aeb .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-6d775aeb .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-6d775aeb.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-d6f82612{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-d6f82612 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-d6f82612 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-d6f82612 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-d6f82612 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-d6f82612 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-d6f82612 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-d6f82612{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-189143de{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-189143de .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-189143de .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-189143de .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-189143de .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-189143de .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-189143de > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 24px;}.wp-block-uagb-container.uagb-block-189143de{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 24px;overflow: visible;border-color: inherit;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-d06d7a5c{max-width: 35%;width: 100%;}.wp-block-uagb-container.uagb-block-d06d7a5c .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-d06d7a5c .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-d06d7a5c .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-d06d7a5c .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-d06d7a5c .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-d06d7a5c > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 28px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-d06d7a5c{box-shadow: 0px 0px   #00000070 ;padding-top: 48px;padding-bottom: 48px;padding-left: 48px;padding-right: 48px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 28px;column-gap: 0px;overflow: visible;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-color: inherit;background-color: var(--ast-global-color-5);;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-1b7c4e47 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-1b7c4e47 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-1b7c4e47 .uagb-ifb-icon svg{fill: #333;}.uagb-block-1b7c4e47.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-1b7c4e47 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-1b7c4e47 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-1b7c4e47.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-1b7c4e47.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-1b7c4e47 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-1b7c4e47 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-1b7c4e47 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-1b7c4e47 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-1b7c4e47.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-1b7c4e47.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-1b7c4e47.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-1b7c4e47.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-1b7c4e47 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{color: var(--ast-global-color-2);margin-bottom: 24px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-1b7c4e47.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-1b7c4e47.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-1b7c4e47 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-1b7c4e47 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-1b7c4e47 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-1b7c4e47 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-1b7c4e47.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-1b7c4e47.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-1b7c4e47 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-1b7c4e47.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-1b7c4e47.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-1b7c4e47 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-1b7c4e47.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-1b7c4e47 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-1b7c4e47 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-1b7c4e47.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-09a29917.wp-block-uagb-buttons.uagb-buttons__outer-wrap .uagb-buttons__wrap {column-gap: 0px;}.uagb-block-09a29917.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-6bd2d184 .wp-block-button__link{background: transparent;}.wp-block-uagb-buttons .uagb-block-6bd2d184 .wp-block-button__link:hover{background: transparent;}.wp-block-uagb-buttons .uagb-block-6bd2d184 .wp-block-button__link:focus{background: transparent;}.wp-block-uagb-buttons .uagb-block-6bd2d184 .uagb-button__wrapper .uagb-buttons-repeater{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;color: var(--ast-global-color-2);margin-top: 0px;margin-bottom: 0px;margin-left: 0px;margin-right: 0px;}.wp-block-uagb-buttons .uagb-block-6bd2d184 .wp-block-button__link.has-text-color:hover .uagb-button__link{color: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-6bd2d184 .wp-block-button__link.has-text-color:focus .uagb-button__link{color: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-6bd2d184 .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link{margin-top: 0px;margin-bottom: 0px;margin-left: 0px;margin-right: 0px;box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-6bd2d184 .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link:hover{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-6bd2d184 .uagb-buttons-repeater .uagb-button__link{color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-6bd2d184 .uagb-buttons-repeater:hover .uagb-button__link{color: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-6bd2d184 .uagb-buttons-repeater:focus .uagb-button__link{color: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-6bd2d184 .uagb-buttons-repeater .uagb-button__icon > svg{width: 15px;height: 15px;fill: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-6bd2d184 .uagb-buttons-repeater:hover .uagb-button__icon > svg{fill: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-6bd2d184 .uagb-buttons-repeater:focus .uagb-button__icon > svg{fill: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-6bd2d184 .uagb-buttons-repeater .uagb-button__icon-position-after{margin-left: 8px;}.wp-block-uagb-buttons .uagb-block-6bd2d184 .uagb-buttons-repeater .uagb-button__icon-position-before{margin-right: 8px;}.wp-block-uagb-buttons .uagb-block-6bd2d184 .uagb-button__link{text-transform: normal;text-decoration: none;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-0b091f96{max-width: 65%;width: 100%;}.wp-block-uagb-container.uagb-block-0b091f96 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-0b091f96 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-0b091f96 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-0b091f96 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-0b091f96 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-0b091f96 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 28px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-0b091f96{box-shadow: 0px 0px   #00000070 ;padding-top: 48px;padding-bottom: 48px;padding-left: 48px;padding-right: 48px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 28px;column-gap: 0px;overflow: visible;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-color: inherit;background-color: var(--ast-global-color-5);;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-c794e651 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-c794e651 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-c794e651 .uagb-ifb-icon svg{fill: #333;}.uagb-block-c794e651.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-c794e651 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-c794e651 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-c794e651.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-c794e651.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-c794e651 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-c794e651 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-c794e651 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-c794e651 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-c794e651.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-c794e651.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-c794e651.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-c794e651.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-c794e651 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{color: var(--ast-global-color-2);margin-bottom: 24px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-c794e651.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-c794e651.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-c794e651 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-c794e651 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-c794e651 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-c794e651 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-c794e651.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-c794e651.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-c794e651 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-c794e651.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-c794e651.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-c794e651 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-c794e651.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-c794e651 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-c794e651 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-c794e651.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-f9d9931e.wp-block-uagb-buttons.uagb-buttons__outer-wrap .uagb-buttons__wrap {column-gap: 0px;}.uagb-block-f9d9931e.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-1c92b98f .wp-block-button__link{background: transparent;}.wp-block-uagb-buttons .uagb-block-1c92b98f .wp-block-button__link:hover{background: transparent;}.wp-block-uagb-buttons .uagb-block-1c92b98f .wp-block-button__link:focus{background: transparent;}.wp-block-uagb-buttons .uagb-block-1c92b98f .uagb-button__wrapper .uagb-buttons-repeater{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;color: var(--ast-global-color-2);margin-top: 0px;margin-bottom: 0px;margin-left: 0px;margin-right: 0px;}.wp-block-uagb-buttons .uagb-block-1c92b98f .wp-block-button__link.has-text-color:hover .uagb-button__link{color: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-1c92b98f .wp-block-button__link.has-text-color:focus .uagb-button__link{color: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-1c92b98f .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link{margin-top: 0px;margin-bottom: 0px;margin-left: 0px;margin-right: 0px;box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-1c92b98f .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link:hover{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-1c92b98f .uagb-buttons-repeater .uagb-button__link{color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-1c92b98f .uagb-buttons-repeater:hover .uagb-button__link{color: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-1c92b98f .uagb-buttons-repeater:focus .uagb-button__link{color: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-1c92b98f .uagb-buttons-repeater .uagb-button__icon > svg{width: 15px;height: 15px;fill: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-1c92b98f .uagb-buttons-repeater:hover .uagb-button__icon > svg{fill: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-1c92b98f .uagb-buttons-repeater:focus .uagb-button__icon > svg{fill: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-1c92b98f .uagb-buttons-repeater .uagb-button__icon-position-after{margin-left: 8px;}.wp-block-uagb-buttons .uagb-block-1c92b98f .uagb-buttons-repeater .uagb-button__icon-position-before{margin-right: 8px;}.wp-block-uagb-buttons .uagb-block-1c92b98f .uagb-button__link{text-transform: normal;text-decoration: none;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-31e52f06{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-31e52f06 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-31e52f06 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-31e52f06 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-31e52f06 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-31e52f06 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-31e52f06 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 24px;}.wp-block-uagb-container.uagb-block-31e52f06{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 24px;overflow: visible;border-color: inherit;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-fe6bf0bb{max-width: 65%;width: 100%;}.wp-block-uagb-container.uagb-block-fe6bf0bb .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-fe6bf0bb .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-fe6bf0bb .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-fe6bf0bb .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-fe6bf0bb .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-fe6bf0bb > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 28px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-fe6bf0bb{box-shadow: 0px 0px   #00000070 ;padding-top: 48px;padding-bottom: 48px;padding-left: 48px;padding-right: 48px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 28px;column-gap: 0px;overflow: visible;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-color: inherit;background-color: var(--ast-global-color-5);;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-4eb9ca05 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-4eb9ca05 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-4eb9ca05 .uagb-ifb-icon svg{fill: #333;}.uagb-block-4eb9ca05.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-4eb9ca05 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-4eb9ca05 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-4eb9ca05.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-4eb9ca05.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-4eb9ca05 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-4eb9ca05 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-4eb9ca05 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-4eb9ca05 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-4eb9ca05.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-4eb9ca05.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-4eb9ca05.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-4eb9ca05.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-4eb9ca05 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{color: var(--ast-global-color-2);margin-bottom: 24px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-4eb9ca05.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-4eb9ca05.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-4eb9ca05 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-4eb9ca05 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-4eb9ca05 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-4eb9ca05 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-4eb9ca05.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-4eb9ca05.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-4eb9ca05 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-4eb9ca05.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-4eb9ca05.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-4eb9ca05 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-4eb9ca05.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-4eb9ca05 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-4eb9ca05 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-4eb9ca05.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-ec698a70.wp-block-uagb-buttons.uagb-buttons__outer-wrap .uagb-buttons__wrap {column-gap: 0px;}.uagb-block-ec698a70.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-1069010a .wp-block-button__link{background: transparent;}.wp-block-uagb-buttons .uagb-block-1069010a .wp-block-button__link:hover{background: transparent;}.wp-block-uagb-buttons .uagb-block-1069010a .wp-block-button__link:focus{background: transparent;}.wp-block-uagb-buttons .uagb-block-1069010a .uagb-button__wrapper .uagb-buttons-repeater{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;color: var(--ast-global-color-2);margin-top: 0px;margin-bottom: 0px;margin-left: 0px;margin-right: 0px;}.wp-block-uagb-buttons .uagb-block-1069010a .wp-block-button__link.has-text-color:hover .uagb-button__link{color: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-1069010a .wp-block-button__link.has-text-color:focus .uagb-button__link{color: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-1069010a .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link{margin-top: 0px;margin-bottom: 0px;margin-left: 0px;margin-right: 0px;box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-1069010a .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link:hover{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-1069010a .uagb-buttons-repeater .uagb-button__link{color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-1069010a .uagb-buttons-repeater:hover .uagb-button__link{color: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-1069010a .uagb-buttons-repeater:focus .uagb-button__link{color: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-1069010a .uagb-buttons-repeater .uagb-button__icon > svg{width: 15px;height: 15px;fill: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-1069010a .uagb-buttons-repeater:hover .uagb-button__icon > svg{fill: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-1069010a .uagb-buttons-repeater:focus .uagb-button__icon > svg{fill: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-1069010a .uagb-buttons-repeater .uagb-button__icon-position-after{margin-left: 8px;}.wp-block-uagb-buttons .uagb-block-1069010a .uagb-buttons-repeater .uagb-button__icon-position-before{margin-right: 8px;}.wp-block-uagb-buttons .uagb-block-1069010a .uagb-button__link{text-transform: normal;text-decoration: none;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-6a50ee5a{max-width: 35%;width: 100%;}.wp-block-uagb-container.uagb-block-6a50ee5a .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-6a50ee5a .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-6a50ee5a .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-6a50ee5a .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-6a50ee5a .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-6a50ee5a > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 28px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-6a50ee5a{box-shadow: 0px 0px   #00000070 ;padding-top: 48px;padding-bottom: 48px;padding-left: 48px;padding-right: 48px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 28px;column-gap: 0px;overflow: visible;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-color: inherit;background-color: var(--ast-global-color-5);;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-e08816f7 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-e08816f7 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-e08816f7 .uagb-ifb-icon svg{fill: #333;}.uagb-block-e08816f7.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-e08816f7 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-e08816f7 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-e08816f7.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-e08816f7.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-e08816f7 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-e08816f7 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-e08816f7 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-e08816f7 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-e08816f7.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-e08816f7.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-e08816f7.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-e08816f7.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-e08816f7 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{color: var(--ast-global-color-2);margin-bottom: 24px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-e08816f7.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-e08816f7.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-e08816f7 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-e08816f7 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-e08816f7 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-e08816f7 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-e08816f7.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-e08816f7.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-e08816f7 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-e08816f7.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-e08816f7.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-e08816f7 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-e08816f7.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-e08816f7 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-e08816f7 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-e08816f7.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-5526b062.wp-block-uagb-buttons.uagb-buttons__outer-wrap .uagb-buttons__wrap {column-gap: 0px;}.uagb-block-5526b062.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-12ccfa2f .wp-block-button__link{background: transparent;}.wp-block-uagb-buttons .uagb-block-12ccfa2f .wp-block-button__link:hover{background: transparent;}.wp-block-uagb-buttons .uagb-block-12ccfa2f .wp-block-button__link:focus{background: transparent;}.wp-block-uagb-buttons .uagb-block-12ccfa2f .uagb-button__wrapper .uagb-buttons-repeater{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;color: var(--ast-global-color-2);margin-top: 0px;margin-bottom: 0px;margin-left: 0px;margin-right: 0px;}.wp-block-uagb-buttons .uagb-block-12ccfa2f .wp-block-button__link.has-text-color:hover .uagb-button__link{color: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-12ccfa2f .wp-block-button__link.has-text-color:focus .uagb-button__link{color: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-12ccfa2f .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link{margin-top: 0px;margin-bottom: 0px;margin-left: 0px;margin-right: 0px;box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-12ccfa2f .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link:hover{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-12ccfa2f .uagb-buttons-repeater .uagb-button__link{color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-12ccfa2f .uagb-buttons-repeater:hover .uagb-button__link{color: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-12ccfa2f .uagb-buttons-repeater:focus .uagb-button__link{color: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-12ccfa2f .uagb-buttons-repeater .uagb-button__icon > svg{width: 15px;height: 15px;fill: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-12ccfa2f .uagb-buttons-repeater:hover .uagb-button__icon > svg{fill: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-12ccfa2f .uagb-buttons-repeater:focus .uagb-button__icon > svg{fill: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-12ccfa2f .uagb-buttons-repeater .uagb-button__icon-position-after{margin-left: 8px;}.wp-block-uagb-buttons .uagb-block-12ccfa2f .uagb-buttons-repeater .uagb-button__icon-position-before{margin-right: 8px;}.wp-block-uagb-buttons .uagb-block-12ccfa2f .uagb-button__link{text-transform: normal;text-decoration: none;}@media only screen and (max-width: 976px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-c1b99237{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-c1b99237 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 40px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-c1b99237{padding-top: 80px;padding-bottom: 80px;padding-left: 32px;padding-right: 32px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 40px;column-gap: 0px;background-color: var(--ast-global-color-4);;}.uagb-block-6d775aeb.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-6d775aeb.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0%;margin-top: 0%;margin-left: 8%;margin-right: 8%;}.uagb-block-6d775aeb.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-6d775aeb.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-6d775aeb.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-6d775aeb .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-6d775aeb .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-6d775aeb .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-6d775aeb .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-6d775aeb .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-6d775aeb.uagb-infobox__content-wrap{padding-top: 0%;padding-right: 0%;padding-bottom: 0%;padding-left: 0%;}.uagb-block-6d775aeb .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-6d775aeb.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-6d775aeb .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-6d775aeb .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-6d775aeb.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-d6f82612{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-d6f82612 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-d6f82612{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-189143de{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-189143de > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;row-gap: 0px;column-gap: 24px;}.wp-block-uagb-container.uagb-block-189143de{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 24px;align-items: stretch;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-d06d7a5c{max-width: 40%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-d06d7a5c > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-d06d7a5c{padding-top: 24px;padding-bottom: 24px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;background-color: var(--ast-global-color-5);;}.uagb-block-1b7c4e47 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-1b7c4e47.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-1b7c4e47.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-1b7c4e47.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-1b7c4e47.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-1b7c4e47.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-1b7c4e47 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-1b7c4e47 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-1b7c4e47 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-1b7c4e47 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-1b7c4e47 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-1b7c4e47.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-1b7c4e47 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-1b7c4e47.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-1b7c4e47 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-1b7c4e47 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-1b7c4e47.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-09a29917.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-6bd2d184 .uagb-buttons-repeater .uagb-button__icon > svg{fill: var(--ast-global-color-2);}.wp-block-uagb-container.uagb-is-root-container .uagb-block-0b091f96{max-width: 60%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-0b091f96 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-0b091f96{padding-top: 24px;padding-bottom: 24px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;background-color: var(--ast-global-color-5);;}.uagb-block-c794e651 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-c794e651.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-c794e651.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-c794e651.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-c794e651.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-c794e651.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-c794e651 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-c794e651 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-c794e651 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-c794e651 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-c794e651 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-c794e651.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-c794e651 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-c794e651.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-c794e651 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-c794e651 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-c794e651.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-f9d9931e.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-1c92b98f .uagb-buttons-repeater .uagb-button__icon > svg{fill: var(--ast-global-color-2);}.wp-block-uagb-container.uagb-is-root-container .uagb-block-31e52f06{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-31e52f06 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;row-gap: 0px;column-gap: 24px;}.wp-block-uagb-container.uagb-block-31e52f06{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 24px;align-items: stretch;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-fe6bf0bb{max-width: 60%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-fe6bf0bb > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-fe6bf0bb{padding-top: 24px;padding-bottom: 24px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;background-color: var(--ast-global-color-5);;}.uagb-block-4eb9ca05 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-4eb9ca05.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-4eb9ca05.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-4eb9ca05.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-4eb9ca05.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-4eb9ca05.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-4eb9ca05 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-4eb9ca05 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-4eb9ca05 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-4eb9ca05 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-4eb9ca05 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-4eb9ca05.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-4eb9ca05 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-4eb9ca05.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-4eb9ca05 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-4eb9ca05 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-4eb9ca05.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-ec698a70.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-1069010a .uagb-buttons-repeater .uagb-button__icon > svg{fill: var(--ast-global-color-2);}.wp-block-uagb-container.uagb-is-root-container .uagb-block-6a50ee5a{max-width: 40%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-6a50ee5a > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-6a50ee5a{padding-top: 24px;padding-bottom: 24px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;background-color: var(--ast-global-color-5);;}.uagb-block-e08816f7 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-e08816f7.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-e08816f7.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-e08816f7.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-e08816f7.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-e08816f7.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-e08816f7 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-e08816f7 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-e08816f7 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-e08816f7 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-e08816f7 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-e08816f7.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-e08816f7 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-e08816f7.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-e08816f7 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-e08816f7 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-e08816f7.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-5526b062.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-12ccfa2f .uagb-buttons-repeater .uagb-button__icon > svg{fill: var(--ast-global-color-2);}}@media only screen and (max-width: 767px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-c1b99237{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-c1b99237 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 40px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-c1b99237{padding-top: 64px;padding-bottom: 64px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 40px;column-gap: 0px;background-color: var(--ast-global-color-4);;}.uagb-block-6d775aeb.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-6d775aeb.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-6d775aeb.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-6d775aeb.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-6d775aeb .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-6d775aeb .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-6d775aeb.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-6d775aeb .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-6d775aeb .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-6d775aeb .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-6d775aeb.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-6d775aeb .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-6d775aeb.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-6d775aeb .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-6d775aeb .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-6d775aeb.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-d6f82612{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-d6f82612 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-d6f82612{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-189143de{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-189143de > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;flex-wrap: wrap;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-189143de{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;align-items: stretch;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-d06d7a5c{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-d06d7a5c > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 20px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-d06d7a5c{padding-top: 24px;padding-bottom: 24px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 20px;column-gap: 0px;background-color: var(--ast-global-color-5);;flex-wrap: wrap;}.uagb-block-1b7c4e47 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-1b7c4e47.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-1b7c4e47.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-1b7c4e47.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-1b7c4e47 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-1b7c4e47 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-1b7c4e47.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-1b7c4e47 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-1b7c4e47 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-1b7c4e47 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-1b7c4e47 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-1b7c4e47.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-1b7c4e47 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-1b7c4e47 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-1b7c4e47.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-09a29917.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-6bd2d184 .uagb-buttons-repeater .uagb-button__icon > svg{fill: var(--ast-global-color-2);}.wp-block-uagb-container.uagb-is-root-container .uagb-block-0b091f96{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-0b091f96 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 20px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-0b091f96{padding-top: 24px;padding-bottom: 24px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 20px;column-gap: 0px;background-color: var(--ast-global-color-5);;flex-wrap: wrap;}.uagb-block-c794e651 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-c794e651.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-c794e651.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-c794e651.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-c794e651 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-c794e651 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-c794e651.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-c794e651 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-c794e651 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-c794e651 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-c794e651 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-c794e651.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-c794e651 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-c794e651 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-c794e651.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-f9d9931e.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-1c92b98f .uagb-buttons-repeater .uagb-button__icon > svg{fill: var(--ast-global-color-2);}.wp-block-uagb-container.uagb-is-root-container .uagb-block-31e52f06{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-31e52f06 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;flex-wrap: wrap;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-31e52f06{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;align-items: stretch;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-fe6bf0bb{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-fe6bf0bb > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 20px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-fe6bf0bb{padding-top: 24px;padding-bottom: 24px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 20px;column-gap: 0px;background-color: var(--ast-global-color-5);;flex-wrap: wrap;}.uagb-block-4eb9ca05 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-4eb9ca05.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-4eb9ca05.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-4eb9ca05.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-4eb9ca05 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-4eb9ca05 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-4eb9ca05.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-4eb9ca05 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-4eb9ca05 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-4eb9ca05 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-4eb9ca05 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-4eb9ca05.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-4eb9ca05 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-4eb9ca05 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-4eb9ca05.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-ec698a70.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-1069010a .uagb-buttons-repeater .uagb-button__icon > svg{fill: var(--ast-global-color-2);}.wp-block-uagb-container.uagb-is-root-container .uagb-block-6a50ee5a{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-6a50ee5a > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 20px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-6a50ee5a{padding-top: 24px;padding-bottom: 24px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 20px;column-gap: 0px;background-color: var(--ast-global-color-5);;flex-wrap: wrap;}.uagb-block-e08816f7 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-e08816f7.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-e08816f7.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-e08816f7.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-e08816f7 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-e08816f7 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-e08816f7.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-e08816f7 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-e08816f7 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-e08816f7 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-e08816f7 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-e08816f7.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-e08816f7 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-e08816f7 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-e08816f7.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-5526b062.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-12ccfa2f .uagb-buttons-repeater .uagb-button__icon > svg{fill: var(--ast-global-color-2);}}";s:7:"content";s:6682:"
<div class="wp-block-uagb-container uagb-block-c1b99237 alignfull uagb-is-root-container"><div class="uagb-container-inner-blocks-wrap">
<div class="wp-block-uagb-info-box uagb-block-6d775aeb uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h2 class="uagb-ifb-title">Innovative Solutions for Growth</h2></div><p class="uagb-ifb-desc">Explore our comprehensive selection of services that cater to a variety of needs, ensuring complete customer satisfaction.</p></div></div>



<div class="wp-block-uagb-container uagb-block-d6f82612">
<div class="wp-block-uagb-container uagb-block-189143de">
<div class="wp-block-uagb-container uagb-block-d06d7a5c">
<div class="wp-block-uagb-info-box uagb-block-1b7c4e47 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h6 class="uagb-ifb-title-prefix">Prefix 1</h6><h5 class="uagb-ifb-title">Service 1</h5></div><p class="uagb-ifb-desc">This is a flexible section where you can share anything you want. It could be details or some information about your service one.</p></div></div>



<div class="wp-block-uagb-buttons uagb-buttons__outer-wrap uagb-btn__default-btn uagb-btn-tablet__default-btn uagb-btn-mobile__default-btn uagb-block-09a29917"><div class="uagb-buttons__wrap uagb-buttons-layout-wrap">
<div class="wp-block-uagb-buttons-child uagb-buttons__outer-wrap uagb-block-6bd2d184 wp-block-button"><div class="uagb-button__wrapper"><a class="uagb-buttons-repeater wp-block-button__link" href="#" onclick="return false;" rel="follow noopener" target="_self"><div class="uagb-button__link">Learn More</div><span class="uagb-button__icon uagb-button__icon-position-after"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 320 512"><path d="M96 480c-8.188 0-16.38-3.125-22.62-9.375c-12.5-12.5-12.5-32.75 0-45.25L242.8 256L73.38 86.63c-12.5-12.5-12.5-32.75 0-45.25s32.75-12.5 45.25 0l192 192c12.5 12.5 12.5 32.75 0 45.25l-192 192C112.4 476.9 104.2 480 96 480z"></path></svg></span></a></div></div>
</div></div>
</div>



<div class="wp-block-uagb-container uagb-block-0b091f96">
<div class="wp-block-uagb-info-box uagb-block-c794e651 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h6 class="uagb-ifb-title-prefix">Prefix 2</h6><h5 class="uagb-ifb-title">Service 2</h5></div><p class="uagb-ifb-desc">This is a flexible section where you can share anything you want. It could be details or some information about your service two.</p></div></div>



<div class="wp-block-uagb-buttons uagb-buttons__outer-wrap uagb-btn__default-btn uagb-btn-tablet__default-btn uagb-btn-mobile__default-btn uagb-block-f9d9931e"><div class="uagb-buttons__wrap uagb-buttons-layout-wrap">
<div class="wp-block-uagb-buttons-child uagb-buttons__outer-wrap uagb-block-1c92b98f wp-block-button"><div class="uagb-button__wrapper"><a class="uagb-buttons-repeater wp-block-button__link" href="#" onclick="return false;" rel="follow noopener" target="_self"><div class="uagb-button__link">Learn More</div><span class="uagb-button__icon uagb-button__icon-position-after"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 320 512"><path d="M96 480c-8.188 0-16.38-3.125-22.62-9.375c-12.5-12.5-12.5-32.75 0-45.25L242.8 256L73.38 86.63c-12.5-12.5-12.5-32.75 0-45.25s32.75-12.5 45.25 0l192 192c12.5 12.5 12.5 32.75 0 45.25l-192 192C112.4 476.9 104.2 480 96 480z"></path></svg></span></a></div></div>
</div></div>
</div>
</div>



<div class="wp-block-uagb-container uagb-block-31e52f06">
<div class="wp-block-uagb-container uagb-block-fe6bf0bb">
<div class="wp-block-uagb-info-box uagb-block-4eb9ca05 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h6 class="uagb-ifb-title-prefix">Prefix 3</h6><h5 class="uagb-ifb-title">Service 3</h5></div><p class="uagb-ifb-desc">This is a flexible section where you can share anything you want. It could be details or some information about your service 3.</p></div></div>



<div class="wp-block-uagb-buttons uagb-buttons__outer-wrap uagb-btn__default-btn uagb-btn-tablet__default-btn uagb-btn-mobile__default-btn uagb-block-ec698a70"><div class="uagb-buttons__wrap uagb-buttons-layout-wrap">
<div class="wp-block-uagb-buttons-child uagb-buttons__outer-wrap uagb-block-1069010a wp-block-button"><div class="uagb-button__wrapper"><a class="uagb-buttons-repeater wp-block-button__link" href="#" onclick="return false;" rel="follow noopener" target="_self"><div class="uagb-button__link">Learn More</div><span class="uagb-button__icon uagb-button__icon-position-after"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 320 512"><path d="M96 480c-8.188 0-16.38-3.125-22.62-9.375c-12.5-12.5-12.5-32.75 0-45.25L242.8 256L73.38 86.63c-12.5-12.5-12.5-32.75 0-45.25s32.75-12.5 45.25 0l192 192c12.5 12.5 12.5 32.75 0 45.25l-192 192C112.4 476.9 104.2 480 96 480z"></path></svg></span></a></div></div>
</div></div>
</div>



<div class="wp-block-uagb-container uagb-block-6a50ee5a">
<div class="wp-block-uagb-info-box uagb-block-e08816f7 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h6 class="uagb-ifb-title-prefix">Prefix 4</h6><h5 class="uagb-ifb-title">Service 4</h5></div><p class="uagb-ifb-desc">This is a flexible section where you can share anything you want. It could be details or some information about your service 4.</p></div></div>



<div class="wp-block-uagb-buttons uagb-buttons__outer-wrap uagb-btn__default-btn uagb-btn-tablet__default-btn uagb-btn-mobile__default-btn uagb-block-5526b062"><div class="uagb-buttons__wrap uagb-buttons-layout-wrap">
<div class="wp-block-uagb-buttons-child uagb-buttons__outer-wrap uagb-block-12ccfa2f wp-block-button"><div class="uagb-button__wrapper"><a class="uagb-buttons-repeater wp-block-button__link" href="#" onclick="return false;" rel="follow noopener" target="_self"><div class="uagb-button__link">Learn More</div><span class="uagb-button__icon uagb-button__icon-position-after"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 320 512"><path d="M96 480c-8.188 0-16.38-3.125-22.62-9.375c-12.5-12.5-12.5-32.75 0-45.25L242.8 256L73.38 86.63c-12.5-12.5-12.5-32.75 0-45.25s32.75-12.5 45.25 0l192 192c12.5 12.5 12.5 32.75 0 45.25l-192 192C112.4 476.9 104.2 480 96 480z"></path></svg></span></a></div></div>
</div></div>
</div>
</div>
</div>
</div></div>
";}s:8:"id-77042";a:10:{s:5:"title";s:11:"Services 10";s:3:"url";s:50:"https://websitedemos.net/astra-blocks/services-10/";s:3:"tag";a:0:{}s:8:"category";i:952;s:16:"primary-category";s:0:"";s:4:"type";s:5:"block";s:12:"page-builder";s:9:"gutenberg";s:16:"required-plugins";a:0:{}s:10:"stylesheet";s:90347:".wp-block-uagb-container.uagb-is-root-container .uagb-block-d673aca5{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-d673aca5 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-d673aca5 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-d673aca5 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-d673aca5 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-d673aca5 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-d673aca5 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 48px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-d673aca5{box-shadow: 0px 0px   #00000070 ;padding-top: 112px;padding-bottom: 112px;padding-left: 40px;padding-right: 40px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 48px;column-gap: 0px;overflow: visible;border-color: inherit;background-color: var(--ast-global-color-4);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-cbc14bd8{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-cbc14bd8 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-cbc14bd8 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-cbc14bd8 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-cbc14bd8 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-cbc14bd8 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-cbc14bd8 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-cbc14bd8{box-shadow: 0px 0px   #00000070 ;padding-top: 0%;padding-bottom: 0%;padding-left: 0%;padding-right: 30%;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-f0818517 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-f0818517 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-f0818517 .uagb-ifb-icon svg{fill: #333;}.uagb-block-f0818517.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-f0818517 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-f0818517 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-f0818517.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-f0818517.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-f0818517 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-f0818517 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-f0818517 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-f0818517 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-f0818517.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-f0818517.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-f0818517.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-f0818517.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-f0818517 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-f0818517.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-f0818517.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-f0818517 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-f0818517 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-f0818517 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-f0818517 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-f0818517.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-f0818517.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-f0818517 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-f0818517.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-f0818517 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-f0818517.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-f0818517 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-f0818517 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-f0818517.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-589e2323{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-589e2323 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-589e2323 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-589e2323 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-589e2323 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-589e2323 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-589e2323 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 48px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-589e2323{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 48px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-7dfac154{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-7dfac154 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-7dfac154 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-7dfac154 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-7dfac154 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-7dfac154 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-7dfac154 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 48px;}.wp-block-uagb-container.uagb-block-7dfac154{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 48px;overflow: visible;border-color: inherit;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-a5ef8ac6{max-width: 48%;width: 100%;}.wp-block-uagb-container.uagb-block-a5ef8ac6 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-a5ef8ac6 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-a5ef8ac6 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-a5ef8ac6 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-a5ef8ac6 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-a5ef8ac6 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-a5ef8ac6{box-shadow: 0px 0px   #00000070 ;padding-top: 32px;padding-bottom: 32px;padding-left: 32px;padding-right: 32px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;overflow: visible;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-color: inherit;background-color: var(--ast-global-color-5);;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-b3700dc8.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-b3700dc8 .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-b3700dc8.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-b3700dc8.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;text-align: center;}.uagb-block-b3700dc8.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-b3700dc8.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-b3700dc8.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-b3700dc8.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-b3700dc8.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-b3700dc8.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-b3700dc8.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-b3700dc8.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-b3700dc8.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 300px;}.uagb-block-b3700dc8.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-b3700dc8.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-b3700dc8.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-b3700dc8.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-b4b7afb9 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-b4b7afb9 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-b4b7afb9 .uagb-ifb-icon svg{fill: #333;}.uagb-block-b4b7afb9.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-b4b7afb9 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-b4b7afb9 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-b4b7afb9.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-b4b7afb9.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-b4b7afb9 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-b4b7afb9 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-b4b7afb9 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-b4b7afb9 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-b4b7afb9.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-b4b7afb9.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-b4b7afb9.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-b4b7afb9.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-b4b7afb9 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-b4b7afb9.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-b4b7afb9.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 4px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-b4b7afb9 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-b4b7afb9 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-b4b7afb9 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-b4b7afb9 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-b4b7afb9.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-b4b7afb9.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-b4b7afb9 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-b4b7afb9.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-b4b7afb9 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-b4b7afb9.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-b4b7afb9 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-b4b7afb9 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-b4b7afb9.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-18b19803.wp-block-uagb-buttons.uagb-buttons__outer-wrap .uagb-buttons__wrap {column-gap: 10px;}.uagb-block-18b19803.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-2d62f56e .wp-block-button__link{background: transparent;}.wp-block-uagb-buttons .uagb-block-2d62f56e .wp-block-button__link:hover{background: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-2d62f56e .wp-block-button__link:focus{background: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-2d62f56e .uagb-button__wrapper .uagb-buttons-repeater{color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-2d62f56e .wp-block-button__link.has-text-color:hover .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-2d62f56e .wp-block-button__link.has-text-color:focus .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-2d62f56e .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-2d62f56e .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link:hover{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-2d62f56e .uagb-buttons-repeater.wp-block-button__link{border-top-width: 1px;border-left-width: 1px;border-right-width: 1px;border-bottom-width: 1px;border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-color: var(--ast-global-color-2);border-style: solid;}.wp-block-uagb-buttons .uagb-block-2d62f56e .uagb-buttons-repeater.wp-block-button__link:hover{border-color: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-2d62f56e .uagb-buttons-repeater.wp-block-button__link:focus{border-color: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-2d62f56e.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-top-width: 1px;border-left-width: 1px;border-right-width: 1px;border-bottom-width: 1px;border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-color: var(--ast-global-color-2);border-style: solid;}.wp-block-uagb-buttons .uagb-block-2d62f56e.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater:hover{border-color: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-2d62f56e .uagb-buttons-repeater .uagb-button__link{color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-2d62f56e .uagb-buttons-repeater:hover .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-2d62f56e .uagb-buttons-repeater:focus .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-2d62f56e .uagb-buttons-repeater .uagb-button__icon > svg{width: 15px;height: 15px;fill: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-2d62f56e .uagb-buttons-repeater:hover .uagb-button__icon > svg{fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-2d62f56e .uagb-buttons-repeater:focus .uagb-button__icon > svg{fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-2d62f56e .uagb-buttons-repeater .uagb-button__icon-position-after{margin-left: 8px;}.wp-block-uagb-buttons .uagb-block-2d62f56e .uagb-buttons-repeater .uagb-button__icon-position-before{margin-right: 8px;}.wp-block-uagb-buttons .uagb-block-2d62f56e .uagb-button__link{text-transform: normal;text-decoration: none;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-82db7f74{max-width: 48%;width: 100%;}.wp-block-uagb-container.uagb-block-82db7f74 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-82db7f74 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-82db7f74 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-82db7f74 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-82db7f74 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-82db7f74 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-82db7f74{box-shadow: 0px 0px   #00000070 ;padding-top: 32px;padding-bottom: 32px;padding-left: 32px;padding-right: 32px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;overflow: visible;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-color: inherit;background-color: var(--ast-global-color-5);;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-10040e4e.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-10040e4e .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-10040e4e.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-10040e4e.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;text-align: center;}.uagb-block-10040e4e.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-10040e4e.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-10040e4e.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-10040e4e.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-10040e4e.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-10040e4e.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-10040e4e.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-10040e4e.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-10040e4e.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 300px;}.uagb-block-10040e4e.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-10040e4e.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-10040e4e.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-10040e4e.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-a53485a7 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-a53485a7 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-a53485a7 .uagb-ifb-icon svg{fill: #333;}.uagb-block-a53485a7.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-a53485a7 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-a53485a7 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-a53485a7.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-a53485a7.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-a53485a7 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-a53485a7 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-a53485a7 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-a53485a7 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-a53485a7.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-a53485a7.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-a53485a7.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-a53485a7.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-a53485a7 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-a53485a7.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-a53485a7.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 4px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-a53485a7 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-a53485a7 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-a53485a7 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-a53485a7 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-a53485a7.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-a53485a7.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-a53485a7 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-a53485a7.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-a53485a7 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-a53485a7.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-a53485a7 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-a53485a7 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-a53485a7.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-e2a12e89.wp-block-uagb-buttons.uagb-buttons__outer-wrap .uagb-buttons__wrap {column-gap: 10px;}.uagb-block-e2a12e89.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-fd545a20 .wp-block-button__link{background: transparent;}.wp-block-uagb-buttons .uagb-block-fd545a20 .wp-block-button__link:hover{background: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-fd545a20 .wp-block-button__link:focus{background: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-fd545a20 .uagb-button__wrapper .uagb-buttons-repeater{color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-fd545a20 .wp-block-button__link.has-text-color:hover .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-fd545a20 .wp-block-button__link.has-text-color:focus .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-fd545a20 .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-fd545a20 .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link:hover{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-fd545a20 .uagb-buttons-repeater.wp-block-button__link{border-top-width: 1px;border-left-width: 1px;border-right-width: 1px;border-bottom-width: 1px;border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-color: var(--ast-global-color-2);border-style: solid;}.wp-block-uagb-buttons .uagb-block-fd545a20 .uagb-buttons-repeater.wp-block-button__link:hover{border-color: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-fd545a20 .uagb-buttons-repeater.wp-block-button__link:focus{border-color: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-fd545a20.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-top-width: 1px;border-left-width: 1px;border-right-width: 1px;border-bottom-width: 1px;border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-color: var(--ast-global-color-2);border-style: solid;}.wp-block-uagb-buttons .uagb-block-fd545a20.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater:hover{border-color: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-fd545a20 .uagb-buttons-repeater .uagb-button__link{color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-fd545a20 .uagb-buttons-repeater:hover .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-fd545a20 .uagb-buttons-repeater:focus .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-fd545a20 .uagb-buttons-repeater .uagb-button__icon > svg{width: 15px;height: 15px;fill: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-fd545a20 .uagb-buttons-repeater:hover .uagb-button__icon > svg{fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-fd545a20 .uagb-buttons-repeater:focus .uagb-button__icon > svg{fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-fd545a20 .uagb-buttons-repeater .uagb-button__icon-position-after{margin-left: 8px;}.wp-block-uagb-buttons .uagb-block-fd545a20 .uagb-buttons-repeater .uagb-button__icon-position-before{margin-right: 8px;}.wp-block-uagb-buttons .uagb-block-fd545a20 .uagb-button__link{text-transform: normal;text-decoration: none;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-e9d5ec93{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-e9d5ec93 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-e9d5ec93 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-e9d5ec93 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-e9d5ec93 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-e9d5ec93 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-e9d5ec93 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 48px;}.wp-block-uagb-container.uagb-block-e9d5ec93{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 48px;overflow: visible;border-color: inherit;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-617755ef{max-width: 48%;width: 100%;}.wp-block-uagb-container.uagb-block-617755ef .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-617755ef .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-617755ef .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-617755ef .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-617755ef .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-617755ef > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-617755ef{box-shadow: 0px 0px   #00000070 ;padding-top: 32px;padding-bottom: 32px;padding-left: 32px;padding-right: 32px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;overflow: visible;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-color: inherit;background-color: var(--ast-global-color-5);;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-c39fc380.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-c39fc380 .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-c39fc380.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-c39fc380.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;text-align: center;}.uagb-block-c39fc380.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-c39fc380.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-c39fc380.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-c39fc380.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-c39fc380.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-c39fc380.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-c39fc380.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-c39fc380.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-c39fc380.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 300px;}.uagb-block-c39fc380.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-c39fc380.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-c39fc380.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-c39fc380.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-12ec7dd4 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-12ec7dd4 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-12ec7dd4 .uagb-ifb-icon svg{fill: #333;}.uagb-block-12ec7dd4.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-12ec7dd4 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-12ec7dd4 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-12ec7dd4.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-12ec7dd4.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-12ec7dd4 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-12ec7dd4 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-12ec7dd4 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-12ec7dd4 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-12ec7dd4.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-12ec7dd4.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-12ec7dd4.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-12ec7dd4.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-12ec7dd4 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-12ec7dd4.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-12ec7dd4.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 4px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-12ec7dd4 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-12ec7dd4 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-12ec7dd4 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-12ec7dd4 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-12ec7dd4.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-12ec7dd4.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-12ec7dd4 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-12ec7dd4.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-12ec7dd4 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-12ec7dd4.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-12ec7dd4 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-12ec7dd4 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-12ec7dd4.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-7737c438.wp-block-uagb-buttons.uagb-buttons__outer-wrap .uagb-buttons__wrap {column-gap: 10px;}.uagb-block-7737c438.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-a5a6b940 .wp-block-button__link{background: transparent;}.wp-block-uagb-buttons .uagb-block-a5a6b940 .wp-block-button__link:hover{background: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-a5a6b940 .wp-block-button__link:focus{background: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-a5a6b940 .uagb-button__wrapper .uagb-buttons-repeater{color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-a5a6b940 .wp-block-button__link.has-text-color:hover .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-a5a6b940 .wp-block-button__link.has-text-color:focus .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-a5a6b940 .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-a5a6b940 .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link:hover{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-a5a6b940 .uagb-buttons-repeater.wp-block-button__link{border-top-width: 1px;border-left-width: 1px;border-right-width: 1px;border-bottom-width: 1px;border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-color: var(--ast-global-color-2);border-style: solid;}.wp-block-uagb-buttons .uagb-block-a5a6b940 .uagb-buttons-repeater.wp-block-button__link:hover{border-color: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-a5a6b940 .uagb-buttons-repeater.wp-block-button__link:focus{border-color: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-a5a6b940.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-top-width: 1px;border-left-width: 1px;border-right-width: 1px;border-bottom-width: 1px;border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-color: var(--ast-global-color-2);border-style: solid;}.wp-block-uagb-buttons .uagb-block-a5a6b940.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater:hover{border-color: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-a5a6b940 .uagb-buttons-repeater .uagb-button__link{color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-a5a6b940 .uagb-buttons-repeater:hover .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-a5a6b940 .uagb-buttons-repeater:focus .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-a5a6b940 .uagb-buttons-repeater .uagb-button__icon > svg{width: 15px;height: 15px;fill: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-a5a6b940 .uagb-buttons-repeater:hover .uagb-button__icon > svg{fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-a5a6b940 .uagb-buttons-repeater:focus .uagb-button__icon > svg{fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-a5a6b940 .uagb-buttons-repeater .uagb-button__icon-position-after{margin-left: 8px;}.wp-block-uagb-buttons .uagb-block-a5a6b940 .uagb-buttons-repeater .uagb-button__icon-position-before{margin-right: 8px;}.wp-block-uagb-buttons .uagb-block-a5a6b940 .uagb-button__link{text-transform: normal;text-decoration: none;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-c218e93c{max-width: 48%;width: 100%;}.wp-block-uagb-container.uagb-block-c218e93c .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-c218e93c .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-c218e93c .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-c218e93c .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-c218e93c .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-c218e93c > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-c218e93c{box-shadow: 0px 0px   #00000070 ;padding-top: 32px;padding-bottom: 32px;padding-left: 32px;padding-right: 32px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;overflow: visible;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-color: inherit;background-color: var(--ast-global-color-5);;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-20d6f885.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-20d6f885 .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-20d6f885.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-20d6f885.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;text-align: center;}.uagb-block-20d6f885.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-20d6f885.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-20d6f885.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-20d6f885.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-20d6f885.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-20d6f885.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-20d6f885.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-20d6f885.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-20d6f885.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 300px;}.uagb-block-20d6f885.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-20d6f885.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-20d6f885.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-20d6f885.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-2d72936d .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-2d72936d .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-2d72936d .uagb-ifb-icon svg{fill: #333;}.uagb-block-2d72936d.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-2d72936d .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-2d72936d .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-2d72936d.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-2d72936d.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-2d72936d .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-2d72936d .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-2d72936d .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-2d72936d .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-2d72936d.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-2d72936d.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-2d72936d.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-2d72936d.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-2d72936d .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-2d72936d.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-2d72936d.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 4px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-2d72936d .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-2d72936d .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-2d72936d .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-2d72936d .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-2d72936d.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-2d72936d.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-2d72936d .uagb-infobox__content-wrap{text-align: left;}.uagb-block-2d72936d.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-2d72936d .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-2d72936d.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-2d72936d .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-2d72936d .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-2d72936d.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-eeb2b623.wp-block-uagb-buttons.uagb-buttons__outer-wrap .uagb-buttons__wrap {column-gap: 10px;}.uagb-block-eeb2b623.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-0a426d60 .wp-block-button__link{background: transparent;}.wp-block-uagb-buttons .uagb-block-0a426d60 .wp-block-button__link:hover{background: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-0a426d60 .wp-block-button__link:focus{background: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-0a426d60 .uagb-button__wrapper .uagb-buttons-repeater{color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-0a426d60 .wp-block-button__link.has-text-color:hover .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-0a426d60 .wp-block-button__link.has-text-color:focus .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-0a426d60 .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-0a426d60 .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link:hover{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-0a426d60 .uagb-buttons-repeater.wp-block-button__link{border-top-width: 1px;border-left-width: 1px;border-right-width: 1px;border-bottom-width: 1px;border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-color: var(--ast-global-color-2);border-style: solid;}.wp-block-uagb-buttons .uagb-block-0a426d60 .uagb-buttons-repeater.wp-block-button__link:hover{border-color: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-0a426d60 .uagb-buttons-repeater.wp-block-button__link:focus{border-color: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-0a426d60.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-top-width: 1px;border-left-width: 1px;border-right-width: 1px;border-bottom-width: 1px;border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-color: var(--ast-global-color-2);border-style: solid;}.wp-block-uagb-buttons .uagb-block-0a426d60.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater:hover{border-color: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-0a426d60 .uagb-buttons-repeater .uagb-button__link{color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-0a426d60 .uagb-buttons-repeater:hover .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-0a426d60 .uagb-buttons-repeater:focus .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-0a426d60 .uagb-buttons-repeater .uagb-button__icon > svg{width: 15px;height: 15px;fill: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-0a426d60 .uagb-buttons-repeater:hover .uagb-button__icon > svg{fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-0a426d60 .uagb-buttons-repeater:focus .uagb-button__icon > svg{fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-0a426d60 .uagb-buttons-repeater .uagb-button__icon-position-after{margin-left: 8px;}.wp-block-uagb-buttons .uagb-block-0a426d60 .uagb-buttons-repeater .uagb-button__icon-position-before{margin-right: 8px;}.wp-block-uagb-buttons .uagb-block-0a426d60 .uagb-button__link{text-transform: normal;text-decoration: none;}@media only screen and (max-width: 976px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-d673aca5{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-d673aca5 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 40px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-d673aca5{padding-top: 80px;padding-bottom: 80px;padding-left: 32px;padding-right: 32px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 40px;column-gap: 0px;background-color: var(--ast-global-color-4);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-cbc14bd8{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-cbc14bd8 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-cbc14bd8{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;}.uagb-block-f0818517.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-f0818517.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-f0818517.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-f0818517.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-f0818517.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-f0818517 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-f0818517 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-f0818517 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-f0818517 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-f0818517 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-f0818517 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-f0818517.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-f0818517 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-f0818517 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-f0818517.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-589e2323{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-589e2323 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 40px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-589e2323{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 40px;column-gap: 0px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-7dfac154{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-7dfac154 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;row-gap: 0px;column-gap: 40px;}.wp-block-uagb-container.uagb-block-7dfac154{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 40px;align-items: stretch;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-a5ef8ac6{max-width: 47%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-a5ef8ac6 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-a5ef8ac6{padding-top: 16px;padding-bottom: 16px;padding-left: 16px;padding-right: 16px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;background-color: var(--ast-global-color-5);;}.uagb-block-b3700dc8.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 200px;}.uagb-block-b4b7afb9.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-b4b7afb9.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-b4b7afb9.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-b4b7afb9.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-b4b7afb9.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-b4b7afb9 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-b4b7afb9 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-b4b7afb9 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-b4b7afb9 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-b4b7afb9 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-b4b7afb9.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-b4b7afb9 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-b4b7afb9.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-b4b7afb9 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-b4b7afb9 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-b4b7afb9.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-18b19803.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-2d62f56e.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-style: solid;border-color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-2d62f56e .uagb-buttons-repeater.wp-block-button__link{border-style: solid;border-color: var(--ast-global-color-2);}.wp-block-uagb-container.uagb-is-root-container .uagb-block-82db7f74{max-width: 47%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-82db7f74 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-82db7f74{padding-top: 16px;padding-bottom: 16px;padding-left: 16px;padding-right: 16px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;background-color: var(--ast-global-color-5);;}.uagb-block-10040e4e.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 200px;}.uagb-block-a53485a7.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-a53485a7.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-a53485a7.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-a53485a7.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-a53485a7.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-a53485a7 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-a53485a7 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-a53485a7 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-a53485a7 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-a53485a7 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-a53485a7.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-a53485a7 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-a53485a7.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-a53485a7 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-a53485a7 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-a53485a7.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-e2a12e89.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-fd545a20.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-style: solid;border-color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-fd545a20 .uagb-buttons-repeater.wp-block-button__link{border-style: solid;border-color: var(--ast-global-color-2);}.wp-block-uagb-container.uagb-is-root-container .uagb-block-e9d5ec93{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-e9d5ec93 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;row-gap: 0px;column-gap: 40px;}.wp-block-uagb-container.uagb-block-e9d5ec93{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 40px;align-items: stretch;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-617755ef{max-width: 47%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-617755ef > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-617755ef{padding-top: 16px;padding-bottom: 16px;padding-left: 16px;padding-right: 16px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;background-color: var(--ast-global-color-5);;}.uagb-block-c39fc380.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 200px;}.uagb-block-12ec7dd4.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-12ec7dd4.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-12ec7dd4.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-12ec7dd4.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-12ec7dd4.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-12ec7dd4 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-12ec7dd4 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-12ec7dd4 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-12ec7dd4 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-12ec7dd4 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-12ec7dd4.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-12ec7dd4 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-12ec7dd4.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-12ec7dd4 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-12ec7dd4 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-12ec7dd4.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-7737c438.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-a5a6b940.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-style: solid;border-color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-a5a6b940 .uagb-buttons-repeater.wp-block-button__link{border-style: solid;border-color: var(--ast-global-color-2);}.wp-block-uagb-container.uagb-is-root-container .uagb-block-c218e93c{max-width: 47%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-c218e93c > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-c218e93c{padding-top: 16px;padding-bottom: 16px;padding-left: 16px;padding-right: 16px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;background-color: var(--ast-global-color-5);;}.uagb-block-20d6f885.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 200px;}.uagb-block-2d72936d.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-2d72936d.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-2d72936d.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-2d72936d.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-2d72936d.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-2d72936d .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-2d72936d .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-2d72936d .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-2d72936d .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-2d72936d .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-2d72936d.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-2d72936d .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-2d72936d.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-2d72936d .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-2d72936d .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-2d72936d.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-eeb2b623.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-0a426d60.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-style: solid;border-color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-0a426d60 .uagb-buttons-repeater.wp-block-button__link{border-style: solid;border-color: var(--ast-global-color-2);}}@media only screen and (max-width: 767px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-d673aca5{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-d673aca5 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 40px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-d673aca5{padding-top: 64px;padding-bottom: 64px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 40px;column-gap: 0px;background-color: var(--ast-global-color-4);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-cbc14bd8{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-cbc14bd8 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-cbc14bd8{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;flex-wrap: wrap;}.uagb-block-f0818517.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-f0818517.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-f0818517.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-f0818517.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-f0818517 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-f0818517 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-f0818517.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-f0818517 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-f0818517 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-f0818517 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-f0818517.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-f0818517 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-f0818517.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-f0818517 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-f0818517 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-f0818517.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-589e2323{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-589e2323 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 30px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-589e2323{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 30px;column-gap: 0px;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-7dfac154{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-7dfac154 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;flex-wrap: wrap;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-7dfac154{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;align-items: stretch;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-a5ef8ac6{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-a5ef8ac6 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-a5ef8ac6{padding-top: 16px;padding-bottom: 16px;padding-left: 16px;padding-right: 16px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;background-color: var(--ast-global-color-5);;flex-wrap: wrap;}.uagb-block-b3700dc8.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 200px;}.uagb-block-b4b7afb9.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-b4b7afb9.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-b4b7afb9.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-b4b7afb9.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-b4b7afb9 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-b4b7afb9 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-b4b7afb9.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-b4b7afb9 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-b4b7afb9 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-b4b7afb9 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-b4b7afb9.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-b4b7afb9 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-b4b7afb9.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-b4b7afb9 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-b4b7afb9 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-b4b7afb9.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-18b19803.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-2d62f56e.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-style: solid;border-color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-2d62f56e .uagb-buttons-repeater.wp-block-button__link{border-style: solid;border-color: var(--ast-global-color-2);}.wp-block-uagb-container.uagb-is-root-container .uagb-block-82db7f74{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-82db7f74 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-82db7f74{padding-top: 16px;padding-bottom: 16px;padding-left: 16px;padding-right: 16px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;background-color: var(--ast-global-color-5);;flex-wrap: wrap;}.uagb-block-10040e4e.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 200px;}.uagb-block-a53485a7.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-a53485a7.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-a53485a7.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-a53485a7.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-a53485a7 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-a53485a7 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-a53485a7.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-a53485a7 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-a53485a7 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-a53485a7 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-a53485a7.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-a53485a7 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-a53485a7.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-a53485a7 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-a53485a7 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-a53485a7.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-e2a12e89.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-fd545a20.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-style: solid;border-color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-fd545a20 .uagb-buttons-repeater.wp-block-button__link{border-style: solid;border-color: var(--ast-global-color-2);}.wp-block-uagb-container.uagb-is-root-container .uagb-block-e9d5ec93{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-e9d5ec93 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;flex-wrap: wrap;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-e9d5ec93{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;align-items: stretch;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-617755ef{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-617755ef > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-617755ef{padding-top: 16px;padding-bottom: 16px;padding-left: 16px;padding-right: 16px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;background-color: var(--ast-global-color-5);;flex-wrap: wrap;}.uagb-block-c39fc380.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 200px;}.uagb-block-12ec7dd4.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-12ec7dd4.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-12ec7dd4.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-12ec7dd4.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-12ec7dd4 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-12ec7dd4 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-12ec7dd4.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-12ec7dd4 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-12ec7dd4 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-12ec7dd4 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-12ec7dd4.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-12ec7dd4 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-12ec7dd4.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-12ec7dd4 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-12ec7dd4 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-12ec7dd4.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-7737c438.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-a5a6b940.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-style: solid;border-color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-a5a6b940 .uagb-buttons-repeater.wp-block-button__link{border-style: solid;border-color: var(--ast-global-color-2);}.wp-block-uagb-container.uagb-is-root-container .uagb-block-c218e93c{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-c218e93c > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 24px;}.wp-block-uagb-container.uagb-block-c218e93c{padding-top: 16px;padding-bottom: 16px;padding-left: 16px;padding-right: 16px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;background-color: var(--ast-global-color-5);;flex-wrap: wrap;}.uagb-block-20d6f885.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 200px;}.uagb-block-2d72936d.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-2d72936d.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-2d72936d.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-2d72936d.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-2d72936d .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-2d72936d .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-2d72936d.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-2d72936d .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-2d72936d .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-2d72936d .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-2d72936d.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-2d72936d .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-2d72936d.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-2d72936d .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-2d72936d .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-2d72936d.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-eeb2b623.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-0a426d60.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-style: solid;border-color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-0a426d60 .uagb-buttons-repeater.wp-block-button__link{border-style: solid;border-color: var(--ast-global-color-2);}}";s:7:"content";s:7743:"
<div class="wp-block-uagb-container uagb-block-d673aca5 alignfull uagb-is-root-container"><div class="uagb-container-inner-blocks-wrap">
<div class="wp-block-uagb-container uagb-block-cbc14bd8">
<div class="wp-block-uagb-info-box uagb-block-f0818517 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h2 class="uagb-ifb-title">Innovative Solutions for Growth</h2></div><p class="uagb-ifb-desc">Explore our comprehensive selection of services that cater to a variety of needs, ensuring complete customer satisfaction.</p></div></div>
</div>



<div class="wp-block-uagb-container uagb-block-589e2323">
<div class="wp-block-uagb-container uagb-block-7dfac154">
<div class="wp-block-uagb-container uagb-block-a5ef8ac6">
<div class="wp-block-uagb-image alignleft uagb-block-b3700dc8 wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-left"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/10/natures-01-1024x683.jpg ,https://websitedemos.net/wp-content/uploads/2023/10/natures-01.jpg 780w, https://websitedemos.net/wp-content/uploads/2023/10/natures-01.jpg 360w" sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/10/natures-01-1024x683.jpg" alt="" class="uag-image-80573" width="600" height="300" title="" loading="lazy"/></figure></div>



<div class="wp-block-uagb-info-box uagb-block-b4b7afb9 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h5 class="uagb-ifb-title">Service 1</h5></div><p class="uagb-ifb-desc">This is a flexible section where you can share anything you want. It could be details or some information about your service one.</p></div></div>



<div class="wp-block-uagb-buttons uagb-buttons__outer-wrap uagb-btn__default-btn uagb-btn-tablet__default-btn uagb-btn-mobile__default-btn uagb-block-18b19803"><div class="uagb-buttons__wrap uagb-buttons-layout-wrap">
<div class="wp-block-uagb-buttons-child uagb-buttons__outer-wrap uagb-block-2d62f56e wp-block-button"><div class="uagb-button__wrapper"><a class="uagb-buttons-repeater wp-block-button__link" href="#" onclick="return false;" rel="follow noopener" target="_self"><div class="uagb-button__link">Get Started</div></a></div></div>
</div></div>
</div>



<div class="wp-block-uagb-container uagb-block-82db7f74">
<div class="wp-block-uagb-image alignleft uagb-block-10040e4e wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-left"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/10/desserts-01-1024x683.jpg ,https://websitedemos.net/wp-content/uploads/2023/10/desserts-01.jpg 780w, https://websitedemos.net/wp-content/uploads/2023/10/desserts-01.jpg 360w" sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/10/desserts-01-1024x683.jpg" alt="" class="uag-image-80569" width="600" height="300" title="" loading="lazy"/></figure></div>



<div class="wp-block-uagb-info-box uagb-block-a53485a7 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h5 class="uagb-ifb-title">Service 2</h5></div><p class="uagb-ifb-desc">This is a flexible section where you can share anything you want. It could be details or some information about your service two.</p></div></div>



<div class="wp-block-uagb-buttons uagb-buttons__outer-wrap uagb-btn__default-btn uagb-btn-tablet__default-btn uagb-btn-mobile__default-btn uagb-block-e2a12e89"><div class="uagb-buttons__wrap uagb-buttons-layout-wrap">
<div class="wp-block-uagb-buttons-child uagb-buttons__outer-wrap uagb-block-fd545a20 wp-block-button"><div class="uagb-button__wrapper"><a class="uagb-buttons-repeater wp-block-button__link" href="#" onclick="return false;" rel="follow noopener" target="_self"><div class="uagb-button__link">Get Started</div></a></div></div>
</div></div>
</div>
</div>



<div class="wp-block-uagb-container uagb-block-e9d5ec93">
<div class="wp-block-uagb-container uagb-block-617755ef">
<div class="wp-block-uagb-image alignleft uagb-block-c39fc380 wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-left"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/10/snow-mountains-01-1024x683.jpg ,https://websitedemos.net/wp-content/uploads/2023/10/snow-mountains-01.jpg 780w, https://websitedemos.net/wp-content/uploads/2023/10/snow-mountains-01.jpg 360w" sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/10/snow-mountains-01-1024x683.jpg" alt="" class="uag-image-80577" width="600" height="300" title="" loading="lazy"/></figure></div>



<div class="wp-block-uagb-info-box uagb-block-12ec7dd4 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h5 class="uagb-ifb-title">Service 3</h5></div><p class="uagb-ifb-desc">This is a flexible section where you can share anything you want. It could be details or some information about your service 3.</p></div></div>



<div class="wp-block-uagb-buttons uagb-buttons__outer-wrap uagb-btn__default-btn uagb-btn-tablet__default-btn uagb-btn-mobile__default-btn uagb-block-7737c438"><div class="uagb-buttons__wrap uagb-buttons-layout-wrap">
<div class="wp-block-uagb-buttons-child uagb-buttons__outer-wrap uagb-block-a5a6b940 wp-block-button"><div class="uagb-button__wrapper"><a class="uagb-buttons-repeater wp-block-button__link" href="#" onclick="return false;" rel="follow noopener" target="_self"><div class="uagb-button__link">Get Started</div></a></div></div>
</div></div>
</div>



<div class="wp-block-uagb-container uagb-block-c218e93c">
<div class="wp-block-uagb-image alignleft uagb-block-20d6f885 wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-left"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/10/mountains-01-1024x683.jpg ,https://websitedemos.net/wp-content/uploads/2023/10/mountains-01.jpg 780w, https://websitedemos.net/wp-content/uploads/2023/10/mountains-01.jpg 360w" sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/10/mountains-01-1024x683.jpg" alt="" class="uag-image-80571" width="600" height="300" title="" loading="lazy"/></figure></div>



<div class="wp-block-uagb-info-box uagb-block-2d72936d uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h5 class="uagb-ifb-title">Service 4</h5></div><p class="uagb-ifb-desc">This is a flexible section where you can share anything you want. It could be details or some information about your service 4.</p></div></div>



<div class="wp-block-uagb-buttons uagb-buttons__outer-wrap uagb-btn__default-btn uagb-btn-tablet__default-btn uagb-btn-mobile__default-btn uagb-block-eeb2b623"><div class="uagb-buttons__wrap uagb-buttons-layout-wrap">
<div class="wp-block-uagb-buttons-child uagb-buttons__outer-wrap uagb-block-0a426d60 wp-block-button"><div class="uagb-button__wrapper"><a class="uagb-buttons-repeater wp-block-button__link" href="#" onclick="return false;" rel="follow noopener" target="_self"><div class="uagb-button__link">Get Started</div></a></div></div>
</div></div>
</div>
</div>
</div>
</div></div>
";}s:8:"id-77150";a:10:{s:5:"title";s:11:"Services 15";s:3:"url";s:50:"https://websitedemos.net/astra-blocks/services-15/";s:3:"tag";a:0:{}s:8:"category";i:952;s:16:"primary-category";s:0:"";s:4:"type";s:5:"block";s:12:"page-builder";s:9:"gutenberg";s:16:"required-plugins";a:0:{}s:10:"stylesheet";s:76510:".wp-block-uagb-container.uagb-is-root-container .uagb-block-d1486fa4{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-d1486fa4 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-d1486fa4 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-d1486fa4 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-d1486fa4 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-d1486fa4 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-d1486fa4 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 48px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-d1486fa4{box-shadow: 0px 0px   #00000070 ;padding-top: 112px;padding-bottom: 112px;padding-left: 40px;padding-right: 40px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 48px;column-gap: 0px;overflow: visible;border-color: inherit;background-color: var(--ast-global-color-4);;}.uagb-block-08247f23 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-08247f23 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-08247f23 .uagb-ifb-icon svg{fill: #333;}.uagb-block-08247f23.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-08247f23 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-08247f23 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-08247f23.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-08247f23.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-08247f23 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-08247f23 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-08247f23 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-08247f23 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-08247f23.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-08247f23.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-08247f23.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-08247f23.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-08247f23 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-08247f23.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-08247f23.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0%;margin-top: 0%;margin-left: 15%;margin-right: 15%;}.uagb-block-08247f23 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-08247f23 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-08247f23 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-08247f23 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-08247f23.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-08247f23.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-08247f23 .uagb-infobox__content-wrap{text-align: center;}.uagb-block-08247f23.uagb-infobox-icon-above-title{text-align: center;}.uagb-block-08247f23.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-08247f23 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-08247f23.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-08247f23 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-08247f23 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-08247f23.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-dba2a2c9{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-dba2a2c9 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-dba2a2c9 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-dba2a2c9 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-dba2a2c9 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-dba2a2c9 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-dba2a2c9 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: stretch;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-dba2a2c9{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: stretch;justify-content: center;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-241ed904{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-241ed904 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-241ed904 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-241ed904 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-241ed904 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-241ed904 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-241ed904 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-241ed904{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-88e05912{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-block-88e05912 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-88e05912 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-88e05912 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-88e05912 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-88e05912 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-88e05912 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-88e05912{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-b4e8d2f2.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-b4e8d2f2 .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-b4e8d2f2.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 0px;border-top-right-radius: 0px;border-bottom-left-radius: 0px;border-bottom-right-radius: 0px;}.uagb-block-b4e8d2f2.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;text-align: center;}.uagb-block-b4e8d2f2.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 0px;border-top-right-radius: 0px;border-bottom-left-radius: 0px;border-bottom-right-radius: 0px;}.uagb-block-b4e8d2f2.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 0px;border-top-right-radius: 0px;border-bottom-left-radius: 0px;border-bottom-right-radius: 0px;}.uagb-block-b4e8d2f2.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-b4e8d2f2.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-b4e8d2f2.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-b4e8d2f2.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-b4e8d2f2.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-b4e8d2f2.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-b4e8d2f2.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 450px;}.uagb-block-b4e8d2f2.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-b4e8d2f2.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-b4e8d2f2.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-b4e8d2f2.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-65b7f731{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-block-65b7f731 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-65b7f731 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-65b7f731 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-65b7f731 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-65b7f731 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-65b7f731 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 32px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-65b7f731{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 72px;padding-right: 72px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 32px;column-gap: 0px;overflow: visible;border-color: inherit;background-color: var(--ast-global-color-5);;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;}.uagb-block-7fcf0987 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-7fcf0987 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-7fcf0987 .uagb-ifb-icon svg{fill: #333;}.uagb-block-7fcf0987.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-7fcf0987 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-7fcf0987 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-7fcf0987.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-7fcf0987.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-7fcf0987 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-7fcf0987 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-7fcf0987 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-7fcf0987 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-7fcf0987.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-7fcf0987.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-7fcf0987.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-7fcf0987.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-7fcf0987 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{color: var(--ast-global-color-2);margin-bottom: 24px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-7fcf0987.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-7fcf0987.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-7fcf0987 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-7fcf0987 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-7fcf0987 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-7fcf0987 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-7fcf0987.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-7fcf0987.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-7fcf0987 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-7fcf0987.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-7fcf0987.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-7fcf0987 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-7fcf0987.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-7fcf0987 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-7fcf0987 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-7fcf0987.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-13fe37e0.wp-block-uagb-buttons.uagb-buttons__outer-wrap .uagb-buttons__wrap {column-gap: 10px;}.uagb-block-13fe37e0.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-90ad841a .wp-block-button__link{background: transparent;}.wp-block-uagb-buttons .uagb-block-90ad841a .wp-block-button__link:hover{background: transparent;}.wp-block-uagb-buttons .uagb-block-90ad841a .wp-block-button__link:focus{background: transparent;}.wp-block-uagb-buttons .uagb-block-90ad841a .uagb-button__wrapper .uagb-buttons-repeater{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;color: var(--ast-global-color-2);margin-top: 0px;margin-bottom: 0px;margin-left: 0px;margin-right: 0px;}.wp-block-uagb-buttons .uagb-block-90ad841a .wp-block-button__link.has-text-color:hover .uagb-button__link{color: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-90ad841a .wp-block-button__link.has-text-color:focus .uagb-button__link{color: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-90ad841a .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link{margin-top: 0px;margin-bottom: 0px;margin-left: 0px;margin-right: 0px;box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-90ad841a .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link:hover{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-90ad841a .uagb-buttons-repeater .uagb-button__link{color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-90ad841a .uagb-buttons-repeater:hover .uagb-button__link{color: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-90ad841a .uagb-buttons-repeater:focus .uagb-button__link{color: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-90ad841a .uagb-buttons-repeater .uagb-button__icon > svg{width: 15px;height: 15px;fill: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-90ad841a .uagb-buttons-repeater:hover .uagb-button__icon > svg{fill: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-90ad841a .uagb-buttons-repeater:focus .uagb-button__icon > svg{fill: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-90ad841a .uagb-buttons-repeater .uagb-button__icon-position-after{margin-left: 8px;}.wp-block-uagb-buttons .uagb-block-90ad841a .uagb-buttons-repeater .uagb-button__icon-position-before{margin-right: 8px;}.wp-block-uagb-buttons .uagb-block-90ad841a .uagb-button__link{text-transform: normal;text-decoration: none;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-bb3f50ff{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-bb3f50ff .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-bb3f50ff .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-bb3f50ff .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-bb3f50ff .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-bb3f50ff .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-bb3f50ff > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-bb3f50ff{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-ced1f7e5{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-block-ced1f7e5 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-ced1f7e5 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-ced1f7e5 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-ced1f7e5 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-ced1f7e5 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-ced1f7e5 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 32px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-ced1f7e5{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 72px;padding-right: 72px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 32px;column-gap: 0px;overflow: visible;border-color: inherit;background-color: var(--ast-global-color-5);;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;}.uagb-block-12b0eb70 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-12b0eb70 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-12b0eb70 .uagb-ifb-icon svg{fill: #333;}.uagb-block-12b0eb70.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-12b0eb70 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-12b0eb70 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-12b0eb70.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-12b0eb70.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-12b0eb70 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-12b0eb70 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-12b0eb70 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-12b0eb70 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-12b0eb70.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-12b0eb70.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-12b0eb70.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-12b0eb70.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-12b0eb70 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{color: var(--ast-global-color-2);margin-bottom: 24px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-12b0eb70.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-12b0eb70.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-12b0eb70 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-12b0eb70 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-12b0eb70 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-12b0eb70 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-12b0eb70.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-12b0eb70.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-12b0eb70 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-12b0eb70.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-12b0eb70.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-12b0eb70 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-12b0eb70.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-12b0eb70 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-12b0eb70 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-12b0eb70.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-8702e6db.wp-block-uagb-buttons.uagb-buttons__outer-wrap .uagb-buttons__wrap {column-gap: 10px;}.uagb-block-8702e6db.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-a2779611 .wp-block-button__link{background: transparent;}.wp-block-uagb-buttons .uagb-block-a2779611 .wp-block-button__link:hover{background: transparent;}.wp-block-uagb-buttons .uagb-block-a2779611 .wp-block-button__link:focus{background: transparent;}.wp-block-uagb-buttons .uagb-block-a2779611 .uagb-button__wrapper .uagb-buttons-repeater{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;color: var(--ast-global-color-2);margin-top: 0px;margin-bottom: 0px;margin-left: 0px;margin-right: 0px;}.wp-block-uagb-buttons .uagb-block-a2779611 .wp-block-button__link.has-text-color:hover .uagb-button__link{color: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-a2779611 .wp-block-button__link.has-text-color:focus .uagb-button__link{color: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-a2779611 .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link{margin-top: 0px;margin-bottom: 0px;margin-left: 0px;margin-right: 0px;box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-a2779611 .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link:hover{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-a2779611 .uagb-buttons-repeater .uagb-button__link{color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-a2779611 .uagb-buttons-repeater:hover .uagb-button__link{color: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-a2779611 .uagb-buttons-repeater:focus .uagb-button__link{color: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-a2779611 .uagb-buttons-repeater .uagb-button__icon > svg{width: 15px;height: 15px;fill: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-a2779611 .uagb-buttons-repeater:hover .uagb-button__icon > svg{fill: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-a2779611 .uagb-buttons-repeater:focus .uagb-button__icon > svg{fill: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-a2779611 .uagb-buttons-repeater .uagb-button__icon-position-after{margin-left: 8px;}.wp-block-uagb-buttons .uagb-block-a2779611 .uagb-buttons-repeater .uagb-button__icon-position-before{margin-right: 8px;}.wp-block-uagb-buttons .uagb-block-a2779611 .uagb-button__link{text-transform: normal;text-decoration: none;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-adbcec80{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-block-adbcec80 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-adbcec80 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-adbcec80 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-adbcec80 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-adbcec80 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-adbcec80 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-adbcec80{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-4802b0c5.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-4802b0c5 .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-4802b0c5.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 0px;border-top-right-radius: 0px;border-bottom-left-radius: 0px;border-bottom-right-radius: 0px;}.uagb-block-4802b0c5.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;text-align: center;}.uagb-block-4802b0c5.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 0px;border-top-right-radius: 0px;border-bottom-left-radius: 0px;border-bottom-right-radius: 0px;}.uagb-block-4802b0c5.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 0px;border-top-right-radius: 0px;border-bottom-left-radius: 0px;border-bottom-right-radius: 0px;}.uagb-block-4802b0c5.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-4802b0c5.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-4802b0c5.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-4802b0c5.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-4802b0c5.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-4802b0c5.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-4802b0c5.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 450px;}.uagb-block-4802b0c5.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-4802b0c5.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-4802b0c5.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-4802b0c5.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-5dd9d44a{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-5dd9d44a .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-5dd9d44a .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-5dd9d44a .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-5dd9d44a .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-5dd9d44a .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-5dd9d44a > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-5dd9d44a{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-260d7990{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-block-260d7990 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-260d7990 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-260d7990 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-260d7990 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-260d7990 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-260d7990 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-260d7990{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-19461998.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-19461998 .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-19461998.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 0px;border-top-right-radius: 0px;border-bottom-left-radius: 0px;border-bottom-right-radius: 0px;}.uagb-block-19461998.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;text-align: center;}.uagb-block-19461998.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 0px;border-top-right-radius: 0px;border-bottom-left-radius: 0px;border-bottom-right-radius: 0px;}.uagb-block-19461998.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 0px;border-top-right-radius: 0px;border-bottom-left-radius: 0px;border-bottom-right-radius: 0px;}.uagb-block-19461998.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-19461998.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-19461998.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-19461998.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-19461998.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-19461998.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-19461998.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 450px;}.uagb-block-19461998.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-19461998.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-19461998.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-19461998.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-aa86ff7d{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-block-aa86ff7d .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-aa86ff7d .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-aa86ff7d .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-aa86ff7d .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-aa86ff7d .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-aa86ff7d > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 32px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-aa86ff7d{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 72px;padding-right: 72px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 32px;column-gap: 0px;overflow: visible;border-color: inherit;background-color: var(--ast-global-color-5);;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;}.uagb-block-95b1afba .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-95b1afba .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-95b1afba .uagb-ifb-icon svg{fill: #333;}.uagb-block-95b1afba.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-95b1afba .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-95b1afba .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-95b1afba.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-95b1afba.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-95b1afba .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-95b1afba .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-95b1afba .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-95b1afba .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-95b1afba.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-95b1afba.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-95b1afba.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-95b1afba.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-95b1afba .uagb-ifb-title-wrap .uagb-ifb-title-prefix{color: var(--ast-global-color-2);margin-bottom: 24px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-95b1afba.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-95b1afba.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-95b1afba .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-95b1afba .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-95b1afba .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-95b1afba .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-95b1afba.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-95b1afba.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-95b1afba .uagb-infobox__content-wrap{text-align: left;}.uagb-block-95b1afba.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-95b1afba.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-95b1afba .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-95b1afba.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-95b1afba .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-95b1afba .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-95b1afba.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-8a8b08f1.wp-block-uagb-buttons.uagb-buttons__outer-wrap .uagb-buttons__wrap {column-gap: 10px;}.uagb-block-8a8b08f1.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-dfbd259e .wp-block-button__link{background: transparent;}.wp-block-uagb-buttons .uagb-block-dfbd259e .wp-block-button__link:hover{background: transparent;}.wp-block-uagb-buttons .uagb-block-dfbd259e .wp-block-button__link:focus{background: transparent;}.wp-block-uagb-buttons .uagb-block-dfbd259e .uagb-button__wrapper .uagb-buttons-repeater{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;color: var(--ast-global-color-2);margin-top: 0px;margin-bottom: 0px;margin-left: 0px;margin-right: 0px;}.wp-block-uagb-buttons .uagb-block-dfbd259e .wp-block-button__link.has-text-color:hover .uagb-button__link{color: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-dfbd259e .wp-block-button__link.has-text-color:focus .uagb-button__link{color: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-dfbd259e .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link{margin-top: 0px;margin-bottom: 0px;margin-left: 0px;margin-right: 0px;box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-dfbd259e .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link:hover{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-dfbd259e .uagb-buttons-repeater .uagb-button__link{color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-dfbd259e .uagb-buttons-repeater:hover .uagb-button__link{color: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-dfbd259e .uagb-buttons-repeater:focus .uagb-button__link{color: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-dfbd259e .uagb-buttons-repeater .uagb-button__icon > svg{width: 15px;height: 15px;fill: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-dfbd259e .uagb-buttons-repeater:hover .uagb-button__icon > svg{fill: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-dfbd259e .uagb-buttons-repeater:focus .uagb-button__icon > svg{fill: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-dfbd259e .uagb-buttons-repeater .uagb-button__icon-position-after{margin-left: 8px;}.wp-block-uagb-buttons .uagb-block-dfbd259e .uagb-buttons-repeater .uagb-button__icon-position-before{margin-right: 8px;}.wp-block-uagb-buttons .uagb-block-dfbd259e .uagb-button__link{text-transform: normal;text-decoration: none;}@media only screen and (max-width: 976px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-d1486fa4{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-d1486fa4 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 40px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-d1486fa4{padding-top: 80px;padding-bottom: 80px;padding-left: 32px;padding-right: 32px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 40px;column-gap: 0px;background-color: var(--ast-global-color-4);;}.uagb-block-08247f23.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-08247f23.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0%;margin-top: 0%;margin-left: 8%;margin-right: 8%;}.uagb-block-08247f23.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-08247f23.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-08247f23.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-08247f23 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-08247f23 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-08247f23 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-08247f23 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-08247f23 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-08247f23.uagb-infobox__content-wrap{padding-top: 0%;padding-right: 0%;padding-bottom: 0%;padding-left: 0%;}.uagb-block-08247f23 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-08247f23.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-08247f23 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-08247f23 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-08247f23.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-dba2a2c9{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-dba2a2c9 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-dba2a2c9{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;align-items: stretch;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-241ed904{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-241ed904 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-241ed904{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;align-items: stretch;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-88e05912{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-88e05912 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-88e05912{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;}.uagb-block-b4e8d2f2.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 350px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-65b7f731{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-65b7f731 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-65b7f731{padding-top: 0px;padding-bottom: 0px;padding-left: 32px;padding-right: 32px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;background-color: var(--ast-global-color-5);;}.uagb-block-7fcf0987 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-7fcf0987.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-7fcf0987.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7fcf0987.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-7fcf0987.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-7fcf0987 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-7fcf0987 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-7fcf0987 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-7fcf0987 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7fcf0987 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7fcf0987 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-7fcf0987.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-7fcf0987 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-7fcf0987 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-7fcf0987.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-13fe37e0.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-90ad841a .uagb-buttons-repeater .uagb-button__icon > svg{fill: var(--ast-global-color-2);}.wp-block-uagb-container.uagb-is-root-container .uagb-block-bb3f50ff{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-bb3f50ff > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-bb3f50ff{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;align-items: stretch;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-ced1f7e5{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-ced1f7e5 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-ced1f7e5{padding-top: 0px;padding-bottom: 0px;padding-left: 32px;padding-right: 32px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;background-color: var(--ast-global-color-5);;}.uagb-block-12b0eb70 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-12b0eb70.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-12b0eb70.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-12b0eb70.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-12b0eb70.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-12b0eb70.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-12b0eb70 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-12b0eb70 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-12b0eb70 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-12b0eb70 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-12b0eb70 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-12b0eb70 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-12b0eb70.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-12b0eb70 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-12b0eb70 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-12b0eb70.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-8702e6db.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-a2779611 .uagb-buttons-repeater .uagb-button__icon > svg{fill: var(--ast-global-color-2);}.wp-block-uagb-container.uagb-is-root-container .uagb-block-adbcec80{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-adbcec80 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-adbcec80{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;}.uagb-block-4802b0c5.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 350px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-5dd9d44a{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-5dd9d44a > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-5dd9d44a{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;align-items: stretch;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-260d7990{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-260d7990 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-260d7990{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;}.uagb-block-19461998.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 350px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-aa86ff7d{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-aa86ff7d > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-aa86ff7d{padding-top: 0px;padding-bottom: 0px;padding-left: 32px;padding-right: 32px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;background-color: var(--ast-global-color-5);;}.uagb-block-95b1afba .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-95b1afba.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-95b1afba.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-95b1afba.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-95b1afba.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-95b1afba .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-95b1afba .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-95b1afba .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-95b1afba .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-95b1afba .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-95b1afba .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-95b1afba.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-95b1afba .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-95b1afba .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-95b1afba.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-8a8b08f1.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-dfbd259e .uagb-buttons-repeater .uagb-button__icon > svg{fill: var(--ast-global-color-2);}}@media only screen and (max-width: 767px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-d1486fa4{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-d1486fa4 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 40px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-d1486fa4{padding-top: 64px;padding-bottom: 64px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 40px;column-gap: 0px;background-color: var(--ast-global-color-4);;}.uagb-block-08247f23.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-08247f23.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-08247f23.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-08247f23.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-08247f23 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-08247f23 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-08247f23.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-08247f23 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-08247f23 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-08247f23 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-08247f23.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-08247f23 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-08247f23.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-08247f23 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-08247f23 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-08247f23.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-dba2a2c9{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-dba2a2c9 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-dba2a2c9{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;align-items: stretch;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-241ed904{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-241ed904 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-241ed904{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;align-items: stretch;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-88e05912{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-88e05912 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-88e05912{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;flex-wrap: wrap;}.uagb-block-b4e8d2f2.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 250px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-65b7f731{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-65b7f731 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 20px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-65b7f731{padding-top: 24px;padding-bottom: 24px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 20px;column-gap: 0px;background-color: var(--ast-global-color-5);;flex-wrap: wrap;}.uagb-block-7fcf0987 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-7fcf0987.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-7fcf0987.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7fcf0987.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-7fcf0987 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7fcf0987 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7fcf0987.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-7fcf0987 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-7fcf0987 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-7fcf0987 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-7fcf0987 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-7fcf0987.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-7fcf0987 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-7fcf0987 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-7fcf0987.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-13fe37e0.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-90ad841a .uagb-buttons-repeater .uagb-button__icon > svg{fill: var(--ast-global-color-2);}.wp-block-uagb-container.uagb-is-root-container .uagb-block-bb3f50ff{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-bb3f50ff > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;flex-wrap: wrap-reverse;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-bb3f50ff{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;align-items: stretch;flex-wrap: wrap-reverse;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-ced1f7e5{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-ced1f7e5 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 20px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-ced1f7e5{padding-top: 24px;padding-bottom: 24px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 20px;column-gap: 0px;background-color: var(--ast-global-color-5);;flex-wrap: wrap;}.uagb-block-12b0eb70 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-12b0eb70.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-12b0eb70.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-12b0eb70.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-12b0eb70 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-12b0eb70 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-12b0eb70.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-12b0eb70 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-12b0eb70 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-12b0eb70 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-12b0eb70 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-12b0eb70.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-12b0eb70 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-12b0eb70 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-12b0eb70.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-8702e6db.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-a2779611 .uagb-buttons-repeater .uagb-button__icon > svg{fill: var(--ast-global-color-2);}.wp-block-uagb-container.uagb-is-root-container .uagb-block-adbcec80{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-adbcec80 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-adbcec80{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;flex-wrap: wrap;}.uagb-block-4802b0c5.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 250px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-5dd9d44a{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-5dd9d44a > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-5dd9d44a{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;align-items: stretch;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-260d7990{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-260d7990 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-260d7990{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;flex-wrap: wrap;}.uagb-block-19461998.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 250px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-aa86ff7d{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-aa86ff7d > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 20px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-aa86ff7d{padding-top: 24px;padding-bottom: 24px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 20px;column-gap: 0px;background-color: var(--ast-global-color-5);;flex-wrap: wrap;}.uagb-block-95b1afba .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-95b1afba.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-95b1afba.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-95b1afba.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-95b1afba .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-95b1afba .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-95b1afba.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-95b1afba .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-95b1afba .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-95b1afba .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-95b1afba .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-95b1afba.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-95b1afba .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-95b1afba .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-95b1afba.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-8a8b08f1.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-dfbd259e .uagb-buttons-repeater .uagb-button__icon > svg{fill: var(--ast-global-color-2);}}";s:7:"content";s:7591:"
<div class="wp-block-uagb-container uagb-block-d1486fa4 alignfull uagb-is-root-container"><div class="uagb-container-inner-blocks-wrap">
<div class="wp-block-uagb-info-box uagb-block-08247f23 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h2 class="uagb-ifb-title">Innovative Solutions for Growth</h2></div><p class="uagb-ifb-desc">Explore our comprehensive selection of services that cater to a variety of needs, ensuring complete customer satisfaction.</p></div></div>



<div class="wp-block-uagb-container uagb-block-dba2a2c9">
<div class="wp-block-uagb-container uagb-block-241ed904">
<div class="wp-block-uagb-container uagb-block-88e05912">
<div class="wp-block-uagb-image alignleft uagb-block-b4e8d2f2 wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-left"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/10/natures-01-1024x683.jpg ,https://websitedemos.net/wp-content/uploads/2023/10/natures-01-1024x683.jpg 780w, https://websitedemos.net/wp-content/uploads/2023/10/natures-01.jpg 360w" sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/10/natures-01-1024x683.jpg" alt="" class="uag-image-80573" width="600" height="450" title="" loading="lazy"/></figure></div>
</div>



<div class="wp-block-uagb-container uagb-block-65b7f731">
<div class="wp-block-uagb-info-box uagb-block-7fcf0987 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h6 class="uagb-ifb-title-prefix">01</h6><h4 class="uagb-ifb-title">Service 1</h4></div><p class="uagb-ifb-desc">Share some details here for Service one. This is a flexible section where you can share anything you want. It could be details or some information about your service.</p></div></div>



<div class="wp-block-uagb-buttons uagb-buttons__outer-wrap uagb-btn__default-btn uagb-btn-tablet__default-btn uagb-btn-mobile__default-btn uagb-block-13fe37e0"><div class="uagb-buttons__wrap uagb-buttons-layout-wrap">
<div class="wp-block-uagb-buttons-child uagb-buttons__outer-wrap uagb-block-90ad841a wp-block-button"><div class="uagb-button__wrapper"><a class="uagb-buttons-repeater wp-block-button__link" href="#" onclick="return false;" rel="follow noopener" target="_self"><div class="uagb-button__link">Read More</div><span class="uagb-button__icon uagb-button__icon-position-after"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 320 512"><path d="M96 480c-8.188 0-16.38-3.125-22.62-9.375c-12.5-12.5-12.5-32.75 0-45.25L242.8 256L73.38 86.63c-12.5-12.5-12.5-32.75 0-45.25s32.75-12.5 45.25 0l192 192c12.5 12.5 12.5 32.75 0 45.25l-192 192C112.4 476.9 104.2 480 96 480z"></path></svg></span></a></div></div>
</div></div>
</div>
</div>



<div class="wp-block-uagb-container uagb-block-bb3f50ff">
<div class="wp-block-uagb-container uagb-block-ced1f7e5">
<div class="wp-block-uagb-info-box uagb-block-12b0eb70 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h6 class="uagb-ifb-title-prefix">02</h6><h4 class="uagb-ifb-title">Service 2</h4></div><p class="uagb-ifb-desc">Share some details here for Service two. This is a flexible section where you can share anything you want. It could be details or some information about your services.</p></div></div>



<div class="wp-block-uagb-buttons uagb-buttons__outer-wrap uagb-btn__default-btn uagb-btn-tablet__default-btn uagb-btn-mobile__default-btn uagb-block-8702e6db"><div class="uagb-buttons__wrap uagb-buttons-layout-wrap">
<div class="wp-block-uagb-buttons-child uagb-buttons__outer-wrap uagb-block-a2779611 wp-block-button"><div class="uagb-button__wrapper"><a class="uagb-buttons-repeater wp-block-button__link" href="#" onclick="return false;" rel="follow noopener" target="_self"><div class="uagb-button__link">Read More</div><span class="uagb-button__icon uagb-button__icon-position-after"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 320 512"><path d="M96 480c-8.188 0-16.38-3.125-22.62-9.375c-12.5-12.5-12.5-32.75 0-45.25L242.8 256L73.38 86.63c-12.5-12.5-12.5-32.75 0-45.25s32.75-12.5 45.25 0l192 192c12.5 12.5 12.5 32.75 0 45.25l-192 192C112.4 476.9 104.2 480 96 480z"></path></svg></span></a></div></div>
</div></div>
</div>



<div class="wp-block-uagb-container uagb-block-adbcec80">
<div class="wp-block-uagb-image alignleft uagb-block-4802b0c5 wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-left"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/10/desserts-01-1024x683.jpg ,https://websitedemos.net/wp-content/uploads/2023/10/natures-01-1024x683.jpg 780w, https://websitedemos.net/wp-content/uploads/2023/10/natures-01.jpg 360w" sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/10/desserts-01-1024x683.jpg" alt="" class="uag-image-80569" width="600" height="450" title="" loading="lazy"/></figure></div>
</div>
</div>



<div class="wp-block-uagb-container uagb-block-5dd9d44a">
<div class="wp-block-uagb-container uagb-block-260d7990">
<div class="wp-block-uagb-image alignleft uagb-block-19461998 wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-left"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/10/snow-mountains-01-1024x683.jpg ,https://websitedemos.net/wp-content/uploads/2023/10/natures-01-1024x683.jpg 780w, https://websitedemos.net/wp-content/uploads/2023/10/natures-01.jpg 360w" sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/10/snow-mountains-01-1024x683.jpg" alt="" class="uag-image-80577" width="600" height="450" title="" loading="lazy"/></figure></div>
</div>



<div class="wp-block-uagb-container uagb-block-aa86ff7d">
<div class="wp-block-uagb-info-box uagb-block-95b1afba uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h6 class="uagb-ifb-title-prefix">03</h6><h4 class="uagb-ifb-title">Service 3</h4></div><p class="uagb-ifb-desc">Share some details here for Service three. This is a flexible section where you can share anything you want. It could be details or some information about your services.</p></div></div>



<div class="wp-block-uagb-buttons uagb-buttons__outer-wrap uagb-btn__default-btn uagb-btn-tablet__default-btn uagb-btn-mobile__default-btn uagb-block-8a8b08f1"><div class="uagb-buttons__wrap uagb-buttons-layout-wrap">
<div class="wp-block-uagb-buttons-child uagb-buttons__outer-wrap uagb-block-dfbd259e wp-block-button"><div class="uagb-button__wrapper"><a class="uagb-buttons-repeater wp-block-button__link" href="#" onclick="return false;" rel="follow noopener" target="_self"><div class="uagb-button__link">Read More</div><span class="uagb-button__icon uagb-button__icon-position-after"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 320 512"><path d="M96 480c-8.188 0-16.38-3.125-22.62-9.375c-12.5-12.5-12.5-32.75 0-45.25L242.8 256L73.38 86.63c-12.5-12.5-12.5-32.75 0-45.25s32.75-12.5 45.25 0l192 192c12.5 12.5 12.5 32.75 0 45.25l-192 192C112.4 476.9 104.2 480 96 480z"></path></svg></span></a></div></div>
</div></div>
</div>
</div>
</div>
</div></div>
";}s:8:"id-77129";a:10:{s:5:"title";s:11:"Services 14";s:3:"url";s:50:"https://websitedemos.net/astra-blocks/services-14/";s:3:"tag";a:0:{}s:8:"category";i:952;s:16:"primary-category";s:0:"";s:4:"type";s:5:"block";s:12:"page-builder";s:9:"gutenberg";s:16:"required-plugins";a:0:{}s:10:"stylesheet";s:94169:".wp-block-uagb-container.uagb-is-root-container .uagb-block-d1486fa4{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-d1486fa4 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-d1486fa4 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-d1486fa4 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-d1486fa4 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-d1486fa4 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-d1486fa4 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 800px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 48px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-d1486fa4{box-shadow: 0px 0px   #00000070 ;padding-top: 112px;padding-bottom: 112px;padding-left: 40px;padding-right: 40px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 48px;column-gap: 0px;overflow: visible;border-color: inherit;background-color: var(--ast-global-color-4);;}.uagb-block-08247f23 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-08247f23 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-08247f23 .uagb-ifb-icon svg{fill: #333;}.uagb-block-08247f23.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-08247f23 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-08247f23 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-08247f23.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-08247f23.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-08247f23 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-08247f23 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-08247f23 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-08247f23 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-08247f23.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-08247f23.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-08247f23.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-08247f23.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-08247f23 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-08247f23.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-08247f23.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0%;margin-top: 0%;margin-left: 15%;margin-right: 15%;}.uagb-block-08247f23 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-08247f23 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-08247f23 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-08247f23 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-08247f23.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-08247f23.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-08247f23 .uagb-infobox__content-wrap{text-align: center;}.uagb-block-08247f23.uagb-infobox-icon-above-title{text-align: center;}.uagb-block-08247f23.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-08247f23 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-08247f23.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-08247f23 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-08247f23 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-08247f23.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-dba2a2c9{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-dba2a2c9 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-dba2a2c9 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-dba2a2c9 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-dba2a2c9 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-dba2a2c9 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-dba2a2c9 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: stretch;justify-content: flex-start;flex-wrap: nowrap;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-dba2a2c9{box-shadow: 0px 0px   #00000070 ;padding-top: 48px;padding-bottom: 48px;padding-left: 48px;padding-right: 48px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;overflow: visible;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-color: inherit;background-color: var(--ast-global-color-5);;flex-direction: column;align-items: stretch;justify-content: flex-start;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-fd07fe04{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-fd07fe04 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-fd07fe04 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-fd07fe04 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-fd07fe04 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-fd07fe04 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-fd07fe04 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 24px;}.wp-block-uagb-container.uagb-block-fd07fe04{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 24px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 24px;overflow: visible;border-top-width: 0px;border-left-width: 0px;border-right-width: 0px;border-bottom-width: 1px;border-style: solid;border-color: var(--ast-global-color-6);flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-eecec216{max-width: 70%;width: 100%;}.wp-block-uagb-container.uagb-block-eecec216 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-eecec216 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-eecec216 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-eecec216 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-eecec216 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-eecec216 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-eecec216{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;}.uagb-block-dbeded41 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-dbeded41 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-dbeded41 .uagb-ifb-icon svg{fill: #333;}.uagb-block-dbeded41.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-dbeded41 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-dbeded41 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-dbeded41.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-dbeded41.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-dbeded41 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-dbeded41 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-dbeded41 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-dbeded41 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-dbeded41.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-dbeded41.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-dbeded41.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-dbeded41.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-dbeded41 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{color: var(--ast-global-color-0);margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-dbeded41.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 8px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-dbeded41.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-dbeded41 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-dbeded41 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-dbeded41 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-dbeded41 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-dbeded41.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-dbeded41.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-dbeded41 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-dbeded41.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-dbeded41.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-dbeded41 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-dbeded41.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-dbeded41 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-dbeded41 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-dbeded41.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-5337167d{max-width: 30%;width: 100%;}.wp-block-uagb-container.uagb-block-5337167d .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-5337167d .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-5337167d .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-5337167d .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-5337167d .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-5337167d > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-5337167d{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;}.uagb-block-80cba3d5.wp-block-uagb-buttons.uagb-buttons__outer-wrap .uagb-buttons__wrap {column-gap: 10px;}.uagb-block-80cba3d5.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: right;align-items: center;}.wp-block-uagb-buttons .uagb-block-60e4f8c2 .wp-block-button__link{background: transparent;}.wp-block-uagb-buttons .uagb-block-60e4f8c2 .wp-block-button__link:hover{background: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-60e4f8c2 .wp-block-button__link:focus{background: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-60e4f8c2 .uagb-button__wrapper .uagb-buttons-repeater{color: var(--ast-global-color-2);margin-top: 0px;margin-bottom: 0px;margin-left: 0px;margin-right: 0px;}.wp-block-uagb-buttons .uagb-block-60e4f8c2 .wp-block-button__link.has-text-color:hover .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-60e4f8c2 .wp-block-button__link.has-text-color:focus .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-60e4f8c2 .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link{margin-top: 0px;margin-bottom: 0px;margin-left: 0px;margin-right: 0px;box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-60e4f8c2 .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link:hover{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-60e4f8c2 .uagb-buttons-repeater.wp-block-button__link{border-top-width: 1px;border-left-width: 1px;border-right-width: 1px;border-bottom-width: 1px;border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-color: var(--ast-global-color-2);border-style: solid;}.wp-block-uagb-buttons .uagb-block-60e4f8c2 .uagb-buttons-repeater.wp-block-button__link:hover{border-color: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-60e4f8c2 .uagb-buttons-repeater.wp-block-button__link:focus{border-color: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-60e4f8c2.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-top-width: 1px;border-left-width: 1px;border-right-width: 1px;border-bottom-width: 1px;border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-color: var(--ast-global-color-2);border-style: solid;}.wp-block-uagb-buttons .uagb-block-60e4f8c2.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater:hover{border-color: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-60e4f8c2 .uagb-buttons-repeater .uagb-button__link{color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-60e4f8c2 .uagb-buttons-repeater:hover .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-60e4f8c2 .uagb-buttons-repeater:focus .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-60e4f8c2 .uagb-buttons-repeater .uagb-button__icon > svg{width: 15px;height: 15px;fill: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-60e4f8c2 .uagb-buttons-repeater:hover .uagb-button__icon > svg{fill: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-60e4f8c2 .uagb-buttons-repeater:focus .uagb-button__icon > svg{fill: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-60e4f8c2 .uagb-buttons-repeater .uagb-button__icon-position-after{margin-left: 8px;}.wp-block-uagb-buttons .uagb-block-60e4f8c2 .uagb-buttons-repeater .uagb-button__icon-position-before{margin-right: 8px;}.wp-block-uagb-buttons .uagb-block-60e4f8c2 .uagb-button__link{text-transform: normal;text-decoration: none;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-22f9e42a{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-22f9e42a .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-22f9e42a .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-22f9e42a .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-22f9e42a .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-22f9e42a .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-22f9e42a > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 24px;}.wp-block-uagb-container.uagb-block-22f9e42a{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 24px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 24px;overflow: visible;border-top-width: 0px;border-left-width: 0px;border-right-width: 0px;border-bottom-width: 1px;border-style: solid;border-color: var(--ast-global-color-6);flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-d7f145cc{max-width: 70%;width: 100%;}.wp-block-uagb-container.uagb-block-d7f145cc .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-d7f145cc .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-d7f145cc .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-d7f145cc .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-d7f145cc .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-d7f145cc > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-d7f145cc{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;}.uagb-block-88bab31b .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-88bab31b .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-88bab31b .uagb-ifb-icon svg{fill: #333;}.uagb-block-88bab31b.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-88bab31b .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-88bab31b .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-88bab31b.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-88bab31b.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-88bab31b .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-88bab31b .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-88bab31b .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-88bab31b .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-88bab31b.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-88bab31b.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-88bab31b.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-88bab31b.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-88bab31b .uagb-ifb-title-wrap .uagb-ifb-title-prefix{color: var(--ast-global-color-0);margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-88bab31b.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 8px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-88bab31b.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-88bab31b .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-88bab31b .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-88bab31b .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-88bab31b .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-88bab31b.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-88bab31b.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-88bab31b .uagb-infobox__content-wrap{text-align: left;}.uagb-block-88bab31b.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-88bab31b.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-88bab31b .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-88bab31b.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-88bab31b .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-88bab31b .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-88bab31b.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-b0a9f4fd{max-width: 30%;width: 100%;}.wp-block-uagb-container.uagb-block-b0a9f4fd .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-b0a9f4fd .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-b0a9f4fd .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-b0a9f4fd .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-b0a9f4fd .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-b0a9f4fd > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-b0a9f4fd{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;}.uagb-block-994eff4b.wp-block-uagb-buttons.uagb-buttons__outer-wrap .uagb-buttons__wrap {column-gap: 10px;}.uagb-block-994eff4b.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: right;align-items: center;}.wp-block-uagb-buttons .uagb-block-8df63892 .wp-block-button__link{background: transparent;}.wp-block-uagb-buttons .uagb-block-8df63892 .wp-block-button__link:hover{background: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-8df63892 .wp-block-button__link:focus{background: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-8df63892 .uagb-button__wrapper .uagb-buttons-repeater{color: var(--ast-global-color-2);margin-top: 0px;margin-bottom: 0px;margin-left: 0px;margin-right: 0px;}.wp-block-uagb-buttons .uagb-block-8df63892 .wp-block-button__link.has-text-color:hover .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-8df63892 .wp-block-button__link.has-text-color:focus .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-8df63892 .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link{margin-top: 0px;margin-bottom: 0px;margin-left: 0px;margin-right: 0px;box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-8df63892 .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link:hover{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-8df63892 .uagb-buttons-repeater.wp-block-button__link{border-top-width: 1px;border-left-width: 1px;border-right-width: 1px;border-bottom-width: 1px;border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-color: var(--ast-global-color-2);border-style: solid;}.wp-block-uagb-buttons .uagb-block-8df63892 .uagb-buttons-repeater.wp-block-button__link:hover{border-color: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-8df63892 .uagb-buttons-repeater.wp-block-button__link:focus{border-color: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-8df63892.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-top-width: 1px;border-left-width: 1px;border-right-width: 1px;border-bottom-width: 1px;border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-color: var(--ast-global-color-2);border-style: solid;}.wp-block-uagb-buttons .uagb-block-8df63892.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater:hover{border-color: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-8df63892 .uagb-buttons-repeater .uagb-button__link{color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-8df63892 .uagb-buttons-repeater:hover .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-8df63892 .uagb-buttons-repeater:focus .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-8df63892 .uagb-buttons-repeater .uagb-button__icon > svg{width: 15px;height: 15px;fill: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-8df63892 .uagb-buttons-repeater:hover .uagb-button__icon > svg{fill: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-8df63892 .uagb-buttons-repeater:focus .uagb-button__icon > svg{fill: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-8df63892 .uagb-buttons-repeater .uagb-button__icon-position-after{margin-left: 8px;}.wp-block-uagb-buttons .uagb-block-8df63892 .uagb-buttons-repeater .uagb-button__icon-position-before{margin-right: 8px;}.wp-block-uagb-buttons .uagb-block-8df63892 .uagb-button__link{text-transform: normal;text-decoration: none;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-b8093dc1{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-b8093dc1 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-b8093dc1 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-b8093dc1 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-b8093dc1 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-b8093dc1 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-b8093dc1 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 24px;}.wp-block-uagb-container.uagb-block-b8093dc1{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 24px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 24px;overflow: visible;border-top-width: 0px;border-left-width: 0px;border-right-width: 0px;border-bottom-width: 1px;border-style: solid;border-color: var(--ast-global-color-6);flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-3e27dceb{max-width: 70%;width: 100%;}.wp-block-uagb-container.uagb-block-3e27dceb .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-3e27dceb .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-3e27dceb .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-3e27dceb .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-3e27dceb .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-3e27dceb > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-3e27dceb{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;}.uagb-block-ec3bc846 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-ec3bc846 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-ec3bc846 .uagb-ifb-icon svg{fill: #333;}.uagb-block-ec3bc846.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-ec3bc846 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-ec3bc846 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-ec3bc846.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-ec3bc846.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-ec3bc846 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-ec3bc846 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-ec3bc846 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-ec3bc846 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-ec3bc846.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-ec3bc846.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-ec3bc846.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-ec3bc846.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-ec3bc846 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{color: var(--ast-global-color-0);margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-ec3bc846.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 8px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-ec3bc846.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-ec3bc846 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-ec3bc846 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-ec3bc846 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-ec3bc846 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-ec3bc846.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-ec3bc846.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-ec3bc846 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-ec3bc846.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-ec3bc846.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-ec3bc846 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-ec3bc846.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-ec3bc846 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-ec3bc846 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-ec3bc846.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-477b8583{max-width: 30%;width: 100%;}.wp-block-uagb-container.uagb-block-477b8583 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-477b8583 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-477b8583 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-477b8583 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-477b8583 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-477b8583 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-477b8583{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;}.uagb-block-cf9f1198.wp-block-uagb-buttons.uagb-buttons__outer-wrap .uagb-buttons__wrap {column-gap: 10px;}.uagb-block-cf9f1198.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: right;align-items: center;}.wp-block-uagb-buttons .uagb-block-690b7758 .wp-block-button__link{background: transparent;}.wp-block-uagb-buttons .uagb-block-690b7758 .wp-block-button__link:hover{background: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-690b7758 .wp-block-button__link:focus{background: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-690b7758 .uagb-button__wrapper .uagb-buttons-repeater{color: var(--ast-global-color-2);margin-top: 0px;margin-bottom: 0px;margin-left: 0px;margin-right: 0px;}.wp-block-uagb-buttons .uagb-block-690b7758 .wp-block-button__link.has-text-color:hover .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-690b7758 .wp-block-button__link.has-text-color:focus .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-690b7758 .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link{margin-top: 0px;margin-bottom: 0px;margin-left: 0px;margin-right: 0px;box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-690b7758 .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link:hover{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-690b7758 .uagb-buttons-repeater.wp-block-button__link{border-top-width: 1px;border-left-width: 1px;border-right-width: 1px;border-bottom-width: 1px;border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-color: var(--ast-global-color-2);border-style: solid;}.wp-block-uagb-buttons .uagb-block-690b7758 .uagb-buttons-repeater.wp-block-button__link:hover{border-color: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-690b7758 .uagb-buttons-repeater.wp-block-button__link:focus{border-color: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-690b7758.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-top-width: 1px;border-left-width: 1px;border-right-width: 1px;border-bottom-width: 1px;border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-color: var(--ast-global-color-2);border-style: solid;}.wp-block-uagb-buttons .uagb-block-690b7758.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater:hover{border-color: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-690b7758 .uagb-buttons-repeater .uagb-button__link{color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-690b7758 .uagb-buttons-repeater:hover .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-690b7758 .uagb-buttons-repeater:focus .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-690b7758 .uagb-buttons-repeater .uagb-button__icon > svg{width: 15px;height: 15px;fill: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-690b7758 .uagb-buttons-repeater:hover .uagb-button__icon > svg{fill: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-690b7758 .uagb-buttons-repeater:focus .uagb-button__icon > svg{fill: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-690b7758 .uagb-buttons-repeater .uagb-button__icon-position-after{margin-left: 8px;}.wp-block-uagb-buttons .uagb-block-690b7758 .uagb-buttons-repeater .uagb-button__icon-position-before{margin-right: 8px;}.wp-block-uagb-buttons .uagb-block-690b7758 .uagb-button__link{text-transform: normal;text-decoration: none;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-87ead717{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-87ead717 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-87ead717 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-87ead717 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-87ead717 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-87ead717 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-87ead717 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 24px;}.wp-block-uagb-container.uagb-block-87ead717{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 24px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 24px;overflow: visible;border-top-width: 0px;border-left-width: 0px;border-right-width: 0px;border-bottom-width: 1px;border-style: solid;border-color: var(--ast-global-color-6);flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-633d21cb{max-width: 70%;width: 100%;}.wp-block-uagb-container.uagb-block-633d21cb .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-633d21cb .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-633d21cb .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-633d21cb .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-633d21cb .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-633d21cb > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-633d21cb{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;}.uagb-block-53f3a695 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-53f3a695 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-53f3a695 .uagb-ifb-icon svg{fill: #333;}.uagb-block-53f3a695.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-53f3a695 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-53f3a695 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-53f3a695.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-53f3a695.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-53f3a695 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-53f3a695 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-53f3a695 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-53f3a695 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-53f3a695.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-53f3a695.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-53f3a695.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-53f3a695.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-53f3a695 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{color: var(--ast-global-color-0);margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-53f3a695.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 8px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-53f3a695.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-53f3a695 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-53f3a695 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-53f3a695 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-53f3a695 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-53f3a695.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-53f3a695.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-53f3a695 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-53f3a695.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-53f3a695.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-53f3a695 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-53f3a695.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-53f3a695 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-53f3a695 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-53f3a695.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-9473e30c{max-width: 30%;width: 100%;}.wp-block-uagb-container.uagb-block-9473e30c .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-9473e30c .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-9473e30c .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-9473e30c .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-9473e30c .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-9473e30c > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-9473e30c{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;}.uagb-block-aeb81ea0.wp-block-uagb-buttons.uagb-buttons__outer-wrap .uagb-buttons__wrap {column-gap: 10px;}.uagb-block-aeb81ea0.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: right;align-items: center;}.wp-block-uagb-buttons .uagb-block-e4e283b2 .wp-block-button__link{background: transparent;}.wp-block-uagb-buttons .uagb-block-e4e283b2 .wp-block-button__link:hover{background: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-e4e283b2 .wp-block-button__link:focus{background: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-e4e283b2 .uagb-button__wrapper .uagb-buttons-repeater{color: var(--ast-global-color-2);margin-top: 0px;margin-bottom: 0px;margin-left: 0px;margin-right: 0px;}.wp-block-uagb-buttons .uagb-block-e4e283b2 .wp-block-button__link.has-text-color:hover .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-e4e283b2 .wp-block-button__link.has-text-color:focus .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-e4e283b2 .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link{margin-top: 0px;margin-bottom: 0px;margin-left: 0px;margin-right: 0px;box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-e4e283b2 .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link:hover{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-e4e283b2 .uagb-buttons-repeater.wp-block-button__link{border-top-width: 1px;border-left-width: 1px;border-right-width: 1px;border-bottom-width: 1px;border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-color: var(--ast-global-color-2);border-style: solid;}.wp-block-uagb-buttons .uagb-block-e4e283b2 .uagb-buttons-repeater.wp-block-button__link:hover{border-color: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-e4e283b2 .uagb-buttons-repeater.wp-block-button__link:focus{border-color: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-e4e283b2.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-top-width: 1px;border-left-width: 1px;border-right-width: 1px;border-bottom-width: 1px;border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-color: var(--ast-global-color-2);border-style: solid;}.wp-block-uagb-buttons .uagb-block-e4e283b2.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater:hover{border-color: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-e4e283b2 .uagb-buttons-repeater .uagb-button__link{color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-e4e283b2 .uagb-buttons-repeater:hover .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-e4e283b2 .uagb-buttons-repeater:focus .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-e4e283b2 .uagb-buttons-repeater .uagb-button__icon > svg{width: 15px;height: 15px;fill: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-e4e283b2 .uagb-buttons-repeater:hover .uagb-button__icon > svg{fill: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-e4e283b2 .uagb-buttons-repeater:focus .uagb-button__icon > svg{fill: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-e4e283b2 .uagb-buttons-repeater .uagb-button__icon-position-after{margin-left: 8px;}.wp-block-uagb-buttons .uagb-block-e4e283b2 .uagb-buttons-repeater .uagb-button__icon-position-before{margin-right: 8px;}.wp-block-uagb-buttons .uagb-block-e4e283b2 .uagb-button__link{text-transform: normal;text-decoration: none;}@media only screen and (max-width: 976px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-d1486fa4{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-d1486fa4 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 600px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 40px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-d1486fa4{padding-top: 80px;padding-bottom: 80px;padding-left: 32px;padding-right: 32px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 40px;column-gap: 0px;background-color: var(--ast-global-color-4);;}.uagb-block-08247f23.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-08247f23.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0%;margin-top: 0%;margin-left: 8%;margin-right: 8%;}.uagb-block-08247f23.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-08247f23.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-08247f23.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-08247f23 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-08247f23 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-08247f23 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-08247f23 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-08247f23 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-08247f23.uagb-infobox__content-wrap{padding-top: 0%;padding-right: 0%;padding-bottom: 0%;padding-left: 0%;}.uagb-block-08247f23 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-08247f23.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-08247f23 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-08247f23 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-08247f23.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-dba2a2c9{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-dba2a2c9 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-dba2a2c9{padding-top: 40px;padding-bottom: 40px;padding-left: 40px;padding-right: 40px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;background-color: var(--ast-global-color-5);;align-items: stretch;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-fd07fe04{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-fd07fe04 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-fd07fe04{padding-top: 0px;padding-bottom: 16px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;border-style: solid;border-color: var(--ast-global-color-6);align-items: stretch;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-eecec216{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-eecec216 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-eecec216{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;}.uagb-block-dbeded41 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-dbeded41.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 8px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-dbeded41.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-dbeded41.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-dbeded41.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-dbeded41 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-dbeded41 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-dbeded41 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-dbeded41 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-dbeded41 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-dbeded41 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-dbeded41.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-dbeded41 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-dbeded41 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-dbeded41.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-5337167d{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-5337167d > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-5337167d{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;}.uagb-block-80cba3d5.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: right;align-items: center;}.wp-block-uagb-buttons .uagb-block-60e4f8c2.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-style: solid;border-color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-60e4f8c2 .uagb-buttons-repeater.wp-block-button__link{border-style: solid;border-color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-60e4f8c2 .uagb-buttons-repeater .uagb-button__icon > svg{fill: var(--ast-global-color-2);}.wp-block-uagb-container.uagb-is-root-container .uagb-block-22f9e42a{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-22f9e42a > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-22f9e42a{padding-top: 0px;padding-bottom: 16px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;border-style: solid;border-color: var(--ast-global-color-6);align-items: stretch;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-d7f145cc{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-d7f145cc > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-d7f145cc{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;}.uagb-block-88bab31b .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-88bab31b.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 8px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-88bab31b.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-88bab31b.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-88bab31b.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-88bab31b .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-88bab31b .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-88bab31b .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-88bab31b .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-88bab31b .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-88bab31b .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-88bab31b.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-88bab31b .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-88bab31b .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-88bab31b.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-b0a9f4fd{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-b0a9f4fd > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-b0a9f4fd{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;}.uagb-block-994eff4b.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: right;align-items: center;}.wp-block-uagb-buttons .uagb-block-8df63892.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-style: solid;border-color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-8df63892 .uagb-buttons-repeater.wp-block-button__link{border-style: solid;border-color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-8df63892 .uagb-buttons-repeater .uagb-button__icon > svg{fill: var(--ast-global-color-2);}.wp-block-uagb-container.uagb-is-root-container .uagb-block-b8093dc1{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-b8093dc1 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-b8093dc1{padding-top: 0px;padding-bottom: 16px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;border-style: solid;border-color: var(--ast-global-color-6);align-items: stretch;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-3e27dceb{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-3e27dceb > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-3e27dceb{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;}.uagb-block-ec3bc846 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-ec3bc846.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 8px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-ec3bc846.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-ec3bc846.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-ec3bc846.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-ec3bc846 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-ec3bc846 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-ec3bc846 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-ec3bc846 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-ec3bc846 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-ec3bc846 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-ec3bc846.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-ec3bc846 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-ec3bc846 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-ec3bc846.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-477b8583{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-477b8583 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-477b8583{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;}.uagb-block-cf9f1198.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: right;align-items: center;}.wp-block-uagb-buttons .uagb-block-690b7758.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-style: solid;border-color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-690b7758 .uagb-buttons-repeater.wp-block-button__link{border-style: solid;border-color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-690b7758 .uagb-buttons-repeater .uagb-button__icon > svg{fill: var(--ast-global-color-2);}.wp-block-uagb-container.uagb-is-root-container .uagb-block-87ead717{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-87ead717 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-87ead717{padding-top: 0px;padding-bottom: 16px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;border-style: solid;border-color: var(--ast-global-color-6);align-items: stretch;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-633d21cb{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-633d21cb > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-633d21cb{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;}.uagb-block-53f3a695 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-53f3a695.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 8px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-53f3a695.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-53f3a695.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-53f3a695.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-53f3a695 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-53f3a695 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-53f3a695 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-53f3a695 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-53f3a695 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-53f3a695 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-53f3a695.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-53f3a695 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-53f3a695 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-53f3a695.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-9473e30c{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-9473e30c > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-9473e30c{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;}.uagb-block-aeb81ea0.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: right;align-items: center;}.wp-block-uagb-buttons .uagb-block-e4e283b2.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-style: solid;border-color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-e4e283b2 .uagb-buttons-repeater.wp-block-button__link{border-style: solid;border-color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-e4e283b2 .uagb-buttons-repeater .uagb-button__icon > svg{fill: var(--ast-global-color-2);}}@media only screen and (max-width: 767px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-d1486fa4{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-d1486fa4 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 40px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-d1486fa4{padding-top: 64px;padding-bottom: 64px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 40px;column-gap: 0px;background-color: var(--ast-global-color-4);;}.uagb-block-08247f23.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-08247f23.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-08247f23.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-08247f23.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-08247f23 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-08247f23 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-08247f23.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-08247f23 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-08247f23 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-08247f23 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-08247f23.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-08247f23 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-08247f23.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-08247f23 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-08247f23 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-08247f23.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-dba2a2c9{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-dba2a2c9 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;flex-wrap: wrap;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-dba2a2c9{padding-top: 32px;padding-bottom: 32px;padding-left: 32px;padding-right: 32px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;background-color: var(--ast-global-color-5);;align-items: stretch;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-fd07fe04{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-fd07fe04 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;flex-wrap: wrap;row-gap: 20px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-fd07fe04{padding-top: 0px;padding-bottom: 16px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 20px;column-gap: 0px;border-style: solid;border-color: var(--ast-global-color-6);align-items: stretch;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-eecec216{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-eecec216 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-eecec216{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;flex-wrap: wrap;}.uagb-block-dbeded41 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-dbeded41.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 8px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-dbeded41.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-dbeded41.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-dbeded41 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-dbeded41 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-dbeded41.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-dbeded41 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-dbeded41 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-dbeded41 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-dbeded41 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-dbeded41.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-dbeded41 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-dbeded41 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-dbeded41.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-5337167d{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-5337167d > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-5337167d{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;flex-wrap: wrap;}.uagb-block-80cba3d5.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-60e4f8c2.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-style: solid;border-color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-60e4f8c2 .uagb-buttons-repeater.wp-block-button__link{border-style: solid;border-color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-60e4f8c2 .uagb-buttons-repeater .uagb-button__icon > svg{fill: var(--ast-global-color-2);}.wp-block-uagb-container.uagb-is-root-container .uagb-block-22f9e42a{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-22f9e42a > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;flex-wrap: wrap;row-gap: 20px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-22f9e42a{padding-top: 0px;padding-bottom: 16px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 20px;column-gap: 0px;border-style: solid;border-color: var(--ast-global-color-6);align-items: stretch;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-d7f145cc{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-d7f145cc > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-d7f145cc{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;flex-wrap: wrap;}.uagb-block-88bab31b .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-88bab31b.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 8px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-88bab31b.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-88bab31b.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-88bab31b .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-88bab31b .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-88bab31b.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-88bab31b .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-88bab31b .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-88bab31b .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-88bab31b .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-88bab31b.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-88bab31b .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-88bab31b .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-88bab31b.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-b0a9f4fd{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-b0a9f4fd > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-b0a9f4fd{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;flex-wrap: wrap;}.uagb-block-994eff4b.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-8df63892.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-style: solid;border-color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-8df63892 .uagb-buttons-repeater.wp-block-button__link{border-style: solid;border-color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-8df63892 .uagb-buttons-repeater .uagb-button__icon > svg{fill: var(--ast-global-color-2);}.wp-block-uagb-container.uagb-is-root-container .uagb-block-b8093dc1{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-b8093dc1 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;flex-wrap: wrap;row-gap: 20px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-b8093dc1{padding-top: 0px;padding-bottom: 16px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 20px;column-gap: 0px;border-style: solid;border-color: var(--ast-global-color-6);align-items: stretch;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-3e27dceb{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-3e27dceb > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-3e27dceb{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;flex-wrap: wrap;}.uagb-block-ec3bc846 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-ec3bc846.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 8px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-ec3bc846.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-ec3bc846.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-ec3bc846 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-ec3bc846 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-ec3bc846.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-ec3bc846 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-ec3bc846 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-ec3bc846 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-ec3bc846 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-ec3bc846.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-ec3bc846 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-ec3bc846 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-ec3bc846.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-477b8583{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-477b8583 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-477b8583{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;flex-wrap: wrap;}.uagb-block-cf9f1198.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-690b7758.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-style: solid;border-color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-690b7758 .uagb-buttons-repeater.wp-block-button__link{border-style: solid;border-color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-690b7758 .uagb-buttons-repeater .uagb-button__icon > svg{fill: var(--ast-global-color-2);}.wp-block-uagb-container.uagb-is-root-container .uagb-block-87ead717{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-87ead717 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;flex-wrap: wrap;row-gap: 20px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-87ead717{padding-top: 0px;padding-bottom: 16px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 20px;column-gap: 0px;border-style: solid;border-color: var(--ast-global-color-6);align-items: stretch;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-633d21cb{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-633d21cb > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-633d21cb{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;flex-wrap: wrap;}.uagb-block-53f3a695 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-53f3a695.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 8px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-53f3a695.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-53f3a695.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-53f3a695 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-53f3a695 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-53f3a695.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-53f3a695 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-53f3a695 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-53f3a695 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-53f3a695 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-53f3a695.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-53f3a695 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-53f3a695 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-53f3a695.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-9473e30c{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-9473e30c > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-9473e30c{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;flex-wrap: wrap;}.uagb-block-aeb81ea0.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: left;align-items: center;}.wp-block-uagb-buttons .uagb-block-e4e283b2.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-style: solid;border-color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-e4e283b2 .uagb-buttons-repeater.wp-block-button__link{border-style: solid;border-color: var(--ast-global-color-2);}.wp-block-uagb-buttons .uagb-block-e4e283b2 .uagb-buttons-repeater .uagb-button__icon > svg{fill: var(--ast-global-color-2);}}";s:7:"content";s:5384:"
<div class="wp-block-uagb-container uagb-block-d1486fa4 alignfull uagb-is-root-container"><div class="uagb-container-inner-blocks-wrap">
<div class="wp-block-uagb-info-box uagb-block-08247f23 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h2 class="uagb-ifb-title">Innovative Solutions for Growth</h2></div><p class="uagb-ifb-desc">Explore our comprehensive selection of services that cater to a variety of needs, ensuring complete customer satisfaction.</p></div></div>



<div class="wp-block-uagb-container uagb-block-dba2a2c9">
<div class="wp-block-uagb-container uagb-block-fd07fe04">
<div class="wp-block-uagb-container uagb-block-eecec216">
<div class="wp-block-uagb-info-box uagb-block-dbeded41 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h5 class="uagb-ifb-title">Service 1</h5></div><p class="uagb-ifb-desc">This is a flexible section where you can share anything you want. It could be details or some information about your service one.</p></div></div>
</div>



<div class="wp-block-uagb-container uagb-block-5337167d">
<div class="wp-block-uagb-buttons uagb-buttons__outer-wrap uagb-btn__default-btn uagb-btn-tablet__default-btn uagb-btn-mobile__default-btn uagb-block-80cba3d5"><div class="uagb-buttons__wrap uagb-buttons-layout-wrap">
<div class="wp-block-uagb-buttons-child uagb-buttons__outer-wrap uagb-block-60e4f8c2 wp-block-button"><div class="uagb-button__wrapper"><a class="uagb-buttons-repeater wp-block-button__link" href="#" onclick="return false;" rel="follow noopener" target="_self"><div class="uagb-button__link">Get Started</div></a></div></div>
</div></div>
</div>
</div>



<div class="wp-block-uagb-container uagb-block-22f9e42a">
<div class="wp-block-uagb-container uagb-block-d7f145cc">
<div class="wp-block-uagb-info-box uagb-block-88bab31b uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h5 class="uagb-ifb-title">Service 2</h5></div><p class="uagb-ifb-desc">This is a flexible section where you can share anything you want. It could be details or some information about your service two.</p></div></div>
</div>



<div class="wp-block-uagb-container uagb-block-b0a9f4fd">
<div class="wp-block-uagb-buttons uagb-buttons__outer-wrap uagb-btn__default-btn uagb-btn-tablet__default-btn uagb-btn-mobile__default-btn uagb-block-994eff4b"><div class="uagb-buttons__wrap uagb-buttons-layout-wrap">
<div class="wp-block-uagb-buttons-child uagb-buttons__outer-wrap uagb-block-8df63892 wp-block-button"><div class="uagb-button__wrapper"><a class="uagb-buttons-repeater wp-block-button__link" href="#" onclick="return false;" rel="follow noopener" target="_self"><div class="uagb-button__link">Get Started</div></a></div></div>
</div></div>
</div>
</div>



<div class="wp-block-uagb-container uagb-block-b8093dc1">
<div class="wp-block-uagb-container uagb-block-3e27dceb">
<div class="wp-block-uagb-info-box uagb-block-ec3bc846 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h5 class="uagb-ifb-title">Service 3</h5></div><p class="uagb-ifb-desc">This is a flexible section where you can share anything you want. It could be details or some information about your service 3.</p></div></div>
</div>



<div class="wp-block-uagb-container uagb-block-477b8583">
<div class="wp-block-uagb-buttons uagb-buttons__outer-wrap uagb-btn__default-btn uagb-btn-tablet__default-btn uagb-btn-mobile__default-btn uagb-block-cf9f1198"><div class="uagb-buttons__wrap uagb-buttons-layout-wrap">
<div class="wp-block-uagb-buttons-child uagb-buttons__outer-wrap uagb-block-690b7758 wp-block-button"><div class="uagb-button__wrapper"><a class="uagb-buttons-repeater wp-block-button__link" href="#" onclick="return false;" rel="follow noopener" target="_self"><div class="uagb-button__link">Get Started</div></a></div></div>
</div></div>
</div>
</div>



<div class="wp-block-uagb-container uagb-block-87ead717">
<div class="wp-block-uagb-container uagb-block-633d21cb">
<div class="wp-block-uagb-info-box uagb-block-53f3a695 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h5 class="uagb-ifb-title">Service 4</h5></div><p class="uagb-ifb-desc">This is a flexible section where you can share anything you want. It could be details or some information about your service 4.</p></div></div>
</div>



<div class="wp-block-uagb-container uagb-block-9473e30c">
<div class="wp-block-uagb-buttons uagb-buttons__outer-wrap uagb-btn__default-btn uagb-btn-tablet__default-btn uagb-btn-mobile__default-btn uagb-block-aeb81ea0"><div class="uagb-buttons__wrap uagb-buttons-layout-wrap">
<div class="wp-block-uagb-buttons-child uagb-buttons__outer-wrap uagb-block-e4e283b2 wp-block-button"><div class="uagb-button__wrapper"><a class="uagb-buttons-repeater wp-block-button__link" href="#" onclick="return false;" rel="follow noopener" target="_self"><div class="uagb-button__link">Get Started</div></a></div></div>
</div></div>
</div>
</div>
</div>
</div></div>
";}s:8:"id-77674";a:10:{s:5:"title";s:10:"Gallery 07";s:3:"url";s:49:"https://websitedemos.net/astra-blocks/gallery-07/";s:3:"tag";a:0:{}s:8:"category";i:3375;s:16:"primary-category";s:0:"";s:4:"type";s:5:"block";s:12:"page-builder";s:9:"gutenberg";s:16:"required-plugins";a:0:{}s:10:"stylesheet";s:41404:".wp-block-uagb-container.uagb-is-root-container .uagb-block-3b550c51{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-3b550c51 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-3b550c51 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-3b550c51 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-3b550c51 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-3b550c51 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-3b550c51 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 48px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-3b550c51{box-shadow: 0px 0px   #00000070 ;padding-top: 112px;padding-bottom: 112px;padding-left: 40px;padding-right: 40px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 48px;column-gap: 0px;overflow: visible;border-color: inherit;background-color: var(--ast-global-color-4);;}.uagb-block-02dd0554 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-02dd0554 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-02dd0554 .uagb-ifb-icon svg{fill: #333;}.uagb-block-02dd0554.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-02dd0554 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-02dd0554 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-02dd0554.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-02dd0554.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-02dd0554 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-02dd0554 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-02dd0554 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-02dd0554 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-02dd0554.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-02dd0554.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-02dd0554.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-02dd0554.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-02dd0554 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-02dd0554.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-02dd0554.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0%;margin-top: 0%;margin-left: 15%;margin-right: 15%;}.uagb-block-02dd0554 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-02dd0554 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-02dd0554 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-02dd0554 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-02dd0554.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-02dd0554.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-02dd0554 .uagb-infobox__content-wrap{text-align: center;}.uagb-block-02dd0554.uagb-infobox-icon-above-title{text-align: center;}.uagb-block-02dd0554.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-02dd0554 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-02dd0554.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-02dd0554 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-02dd0554 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-02dd0554.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-cef2b215{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-cef2b215 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-cef2b215 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-cef2b215 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-cef2b215 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-cef2b215 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-cef2b215 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 24px;}.wp-block-uagb-container.uagb-block-cef2b215{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 24px;overflow: visible;border-color: inherit;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-b50c2095{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-block-b50c2095 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-b50c2095 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-b50c2095 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-b50c2095 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-b50c2095 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-b50c2095 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-b50c2095{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;}.uagb-block-9b6c996a.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-9b6c996a .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-9b6c996a.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-9b6c996a.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;text-align: center;}.uagb-block-9b6c996a.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-9b6c996a.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-9b6c996a.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-9b6c996a.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-9b6c996a.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-9b6c996a.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-9b6c996a.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-9b6c996a.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-9b6c996a.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 450px;}.uagb-block-9b6c996a.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-9b6c996a.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-9b6c996a.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-9b6c996a.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-1ab8c6c9{max-width: 25%;width: 100%;}.wp-block-uagb-container.uagb-block-1ab8c6c9 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-1ab8c6c9 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-1ab8c6c9 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-1ab8c6c9 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-1ab8c6c9 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-1ab8c6c9 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-1ab8c6c9{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;}.uagb-block-7727ec30.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-7727ec30 .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-7727ec30.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-7727ec30.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;text-align: center;}.uagb-block-7727ec30.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-7727ec30.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-7727ec30.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-7727ec30.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-7727ec30.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-7727ec30.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-7727ec30.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-7727ec30.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-7727ec30.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 450px;}.uagb-block-7727ec30.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-7727ec30.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-7727ec30.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-7727ec30.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-001cde8a{max-width: 25%;width: 100%;}.wp-block-uagb-container.uagb-block-001cde8a .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-001cde8a .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-001cde8a .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-001cde8a .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-001cde8a .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-001cde8a > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-001cde8a{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;}.uagb-block-c94ed38c.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-c94ed38c .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-c94ed38c.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-c94ed38c.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;text-align: center;}.uagb-block-c94ed38c.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-c94ed38c.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-c94ed38c.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-c94ed38c.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-c94ed38c.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-c94ed38c.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-c94ed38c.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-c94ed38c.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-c94ed38c.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 450px;}.uagb-block-c94ed38c.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-c94ed38c.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-c94ed38c.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-c94ed38c.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}@media only screen and (max-width: 976px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-3b550c51{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-3b550c51 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: stretch;justify-content: center;flex-wrap: nowrap;row-gap: 40px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-3b550c51{padding-top: 80px;padding-bottom: 80px;padding-left: 32px;padding-right: 32px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 40px;column-gap: 0px;background-color: var(--ast-global-color-4);;}.wp-block-uagb-container.uagb-block-3b550c51.wp-block-uagb-container > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-uagb-image ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not( .spectra-container-link-overlay ):not(.spectra-image-gallery__control-lightbox):not(.wp-block-uagb-lottie):not(.uagb-container-inner-blocks-wrap){width: 100%;}.wp-block-uagb-container.uagb-block-3b550c51.wp-block-uagb-container > .uagb-container-inner-blocks-wrap > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not(.spectra-image-gallery__control-lightbox){width: 100%;}.uagb-block-02dd0554.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-02dd0554.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0%;margin-top: 0%;margin-left: 8%;margin-right: 8%;}.uagb-block-02dd0554.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-02dd0554.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-02dd0554.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-02dd0554 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-02dd0554 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-02dd0554 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-02dd0554 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-02dd0554 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-02dd0554.uagb-infobox__content-wrap{padding-top: 0%;padding-right: 0%;padding-bottom: 0%;padding-left: 0%;}.uagb-block-02dd0554 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-02dd0554.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-02dd0554 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-02dd0554 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-02dd0554.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-cef2b215{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-cef2b215 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 24px;}.wp-block-uagb-container.uagb-block-cef2b215{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 24px;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-block-cef2b215.wp-block-uagb-container > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-uagb-image ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not( .spectra-container-link-overlay ):not(.spectra-image-gallery__control-lightbox):not(.wp-block-uagb-lottie):not(.uagb-container-inner-blocks-wrap){width: 100%;}.wp-block-uagb-container.uagb-block-cef2b215.wp-block-uagb-container > .uagb-container-inner-blocks-wrap > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not(.spectra-image-gallery__control-lightbox){width: 100%;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-b50c2095{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-b50c2095 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-b50c2095{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;flex-direction: row;align-items: stretch;justify-content: flex-start;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-block-b50c2095.wp-block-uagb-container > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-uagb-image ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not( .spectra-container-link-overlay ):not(.spectra-image-gallery__control-lightbox):not(.wp-block-uagb-lottie):not(.uagb-container-inner-blocks-wrap){width: 100%;}.wp-block-uagb-container.uagb-block-b50c2095.wp-block-uagb-container > .uagb-container-inner-blocks-wrap > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not(.spectra-image-gallery__control-lightbox){width: 100%;}.uagb-block-9b6c996a.wp-block-uagb-image--layout-default figure img{border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-9b6c996a.wp-block-uagb-image--layout-overlay figure img{border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-9b6c996a.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 350px;}.uagb-block-9b6c996a.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-9b6c996a .wp-block-uagb-image__figure{align-items: flex-start;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-1ab8c6c9{max-width: 25%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-1ab8c6c9 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-1ab8c6c9{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;flex-direction: row;align-items: stretch;justify-content: flex-start;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-block-1ab8c6c9.wp-block-uagb-container > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-uagb-image ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not( .spectra-container-link-overlay ):not(.spectra-image-gallery__control-lightbox):not(.wp-block-uagb-lottie):not(.uagb-container-inner-blocks-wrap){width: 100%;}.wp-block-uagb-container.uagb-block-1ab8c6c9.wp-block-uagb-container > .uagb-container-inner-blocks-wrap > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not(.spectra-image-gallery__control-lightbox){width: 100%;}.uagb-block-7727ec30.wp-block-uagb-image--layout-default figure img{border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-7727ec30.wp-block-uagb-image--layout-overlay figure img{border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-7727ec30.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 350px;}.uagb-block-7727ec30.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-001cde8a{max-width: 25%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-001cde8a > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-001cde8a{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-block-001cde8a.wp-block-uagb-container > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-uagb-image ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not( .spectra-container-link-overlay ):not(.spectra-image-gallery__control-lightbox):not(.wp-block-uagb-lottie):not(.uagb-container-inner-blocks-wrap){width: 100%;}.wp-block-uagb-container.uagb-block-001cde8a.wp-block-uagb-container > .uagb-container-inner-blocks-wrap > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not(.spectra-image-gallery__control-lightbox){width: 100%;}.uagb-block-c94ed38c.wp-block-uagb-image--layout-default figure img{border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-c94ed38c.wp-block-uagb-image--layout-overlay figure img{border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-c94ed38c.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 350px;}.uagb-block-c94ed38c.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-c94ed38c .wp-block-uagb-image__figure{align-items: flex-start;}}@media only screen and (max-width: 767px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-3b550c51{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-3b550c51 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: flex-start;flex-wrap: wrap;align-content: flex-start;row-gap: 40px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-3b550c51{padding-top: 64px;padding-bottom: 64px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 40px;column-gap: 0px;background-color: var(--ast-global-color-4);;}.wp-block-uagb-container.uagb-block-3b550c51.wp-block-uagb-container > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-uagb-image ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not( .spectra-container-link-overlay ):not(.spectra-image-gallery__control-lightbox):not(.wp-block-uagb-lottie):not(.uagb-container-inner-blocks-wrap){width: 100%;}.wp-block-uagb-container.uagb-block-3b550c51.wp-block-uagb-container > .uagb-container-inner-blocks-wrap > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not(.spectra-image-gallery__control-lightbox){width: 100%;}.uagb-block-02dd0554.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-02dd0554.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-02dd0554.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-02dd0554.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-02dd0554 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-02dd0554 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-02dd0554.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-02dd0554 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-02dd0554 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-02dd0554 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-02dd0554.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-02dd0554 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-02dd0554.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-02dd0554 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-02dd0554 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-02dd0554.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-cef2b215{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-cef2b215 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: wrap;align-content: flex-start;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-cef2b215{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: wrap;align-content: flex-start;}.wp-block-uagb-container.uagb-block-cef2b215.wp-block-uagb-container > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-uagb-image ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not( .spectra-container-link-overlay ):not(.spectra-image-gallery__control-lightbox):not(.wp-block-uagb-lottie):not(.uagb-container-inner-blocks-wrap){width: 100%;}.wp-block-uagb-container.uagb-block-cef2b215.wp-block-uagb-container > .uagb-container-inner-blocks-wrap > *:not( .wp-block-uagb-container ):not( .wp-block-uagb-column ):not( .wp-block-uagb-container ):not( .wp-block-uagb-section ):not( .uagb-container__shape ):not( .uagb-container__video-wrap ):not( .wp-block-spectra-pro-register ):not( .wp-block-spectra-pro-login ):not( .uagb-slider-container ):not(.spectra-image-gallery__control-lightbox){width: 100%;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-b50c2095{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-b50c2095 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-b50c2095{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;flex-wrap: wrap;}.uagb-block-9b6c996a.wp-block-uagb-image--layout-default figure img{border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-9b6c996a.wp-block-uagb-image--layout-overlay figure img{border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-9b6c996a.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 300px;}.uagb-block-9b6c996a.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: center;justify-content: center;align-self: center;}.uagb-block-9b6c996a .wp-block-uagb-image__figure{align-items: center;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-1ab8c6c9{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-1ab8c6c9 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-1ab8c6c9{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;flex-wrap: wrap;}.uagb-block-7727ec30.wp-block-uagb-image--layout-default figure img{border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-7727ec30.wp-block-uagb-image--layout-overlay figure img{border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-7727ec30.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 300px;}.uagb-block-7727ec30.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: center;justify-content: center;align-self: center;}.uagb-block-7727ec30 .wp-block-uagb-image__figure{align-items: center;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-001cde8a{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-001cde8a > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-001cde8a{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;flex-wrap: wrap;}.uagb-block-c94ed38c.wp-block-uagb-image--layout-default figure img{border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-c94ed38c.wp-block-uagb-image--layout-overlay figure img{border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-c94ed38c.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 300px;}.uagb-block-c94ed38c.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: center;justify-content: center;align-self: center;}.uagb-block-c94ed38c .wp-block-uagb-image__figure{align-items: center;}}";s:7:"content";s:2359:"
