<div class="wp-block-uagb-container uagb-block-3fd7bfbf alignfull uagb-is-root-container"><div class="uagb-container-inner-blocks-wrap">
<div class="wp-block-uagb-info-box uagb-block-e4d616d7 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h1 class="uagb-ifb-title">Elevating Possibilities</h1></div><p class="uagb-ifb-desc">Explore a world of creative solutions and innovation tailored to your needs.</p></div></div>
</div></div>



<div class="wp-block-uagb-container uagb-block-5e1bcd2e alignfull uagb-is-root-container"><div class="uagb-container-inner-blocks-wrap">
<div class="wp-block-uagb-info-box uagb-block-41279eec uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h2 class="uagb-ifb-title">Discover Our Expertise</h2></div><p class="uagb-ifb-desc">We offer a range of exceptional services designed to shape your vision and create unique experiences that stand out.</p></div></div>



<div class="wp-block-uagb-container uagb-block-8673fe8b">
<div class="wp-block-uagb-container uagb-block-2ba0c7cf">
<div class="wp-block-uagb-image alignleft uagb-block-b1465ec0 wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-left"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/10/natures-01-1024x683.jpg ,https://websitedemos.net/wp-content/uploads/2023/10/natures-01-1024x683.jpg 780w" sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/10/natures-01-1024x683.jpg" alt="" class="uag-image-80573" width="352" height="260" title="" loading="lazy"/></figure></div>



<div class="wp-block-uagb-info-box uagb-block-2fb1f0f1 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h5 class="uagb-ifb-title">Service 1</h5></div><p class="uagb-ifb-desc">This is a flexible section where you can share anything you want. It could be details or some information about your service 1.</p></div></div>



<div class="wp-block-uagb-buttons uagb-buttons__outer-wrap uagb-btn__default-btn uagb-btn-tablet__default-btn uagb-btn-mobile__default-btn uagb-block-284dc447"><div class="uagb-buttons__wrap uagb-buttons-layout-wrap">
<div class="wp-block-uagb-buttons-child uagb-buttons__outer-wrap uagb-block-0861aba1 wp-block-button"><div class="uagb-button__wrapper"><a class="uagb-buttons-repeater wp-block-button__link" href="#" onclick="return false;" rel="follow noopener" target="_self"><div class="uagb-button__link">Read More</div><span class="uagb-button__icon uagb-button__icon-position-after"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 320 512"><path d="M96 480c-8.188 0-16.38-3.125-22.62-9.375c-12.5-12.5-12.5-32.75 0-45.25L242.8 256L73.38 86.63c-12.5-12.5-12.5-32.75 0-45.25s32.75-12.5 45.25 0l192 192c12.5 12.5 12.5 32.75 0 45.25l-192 192C112.4 476.9 104.2 480 96 480z"></path></svg></span></a></div></div>
</div></div>
</div>



<div class="wp-block-uagb-container uagb-block-9c23cc30">
<div class="wp-block-uagb-image alignleft uagb-block-55e50dd0 wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-left"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/10/desserts-01-1024x683.jpg ,https://websitedemos.net/wp-content/uploads/2023/10/desserts-01-1024x683.jpg 780w" sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/10/desserts-01-1024x683.jpg" alt="" class="uag-image-80569" width="352" height="260" title="" loading="lazy"/></figure></div>



<div class="wp-block-uagb-info-box uagb-block-c581d11e uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h5 class="uagb-ifb-title">Service 2</h5></div><p class="uagb-ifb-desc">This is a flexible section where you can share anything you want. It could be details or some information about your service 2.</p></div></div>



<div class="wp-block-uagb-buttons uagb-buttons__outer-wrap uagb-btn__default-btn uagb-btn-tablet__default-btn uagb-btn-mobile__default-btn uagb-block-9dda4c1b"><div class="uagb-buttons__wrap uagb-buttons-layout-wrap">
<div class="wp-block-uagb-buttons-child uagb-buttons__outer-wrap uagb-block-46fccf4a wp-block-button"><div class="uagb-button__wrapper"><a class="uagb-buttons-repeater wp-block-button__link" href="#" onclick="return false;" rel="follow noopener" target="_self"><div class="uagb-button__link">Read More</div><span class="uagb-button__icon uagb-button__icon-position-after"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 320 512"><path d="M96 480c-8.188 0-16.38-3.125-22.62-9.375c-12.5-12.5-12.5-32.75 0-45.25L242.8 256L73.38 86.63c-12.5-12.5-12.5-32.75 0-45.25s32.75-12.5 45.25 0l192 192c12.5 12.5 12.5 32.75 0 45.25l-192 192C112.4 476.9 104.2 480 96 480z"></path></svg></span></a></div></div>
</div></div>
</div>



<div class="wp-block-uagb-container uagb-block-61fb7037">
<div class="wp-block-uagb-image alignleft uagb-block-69d12521 wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-left"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/10/snow-mountains-01-1024x683.jpg ,https://websitedemos.net/wp-content/uploads/2023/10/snow-mountains-01-1024x683.jpg 780w" sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/10/snow-mountains-01-1024x683.jpg" alt="" class="uag-image-80577" width="352" height="260" title="" loading="lazy"/></figure></div>



<div class="wp-block-uagb-info-box uagb-block-c405fcaf uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h5 class="uagb-ifb-title">Service 3</h5></div><p class="uagb-ifb-desc">This is a flexible section where you can share anything you want. It could be details or some information about your service 3.</p></div></div>



<div class="wp-block-uagb-buttons uagb-buttons__outer-wrap uagb-btn__default-btn uagb-btn-tablet__default-btn uagb-btn-mobile__default-btn uagb-block-c9209a88"><div class="uagb-buttons__wrap uagb-buttons-layout-wrap">
<div class="wp-block-uagb-buttons-child uagb-buttons__outer-wrap uagb-block-a1f3443a wp-block-button"><div class="uagb-button__wrapper"><a class="uagb-buttons-repeater wp-block-button__link" href="#" onclick="return false;" rel="follow noopener" target="_self"><div class="uagb-button__link">Read More</div><span class="uagb-button__icon uagb-button__icon-position-after"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 320 512"><path d="M96 480c-8.188 0-16.38-3.125-22.62-9.375c-12.5-12.5-12.5-32.75 0-45.25L242.8 256L73.38 86.63c-12.5-12.5-12.5-32.75 0-45.25s32.75-12.5 45.25 0l192 192c12.5 12.5 12.5 32.75 0 45.25l-192 192C112.4 476.9 104.2 480 96 480z"></path></svg></span></a></div></div>
</div></div>
</div>
</div>



<div class="wp-block-uagb-container uagb-block-da0ed808">
<div class="wp-block-uagb-container uagb-block-61d1ceb6">
<div class="wp-block-uagb-image alignleft uagb-block-f10b22a2 wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-left"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/10/rivers-02.jpg ,https://websitedemos.net/wp-content/uploads/2023/10/rivers-02.jpg 780w, https://websitedemos.net/wp-content/uploads/2023/10/rivers-02.jpg 360w" sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/10/rivers-02.jpg" alt="" class="uag-image-80576" width="352" height="260" title="" loading="lazy"/></figure></div>



<div class="wp-block-uagb-info-box uagb-block-ec2c2d25 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h5 class="uagb-ifb-title">Service 4</h5></div><p class="uagb-ifb-desc">This is a flexible section where you can share anything you want. It could be details or some information about your service 4.</p></div></div>



<div class="wp-block-uagb-buttons uagb-buttons__outer-wrap uagb-btn__default-btn uagb-btn-tablet__default-btn uagb-btn-mobile__default-btn uagb-block-4fba94a8"><div class="uagb-buttons__wrap uagb-buttons-layout-wrap">
<div class="wp-block-uagb-buttons-child uagb-buttons__outer-wrap uagb-block-149b1fb3 wp-block-button"><div class="uagb-button__wrapper"><a class="uagb-buttons-repeater wp-block-button__link" href="#" onclick="return false;" rel="follow noopener" target="_self"><div class="uagb-button__link">Read More</div><span class="uagb-button__icon uagb-button__icon-position-after"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 320 512"><path d="M96 480c-8.188 0-16.38-3.125-22.62-9.375c-12.5-12.5-12.5-32.75 0-45.25L242.8 256L73.38 86.63c-12.5-12.5-12.5-32.75 0-45.25s32.75-12.5 45.25 0l192 192c12.5 12.5 12.5 32.75 0 45.25l-192 192C112.4 476.9 104.2 480 96 480z"></path></svg></span></a></div></div>
</div></div>
</div>



<div class="wp-block-uagb-container uagb-block-c55a6e8e">
<div class="wp-block-uagb-image alignleft uagb-block-7266cf14 wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-left"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/09/trees-rivers-02.jpg ,https://websitedemos.net/wp-content/uploads/2023/09/trees-rivers-02.jpg 780w, https://websitedemos.net/wp-content/uploads/2023/09/trees-rivers-02.jpg 360w" sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/09/trees-rivers-02.jpg" alt="" class="uag-image-80698" width="352" height="260" title="" loading="lazy"/></figure></div>



<div class="wp-block-uagb-info-box uagb-block-7754e3e0 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h5 class="uagb-ifb-title">Service 5</h5></div><p class="uagb-ifb-desc">This is a flexible section where you can share anything you want. It could be details or some information about your service 5.</p></div></div>



<div class="wp-block-uagb-buttons uagb-buttons__outer-wrap uagb-btn__default-btn uagb-btn-tablet__default-btn uagb-btn-mobile__default-btn uagb-block-270c0105"><div class="uagb-buttons__wrap uagb-buttons-layout-wrap">
<div class="wp-block-uagb-buttons-child uagb-buttons__outer-wrap uagb-block-428d760a wp-block-button"><div class="uagb-button__wrapper"><a class="uagb-buttons-repeater wp-block-button__link" href="#" onclick="return false;" rel="follow noopener" target="_self"><div class="uagb-button__link">Read More</div><span class="uagb-button__icon uagb-button__icon-position-after"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 320 512"><path d="M96 480c-8.188 0-16.38-3.125-22.62-9.375c-12.5-12.5-12.5-32.75 0-45.25L242.8 256L73.38 86.63c-12.5-12.5-12.5-32.75 0-45.25s32.75-12.5 45.25 0l192 192c12.5 12.5 12.5 32.75 0 45.25l-192 192C112.4 476.9 104.2 480 96 480z"></path></svg></span></a></div></div>
</div></div>
</div>



<div class="wp-block-uagb-container uagb-block-ee5b9247">
<div class="wp-block-uagb-image alignleft uagb-block-152ae3cd wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-left"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/10/desserts-02.jpg ,https://websitedemos.net/wp-content/uploads/2023/10/desserts-02.jpg 780w, https://websitedemos.net/wp-content/uploads/2023/10/desserts-02.jpg 360w" sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/10/desserts-02.jpg" alt="" class="uag-image-80570" width="352" height="260" title="" loading="lazy"/></figure></div>



<div class="wp-block-uagb-info-box uagb-block-1342da43 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h5 class="uagb-ifb-title">Service 6</h5></div><p class="uagb-ifb-desc">This is a flexible section where you can share anything you want. It could be details or some information about your service 6.</p></div></div>



<div class="wp-block-uagb-buttons uagb-buttons__outer-wrap uagb-btn__default-btn uagb-btn-tablet__default-btn uagb-btn-mobile__default-btn uagb-block-6e74ec4b"><div class="uagb-buttons__wrap uagb-buttons-layout-wrap">
<div class="wp-block-uagb-buttons-child uagb-buttons__outer-wrap uagb-block-27bcc1a9 wp-block-button"><div class="uagb-button__wrapper"><a class="uagb-buttons-repeater wp-block-button__link" href="#" onclick="return false;" rel="follow noopener" target="_self"><div class="uagb-button__link">Read More</div><span class="uagb-button__icon uagb-button__icon-position-after"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 320 512"><path d="M96 480c-8.188 0-16.38-3.125-22.62-9.375c-12.5-12.5-12.5-32.75 0-45.25L242.8 256L73.38 86.63c-12.5-12.5-12.5-32.75 0-45.25s32.75-12.5 45.25 0l192 192c12.5 12.5 12.5 32.75 0 45.25l-192 192C112.4 476.9 104.2 480 96 480z"></path></svg></span></a></div></div>
</div></div>
</div>
</div>
</div></div>



<div class="wp-block-uagb-container uagb-block-1202b3b6 alignfull uagb-is-root-container"><div class="uagb-container-inner-blocks-wrap">
<div class="wp-block-uagb-container uagb-block-be48a6cb">
<div class="wp-block-uagb-container uagb-block-ec0d038e">
<div class="wp-block-uagb-info-box uagb-block-bad1c591 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h2 class="uagb-ifb-title">Our Unique Value Proposition</h2></div></div></div>
</div>



<div class="wp-block-uagb-container uagb-block-675cd79a">
<div class="wp-block-uagb-info-box uagb-block-fa01e997 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"></div><p class="uagb-ifb-desc">Discover what sets us apart and makes us the ideal choice for your creative needs.</p></div></div>
</div>
</div>



<div class="wp-block-uagb-container uagb-block-2ca479bc">
<div class="wp-block-uagb-container uagb-block-9ff2590f">
<div class="wp-block-uagb-info-box uagb-block-2d59b177 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><p class="uagb-ifb-title-prefix">01</p><h5 class="uagb-ifb-title">Innovation</h5></div><p class="uagb-ifb-desc">We thrive on innovation, continually exploring new ideas and pushing creative boundaries to deliver unique solutions.</p></div></div>
</div>



<div class="wp-block-uagb-container uagb-block-3310da07">
<div class="wp-block-uagb-info-box uagb-block-84acc2a6 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><p class="uagb-ifb-title-prefix">02</p><h5 class="uagb-ifb-title">Expertise</h5></div><p class="uagb-ifb-desc">Our team of seasoned professionals brings unmatched expertise to every project, ensuring quality and excellence.</p></div></div>
</div>



<div class="wp-block-uagb-container uagb-block-e3c4babb">
<div class="wp-block-uagb-info-box uagb-block-e596e133 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><p class="uagb-ifb-title-prefix">03</p><h5 class="uagb-ifb-title">Collaboration</h5></div><p class="uagb-ifb-desc">We value collaboration, fostering partnerships and teamwork that result in groundbreaking solutions.</p></div></div>
</div>
</div>
</div></div>



<div class="wp-block-uagb-container uagb-block-74f2c06c alignfull uagb-is-root-container"><div class="uagb-container-inner-blocks-wrap">
<div class="wp-block-uagb-info-box uagb-block-daaa5215 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h6 class="uagb-ifb-title-prefix">Stay Connected with Us</h6><h2 class="uagb-ifb-title">Let's Create Together</h2></div><p class="uagb-ifb-desc">Connect with us to explore how we can make your vision a reality. Join us in shaping the future.</p></div></div>



<div class="wp-block-uagb-buttons uagb-buttons__outer-wrap uagb-btn__default-btn uagb-btn-tablet__default-btn uagb-btn-mobile__default-btn uagb-block-f8796360"><div class="uagb-buttons__wrap uagb-buttons-layout-wrap">
<div class="wp-block-uagb-buttons-child uagb-buttons__outer-wrap uagb-block-6cc092b8 wp-block-button"><div class="uagb-button__wrapper"><a class="uagb-buttons-repeater wp-block-button__link" href="#" onclick="return false;" rel="follow noopener" target="_self"><div class="uagb-button__link">Get Started</div></a></div></div>
</div></div>
</div></div>
";}s:8:"id-82497";a:10:{s:5:"title";s:13:"About Page 05";s:3:"url";s:52:"https://websitedemos.net/astra-blocks/about-page-05/";s:3:"tag";a:0:{}s:8:"category";i:3392;s:16:"primary-category";s:0:"";s:4:"type";s:4:"page";s:12:"page-builder";s:9:"gutenberg";s:16:"required-plugins";a:0:{}s:10:"stylesheet";s:236593:".wp-block-uagb-container{display:flex;position:relative;box-sizing:border-box;transition-property:box-shadow;transition-duration:0.2s;transition-timing-function:ease}.wp-block-uagb-container .spectra-container-link-overlay{bottom:0;left:0;position:absolute;right:0;top:0;z-index:10}.wp-block-uagb-container.uagb-is-root-container{margin-left:auto;margin-right:auto}.wp-block-uagb-container.alignfull.uagb-is-root-container .uagb-container-inner-blocks-wrap{display:flex;position:relative;box-sizing:border-box;margin-left:auto !important;margin-right:auto !important}.wp-block-uagb-container .uagb-container__video-wrap{height:100%;width:100%;top:0;left:0;position:absolute;overflow:hidden;-webkit-transition:opacity 1s;-o-transition:opacity 1s;transition:opacity 1s}.wp-block-uagb-container .uagb-container__video-wrap video{max-width:100%;width:100%;height:100%;margin:0;line-height:1;border:none;display:inline-block;vertical-align:baseline;-o-object-fit:cover;object-fit:cover;background-size:cover}.st-block-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap>*:not(.wp-block-uagb-container):not(.wp-block-uagb-column):not(.wp-block-uagb-container):not(.wp-block-uagb-section):not(.uagb-container__shape):not(.uagb-container__video-wrap):not(.wp-block-spectra-pro-register):not(.wp-block-spectra-pro-login):not(.uagb-slider-container):not(.spectra-image-gallery__control-lightbox),.st-block-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap,.st-block-container .wp-block-uagb-container>*:not(.wp-block-uagb-container):not(.wp-block-uagb-column):not(.wp-block-uagb-container):not(.wp-block-uagb-section):not(.uagb-container__shape):not(.uagb-container__video-wrap):not(.wp-block-uagb-image):not(.wp-block-spectra-pro-register):not(.wp-block-spectra-pro-login):not(.uagb-slider-container):not(.spectra-container-link-overlay):not(.spectra-image-gallery__control-lightbox):not(.wp-block-uagb-lottie):not(.uagb-faq__outer-wrap){min-width:unset !important;width:100%;position:relative}.st-block-container .ast-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap>.wp-block-uagb-container>ul,.st-block-container .ast-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap>.wp-block-uagb-container ol,.st-block-container .ast-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap>ul,.st-block-container .ast-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap ol{max-width:-webkit-fill-available;margin-block-start:0;margin-block-end:0;margin-left:20px}.ast-plain-container .editor-styles-wrapper .block-editor-block-list__layout.is-root-container .uagb-is-root-container.wp-block-uagb-container.alignwide{margin-left:auto;margin-right:auto}.uagb-container__shape{overflow:hidden;position:absolute;left:0;width:100%;line-height:0;direction:ltr}.uagb-container__shape-top{top:-3px}.uagb-container__shape-bottom{bottom:-3px}.uagb-container__shape.uagb-container__invert.uagb-container__shape-bottom,.uagb-container__shape.uagb-container__invert.uagb-container__shape-top{-webkit-transform:rotate(180deg);-ms-transform:rotate(180deg);transform:rotate(180deg)}.uagb-container__shape.uagb-container__shape-flip svg{transform:translateX(-50%) rotateY(180deg)}.uagb-container__shape svg{display:block;width:-webkit-calc(100% + 1.3px);width:calc(100% + 1.3px);position:relative;left:50%;-webkit-transform:translateX(-50%);-ms-transform:translateX(-50%);transform:translateX(-50%)}.uagb-container__shape .uagb-container__shape-fill{-webkit-transform-origin:center;-ms-transform-origin:center;transform-origin:center;-webkit-transform:rotateY(0deg);transform:rotateY(0deg)}.uagb-container__shape.uagb-container__shape-above-content{z-index:9;pointer-events:none}.nv-single-page-wrap .nv-content-wrap.entry-content .wp-block-uagb-container.alignfull{margin-left:calc(50% - 50vw);margin-right:calc(50% - 50vw)}@media only screen and (max-width: 767px){.wp-block-uagb-container .wp-block-uagb-advanced-heading{width:-webkit-fill-available !important}}
.uagb-ifb-content>svg *{-webkit-transition:all 0.2s;-o-transition:all 0.2s;transition:all 0.2s}.uagb-ifb-content>svg,.uagb-ifb-content{display:inline-block}.uagb-ifb-content>svg{vertical-align:middle;width:inherit;height:inherit;font-style:initial}.uagb-ifb-content .uagb-ifb-icon-wrap svg{box-sizing:content-box;width:inherit;height:inherit}.uagb-ifb-button-wrapper:empty{display:none}div.uagb-ifb-button-wrapper a.uagb-infobox-cta-link,div.uagb-ifb-cta a.uagb-infobox-cta-link,.entry .entry-content a.uagb-infobox-cta-link,a.uagb-infobox-link-wrap,.entry .entry-content a.uagb-infobox-link-wrap{text-decoration:none;align-items:center}.uagb-infobox-icon-left-title.uagb-infobox-image-valign-middle .uagb-ifb-title-wrap,.uagb-infobox-icon-right-title.uagb-infobox-image-valign-middle .uagb-ifb-title-wrap,.uagb-infobox-image-valign-middle .uagb-ifb-icon-wrap,.uagb-infobox-image-valign-middle .uagb-ifb-image-content,.uagb-infobox-icon-left.uagb-infobox-image-valign-middle .uagb-ifb-content,.uagb-infobox-icon-right.uagb-infobox-image-valign-middle .uagb-ifb-content{-ms-flex-item-align:center;-webkit-align-self:center;align-self:center}.uagb-infobox-icon-left-title.uagb-infobox-image-valign-top .uagb-ifb-title-wrap,.uagb-infobox-icon-right-title.uagb-infobox-image-valign-top .uagb-ifb-title-wrap,.uagb-infobox-image-valign-top .uagb-ifb-icon-wrap,.uagb-infobox-image-valign-top .uagb-ifb-image-content,.uagb-infobox-icon-left.uagb-infobox-image-valign-top .uagb-ifb-content,.uagb-infobox-icon-right.uagb-infobox-image-valign-top .uagb-ifb-content{-webkit-align-self:self-start;align-self:self-start}.uagb-infobox-left{justify-content:flex-start;text-align:left;-webkit-box-pack:start;-ms-flex-pack:start;-webkit-justify-content:flex-start;-moz-box-pack:start}.uagb-infobox-center{justify-content:center;text-align:center;-webkit-box-pack:center;-ms-flex-pack:center;-webkit-justify-content:center;-moz-box-pack:center}.uagb-infobox-right{justify-content:flex-end;text-align:right;-webkit-box-pack:end;-ms-flex-pack:end;-webkit-justify-content:flex-end;-moz-box-pack:end}.uagb-infobox-icon-above-title.uagb-infobox__content-wrap,.uagb-infobox-icon-below-title.uagb-infobox__content-wrap{display:block;width:100%}.uagb-infobox-icon-left-title .uagb-ifb-content>svg,.uagb-infobox-icon-left .uagb-ifb-content>svg{margin-right:10px}.uagb-infobox-icon-right-title .uagb-ifb-content>svg,.uagb-infobox-icon-right .uagb-ifb-content>svg{margin-left:10px}.uagb-infobox-icon-left.uagb-infobox__content-wrap,.uagb-infobox-icon-right.uagb-infobox__content-wrap,.uagb-infobox-icon-left-title .uagb-ifb-left-title-image,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image{display:-webkit-box;display:-ms-flexbox;display:-webkit-flex;display:-moz-box;display:flex;-js-display:flex}.uagb-infobox-icon-left-title .uagb-ifb-left-title-image .uagb-ifb-image-content,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image .uagb-ifb-image-content,.uagb-infobox-icon-left .uagb-ifb-image-content,.uagb-infobox-icon-right .uagb-ifb-image-content{flex-shrink:0;line-height:0}.uagb-infobox-icon-left-title .uagb-ifb-left-title-image .uagb-ifb-title-wrap,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image .uagb-ifb-title-wrap,.uagb-infobox-icon-left .uagb-ifb-content,.uagb-infobox-icon-right .uagb-ifb-content{flex-grow:1}.uagb-infobox-icon-right.uagb-infobox__content-wrap,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image{-webkit-box-pack:end;-ms-flex-pack:end;-webkit-justify-content:flex-end;-moz-box-pack:end;justify-content:flex-end}.uagb-ifb-content img{position:relative;display:inline-block;line-height:0;width:auto;height:auto !important;max-width:100%;border-radius:inherit;-webkit-box-sizing:content-box;-moz-box-sizing:content-box;-webkit-border-radius:inherit}.uagb-infobox-module-link{position:absolute;top:0;right:0;bottom:0;left:0;z-index:4;width:100%;height:100%}.uagb-edit-mode .uagb-infobox-module-link{z-index:2}.uagb-infobox-link-icon-after{margin-right:0;margin-left:5px}.uagb-infobox-link-icon-before{margin-right:5px;margin-left:0}.uagb-infobox-link-icon{-webkit-transition:all 200ms linear;transition:all 200ms linear}.uagb-infobox__content-wrap{box-sizing:border-box;position:relative;width:100%;word-break:break-word;z-index:1}.uagb-ifb-separator{display:inline-block;margin:0;border-top-color:#333;border-top-style:solid;border-top-width:2px;line-height:0}.uagb-ifb-button-wrapper{line-height:1}.uagb-ifb-button-wrapper.uagb-ifb-button-type-text .uagb-infobox-cta-link.wp-block-button__link{background-color:unset;border:none}.uagb-ifb-button-wrapper.uagb-ifb-button-type-text .uagb-infobox-cta-link.wp-block-button__link:hover{background-color:unset;border-color:unset}.uagb-ifb-button-wrapper .uagb-infobox-cta-link{cursor:pointer}.uagb-ifb-button-wrapper .wp-block-button__link svg{fill:currentColor}.uagb-infobox__content-wrap a{-webkit-box-shadow:none;box-shadow:none;text-decoration:none}.uagb-ifb-title-wrap{width:100%}.uagb-ifb-title{margin-block-start:0}.uagb-ifb-title-wrap .uagb-ifb-title-prefix{display:block;padding:0;margin:0}.uagb-infobox__content-wrap.uagb-infobox__content-wrap{position:relative}.uagb-ifb-content{width:100%}.uagb-infobox__content-wrap.uagb-infobox,.uagb-ifb-content,.uagb-ifb-title-wrap,.uagb-ifb-title-prefix *,svg.dashicon.dashicons-upload{z-index:1}a.uagb-infobox-link-wrap{color:inherit}.uagb-ifb-content p:empty{display:none}.uagb-infobox__content-wrap .uagb-ifb-content img{display:inline-block;max-width:100%}.uagb-infobox__content-wrap .uagb-ifb-content svg{display:inline-block}.uagb-infobox__content-wrap .uagb-ifb-icon-wrap,.uagb-infobox-icon-left .uagb-ifb-image-content,.uagb-infobox-icon-right .uagb-ifb-image-content{box-sizing:content-box}.uagb-infobox-cta-link>svg{vertical-align:middle;width:15px;height:15px;font-size:15px}.uagb-infobox-cta-link{display:inline-flex}.block-editor-page #wpwrap .uagb-infobox-cta-link svg,.uagb-infobox-cta-link svg{font-style:normal}.uagb-infobox-icon-left-title .uagb-ifb-icon-wrap,.uagb-infobox-icon-left .uagb-ifb-icon-wrap{margin-right:10px;line-height:0}.uagb-infobox-icon-right-title .uagb-ifb-icon-wrap,.uagb-infobox-icon-right .uagb-ifb-icon-wrap{margin-left:10px;line-height:0}.uagb-infobox-icon-left .uagb-ifb-left-right-wrap,.uagb-infobox-icon-right .uagb-ifb-left-right-wrap,.uagb-infobox-icon-left-title .uagb-ifb-left-title-image,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image{display:-webkit-box;display:-ms-flexbox;display:flex}.uagb-infobox-icon-right .uagb-ifb-left-right-wrap,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image{-webkit-box-pack:end;-ms-flex-pack:end;-webkit-justify-content:flex-end;-moz-box-pack:end;justify-content:flex-end}a.uagb-infbox__link-to-all{position:absolute;top:0;left:0;z-index:3;width:100%;height:100%;box-shadow:none;text-decoration:none;-webkit-box-shadow:none}@media only screen and (max-width: 976px){.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-image-content{padding:0;margin-bottom:20px}.uagb-infobox-stacked-tablet.uagb-reverse-order-tablet.uagb-infobox__content-wrap{display:-webkit-inline-box;display:-ms-inline-flexbox;display:-webkit-inline-flex;display:-moz-inline-box;display:inline-flex;flex-direction:column-reverse;-js-display:inline-flex;-webkit-box-orient:vertical;-webkit-box-direction:reverse;-ms-flex-direction:column-reverse;-webkit-flex-direction:column-reverse;-moz-box-orient:vertical;-moz-box-direction:reverse}.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-content,.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-icon-wrap,.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-image-content{display:block;width:100%;text-align:center}.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-icon-wrap,.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-image-content{margin-right:0;margin-left:0}.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap{display:inline-block}.uagb-infobox-icon-left-title.uagb-infobox-stacked-tablet .uagb-ifb-image-content,.uagb-infobox-icon-left-title.uagb-infobox-stacked-tablet .uagb-ifb-icon-wrap,.uagb-infobox-icon-left.uagb-infobox-stacked-tablet .uagb-ifb-image-content,.uagb-infobox-icon-left.uagb-infobox-stacked-tablet .uagb-ifb-icon-wrap{margin-right:0}.uagb-infobox-icon-right-title.uagb-infobox-stacked-tablet .uagb-ifb-image-content,.uagb-infobox-icon-right-title.uagb-infobox-stacked-tablet .uagb-ifb-icon-wrap,.uagb-infobox-icon-right.uagb-infobox-stacked-tablet .uagb-ifb-image-content,.uagb-infobox-icon-right.uagb-infobox-stacked-tablet .uagb-ifb-icon-wrap{margin-left:0}.uagb-infobox-icon-left-title .uagb-ifb-separator{margin:10px 0}}@media screen and (max-width: 767px){.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap{display:inline-block}.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-image-content,.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-icon-wrap{padding:0;margin-bottom:20px;margin-right:0;margin-left:0}.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap.uagb-reverse-order-mobile{display:-webkit-inline-box;display:-ms-inline-flexbox;display:-webkit-inline-flex;display:-moz-inline-box;display:inline-flex;flex-direction:column-reverse;-js-display:inline-flex;-webkit-box-orient:vertical;-webkit-box-direction:reverse;-ms-flex-direction:column-reverse;-webkit-flex-direction:column-reverse;-moz-box-orient:vertical;-moz-box-direction:reverse}.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-image-content,.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-icon-wrap,.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-content{display:block;width:100%;text-align:center}.uagb-infobox-icon-left-title.uagb-infobox-stacked-mobile .uagb-ifb-image-content,.uagb-infobox-icon-left-title.uagb-infobox-stacked-mobile .uagb-ifb-icon-wrap,.uagb-infobox-icon-left.uagb-infobox-stacked-mobile .uagb-ifb-image-content,.uagb-infobox-icon-left.uagb-infobox-stacked-mobile .uagb-ifb-icon-wrap{margin-right:0}.uagb-infobox-icon-right-title.uagb-infobox-stacked-mobile .uagb-ifb-image-content,.uagb-infobox-icon-right-title.uagb-infobox-stacked-mobile .uagb-ifb-icon-wrap,.uagb-infobox-icon-right.uagb-infobox-stacked-mobile .uagb-ifb-image-content,.uagb-infobox-icon-right.uagb-infobox-stacked-mobile .uagb-ifb-icon-wrap{margin-left:0}.uagb-infobox-icon-left-title .uagb-ifb-separator{margin:10px 0}}.uagb-ifb-icon svg{width:inherit;height:inherit;vertical-align:middle}.uagb-ifb-button-icon{height:15px;width:15px;font-size:15px;vertical-align:middle}.uagb-ifb-button-icon svg{height:inherit;width:inherit;display:inline-block}.uagb-ifb-button-icon.uagb-ifb-align-icon-after{float:right}.uagb-ifb-cta-button{display:inline-block}.uagb-disable-link{pointer-events:none}
.wp-block-uagb-container.uagb-is-root-container .uagb-block-5657136f{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-5657136f .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-5657136f .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-5657136f .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-5657136f .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-5657136f .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-5657136f > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-5657136f{box-shadow: 0px 0px   #00000070 ;padding-top: 112px;padding-bottom: 112px;padding-left: 40px;padding-right: 40px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;background-color: var(--ast-global-color-5);;}.uagb-block-48b77c69 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-48b77c69 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-48b77c69 .uagb-ifb-icon svg{fill: #333;}.uagb-block-48b77c69.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-48b77c69 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-48b77c69 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-48b77c69.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-48b77c69.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-48b77c69 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-48b77c69 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-48b77c69 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-48b77c69 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-48b77c69.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-48b77c69.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-48b77c69.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-48b77c69.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-48b77c69 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-48b77c69.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 24px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-48b77c69.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-48b77c69 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-48b77c69 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-48b77c69 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-48b77c69 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-48b77c69.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-48b77c69.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-48b77c69 .uagb-infobox__content-wrap{text-align: center;}.uagb-block-48b77c69.uagb-infobox-icon-above-title{text-align: center;}.uagb-block-48b77c69.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-48b77c69 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-48b77c69.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-48b77c69 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-48b77c69 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-48b77c69.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-cdd6ca86{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-cdd6ca86 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-cdd6ca86 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-cdd6ca86 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-cdd6ca86 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-cdd6ca86 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-block-cdd6ca86{min-height: 350px;box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 20px;column-gap: 20px;overflow: visible;border-color: inherit;background-repeat: no-repeat;background-position: 50% 50%;background-size: cover;background-attachment: fixed;background-image: url(https://websitedemos.net/wp-content/uploads/2023/10/desserts-01.jpg);;background-clip: padding-box;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;}.wp-block-uagb-image{display:flex}.wp-block-uagb-image__figure{position:relative;display:flex;flex-direction:column;max-width:100%;height:auto;margin:0}.wp-block-uagb-image__figure img{height:auto;display:flex;max-width:100%;transition:box-shadow 0.2s ease}.wp-block-uagb-image__figure>a{display:inline-block}.wp-block-uagb-image__figure figcaption{text-align:center;margin-top:0.5em;margin-bottom:1em}.wp-block-uagb-image--align-left{text-align:left}.wp-block-uagb-image--align-right{text-align:right}.wp-block-uagb-image--align-center{text-align:center}.wp-block-uagb-image--align-full .wp-block-uagb-image__figure{margin-left:calc(50% - 50vw);margin-right:calc(50% - 50vw);max-width:100vw;width:100vw;height:auto}.wp-block-uagb-image--align-full .wp-block-uagb-image__figure img{height:auto;width:100% !important}.wp-block-uagb-image--align-wide .wp-block-uagb-image__figure img{height:auto;width:100%}.wp-block-uagb-image--layout-overlay__color-wrapper{position:absolute;left:0;top:0;right:0;bottom:0;opacity:0.2;background:rgba(0,0,0,0.5);transition:opacity 0.35s ease-in-out}.wp-block-uagb-image--layout-overlay-link{position:absolute;left:0;right:0;bottom:0;top:0}.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity:1}.wp-block-uagb-image--layout-overlay__inner{position:absolute;left:15px;right:15px;bottom:15px;top:15px;display:flex;align-items:center;justify-content:center;flex-direction:column;border-color:#fff;transition:0.35s ease-in-out}.wp-block-uagb-image--layout-overlay__inner.top-left,.wp-block-uagb-image--layout-overlay__inner.top-center,.wp-block-uagb-image--layout-overlay__inner.top-right{justify-content:flex-start}.wp-block-uagb-image--layout-overlay__inner.bottom-left,.wp-block-uagb-image--layout-overlay__inner.bottom-center,.wp-block-uagb-image--layout-overlay__inner.bottom-right{justify-content:flex-end}.wp-block-uagb-image--layout-overlay__inner.top-left,.wp-block-uagb-image--layout-overlay__inner.center-left,.wp-block-uagb-image--layout-overlay__inner.bottom-left{align-items:flex-start}.wp-block-uagb-image--layout-overlay__inner.top-right,.wp-block-uagb-image--layout-overlay__inner.center-right,.wp-block-uagb-image--layout-overlay__inner.bottom-right{align-items:flex-end}.wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{color:#fff;transition:transform 0.35s, opacity 0.35s ease-in-out;transform:translate3d(0, 24px, 0)}.wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width:30%;border-top-width:2px;border-top-color:#fff;border-top-style:solid;margin-bottom:10px;opacity:0;transition:transform 0.4s, opacity 0.4s ease-in-out;transform:translate3d(0, 30px, 0)}.wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity:0;overflow:visible;color:#fff;transition:transform 0.45s, opacity 0.45s ease-in-out;transform:translate3d(0, 35px, 0)}.wp-block-uagb-image--layout-overlay__inner:hover .uagb-image-heading,.wp-block-uagb-image--layout-overlay__inner:hover .uagb-image-separator,.wp-block-uagb-image--layout-overlay__inner:hover .uagb-image-caption{opacity:1;transform:translate3d(0, 0, 0)}.wp-block-uagb-image--effect-zoomin .wp-block-uagb-image__figure img,.wp-block-uagb-image--effect-zoomin .wp-block-uagb-image__figure .wp-block-uagb-image--layout-overlay__color-wrapper{transform:scale(1);transition:transform 0.35s ease-in-out}.wp-block-uagb-image--effect-zoomin .wp-block-uagb-image__figure:hover img,.wp-block-uagb-image--effect-zoomin .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{transform:scale(1.05)}.wp-block-uagb-image--effect-slide .wp-block-uagb-image__figure img,.wp-block-uagb-image--effect-slide .wp-block-uagb-image__figure .wp-block-uagb-image--layout-overlay__color-wrapper{width:calc(100% + 40px) !important;max-width:none !important;transform:translate3d(-40px, 0, 0);transition:transform 0.35s ease-in-out}.wp-block-uagb-image--effect-slide .wp-block-uagb-image__figure:hover img,.wp-block-uagb-image--effect-slide .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{transform:translate3d(0, 0, 0)}.wp-block-uagb-image--effect-grayscale img{filter:grayscale(0%);transition:0.35s ease-in-out}.wp-block-uagb-image--effect-grayscale:hover img{filter:grayscale(100%)}.wp-block-uagb-image--effect-blur img{filter:blur(0);transition:0.35s ease-in-out}.wp-block-uagb-image--effect-blur:hover img{filter:blur(3px)}
.wp-block-uagb-container.uagb-is-root-container .uagb-block-8c4383c7{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-8c4383c7 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-8c4383c7 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-8c4383c7 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-8c4383c7 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-8c4383c7 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-8c4383c7 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 72px;}.wp-block-uagb-container.uagb-block-8c4383c7{box-shadow: 0px 0px   #00000070 ;padding-top: 112px;padding-bottom: 112px;padding-left: 40px;padding-right: 40px;margin-top:  !important;margin-bottom:  !important;row-gap: 0px;column-gap: 72px;overflow: visible;border-color: inherit;background-color: var(--ast-global-color-5);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-d4a03254{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-block-d4a03254 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-d4a03254 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-d4a03254 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-d4a03254 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-d4a03254 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-d4a03254 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 72px;}.wp-block-uagb-container.uagb-block-d4a03254{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 0px;column-gap: 72px;overflow: visible;border-color: inherit;flex-direction: row;align-items: center;justify-content: center;flex-wrap: nowrap;}.uagb-block-7edef7ac .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-7edef7ac .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-7edef7ac .uagb-ifb-icon svg{fill: #333;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-7edef7ac .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-7edef7ac .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-7edef7ac .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-7edef7ac .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-7edef7ac.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-7edef7ac.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-7edef7ac .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-7edef7ac .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-7edef7ac .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-7edef7ac .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-7edef7ac .uagb-infobox__content-wrap{text-align: left;}.uagb-block-7edef7ac.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-7edef7ac.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-c7857b8c{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-block-c7857b8c .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-c7857b8c .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-c7857b8c .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-c7857b8c .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-c7857b8c .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-c7857b8c > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: flex-start;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 72px;}.wp-block-uagb-container.uagb-block-c7857b8c{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 0px;column-gap: 72px;overflow: visible;border-color: inherit;flex-direction: row;align-items: flex-start;justify-content: center;flex-wrap: nowrap;}.uagb-block-955803d2.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-955803d2 .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-955803d2.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-955803d2.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;text-align: center;}.uagb-block-955803d2.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-955803d2.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-955803d2.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-955803d2.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-955803d2.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-955803d2.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-955803d2.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-955803d2.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-955803d2.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 450px;}.uagb-block-955803d2.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-955803d2.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-955803d2.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-955803d2.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-1202b3b6{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-1202b3b6 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-1202b3b6 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-1202b3b6 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-1202b3b6 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-1202b3b6 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-1202b3b6 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 40px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-1202b3b6{box-shadow: 0px 0px   #00000070 ;padding-top: 112px;padding-bottom: 112px;padding-left: 40px;padding-right: 40px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 40px;column-gap: 0px;overflow: visible;border-color: inherit;background-color: var(--ast-global-color-4);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-be48a6cb{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-be48a6cb .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-be48a6cb .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-be48a6cb .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-be48a6cb .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-be48a6cb .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-be48a6cb > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 72px;}.wp-block-uagb-container.uagb-block-be48a6cb{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 72px;overflow: visible;border-color: inherit;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-ec0d038e{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-block-ec0d038e .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-ec0d038e .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-ec0d038e .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-ec0d038e .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-ec0d038e .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-ec0d038e > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-ec0d038e{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-bad1c591 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-bad1c591 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-bad1c591 .uagb-ifb-icon svg{fill: #333;}.uagb-block-bad1c591.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-bad1c591 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-bad1c591 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-bad1c591.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-bad1c591.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-bad1c591 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-bad1c591 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-bad1c591 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-bad1c591 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-bad1c591.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-bad1c591.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-bad1c591.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-bad1c591.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-bad1c591 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-bad1c591.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-bad1c591.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 20px;}.uagb-block-bad1c591 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-bad1c591 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-bad1c591 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-bad1c591 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-bad1c591.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-bad1c591.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-bad1c591 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-bad1c591.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-bad1c591.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-bad1c591 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-bad1c591.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-bad1c591 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-bad1c591 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-bad1c591.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-675cd79a{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-block-675cd79a .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-675cd79a .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-675cd79a .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-675cd79a .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-675cd79a .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-675cd79a > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-675cd79a{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-fa01e997 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-fa01e997 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-fa01e997 .uagb-ifb-icon svg{fill: #333;}.uagb-block-fa01e997.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-fa01e997 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-fa01e997 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-fa01e997.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-fa01e997.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-fa01e997 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-fa01e997 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-fa01e997 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-fa01e997 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-fa01e997.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-fa01e997.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-fa01e997.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-fa01e997.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-fa01e997 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-fa01e997.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-fa01e997.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-fa01e997 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-fa01e997 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-fa01e997 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-fa01e997 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-fa01e997.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-fa01e997.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-fa01e997 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-fa01e997.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-fa01e997.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-fa01e997 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-fa01e997.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-fa01e997 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-fa01e997 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-fa01e997.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-2ca479bc{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-2ca479bc .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-2ca479bc .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-2ca479bc .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-2ca479bc .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-2ca479bc .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-2ca479bc > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 48px;}.wp-block-uagb-container.uagb-block-2ca479bc{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 48px;overflow: visible;border-color: inherit;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-9ff2590f{max-width: 33%;width: 100%;}.wp-block-uagb-container.uagb-block-9ff2590f .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-9ff2590f .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-9ff2590f .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-9ff2590f .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-9ff2590f .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-9ff2590f > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-9ff2590f{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-2d59b177 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-2d59b177 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-2d59b177 .uagb-ifb-icon svg{fill: #333;}.uagb-block-2d59b177.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-2d59b177 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-2d59b177 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-2d59b177.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-2d59b177.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-2d59b177 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-2d59b177 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-2d59b177 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-2d59b177 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-2d59b177.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-2d59b177.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-2d59b177.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-2d59b177.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-2d59b177 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{color: var(--ast-global-color-3);margin-bottom: 32px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-2d59b177.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-2d59b177.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-2d59b177 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-2d59b177 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-2d59b177 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-2d59b177 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-2d59b177.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-2d59b177.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-2d59b177 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-2d59b177.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-2d59b177 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-2d59b177.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-2d59b177 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-2d59b177 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-2d59b177.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-2d59b177 .uagb-ifb-title-prefix{font-weight: 500;font-size: 32px;line-height: 1.2em;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-3310da07{max-width: 33%;width: 100%;}.wp-block-uagb-container.uagb-block-3310da07 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-3310da07 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-3310da07 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-3310da07 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-3310da07 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-3310da07 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-3310da07{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-84acc2a6 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-84acc2a6 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-84acc2a6 .uagb-ifb-icon svg{fill: #333;}.uagb-block-84acc2a6.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-84acc2a6 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-84acc2a6 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-84acc2a6.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-84acc2a6.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-84acc2a6 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-84acc2a6 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-84acc2a6 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-84acc2a6 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-84acc2a6.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-84acc2a6.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-84acc2a6.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-84acc2a6.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-84acc2a6 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{color: var(--ast-global-color-3);margin-bottom: 32px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-84acc2a6.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-84acc2a6.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-84acc2a6 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-84acc2a6 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-84acc2a6 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-84acc2a6 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-84acc2a6.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-84acc2a6.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-84acc2a6 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-84acc2a6.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-84acc2a6 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-84acc2a6.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-84acc2a6 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-84acc2a6 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-84acc2a6.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-84acc2a6 .uagb-ifb-title-prefix{font-weight: 500;font-size: 32px;line-height: 1.2em;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-e3c4babb{max-width: 33%;width: 100%;}.wp-block-uagb-container.uagb-block-e3c4babb .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-e3c4babb .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-e3c4babb .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-e3c4babb .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-e3c4babb .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-e3c4babb > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-e3c4babb{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-e596e133 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-e596e133 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-e596e133 .uagb-ifb-icon svg{fill: #333;}.uagb-block-e596e133.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-e596e133 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-e596e133 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-e596e133.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-e596e133.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-e596e133 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-e596e133 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-e596e133 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-e596e133 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-e596e133.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-e596e133.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-e596e133.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-e596e133.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-e596e133 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{color: var(--ast-global-color-3);margin-bottom: 32px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-e596e133.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-e596e133.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-e596e133 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-e596e133 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-e596e133 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-e596e133 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-e596e133.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-e596e133.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-e596e133 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-e596e133.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-e596e133 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-e596e133.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-e596e133 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-e596e133 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-e596e133.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-e596e133 .uagb-ifb-title-prefix{font-weight: 500;font-size: 32px;line-height: 1.2em;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-573dc06d{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-573dc06d .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-573dc06d .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-573dc06d .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-573dc06d .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-573dc06d .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-573dc06d > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: flex-start;justify-content: center;flex-wrap: nowrap;row-gap: 72px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-573dc06d{box-shadow: 0px 0px   #00000070 ;padding-top: 112px;padding-bottom: 112px;padding-left: 40px;padding-right: 40px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 72px;column-gap: 0px;overflow: visible;border-color: inherit;background-color: var(--ast-global-color-5);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-13533f4b{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-13533f4b .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-13533f4b .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-13533f4b .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-13533f4b .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-13533f4b .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-13533f4b > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: flex-start;flex-wrap: nowrap;row-gap: 48px;column-gap: 48px;}.wp-block-uagb-container.uagb-block-13533f4b{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 48px;column-gap: 48px;overflow: visible;border-color: inherit;flex-direction: row;align-items: stretch;justify-content: flex-start;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-ac5bb9d7{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-block-ac5bb9d7 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-ac5bb9d7 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-ac5bb9d7 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-ac5bb9d7 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-ac5bb9d7 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-ac5bb9d7 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 20px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-ac5bb9d7{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 20px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-4ef0e025.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-4ef0e025 .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-4ef0e025.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-4ef0e025.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;text-align: center;}.uagb-block-4ef0e025.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-4ef0e025.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-4ef0e025.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-4ef0e025.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-4ef0e025.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-4ef0e025.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-4ef0e025.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-4ef0e025.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-4ef0e025.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 575px;height: 384px;}.uagb-block-4ef0e025.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-4ef0e025.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-4ef0e025.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-4ef0e025.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-79dddf46{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-79dddf46 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-79dddf46 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-79dddf46 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-79dddf46 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-79dddf46 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-79dddf46 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 12px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-79dddf46{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 12px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;}.uagb-block-062d9584 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-062d9584 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-062d9584 .uagb-ifb-icon svg{fill: #333;}.uagb-block-062d9584.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-062d9584 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-062d9584 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-062d9584.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-062d9584.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-062d9584 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-062d9584 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-062d9584 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-062d9584 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-062d9584.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-062d9584.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-062d9584.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-062d9584.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-062d9584 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-062d9584.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-062d9584.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-062d9584 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-062d9584 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-062d9584 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-062d9584 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-062d9584.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-062d9584.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-062d9584 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-062d9584.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-062d9584 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-062d9584.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-062d9584 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-062d9584 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-062d9584.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-a55c90da .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-a55c90da .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-a55c90da .uagb-ifb-icon svg{fill: #333;}.uagb-block-a55c90da.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-a55c90da .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-a55c90da .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-a55c90da.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-a55c90da.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-a55c90da .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-a55c90da .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-a55c90da .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-a55c90da .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-a55c90da.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-a55c90da.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-a55c90da.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-a55c90da.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-a55c90da .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-a55c90da.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-a55c90da.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-a55c90da .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-a55c90da .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-a55c90da .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-a55c90da .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-a55c90da.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-a55c90da.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-a55c90da .uagb-infobox__content-wrap{text-align: left;}.uagb-block-a55c90da.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-a55c90da .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-a55c90da.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-a55c90da .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-a55c90da .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-a55c90da.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-f0b36b2e{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-block-f0b36b2e .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-f0b36b2e .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-f0b36b2e .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-f0b36b2e .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-f0b36b2e .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-f0b36b2e > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 20px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-f0b36b2e{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 20px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-26690864.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-26690864 .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-26690864.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-26690864.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;text-align: center;}.uagb-block-26690864.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-26690864.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-26690864.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-26690864.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-26690864.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-26690864.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-26690864.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-26690864.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-26690864.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 575px;height: 384px;}.uagb-block-26690864.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-26690864.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-26690864.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-26690864.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-2d2b11d2{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-2d2b11d2 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-2d2b11d2 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-2d2b11d2 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-2d2b11d2 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-2d2b11d2 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-2d2b11d2 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 12px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-2d2b11d2{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 12px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;}.uagb-block-0aef4b77 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-0aef4b77 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-0aef4b77 .uagb-ifb-icon svg{fill: #333;}.uagb-block-0aef4b77.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-0aef4b77 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-0aef4b77 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-0aef4b77.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-0aef4b77.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-0aef4b77 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-0aef4b77 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-0aef4b77 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-0aef4b77 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-0aef4b77.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-0aef4b77.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-0aef4b77.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-0aef4b77.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-0aef4b77 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-0aef4b77.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-0aef4b77.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-0aef4b77 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-0aef4b77 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-0aef4b77 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-0aef4b77 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-0aef4b77.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-0aef4b77.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-0aef4b77 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-0aef4b77.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-0aef4b77 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-0aef4b77.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-0aef4b77 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-0aef4b77 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-0aef4b77.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-bb77719c .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-bb77719c .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-bb77719c .uagb-ifb-icon svg{fill: #333;}.uagb-block-bb77719c.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-bb77719c .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-bb77719c .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-bb77719c.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-bb77719c.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-bb77719c .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-bb77719c .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-bb77719c .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-bb77719c .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-bb77719c.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-bb77719c.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-bb77719c.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-bb77719c.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-bb77719c .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-bb77719c.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-bb77719c.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-bb77719c .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-bb77719c .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-bb77719c .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-bb77719c .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-bb77719c.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-bb77719c.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-bb77719c .uagb-infobox__content-wrap{text-align: left;}.uagb-block-bb77719c.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-bb77719c .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-bb77719c.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-bb77719c .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-bb77719c .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-bb77719c.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-ae2d60c2{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-ae2d60c2 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-ae2d60c2 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-ae2d60c2 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-ae2d60c2 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-ae2d60c2 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-ae2d60c2 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: flex-start;flex-wrap: nowrap;row-gap: 48px;column-gap: 48px;}.wp-block-uagb-container.uagb-block-ae2d60c2{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 48px;column-gap: 48px;overflow: visible;border-color: inherit;flex-direction: row;align-items: stretch;justify-content: flex-start;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-8bc79849{max-width: 31%;width: 100%;}.wp-block-uagb-container.uagb-block-8bc79849 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-8bc79849 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-8bc79849 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-8bc79849 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-8bc79849 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-8bc79849 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 20px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-8bc79849{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 20px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-7f610b7f.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-7f610b7f .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-7f610b7f.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-7f610b7f.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;text-align: center;}.uagb-block-7f610b7f.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-7f610b7f.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-7f610b7f.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-7f610b7f.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-7f610b7f.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-7f610b7f.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-7f610b7f.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-7f610b7f.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-7f610b7f.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 368px;height: 368px;}.uagb-block-7f610b7f.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-7f610b7f.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-7f610b7f.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-7f610b7f.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-54feaec6{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-54feaec6 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-54feaec6 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-54feaec6 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-54feaec6 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-54feaec6 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-54feaec6 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 12px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-54feaec6{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 12px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;}.uagb-block-45e1a757 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-45e1a757 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-45e1a757 .uagb-ifb-icon svg{fill: #333;}.uagb-block-45e1a757.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-45e1a757 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-45e1a757 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-45e1a757.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-45e1a757.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-45e1a757 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-45e1a757 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-45e1a757 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-45e1a757 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-45e1a757.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-45e1a757.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-45e1a757.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-45e1a757.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-45e1a757 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-45e1a757.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-45e1a757.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-45e1a757 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-45e1a757 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-45e1a757 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-45e1a757 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-45e1a757.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-45e1a757.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-45e1a757 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-45e1a757.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-45e1a757 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-45e1a757.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-45e1a757 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-45e1a757 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-45e1a757.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-300b4fa9 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-300b4fa9 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-300b4fa9 .uagb-ifb-icon svg{fill: #333;}.uagb-block-300b4fa9.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-300b4fa9 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-300b4fa9 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-300b4fa9.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-300b4fa9.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-300b4fa9 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-300b4fa9 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-300b4fa9 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-300b4fa9 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-300b4fa9.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-300b4fa9.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-300b4fa9.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-300b4fa9.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-300b4fa9 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-300b4fa9.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-300b4fa9.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-300b4fa9 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-300b4fa9 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-300b4fa9 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-300b4fa9 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-300b4fa9.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-300b4fa9.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-300b4fa9 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-300b4fa9.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-300b4fa9 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-300b4fa9.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-300b4fa9 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-300b4fa9 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-300b4fa9.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-2b49afdf{max-width: 31%;width: 100%;}.wp-block-uagb-container.uagb-block-2b49afdf .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-2b49afdf .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-2b49afdf .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-2b49afdf .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-2b49afdf .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-2b49afdf > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 20px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-2b49afdf{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 20px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-b9de53f3.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-b9de53f3 .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-b9de53f3.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-b9de53f3.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;text-align: center;}.uagb-block-b9de53f3.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-b9de53f3.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-b9de53f3.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-b9de53f3.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-b9de53f3.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-b9de53f3.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-b9de53f3.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-b9de53f3.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-b9de53f3.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 368px;height: 368px;}.uagb-block-b9de53f3.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-b9de53f3.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-b9de53f3.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-b9de53f3.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-93bd2b4e{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-93bd2b4e .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-93bd2b4e .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-93bd2b4e .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-93bd2b4e .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-93bd2b4e .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-93bd2b4e > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 12px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-93bd2b4e{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 12px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;}.uagb-block-3124bf25 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-3124bf25 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-3124bf25 .uagb-ifb-icon svg{fill: #333;}.uagb-block-3124bf25.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-3124bf25 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-3124bf25 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-3124bf25.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-3124bf25.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-3124bf25 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-3124bf25 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-3124bf25 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-3124bf25 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-3124bf25.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-3124bf25.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-3124bf25.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-3124bf25.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-3124bf25 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-3124bf25.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-3124bf25.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-3124bf25 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-3124bf25 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-3124bf25 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-3124bf25 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-3124bf25.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-3124bf25.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-3124bf25 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-3124bf25.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-3124bf25 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-3124bf25.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-3124bf25 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-3124bf25 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-3124bf25.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-558db471 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-558db471 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-558db471 .uagb-ifb-icon svg{fill: #333;}.uagb-block-558db471.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-558db471 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-558db471 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-558db471.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-558db471.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-558db471 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-558db471 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-558db471 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-558db471 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-558db471.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-558db471.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-558db471.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-558db471.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-558db471 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-558db471.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-558db471.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-558db471 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-558db471 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-558db471 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-558db471 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-558db471.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-558db471.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-558db471 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-558db471.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-558db471 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-558db471.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-558db471 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-558db471 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-558db471.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-a1eba3d5{max-width: 31%;width: 100%;}.wp-block-uagb-container.uagb-block-a1eba3d5 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-a1eba3d5 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-a1eba3d5 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-a1eba3d5 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-a1eba3d5 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-a1eba3d5 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 20px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-a1eba3d5{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 20px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-3214db08.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-3214db08 .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-3214db08.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-3214db08.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;text-align: center;}.uagb-block-3214db08.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-3214db08.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-3214db08.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-3214db08.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-3214db08.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-3214db08.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-3214db08.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-3214db08.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-3214db08.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 368px;height: 368px;}.uagb-block-3214db08.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-3214db08.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-3214db08.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-3214db08.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-1207eaf6{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-1207eaf6 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-1207eaf6 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-1207eaf6 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-1207eaf6 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-1207eaf6 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-1207eaf6 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 12px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-1207eaf6{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 12px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;}.uagb-block-29ee3c78 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-29ee3c78 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-29ee3c78 .uagb-ifb-icon svg{fill: #333;}.uagb-block-29ee3c78.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-29ee3c78 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-29ee3c78 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-29ee3c78.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-29ee3c78.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-29ee3c78 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-29ee3c78 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-29ee3c78 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-29ee3c78 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-29ee3c78.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-29ee3c78.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-29ee3c78.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-29ee3c78.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-29ee3c78 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-29ee3c78.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-29ee3c78.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-29ee3c78 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-29ee3c78 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-29ee3c78 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-29ee3c78 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-29ee3c78.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-29ee3c78.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-29ee3c78 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-29ee3c78.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-29ee3c78 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-29ee3c78.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-29ee3c78 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-29ee3c78 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-29ee3c78.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-84e7d4da .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-84e7d4da .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-84e7d4da .uagb-ifb-icon svg{fill: #333;}.uagb-block-84e7d4da.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-84e7d4da .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-84e7d4da .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-84e7d4da.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-84e7d4da.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-84e7d4da .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-84e7d4da .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-84e7d4da .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-84e7d4da .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-84e7d4da.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-84e7d4da.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-84e7d4da.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-84e7d4da.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-84e7d4da .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-84e7d4da.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-84e7d4da.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-84e7d4da .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-84e7d4da .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-84e7d4da .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-84e7d4da .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-84e7d4da.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-84e7d4da.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-84e7d4da .uagb-infobox__content-wrap{text-align: left;}.uagb-block-84e7d4da.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-84e7d4da .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-84e7d4da.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-84e7d4da .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-84e7d4da .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-84e7d4da.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-icon-list__wrap{display:flex;align-items:flex-start;justify-content:flex-start}.wp-block-uagb-icon-list-child{padding:0;transition:all 0.2s;display:inline-flex;color:#3a3a3a;align-items:center;text-decoration:none;box-shadow:none}.wp-block-uagb-icon-list-child span.uagb-icon-list__source-wrap{display:block;align-items:center}.uagb-icon-list__source-wrap svg{display:block}.uagb-icon-list__source-image{width:40px}.uagb-icon-list__outer-wrap .uagb-icon-list__content-wrap{color:#3a3a3a;display:flex;align-items:center}
.wp-block-uagb-icon-list-child{position:relative}.wp-block-uagb-icon-list-child>a{position:absolute;top:0;left:0;width:100%;height:100%}img.uagb-icon-list__source-image{max-width:unset}.wp-block-uagb-icon-list-child .uagb-icon-list__label{word-break:break-word}
.wp-block-uagb-container.uagb-is-root-container .uagb-block-3ac63830{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-3ac63830 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-3ac63830 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-3ac63830 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-3ac63830 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-3ac63830 .uagb-container__video-wrap video{opacity: 0.3;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-3ac63830 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 768px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: stretch;justify-content: center;flex-wrap: nowrap;row-gap: 40px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-3ac63830{box-shadow: 0px 0px   #00000070 ;padding-top: 112px;padding-bottom: 112px;padding-left: 40px;padding-right: 40px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 40px;column-gap: 0px;overflow: visible;border-color: inherit;background-repeat: no-repeat;background-position: 50% 50%;background-size: cover;background-attachment: scroll;background-image: url(https://websitedemos.net/wp-content/uploads/2023/10/natures-01.jpg);;background-clip: padding-box;}.wp-block-uagb-container.uagb-block-3ac63830::before{content: "";position: absolute;pointer-events: none;top: -0px;left: -0px;width: calc(100% + 0px + 0px);height: calc(100% + 0px + 0px);border-color: inherit;background: var(--ast-global-color-7);opacity: 0.7;}.uagb-block-ac68ea7b .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-ac68ea7b .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-ac68ea7b .uagb-ifb-icon svg{fill: #333;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-ac68ea7b .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-ac68ea7b .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-ac68ea7b .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-ac68ea7b .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-ac68ea7b .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-ac68ea7b .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-ac68ea7b .uagb-ifb-title-wrap .uagb-ifb-title-prefix{color: #ffffff;margin-bottom: 24px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-ac68ea7b.wp-block-uagb-info-box .uagb-ifb-title{color: #ffffff;margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-ac68ea7b.wp-block-uagb-info-box .uagb-ifb-desc{color: #ffffff;margin-bottom: 0%;margin-top: 0%;margin-left: 18%;margin-right: 18%;}.uagb-block-ac68ea7b .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-ac68ea7b .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-ac68ea7b .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-ac68ea7b .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-ac68ea7b .uagb-infobox__content-wrap{text-align: center;}.uagb-block-ac68ea7b.uagb-infobox-icon-above-title{text-align: center;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-ac68ea7b .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-ac68ea7b .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-ac68ea7b .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-icon-list.uagb-block-18525ae3 .uagb-icon-list__source-image{width: 24px;}.wp-block-uagb-icon-list.uagb-block-18525ae3 .wp-block-uagb-icon-list-child .uagb-icon-list__source-wrap svg{width: 24px;height: 24px;font-size: 24px;color: #ffffff;fill: #ffffff;}.wp-block-uagb-icon-list.uagb-block-18525ae3 .wp-block-uagb-icon-list-child .uagb-icon-list__source-wrap{padding: 0px;border-radius: 0px;border-width: 0px;align-self: center;}.wp-block-uagb-icon-list.uagb-block-18525ae3 .wp-block-uagb-icon-list-child .uagb-icon-list__label{font-size: 24px;text-decoration: !important;font-weight: 700;line-height: em;color: #ffffff;}.wp-block-uagb-icon-list.uagb-block-18525ae3 .uagb-icon-list__wrap{display: flex;flex-direction: column;justify-content: center;-webkit-box-pack: center;-ms-flex-pack: center;-webkit-box-align: center;-ms-flex-align: center;align-items: center;margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.wp-block-uagb-icon-list.uagb-block-18525ae3 .uagb-icon-list__label{text-align: center;}.wp-block-uagb-icon-list.uagb-block-18525ae3 .wp-block-uagb-icon-list-child{text-align: center;}.wp-block-uagb-icon-list.uagb-block-18525ae3.wp-block-uagb-icon-list .wp-block-uagb-icon-list-child{margin-left: 0;margin-right: 0;margin-bottom: 0px;}.wp-block-uagb-icon-list.uagb-block-18525ae3 .uagb-icon-list__source-wrap{margin-right: 16px;}.uagb-block-6a0bac75.wp-block-uagb-icon-list-child .uagb-icon-list__source-wrap{background:  !important;border-color:  !important;}.uagb-block-6a0bac75.wp-block-uagb-icon-list-child:hover .uagb-icon-list__source-wrap{background:  !important;border-color:  !important;}@media only screen and (max-width: 976px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-5657136f{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-5657136f > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-5657136f{padding-top: 80px;padding-bottom: 80px;padding-left: 32px;padding-right: 32px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;background-color: var(--ast-global-color-5);;}.uagb-block-48b77c69.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 32px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-48b77c69.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-48b77c69.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-48b77c69.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-48b77c69.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-48b77c69 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-48b77c69 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-48b77c69 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-48b77c69 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-48b77c69 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-48b77c69.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-48b77c69 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-48b77c69.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-48b77c69 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-48b77c69 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-48b77c69.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-cdd6ca86{width: 100%;}.wp-block-uagb-container.uagb-block-cdd6ca86{min-height: 300px;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;background-clip: padding-box;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-8c4383c7{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-8c4383c7 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;align-items: center;column-gap: 40px;}.wp-block-uagb-container.uagb-block-8c4383c7{padding-top: 80px;padding-bottom: 80px;padding-left: 32px;padding-right: 32px;margin-top:  !important;margin-bottom:  !important;column-gap: 40px;background-color: var(--ast-global-color-5);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-d4a03254{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-d4a03254 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 0px;column-gap: 40px;}.wp-block-uagb-container.uagb-block-d4a03254{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 0px;column-gap: 40px;}.uagb-block-7edef7ac.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-7edef7ac .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-7edef7ac .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-7edef7ac .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-c7857b8c{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-c7857b8c > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 0px;column-gap: 40px;}.wp-block-uagb-container.uagb-block-c7857b8c{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 0px;column-gap: 40px;}.uagb-block-955803d2.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 300px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-1202b3b6{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-1202b3b6 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 40px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-1202b3b6{padding-top: 80px;padding-bottom: 60px;padding-left: 32px;padding-right: 32px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 40px;column-gap: 0px;background-color: var(--ast-global-color-4);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-be48a6cb{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-be48a6cb > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;row-gap: 0px;column-gap: 40px;}.wp-block-uagb-container.uagb-block-be48a6cb{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 40px;align-items: stretch;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-ec0d038e{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-ec0d038e > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-ec0d038e{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;}.uagb-block-bad1c591.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-bad1c591.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-bad1c591.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-bad1c591 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-bad1c591 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-bad1c591 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-bad1c591 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-bad1c591 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-bad1c591 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-bad1c591.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-bad1c591 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-bad1c591 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-bad1c591.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-675cd79a{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-675cd79a > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-675cd79a{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;}.uagb-block-fa01e997.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-fa01e997.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-fa01e997.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-fa01e997 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-fa01e997 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-fa01e997 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-fa01e997 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-fa01e997 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-fa01e997 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-fa01e997.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-fa01e997 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-fa01e997 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-fa01e997.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-2ca479bc{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-2ca479bc > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;row-gap: 0px;column-gap: 24px;}.wp-block-uagb-container.uagb-block-2ca479bc{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 24px;align-items: stretch;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-9ff2590f{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-9ff2590f > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-9ff2590f{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;}.uagb-block-2d59b177 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 24px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-2d59b177.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-2d59b177.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-2d59b177.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-2d59b177.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-2d59b177.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-2d59b177 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-2d59b177 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-2d59b177 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-2d59b177 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-2d59b177 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-2d59b177.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-2d59b177 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-2d59b177.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-2d59b177 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-2d59b177 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-2d59b177.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-2d59b177 .uagb-ifb-title-prefix{font-size: 32px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-3310da07{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-3310da07 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-3310da07{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;}.uagb-block-84acc2a6 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 24px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-84acc2a6.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-84acc2a6.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-84acc2a6.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-84acc2a6.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-84acc2a6.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-84acc2a6 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-84acc2a6 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-84acc2a6 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-84acc2a6 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-84acc2a6 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-84acc2a6.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-84acc2a6 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-84acc2a6.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-84acc2a6 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-84acc2a6 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-84acc2a6.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-84acc2a6 .uagb-ifb-title-prefix{font-size: 32px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-e3c4babb{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-e3c4babb > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-e3c4babb{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;}.uagb-block-e596e133 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 24px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-e596e133.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-e596e133.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-e596e133.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-e596e133.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-e596e133.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-e596e133 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-e596e133 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-e596e133 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-e596e133 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-e596e133 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-e596e133.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-e596e133 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-e596e133.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-e596e133 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-e596e133 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-e596e133.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-e596e133 .uagb-ifb-title-prefix{font-size: 32px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-573dc06d{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-573dc06d > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-573dc06d{padding-top: 80px;padding-bottom: 80px;padding-left: 32px;padding-right: 32px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;background-color: var(--ast-global-color-5);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-13533f4b{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-13533f4b > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;row-gap: 40px;column-gap: 40px;}.wp-block-uagb-container.uagb-block-13533f4b{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 40px;column-gap: 40px;align-items: stretch;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-ac5bb9d7{max-width: 47%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-ac5bb9d7 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-ac5bb9d7{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;}.uagb-block-4ef0e025.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 576px;height: 350px;}.uagb-block-4ef0e025.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-79dddf46{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-79dddf46 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 12px;}.wp-block-uagb-container.uagb-block-79dddf46{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 12px;}.uagb-block-062d9584.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-062d9584.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-062d9584.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-062d9584.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-062d9584 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-062d9584 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-062d9584 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-062d9584 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-062d9584 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-062d9584 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-062d9584.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-062d9584 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-062d9584 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-062d9584.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-a55c90da.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-a55c90da.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-a55c90da.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-a55c90da .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-a55c90da .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-a55c90da .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-a55c90da .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-a55c90da .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-a55c90da .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-a55c90da.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-a55c90da .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-a55c90da .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-a55c90da.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-f0b36b2e{max-width: 47%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-f0b36b2e > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-f0b36b2e{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;}.uagb-block-26690864.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 576px;height: 350px;}.uagb-block-26690864.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-2d2b11d2{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-2d2b11d2 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 12px;}.wp-block-uagb-container.uagb-block-2d2b11d2{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 12px;}.uagb-block-0aef4b77.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-0aef4b77.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-0aef4b77.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-0aef4b77.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-0aef4b77 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-0aef4b77 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-0aef4b77 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-0aef4b77 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-0aef4b77 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-0aef4b77 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-0aef4b77.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-0aef4b77 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-0aef4b77 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-0aef4b77.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-bb77719c.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-bb77719c.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-bb77719c.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-bb77719c .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-bb77719c .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-bb77719c .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-bb77719c .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-bb77719c .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-bb77719c .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-bb77719c.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-bb77719c .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-bb77719c .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-bb77719c.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-ae2d60c2{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-ae2d60c2 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;row-gap: 24px;column-gap: 24px;}.wp-block-uagb-container.uagb-block-ae2d60c2{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 24px;align-items: stretch;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-8bc79849{max-width: 32%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-8bc79849 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-8bc79849{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;}.uagb-block-7f610b7f.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 368px;height: 224px;}.uagb-block-7f610b7f.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-54feaec6{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-54feaec6 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-54feaec6{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;}.uagb-block-45e1a757.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-45e1a757.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-45e1a757.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-45e1a757 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-45e1a757 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-45e1a757 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-45e1a757 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-45e1a757 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-45e1a757 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-45e1a757.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-45e1a757 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-45e1a757 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-45e1a757.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-300b4fa9.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-300b4fa9.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-300b4fa9.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-300b4fa9 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-300b4fa9 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-300b4fa9 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-300b4fa9 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-300b4fa9 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-300b4fa9 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-300b4fa9.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-300b4fa9 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-300b4fa9 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-300b4fa9.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-2b49afdf{max-width: 32%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-2b49afdf > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-2b49afdf{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;}.uagb-block-b9de53f3.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 368px;height: 224px;}.uagb-block-b9de53f3.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-93bd2b4e{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-93bd2b4e > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-93bd2b4e{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;}.uagb-block-3124bf25.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-3124bf25.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-3124bf25.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-3124bf25 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-3124bf25 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-3124bf25 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-3124bf25 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-3124bf25 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-3124bf25 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-3124bf25.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-3124bf25 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-3124bf25 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-3124bf25.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-558db471.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-558db471.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-558db471.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-558db471 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-558db471 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-558db471 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-558db471 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-558db471 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-558db471 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-558db471.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-558db471 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-558db471 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-558db471.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-a1eba3d5{max-width: 32%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-a1eba3d5 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-a1eba3d5{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;}.uagb-block-3214db08.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 368px;height: 224px;}.uagb-block-3214db08.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-1207eaf6{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-1207eaf6 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-1207eaf6{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;}.uagb-block-29ee3c78.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-29ee3c78.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-29ee3c78.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-29ee3c78 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-29ee3c78 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-29ee3c78 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-29ee3c78 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-29ee3c78 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-29ee3c78 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-29ee3c78.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-29ee3c78 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-29ee3c78 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-29ee3c78.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-84e7d4da.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-84e7d4da.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-84e7d4da.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-84e7d4da .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-84e7d4da .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-84e7d4da .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-84e7d4da .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-84e7d4da .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-84e7d4da .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-84e7d4da.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-84e7d4da .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-84e7d4da .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-84e7d4da.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-3ac63830{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-3ac63830 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 32px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-3ac63830{padding-top: 80px;padding-bottom: 80px;padding-left: 32px;padding-right: 32px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 32px;column-gap: 0px;background-clip: padding-box;}.wp-block-uagb-container.uagb-block-3ac63830::before{top: -0px;left: -0px;width: calc(100% + 0px + 0px);height: calc(100% + 0px + 0px);}.uagb-block-ac68ea7b .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-ac68ea7b.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-ac68ea7b.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0%;margin-top: 0%;margin-left: 16%;margin-right: 16%;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-ac68ea7b .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-ac68ea7b .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-ac68ea7b .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-ac68ea7b .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-ac68ea7b .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-ac68ea7b.uagb-infobox-icon-above-title{text-align: center;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-ac68ea7b .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-ac68ea7b .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-ac68ea7b .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-icon-list.uagb-block-18525ae3 .uagb-icon-list__source-image{width: 24px;}.wp-block-uagb-icon-list.uagb-block-18525ae3 .wp-block-uagb-icon-list-child .uagb-icon-list__source-wrap svg{width: 24px;height: 24px;font-size: 24px;}.wp-block-uagb-icon-list.uagb-block-18525ae3 .wp-block-uagb-icon-list-child .uagb-icon-list__source-wrap {padding: 0px;border-width: 0px;align-self: center;}.wp-block-uagb-icon-list.uagb-block-18525ae3 .uagb-icon-list__wrap{display: flex;flex-direction: column;justify-content: center;-webkit-box-pack: center;-ms-flex-pack: center;-webkit-box-align: center;-ms-flex-align: center;align-items: center;}.wp-block-uagb-icon-list.uagb-block-18525ae3.wp-block-uagb-icon-list .wp-block-uagb-icon-list-child{margin-left: 0;margin-right: 0;margin-bottom: 0px;}}@media only screen and (max-width: 767px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-5657136f{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-5657136f > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-5657136f{padding-top: 64px;padding-bottom: 64px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;background-color: var(--ast-global-color-5);;}.uagb-block-48b77c69.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 28px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-48b77c69.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-48b77c69.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-48b77c69.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-48b77c69 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-48b77c69 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-48b77c69.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-48b77c69 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-48b77c69 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-48b77c69 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-48b77c69.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-48b77c69 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-48b77c69.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-48b77c69 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-48b77c69 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-48b77c69.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-cdd6ca86{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-cdd6ca86{min-height: 250px;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;background-clip: padding-box;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-8c4383c7{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-8c4383c7 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: center;flex-wrap: wrap;row-gap: 36px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-8c4383c7{padding-top: 64px;padding-bottom: 64px;padding-left: 24px;padding-right: 24px;margin-top:  !important;margin-bottom:  !important;row-gap: 36px;column-gap: 0px;background-color: var(--ast-global-color-5);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-d4a03254{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-d4a03254 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 16px;}.wp-block-uagb-container.uagb-block-d4a03254{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 16px;flex-wrap: wrap;}.uagb-block-7edef7ac.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-7edef7ac .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-7edef7ac .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-7edef7ac .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-c7857b8c{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-c7857b8c > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 16px;}.wp-block-uagb-container.uagb-block-c7857b8c{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 16px;flex-wrap: wrap;}.uagb-block-955803d2.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 250px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-1202b3b6{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-1202b3b6 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 40px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-1202b3b6{padding-top: 64px;padding-bottom: 64px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 40px;column-gap: 0px;background-color: var(--ast-global-color-4);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-be48a6cb{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-be48a6cb > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;flex-wrap: wrap;row-gap: 12px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-be48a6cb{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 12px;column-gap: 0px;align-items: stretch;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-ec0d038e{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-ec0d038e > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-ec0d038e{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;flex-wrap: wrap;}.uagb-block-bad1c591.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-bad1c591.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-bad1c591 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-bad1c591 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-bad1c591.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-bad1c591 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-bad1c591 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-bad1c591 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-bad1c591 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-bad1c591.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-bad1c591 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-bad1c591 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-bad1c591.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-675cd79a{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-675cd79a > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-675cd79a{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;flex-wrap: wrap;}.uagb-block-fa01e997.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-fa01e997.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-fa01e997 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-fa01e997 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-fa01e997.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-fa01e997 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-fa01e997 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-fa01e997 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-fa01e997 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-fa01e997.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-fa01e997 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-fa01e997 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-fa01e997.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-2ca479bc{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-2ca479bc > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;flex-wrap: wrap;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-2ca479bc{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;align-items: stretch;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-9ff2590f{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-9ff2590f > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-9ff2590f{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;flex-wrap: wrap;}.uagb-block-2d59b177 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-2d59b177.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-2d59b177.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-2d59b177.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-2d59b177.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-2d59b177 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-2d59b177 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-2d59b177.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-2d59b177 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-2d59b177 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-2d59b177 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-2d59b177.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-2d59b177 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-2d59b177.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-2d59b177 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-2d59b177 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-2d59b177.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-2d59b177 .uagb-ifb-title-prefix{font-size: 28px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-3310da07{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-3310da07 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-3310da07{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;flex-wrap: wrap;}.uagb-block-84acc2a6 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-84acc2a6.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-84acc2a6.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-84acc2a6.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-84acc2a6.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-84acc2a6 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-84acc2a6 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-84acc2a6.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-84acc2a6 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-84acc2a6 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-84acc2a6 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-84acc2a6.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-84acc2a6 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-84acc2a6.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-84acc2a6 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-84acc2a6 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-84acc2a6.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-84acc2a6 .uagb-ifb-title-prefix{font-size: 28px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-e3c4babb{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-e3c4babb > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-e3c4babb{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;flex-wrap: wrap;}.uagb-block-e596e133 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-e596e133.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-e596e133.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-e596e133.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-e596e133.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-e596e133 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-e596e133 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-e596e133.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-e596e133 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-e596e133 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-e596e133 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-e596e133.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-e596e133 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-e596e133.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-e596e133 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-e596e133 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-e596e133.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-e596e133 .uagb-ifb-title-prefix{font-size: 28px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-573dc06d{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-573dc06d > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 48px;}.wp-block-uagb-container.uagb-block-573dc06d{padding-top: 64px;padding-bottom: 64px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 48px;background-color: var(--ast-global-color-5);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-13533f4b{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-13533f4b > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;flex-wrap: wrap;row-gap: 48px;}.wp-block-uagb-container.uagb-block-13533f4b{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 48px;align-items: stretch;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-ac5bb9d7{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-ac5bb9d7 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-ac5bb9d7{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;flex-wrap: wrap;}.uagb-block-4ef0e025.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 300px;}.uagb-block-4ef0e025.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-79dddf46{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-79dddf46 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 8px;}.wp-block-uagb-container.uagb-block-79dddf46{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 8px;flex-wrap: wrap;}.uagb-block-062d9584.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 8px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-062d9584.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-062d9584.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-062d9584 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-062d9584 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-062d9584.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-062d9584 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-062d9584 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-062d9584 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-062d9584 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-062d9584.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-062d9584 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-062d9584 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-062d9584.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-a55c90da.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-a55c90da.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-a55c90da.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-a55c90da .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-a55c90da .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-a55c90da.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-a55c90da .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-a55c90da .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-a55c90da .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-a55c90da .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-a55c90da.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-a55c90da .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-a55c90da .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-a55c90da.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-f0b36b2e{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-f0b36b2e > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-f0b36b2e{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;flex-wrap: wrap;}.uagb-block-26690864.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 300px;}.uagb-block-26690864.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-2d2b11d2{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-2d2b11d2 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 8px;}.wp-block-uagb-container.uagb-block-2d2b11d2{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 8px;flex-wrap: wrap;}.uagb-block-0aef4b77.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 8px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-0aef4b77.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-0aef4b77.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-0aef4b77.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-0aef4b77 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-0aef4b77 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-0aef4b77.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-0aef4b77 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-0aef4b77 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-0aef4b77 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-0aef4b77 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-0aef4b77.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-0aef4b77 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-0aef4b77 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-0aef4b77.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-bb77719c.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-bb77719c.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-bb77719c.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-bb77719c .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-bb77719c .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-bb77719c.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-bb77719c .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-bb77719c .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-bb77719c .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-bb77719c .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-bb77719c.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-bb77719c .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-bb77719c .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-bb77719c.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-ae2d60c2{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-ae2d60c2 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;flex-wrap: wrap;row-gap: 48px;}.wp-block-uagb-container.uagb-block-ae2d60c2{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 48px;align-items: stretch;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-8bc79849{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-8bc79849 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-8bc79849{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;flex-wrap: wrap;}.uagb-block-7f610b7f.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 300px;}.uagb-block-7f610b7f.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-54feaec6{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-54feaec6 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 8px;}.wp-block-uagb-container.uagb-block-54feaec6{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 8px;flex-wrap: wrap;}.uagb-block-45e1a757.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 8px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-45e1a757.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-45e1a757.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-45e1a757.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-45e1a757 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-45e1a757 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-45e1a757.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-45e1a757 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-45e1a757 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-45e1a757 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-45e1a757 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-45e1a757.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-45e1a757 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-45e1a757 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-45e1a757.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-300b4fa9.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-300b4fa9.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-300b4fa9.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-300b4fa9 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-300b4fa9 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-300b4fa9.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-300b4fa9 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-300b4fa9 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-300b4fa9 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-300b4fa9 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-300b4fa9.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-300b4fa9 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-300b4fa9 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-300b4fa9.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-2b49afdf{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-2b49afdf > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-2b49afdf{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;flex-wrap: wrap;}.uagb-block-b9de53f3.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 300px;}.uagb-block-b9de53f3.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-93bd2b4e{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-93bd2b4e > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 8px;}.wp-block-uagb-container.uagb-block-93bd2b4e{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 8px;flex-wrap: wrap;}.uagb-block-3124bf25.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 8px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-3124bf25.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-3124bf25.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-3124bf25.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-3124bf25 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-3124bf25 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-3124bf25.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-3124bf25 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-3124bf25 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-3124bf25 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-3124bf25 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-3124bf25.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-3124bf25 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-3124bf25 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-3124bf25.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-558db471.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-558db471.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-558db471.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-558db471 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-558db471 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-558db471.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-558db471 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-558db471 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-558db471 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-558db471 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-558db471.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-558db471 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-558db471 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-558db471.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-a1eba3d5{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-a1eba3d5 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-a1eba3d5{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;flex-wrap: wrap;}.uagb-block-3214db08.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 300px;}.uagb-block-3214db08.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-1207eaf6{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-1207eaf6 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 8px;}.wp-block-uagb-container.uagb-block-1207eaf6{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 8px;flex-wrap: wrap;}.uagb-block-29ee3c78.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 8px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-29ee3c78.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-29ee3c78.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-29ee3c78.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-29ee3c78 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-29ee3c78 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-29ee3c78.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-29ee3c78 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-29ee3c78 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-29ee3c78 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-29ee3c78 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-29ee3c78.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-29ee3c78 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-29ee3c78 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-29ee3c78.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-84e7d4da.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-84e7d4da.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-84e7d4da.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-84e7d4da .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-84e7d4da .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-84e7d4da.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-84e7d4da .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-84e7d4da .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-84e7d4da .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-84e7d4da .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-84e7d4da.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-84e7d4da .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-84e7d4da .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-84e7d4da.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-3ac63830{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-3ac63830 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 32px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-3ac63830{padding-top: 64px;padding-bottom: 64px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 32px;column-gap: 0px;background-clip: padding-box;}.wp-block-uagb-container.uagb-block-3ac63830::before{top: -0px;left: -0px;width: calc(100% + 0px + 0px);height: calc(100% + 0px + 0px);}.uagb-block-ac68ea7b .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-ac68ea7b.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-ac68ea7b.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-ac68ea7b .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-ac68ea7b .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-ac68ea7b .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-ac68ea7b .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-ac68ea7b .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-ac68ea7b .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-ac68ea7b .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-ac68ea7b .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-ac68ea7b.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-icon-list.uagb-block-18525ae3 .uagb-icon-list__source-image{width: 20px;}.wp-block-uagb-icon-list.uagb-block-18525ae3 .wp-block-uagb-icon-list-child .uagb-icon-list__source-wrap svg{width: 20px;height: 20px;font-size: 20px;}.wp-block-uagb-icon-list.uagb-block-18525ae3 .wp-block-uagb-icon-list-child .uagb-icon-list__source-wrap{padding: 0px;border-width: 0px;align-self: center;}.wp-block-uagb-icon-list.uagb-block-18525ae3 .wp-block-uagb-icon-list-child .uagb-icon-list__label{font-size: 20px;}.wp-block-uagb-icon-list.uagb-block-18525ae3 .uagb-icon-list__wrap{display: flex;flex-direction: column;justify-content: center;-webkit-box-pack: center;-ms-flex-pack: center;-webkit-box-align: center;-ms-flex-align: center;align-items: center;}.wp-block-uagb-icon-list.uagb-block-18525ae3.wp-block-uagb-icon-list .wp-block-uagb-icon-list-child{margin-left: 0;margin-right: 0;margin-bottom: 0px;}}";s:7:"content";s:13620:"
<div class="wp-block-uagb-container uagb-block-5657136f alignfull uagb-is-root-container"><div class="uagb-container-inner-blocks-wrap">
<div class="wp-block-uagb-info-box uagb-block-48b77c69 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h1 class="uagb-ifb-title">Our Inspiring Journey</h1></div><p class="uagb-ifb-desc">Discover our story and commitment to excellence in just a few lines.</p></div></div>
</div></div>



<div class="wp-block-uagb-container uagb-block-cdd6ca86 alignfull uagb-is-root-container"></div>



<div class="wp-block-uagb-container uagb-block-8c4383c7 alignfull uagb-is-root-container"><div class="uagb-container-inner-blocks-wrap">
<div class="wp-block-uagb-container uagb-block-d4a03254">
<div class="wp-block-uagb-info-box uagb-block-7edef7ac uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h3 class="uagb-ifb-title">Our Story</h3></div><p class="uagb-ifb-desc">Our story began with a vision to revolutionize the creative landscape. Over the years, we have honed our craft and built a legacy of excellence. We are committed to pushing boundaries, setting new standards, and inspiring others to join us on this incredible journey.</p></div></div>
</div>



<div class="wp-block-uagb-container uagb-block-c7857b8c">
<div class="wp-block-uagb-image alignleft uagb-block-955803d2 wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-left"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/10/natures-02.jpg ,https://websitedemos.net/wp-content/uploads/2023/10/natures-02.jpg 780w" sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/10/natures-02.jpg" alt="" class="uag-image-80574" width="600" height="450" title="" loading="lazy"/></figure></div>
</div>
</div></div>



<div class="wp-block-uagb-container uagb-block-1202b3b6 alignfull uagb-is-root-container"><div class="uagb-container-inner-blocks-wrap">
<div class="wp-block-uagb-container uagb-block-be48a6cb">
<div class="wp-block-uagb-container uagb-block-ec0d038e">
<div class="wp-block-uagb-info-box uagb-block-bad1c591 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h2 class="uagb-ifb-title">Why Choose Us</h2></div></div></div>
</div>



<div class="wp-block-uagb-container uagb-block-675cd79a">
<div class="wp-block-uagb-info-box uagb-block-fa01e997 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"></div><p class="uagb-ifb-desc">Discover the reasons that set us apart.</p></div></div>
</div>
</div>



<div class="wp-block-uagb-container uagb-block-2ca479bc">
<div class="wp-block-uagb-container uagb-block-9ff2590f">
<div class="wp-block-uagb-info-box uagb-block-2d59b177 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><p class="uagb-ifb-title-prefix">01</p><h5 class="uagb-ifb-title">Innovation</h5></div><p class="uagb-ifb-desc">We continuously push the boundaries of creativity to deliver innovative solutions.</p></div></div>
</div>



<div class="wp-block-uagb-container uagb-block-3310da07">
<div class="wp-block-uagb-info-box uagb-block-84acc2a6 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><p class="uagb-ifb-title-prefix">02</p><h5 class="uagb-ifb-title">Expertise</h5></div><p class="uagb-ifb-desc">Our team of seasoned professionals brings unmatched expertise to every project.</p></div></div>
</div>



<div class="wp-block-uagb-container uagb-block-e3c4babb">
<div class="wp-block-uagb-info-box uagb-block-e596e133 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><p class="uagb-ifb-title-prefix">03</p><h5 class="uagb-ifb-title">Collaboration</h5></div><p class="uagb-ifb-desc">We thrive on partnerships and teamwork, fostering collaborative efforts that result in groundbreaking solutions.</p></div></div>
</div>
</div>
</div></div>



<div class="wp-block-uagb-container uagb-block-573dc06d alignfull uagb-is-root-container"><div class="uagb-container-inner-blocks-wrap">
<div class="wp-block-uagb-container uagb-block-13533f4b">
<div class="wp-block-uagb-container uagb-block-ac5bb9d7">
<div class="wp-block-uagb-image alignleft uagb-block-4ef0e025 wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-left"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/09/team-skip-20.jpg ,https://websitedemos.net/wp-content/uploads/2023/09/team-skip-20.jpg 780w, https://websitedemos.net/wp-content/uploads/2023/09/team-skip-20.jpg 360w" sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/09/team-skip-20.jpg" alt="" class="uag-image-77990" width="575" height="384" title="" loading="lazy"/></figure></div>



<div class="wp-block-uagb-container uagb-block-79dddf46">
<div class="wp-block-uagb-info-box uagb-block-062d9584 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h5 class="uagb-ifb-title">Jane Cooper</h5></div><p class="uagb-ifb-desc">CEO</p></div></div>



<div class="wp-block-uagb-info-box uagb-block-a55c90da uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"></div><p class="uagb-ifb-desc">Share some details here. This is a flexible section where you can share anything you want. It could be details or some information.</p></div></div>
</div>
</div>



<div class="wp-block-uagb-container uagb-block-f0b36b2e">
<div class="wp-block-uagb-image alignleft uagb-block-26690864 wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-left"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/09/team-skip-28.jpg ,https://websitedemos.net/wp-content/uploads/2023/09/team-skip-28.jpg 780w, https://websitedemos.net/wp-content/uploads/2023/09/team-skip-28.jpg 360w" sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/09/team-skip-28.jpg" alt="" class="uag-image-78366" width="575" height="384" title="" loading="lazy"/></figure></div>



<div class="wp-block-uagb-container uagb-block-2d2b11d2">
<div class="wp-block-uagb-info-box uagb-block-0aef4b77 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h5 class="uagb-ifb-title">Wade Warren</h5></div><p class="uagb-ifb-desc">Co-Founder</p></div></div>



<div class="wp-block-uagb-info-box uagb-block-bb77719c uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"></div><p class="uagb-ifb-desc">Share some details here. This is a flexible section where you can share anything you want. It could be details or some information.</p></div></div>
</div>
</div>
</div>



<div class="wp-block-uagb-container uagb-block-ae2d60c2">
<div class="wp-block-uagb-container uagb-block-8bc79849">
<div class="wp-block-uagb-image alignleft uagb-block-7f610b7f wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-left"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/09/team-skip-06.jpg ,https://websitedemos.net/wp-content/uploads/2023/09/team-skip-13.jpg 780w, https://websitedemos.net/wp-content/uploads/2023/09/team-skip-13.jpg 360w" sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/09/team-skip-06.jpg" alt="" class="uag-image-77947" width="368" height="368" title="" loading="lazy"/></figure></div>



<div class="wp-block-uagb-container uagb-block-54feaec6">
<div class="wp-block-uagb-info-box uagb-block-45e1a757 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h5 class="uagb-ifb-title">Esther Howard</h5></div><p class="uagb-ifb-desc">Director</p></div></div>



<div class="wp-block-uagb-info-box uagb-block-300b4fa9 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"></div><p class="uagb-ifb-desc">Share some details here. This is a flexible section where you can share anything you want. It could be details or some information.</p></div></div>
</div>
</div>



<div class="wp-block-uagb-container uagb-block-2b49afdf">
<div class="wp-block-uagb-image alignleft uagb-block-b9de53f3 wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-left"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/09/team-skip-27.jpg ,https://websitedemos.net/wp-content/uploads/2023/09/team-skip-27.jpg 780w, https://websitedemos.net/wp-content/uploads/2023/09/team-skip-27.jpg 360w" sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/09/team-skip-27.jpg" alt="" class="uag-image-78358" width="368" height="368" title="" loading="lazy"/></figure></div>



<div class="wp-block-uagb-container uagb-block-93bd2b4e">
<div class="wp-block-uagb-info-box uagb-block-3124bf25 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h5 class="uagb-ifb-title">Cameron Williamson</h5></div><p class="uagb-ifb-desc">Manager</p></div></div>



<div class="wp-block-uagb-info-box uagb-block-558db471 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"></div><p class="uagb-ifb-desc">Share some details here. This is a flexible section where you can share anything you want. It could be details or some information.</p></div></div>
</div>
</div>



<div class="wp-block-uagb-container uagb-block-a1eba3d5">
<div class="wp-block-uagb-image alignleft uagb-block-3214db08 wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-left"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/09/team-skip-15.jpg ,https://websitedemos.net/wp-content/uploads/2023/09/team-skip-15.jpg 780w, https://websitedemos.net/wp-content/uploads/2023/09/team-skip-15.jpg 360w" sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/09/team-skip-15.jpg" alt="" class="uag-image-77971" width="368" height="368" title="" loading="lazy"/></figure></div>



<div class="wp-block-uagb-container uagb-block-1207eaf6">
<div class="wp-block-uagb-info-box uagb-block-29ee3c78 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h5 class="uagb-ifb-title">Brooklyn Simmons</h5></div><p class="uagb-ifb-desc">Marketing</p></div></div>



<div class="wp-block-uagb-info-box uagb-block-84e7d4da uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"></div><p class="uagb-ifb-desc">Share some details here. This is a flexible section where you can share anything you want. It could be details or some information.</p></div></div>
</div>
</div>
</div>
</div></div>



<div class="wp-block-uagb-container uagb-block-3ac63830 alignfull uagb-is-root-container"><div class="uagb-container-inner-blocks-wrap">
<div class="wp-block-uagb-info-box uagb-block-ac68ea7b uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h6 class="uagb-ifb-title-prefix">Stay Connected with Us</h6><h2 class="uagb-ifb-title">Let's Create Together</h2></div><p class="uagb-ifb-desc">Connect with us to explore how we can make your vision a reality. Join us in shaping the future.</p></div></div>



<div class="wp-block-uagb-icon-list uagb-block-18525ae3"><div class="uagb-icon-list__wrap">
<div class="wp-block-uagb-icon-list-child uagb-block-6a0bac75"><a target="_self" aria-label="202-555-0188" rel="noopener noreferrer" href="#"> </a><span class="uagb-icon-list__source-wrap"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 512 512"><path d="M511.2 387l-23.25 100.8c-3.266 14.25-15.79 24.22-30.46 24.22C205.2 512 0 306.8 0 54.5c0-14.66 9.969-27.2 24.22-30.45l100.8-23.25C139.7-2.602 154.7 5.018 160.8 18.92l46.52 108.5c5.438 12.78 1.77 27.67-8.98 36.45L144.5 207.1c33.98 69.22 90.26 125.5 159.5 159.5l44.08-53.8c8.688-10.78 23.69-14.51 36.47-8.975l108.5 46.51C506.1 357.2 514.6 372.4 511.2 387z"></path></svg></span><span class="uagb-icon-list__label">202-555-0188</span></div>
</div></div>
</div></div>
";}s:8:"id-82462";a:10:{s:5:"title";s:13:"About Page 04";s:3:"url";s:52:"https://websitedemos.net/astra-blocks/about-page-04/";s:3:"tag";a:0:{}s:8:"category";i:3392;s:16:"primary-category";s:0:"";s:4:"type";s:4:"page";s:12:"page-builder";s:9:"gutenberg";s:16:"required-plugins";a:0:{}s:10:"stylesheet";s:219636:".wp-block-uagb-container{display:flex;position:relative;box-sizing:border-box;transition-property:box-shadow;transition-duration:0.2s;transition-timing-function:ease}.wp-block-uagb-container .spectra-container-link-overlay{bottom:0;left:0;position:absolute;right:0;top:0;z-index:10}.wp-block-uagb-container.uagb-is-root-container{margin-left:auto;margin-right:auto}.wp-block-uagb-container.alignfull.uagb-is-root-container .uagb-container-inner-blocks-wrap{display:flex;position:relative;box-sizing:border-box;margin-left:auto !important;margin-right:auto !important}.wp-block-uagb-container .uagb-container__video-wrap{height:100%;width:100%;top:0;left:0;position:absolute;overflow:hidden;-webkit-transition:opacity 1s;-o-transition:opacity 1s;transition:opacity 1s}.wp-block-uagb-container .uagb-container__video-wrap video{max-width:100%;width:100%;height:100%;margin:0;line-height:1;border:none;display:inline-block;vertical-align:baseline;-o-object-fit:cover;object-fit:cover;background-size:cover}.st-block-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap>*:not(.wp-block-uagb-container):not(.wp-block-uagb-column):not(.wp-block-uagb-container):not(.wp-block-uagb-section):not(.uagb-container__shape):not(.uagb-container__video-wrap):not(.wp-block-spectra-pro-register):not(.wp-block-spectra-pro-login):not(.uagb-slider-container):not(.spectra-image-gallery__control-lightbox),.st-block-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap,.st-block-container .wp-block-uagb-container>*:not(.wp-block-uagb-container):not(.wp-block-uagb-column):not(.wp-block-uagb-container):not(.wp-block-uagb-section):not(.uagb-container__shape):not(.uagb-container__video-wrap):not(.wp-block-uagb-image):not(.wp-block-spectra-pro-register):not(.wp-block-spectra-pro-login):not(.uagb-slider-container):not(.spectra-container-link-overlay):not(.spectra-image-gallery__control-lightbox):not(.wp-block-uagb-lottie):not(.uagb-faq__outer-wrap){min-width:unset !important;width:100%;position:relative}.st-block-container .ast-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap>.wp-block-uagb-container>ul,.st-block-container .ast-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap>.wp-block-uagb-container ol,.st-block-container .ast-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap>ul,.st-block-container .ast-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap ol{max-width:-webkit-fill-available;margin-block-start:0;margin-block-end:0;margin-left:20px}.ast-plain-container .editor-styles-wrapper .block-editor-block-list__layout.is-root-container .uagb-is-root-container.wp-block-uagb-container.alignwide{margin-left:auto;margin-right:auto}.uagb-container__shape{overflow:hidden;position:absolute;left:0;width:100%;line-height:0;direction:ltr}.uagb-container__shape-top{top:-3px}.uagb-container__shape-bottom{bottom:-3px}.uagb-container__shape.uagb-container__invert.uagb-container__shape-bottom,.uagb-container__shape.uagb-container__invert.uagb-container__shape-top{-webkit-transform:rotate(180deg);-ms-transform:rotate(180deg);transform:rotate(180deg)}.uagb-container__shape.uagb-container__shape-flip svg{transform:translateX(-50%) rotateY(180deg)}.uagb-container__shape svg{display:block;width:-webkit-calc(100% + 1.3px);width:calc(100% + 1.3px);position:relative;left:50%;-webkit-transform:translateX(-50%);-ms-transform:translateX(-50%);transform:translateX(-50%)}.uagb-container__shape .uagb-container__shape-fill{-webkit-transform-origin:center;-ms-transform-origin:center;transform-origin:center;-webkit-transform:rotateY(0deg);transform:rotateY(0deg)}.uagb-container__shape.uagb-container__shape-above-content{z-index:9;pointer-events:none}.nv-single-page-wrap .nv-content-wrap.entry-content .wp-block-uagb-container.alignfull{margin-left:calc(50% - 50vw);margin-right:calc(50% - 50vw)}@media only screen and (max-width: 767px){.wp-block-uagb-container .wp-block-uagb-advanced-heading{width:-webkit-fill-available !important}}
.uagb-ifb-content>svg *{-webkit-transition:all 0.2s;-o-transition:all 0.2s;transition:all 0.2s}.uagb-ifb-content>svg,.uagb-ifb-content{display:inline-block}.uagb-ifb-content>svg{vertical-align:middle;width:inherit;height:inherit;font-style:initial}.uagb-ifb-content .uagb-ifb-icon-wrap svg{box-sizing:content-box;width:inherit;height:inherit}.uagb-ifb-button-wrapper:empty{display:none}div.uagb-ifb-button-wrapper a.uagb-infobox-cta-link,div.uagb-ifb-cta a.uagb-infobox-cta-link,.entry .entry-content a.uagb-infobox-cta-link,a.uagb-infobox-link-wrap,.entry .entry-content a.uagb-infobox-link-wrap{text-decoration:none;align-items:center}.uagb-infobox-icon-left-title.uagb-infobox-image-valign-middle .uagb-ifb-title-wrap,.uagb-infobox-icon-right-title.uagb-infobox-image-valign-middle .uagb-ifb-title-wrap,.uagb-infobox-image-valign-middle .uagb-ifb-icon-wrap,.uagb-infobox-image-valign-middle .uagb-ifb-image-content,.uagb-infobox-icon-left.uagb-infobox-image-valign-middle .uagb-ifb-content,.uagb-infobox-icon-right.uagb-infobox-image-valign-middle .uagb-ifb-content{-ms-flex-item-align:center;-webkit-align-self:center;align-self:center}.uagb-infobox-icon-left-title.uagb-infobox-image-valign-top .uagb-ifb-title-wrap,.uagb-infobox-icon-right-title.uagb-infobox-image-valign-top .uagb-ifb-title-wrap,.uagb-infobox-image-valign-top .uagb-ifb-icon-wrap,.uagb-infobox-image-valign-top .uagb-ifb-image-content,.uagb-infobox-icon-left.uagb-infobox-image-valign-top .uagb-ifb-content,.uagb-infobox-icon-right.uagb-infobox-image-valign-top .uagb-ifb-content{-webkit-align-self:self-start;align-self:self-start}.uagb-infobox-left{justify-content:flex-start;text-align:left;-webkit-box-pack:start;-ms-flex-pack:start;-webkit-justify-content:flex-start;-moz-box-pack:start}.uagb-infobox-center{justify-content:center;text-align:center;-webkit-box-pack:center;-ms-flex-pack:center;-webkit-justify-content:center;-moz-box-pack:center}.uagb-infobox-right{justify-content:flex-end;text-align:right;-webkit-box-pack:end;-ms-flex-pack:end;-webkit-justify-content:flex-end;-moz-box-pack:end}.uagb-infobox-icon-above-title.uagb-infobox__content-wrap,.uagb-infobox-icon-below-title.uagb-infobox__content-wrap{display:block;width:100%}.uagb-infobox-icon-left-title .uagb-ifb-content>svg,.uagb-infobox-icon-left .uagb-ifb-content>svg{margin-right:10px}.uagb-infobox-icon-right-title .uagb-ifb-content>svg,.uagb-infobox-icon-right .uagb-ifb-content>svg{margin-left:10px}.uagb-infobox-icon-left.uagb-infobox__content-wrap,.uagb-infobox-icon-right.uagb-infobox__content-wrap,.uagb-infobox-icon-left-title .uagb-ifb-left-title-image,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image{display:-webkit-box;display:-ms-flexbox;display:-webkit-flex;display:-moz-box;display:flex;-js-display:flex}.uagb-infobox-icon-left-title .uagb-ifb-left-title-image .uagb-ifb-image-content,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image .uagb-ifb-image-content,.uagb-infobox-icon-left .uagb-ifb-image-content,.uagb-infobox-icon-right .uagb-ifb-image-content{flex-shrink:0;line-height:0}.uagb-infobox-icon-left-title .uagb-ifb-left-title-image .uagb-ifb-title-wrap,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image .uagb-ifb-title-wrap,.uagb-infobox-icon-left .uagb-ifb-content,.uagb-infobox-icon-right .uagb-ifb-content{flex-grow:1}.uagb-infobox-icon-right.uagb-infobox__content-wrap,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image{-webkit-box-pack:end;-ms-flex-pack:end;-webkit-justify-content:flex-end;-moz-box-pack:end;justify-content:flex-end}.uagb-ifb-content img{position:relative;display:inline-block;line-height:0;width:auto;height:auto !important;max-width:100%;border-radius:inherit;-webkit-box-sizing:content-box;-moz-box-sizing:content-box;-webkit-border-radius:inherit}.uagb-infobox-module-link{position:absolute;top:0;right:0;bottom:0;left:0;z-index:4;width:100%;height:100%}.uagb-edit-mode .uagb-infobox-module-link{z-index:2}.uagb-infobox-link-icon-after{margin-right:0;margin-left:5px}.uagb-infobox-link-icon-before{margin-right:5px;margin-left:0}.uagb-infobox-link-icon{-webkit-transition:all 200ms linear;transition:all 200ms linear}.uagb-infobox__content-wrap{box-sizing:border-box;position:relative;width:100%;word-break:break-word;z-index:1}.uagb-ifb-separator{display:inline-block;margin:0;border-top-color:#333;border-top-style:solid;border-top-width:2px;line-height:0}.uagb-ifb-button-wrapper{line-height:1}.uagb-ifb-button-wrapper.uagb-ifb-button-type-text .uagb-infobox-cta-link.wp-block-button__link{background-color:unset;border:none}.uagb-ifb-button-wrapper.uagb-ifb-button-type-text .uagb-infobox-cta-link.wp-block-button__link:hover{background-color:unset;border-color:unset}.uagb-ifb-button-wrapper .uagb-infobox-cta-link{cursor:pointer}.uagb-ifb-button-wrapper .wp-block-button__link svg{fill:currentColor}.uagb-infobox__content-wrap a{-webkit-box-shadow:none;box-shadow:none;text-decoration:none}.uagb-ifb-title-wrap{width:100%}.uagb-ifb-title{margin-block-start:0}.uagb-ifb-title-wrap .uagb-ifb-title-prefix{display:block;padding:0;margin:0}.uagb-infobox__content-wrap.uagb-infobox__content-wrap{position:relative}.uagb-ifb-content{width:100%}.uagb-infobox__content-wrap.uagb-infobox,.uagb-ifb-content,.uagb-ifb-title-wrap,.uagb-ifb-title-prefix *,svg.dashicon.dashicons-upload{z-index:1}a.uagb-infobox-link-wrap{color:inherit}.uagb-ifb-content p:empty{display:none}.uagb-infobox__content-wrap .uagb-ifb-content img{display:inline-block;max-width:100%}.uagb-infobox__content-wrap .uagb-ifb-content svg{display:inline-block}.uagb-infobox__content-wrap .uagb-ifb-icon-wrap,.uagb-infobox-icon-left .uagb-ifb-image-content,.uagb-infobox-icon-right .uagb-ifb-image-content{box-sizing:content-box}.uagb-infobox-cta-link>svg{vertical-align:middle;width:15px;height:15px;font-size:15px}.uagb-infobox-cta-link{display:inline-flex}.block-editor-page #wpwrap .uagb-infobox-cta-link svg,.uagb-infobox-cta-link svg{font-style:normal}.uagb-infobox-icon-left-title .uagb-ifb-icon-wrap,.uagb-infobox-icon-left .uagb-ifb-icon-wrap{margin-right:10px;line-height:0}.uagb-infobox-icon-right-title .uagb-ifb-icon-wrap,.uagb-infobox-icon-right .uagb-ifb-icon-wrap{margin-left:10px;line-height:0}.uagb-infobox-icon-left .uagb-ifb-left-right-wrap,.uagb-infobox-icon-right .uagb-ifb-left-right-wrap,.uagb-infobox-icon-left-title .uagb-ifb-left-title-image,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image{display:-webkit-box;display:-ms-flexbox;display:flex}.uagb-infobox-icon-right .uagb-ifb-left-right-wrap,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image{-webkit-box-pack:end;-ms-flex-pack:end;-webkit-justify-content:flex-end;-moz-box-pack:end;justify-content:flex-end}a.uagb-infbox__link-to-all{position:absolute;top:0;left:0;z-index:3;width:100%;height:100%;box-shadow:none;text-decoration:none;-webkit-box-shadow:none}@media only screen and (max-width: 976px){.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-image-content{padding:0;margin-bottom:20px}.uagb-infobox-stacked-tablet.uagb-reverse-order-tablet.uagb-infobox__content-wrap{display:-webkit-inline-box;display:-ms-inline-flexbox;display:-webkit-inline-flex;display:-moz-inline-box;display:inline-flex;flex-direction:column-reverse;-js-display:inline-flex;-webkit-box-orient:vertical;-webkit-box-direction:reverse;-ms-flex-direction:column-reverse;-webkit-flex-direction:column-reverse;-moz-box-orient:vertical;-moz-box-direction:reverse}.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-content,.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-icon-wrap,.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-image-content{display:block;width:100%;text-align:center}.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-icon-wrap,.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-image-content{margin-right:0;margin-left:0}.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap{display:inline-block}.uagb-infobox-icon-left-title.uagb-infobox-stacked-tablet .uagb-ifb-image-content,.uagb-infobox-icon-left-title.uagb-infobox-stacked-tablet .uagb-ifb-icon-wrap,.uagb-infobox-icon-left.uagb-infobox-stacked-tablet .uagb-ifb-image-content,.uagb-infobox-icon-left.uagb-infobox-stacked-tablet .uagb-ifb-icon-wrap{margin-right:0}.uagb-infobox-icon-right-title.uagb-infobox-stacked-tablet .uagb-ifb-image-content,.uagb-infobox-icon-right-title.uagb-infobox-stacked-tablet .uagb-ifb-icon-wrap,.uagb-infobox-icon-right.uagb-infobox-stacked-tablet .uagb-ifb-image-content,.uagb-infobox-icon-right.uagb-infobox-stacked-tablet .uagb-ifb-icon-wrap{margin-left:0}.uagb-infobox-icon-left-title .uagb-ifb-separator{margin:10px 0}}@media screen and (max-width: 767px){.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap{display:inline-block}.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-image-content,.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-icon-wrap{padding:0;margin-bottom:20px;margin-right:0;margin-left:0}.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap.uagb-reverse-order-mobile{display:-webkit-inline-box;display:-ms-inline-flexbox;display:-webkit-inline-flex;display:-moz-inline-box;display:inline-flex;flex-direction:column-reverse;-js-display:inline-flex;-webkit-box-orient:vertical;-webkit-box-direction:reverse;-ms-flex-direction:column-reverse;-webkit-flex-direction:column-reverse;-moz-box-orient:vertical;-moz-box-direction:reverse}.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-image-content,.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-icon-wrap,.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-content{display:block;width:100%;text-align:center}.uagb-infobox-icon-left-title.uagb-infobox-stacked-mobile .uagb-ifb-image-content,.uagb-infobox-icon-left-title.uagb-infobox-stacked-mobile .uagb-ifb-icon-wrap,.uagb-infobox-icon-left.uagb-infobox-stacked-mobile .uagb-ifb-image-content,.uagb-infobox-icon-left.uagb-infobox-stacked-mobile .uagb-ifb-icon-wrap{margin-right:0}.uagb-infobox-icon-right-title.uagb-infobox-stacked-mobile .uagb-ifb-image-content,.uagb-infobox-icon-right-title.uagb-infobox-stacked-mobile .uagb-ifb-icon-wrap,.uagb-infobox-icon-right.uagb-infobox-stacked-mobile .uagb-ifb-image-content,.uagb-infobox-icon-right.uagb-infobox-stacked-mobile .uagb-ifb-icon-wrap{margin-left:0}.uagb-infobox-icon-left-title .uagb-ifb-separator{margin:10px 0}}.uagb-ifb-icon svg{width:inherit;height:inherit;vertical-align:middle}.uagb-ifb-button-icon{height:15px;width:15px;font-size:15px;vertical-align:middle}.uagb-ifb-button-icon svg{height:inherit;width:inherit;display:inline-block}.uagb-ifb-button-icon.uagb-ifb-align-icon-after{float:right}.uagb-ifb-cta-button{display:inline-block}.uagb-disable-link{pointer-events:none}
.wp-block-uagb-container.uagb-is-root-container .uagb-block-5657136f{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-5657136f .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-5657136f .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-5657136f .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-5657136f .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-5657136f .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-5657136f > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-5657136f{box-shadow: 0px 0px   #00000070 ;padding-top: 112px;padding-bottom: 112px;padding-left: 40px;padding-right: 40px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;background-color: var(--ast-global-color-5);;}.uagb-block-48b77c69 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-48b77c69 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-48b77c69 .uagb-ifb-icon svg{fill: #333;}.uagb-block-48b77c69.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-48b77c69 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-48b77c69 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-48b77c69.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-48b77c69.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-48b77c69 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-48b77c69 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-48b77c69 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-48b77c69 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-48b77c69.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-48b77c69.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-48b77c69.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-48b77c69.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-48b77c69 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-48b77c69.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 24px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-48b77c69.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-48b77c69 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-48b77c69 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-48b77c69 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-48b77c69 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-48b77c69.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-48b77c69.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-48b77c69 .uagb-infobox__content-wrap{text-align: center;}.uagb-block-48b77c69.uagb-infobox-icon-above-title{text-align: center;}.uagb-block-48b77c69.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-48b77c69 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-48b77c69.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-48b77c69 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-48b77c69 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-48b77c69.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-image{display:flex}.wp-block-uagb-image__figure{position:relative;display:flex;flex-direction:column;max-width:100%;height:auto;margin:0}.wp-block-uagb-image__figure img{height:auto;display:flex;max-width:100%;transition:box-shadow 0.2s ease}.wp-block-uagb-image__figure>a{display:inline-block}.wp-block-uagb-image__figure figcaption{text-align:center;margin-top:0.5em;margin-bottom:1em}.wp-block-uagb-image--align-left{text-align:left}.wp-block-uagb-image--align-right{text-align:right}.wp-block-uagb-image--align-center{text-align:center}.wp-block-uagb-image--align-full .wp-block-uagb-image__figure{margin-left:calc(50% - 50vw);margin-right:calc(50% - 50vw);max-width:100vw;width:100vw;height:auto}.wp-block-uagb-image--align-full .wp-block-uagb-image__figure img{height:auto;width:100% !important}.wp-block-uagb-image--align-wide .wp-block-uagb-image__figure img{height:auto;width:100%}.wp-block-uagb-image--layout-overlay__color-wrapper{position:absolute;left:0;top:0;right:0;bottom:0;opacity:0.2;background:rgba(0,0,0,0.5);transition:opacity 0.35s ease-in-out}.wp-block-uagb-image--layout-overlay-link{position:absolute;left:0;right:0;bottom:0;top:0}.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity:1}.wp-block-uagb-image--layout-overlay__inner{position:absolute;left:15px;right:15px;bottom:15px;top:15px;display:flex;align-items:center;justify-content:center;flex-direction:column;border-color:#fff;transition:0.35s ease-in-out}.wp-block-uagb-image--layout-overlay__inner.top-left,.wp-block-uagb-image--layout-overlay__inner.top-center,.wp-block-uagb-image--layout-overlay__inner.top-right{justify-content:flex-start}.wp-block-uagb-image--layout-overlay__inner.bottom-left,.wp-block-uagb-image--layout-overlay__inner.bottom-center,.wp-block-uagb-image--layout-overlay__inner.bottom-right{justify-content:flex-end}.wp-block-uagb-image--layout-overlay__inner.top-left,.wp-block-uagb-image--layout-overlay__inner.center-left,.wp-block-uagb-image--layout-overlay__inner.bottom-left{align-items:flex-start}.wp-block-uagb-image--layout-overlay__inner.top-right,.wp-block-uagb-image--layout-overlay__inner.center-right,.wp-block-uagb-image--layout-overlay__inner.bottom-right{align-items:flex-end}.wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{color:#fff;transition:transform 0.35s, opacity 0.35s ease-in-out;transform:translate3d(0, 24px, 0)}.wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width:30%;border-top-width:2px;border-top-color:#fff;border-top-style:solid;margin-bottom:10px;opacity:0;transition:transform 0.4s, opacity 0.4s ease-in-out;transform:translate3d(0, 30px, 0)}.wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity:0;overflow:visible;color:#fff;transition:transform 0.45s, opacity 0.45s ease-in-out;transform:translate3d(0, 35px, 0)}.wp-block-uagb-image--layout-overlay__inner:hover .uagb-image-heading,.wp-block-uagb-image--layout-overlay__inner:hover .uagb-image-separator,.wp-block-uagb-image--layout-overlay__inner:hover .uagb-image-caption{opacity:1;transform:translate3d(0, 0, 0)}.wp-block-uagb-image--effect-zoomin .wp-block-uagb-image__figure img,.wp-block-uagb-image--effect-zoomin .wp-block-uagb-image__figure .wp-block-uagb-image--layout-overlay__color-wrapper{transform:scale(1);transition:transform 0.35s ease-in-out}.wp-block-uagb-image--effect-zoomin .wp-block-uagb-image__figure:hover img,.wp-block-uagb-image--effect-zoomin .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{transform:scale(1.05)}.wp-block-uagb-image--effect-slide .wp-block-uagb-image__figure img,.wp-block-uagb-image--effect-slide .wp-block-uagb-image__figure .wp-block-uagb-image--layout-overlay__color-wrapper{width:calc(100% + 40px) !important;max-width:none !important;transform:translate3d(-40px, 0, 0);transition:transform 0.35s ease-in-out}.wp-block-uagb-image--effect-slide .wp-block-uagb-image__figure:hover img,.wp-block-uagb-image--effect-slide .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{transform:translate3d(0, 0, 0)}.wp-block-uagb-image--effect-grayscale img{filter:grayscale(0%);transition:0.35s ease-in-out}.wp-block-uagb-image--effect-grayscale:hover img{filter:grayscale(100%)}.wp-block-uagb-image--effect-blur img{filter:blur(0);transition:0.35s ease-in-out}.wp-block-uagb-image--effect-blur:hover img{filter:blur(3px)}
.wp-block-uagb-container.uagb-is-root-container .uagb-block-7b812963{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-7b812963 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-7b812963 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-7b812963 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-7b812963 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-7b812963 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-7b812963 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: flex-start;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 72px;}.wp-block-uagb-container.uagb-block-7b812963{box-shadow: 0px 0px   #00000070 ;padding-top: 112px;padding-bottom: 112px;padding-left: 40px;padding-right: 40px;margin-top:  !important;margin-bottom:  !important;row-gap: 0px;column-gap: 72px;overflow: visible;border-color: inherit;background-color: var(--ast-global-color-4);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-995656b7{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-block-995656b7 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-995656b7 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-995656b7 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-995656b7 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-995656b7 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-995656b7 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 48px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-995656b7{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 48px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-edc15cc2{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-edc15cc2 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-edc15cc2 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-edc15cc2 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-edc15cc2 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-edc15cc2 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-edc15cc2 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-edc15cc2{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 24px;margin-top:  !important;margin-bottom:  !important;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;}.uagb-block-50f73676 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-50f73676 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-50f73676 .uagb-ifb-icon svg{fill: #333;}.uagb-block-50f73676.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-50f73676 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-50f73676 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-50f73676.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-50f73676.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-50f73676 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-50f73676 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-50f73676 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-50f73676 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-50f73676.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-50f73676.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-50f73676.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-50f73676.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-50f73676 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-50f73676.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-50f73676.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;}.uagb-block-50f73676 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-50f73676 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-50f73676 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-50f73676 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-50f73676.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-50f73676.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-50f73676 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-50f73676.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-50f73676.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-50f73676 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-50f73676.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-50f73676 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-50f73676 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-50f73676.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-1680ca56{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-1680ca56 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-1680ca56 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-1680ca56 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-1680ca56 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-1680ca56 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-1680ca56 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 20px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-1680ca56{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 20px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;}.uagb-block-670f764d.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-670f764d .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-670f764d.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-670f764d.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;text-align: center;}.uagb-block-670f764d.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-670f764d.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-670f764d.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-670f764d.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-670f764d.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-670f764d.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-670f764d.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-670f764d.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-670f764d.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 564px;height: 376px;}.uagb-block-670f764d.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-670f764d.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-670f764d.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-670f764d.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-04196942 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-04196942 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-04196942 .uagb-ifb-icon svg{fill: #333;}.uagb-block-04196942.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-04196942 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-04196942 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-04196942.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-04196942.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-04196942 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-04196942 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-04196942 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-04196942 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-04196942.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-04196942.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-04196942.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-04196942.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-04196942 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-04196942.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-04196942.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;}.uagb-block-04196942 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-04196942 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-04196942 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-04196942 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-04196942.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-04196942.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-04196942 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-04196942.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-04196942.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-04196942 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-04196942.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-04196942 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-04196942 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-04196942.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-0953f8e4{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-block-0953f8e4 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-0953f8e4 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-0953f8e4 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-0953f8e4 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-0953f8e4 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-0953f8e4 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 48px;column-gap: 20px;}.wp-block-uagb-container.uagb-block-0953f8e4{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 48px;column-gap: 20px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-73451b7a{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-73451b7a .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-73451b7a .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-73451b7a .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-73451b7a .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-73451b7a .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-73451b7a > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 20px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-73451b7a{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 20px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;}.uagb-block-ace2e526.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-ace2e526 .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-ace2e526.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-ace2e526.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;text-align: center;}.uagb-block-ace2e526.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-ace2e526.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-ace2e526.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-ace2e526.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-ace2e526.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-ace2e526.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-ace2e526.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-ace2e526.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-ace2e526.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 564px;height: 376px;}.uagb-block-ace2e526.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-ace2e526.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-ace2e526.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-ace2e526.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-652f6e85 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-652f6e85 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-652f6e85 .uagb-ifb-icon svg{fill: #333;}.uagb-block-652f6e85.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-652f6e85 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-652f6e85 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-652f6e85.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-652f6e85.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-652f6e85 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-652f6e85 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-652f6e85 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-652f6e85 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-652f6e85.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-652f6e85.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-652f6e85.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-652f6e85.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-652f6e85 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-652f6e85.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-652f6e85.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;}.uagb-block-652f6e85 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-652f6e85 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-652f6e85 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-652f6e85 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-652f6e85.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-652f6e85.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-652f6e85 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-652f6e85.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-652f6e85.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-652f6e85 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-652f6e85.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-652f6e85 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-652f6e85 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-652f6e85.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-29ea1d4a{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-29ea1d4a .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-29ea1d4a .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-29ea1d4a .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-29ea1d4a .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-29ea1d4a .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-29ea1d4a > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 20px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-29ea1d4a{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 20px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;}.uagb-block-71f8f880.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-71f8f880 .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-71f8f880.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-71f8f880.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;text-align: center;}.uagb-block-71f8f880.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-71f8f880.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-71f8f880.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-71f8f880.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-71f8f880.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-71f8f880.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-71f8f880.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-71f8f880.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-71f8f880.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 564px;height: 376px;}.uagb-block-71f8f880.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-71f8f880.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-71f8f880.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-71f8f880.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-b7968360 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-b7968360 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-b7968360 .uagb-ifb-icon svg{fill: #333;}.uagb-block-b7968360.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-b7968360 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-b7968360 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-b7968360.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-b7968360.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-b7968360 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-b7968360 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-b7968360 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-b7968360 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-b7968360.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-b7968360.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-b7968360.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-b7968360.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-b7968360 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-b7968360.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-b7968360.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;}.uagb-block-b7968360 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-b7968360 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-b7968360 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-b7968360 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-b7968360.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-b7968360.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-b7968360 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-b7968360.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-b7968360.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-b7968360 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-b7968360.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-b7968360 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-b7968360 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-b7968360.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-star-rating{display:flex}.wp-block-uagb-star-rating .uag-star-rating__title{margin:0;display:flex;align-items:center}.wp-block-uagb-star-rating .uag-star-rating{display:flex;align-items:center}.wp-block-uagb-star-rating .uag-star{color:#ccd6df;display:inline-block;line-height:0.75em}
.wp-block-uagb-container.uagb-is-root-container .uagb-block-91498726{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-91498726 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-91498726 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-91498726 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-91498726 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-91498726 .uagb-container__video-wrap video{opacity: 0.3;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-91498726 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-91498726{box-shadow: 0px 0px   #00000070 ;padding-top: 112px;padding-bottom: 112px;padding-left: 40px;padding-right: 40px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;background-repeat: no-repeat;background-position: 50% 50%;background-size: cover;background-attachment: scroll;background-image: url(https://websitedemos.net/wp-content/uploads/2023/10/natures-01.jpg);;background-clip: padding-box;}.wp-block-uagb-container.uagb-block-91498726::before{content: "";position: absolute;pointer-events: none;top: -0px;left: -0px;width: calc(100% + 0px + 0px);height: calc(100% + 0px + 0px);border-color: inherit;background: var(--ast-global-color-7);opacity: 0.7;} .uagb-block-e7b97723 .uag-star-rating{font-size: 20px;} .uagb-block-e7b97723 .uag-star-rating > span{margin-right: 2px;color: #ccd6df;} .uagb-block-e7b97723 .uag-star:nth-child(-n+5){color: #f0ad4e;} .uagb-block-e7b97723 .uag-star-rating__title{margin-right: 10px;} .uagb-block-e7b97723.wp-block-uagb-star-rating {flex-direction: row;justify-content: center;margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;padding-top: 0px;padding-right: 0px;padding-bottom: 32px;padding-left: 0px;} .uagb-block-e7b97723 .uag-star:nth-child(5):before{color: #f0ad4e;width: 0%;position: absolute;content: '★';overflow: hidden;} .uagb-block-e7b97723 .uag-star:nth-child(5){position: relative;}.uagb-block-927b94d5 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-927b94d5 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-927b94d5 .uagb-ifb-icon svg{fill: #333;}.uagb-block-927b94d5.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-927b94d5 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-927b94d5 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-927b94d5.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-927b94d5.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-927b94d5 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-927b94d5 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-927b94d5 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-927b94d5 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-927b94d5.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-927b94d5.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-927b94d5.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-927b94d5.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-927b94d5 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-927b94d5.wp-block-uagb-info-box .uagb-ifb-title{color: #ffffff;margin-bottom: 32px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-927b94d5.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-927b94d5 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-927b94d5 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-927b94d5 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-927b94d5 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-927b94d5.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-927b94d5.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-927b94d5 .uagb-infobox__content-wrap{text-align: center;}.uagb-block-927b94d5.uagb-infobox-icon-above-title{text-align: center;}.uagb-block-927b94d5.uagb-infobox__content-wrap{padding-top: 0%;padding-right: 20%;padding-bottom: 0%;padding-left: 20%;}.uagb-block-927b94d5 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-927b94d5.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-927b94d5 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-927b94d5 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-927b94d5.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-6500537b .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-6500537b .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-6500537b .uagb-ifb-icon svg{fill: #333;}.uagb-block-6500537b.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-6500537b .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-6500537b .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-6500537b.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-6500537b.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-6500537b .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-6500537b .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-6500537b .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-6500537b .uagb-infobox .uagb-ifb-image-content img{border-radius: 50px;}.uagb-block-6500537b.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 50px;}.uagb-block-6500537b.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 50px;}.uagb-block-6500537b.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 50px;}.uagb-block-6500537b.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 50px;}.uagb-block-6500537b .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-6500537b.wp-block-uagb-info-box .uagb-ifb-title{color: #ffffff;margin-bottom: 0px;margin-top: 12px;margin-left: 0px;margin-right: 0px;}.uagb-block-6500537b.wp-block-uagb-info-box .uagb-ifb-desc{color: #ffffff;margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-6500537b .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-6500537b .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-6500537b .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-6500537b .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-6500537b.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-6500537b.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-6500537b .uagb-infobox__content-wrap{text-align: center;}.uagb-block-6500537b.uagb-infobox-icon-above-title{text-align: center;}.uagb-block-6500537b.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-6500537b .uagb-ifb-content .uagb-ifb-image-content > img{width: 48px;}.uagb-block-6500537b.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 48px;}.uagb-block-6500537b .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 48px;}.uagb-block-6500537b .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 48px;}.uagb-block-6500537b.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-af1c3188{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-af1c3188 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-af1c3188 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-af1c3188 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-af1c3188 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-af1c3188 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-af1c3188 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 48px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-af1c3188{box-shadow: 0px 0px   #00000070 ;padding-top: 112px;padding-bottom: 112px;padding-left: 40px;padding-right: 40px;margin-top:  !important;margin-bottom:  !important;row-gap: 48px;column-gap: 0px;overflow: visible;border-color: inherit;background-color: var(--ast-global-color-5);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-9527e0d6{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-9527e0d6 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-9527e0d6 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-9527e0d6 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-9527e0d6 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-9527e0d6 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-9527e0d6 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 72px;}.wp-block-uagb-container.uagb-block-9527e0d6{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 0px;column-gap: 72px;overflow: visible;border-color: inherit;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-f5bce098{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-f5bce098 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-f5bce098 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-f5bce098 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-f5bce098 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-f5bce098 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-f5bce098 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 20px;column-gap: 20px;}.wp-block-uagb-container.uagb-block-f5bce098{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 20px;column-gap: 20px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-db00f262 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-db00f262 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-db00f262 .uagb-ifb-icon svg{fill: #333;}.uagb-block-db00f262.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-db00f262 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-db00f262 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-db00f262.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-db00f262.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-db00f262 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-db00f262 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-db00f262 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-db00f262 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-db00f262.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-db00f262.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-db00f262.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-db00f262.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-db00f262 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-db00f262.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 0px;}.uagb-block-db00f262.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;}.uagb-block-db00f262 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-db00f262 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-db00f262 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-db00f262 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-db00f262.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-db00f262.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-db00f262 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-db00f262.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-db00f262 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-db00f262.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-db00f262 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-db00f262 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-db00f262.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-a84ca7d9{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-a84ca7d9 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-a84ca7d9 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-a84ca7d9 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-a84ca7d9 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-a84ca7d9 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-a84ca7d9 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 20px;column-gap: 20px;}.wp-block-uagb-container.uagb-block-a84ca7d9{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 40px;margin-top:  !important;margin-bottom:  !important;row-gap: 20px;column-gap: 20px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-8c6b6cf7 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-8c6b6cf7 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-8c6b6cf7 .uagb-ifb-icon svg{fill: #333;}.uagb-block-8c6b6cf7.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-8c6b6cf7 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-8c6b6cf7 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-8c6b6cf7.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-8c6b6cf7.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-8c6b6cf7 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-8c6b6cf7 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-8c6b6cf7 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-8c6b6cf7 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-8c6b6cf7.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-8c6b6cf7.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-8c6b6cf7.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-8c6b6cf7.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-8c6b6cf7 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-8c6b6cf7.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 0px;}.uagb-block-8c6b6cf7.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-8c6b6cf7 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-8c6b6cf7 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-8c6b6cf7 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-8c6b6cf7 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-8c6b6cf7.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-8c6b6cf7.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-8c6b6cf7 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-8c6b6cf7.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-8c6b6cf7 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-8c6b6cf7.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-8c6b6cf7 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-8c6b6cf7 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-8c6b6cf7.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-eab9a597{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-eab9a597 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-eab9a597 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-eab9a597 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-eab9a597 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-eab9a597 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-eab9a597 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 48px;}.wp-block-uagb-container.uagb-block-eab9a597{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 0px;column-gap: 48px;overflow: visible;border-color: inherit;flex-direction: row;align-items: stretch;justify-content: flex-start;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-aa320a5c{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-aa320a5c .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-aa320a5c .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-aa320a5c .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-aa320a5c .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-aa320a5c .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-aa320a5c > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-aa320a5c{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-02f6b38a .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-02f6b38a .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-02f6b38a .uagb-ifb-icon svg{fill: #333;}.uagb-block-02f6b38a.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-02f6b38a .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-02f6b38a .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-02f6b38a.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-02f6b38a.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-02f6b38a .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-02f6b38a .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-02f6b38a .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-02f6b38a .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-02f6b38a.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-02f6b38a.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-02f6b38a.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-02f6b38a.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-02f6b38a .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-02f6b38a.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 16px;}.uagb-block-02f6b38a.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-02f6b38a .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-02f6b38a .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-02f6b38a .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-02f6b38a .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-02f6b38a.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-02f6b38a.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-02f6b38a .uagb-infobox__content-wrap{text-align: left;}.uagb-block-02f6b38a.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-02f6b38a .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-02f6b38a.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-02f6b38a .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-02f6b38a .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-02f6b38a.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-e44ee0f1{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-e44ee0f1 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-e44ee0f1 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-e44ee0f1 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-e44ee0f1 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-e44ee0f1 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-e44ee0f1 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-e44ee0f1{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-d077b586 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-d077b586 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-d077b586 .uagb-ifb-icon svg{fill: #333;}.uagb-block-d077b586.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-d077b586 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-d077b586 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-d077b586.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-d077b586.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-d077b586 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-d077b586 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-d077b586 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-d077b586 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-d077b586.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-d077b586.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-d077b586.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-d077b586.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-d077b586 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-d077b586.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 16px;}.uagb-block-d077b586.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-d077b586 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-d077b586 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-d077b586 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-d077b586 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-d077b586.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-d077b586.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-d077b586 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-d077b586.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-d077b586 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-d077b586.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-d077b586 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-d077b586 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-d077b586.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-c17e7b55{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-c17e7b55 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-c17e7b55 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-c17e7b55 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-c17e7b55 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-c17e7b55 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-c17e7b55 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-c17e7b55{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-ce34d80a .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-ce34d80a .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-ce34d80a .uagb-ifb-icon svg{fill: #333;}.uagb-block-ce34d80a.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-ce34d80a .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-ce34d80a .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-ce34d80a.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-ce34d80a.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-ce34d80a .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-ce34d80a .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-ce34d80a .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-ce34d80a .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-ce34d80a.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-ce34d80a.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-ce34d80a.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-ce34d80a.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-ce34d80a .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-ce34d80a.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 16px;}.uagb-block-ce34d80a.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-ce34d80a .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-ce34d80a .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-ce34d80a .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-ce34d80a .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-ce34d80a.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-ce34d80a.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-ce34d80a .uagb-infobox__content-wrap{text-align: left;}.uagb-block-ce34d80a.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-ce34d80a .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-ce34d80a.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-ce34d80a .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-ce34d80a .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-ce34d80a.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-b8e9ac21{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-b8e9ac21 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-b8e9ac21 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-b8e9ac21 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-b8e9ac21 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-b8e9ac21 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-b8e9ac21 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 48px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-b8e9ac21{box-shadow: 0px 0px   #00000070 ;padding-top: 112px;padding-bottom: 112px;padding-left: 40px;padding-right: 40px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 48px;column-gap: 0px;overflow: visible;border-color: inherit;background-color: var(--ast-global-color-4);;}.uagb-block-f71827e9 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-f71827e9 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-f71827e9 .uagb-ifb-icon svg{fill: #333;}.uagb-block-f71827e9.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-f71827e9 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-f71827e9 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-f71827e9.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-f71827e9.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-f71827e9 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-f71827e9 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-f71827e9 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-f71827e9 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-f71827e9.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-f71827e9.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-f71827e9.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-f71827e9.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-f71827e9 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-f71827e9.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 24px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-f71827e9.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0%;margin-top: 0%;margin-left: 26%;margin-right: 26%;}.uagb-block-f71827e9 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-f71827e9 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-f71827e9 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-f71827e9 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-f71827e9.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-f71827e9.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-f71827e9 .uagb-infobox__content-wrap{text-align: center;}.uagb-block-f71827e9.uagb-infobox-icon-above-title{text-align: center;}.uagb-block-f71827e9.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-f71827e9 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-f71827e9.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-f71827e9 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-f71827e9 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-f71827e9.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-f19c72df{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-f19c72df .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-f19c72df .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-f19c72df .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-f19c72df .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-f19c72df .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-f19c72df > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 24px;}.wp-block-uagb-container.uagb-block-f19c72df{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 24px;overflow: visible;border-color: inherit;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-37f5ce64{max-width: 25%;width: 100%;}.wp-block-uagb-container.uagb-block-37f5ce64 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-37f5ce64 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-37f5ce64 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-37f5ce64 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-37f5ce64 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-37f5ce64 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-37f5ce64{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-c66822e3.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-c66822e3 .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-c66822e3.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-c66822e3.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;text-align: center;}.uagb-block-c66822e3.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-c66822e3.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-c66822e3.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-c66822e3.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-c66822e3.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-c66822e3.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-c66822e3.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-c66822e3.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-c66822e3.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 282px;height: 282px;}.uagb-block-c66822e3.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-c66822e3.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-c66822e3.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-c66822e3.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-5a0c6506{max-width: 25%;width: 100%;}.wp-block-uagb-container.uagb-block-5a0c6506 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-5a0c6506 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-5a0c6506 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-5a0c6506 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-5a0c6506 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-5a0c6506 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-5a0c6506{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-0b3024da.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-0b3024da .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-0b3024da.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-0b3024da.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;text-align: center;}.uagb-block-0b3024da.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-0b3024da.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-0b3024da.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-0b3024da.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-0b3024da.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-0b3024da.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-0b3024da.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-0b3024da.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-0b3024da.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 282px;height: 282px;}.uagb-block-0b3024da.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-0b3024da.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-0b3024da.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-0b3024da.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-cad970aa{max-width: 25%;width: 100%;}.wp-block-uagb-container.uagb-block-cad970aa .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-cad970aa .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-cad970aa .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-cad970aa .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-cad970aa .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-cad970aa > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-cad970aa{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-3094507a.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-3094507a .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-3094507a.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-3094507a.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;text-align: center;}.uagb-block-3094507a.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-3094507a.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-3094507a.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-3094507a.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-3094507a.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-3094507a.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-3094507a.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-3094507a.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-3094507a.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 282px;height: 282px;}.uagb-block-3094507a.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-3094507a.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-3094507a.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-3094507a.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-efb0742a{max-width: 25%;width: 100%;}.wp-block-uagb-container.uagb-block-efb0742a .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-efb0742a .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-efb0742a .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-efb0742a .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-efb0742a .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-efb0742a > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-efb0742a{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-1d7aabaf.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-1d7aabaf .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-1d7aabaf.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-1d7aabaf.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;text-align: center;}.uagb-block-1d7aabaf.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-1d7aabaf.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-1d7aabaf.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-1d7aabaf.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-1d7aabaf.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-1d7aabaf.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-1d7aabaf.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-1d7aabaf.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-1d7aabaf.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 282px;height: 282px;}.uagb-block-1d7aabaf.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-1d7aabaf.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-1d7aabaf.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-1d7aabaf.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-buttons__outer-wrap .uagb-buttons__wrap{display:inline-flex;width:100%}.uagb-buttons__outer-wrap.uagb-btn__small-btn .uagb-buttons-repeater{padding:5px 10px}.uagb-buttons__outer-wrap.uagb-btn__medium-btn .uagb-buttons-repeater{padding:12px 24px}.uagb-buttons__outer-wrap.uagb-btn__large-btn .uagb-buttons-repeater{padding:20px 30px}.uagb-buttons__outer-wrap.uagb-btn__extralarge-btn .uagb-buttons-repeater{padding:30px 65px}@media (max-width: 976px){.uagb-buttons__outer-wrap.uagb-btn-tablet__small-btn .uagb-buttons-repeater{padding:5px 10px}.uagb-buttons__outer-wrap.uagb-btn-tablet__medium-btn .uagb-buttons-repeater{padding:12px 24px}.uagb-buttons__outer-wrap.uagb-btn-tablet__large-btn .uagb-buttons-repeater{padding:20px 30px}.uagb-buttons__outer-wrap.uagb-btn-tablet__extralarge-btn .uagb-buttons-repeater{padding:30px 65px}}@media (max-width: 767px){.uagb-buttons__outer-wrap.uagb-btn-mobile__small-btn .uagb-buttons-repeater{padding:5px 10px}.uagb-buttons__outer-wrap.uagb-btn-mobile__medium-btn .uagb-buttons-repeater{padding:12px 24px}.uagb-buttons__outer-wrap.uagb-btn-mobile__large-btn .uagb-buttons-repeater{padding:20px 30px}.uagb-buttons__outer-wrap.uagb-btn-mobile__extralarge-btn .uagb-buttons-repeater{padding:30px 65px}}
.uagb-buttons__outer-wrap .uagb-buttons-repeater{display:flex;justify-content:center;align-items:center;transition:box-shadow 0.2s ease}.uagb-buttons__outer-wrap .uagb-buttons-repeater a.uagb-button__link{display:flex;justify-content:center}.uagb-buttons__outer-wrap .uagb-buttons-repeater .uagb-button__icon{font-size:inherit;display:flex;align-items:center}.uagb-buttons__outer-wrap .uagb-buttons-repeater .uagb-button__icon svg{fill:currentColor;width:inherit;height:inherit}
.wp-block-uagb-container.uagb-is-root-container .uagb-block-ec802e59{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-ec802e59 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-ec802e59 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-ec802e59 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-ec802e59 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-ec802e59 .uagb-container__video-wrap video{opacity: 0.3;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-ec802e59 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 800px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: stretch;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-ec802e59{box-shadow: 0px 0px   #00000070 ;padding-top: 112px;padding-bottom: 112px;padding-left: 40px;padding-right: 40px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;background-repeat: no-repeat;background-position: 50% 50%;background-size: cover;background-attachment: scroll;background-image: url(https://websitedemos.net/wp-content/uploads/2023/10/natures-01.jpg);;background-clip: padding-box;}.wp-block-uagb-container.uagb-block-ec802e59::before{content: "";position: absolute;pointer-events: none;top: -0px;left: -0px;width: calc(100% + 0px + 0px);height: calc(100% + 0px + 0px);border-color: inherit;background: var(--ast-global-color-7);opacity: 0.7;}.uagb-block-2eea1fe1 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-2eea1fe1 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-2eea1fe1 .uagb-ifb-icon svg{fill: #333;}.uagb-block-2eea1fe1.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-2eea1fe1 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-2eea1fe1 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-2eea1fe1.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-2eea1fe1.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-2eea1fe1 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-2eea1fe1 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-2eea1fe1 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-2eea1fe1 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-2eea1fe1.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-2eea1fe1.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-2eea1fe1.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-2eea1fe1.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-2eea1fe1 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{color: #ffffff;margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-2eea1fe1.wp-block-uagb-info-box .uagb-ifb-title{color: #ffffff;margin-bottom: 40px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-2eea1fe1.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-2eea1fe1 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-2eea1fe1 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-2eea1fe1 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-2eea1fe1 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-2eea1fe1.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-2eea1fe1.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-2eea1fe1 .uagb-infobox__content-wrap{text-align: center;}.uagb-block-2eea1fe1.uagb-infobox-icon-above-title{text-align: center;}.uagb-block-2eea1fe1.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-2eea1fe1 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-2eea1fe1.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-2eea1fe1 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-2eea1fe1 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-2eea1fe1.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-aba0ff05.wp-block-uagb-buttons.uagb-buttons__outer-wrap .uagb-buttons__wrap {column-gap: 20px;}.uagb-block-aba0ff05.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: center;align-items: center;}.wp-block-uagb-buttons .uagb-block-cc41c321.wp-block-uagb-buttons-child .uagb-buttons-repeater{background: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-cc41c321 .wp-block-button__link{background: var(--ast-global-color-0);}.wp-block-uagb-buttons .uagb-block-cc41c321 .wp-block-button__link:hover{background: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-cc41c321 .wp-block-button__link:focus{background: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-cc41c321 .uagb-button__wrapper .uagb-buttons-repeater{color: #ffffff;margin-top: 0px;margin-bottom: 0px;margin-left: 0px;margin-right: 0px;}.wp-block-uagb-buttons .uagb-block-cc41c321 .wp-block-button__link.has-text-color:hover .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-cc41c321 .wp-block-button__link.has-text-color:focus .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-cc41c321 .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-cc41c321 .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link:hover{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-cc41c321 .uagb-buttons-repeater.wp-block-button__link{border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-style: none;}.wp-block-uagb-buttons .uagb-block-cc41c321.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-style: none;}.wp-block-uagb-buttons .uagb-block-cc41c321 .uagb-buttons-repeater .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-cc41c321 .uagb-buttons-repeater:hover .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-cc41c321 .uagb-buttons-repeater:focus .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-cc41c321 .uagb-buttons-repeater .uagb-button__icon > svg{width: 15px;height: 15px;fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-cc41c321 .uagb-buttons-repeater:hover .uagb-button__icon > svg{fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-cc41c321 .uagb-buttons-repeater:focus .uagb-button__icon > svg{fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-cc41c321 .uagb-buttons-repeater .uagb-button__icon-position-after{margin-left: 8px;}.wp-block-uagb-buttons .uagb-block-cc41c321 .uagb-buttons-repeater .uagb-button__icon-position-before{margin-right: 8px;}.wp-block-uagb-buttons .uagb-block-cc41c321 .uagb-button__link{text-transform: normal;text-decoration: none;}.wp-block-uagb-buttons .uagb-block-63f00eb8 .wp-block-button__link{background: transparent;}.wp-block-uagb-buttons .uagb-block-63f00eb8 .wp-block-button__link:hover{background: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-63f00eb8 .wp-block-button__link:focus{background: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-63f00eb8 .uagb-button__wrapper .uagb-buttons-repeater{color: #ffffff;margin-top: 0px;margin-bottom: 0px;margin-left: 0px;margin-right: 0px;}.wp-block-uagb-buttons .uagb-block-63f00eb8 .wp-block-button__link.has-text-color:hover .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-63f00eb8 .wp-block-button__link.has-text-color:focus .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-63f00eb8 .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-63f00eb8 .uagb-button__wrapper  .uagb-buttons-repeater.wp-block-button__link:hover{box-shadow: 0px 0px 0 #00000026;}.wp-block-uagb-buttons .uagb-block-63f00eb8 .uagb-buttons-repeater.wp-block-button__link{border-top-width: 1px;border-left-width: 1px;border-right-width: 1px;border-bottom-width: 1px;border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-color: #ffffff;border-style: solid;}.wp-block-uagb-buttons .uagb-block-63f00eb8 .uagb-buttons-repeater.wp-block-button__link:hover{border-color: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-63f00eb8 .uagb-buttons-repeater.wp-block-button__link:focus{border-color: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-63f00eb8.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-top-width: 1px;border-left-width: 1px;border-right-width: 1px;border-bottom-width: 1px;border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-color: #ffffff;border-style: solid;}.wp-block-uagb-buttons .uagb-block-63f00eb8.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater:hover{border-color: var(--ast-global-color-1);}.wp-block-uagb-buttons .uagb-block-63f00eb8 .uagb-buttons-repeater .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-63f00eb8 .uagb-buttons-repeater:hover .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-63f00eb8 .uagb-buttons-repeater:focus .uagb-button__link{color: #ffffff;}.wp-block-uagb-buttons .uagb-block-63f00eb8 .uagb-buttons-repeater .uagb-button__icon > svg{width: 15px;height: 15px;fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-63f00eb8 .uagb-buttons-repeater:hover .uagb-button__icon > svg{fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-63f00eb8 .uagb-buttons-repeater:focus .uagb-button__icon > svg{fill: #ffffff;}.wp-block-uagb-buttons .uagb-block-63f00eb8 .uagb-buttons-repeater .uagb-button__icon-position-after{margin-left: 8px;}.wp-block-uagb-buttons .uagb-block-63f00eb8 .uagb-buttons-repeater .uagb-button__icon-position-before{margin-right: 8px;}.wp-block-uagb-buttons .uagb-block-63f00eb8 .uagb-button__link{text-transform: normal;text-decoration: none;}@media only screen and (max-width: 976px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-5657136f{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-5657136f > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-5657136f{padding-top: 80px;padding-bottom: 80px;padding-left: 32px;padding-right: 32px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;background-color: var(--ast-global-color-5);;}.uagb-block-48b77c69.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 32px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-48b77c69.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-48b77c69.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-48b77c69.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-48b77c69.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-48b77c69 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-48b77c69 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-48b77c69 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-48b77c69 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-48b77c69 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-48b77c69.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-48b77c69 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-48b77c69.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-48b77c69 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-48b77c69 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-48b77c69.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-7b812963{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-7b812963 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 0px;column-gap: 40px;}.wp-block-uagb-container.uagb-block-7b812963{padding-top: 80px;padding-bottom: 80px;padding-left: 32px;padding-right: 32px;margin-top:  !important;margin-bottom:  !important;row-gap: 0px;column-gap: 40px;background-color: var(--ast-global-color-4);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-995656b7{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-995656b7 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 40px;}.wp-block-uagb-container.uagb-block-995656b7{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 40px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-edc15cc2{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-edc15cc2 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-edc15cc2{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 16px;margin-top:  !important;margin-bottom:  !important;}.uagb-block-50f73676.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-50f73676.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-50f73676.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-50f73676.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-50f73676 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-50f73676 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-50f73676 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-50f73676 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-50f73676 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-50f73676.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-50f73676 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-50f73676.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-50f73676 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-50f73676 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-50f73676.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-1680ca56{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-1680ca56 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 24px;}.wp-block-uagb-container.uagb-block-1680ca56{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 24px;}.uagb-block-670f764d.wp-block-uagb-image--layout-default figure img{border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-670f764d.wp-block-uagb-image--layout-overlay figure img{border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-670f764d.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 332px;height: 300px;}.uagb-block-670f764d.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-670f764d .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-04196942.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-04196942.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-04196942.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-04196942.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-04196942.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-04196942 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-04196942 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-04196942 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-04196942 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-04196942 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-04196942.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-04196942 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-04196942.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-04196942 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-04196942 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-04196942.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-0953f8e4{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-0953f8e4 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 40px;}.wp-block-uagb-container.uagb-block-0953f8e4{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 40px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-73451b7a{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-73451b7a > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 20px;}.wp-block-uagb-container.uagb-block-73451b7a{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 20px;}.uagb-block-ace2e526.wp-block-uagb-image--layout-default figure img{border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-ace2e526.wp-block-uagb-image--layout-overlay figure img{border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-ace2e526.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 332px;height: 300px;}.uagb-block-ace2e526.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-ace2e526 .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-652f6e85.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-652f6e85.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-652f6e85.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-652f6e85.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-652f6e85.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-652f6e85 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-652f6e85 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-652f6e85 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-652f6e85 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-652f6e85 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-652f6e85.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-652f6e85 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-652f6e85.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-652f6e85 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-652f6e85 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-652f6e85.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-29ea1d4a{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-29ea1d4a > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 20px;}.wp-block-uagb-container.uagb-block-29ea1d4a{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 20px;}.uagb-block-71f8f880.wp-block-uagb-image--layout-default figure img{border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-71f8f880.wp-block-uagb-image--layout-overlay figure img{border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-71f8f880.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 332px;height: 300px;}.uagb-block-71f8f880.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-71f8f880 .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-b7968360.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-b7968360.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-b7968360.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-b7968360.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-b7968360.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-b7968360 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-b7968360 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-b7968360 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-b7968360 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-b7968360 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-b7968360.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-b7968360 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-b7968360.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-b7968360 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-b7968360 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-b7968360.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-91498726{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-91498726 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-91498726{padding-top: 80px;padding-bottom: 80px;padding-left: 32px;padding-right: 32px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;background-clip: padding-box;}.wp-block-uagb-container.uagb-block-91498726::before{top: -0px;left: -0px;width: calc(100% + 0px + 0px);height: calc(100% + 0px + 0px);} .uagb-block-e7b97723.wp-block-uagb-star-rating {flex-direction: row;justify-content: center;padding-top: 0px;padding-right: 0px;padding-bottom: 24px;padding-left: 0px;margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;} .uagb-block-e7b97723 .uag-star-rating__title {margin-bottom: 0;} .uagb-block-e7b97723 .uag-star-rating__title{margin-right: 10px;} .uagb-block-e7b97723 .uag-star-rating{font-size: 24px;}.uagb-block-927b94d5.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 24px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-927b94d5.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-927b94d5.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-927b94d5.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-927b94d5 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-927b94d5 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-927b94d5 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-927b94d5 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-927b94d5 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-927b94d5.uagb-infobox__content-wrap{padding-top: 0%;padding-right: 15%;padding-bottom: 0%;padding-left: 15%;}.uagb-block-927b94d5 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-927b94d5.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-927b94d5 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-927b94d5 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-927b94d5.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-6500537b.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 5px;margin-top: 12px;margin-left: 0px;margin-right: 0px;}.uagb-block-6500537b.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-6500537b.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-6500537b.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-6500537b .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-6500537b .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-6500537b .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-6500537b .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-6500537b .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-6500537b .uagb-ifb-content .uagb-ifb-image-content img{width: 48px;}.uagb-block-6500537b.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 48px;}.uagb-block-6500537b .uagb-ifb-content .uagb-ifb-left-title-image img{width: 48px;}.uagb-block-6500537b .uagb-ifb-content .uagb-ifb-right-title-image img{width: 48px;}.uagb-block-6500537b.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-af1c3188{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-af1c3188 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 40px;}.wp-block-uagb-container.uagb-block-af1c3188{padding-top: 80px;padding-bottom: 80px;padding-left: 32px;padding-right: 32px;margin-top:  !important;margin-bottom:  !important;row-gap: 40px;background-color: var(--ast-global-color-5);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-9527e0d6{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-9527e0d6 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;column-gap: 40px;}.wp-block-uagb-container.uagb-block-9527e0d6{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;column-gap: 40px;align-items: stretch;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-f5bce098{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-f5bce098 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-f5bce098{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;}.uagb-block-db00f262.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-db00f262.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-db00f262.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-db00f262.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-db00f262 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-db00f262 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-db00f262 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-db00f262 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-db00f262 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-db00f262 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-db00f262.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-db00f262 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-db00f262 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-db00f262.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-a84ca7d9{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-a84ca7d9 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-a84ca7d9{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;}.uagb-block-8c6b6cf7.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-8c6b6cf7.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-8c6b6cf7.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-8c6b6cf7.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-8c6b6cf7 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-8c6b6cf7 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-8c6b6cf7 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-8c6b6cf7 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-8c6b6cf7 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-8c6b6cf7 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-8c6b6cf7.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-8c6b6cf7 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-8c6b6cf7 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-8c6b6cf7.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-eab9a597{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-eab9a597 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;column-gap: 24px;}.wp-block-uagb-container.uagb-block-eab9a597{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;column-gap: 24px;align-items: stretch;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-aa320a5c{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-aa320a5c > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-aa320a5c{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;}.uagb-block-02f6b38a.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-02f6b38a.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-02f6b38a.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-02f6b38a.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-02f6b38a.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-02f6b38a .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-02f6b38a .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-02f6b38a .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-02f6b38a .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-02f6b38a .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-02f6b38a .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-02f6b38a.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-02f6b38a .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-02f6b38a .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-02f6b38a.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-e44ee0f1{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-e44ee0f1 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-e44ee0f1{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;}.uagb-block-d077b586.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-d077b586.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-d077b586.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-d077b586.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-d077b586.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-d077b586 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-d077b586 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-d077b586 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-d077b586 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-d077b586 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-d077b586 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-d077b586.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-d077b586 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-d077b586 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-d077b586.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-c17e7b55{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-c17e7b55 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-c17e7b55{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;}.uagb-block-ce34d80a.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-ce34d80a.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-ce34d80a.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-ce34d80a.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-ce34d80a.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-ce34d80a .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-ce34d80a .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-ce34d80a .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-ce34d80a .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-ce34d80a .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-ce34d80a .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-ce34d80a.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-ce34d80a .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-ce34d80a .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-ce34d80a.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-b8e9ac21{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-b8e9ac21 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 40px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-b8e9ac21{padding-top: 80px;padding-bottom: 80px;padding-left: 32px;padding-right: 32px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 40px;column-gap: 0px;background-color: var(--ast-global-color-4);;}.uagb-block-f71827e9.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-f71827e9.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0%;margin-top: 0%;margin-left: 14%;margin-right: 14%;}.uagb-block-f71827e9.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-f71827e9.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-f71827e9.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-f71827e9 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-f71827e9 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-f71827e9 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-f71827e9 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-f71827e9 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-f71827e9.uagb-infobox-icon-above-title{text-align: center;}.uagb-block-f71827e9.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 14px;padding-bottom: 0px;padding-left: 14px;}.uagb-block-f71827e9 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-f71827e9.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-f71827e9 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-f71827e9 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-f71827e9.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-f19c72df{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-f19c72df > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;row-gap: 0px;column-gap: 24px;}.wp-block-uagb-container.uagb-block-f19c72df{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 24px;align-items: stretch;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-37f5ce64{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-37f5ce64 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-37f5ce64{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;}.uagb-block-c66822e3.wp-block-uagb-image--layout-default figure img{border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-c66822e3.wp-block-uagb-image--layout-overlay figure img{border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-c66822e3.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 158px;height: 158px;}.uagb-block-c66822e3.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-5a0c6506{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-5a0c6506 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-5a0c6506{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;}.uagb-block-0b3024da.wp-block-uagb-image--layout-default figure img{border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-0b3024da.wp-block-uagb-image--layout-overlay figure img{border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-0b3024da.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 158px;height: 158px;}.uagb-block-0b3024da.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-cad970aa{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-cad970aa > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-cad970aa{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;}.uagb-block-3094507a.wp-block-uagb-image--layout-default figure img{border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-3094507a.wp-block-uagb-image--layout-overlay figure img{border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-3094507a.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 158px;height: 158px;}.uagb-block-3094507a.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-efb0742a{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-efb0742a > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-efb0742a{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;}.uagb-block-1d7aabaf.wp-block-uagb-image--layout-default figure img{border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-1d7aabaf.wp-block-uagb-image--layout-overlay figure img{border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-1d7aabaf.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 158px;height: 158px;}.uagb-block-1d7aabaf.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-ec802e59{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-ec802e59 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-ec802e59{padding-top: 80px;padding-bottom: 80px;padding-left: 32px;padding-right: 32px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;background-clip: padding-box;}.wp-block-uagb-container.uagb-block-ec802e59::before{top: -0px;left: -0px;width: calc(100% + 0px + 0px);height: calc(100% + 0px + 0px);}.uagb-block-2eea1fe1 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-2eea1fe1.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 32px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-2eea1fe1.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-2eea1fe1.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-2eea1fe1.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-2eea1fe1 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-2eea1fe1 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-2eea1fe1 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-2eea1fe1 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-2eea1fe1 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-2eea1fe1.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-2eea1fe1 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-2eea1fe1.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-2eea1fe1 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-2eea1fe1 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-2eea1fe1.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-aba0ff05.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: center;align-items: center;}.wp-block-uagb-buttons .uagb-block-cc41c321.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-style: none;}.wp-block-uagb-buttons .uagb-block-63f00eb8.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-top-width: 1px;border-left-width: 1px;border-right-width: 1px;border-bottom-width: 1px;border-top-left-radius: 4px;border-top-right-radius: 4px;border-bottom-left-radius: 4px;border-bottom-right-radius: 4px;border-style: solid;border-color: #ffffff;}}@media only screen and (max-width: 767px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-5657136f{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-5657136f > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-5657136f{padding-top: 64px;padding-bottom: 64px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;background-color: var(--ast-global-color-5);;}.uagb-block-48b77c69.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 28px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-48b77c69.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-48b77c69.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-48b77c69.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-48b77c69 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-48b77c69 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-48b77c69.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-48b77c69 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-48b77c69 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-48b77c69 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-48b77c69.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-48b77c69 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-48b77c69.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-48b77c69 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-48b77c69 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-48b77c69.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-7b812963{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-7b812963 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 36px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-7b812963{padding-top: 64px;padding-bottom: 64px;padding-left: 24px;padding-right: 24px;margin-top:  !important;margin-bottom:  !important;row-gap: 36px;column-gap: 0px;background-color: var(--ast-global-color-4);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-995656b7{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-995656b7 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 36px;}.wp-block-uagb-container.uagb-block-995656b7{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 36px;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-edc15cc2{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-edc15cc2 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-edc15cc2{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;flex-wrap: wrap;}.uagb-block-50f73676.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-50f73676.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-50f73676.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-50f73676 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-50f73676 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-50f73676.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-50f73676 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-50f73676 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-50f73676 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-50f73676.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-50f73676 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-50f73676.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-50f73676 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-50f73676 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-50f73676.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-1680ca56{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-1680ca56 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 20px;}.wp-block-uagb-container.uagb-block-1680ca56{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 20px;flex-wrap: wrap;}.uagb-block-670f764d.wp-block-uagb-image--layout-default figure img{border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-670f764d.wp-block-uagb-image--layout-overlay figure img{border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-670f764d.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 250px;}.uagb-block-670f764d.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-670f764d .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-04196942.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-04196942.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-04196942.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-04196942 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-04196942 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-04196942.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-04196942 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-04196942 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-04196942 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-04196942.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-04196942 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-04196942.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-04196942 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-04196942 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-04196942.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-0953f8e4{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-0953f8e4 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 36px;}.wp-block-uagb-container.uagb-block-0953f8e4{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 36px;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-73451b7a{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-73451b7a > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-73451b7a{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;flex-wrap: wrap;}.uagb-block-ace2e526.wp-block-uagb-image--layout-default figure img{border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-ace2e526.wp-block-uagb-image--layout-overlay figure img{border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-ace2e526.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 250px;}.uagb-block-ace2e526.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-ace2e526 .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-652f6e85.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-652f6e85.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-652f6e85.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-652f6e85 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-652f6e85 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-652f6e85.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-652f6e85 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-652f6e85 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-652f6e85 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-652f6e85.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-652f6e85 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-652f6e85.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-652f6e85 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-652f6e85 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-652f6e85.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-29ea1d4a{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-29ea1d4a > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-29ea1d4a{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;flex-wrap: wrap;}.uagb-block-71f8f880.wp-block-uagb-image--layout-default figure img{border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-71f8f880.wp-block-uagb-image--layout-overlay figure img{border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-71f8f880.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 250px;}.uagb-block-71f8f880.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;}.uagb-block-b7968360.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-b7968360.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-b7968360.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-b7968360 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-b7968360 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-b7968360.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-b7968360 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-b7968360 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-b7968360 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-b7968360.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-b7968360 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-b7968360.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-b7968360 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-b7968360 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-b7968360.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-91498726{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-91498726 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-91498726{padding-top: 64px;padding-bottom: 64px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;background-clip: padding-box;}.wp-block-uagb-container.uagb-block-91498726::before{top: -0px;left: -0px;width: calc(100% + 0px + 0px);height: calc(100% + 0px + 0px);} .uagb-block-e7b97723.wp-block-uagb-star-rating {flex-direction: row;justify-content: center;padding-top: 0px;padding-right: 0px;padding-bottom: 20px;padding-left: 0px;margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;} .uagb-block-e7b97723 .uag-star-rating__title {margin-bottom: 0;} .uagb-block-e7b97723 .uag-star-rating__title{margin-right: 10px;} .uagb-block-e7b97723 .uag-star-rating{font-size: 24px;}.uagb-block-927b94d5.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-927b94d5.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-927b94d5.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-927b94d5 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-927b94d5 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-927b94d5.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-927b94d5 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-927b94d5 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-927b94d5 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-927b94d5.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 20px;padding-left: 0px;}.uagb-block-927b94d5 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-927b94d5.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-927b94d5 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-927b94d5 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-927b94d5.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-6500537b.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 5px;margin-top: 12px;margin-left: 0px;margin-right: 0px;}.uagb-block-6500537b.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-6500537b.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-6500537b .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-6500537b .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-6500537b.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-6500537b .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-6500537b .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-6500537b .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-6500537b .uagb-ifb-content .uagb-ifb-image-content img{width: 48px;}.uagb-block-6500537b.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 48px;}.uagb-block-6500537b .uagb-ifb-content .uagb-ifb-left-title-image img{width: 48px;}.uagb-block-6500537b .uagb-ifb-content .uagb-ifb-right-title-image img{width: 48px;}.uagb-block-6500537b.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-af1c3188{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-af1c3188 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 36px;}.wp-block-uagb-container.uagb-block-af1c3188{padding-top: 64px;padding-bottom: 64px;padding-left: 24px;padding-right: 24px;margin-top:  !important;margin-bottom:  !important;row-gap: 36px;background-color: var(--ast-global-color-5);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-9527e0d6{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-9527e0d6 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-9527e0d6{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;align-items: stretch;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-f5bce098{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-f5bce098 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-f5bce098{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;flex-wrap: wrap;}.uagb-block-db00f262.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-db00f262.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-db00f262.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-db00f262 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-db00f262 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-db00f262.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-db00f262 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-db00f262 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-db00f262 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-db00f262 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-db00f262.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-db00f262 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-db00f262 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-db00f262.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-a84ca7d9{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-a84ca7d9 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-a84ca7d9{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;flex-wrap: wrap;}.uagb-block-8c6b6cf7.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-8c6b6cf7.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-8c6b6cf7.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-8c6b6cf7 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-8c6b6cf7 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-8c6b6cf7.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-8c6b6cf7 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-8c6b6cf7 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-8c6b6cf7 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-8c6b6cf7 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-8c6b6cf7.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-8c6b6cf7 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-8c6b6cf7 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-8c6b6cf7.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-eab9a597{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-eab9a597 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;flex-wrap: wrap;row-gap: 20px;}.wp-block-uagb-container.uagb-block-eab9a597{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 20px;align-items: stretch;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-aa320a5c{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-aa320a5c > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-aa320a5c{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;flex-wrap: wrap;}.uagb-block-02f6b38a.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 8px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-02f6b38a.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-02f6b38a.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-02f6b38a.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-02f6b38a .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-02f6b38a .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-02f6b38a.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-02f6b38a .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-02f6b38a .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-02f6b38a .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-02f6b38a.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-02f6b38a .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-02f6b38a.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-02f6b38a .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-02f6b38a .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-02f6b38a.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-e44ee0f1{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-e44ee0f1 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-e44ee0f1{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;flex-wrap: wrap;}.uagb-block-d077b586.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 8px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-d077b586.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-d077b586.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-d077b586.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-d077b586 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-d077b586 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-d077b586.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-d077b586 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-d077b586 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-d077b586 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-d077b586.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-d077b586 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-d077b586.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-d077b586 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-d077b586 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-d077b586.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-c17e7b55{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-c17e7b55 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-c17e7b55{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;flex-wrap: wrap;}.uagb-block-ce34d80a.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 8px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-ce34d80a.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-ce34d80a.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-ce34d80a.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-ce34d80a .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-ce34d80a .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-ce34d80a.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-ce34d80a .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-ce34d80a .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-ce34d80a .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-ce34d80a.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-ce34d80a .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-ce34d80a.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-ce34d80a .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-ce34d80a .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-ce34d80a.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-b8e9ac21{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-b8e9ac21 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 40px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-b8e9ac21{padding-top: 64px;padding-bottom: 64px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 40px;column-gap: 0px;background-color: var(--ast-global-color-4);;}.uagb-block-f71827e9.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-f71827e9.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-f71827e9.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-f71827e9.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-f71827e9 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-f71827e9 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-f71827e9.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-f71827e9 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-f71827e9 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-f71827e9 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-f71827e9.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-f71827e9 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-f71827e9.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-f71827e9 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-f71827e9 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-f71827e9.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-f19c72df{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-f19c72df > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;flex-wrap: wrap;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-f19c72df{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;align-items: stretch;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-37f5ce64{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-37f5ce64 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-37f5ce64{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;flex-wrap: wrap;}.uagb-block-c66822e3.wp-block-uagb-image--layout-default figure img{border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-c66822e3.wp-block-uagb-image--layout-overlay figure img{border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-c66822e3.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 250px;}.uagb-block-c66822e3.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-5a0c6506{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-5a0c6506 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-5a0c6506{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;flex-wrap: wrap;}.uagb-block-0b3024da.wp-block-uagb-image--layout-default figure img{border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-0b3024da.wp-block-uagb-image--layout-overlay figure img{border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-0b3024da.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 250px;}.uagb-block-0b3024da.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-cad970aa{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-cad970aa > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-cad970aa{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;flex-wrap: wrap;}.uagb-block-3094507a.wp-block-uagb-image--layout-default figure img{border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-3094507a.wp-block-uagb-image--layout-overlay figure img{border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-3094507a.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 250px;}.uagb-block-3094507a.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-efb0742a{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-efb0742a > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 24px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-efb0742a{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 0px;flex-wrap: wrap;}.uagb-block-1d7aabaf.wp-block-uagb-image--layout-default figure img{border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-1d7aabaf.wp-block-uagb-image--layout-overlay figure img{border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;border-style: none;}.uagb-block-1d7aabaf.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 250px;}.uagb-block-1d7aabaf.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-ec802e59{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-ec802e59 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-ec802e59{padding-top: 64px;padding-bottom: 64px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 0px;background-clip: padding-box;}.wp-block-uagb-container.uagb-block-ec802e59::before{top: -0px;left: -0px;width: calc(100% + 0px + 0px);height: calc(100% + 0px + 0px);}.uagb-block-2eea1fe1 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-2eea1fe1.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 32px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-2eea1fe1.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-2eea1fe1.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-2eea1fe1 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-2eea1fe1 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-2eea1fe1.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-2eea1fe1 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-2eea1fe1 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-2eea1fe1 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-2eea1fe1.uagb-infobox-icon-above-title{text-align: center;}.uagb-block-2eea1fe1.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-2eea1fe1 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-2eea1fe1.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-2eea1fe1 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-2eea1fe1 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-2eea1fe1.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-aba0ff05.uagb-buttons__outer-wrap .uagb-buttons__wrap {justify-content: center;align-items: center;}.wp-block-uagb-buttons .uagb-block-cc41c321.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-style: none;}.wp-block-uagb-buttons .uagb-block-63f00eb8.wp-block-button.is-style-outline .uagb-button__wrapper .wp-block-button__link.uagb-buttons-repeater{border-style: solid;border-color: #ffffff;}}";s:7:"content";s:12958:"
