<div class="wp-block-uagb-container uagb-block-573dc06d alignfull uagb-is-root-container"><div class="uagb-container-inner-blocks-wrap">
<div class="wp-block-uagb-info-box uagb-block-7edef7ac uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h2 class="uagb-ifb-title">Meet Our Talented Team</h2></div><p class="uagb-ifb-desc">Our passionate and dedicated team brings together a diverse range of skills and expertise to deliver exceptional results. From creative visionaries to meticulous strategists, we work seamlessly together to meet and exceed our clients' expectations.</p></div></div>



<div class="wp-block-uagb-container uagb-block-13533f4b">
<div class="wp-block-uagb-container uagb-block-ae135cd8">
<div class="wp-block-uagb-image aligncenter uagb-block-e48e6de7 wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-center"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/09/team-skip-04.jpg ,https://websitedemos.net/wp-content/uploads/2023/09/team-skip-04.jpg 780w, https://websitedemos.net/wp-content/uploads/2023/09/team-skip-04.jpg 360w" sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/09/team-skip-04.jpg" alt="" class="uag-image-77944" width="368" height="368" title="" loading="lazy"/></figure></div>



<div class="wp-block-uagb-container uagb-block-bbf7b6e6">
<div class="wp-block-uagb-info-box uagb-block-82b9f747 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h5 class="uagb-ifb-title">Jane Cooper</h5></div><p class="uagb-ifb-desc">CEO</p></div></div>



<div class="wp-block-uagb-icon-list uagb-block-90f378ae"><div class="uagb-icon-list__wrap">
<div class="wp-block-uagb-icon-list-child uagb-block-ed9967b6"><a target="_self" aria-label="List item" rel="noopener noreferrer" href="#"> </a><span class="uagb-icon-list__source-wrap"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 512 512"><path d="M504 256C504 119 393 8 256 8S8 119 8 256c0 123.8 90.69 226.4 209.3 245V327.7h-63V256h63v-54.64c0-62.15 37-96.48 93.67-96.48 27.14 0 55.52 4.84 55.52 4.84v61h-31.28c-30.8 0-40.41 19.12-40.41 38.73V256h68.78l-11 71.69h-57.78V501C413.3 482.4 504 379.8 504 256z"></path></svg></span></div>



<div class="wp-block-uagb-icon-list-child uagb-block-8968b5e9"><a target="_self" aria-label="" rel="noopener noreferrer" href="#"> </a><span class="uagb-icon-list__source-wrap"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 448 512"><path d="M224.1 141c-63.6 0-114.9 51.3-114.9 114.9s51.3 114.9 114.9 114.9S339 319.5 339 255.9 287.7 141 224.1 141zm0 189.6c-41.1 0-74.7-33.5-74.7-74.7s33.5-74.7 74.7-74.7 74.7 33.5 74.7 74.7-33.6 74.7-74.7 74.7zm146.4-194.3c0 14.9-12 26.8-26.8 26.8-14.9 0-26.8-12-26.8-26.8s12-26.8 26.8-26.8 26.8 12 26.8 26.8zm76.1 27.2c-1.7-35.9-9.9-67.7-36.2-93.9-26.2-26.2-58-34.4-93.9-36.2-37-2.1-147.9-2.1-184.9 0-35.8 1.7-67.6 9.9-93.9 36.1s-34.4 58-36.2 93.9c-2.1 37-2.1 147.9 0 184.9 1.7 35.9 9.9 67.7 36.2 93.9s58 34.4 93.9 36.2c37 2.1 147.9 2.1 184.9 0 35.9-1.7 67.7-9.9 93.9-36.2 26.2-26.2 34.4-58 36.2-93.9 2.1-37 2.1-147.8 0-184.8zM398.8 388c-7.8 19.6-22.9 34.7-42.6 42.6-29.5 11.7-99.5 9-132.1 9s-102.7 2.6-132.1-9c-19.6-7.8-34.7-22.9-42.6-42.6-11.7-29.5-9-99.5-9-132.1s-2.6-102.7 9-132.1c7.8-19.6 22.9-34.7 42.6-42.6 29.5-11.7 99.5-9 132.1-9s102.7-2.6 132.1 9c19.6 7.8 34.7 22.9 42.6 42.6 11.7 29.5 9 99.5 9 132.1s2.7 102.7-9 132.1z"></path></svg></span></div>



<div class="wp-block-uagb-icon-list-child uagb-block-0a51137b"><a target="_self" aria-label="List item" rel="noopener noreferrer" href="#"> </a><span class="uagb-icon-list__source-wrap"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 512 512"><path d="M459.4 151.7c.325 4.548 .325 9.097 .325 13.65 0 138.7-105.6 298.6-298.6 298.6-59.45 0-114.7-17.22-161.1-47.11 8.447 .974 16.57 1.299 25.34 1.299 49.06 0 94.21-16.57 130.3-44.83-46.13-.975-84.79-31.19-98.11-72.77 6.498 .974 12.99 1.624 19.82 1.624 9.421 0 18.84-1.3 27.61-3.573-48.08-9.747-84.14-51.98-84.14-102.1v-1.299c13.97 7.797 30.21 12.67 47.43 13.32-28.26-18.84-46.78-51.01-46.78-87.39 0-19.49 5.197-37.36 14.29-52.95 51.65 63.67 129.3 105.3 216.4 109.8-1.624-7.797-2.599-15.92-2.599-24.04 0-57.83 46.78-104.9 104.9-104.9 30.21 0 57.5 12.67 76.67 33.14 23.72-4.548 46.46-13.32 66.6-25.34-7.798 24.37-24.37 44.83-46.13 57.83 21.12-2.273 41.58-8.122 60.43-16.24-14.29 20.79-32.16 39.31-52.63 54.25z"></path></svg></span></div>



<div class="wp-block-uagb-icon-list-child uagb-block-106ef350"><a target="_self" aria-label="List item" rel="noopener noreferrer" href="#"> </a><span class="uagb-icon-list__source-wrap"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 576 512"><path d="M549.7 124.1c-6.281-23.65-24.79-42.28-48.28-48.6C458.8 64 288 64 288 64S117.2 64 74.63 75.49c-23.5 6.322-42 24.95-48.28 48.6-11.41 42.87-11.41 132.3-11.41 132.3s0 89.44 11.41 132.3c6.281 23.65 24.79 41.5 48.28 47.82C117.2 448 288 448 288 448s170.8 0 213.4-11.49c23.5-6.321 42-24.17 48.28-47.82 11.41-42.87 11.41-132.3 11.41-132.3s0-89.44-11.41-132.3zm-317.5 213.5V175.2l142.7 81.21-142.7 81.2z"></path></svg></span></div>
</div></div>
</div>
</div>



<div class="wp-block-uagb-container uagb-block-3bd77aa2">
<div class="wp-block-uagb-image aligncenter uagb-block-94df08a9 wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-center"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/09/team-skip-25.jpg ,https://websitedemos.net/wp-content/uploads/2023/09/team-skip-25.jpg 780w, https://websitedemos.net/wp-content/uploads/2023/09/team-skip-25.jpg 360w" sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/09/team-skip-25.jpg" alt="" class="uag-image-78349" width="368" height="368" title="" loading="lazy"/></figure></div>



<div class="wp-block-uagb-container uagb-block-7ffa1f27">
<div class="wp-block-uagb-info-box uagb-block-e6dd03d4 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h5 class="uagb-ifb-title">Wade Warren</h5></div><p class="uagb-ifb-desc">Director</p></div></div>



<div class="wp-block-uagb-icon-list uagb-block-9758af8c"><div class="uagb-icon-list__wrap">
<div class="wp-block-uagb-icon-list-child uagb-block-12947505"><a target="_self" aria-label="List item" rel="noopener noreferrer" href="#"> </a><span class="uagb-icon-list__source-wrap"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 512 512"><path d="M504 256C504 119 393 8 256 8S8 119 8 256c0 123.8 90.69 226.4 209.3 245V327.7h-63V256h63v-54.64c0-62.15 37-96.48 93.67-96.48 27.14 0 55.52 4.84 55.52 4.84v61h-31.28c-30.8 0-40.41 19.12-40.41 38.73V256h68.78l-11 71.69h-57.78V501C413.3 482.4 504 379.8 504 256z"></path></svg></span></div>



<div class="wp-block-uagb-icon-list-child uagb-block-733db7aa"><a target="_self" aria-label="" rel="noopener noreferrer" href="#"> </a><span class="uagb-icon-list__source-wrap"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 448 512"><path d="M224.1 141c-63.6 0-114.9 51.3-114.9 114.9s51.3 114.9 114.9 114.9S339 319.5 339 255.9 287.7 141 224.1 141zm0 189.6c-41.1 0-74.7-33.5-74.7-74.7s33.5-74.7 74.7-74.7 74.7 33.5 74.7 74.7-33.6 74.7-74.7 74.7zm146.4-194.3c0 14.9-12 26.8-26.8 26.8-14.9 0-26.8-12-26.8-26.8s12-26.8 26.8-26.8 26.8 12 26.8 26.8zm76.1 27.2c-1.7-35.9-9.9-67.7-36.2-93.9-26.2-26.2-58-34.4-93.9-36.2-37-2.1-147.9-2.1-184.9 0-35.8 1.7-67.6 9.9-93.9 36.1s-34.4 58-36.2 93.9c-2.1 37-2.1 147.9 0 184.9 1.7 35.9 9.9 67.7 36.2 93.9s58 34.4 93.9 36.2c37 2.1 147.9 2.1 184.9 0 35.9-1.7 67.7-9.9 93.9-36.2 26.2-26.2 34.4-58 36.2-93.9 2.1-37 2.1-147.8 0-184.8zM398.8 388c-7.8 19.6-22.9 34.7-42.6 42.6-29.5 11.7-99.5 9-132.1 9s-102.7 2.6-132.1-9c-19.6-7.8-34.7-22.9-42.6-42.6-11.7-29.5-9-99.5-9-132.1s-2.6-102.7 9-132.1c7.8-19.6 22.9-34.7 42.6-42.6 29.5-11.7 99.5-9 132.1-9s102.7-2.6 132.1 9c19.6 7.8 34.7 22.9 42.6 42.6 11.7 29.5 9 99.5 9 132.1s2.7 102.7-9 132.1z"></path></svg></span></div>



<div class="wp-block-uagb-icon-list-child uagb-block-ef67e107"><a target="_self" aria-label="List item" rel="noopener noreferrer" href="#"> </a><span class="uagb-icon-list__source-wrap"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 512 512"><path d="M459.4 151.7c.325 4.548 .325 9.097 .325 13.65 0 138.7-105.6 298.6-298.6 298.6-59.45 0-114.7-17.22-161.1-47.11 8.447 .974 16.57 1.299 25.34 1.299 49.06 0 94.21-16.57 130.3-44.83-46.13-.975-84.79-31.19-98.11-72.77 6.498 .974 12.99 1.624 19.82 1.624 9.421 0 18.84-1.3 27.61-3.573-48.08-9.747-84.14-51.98-84.14-102.1v-1.299c13.97 7.797 30.21 12.67 47.43 13.32-28.26-18.84-46.78-51.01-46.78-87.39 0-19.49 5.197-37.36 14.29-52.95 51.65 63.67 129.3 105.3 216.4 109.8-1.624-7.797-2.599-15.92-2.599-24.04 0-57.83 46.78-104.9 104.9-104.9 30.21 0 57.5 12.67 76.67 33.14 23.72-4.548 46.46-13.32 66.6-25.34-7.798 24.37-24.37 44.83-46.13 57.83 21.12-2.273 41.58-8.122 60.43-16.24-14.29 20.79-32.16 39.31-52.63 54.25z"></path></svg></span></div>



<div class="wp-block-uagb-icon-list-child uagb-block-fa7ea295"><a target="_self" aria-label="List item" rel="noopener noreferrer" href="#"> </a><span class="uagb-icon-list__source-wrap"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 576 512"><path d="M549.7 124.1c-6.281-23.65-24.79-42.28-48.28-48.6C458.8 64 288 64 288 64S117.2 64 74.63 75.49c-23.5 6.322-42 24.95-48.28 48.6-11.41 42.87-11.41 132.3-11.41 132.3s0 89.44 11.41 132.3c6.281 23.65 24.79 41.5 48.28 47.82C117.2 448 288 448 288 448s170.8 0 213.4-11.49c23.5-6.321 42-24.17 48.28-47.82 11.41-42.87 11.41-132.3 11.41-132.3s0-89.44-11.41-132.3zm-317.5 213.5V175.2l142.7 81.21-142.7 81.2z"></path></svg></span></div>
</div></div>
</div>
</div>



<div class="wp-block-uagb-container uagb-block-b30185e1">
<div class="wp-block-uagb-image aligncenter uagb-block-3f92ce4c wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-center"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/09/team-skip-06.jpg ,https://websitedemos.net/wp-content/uploads/2023/09/team-skip-06.jpg 780w, https://websitedemos.net/wp-content/uploads/2023/09/team-skip-06.jpg 360w" sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/09/team-skip-06.jpg" alt="" class="uag-image-77947" width="368" height="368" title="" loading="lazy"/></figure></div>



<div class="wp-block-uagb-container uagb-block-c15bdf8e">
<div class="wp-block-uagb-info-box uagb-block-a0382e85 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h5 class="uagb-ifb-title">Esther Howard</h5></div><p class="uagb-ifb-desc">Manager</p></div></div>



<div class="wp-block-uagb-icon-list uagb-block-472091b1"><div class="uagb-icon-list__wrap">
<div class="wp-block-uagb-icon-list-child uagb-block-c759762c"><a target="_self" aria-label="List item" rel="noopener noreferrer" href="#"> </a><span class="uagb-icon-list__source-wrap"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 512 512"><path d="M504 256C504 119 393 8 256 8S8 119 8 256c0 123.8 90.69 226.4 209.3 245V327.7h-63V256h63v-54.64c0-62.15 37-96.48 93.67-96.48 27.14 0 55.52 4.84 55.52 4.84v61h-31.28c-30.8 0-40.41 19.12-40.41 38.73V256h68.78l-11 71.69h-57.78V501C413.3 482.4 504 379.8 504 256z"></path></svg></span></div>



<div class="wp-block-uagb-icon-list-child uagb-block-b4b004d8"><a target="_self" aria-label="" rel="noopener noreferrer" href="#"> </a><span class="uagb-icon-list__source-wrap"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 448 512"><path d="M224.1 141c-63.6 0-114.9 51.3-114.9 114.9s51.3 114.9 114.9 114.9S339 319.5 339 255.9 287.7 141 224.1 141zm0 189.6c-41.1 0-74.7-33.5-74.7-74.7s33.5-74.7 74.7-74.7 74.7 33.5 74.7 74.7-33.6 74.7-74.7 74.7zm146.4-194.3c0 14.9-12 26.8-26.8 26.8-14.9 0-26.8-12-26.8-26.8s12-26.8 26.8-26.8 26.8 12 26.8 26.8zm76.1 27.2c-1.7-35.9-9.9-67.7-36.2-93.9-26.2-26.2-58-34.4-93.9-36.2-37-2.1-147.9-2.1-184.9 0-35.8 1.7-67.6 9.9-93.9 36.1s-34.4 58-36.2 93.9c-2.1 37-2.1 147.9 0 184.9 1.7 35.9 9.9 67.7 36.2 93.9s58 34.4 93.9 36.2c37 2.1 147.9 2.1 184.9 0 35.9-1.7 67.7-9.9 93.9-36.2 26.2-26.2 34.4-58 36.2-93.9 2.1-37 2.1-147.8 0-184.8zM398.8 388c-7.8 19.6-22.9 34.7-42.6 42.6-29.5 11.7-99.5 9-132.1 9s-102.7 2.6-132.1-9c-19.6-7.8-34.7-22.9-42.6-42.6-11.7-29.5-9-99.5-9-132.1s-2.6-102.7 9-132.1c7.8-19.6 22.9-34.7 42.6-42.6 29.5-11.7 99.5-9 132.1-9s102.7-2.6 132.1 9c19.6 7.8 34.7 22.9 42.6 42.6 11.7 29.5 9 99.5 9 132.1s2.7 102.7-9 132.1z"></path></svg></span></div>



<div class="wp-block-uagb-icon-list-child uagb-block-ea9aac1d"><a target="_self" aria-label="List item" rel="noopener noreferrer" href="#"> </a><span class="uagb-icon-list__source-wrap"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 512 512"><path d="M459.4 151.7c.325 4.548 .325 9.097 .325 13.65 0 138.7-105.6 298.6-298.6 298.6-59.45 0-114.7-17.22-161.1-47.11 8.447 .974 16.57 1.299 25.34 1.299 49.06 0 94.21-16.57 130.3-44.83-46.13-.975-84.79-31.19-98.11-72.77 6.498 .974 12.99 1.624 19.82 1.624 9.421 0 18.84-1.3 27.61-3.573-48.08-9.747-84.14-51.98-84.14-102.1v-1.299c13.97 7.797 30.21 12.67 47.43 13.32-28.26-18.84-46.78-51.01-46.78-87.39 0-19.49 5.197-37.36 14.29-52.95 51.65 63.67 129.3 105.3 216.4 109.8-1.624-7.797-2.599-15.92-2.599-24.04 0-57.83 46.78-104.9 104.9-104.9 30.21 0 57.5 12.67 76.67 33.14 23.72-4.548 46.46-13.32 66.6-25.34-7.798 24.37-24.37 44.83-46.13 57.83 21.12-2.273 41.58-8.122 60.43-16.24-14.29 20.79-32.16 39.31-52.63 54.25z"></path></svg></span></div>



<div class="wp-block-uagb-icon-list-child uagb-block-1be5407c"><a target="_self" aria-label="List item" rel="noopener noreferrer" href="#"> </a><span class="uagb-icon-list__source-wrap"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 576 512"><path d="M549.7 124.1c-6.281-23.65-24.79-42.28-48.28-48.6C458.8 64 288 64 288 64S117.2 64 74.63 75.49c-23.5 6.322-42 24.95-48.28 48.6-11.41 42.87-11.41 132.3-11.41 132.3s0 89.44 11.41 132.3c6.281 23.65 24.79 41.5 48.28 47.82C117.2 448 288 448 288 448s170.8 0 213.4-11.49c23.5-6.321 42-24.17 48.28-47.82 11.41-42.87 11.41-132.3 11.41-132.3s0-89.44-11.41-132.3zm-317.5 213.5V175.2l142.7 81.21-142.7 81.2z"></path></svg></span></div>
</div></div>
</div>
</div>
</div>
</div></div>
";}s:8:"id-76419";a:10:{s:5:"title";s:7:"Team 09";s:3:"url";s:46:"https://websitedemos.net/astra-blocks/team-09/";s:3:"tag";a:0:{}s:8:"category";i:829;s:16:"primary-category";s:0:"";s:4:"type";s:5:"block";s:12:"page-builder";s:9:"gutenberg";s:16:"required-plugins";a:0:{}s:10:"stylesheet";s:134155:".wp-block-uagb-container{display:flex;position:relative;box-sizing:border-box;transition-property:box-shadow;transition-duration:0.2s;transition-timing-function:ease}.wp-block-uagb-container .spectra-container-link-overlay{bottom:0;left:0;position:absolute;right:0;top:0;z-index:10}.wp-block-uagb-container.uagb-is-root-container{margin-left:auto;margin-right:auto}.wp-block-uagb-container.alignfull.uagb-is-root-container .uagb-container-inner-blocks-wrap{display:flex;position:relative;box-sizing:border-box;margin-left:auto !important;margin-right:auto !important}.wp-block-uagb-container .uagb-container__video-wrap{height:100%;width:100%;top:0;left:0;position:absolute;overflow:hidden;-webkit-transition:opacity 1s;-o-transition:opacity 1s;transition:opacity 1s}.wp-block-uagb-container .uagb-container__video-wrap video{max-width:100%;width:100%;height:100%;margin:0;line-height:1;border:none;display:inline-block;vertical-align:baseline;-o-object-fit:cover;object-fit:cover;background-size:cover}.st-block-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap>*:not(.wp-block-uagb-container):not(.wp-block-uagb-column):not(.wp-block-uagb-container):not(.wp-block-uagb-section):not(.uagb-container__shape):not(.uagb-container__video-wrap):not(.wp-block-spectra-pro-register):not(.wp-block-spectra-pro-login):not(.uagb-slider-container):not(.spectra-image-gallery__control-lightbox),.st-block-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap,.st-block-container .wp-block-uagb-container>*:not(.wp-block-uagb-container):not(.wp-block-uagb-column):not(.wp-block-uagb-container):not(.wp-block-uagb-section):not(.uagb-container__shape):not(.uagb-container__video-wrap):not(.wp-block-uagb-image):not(.wp-block-spectra-pro-register):not(.wp-block-spectra-pro-login):not(.uagb-slider-container):not(.spectra-container-link-overlay):not(.spectra-image-gallery__control-lightbox):not(.wp-block-uagb-lottie):not(.uagb-faq__outer-wrap){min-width:unset !important;width:100%;position:relative}.st-block-container .ast-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap>.wp-block-uagb-container>ul,.st-block-container .ast-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap>.wp-block-uagb-container ol,.st-block-container .ast-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap>ul,.st-block-container .ast-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap ol{max-width:-webkit-fill-available;margin-block-start:0;margin-block-end:0;margin-left:20px}.ast-plain-container .editor-styles-wrapper .block-editor-block-list__layout.is-root-container .uagb-is-root-container.wp-block-uagb-container.alignwide{margin-left:auto;margin-right:auto}.uagb-container__shape{overflow:hidden;position:absolute;left:0;width:100%;line-height:0;direction:ltr}.uagb-container__shape-top{top:-3px}.uagb-container__shape-bottom{bottom:-3px}.uagb-container__shape.uagb-container__invert.uagb-container__shape-bottom,.uagb-container__shape.uagb-container__invert.uagb-container__shape-top{-webkit-transform:rotate(180deg);-ms-transform:rotate(180deg);transform:rotate(180deg)}.uagb-container__shape.uagb-container__shape-flip svg{transform:translateX(-50%) rotateY(180deg)}.uagb-container__shape svg{display:block;width:-webkit-calc(100% + 1.3px);width:calc(100% + 1.3px);position:relative;left:50%;-webkit-transform:translateX(-50%);-ms-transform:translateX(-50%);transform:translateX(-50%)}.uagb-container__shape .uagb-container__shape-fill{-webkit-transform-origin:center;-ms-transform-origin:center;transform-origin:center;-webkit-transform:rotateY(0deg);transform:rotateY(0deg)}.uagb-container__shape.uagb-container__shape-above-content{z-index:9;pointer-events:none}.nv-single-page-wrap .nv-content-wrap.entry-content .wp-block-uagb-container.alignfull{margin-left:calc(50% - 50vw);margin-right:calc(50% - 50vw)}@media only screen and (max-width: 767px){.wp-block-uagb-container .wp-block-uagb-advanced-heading{width:-webkit-fill-available !important}}
.wp-block-uagb-image{display:flex}.wp-block-uagb-image__figure{position:relative;display:flex;flex-direction:column;max-width:100%;height:auto;margin:0}.wp-block-uagb-image__figure img{height:auto;display:flex;max-width:100%;transition:box-shadow 0.2s ease}.wp-block-uagb-image__figure>a{display:inline-block}.wp-block-uagb-image__figure figcaption{text-align:center;margin-top:0.5em;margin-bottom:1em}.wp-block-uagb-image--align-left{text-align:left}.wp-block-uagb-image--align-right{text-align:right}.wp-block-uagb-image--align-center{text-align:center}.wp-block-uagb-image--align-full .wp-block-uagb-image__figure{margin-left:calc(50% - 50vw);margin-right:calc(50% - 50vw);max-width:100vw;width:100vw;height:auto}.wp-block-uagb-image--align-full .wp-block-uagb-image__figure img{height:auto;width:100% !important}.wp-block-uagb-image--align-wide .wp-block-uagb-image__figure img{height:auto;width:100%}.wp-block-uagb-image--layout-overlay__color-wrapper{position:absolute;left:0;top:0;right:0;bottom:0;opacity:0.2;background:rgba(0,0,0,0.5);transition:opacity 0.35s ease-in-out}.wp-block-uagb-image--layout-overlay-link{position:absolute;left:0;right:0;bottom:0;top:0}.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity:1}.wp-block-uagb-image--layout-overlay__inner{position:absolute;left:15px;right:15px;bottom:15px;top:15px;display:flex;align-items:center;justify-content:center;flex-direction:column;border-color:#fff;transition:0.35s ease-in-out}.wp-block-uagb-image--layout-overlay__inner.top-left,.wp-block-uagb-image--layout-overlay__inner.top-center,.wp-block-uagb-image--layout-overlay__inner.top-right{justify-content:flex-start}.wp-block-uagb-image--layout-overlay__inner.bottom-left,.wp-block-uagb-image--layout-overlay__inner.bottom-center,.wp-block-uagb-image--layout-overlay__inner.bottom-right{justify-content:flex-end}.wp-block-uagb-image--layout-overlay__inner.top-left,.wp-block-uagb-image--layout-overlay__inner.center-left,.wp-block-uagb-image--layout-overlay__inner.bottom-left{align-items:flex-start}.wp-block-uagb-image--layout-overlay__inner.top-right,.wp-block-uagb-image--layout-overlay__inner.center-right,.wp-block-uagb-image--layout-overlay__inner.bottom-right{align-items:flex-end}.wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{color:#fff;transition:transform 0.35s, opacity 0.35s ease-in-out;transform:translate3d(0, 24px, 0)}.wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width:30%;border-top-width:2px;border-top-color:#fff;border-top-style:solid;margin-bottom:10px;opacity:0;transition:transform 0.4s, opacity 0.4s ease-in-out;transform:translate3d(0, 30px, 0)}.wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity:0;overflow:visible;color:#fff;transition:transform 0.45s, opacity 0.45s ease-in-out;transform:translate3d(0, 35px, 0)}.wp-block-uagb-image--layout-overlay__inner:hover .uagb-image-heading,.wp-block-uagb-image--layout-overlay__inner:hover .uagb-image-separator,.wp-block-uagb-image--layout-overlay__inner:hover .uagb-image-caption{opacity:1;transform:translate3d(0, 0, 0)}.wp-block-uagb-image--effect-zoomin .wp-block-uagb-image__figure img,.wp-block-uagb-image--effect-zoomin .wp-block-uagb-image__figure .wp-block-uagb-image--layout-overlay__color-wrapper{transform:scale(1);transition:transform 0.35s ease-in-out}.wp-block-uagb-image--effect-zoomin .wp-block-uagb-image__figure:hover img,.wp-block-uagb-image--effect-zoomin .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{transform:scale(1.05)}.wp-block-uagb-image--effect-slide .wp-block-uagb-image__figure img,.wp-block-uagb-image--effect-slide .wp-block-uagb-image__figure .wp-block-uagb-image--layout-overlay__color-wrapper{width:calc(100% + 40px) !important;max-width:none !important;transform:translate3d(-40px, 0, 0);transition:transform 0.35s ease-in-out}.wp-block-uagb-image--effect-slide .wp-block-uagb-image__figure:hover img,.wp-block-uagb-image--effect-slide .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{transform:translate3d(0, 0, 0)}.wp-block-uagb-image--effect-grayscale img{filter:grayscale(0%);transition:0.35s ease-in-out}.wp-block-uagb-image--effect-grayscale:hover img{filter:grayscale(100%)}.wp-block-uagb-image--effect-blur img{filter:blur(0);transition:0.35s ease-in-out}.wp-block-uagb-image--effect-blur:hover img{filter:blur(3px)}
.uagb-ifb-content>svg *{-webkit-transition:all 0.2s;-o-transition:all 0.2s;transition:all 0.2s}.uagb-ifb-content>svg,.uagb-ifb-content{display:inline-block}.uagb-ifb-content>svg{vertical-align:middle;width:inherit;height:inherit;font-style:initial}.uagb-ifb-content .uagb-ifb-icon-wrap svg{box-sizing:content-box;width:inherit;height:inherit}.uagb-ifb-button-wrapper:empty{display:none}div.uagb-ifb-button-wrapper a.uagb-infobox-cta-link,div.uagb-ifb-cta a.uagb-infobox-cta-link,.entry .entry-content a.uagb-infobox-cta-link,a.uagb-infobox-link-wrap,.entry .entry-content a.uagb-infobox-link-wrap{text-decoration:none;align-items:center}.uagb-infobox-icon-left-title.uagb-infobox-image-valign-middle .uagb-ifb-title-wrap,.uagb-infobox-icon-right-title.uagb-infobox-image-valign-middle .uagb-ifb-title-wrap,.uagb-infobox-image-valign-middle .uagb-ifb-icon-wrap,.uagb-infobox-image-valign-middle .uagb-ifb-image-content,.uagb-infobox-icon-left.uagb-infobox-image-valign-middle .uagb-ifb-content,.uagb-infobox-icon-right.uagb-infobox-image-valign-middle .uagb-ifb-content{-ms-flex-item-align:center;-webkit-align-self:center;align-self:center}.uagb-infobox-icon-left-title.uagb-infobox-image-valign-top .uagb-ifb-title-wrap,.uagb-infobox-icon-right-title.uagb-infobox-image-valign-top .uagb-ifb-title-wrap,.uagb-infobox-image-valign-top .uagb-ifb-icon-wrap,.uagb-infobox-image-valign-top .uagb-ifb-image-content,.uagb-infobox-icon-left.uagb-infobox-image-valign-top .uagb-ifb-content,.uagb-infobox-icon-right.uagb-infobox-image-valign-top .uagb-ifb-content{-webkit-align-self:self-start;align-self:self-start}.uagb-infobox-left{justify-content:flex-start;text-align:left;-webkit-box-pack:start;-ms-flex-pack:start;-webkit-justify-content:flex-start;-moz-box-pack:start}.uagb-infobox-center{justify-content:center;text-align:center;-webkit-box-pack:center;-ms-flex-pack:center;-webkit-justify-content:center;-moz-box-pack:center}.uagb-infobox-right{justify-content:flex-end;text-align:right;-webkit-box-pack:end;-ms-flex-pack:end;-webkit-justify-content:flex-end;-moz-box-pack:end}.uagb-infobox-icon-above-title.uagb-infobox__content-wrap,.uagb-infobox-icon-below-title.uagb-infobox__content-wrap{display:block;width:100%}.uagb-infobox-icon-left-title .uagb-ifb-content>svg,.uagb-infobox-icon-left .uagb-ifb-content>svg{margin-right:10px}.uagb-infobox-icon-right-title .uagb-ifb-content>svg,.uagb-infobox-icon-right .uagb-ifb-content>svg{margin-left:10px}.uagb-infobox-icon-left.uagb-infobox__content-wrap,.uagb-infobox-icon-right.uagb-infobox__content-wrap,.uagb-infobox-icon-left-title .uagb-ifb-left-title-image,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image{display:-webkit-box;display:-ms-flexbox;display:-webkit-flex;display:-moz-box;display:flex;-js-display:flex}.uagb-infobox-icon-left-title .uagb-ifb-left-title-image .uagb-ifb-image-content,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image .uagb-ifb-image-content,.uagb-infobox-icon-left .uagb-ifb-image-content,.uagb-infobox-icon-right .uagb-ifb-image-content{flex-shrink:0;line-height:0}.uagb-infobox-icon-left-title .uagb-ifb-left-title-image .uagb-ifb-title-wrap,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image .uagb-ifb-title-wrap,.uagb-infobox-icon-left .uagb-ifb-content,.uagb-infobox-icon-right .uagb-ifb-content{flex-grow:1}.uagb-infobox-icon-right.uagb-infobox__content-wrap,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image{-webkit-box-pack:end;-ms-flex-pack:end;-webkit-justify-content:flex-end;-moz-box-pack:end;justify-content:flex-end}.uagb-ifb-content img{position:relative;display:inline-block;line-height:0;width:auto;height:auto !important;max-width:100%;border-radius:inherit;-webkit-box-sizing:content-box;-moz-box-sizing:content-box;-webkit-border-radius:inherit}.uagb-infobox-module-link{position:absolute;top:0;right:0;bottom:0;left:0;z-index:4;width:100%;height:100%}.uagb-edit-mode .uagb-infobox-module-link{z-index:2}.uagb-infobox-link-icon-after{margin-right:0;margin-left:5px}.uagb-infobox-link-icon-before{margin-right:5px;margin-left:0}.uagb-infobox-link-icon{-webkit-transition:all 200ms linear;transition:all 200ms linear}.uagb-infobox__content-wrap{box-sizing:border-box;position:relative;width:100%;word-break:break-word;z-index:1}.uagb-ifb-separator{display:inline-block;margin:0;border-top-color:#333;border-top-style:solid;border-top-width:2px;line-height:0}.uagb-ifb-button-wrapper{line-height:1}.uagb-ifb-button-wrapper.uagb-ifb-button-type-text .uagb-infobox-cta-link.wp-block-button__link{background-color:unset;border:none}.uagb-ifb-button-wrapper.uagb-ifb-button-type-text .uagb-infobox-cta-link.wp-block-button__link:hover{background-color:unset;border-color:unset}.uagb-ifb-button-wrapper .uagb-infobox-cta-link{cursor:pointer}.uagb-ifb-button-wrapper .wp-block-button__link svg{fill:currentColor}.uagb-infobox__content-wrap a{-webkit-box-shadow:none;box-shadow:none;text-decoration:none}.uagb-ifb-title-wrap{width:100%}.uagb-ifb-title{margin-block-start:0}.uagb-ifb-title-wrap .uagb-ifb-title-prefix{display:block;padding:0;margin:0}.uagb-infobox__content-wrap.uagb-infobox__content-wrap{position:relative}.uagb-ifb-content{width:100%}.uagb-infobox__content-wrap.uagb-infobox,.uagb-ifb-content,.uagb-ifb-title-wrap,.uagb-ifb-title-prefix *,svg.dashicon.dashicons-upload{z-index:1}a.uagb-infobox-link-wrap{color:inherit}.uagb-ifb-content p:empty{display:none}.uagb-infobox__content-wrap .uagb-ifb-content img{display:inline-block;max-width:100%}.uagb-infobox__content-wrap .uagb-ifb-content svg{display:inline-block}.uagb-infobox__content-wrap .uagb-ifb-icon-wrap,.uagb-infobox-icon-left .uagb-ifb-image-content,.uagb-infobox-icon-right .uagb-ifb-image-content{box-sizing:content-box}.uagb-infobox-cta-link>svg{vertical-align:middle;width:15px;height:15px;font-size:15px}.uagb-infobox-cta-link{display:inline-flex}.block-editor-page #wpwrap .uagb-infobox-cta-link svg,.uagb-infobox-cta-link svg{font-style:normal}.uagb-infobox-icon-left-title .uagb-ifb-icon-wrap,.uagb-infobox-icon-left .uagb-ifb-icon-wrap{margin-right:10px;line-height:0}.uagb-infobox-icon-right-title .uagb-ifb-icon-wrap,.uagb-infobox-icon-right .uagb-ifb-icon-wrap{margin-left:10px;line-height:0}.uagb-infobox-icon-left .uagb-ifb-left-right-wrap,.uagb-infobox-icon-right .uagb-ifb-left-right-wrap,.uagb-infobox-icon-left-title .uagb-ifb-left-title-image,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image{display:-webkit-box;display:-ms-flexbox;display:flex}.uagb-infobox-icon-right .uagb-ifb-left-right-wrap,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image{-webkit-box-pack:end;-ms-flex-pack:end;-webkit-justify-content:flex-end;-moz-box-pack:end;justify-content:flex-end}a.uagb-infbox__link-to-all{position:absolute;top:0;left:0;z-index:3;width:100%;height:100%;box-shadow:none;text-decoration:none;-webkit-box-shadow:none}@media only screen and (max-width: 976px){.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-image-content{padding:0;margin-bottom:20px}.uagb-infobox-stacked-tablet.uagb-reverse-order-tablet.uagb-infobox__content-wrap{display:-webkit-inline-box;display:-ms-inline-flexbox;display:-webkit-inline-flex;display:-moz-inline-box;display:inline-flex;flex-direction:column-reverse;-js-display:inline-flex;-webkit-box-orient:vertical;-webkit-box-direction:reverse;-ms-flex-direction:column-reverse;-webkit-flex-direction:column-reverse;-moz-box-orient:vertical;-moz-box-direction:reverse}.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-content,.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-icon-wrap,.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-image-content{display:block;width:100%;text-align:center}.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-icon-wrap,.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-image-content{margin-right:0;margin-left:0}.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap{display:inline-block}.uagb-infobox-icon-left-title.uagb-infobox-stacked-tablet .uagb-ifb-image-content,.uagb-infobox-icon-left-title.uagb-infobox-stacked-tablet .uagb-ifb-icon-wrap,.uagb-infobox-icon-left.uagb-infobox-stacked-tablet .uagb-ifb-image-content,.uagb-infobox-icon-left.uagb-infobox-stacked-tablet .uagb-ifb-icon-wrap{margin-right:0}.uagb-infobox-icon-right-title.uagb-infobox-stacked-tablet .uagb-ifb-image-content,.uagb-infobox-icon-right-title.uagb-infobox-stacked-tablet .uagb-ifb-icon-wrap,.uagb-infobox-icon-right.uagb-infobox-stacked-tablet .uagb-ifb-image-content,.uagb-infobox-icon-right.uagb-infobox-stacked-tablet .uagb-ifb-icon-wrap{margin-left:0}.uagb-infobox-icon-left-title .uagb-ifb-separator{margin:10px 0}}@media screen and (max-width: 767px){.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap{display:inline-block}.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-image-content,.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-icon-wrap{padding:0;margin-bottom:20px;margin-right:0;margin-left:0}.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap.uagb-reverse-order-mobile{display:-webkit-inline-box;display:-ms-inline-flexbox;display:-webkit-inline-flex;display:-moz-inline-box;display:inline-flex;flex-direction:column-reverse;-js-display:inline-flex;-webkit-box-orient:vertical;-webkit-box-direction:reverse;-ms-flex-direction:column-reverse;-webkit-flex-direction:column-reverse;-moz-box-orient:vertical;-moz-box-direction:reverse}.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-image-content,.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-icon-wrap,.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-content{display:block;width:100%;text-align:center}.uagb-infobox-icon-left-title.uagb-infobox-stacked-mobile .uagb-ifb-image-content,.uagb-infobox-icon-left-title.uagb-infobox-stacked-mobile .uagb-ifb-icon-wrap,.uagb-infobox-icon-left.uagb-infobox-stacked-mobile .uagb-ifb-image-content,.uagb-infobox-icon-left.uagb-infobox-stacked-mobile .uagb-ifb-icon-wrap{margin-right:0}.uagb-infobox-icon-right-title.uagb-infobox-stacked-mobile .uagb-ifb-image-content,.uagb-infobox-icon-right-title.uagb-infobox-stacked-mobile .uagb-ifb-icon-wrap,.uagb-infobox-icon-right.uagb-infobox-stacked-mobile .uagb-ifb-image-content,.uagb-infobox-icon-right.uagb-infobox-stacked-mobile .uagb-ifb-icon-wrap{margin-left:0}.uagb-infobox-icon-left-title .uagb-ifb-separator{margin:10px 0}}.uagb-ifb-icon svg{width:inherit;height:inherit;vertical-align:middle}.uagb-ifb-button-icon{height:15px;width:15px;font-size:15px;vertical-align:middle}.uagb-ifb-button-icon svg{height:inherit;width:inherit;display:inline-block}.uagb-ifb-button-icon.uagb-ifb-align-icon-after{float:right}.uagb-ifb-cta-button{display:inline-block}.uagb-disable-link{pointer-events:none}
.wp-block-uagb-container.uagb-is-root-container .uagb-block-573dc06d{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-573dc06d .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-573dc06d .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-573dc06d .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-573dc06d .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-573dc06d .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-573dc06d > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: flex-start;justify-content: center;flex-wrap: nowrap;row-gap: 72px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-573dc06d{box-shadow: 0px 0px   #00000070 ;padding-top: 112px;padding-bottom: 112px;padding-left: 40px;padding-right: 40px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 72px;column-gap: 0px;overflow: visible;border-color: inherit;background-color: var(--ast-global-color-4);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-13533f4b{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-13533f4b .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-13533f4b .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-13533f4b .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-13533f4b .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-13533f4b .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-13533f4b > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: flex-start;flex-wrap: nowrap;row-gap: 48px;column-gap: 48px;}.wp-block-uagb-container.uagb-block-13533f4b{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 48px;column-gap: 48px;overflow: visible;border-color: inherit;flex-direction: row;align-items: stretch;justify-content: flex-start;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-ac5bb9d7{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-block-ac5bb9d7 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-ac5bb9d7 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-ac5bb9d7 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-ac5bb9d7 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-ac5bb9d7 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-ac5bb9d7 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 20px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-ac5bb9d7{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 20px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-4ef0e025.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-4ef0e025 .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-4ef0e025.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-4ef0e025.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;text-align: center;}.uagb-block-4ef0e025.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-4ef0e025.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-4ef0e025.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-4ef0e025.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-4ef0e025.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-4ef0e025.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-4ef0e025.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-4ef0e025.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-4ef0e025.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 575px;height: 384px;}.uagb-block-4ef0e025.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-4ef0e025.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-4ef0e025.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-4ef0e025.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-79dddf46{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-79dddf46 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-79dddf46 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-79dddf46 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-79dddf46 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-79dddf46 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-79dddf46 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 12px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-79dddf46{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 12px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;}.uagb-block-062d9584 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-062d9584 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-062d9584 .uagb-ifb-icon svg{fill: #333;}.uagb-block-062d9584.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-062d9584 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-062d9584 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-062d9584.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-062d9584.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-062d9584 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-062d9584 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-062d9584 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-062d9584 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-062d9584.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-062d9584.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-062d9584.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-062d9584.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-062d9584 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-062d9584.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-062d9584.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-062d9584 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-062d9584 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-062d9584 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-062d9584 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-062d9584.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-062d9584.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-062d9584 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-062d9584.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-062d9584 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-062d9584.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-062d9584 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-062d9584 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-062d9584.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-a55c90da .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-a55c90da .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-a55c90da .uagb-ifb-icon svg{fill: #333;}.uagb-block-a55c90da.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-a55c90da .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-a55c90da .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-a55c90da.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-a55c90da.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-a55c90da .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-a55c90da .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-a55c90da .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-a55c90da .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-a55c90da.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-a55c90da.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-a55c90da.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-a55c90da.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-a55c90da .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-a55c90da.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-a55c90da.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-a55c90da .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-a55c90da .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-a55c90da .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-a55c90da .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-a55c90da.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-a55c90da.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-a55c90da .uagb-infobox__content-wrap{text-align: left;}.uagb-block-a55c90da.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-a55c90da .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-a55c90da.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-a55c90da .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-a55c90da .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-a55c90da.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-f0b36b2e{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-block-f0b36b2e .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-f0b36b2e .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-f0b36b2e .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-f0b36b2e .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-f0b36b2e .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-f0b36b2e > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 20px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-f0b36b2e{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 20px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-26690864.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-26690864 .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-26690864.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-26690864.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;text-align: center;}.uagb-block-26690864.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-26690864.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-26690864.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-26690864.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-26690864.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-26690864.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-26690864.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-26690864.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-26690864.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 575px;height: 384px;}.uagb-block-26690864.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-26690864.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-26690864.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-26690864.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-2d2b11d2{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-2d2b11d2 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-2d2b11d2 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-2d2b11d2 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-2d2b11d2 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-2d2b11d2 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-2d2b11d2 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 12px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-2d2b11d2{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 12px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;}.uagb-block-0aef4b77 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-0aef4b77 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-0aef4b77 .uagb-ifb-icon svg{fill: #333;}.uagb-block-0aef4b77.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-0aef4b77 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-0aef4b77 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-0aef4b77.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-0aef4b77.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-0aef4b77 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-0aef4b77 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-0aef4b77 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-0aef4b77 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-0aef4b77.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-0aef4b77.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-0aef4b77.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-0aef4b77.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-0aef4b77 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-0aef4b77.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-0aef4b77.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-0aef4b77 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-0aef4b77 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-0aef4b77 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-0aef4b77 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-0aef4b77.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-0aef4b77.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-0aef4b77 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-0aef4b77.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-0aef4b77 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-0aef4b77.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-0aef4b77 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-0aef4b77 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-0aef4b77.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-bb77719c .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-bb77719c .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-bb77719c .uagb-ifb-icon svg{fill: #333;}.uagb-block-bb77719c.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-bb77719c .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-bb77719c .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-bb77719c.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-bb77719c.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-bb77719c .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-bb77719c .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-bb77719c .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-bb77719c .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-bb77719c.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-bb77719c.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-bb77719c.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-bb77719c.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-bb77719c .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-bb77719c.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-bb77719c.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-bb77719c .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-bb77719c .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-bb77719c .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-bb77719c .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-bb77719c.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-bb77719c.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-bb77719c .uagb-infobox__content-wrap{text-align: left;}.uagb-block-bb77719c.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-bb77719c .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-bb77719c.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-bb77719c .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-bb77719c .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-bb77719c.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-ae2d60c2{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-ae2d60c2 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-ae2d60c2 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-ae2d60c2 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-ae2d60c2 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-ae2d60c2 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-ae2d60c2 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: flex-start;flex-wrap: nowrap;row-gap: 48px;column-gap: 48px;}.wp-block-uagb-container.uagb-block-ae2d60c2{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 48px;column-gap: 48px;overflow: visible;border-color: inherit;flex-direction: row;align-items: stretch;justify-content: flex-start;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-8bc79849{max-width: 31%;width: 100%;}.wp-block-uagb-container.uagb-block-8bc79849 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-8bc79849 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-8bc79849 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-8bc79849 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-8bc79849 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-8bc79849 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 20px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-8bc79849{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 20px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-7f610b7f.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-7f610b7f .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-7f610b7f.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-7f610b7f.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;text-align: center;}.uagb-block-7f610b7f.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-7f610b7f.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-7f610b7f.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-7f610b7f.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-7f610b7f.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-7f610b7f.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-7f610b7f.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-7f610b7f.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-7f610b7f.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 368px;height: 368px;}.uagb-block-7f610b7f.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-7f610b7f.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-7f610b7f.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-7f610b7f.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-54feaec6{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-54feaec6 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-54feaec6 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-54feaec6 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-54feaec6 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-54feaec6 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-54feaec6 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 12px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-54feaec6{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 12px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;}.uagb-block-45e1a757 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-45e1a757 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-45e1a757 .uagb-ifb-icon svg{fill: #333;}.uagb-block-45e1a757.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-45e1a757 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-45e1a757 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-45e1a757.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-45e1a757.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-45e1a757 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-45e1a757 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-45e1a757 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-45e1a757 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-45e1a757.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-45e1a757.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-45e1a757.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-45e1a757.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-45e1a757 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-45e1a757.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-45e1a757.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-45e1a757 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-45e1a757 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-45e1a757 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-45e1a757 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-45e1a757.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-45e1a757.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-45e1a757 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-45e1a757.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-45e1a757 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-45e1a757.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-45e1a757 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-45e1a757 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-45e1a757.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-300b4fa9 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-300b4fa9 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-300b4fa9 .uagb-ifb-icon svg{fill: #333;}.uagb-block-300b4fa9.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-300b4fa9 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-300b4fa9 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-300b4fa9.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-300b4fa9.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-300b4fa9 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-300b4fa9 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-300b4fa9 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-300b4fa9 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-300b4fa9.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-300b4fa9.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-300b4fa9.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-300b4fa9.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-300b4fa9 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-300b4fa9.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-300b4fa9.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-300b4fa9 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-300b4fa9 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-300b4fa9 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-300b4fa9 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-300b4fa9.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-300b4fa9.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-300b4fa9 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-300b4fa9.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-300b4fa9 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-300b4fa9.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-300b4fa9 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-300b4fa9 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-300b4fa9.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-2b49afdf{max-width: 31%;width: 100%;}.wp-block-uagb-container.uagb-block-2b49afdf .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-2b49afdf .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-2b49afdf .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-2b49afdf .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-2b49afdf .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-2b49afdf > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 20px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-2b49afdf{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 20px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-b9de53f3.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-b9de53f3 .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-b9de53f3.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-b9de53f3.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;text-align: center;}.uagb-block-b9de53f3.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-b9de53f3.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-b9de53f3.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-b9de53f3.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-b9de53f3.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-b9de53f3.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-b9de53f3.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-b9de53f3.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-b9de53f3.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 368px;height: 368px;}.uagb-block-b9de53f3.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-b9de53f3.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-b9de53f3.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-b9de53f3.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-93bd2b4e{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-93bd2b4e .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-93bd2b4e .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-93bd2b4e .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-93bd2b4e .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-93bd2b4e .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-93bd2b4e > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 12px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-93bd2b4e{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 12px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;}.uagb-block-3124bf25 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-3124bf25 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-3124bf25 .uagb-ifb-icon svg{fill: #333;}.uagb-block-3124bf25.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-3124bf25 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-3124bf25 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-3124bf25.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-3124bf25.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-3124bf25 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-3124bf25 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-3124bf25 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-3124bf25 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-3124bf25.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-3124bf25.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-3124bf25.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-3124bf25.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-3124bf25 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-3124bf25.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-3124bf25.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-3124bf25 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-3124bf25 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-3124bf25 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-3124bf25 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-3124bf25.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-3124bf25.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-3124bf25 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-3124bf25.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-3124bf25 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-3124bf25.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-3124bf25 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-3124bf25 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-3124bf25.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-558db471 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-558db471 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-558db471 .uagb-ifb-icon svg{fill: #333;}.uagb-block-558db471.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-558db471 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-558db471 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-558db471.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-558db471.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-558db471 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-558db471 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-558db471 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-558db471 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-558db471.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-558db471.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-558db471.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-558db471.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-558db471 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-558db471.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-558db471.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-558db471 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-558db471 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-558db471 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-558db471 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-558db471.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-558db471.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-558db471 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-558db471.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-558db471 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-558db471.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-558db471 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-558db471 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-558db471.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-a1eba3d5{max-width: 31%;width: 100%;}.wp-block-uagb-container.uagb-block-a1eba3d5 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-a1eba3d5 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-a1eba3d5 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-a1eba3d5 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-a1eba3d5 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-a1eba3d5 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 20px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-a1eba3d5{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 20px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-3214db08.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-3214db08 .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-3214db08.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-3214db08.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;text-align: center;}.uagb-block-3214db08.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-3214db08.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-3214db08.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-3214db08.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-3214db08.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-3214db08.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-3214db08.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-3214db08.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-3214db08.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 368px;height: 368px;}.uagb-block-3214db08.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-3214db08.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-3214db08.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-3214db08.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-1207eaf6{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-1207eaf6 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-1207eaf6 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-1207eaf6 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-1207eaf6 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-1207eaf6 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-1207eaf6 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 12px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-1207eaf6{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 12px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;}.uagb-block-29ee3c78 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-29ee3c78 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-29ee3c78 .uagb-ifb-icon svg{fill: #333;}.uagb-block-29ee3c78.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-29ee3c78 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-29ee3c78 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-29ee3c78.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-29ee3c78.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-29ee3c78 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-29ee3c78 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-29ee3c78 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-29ee3c78 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-29ee3c78.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-29ee3c78.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-29ee3c78.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-29ee3c78.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-29ee3c78 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-29ee3c78.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-29ee3c78.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-29ee3c78 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-29ee3c78 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-29ee3c78 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-29ee3c78 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-29ee3c78.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-29ee3c78.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-29ee3c78 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-29ee3c78.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-29ee3c78 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-29ee3c78.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-29ee3c78 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-29ee3c78 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-29ee3c78.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-84e7d4da .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-84e7d4da .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-84e7d4da .uagb-ifb-icon svg{fill: #333;}.uagb-block-84e7d4da.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-84e7d4da .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-84e7d4da .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-84e7d4da.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-84e7d4da.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-84e7d4da .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-84e7d4da .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-84e7d4da .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-84e7d4da .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-84e7d4da.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-84e7d4da.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-84e7d4da.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-84e7d4da.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-84e7d4da .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-84e7d4da.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-84e7d4da.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-84e7d4da .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-84e7d4da .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-84e7d4da .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-84e7d4da .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-84e7d4da.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-84e7d4da.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-84e7d4da .uagb-infobox__content-wrap{text-align: left;}.uagb-block-84e7d4da.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-84e7d4da .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-84e7d4da.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-84e7d4da .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-84e7d4da .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-84e7d4da.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}@media only screen and (max-width: 976px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-573dc06d{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-573dc06d > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-573dc06d{padding-top: 80px;padding-bottom: 80px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;background-color: var(--ast-global-color-4);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-13533f4b{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-13533f4b > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;row-gap: 40px;column-gap: 40px;}.wp-block-uagb-container.uagb-block-13533f4b{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 40px;column-gap: 40px;align-items: stretch;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-ac5bb9d7{max-width: 47%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-ac5bb9d7 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-ac5bb9d7{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;}.uagb-block-4ef0e025.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 576px;height: 350px;}.uagb-block-4ef0e025.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-79dddf46{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-79dddf46 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 12px;}.wp-block-uagb-container.uagb-block-79dddf46{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 12px;}.uagb-block-062d9584.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-062d9584.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-062d9584.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-062d9584.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-062d9584 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-062d9584 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-062d9584 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-062d9584 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-062d9584 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-062d9584 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-062d9584.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-062d9584 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-062d9584 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-062d9584.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-a55c90da.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-a55c90da.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-a55c90da.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-a55c90da .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-a55c90da .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-a55c90da .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-a55c90da .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-a55c90da .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-a55c90da .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-a55c90da.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-a55c90da .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-a55c90da .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-a55c90da.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-f0b36b2e{max-width: 47%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-f0b36b2e > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-f0b36b2e{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;}.uagb-block-26690864.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 576px;height: 350px;}.uagb-block-26690864.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-2d2b11d2{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-2d2b11d2 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 12px;}.wp-block-uagb-container.uagb-block-2d2b11d2{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 12px;}.uagb-block-0aef4b77.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-0aef4b77.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-0aef4b77.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-0aef4b77.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-0aef4b77 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-0aef4b77 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-0aef4b77 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-0aef4b77 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-0aef4b77 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-0aef4b77 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-0aef4b77.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-0aef4b77 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-0aef4b77 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-0aef4b77.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-bb77719c.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-bb77719c.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-bb77719c.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-bb77719c .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-bb77719c .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-bb77719c .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-bb77719c .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-bb77719c .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-bb77719c .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-bb77719c.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-bb77719c .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-bb77719c .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-bb77719c.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-ae2d60c2{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-ae2d60c2 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;row-gap: 24px;column-gap: 24px;}.wp-block-uagb-container.uagb-block-ae2d60c2{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 24px;align-items: stretch;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-8bc79849{max-width: 32%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-8bc79849 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-8bc79849{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;}.uagb-block-7f610b7f.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 368px;height: 224px;}.uagb-block-7f610b7f.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-54feaec6{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-54feaec6 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-54feaec6{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;}.uagb-block-45e1a757.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-45e1a757.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-45e1a757.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-45e1a757 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-45e1a757 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-45e1a757 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-45e1a757 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-45e1a757 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-45e1a757 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-45e1a757.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-45e1a757 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-45e1a757 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-45e1a757.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-300b4fa9.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-300b4fa9.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-300b4fa9.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-300b4fa9 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-300b4fa9 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-300b4fa9 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-300b4fa9 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-300b4fa9 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-300b4fa9 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-300b4fa9.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-300b4fa9 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-300b4fa9 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-300b4fa9.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-2b49afdf{max-width: 32%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-2b49afdf > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-2b49afdf{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;}.uagb-block-b9de53f3.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 368px;height: 224px;}.uagb-block-b9de53f3.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-93bd2b4e{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-93bd2b4e > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-93bd2b4e{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;}.uagb-block-3124bf25.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-3124bf25.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-3124bf25.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-3124bf25 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-3124bf25 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-3124bf25 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-3124bf25 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-3124bf25 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-3124bf25 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-3124bf25.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-3124bf25 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-3124bf25 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-3124bf25.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-558db471.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-558db471.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-558db471.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-558db471 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-558db471 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-558db471 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-558db471 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-558db471 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-558db471 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-558db471.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-558db471 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-558db471 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-558db471.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-a1eba3d5{max-width: 32%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-a1eba3d5 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-a1eba3d5{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;}.uagb-block-3214db08.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 368px;height: 224px;}.uagb-block-3214db08.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-1207eaf6{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-1207eaf6 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-1207eaf6{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;}.uagb-block-29ee3c78.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-29ee3c78.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-29ee3c78.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-29ee3c78 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-29ee3c78 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-29ee3c78 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-29ee3c78 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-29ee3c78 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-29ee3c78 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-29ee3c78.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-29ee3c78 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-29ee3c78 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-29ee3c78.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-84e7d4da.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-84e7d4da.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-84e7d4da.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-84e7d4da .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-84e7d4da .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-84e7d4da .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-84e7d4da .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-84e7d4da .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-84e7d4da .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-84e7d4da.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-84e7d4da .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-84e7d4da .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-84e7d4da.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}}@media only screen and (max-width: 767px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-573dc06d{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-573dc06d > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 48px;}.wp-block-uagb-container.uagb-block-573dc06d{padding-top: 64px;padding-bottom: 64px;padding-left: 20px;padding-right: 20px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 48px;background-color: var(--ast-global-color-4);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-13533f4b{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-13533f4b > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;flex-wrap: wrap;row-gap: 48px;}.wp-block-uagb-container.uagb-block-13533f4b{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 48px;align-items: stretch;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-ac5bb9d7{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-ac5bb9d7 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-ac5bb9d7{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;flex-wrap: wrap;}.uagb-block-4ef0e025.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 300px;}.uagb-block-4ef0e025.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-79dddf46{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-79dddf46 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 8px;}.wp-block-uagb-container.uagb-block-79dddf46{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 8px;flex-wrap: wrap;}.uagb-block-062d9584.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 8px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-062d9584.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-062d9584.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-062d9584 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-062d9584 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-062d9584.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-062d9584 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-062d9584 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-062d9584 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-062d9584 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-062d9584.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-062d9584 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-062d9584 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-062d9584.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-a55c90da.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-a55c90da.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-a55c90da.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-a55c90da .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-a55c90da .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-a55c90da.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-a55c90da .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-a55c90da .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-a55c90da .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-a55c90da .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-a55c90da.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-a55c90da .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-a55c90da .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-a55c90da.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-f0b36b2e{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-f0b36b2e > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-f0b36b2e{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;flex-wrap: wrap;}.uagb-block-26690864.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 300px;}.uagb-block-26690864.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-2d2b11d2{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-2d2b11d2 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 8px;}.wp-block-uagb-container.uagb-block-2d2b11d2{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 8px;flex-wrap: wrap;}.uagb-block-0aef4b77.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 8px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-0aef4b77.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-0aef4b77.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-0aef4b77.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-0aef4b77 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-0aef4b77 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-0aef4b77.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-0aef4b77 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-0aef4b77 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-0aef4b77 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-0aef4b77 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-0aef4b77.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-0aef4b77 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-0aef4b77 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-0aef4b77.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-bb77719c.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-bb77719c.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-bb77719c.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-bb77719c .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-bb77719c .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-bb77719c.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-bb77719c .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-bb77719c .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-bb77719c .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-bb77719c .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-bb77719c.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-bb77719c .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-bb77719c .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-bb77719c.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-ae2d60c2{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-ae2d60c2 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;flex-wrap: wrap;row-gap: 48px;}.wp-block-uagb-container.uagb-block-ae2d60c2{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 48px;align-items: stretch;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-8bc79849{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-8bc79849 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-8bc79849{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;flex-wrap: wrap;}.uagb-block-7f610b7f.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 300px;}.uagb-block-7f610b7f.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-54feaec6{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-54feaec6 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 8px;}.wp-block-uagb-container.uagb-block-54feaec6{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 8px;flex-wrap: wrap;}.uagb-block-45e1a757.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 8px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-45e1a757.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-45e1a757.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-45e1a757.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-45e1a757 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-45e1a757 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-45e1a757.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-45e1a757 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-45e1a757 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-45e1a757 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-45e1a757 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-45e1a757.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-45e1a757 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-45e1a757 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-45e1a757.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-300b4fa9.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-300b4fa9.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-300b4fa9.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-300b4fa9 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-300b4fa9 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-300b4fa9.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-300b4fa9 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-300b4fa9 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-300b4fa9 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-300b4fa9 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-300b4fa9.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-300b4fa9 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-300b4fa9 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-300b4fa9.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-2b49afdf{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-2b49afdf > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-2b49afdf{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;flex-wrap: wrap;}.uagb-block-b9de53f3.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 300px;}.uagb-block-b9de53f3.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-93bd2b4e{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-93bd2b4e > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 8px;}.wp-block-uagb-container.uagb-block-93bd2b4e{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 8px;flex-wrap: wrap;}.uagb-block-3124bf25.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 8px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-3124bf25.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-3124bf25.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-3124bf25.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-3124bf25 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-3124bf25 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-3124bf25.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-3124bf25 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-3124bf25 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-3124bf25 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-3124bf25 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-3124bf25.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-3124bf25 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-3124bf25 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-3124bf25.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-558db471.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-558db471.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-558db471.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-558db471 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-558db471 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-558db471.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-558db471 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-558db471 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-558db471 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-558db471 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-558db471.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-558db471 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-558db471 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-558db471.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-a1eba3d5{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-a1eba3d5 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-a1eba3d5{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;flex-wrap: wrap;}.uagb-block-3214db08.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 300px;}.uagb-block-3214db08.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-1207eaf6{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-1207eaf6 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 8px;}.wp-block-uagb-container.uagb-block-1207eaf6{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 8px;flex-wrap: wrap;}.uagb-block-29ee3c78.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 8px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-29ee3c78.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-29ee3c78.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-29ee3c78.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-29ee3c78 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-29ee3c78 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-29ee3c78.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-29ee3c78 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-29ee3c78 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-29ee3c78 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-29ee3c78 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-29ee3c78.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-29ee3c78 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-29ee3c78 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-29ee3c78.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.uagb-block-84e7d4da.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-84e7d4da.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-84e7d4da.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-84e7d4da .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-84e7d4da .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-84e7d4da.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-84e7d4da .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-84e7d4da .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-84e7d4da .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-84e7d4da .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-84e7d4da.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-84e7d4da .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-84e7d4da .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-84e7d4da.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}}";s:7:"content";s:7684:"
<div class="wp-block-uagb-container uagb-block-573dc06d alignfull uagb-is-root-container"><div class="uagb-container-inner-blocks-wrap">
<div class="wp-block-uagb-container uagb-block-13533f4b">
<div class="wp-block-uagb-container uagb-block-ac5bb9d7">
<div class="wp-block-uagb-image alignleft uagb-block-4ef0e025 wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-left"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/09/team-skip-20.jpg ,https://websitedemos.net/wp-content/uploads/2023/09/team-skip-20.jpg 780w, https://websitedemos.net/wp-content/uploads/2023/09/team-skip-20.jpg 360w" sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/09/team-skip-20.jpg" alt="" class="uag-image-77990" width="575" height="384" title="" loading="lazy"/></figure></div>



<div class="wp-block-uagb-container uagb-block-79dddf46">
<div class="wp-block-uagb-info-box uagb-block-062d9584 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h5 class="uagb-ifb-title">Jane Cooper</h5></div><p class="uagb-ifb-desc">CEO</p></div></div>



<div class="wp-block-uagb-info-box uagb-block-a55c90da uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"></div><p class="uagb-ifb-desc">Share some details here. This is a flexible section where you can share anything you want. It could be details or some information.</p></div></div>
</div>
</div>



<div class="wp-block-uagb-container uagb-block-f0b36b2e">
<div class="wp-block-uagb-image alignleft uagb-block-26690864 wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-left"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/09/team-skip-28.jpg ,https://websitedemos.net/wp-content/uploads/2023/09/team-skip-28.jpg 780w, https://websitedemos.net/wp-content/uploads/2023/09/team-skip-28.jpg 360w" sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/09/team-skip-28.jpg" alt="" class="uag-image-78366" width="575" height="384" title="" loading="lazy"/></figure></div>



<div class="wp-block-uagb-container uagb-block-2d2b11d2">
<div class="wp-block-uagb-info-box uagb-block-0aef4b77 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h5 class="uagb-ifb-title">Wade Warren</h5></div><p class="uagb-ifb-desc">Co-Founder</p></div></div>



<div class="wp-block-uagb-info-box uagb-block-bb77719c uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"></div><p class="uagb-ifb-desc">Share some details here. This is a flexible section where you can share anything you want. It could be details or some information.</p></div></div>
</div>
</div>
</div>



<div class="wp-block-uagb-container uagb-block-ae2d60c2">
<div class="wp-block-uagb-container uagb-block-8bc79849">
<div class="wp-block-uagb-image alignleft uagb-block-7f610b7f wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-left"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/09/team-skip-06.jpg ,https://websitedemos.net/wp-content/uploads/2023/09/team-skip-13.jpg 780w, https://websitedemos.net/wp-content/uploads/2023/09/team-skip-13.jpg 360w" sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/09/team-skip-06.jpg" alt="" class="uag-image-77947" width="368" height="368" title="" loading="lazy"/></figure></div>



<div class="wp-block-uagb-container uagb-block-54feaec6">
<div class="wp-block-uagb-info-box uagb-block-45e1a757 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h5 class="uagb-ifb-title">Esther Howard</h5></div><p class="uagb-ifb-desc">Director</p></div></div>



<div class="wp-block-uagb-info-box uagb-block-300b4fa9 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"></div><p class="uagb-ifb-desc">Share some details here. This is a flexible section where you can share anything you want. It could be details or some information.</p></div></div>
</div>
</div>



<div class="wp-block-uagb-container uagb-block-2b49afdf">
<div class="wp-block-uagb-image alignleft uagb-block-b9de53f3 wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-left"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/09/team-skip-27.jpg ,https://websitedemos.net/wp-content/uploads/2023/09/team-skip-27.jpg 780w, https://websitedemos.net/wp-content/uploads/2023/09/team-skip-27.jpg 360w" sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/09/team-skip-27.jpg" alt="" class="uag-image-78358" width="368" height="368" title="" loading="lazy"/></figure></div>



<div class="wp-block-uagb-container uagb-block-93bd2b4e">
<div class="wp-block-uagb-info-box uagb-block-3124bf25 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h5 class="uagb-ifb-title">Cameron Williamson</h5></div><p class="uagb-ifb-desc">Manager</p></div></div>



<div class="wp-block-uagb-info-box uagb-block-558db471 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"></div><p class="uagb-ifb-desc">Share some details here. This is a flexible section where you can share anything you want. It could be details or some information.</p></div></div>
</div>
</div>



<div class="wp-block-uagb-container uagb-block-a1eba3d5">
<div class="wp-block-uagb-image alignleft uagb-block-3214db08 wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-left"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/09/team-skip-15.jpg ,https://websitedemos.net/wp-content/uploads/2023/09/team-skip-15.jpg 780w, https://websitedemos.net/wp-content/uploads/2023/09/team-skip-15.jpg 360w" sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/09/team-skip-15.jpg" alt="" class="uag-image-77971" width="368" height="368" title="" loading="lazy"/></figure></div>



<div class="wp-block-uagb-container uagb-block-1207eaf6">
<div class="wp-block-uagb-info-box uagb-block-29ee3c78 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h5 class="uagb-ifb-title">Brooklyn Simmons</h5></div><p class="uagb-ifb-desc">Marketing</p></div></div>



<div class="wp-block-uagb-info-box uagb-block-84e7d4da uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"></div><p class="uagb-ifb-desc">Share some details here. This is a flexible section where you can share anything you want. It could be details or some information.</p></div></div>
</div>
</div>
</div>
</div></div>
";}s:8:"id-76410";a:10:{s:5:"title";s:7:"Team 08";s:3:"url";s:45:"https://websitedemos.net/astra-blocks/team-8/";s:3:"tag";a:0:{}s:8:"category";i:829;s:16:"primary-category";s:0:"";s:4:"type";s:5:"block";s:12:"page-builder";s:9:"gutenberg";s:16:"required-plugins";a:0:{}s:10:"stylesheet";s:89062:".wp-block-uagb-container{display:flex;position:relative;box-sizing:border-box;transition-property:box-shadow;transition-duration:0.2s;transition-timing-function:ease}.wp-block-uagb-container .spectra-container-link-overlay{bottom:0;left:0;position:absolute;right:0;top:0;z-index:10}.wp-block-uagb-container.uagb-is-root-container{margin-left:auto;margin-right:auto}.wp-block-uagb-container.alignfull.uagb-is-root-container .uagb-container-inner-blocks-wrap{display:flex;position:relative;box-sizing:border-box;margin-left:auto !important;margin-right:auto !important}.wp-block-uagb-container .uagb-container__video-wrap{height:100%;width:100%;top:0;left:0;position:absolute;overflow:hidden;-webkit-transition:opacity 1s;-o-transition:opacity 1s;transition:opacity 1s}.wp-block-uagb-container .uagb-container__video-wrap video{max-width:100%;width:100%;height:100%;margin:0;line-height:1;border:none;display:inline-block;vertical-align:baseline;-o-object-fit:cover;object-fit:cover;background-size:cover}.st-block-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap>*:not(.wp-block-uagb-container):not(.wp-block-uagb-column):not(.wp-block-uagb-container):not(.wp-block-uagb-section):not(.uagb-container__shape):not(.uagb-container__video-wrap):not(.wp-block-spectra-pro-register):not(.wp-block-spectra-pro-login):not(.uagb-slider-container):not(.spectra-image-gallery__control-lightbox),.st-block-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap,.st-block-container .wp-block-uagb-container>*:not(.wp-block-uagb-container):not(.wp-block-uagb-column):not(.wp-block-uagb-container):not(.wp-block-uagb-section):not(.uagb-container__shape):not(.uagb-container__video-wrap):not(.wp-block-uagb-image):not(.wp-block-spectra-pro-register):not(.wp-block-spectra-pro-login):not(.uagb-slider-container):not(.spectra-container-link-overlay):not(.spectra-image-gallery__control-lightbox):not(.wp-block-uagb-lottie):not(.uagb-faq__outer-wrap){min-width:unset !important;width:100%;position:relative}.st-block-container .ast-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap>.wp-block-uagb-container>ul,.st-block-container .ast-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap>.wp-block-uagb-container ol,.st-block-container .ast-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap>ul,.st-block-container .ast-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap ol{max-width:-webkit-fill-available;margin-block-start:0;margin-block-end:0;margin-left:20px}.ast-plain-container .editor-styles-wrapper .block-editor-block-list__layout.is-root-container .uagb-is-root-container.wp-block-uagb-container.alignwide{margin-left:auto;margin-right:auto}.uagb-container__shape{overflow:hidden;position:absolute;left:0;width:100%;line-height:0;direction:ltr}.uagb-container__shape-top{top:-3px}.uagb-container__shape-bottom{bottom:-3px}.uagb-container__shape.uagb-container__invert.uagb-container__shape-bottom,.uagb-container__shape.uagb-container__invert.uagb-container__shape-top{-webkit-transform:rotate(180deg);-ms-transform:rotate(180deg);transform:rotate(180deg)}.uagb-container__shape.uagb-container__shape-flip svg{transform:translateX(-50%) rotateY(180deg)}.uagb-container__shape svg{display:block;width:-webkit-calc(100% + 1.3px);width:calc(100% + 1.3px);position:relative;left:50%;-webkit-transform:translateX(-50%);-ms-transform:translateX(-50%);transform:translateX(-50%)}.uagb-container__shape .uagb-container__shape-fill{-webkit-transform-origin:center;-ms-transform-origin:center;transform-origin:center;-webkit-transform:rotateY(0deg);transform:rotateY(0deg)}.uagb-container__shape.uagb-container__shape-above-content{z-index:9;pointer-events:none}.nv-single-page-wrap .nv-content-wrap.entry-content .wp-block-uagb-container.alignfull{margin-left:calc(50% - 50vw);margin-right:calc(50% - 50vw)}@media only screen and (max-width: 767px){.wp-block-uagb-container .wp-block-uagb-advanced-heading{width:-webkit-fill-available !important}}
.uagb-ifb-content>svg *{-webkit-transition:all 0.2s;-o-transition:all 0.2s;transition:all 0.2s}.uagb-ifb-content>svg,.uagb-ifb-content{display:inline-block}.uagb-ifb-content>svg{vertical-align:middle;width:inherit;height:inherit;font-style:initial}.uagb-ifb-content .uagb-ifb-icon-wrap svg{box-sizing:content-box;width:inherit;height:inherit}.uagb-ifb-button-wrapper:empty{display:none}div.uagb-ifb-button-wrapper a.uagb-infobox-cta-link,div.uagb-ifb-cta a.uagb-infobox-cta-link,.entry .entry-content a.uagb-infobox-cta-link,a.uagb-infobox-link-wrap,.entry .entry-content a.uagb-infobox-link-wrap{text-decoration:none;align-items:center}.uagb-infobox-icon-left-title.uagb-infobox-image-valign-middle .uagb-ifb-title-wrap,.uagb-infobox-icon-right-title.uagb-infobox-image-valign-middle .uagb-ifb-title-wrap,.uagb-infobox-image-valign-middle .uagb-ifb-icon-wrap,.uagb-infobox-image-valign-middle .uagb-ifb-image-content,.uagb-infobox-icon-left.uagb-infobox-image-valign-middle .uagb-ifb-content,.uagb-infobox-icon-right.uagb-infobox-image-valign-middle .uagb-ifb-content{-ms-flex-item-align:center;-webkit-align-self:center;align-self:center}.uagb-infobox-icon-left-title.uagb-infobox-image-valign-top .uagb-ifb-title-wrap,.uagb-infobox-icon-right-title.uagb-infobox-image-valign-top .uagb-ifb-title-wrap,.uagb-infobox-image-valign-top .uagb-ifb-icon-wrap,.uagb-infobox-image-valign-top .uagb-ifb-image-content,.uagb-infobox-icon-left.uagb-infobox-image-valign-top .uagb-ifb-content,.uagb-infobox-icon-right.uagb-infobox-image-valign-top .uagb-ifb-content{-webkit-align-self:self-start;align-self:self-start}.uagb-infobox-left{justify-content:flex-start;text-align:left;-webkit-box-pack:start;-ms-flex-pack:start;-webkit-justify-content:flex-start;-moz-box-pack:start}.uagb-infobox-center{justify-content:center;text-align:center;-webkit-box-pack:center;-ms-flex-pack:center;-webkit-justify-content:center;-moz-box-pack:center}.uagb-infobox-right{justify-content:flex-end;text-align:right;-webkit-box-pack:end;-ms-flex-pack:end;-webkit-justify-content:flex-end;-moz-box-pack:end}.uagb-infobox-icon-above-title.uagb-infobox__content-wrap,.uagb-infobox-icon-below-title.uagb-infobox__content-wrap{display:block;width:100%}.uagb-infobox-icon-left-title .uagb-ifb-content>svg,.uagb-infobox-icon-left .uagb-ifb-content>svg{margin-right:10px}.uagb-infobox-icon-right-title .uagb-ifb-content>svg,.uagb-infobox-icon-right .uagb-ifb-content>svg{margin-left:10px}.uagb-infobox-icon-left.uagb-infobox__content-wrap,.uagb-infobox-icon-right.uagb-infobox__content-wrap,.uagb-infobox-icon-left-title .uagb-ifb-left-title-image,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image{display:-webkit-box;display:-ms-flexbox;display:-webkit-flex;display:-moz-box;display:flex;-js-display:flex}.uagb-infobox-icon-left-title .uagb-ifb-left-title-image .uagb-ifb-image-content,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image .uagb-ifb-image-content,.uagb-infobox-icon-left .uagb-ifb-image-content,.uagb-infobox-icon-right .uagb-ifb-image-content{flex-shrink:0;line-height:0}.uagb-infobox-icon-left-title .uagb-ifb-left-title-image .uagb-ifb-title-wrap,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image .uagb-ifb-title-wrap,.uagb-infobox-icon-left .uagb-ifb-content,.uagb-infobox-icon-right .uagb-ifb-content{flex-grow:1}.uagb-infobox-icon-right.uagb-infobox__content-wrap,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image{-webkit-box-pack:end;-ms-flex-pack:end;-webkit-justify-content:flex-end;-moz-box-pack:end;justify-content:flex-end}.uagb-ifb-content img{position:relative;display:inline-block;line-height:0;width:auto;height:auto !important;max-width:100%;border-radius:inherit;-webkit-box-sizing:content-box;-moz-box-sizing:content-box;-webkit-border-radius:inherit}.uagb-infobox-module-link{position:absolute;top:0;right:0;bottom:0;left:0;z-index:4;width:100%;height:100%}.uagb-edit-mode .uagb-infobox-module-link{z-index:2}.uagb-infobox-link-icon-after{margin-right:0;margin-left:5px}.uagb-infobox-link-icon-before{margin-right:5px;margin-left:0}.uagb-infobox-link-icon{-webkit-transition:all 200ms linear;transition:all 200ms linear}.uagb-infobox__content-wrap{box-sizing:border-box;position:relative;width:100%;word-break:break-word;z-index:1}.uagb-ifb-separator{display:inline-block;margin:0;border-top-color:#333;border-top-style:solid;border-top-width:2px;line-height:0}.uagb-ifb-button-wrapper{line-height:1}.uagb-ifb-button-wrapper.uagb-ifb-button-type-text .uagb-infobox-cta-link.wp-block-button__link{background-color:unset;border:none}.uagb-ifb-button-wrapper.uagb-ifb-button-type-text .uagb-infobox-cta-link.wp-block-button__link:hover{background-color:unset;border-color:unset}.uagb-ifb-button-wrapper .uagb-infobox-cta-link{cursor:pointer}.uagb-ifb-button-wrapper .wp-block-button__link svg{fill:currentColor}.uagb-infobox__content-wrap a{-webkit-box-shadow:none;box-shadow:none;text-decoration:none}.uagb-ifb-title-wrap{width:100%}.uagb-ifb-title{margin-block-start:0}.uagb-ifb-title-wrap .uagb-ifb-title-prefix{display:block;padding:0;margin:0}.uagb-infobox__content-wrap.uagb-infobox__content-wrap{position:relative}.uagb-ifb-content{width:100%}.uagb-infobox__content-wrap.uagb-infobox,.uagb-ifb-content,.uagb-ifb-title-wrap,.uagb-ifb-title-prefix *,svg.dashicon.dashicons-upload{z-index:1}a.uagb-infobox-link-wrap{color:inherit}.uagb-ifb-content p:empty{display:none}.uagb-infobox__content-wrap .uagb-ifb-content img{display:inline-block;max-width:100%}.uagb-infobox__content-wrap .uagb-ifb-content svg{display:inline-block}.uagb-infobox__content-wrap .uagb-ifb-icon-wrap,.uagb-infobox-icon-left .uagb-ifb-image-content,.uagb-infobox-icon-right .uagb-ifb-image-content{box-sizing:content-box}.uagb-infobox-cta-link>svg{vertical-align:middle;width:15px;height:15px;font-size:15px}.uagb-infobox-cta-link{display:inline-flex}.block-editor-page #wpwrap .uagb-infobox-cta-link svg,.uagb-infobox-cta-link svg{font-style:normal}.uagb-infobox-icon-left-title .uagb-ifb-icon-wrap,.uagb-infobox-icon-left .uagb-ifb-icon-wrap{margin-right:10px;line-height:0}.uagb-infobox-icon-right-title .uagb-ifb-icon-wrap,.uagb-infobox-icon-right .uagb-ifb-icon-wrap{margin-left:10px;line-height:0}.uagb-infobox-icon-left .uagb-ifb-left-right-wrap,.uagb-infobox-icon-right .uagb-ifb-left-right-wrap,.uagb-infobox-icon-left-title .uagb-ifb-left-title-image,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image{display:-webkit-box;display:-ms-flexbox;display:flex}.uagb-infobox-icon-right .uagb-ifb-left-right-wrap,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image{-webkit-box-pack:end;-ms-flex-pack:end;-webkit-justify-content:flex-end;-moz-box-pack:end;justify-content:flex-end}a.uagb-infbox__link-to-all{position:absolute;top:0;left:0;z-index:3;width:100%;height:100%;box-shadow:none;text-decoration:none;-webkit-box-shadow:none}@media only screen and (max-width: 976px){.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-image-content{padding:0;margin-bottom:20px}.uagb-infobox-stacked-tablet.uagb-reverse-order-tablet.uagb-infobox__content-wrap{display:-webkit-inline-box;display:-ms-inline-flexbox;display:-webkit-inline-flex;display:-moz-inline-box;display:inline-flex;flex-direction:column-reverse;-js-display:inline-flex;-webkit-box-orient:vertical;-webkit-box-direction:reverse;-ms-flex-direction:column-reverse;-webkit-flex-direction:column-reverse;-moz-box-orient:vertical;-moz-box-direction:reverse}.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-content,.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-icon-wrap,.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-image-content{display:block;width:100%;text-align:center}.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-icon-wrap,.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-image-content{margin-right:0;margin-left:0}.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap{display:inline-block}.uagb-infobox-icon-left-title.uagb-infobox-stacked-tablet .uagb-ifb-image-content,.uagb-infobox-icon-left-title.uagb-infobox-stacked-tablet .uagb-ifb-icon-wrap,.uagb-infobox-icon-left.uagb-infobox-stacked-tablet .uagb-ifb-image-content,.uagb-infobox-icon-left.uagb-infobox-stacked-tablet .uagb-ifb-icon-wrap{margin-right:0}.uagb-infobox-icon-right-title.uagb-infobox-stacked-tablet .uagb-ifb-image-content,.uagb-infobox-icon-right-title.uagb-infobox-stacked-tablet .uagb-ifb-icon-wrap,.uagb-infobox-icon-right.uagb-infobox-stacked-tablet .uagb-ifb-image-content,.uagb-infobox-icon-right.uagb-infobox-stacked-tablet .uagb-ifb-icon-wrap{margin-left:0}.uagb-infobox-icon-left-title .uagb-ifb-separator{margin:10px 0}}@media screen and (max-width: 767px){.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap{display:inline-block}.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-image-content,.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-icon-wrap{padding:0;margin-bottom:20px;margin-right:0;margin-left:0}.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap.uagb-reverse-order-mobile{display:-webkit-inline-box;display:-ms-inline-flexbox;display:-webkit-inline-flex;display:-moz-inline-box;display:inline-flex;flex-direction:column-reverse;-js-display:inline-flex;-webkit-box-orient:vertical;-webkit-box-direction:reverse;-ms-flex-direction:column-reverse;-webkit-flex-direction:column-reverse;-moz-box-orient:vertical;-moz-box-direction:reverse}.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-image-content,.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-icon-wrap,.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-content{display:block;width:100%;text-align:center}.uagb-infobox-icon-left-title.uagb-infobox-stacked-mobile .uagb-ifb-image-content,.uagb-infobox-icon-left-title.uagb-infobox-stacked-mobile .uagb-ifb-icon-wrap,.uagb-infobox-icon-left.uagb-infobox-stacked-mobile .uagb-ifb-image-content,.uagb-infobox-icon-left.uagb-infobox-stacked-mobile .uagb-ifb-icon-wrap{margin-right:0}.uagb-infobox-icon-right-title.uagb-infobox-stacked-mobile .uagb-ifb-image-content,.uagb-infobox-icon-right-title.uagb-infobox-stacked-mobile .uagb-ifb-icon-wrap,.uagb-infobox-icon-right.uagb-infobox-stacked-mobile .uagb-ifb-image-content,.uagb-infobox-icon-right.uagb-infobox-stacked-mobile .uagb-ifb-icon-wrap{margin-left:0}.uagb-infobox-icon-left-title .uagb-ifb-separator{margin:10px 0}}.uagb-ifb-icon svg{width:inherit;height:inherit;vertical-align:middle}.uagb-ifb-button-icon{height:15px;width:15px;font-size:15px;vertical-align:middle}.uagb-ifb-button-icon svg{height:inherit;width:inherit;display:inline-block}.uagb-ifb-button-icon.uagb-ifb-align-icon-after{float:right}.uagb-ifb-cta-button{display:inline-block}.uagb-disable-link{pointer-events:none}
.wp-block-uagb-image{display:flex}.wp-block-uagb-image__figure{position:relative;display:flex;flex-direction:column;max-width:100%;height:auto;margin:0}.wp-block-uagb-image__figure img{height:auto;display:flex;max-width:100%;transition:box-shadow 0.2s ease}.wp-block-uagb-image__figure>a{display:inline-block}.wp-block-uagb-image__figure figcaption{text-align:center;margin-top:0.5em;margin-bottom:1em}.wp-block-uagb-image--align-left{text-align:left}.wp-block-uagb-image--align-right{text-align:right}.wp-block-uagb-image--align-center{text-align:center}.wp-block-uagb-image--align-full .wp-block-uagb-image__figure{margin-left:calc(50% - 50vw);margin-right:calc(50% - 50vw);max-width:100vw;width:100vw;height:auto}.wp-block-uagb-image--align-full .wp-block-uagb-image__figure img{height:auto;width:100% !important}.wp-block-uagb-image--align-wide .wp-block-uagb-image__figure img{height:auto;width:100%}.wp-block-uagb-image--layout-overlay__color-wrapper{position:absolute;left:0;top:0;right:0;bottom:0;opacity:0.2;background:rgba(0,0,0,0.5);transition:opacity 0.35s ease-in-out}.wp-block-uagb-image--layout-overlay-link{position:absolute;left:0;right:0;bottom:0;top:0}.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity:1}.wp-block-uagb-image--layout-overlay__inner{position:absolute;left:15px;right:15px;bottom:15px;top:15px;display:flex;align-items:center;justify-content:center;flex-direction:column;border-color:#fff;transition:0.35s ease-in-out}.wp-block-uagb-image--layout-overlay__inner.top-left,.wp-block-uagb-image--layout-overlay__inner.top-center,.wp-block-uagb-image--layout-overlay__inner.top-right{justify-content:flex-start}.wp-block-uagb-image--layout-overlay__inner.bottom-left,.wp-block-uagb-image--layout-overlay__inner.bottom-center,.wp-block-uagb-image--layout-overlay__inner.bottom-right{justify-content:flex-end}.wp-block-uagb-image--layout-overlay__inner.top-left,.wp-block-uagb-image--layout-overlay__inner.center-left,.wp-block-uagb-image--layout-overlay__inner.bottom-left{align-items:flex-start}.wp-block-uagb-image--layout-overlay__inner.top-right,.wp-block-uagb-image--layout-overlay__inner.center-right,.wp-block-uagb-image--layout-overlay__inner.bottom-right{align-items:flex-end}.wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{color:#fff;transition:transform 0.35s, opacity 0.35s ease-in-out;transform:translate3d(0, 24px, 0)}.wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width:30%;border-top-width:2px;border-top-color:#fff;border-top-style:solid;margin-bottom:10px;opacity:0;transition:transform 0.4s, opacity 0.4s ease-in-out;transform:translate3d(0, 30px, 0)}.wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity:0;overflow:visible;color:#fff;transition:transform 0.45s, opacity 0.45s ease-in-out;transform:translate3d(0, 35px, 0)}.wp-block-uagb-image--layout-overlay__inner:hover .uagb-image-heading,.wp-block-uagb-image--layout-overlay__inner:hover .uagb-image-separator,.wp-block-uagb-image--layout-overlay__inner:hover .uagb-image-caption{opacity:1;transform:translate3d(0, 0, 0)}.wp-block-uagb-image--effect-zoomin .wp-block-uagb-image__figure img,.wp-block-uagb-image--effect-zoomin .wp-block-uagb-image__figure .wp-block-uagb-image--layout-overlay__color-wrapper{transform:scale(1);transition:transform 0.35s ease-in-out}.wp-block-uagb-image--effect-zoomin .wp-block-uagb-image__figure:hover img,.wp-block-uagb-image--effect-zoomin .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{transform:scale(1.05)}.wp-block-uagb-image--effect-slide .wp-block-uagb-image__figure img,.wp-block-uagb-image--effect-slide .wp-block-uagb-image__figure .wp-block-uagb-image--layout-overlay__color-wrapper{width:calc(100% + 40px) !important;max-width:none !important;transform:translate3d(-40px, 0, 0);transition:transform 0.35s ease-in-out}.wp-block-uagb-image--effect-slide .wp-block-uagb-image__figure:hover img,.wp-block-uagb-image--effect-slide .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{transform:translate3d(0, 0, 0)}.wp-block-uagb-image--effect-grayscale img{filter:grayscale(0%);transition:0.35s ease-in-out}.wp-block-uagb-image--effect-grayscale:hover img{filter:grayscale(100%)}.wp-block-uagb-image--effect-blur img{filter:blur(0);transition:0.35s ease-in-out}.wp-block-uagb-image--effect-blur:hover img{filter:blur(3px)}
.uagb-icon-list__wrap{display:flex;align-items:flex-start;justify-content:flex-start}.wp-block-uagb-icon-list-child{padding:0;transition:all 0.2s;display:inline-flex;color:#3a3a3a;align-items:center;text-decoration:none;box-shadow:none}.wp-block-uagb-icon-list-child span.uagb-icon-list__source-wrap{display:block;align-items:center}.uagb-icon-list__source-wrap svg{display:block}.uagb-icon-list__source-image{width:40px}.uagb-icon-list__outer-wrap .uagb-icon-list__content-wrap{color:#3a3a3a;display:flex;align-items:center}
.wp-block-uagb-icon-list-child{position:relative}.wp-block-uagb-icon-list-child>a{position:absolute;top:0;left:0;width:100%;height:100%}img.uagb-icon-list__source-image{max-width:unset}.wp-block-uagb-icon-list-child .uagb-icon-list__label{word-break:break-word}
.wp-block-uagb-container.uagb-is-root-container .uagb-block-573dc06d{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-573dc06d .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-573dc06d .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-573dc06d .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-573dc06d .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-573dc06d .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-573dc06d > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 48px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-573dc06d{box-shadow: 0px 0px   #00000070 ;padding-top: 112px;padding-bottom: 112px;padding-left: 40px;padding-right: 40px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 48px;column-gap: 0px;overflow: visible;border-color: inherit;background-color: var(--ast-global-color-4);;}.uagb-block-7edef7ac .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-7edef7ac .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-7edef7ac .uagb-ifb-icon svg{fill: #333;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-7edef7ac .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-7edef7ac .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-7edef7ac .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-7edef7ac .uagb-ifb-title-wrap .uagb-ifb-title-prefix{color: var(--ast-global-color-0);margin-bottom: 10px;margin-top: 5px;margin-left: 0px;margin-right: 0px;}.uagb-block-7edef7ac.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-7edef7ac.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0%;margin-top: 0%;margin-left: 15%;margin-right: 15%;}.uagb-block-7edef7ac .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-7edef7ac .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-7edef7ac .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-7edef7ac .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-7edef7ac .uagb-infobox__content-wrap{text-align: center;}.uagb-block-7edef7ac.uagb-infobox-icon-above-title{text-align: center;}.uagb-block-7edef7ac.uagb-infobox__content-wrap{padding-top: 0%;padding-right: 0%;padding-bottom: 0%;padding-left: 0%;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-13533f4b{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-13533f4b .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-13533f4b .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-13533f4b .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-13533f4b .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-13533f4b .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-13533f4b > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 48px;}.wp-block-uagb-container.uagb-block-13533f4b{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 48px;overflow: visible;border-color: inherit;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-ae135cd8{max-width: 32%;width: 100%;}.wp-block-uagb-container.uagb-block-ae135cd8 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-ae135cd8 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-ae135cd8 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-ae135cd8 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-ae135cd8 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-ae135cd8 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 20px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-ae135cd8{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 20px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-4ac021bb.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-4ac021bb .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-4ac021bb.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-4ac021bb.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;text-align: center;}.uagb-block-4ac021bb.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-4ac021bb.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-4ac021bb.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-4ac021bb.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-4ac021bb.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-4ac021bb.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-4ac021bb.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-4ac021bb.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-4ac021bb.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 368px;height: 460px;}.uagb-block-4ac021bb.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-4ac021bb.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-4ac021bb.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-4ac021bb.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-bbf7b6e6{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-bbf7b6e6 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-bbf7b6e6 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-bbf7b6e6 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-bbf7b6e6 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-bbf7b6e6 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-bbf7b6e6 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 16px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-bbf7b6e6{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 16px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;}.uagb-block-82b9f747 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-82b9f747 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-82b9f747 .uagb-ifb-icon svg{fill: #333;}.uagb-block-82b9f747.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-82b9f747 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-82b9f747 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-82b9f747.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-82b9f747.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-82b9f747 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-82b9f747 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-82b9f747 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-82b9f747 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-82b9f747.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-82b9f747.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-82b9f747.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-82b9f747.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-82b9f747 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-82b9f747.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-82b9f747.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-82b9f747 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-82b9f747 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-82b9f747 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-82b9f747 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-82b9f747.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-82b9f747.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-82b9f747 .uagb-infobox__content-wrap{text-align: center;}.uagb-block-82b9f747.uagb-infobox-icon-above-title{text-align: center;}.uagb-block-82b9f747 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-82b9f747.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-82b9f747 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-82b9f747 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-82b9f747.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-icon-list.uagb-block-90f378ae .uagb-icon-list__source-image{width: 16px;}.wp-block-uagb-icon-list.uagb-block-90f378ae .wp-block-uagb-icon-list-child .uagb-icon-list__source-wrap svg{width: 16px;height: 16px;font-size: 16px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.wp-block-uagb-icon-list.uagb-block-90f378ae .wp-block-uagb-icon-list-child .uagb-icon-list__source-wrap{padding: 0px;border-radius: 0px;border-width: 0px;align-self: center;}.wp-block-uagb-icon-list.uagb-block-90f378ae .wp-block-uagb-icon-list-child .uagb-icon-list__label{text-decoration: !important;line-height: em;}.wp-block-uagb-icon-list.uagb-block-90f378ae .uagb-icon-list__wrap{display: flex;flex-direction: row;justify-content: center;-webkit-box-pack: center;-ms-flex-pack: center;-webkit-box-align: center;-ms-flex-align: center;align-items: center;padding-top: 12px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.wp-block-uagb-icon-list.uagb-block-90f378ae .uagb-icon-list__label{text-align: center;}.wp-block-uagb-icon-list.uagb-block-90f378ae .wp-block-uagb-icon-list-child{text-align: center;}.wp-block-uagb-icon-list.uagb-block-90f378ae.wp-block-uagb-icon-list .wp-block-uagb-icon-list-child{margin-left: 10px;margin-right: 10px;display: inline-flex;}.wp-block-uagb-icon-list.uagb-block-90f378ae.wp-block-uagb-icon-list .wp-block-uagb-icon-list-child:first-child{margin-left: 0;}.wp-block-uagb-icon-list.uagb-block-90f378ae.wp-block-uagb-icon-list .wp-block-uagb-icon-list-child:last-child{margin-right: 0;}.uagb-block-ed9967b6.wp-block-uagb-icon-list-child .uagb-icon-list__source-wrap{background:  !important;border-color:  !important;}.uagb-block-ed9967b6.wp-block-uagb-icon-list-child:hover .uagb-icon-list__source-wrap{background:  !important;border-color:  !important;}.uagb-block-8968b5e9.wp-block-uagb-icon-list-child .uagb-icon-list__source-wrap{background:  !important;border-color:  !important;}.uagb-block-8968b5e9.wp-block-uagb-icon-list-child:hover .uagb-icon-list__source-wrap{background:  !important;border-color:  !important;}.uagb-block-0a51137b.wp-block-uagb-icon-list-child .uagb-icon-list__source-wrap{background:  !important;border-color:  !important;}.uagb-block-0a51137b.wp-block-uagb-icon-list-child:hover .uagb-icon-list__source-wrap{background:  !important;border-color:  !important;}.uagb-block-106ef350.wp-block-uagb-icon-list-child .uagb-icon-list__source-wrap{background:  !important;border-color:  !important;}.uagb-block-106ef350.wp-block-uagb-icon-list-child:hover .uagb-icon-list__source-wrap{background:  !important;border-color:  !important;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-3bd77aa2{max-width: 32%;width: 100%;}.wp-block-uagb-container.uagb-block-3bd77aa2 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-3bd77aa2 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-3bd77aa2 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-3bd77aa2 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-3bd77aa2 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-3bd77aa2 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 20px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-3bd77aa2{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 20px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-1f0744c7.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-1f0744c7 .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-1f0744c7.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-1f0744c7.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;text-align: center;}.uagb-block-1f0744c7.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-1f0744c7.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-1f0744c7.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-1f0744c7.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-1f0744c7.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-1f0744c7.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-1f0744c7.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-1f0744c7.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-1f0744c7.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 368px;height: 460px;}.uagb-block-1f0744c7.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-1f0744c7.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-1f0744c7.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-1f0744c7.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-7ffa1f27{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-7ffa1f27 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-7ffa1f27 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-7ffa1f27 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-7ffa1f27 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-7ffa1f27 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-7ffa1f27 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 16px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-7ffa1f27{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 16px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;}.uagb-block-e6dd03d4 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-e6dd03d4 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-e6dd03d4 .uagb-ifb-icon svg{fill: #333;}.uagb-block-e6dd03d4.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-e6dd03d4 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-e6dd03d4 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-e6dd03d4.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-e6dd03d4.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-e6dd03d4 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-e6dd03d4 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-e6dd03d4 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-e6dd03d4 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-e6dd03d4.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-e6dd03d4.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-e6dd03d4.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-e6dd03d4.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-e6dd03d4 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-e6dd03d4.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-e6dd03d4.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-e6dd03d4 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-e6dd03d4 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-e6dd03d4 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-e6dd03d4 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-e6dd03d4.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-e6dd03d4.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-e6dd03d4 .uagb-infobox__content-wrap{text-align: center;}.uagb-block-e6dd03d4.uagb-infobox-icon-above-title{text-align: center;}.uagb-block-e6dd03d4 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-e6dd03d4.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-e6dd03d4 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-e6dd03d4 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-e6dd03d4.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-icon-list.uagb-block-9758af8c .uagb-icon-list__source-image{width: 16px;}.wp-block-uagb-icon-list.uagb-block-9758af8c .wp-block-uagb-icon-list-child .uagb-icon-list__source-wrap svg{width: 16px;height: 16px;font-size: 16px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.wp-block-uagb-icon-list.uagb-block-9758af8c .wp-block-uagb-icon-list-child .uagb-icon-list__source-wrap{padding: 0px;border-radius: 0px;border-width: 0px;align-self: center;}.wp-block-uagb-icon-list.uagb-block-9758af8c .wp-block-uagb-icon-list-child .uagb-icon-list__label{text-decoration: !important;line-height: em;}.wp-block-uagb-icon-list.uagb-block-9758af8c .uagb-icon-list__wrap{display: flex;flex-direction: row;justify-content: center;-webkit-box-pack: center;-ms-flex-pack: center;-webkit-box-align: center;-ms-flex-align: center;align-items: center;padding-top: 12px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.wp-block-uagb-icon-list.uagb-block-9758af8c .uagb-icon-list__label{text-align: center;}.wp-block-uagb-icon-list.uagb-block-9758af8c .wp-block-uagb-icon-list-child{text-align: center;}.wp-block-uagb-icon-list.uagb-block-9758af8c.wp-block-uagb-icon-list .wp-block-uagb-icon-list-child{margin-left: 10px;margin-right: 10px;display: inline-flex;}.wp-block-uagb-icon-list.uagb-block-9758af8c.wp-block-uagb-icon-list .wp-block-uagb-icon-list-child:first-child{margin-left: 0;}.wp-block-uagb-icon-list.uagb-block-9758af8c.wp-block-uagb-icon-list .wp-block-uagb-icon-list-child:last-child{margin-right: 0;}.uagb-block-12947505.wp-block-uagb-icon-list-child .uagb-icon-list__source-wrap{background:  !important;border-color:  !important;}.uagb-block-12947505.wp-block-uagb-icon-list-child:hover .uagb-icon-list__source-wrap{background:  !important;border-color:  !important;}.uagb-block-733db7aa.wp-block-uagb-icon-list-child .uagb-icon-list__source-wrap{background:  !important;border-color:  !important;}.uagb-block-733db7aa.wp-block-uagb-icon-list-child:hover .uagb-icon-list__source-wrap{background:  !important;border-color:  !important;}.uagb-block-ef67e107.wp-block-uagb-icon-list-child .uagb-icon-list__source-wrap{background:  !important;border-color:  !important;}.uagb-block-ef67e107.wp-block-uagb-icon-list-child:hover .uagb-icon-list__source-wrap{background:  !important;border-color:  !important;}.uagb-block-fa7ea295.wp-block-uagb-icon-list-child .uagb-icon-list__source-wrap{background:  !important;border-color:  !important;}.uagb-block-fa7ea295.wp-block-uagb-icon-list-child:hover .uagb-icon-list__source-wrap{background:  !important;border-color:  !important;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-b30185e1{max-width: 32%;width: 100%;}.wp-block-uagb-container.uagb-block-b30185e1 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-b30185e1 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-b30185e1 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-b30185e1 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-b30185e1 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-b30185e1 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 20px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-b30185e1{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 20px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-11a0a5ef.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-11a0a5ef .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-11a0a5ef.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-11a0a5ef.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;text-align: center;}.uagb-block-11a0a5ef.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-11a0a5ef.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-11a0a5ef.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-11a0a5ef.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-11a0a5ef.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-11a0a5ef.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-11a0a5ef.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-11a0a5ef.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-11a0a5ef.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 368px;height: 460px;}.uagb-block-11a0a5ef.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-11a0a5ef.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-11a0a5ef.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-11a0a5ef.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-c15bdf8e{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-c15bdf8e .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-c15bdf8e .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-c15bdf8e .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-c15bdf8e .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-c15bdf8e .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-c15bdf8e > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 16px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-c15bdf8e{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 16px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;}.uagb-block-a0382e85 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-a0382e85 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-a0382e85 .uagb-ifb-icon svg{fill: #333;}.uagb-block-a0382e85.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-a0382e85 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-a0382e85 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-a0382e85.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-a0382e85.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-a0382e85 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-a0382e85 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-a0382e85 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-a0382e85 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-a0382e85.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-a0382e85.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-a0382e85.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-a0382e85.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-a0382e85 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-a0382e85.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-a0382e85.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-a0382e85 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-a0382e85 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-a0382e85 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-a0382e85 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-a0382e85.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-a0382e85.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-a0382e85 .uagb-infobox__content-wrap{text-align: center;}.uagb-block-a0382e85.uagb-infobox-icon-above-title{text-align: center;}.uagb-block-a0382e85 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-a0382e85.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-a0382e85 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-a0382e85 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-a0382e85.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-icon-list.uagb-block-472091b1 .uagb-icon-list__source-image{width: 16px;}.wp-block-uagb-icon-list.uagb-block-472091b1 .wp-block-uagb-icon-list-child .uagb-icon-list__source-wrap svg{width: 16px;height: 16px;font-size: 16px;color: var(--ast-global-color-2);fill: var(--ast-global-color-2);}.wp-block-uagb-icon-list.uagb-block-472091b1 .wp-block-uagb-icon-list-child .uagb-icon-list__source-wrap{padding: 0px;border-radius: 0px;border-width: 0px;align-self: center;}.wp-block-uagb-icon-list.uagb-block-472091b1 .wp-block-uagb-icon-list-child .uagb-icon-list__label{text-decoration: !important;line-height: em;}.wp-block-uagb-icon-list.uagb-block-472091b1 .uagb-icon-list__wrap{display: flex;flex-direction: row;justify-content: center;-webkit-box-pack: center;-ms-flex-pack: center;-webkit-box-align: center;-ms-flex-align: center;align-items: center;padding-top: 12px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.wp-block-uagb-icon-list.uagb-block-472091b1 .uagb-icon-list__label{text-align: center;}.wp-block-uagb-icon-list.uagb-block-472091b1 .wp-block-uagb-icon-list-child{text-align: center;}.wp-block-uagb-icon-list.uagb-block-472091b1.wp-block-uagb-icon-list .wp-block-uagb-icon-list-child{margin-left: 10px;margin-right: 10px;display: inline-flex;}.wp-block-uagb-icon-list.uagb-block-472091b1.wp-block-uagb-icon-list .wp-block-uagb-icon-list-child:first-child{margin-left: 0;}.wp-block-uagb-icon-list.uagb-block-472091b1.wp-block-uagb-icon-list .wp-block-uagb-icon-list-child:last-child{margin-right: 0;}.uagb-block-c759762c.wp-block-uagb-icon-list-child .uagb-icon-list__source-wrap{background:  !important;border-color:  !important;}.uagb-block-c759762c.wp-block-uagb-icon-list-child:hover .uagb-icon-list__source-wrap{background:  !important;border-color:  !important;}.uagb-block-b4b004d8.wp-block-uagb-icon-list-child .uagb-icon-list__source-wrap{background:  !important;border-color:  !important;}.uagb-block-b4b004d8.wp-block-uagb-icon-list-child:hover .uagb-icon-list__source-wrap{background:  !important;border-color:  !important;}.uagb-block-ea9aac1d.wp-block-uagb-icon-list-child .uagb-icon-list__source-wrap{background:  !important;border-color:  !important;}.uagb-block-ea9aac1d.wp-block-uagb-icon-list-child:hover .uagb-icon-list__source-wrap{background:  !important;border-color:  !important;}.uagb-block-1be5407c.wp-block-uagb-icon-list-child .uagb-icon-list__source-wrap{background:  !important;border-color:  !important;}.uagb-block-1be5407c.wp-block-uagb-icon-list-child:hover .uagb-icon-list__source-wrap{background:  !important;border-color:  !important;}@media only screen and (max-width: 976px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-573dc06d{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-573dc06d > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 40px;}.wp-block-uagb-container.uagb-block-573dc06d{padding-top: 80px;padding-bottom: 80px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 40px;background-color: var(--ast-global-color-4);;}.uagb-block-7edef7ac.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 16px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-7edef7ac.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0%;margin-top: 0%;margin-left: 8%;margin-right: 8%;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-7edef7ac .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-7edef7ac .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-7edef7ac .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap{padding-top: 0%;padding-right: 0%;padding-bottom: 0%;padding-left: 0%;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-13533f4b{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-13533f4b > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;row-gap: 24px;column-gap: 24px;}.wp-block-uagb-container.uagb-block-13533f4b{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 24px;align-items: stretch;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-ae135cd8{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-ae135cd8 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-ae135cd8{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;}.uagb-block-4ac021bb.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 368px;height: 300px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-bbf7b6e6{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-bbf7b6e6 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-bbf7b6e6{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;}.uagb-block-82b9f747.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-82b9f747.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-82b9f747.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-82b9f747 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-82b9f747 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-82b9f747 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-82b9f747 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-82b9f747 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-82b9f747 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-82b9f747.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-82b9f747 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-82b9f747 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-82b9f747.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-icon-list.uagb-block-90f378ae .uagb-icon-list__source-image{width: 16px;}.wp-block-uagb-icon-list.uagb-block-90f378ae .wp-block-uagb-icon-list-child .uagb-icon-list__source-wrap svg{width: 16px;height: 16px;font-size: 16px;}.wp-block-uagb-icon-list.uagb-block-90f378ae .wp-block-uagb-icon-list-child .uagb-icon-list__source-wrap {padding: 0px;border-width: 0px;align-self: center;}.wp-block-uagb-icon-list.uagb-block-90f378ae .uagb-icon-list__wrap{display: flex;flex-direction: row;justify-content: center;-webkit-box-pack: center;-ms-flex-pack: center;-webkit-box-align: center;-ms-flex-align: center;align-items: center;}.wp-block-uagb-icon-list.uagb-block-90f378ae.wp-block-uagb-icon-list .wp-block-uagb-icon-list-child{margin-left: 10px;margin-right: 10px;display: inline-flex;}.wp-block-uagb-icon-list.uagb-block-90f378ae.wp-block-uagb-icon-list .wp-block-uagb-icon-list-child:first-child{margin-left: 0;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-3bd77aa2{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-3bd77aa2 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-3bd77aa2{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;}.uagb-block-1f0744c7.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 358px;height: 300px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-7ffa1f27{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-7ffa1f27 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-7ffa1f27{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;}.uagb-block-e6dd03d4.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-e6dd03d4.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-e6dd03d4.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-e6dd03d4 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-e6dd03d4 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-e6dd03d4 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-e6dd03d4 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-e6dd03d4 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-e6dd03d4 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-e6dd03d4.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-e6dd03d4 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-e6dd03d4 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-e6dd03d4.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-icon-list.uagb-block-9758af8c .uagb-icon-list__source-image{width: 16px;}.wp-block-uagb-icon-list.uagb-block-9758af8c .wp-block-uagb-icon-list-child .uagb-icon-list__source-wrap svg{width: 16px;height: 16px;font-size: 16px;}.wp-block-uagb-icon-list.uagb-block-9758af8c .wp-block-uagb-icon-list-child .uagb-icon-list__source-wrap {padding: 0px;border-width: 0px;align-self: center;}.wp-block-uagb-icon-list.uagb-block-9758af8c .uagb-icon-list__wrap{display: flex;flex-direction: row;justify-content: center;-webkit-box-pack: center;-ms-flex-pack: center;-webkit-box-align: center;-ms-flex-align: center;align-items: center;}.wp-block-uagb-icon-list.uagb-block-9758af8c.wp-block-uagb-icon-list .wp-block-uagb-icon-list-child{margin-left: 10px;margin-right: 10px;display: inline-flex;}.wp-block-uagb-icon-list.uagb-block-9758af8c.wp-block-uagb-icon-list .wp-block-uagb-icon-list-child:first-child{margin-left: 0;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-b30185e1{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-b30185e1 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-b30185e1{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;}.uagb-block-11a0a5ef.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 368px;height: 300px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-c15bdf8e{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-c15bdf8e > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-c15bdf8e{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;}.uagb-block-a0382e85.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-a0382e85.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-a0382e85.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-a0382e85 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-a0382e85 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-a0382e85 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-a0382e85 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-a0382e85 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-a0382e85 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-a0382e85.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-a0382e85 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-a0382e85 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-a0382e85.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-icon-list.uagb-block-472091b1 .uagb-icon-list__source-image{width: 16px;}.wp-block-uagb-icon-list.uagb-block-472091b1 .wp-block-uagb-icon-list-child .uagb-icon-list__source-wrap svg{width: 16px;height: 16px;font-size: 16px;}.wp-block-uagb-icon-list.uagb-block-472091b1 .wp-block-uagb-icon-list-child .uagb-icon-list__source-wrap {padding: 0px;border-width: 0px;align-self: center;}.wp-block-uagb-icon-list.uagb-block-472091b1 .uagb-icon-list__wrap{display: flex;flex-direction: row;justify-content: center;-webkit-box-pack: center;-ms-flex-pack: center;-webkit-box-align: center;-ms-flex-align: center;align-items: center;}.wp-block-uagb-icon-list.uagb-block-472091b1.wp-block-uagb-icon-list .wp-block-uagb-icon-list-child{margin-left: 10px;margin-right: 10px;display: inline-flex;}.wp-block-uagb-icon-list.uagb-block-472091b1.wp-block-uagb-icon-list .wp-block-uagb-icon-list-child:first-child{margin-left: 0;}}@media only screen and (max-width: 767px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-573dc06d{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-573dc06d > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 36px;}.wp-block-uagb-container.uagb-block-573dc06d{padding-top: 64px;padding-bottom: 64px;padding-left: 20px;padding-right: 20px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 36px;background-color: var(--ast-global-color-4);;}.uagb-block-7edef7ac.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 12px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-7edef7ac.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-7edef7ac .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-7edef7ac .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-7edef7ac .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-7edef7ac.uagb-infobox-icon-above-title{text-align: center;}.uagb-block-7edef7ac.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-13533f4b{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-13533f4b > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;flex-wrap: wrap;row-gap: 48px;}.wp-block-uagb-container.uagb-block-13533f4b{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 48px;align-items: stretch;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-ae135cd8{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-ae135cd8 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-ae135cd8{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;flex-wrap: wrap;}.uagb-block-4ac021bb.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 400px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-bbf7b6e6{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-bbf7b6e6 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-bbf7b6e6{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;flex-wrap: wrap;}.uagb-block-82b9f747.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-82b9f747.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-82b9f747 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-82b9f747 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-82b9f747.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-82b9f747 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-82b9f747 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-82b9f747 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-82b9f747 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-82b9f747.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-82b9f747 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-82b9f747 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-82b9f747.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-icon-list.uagb-block-90f378ae .uagb-icon-list__source-image{width: 16px;}.wp-block-uagb-icon-list.uagb-block-90f378ae .wp-block-uagb-icon-list-child .uagb-icon-list__source-wrap svg{width: 16px;height: 16px;font-size: 16px;}.wp-block-uagb-icon-list.uagb-block-90f378ae .wp-block-uagb-icon-list-child .uagb-icon-list__source-wrap{padding: 0px;border-width: 0px;align-self: center;}.wp-block-uagb-icon-list.uagb-block-90f378ae .uagb-icon-list__wrap{display: flex;flex-direction: row;justify-content: center;-webkit-box-pack: center;-ms-flex-pack: center;-webkit-box-align: center;-ms-flex-align: center;align-items: center;}.wp-block-uagb-icon-list.uagb-block-90f378ae.wp-block-uagb-icon-list .wp-block-uagb-icon-list-child{margin-left: 10px;margin-right: 10px;display: inline-flex;}.wp-block-uagb-icon-list.uagb-block-90f378ae.wp-block-uagb-icon-list .wp-block-uagb-icon-list-child:first-child{margin-left: 0;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-3bd77aa2{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-3bd77aa2 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-3bd77aa2{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;flex-wrap: wrap;}.uagb-block-1f0744c7.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 358px;height: 400px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-7ffa1f27{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-7ffa1f27 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-7ffa1f27{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;flex-wrap: wrap;}.uagb-block-e6dd03d4.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-e6dd03d4.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-e6dd03d4 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-e6dd03d4 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-e6dd03d4.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-e6dd03d4 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-e6dd03d4 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-e6dd03d4 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-e6dd03d4 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-e6dd03d4.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-e6dd03d4 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-e6dd03d4 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-e6dd03d4.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-icon-list.uagb-block-9758af8c .uagb-icon-list__source-image{width: 16px;}.wp-block-uagb-icon-list.uagb-block-9758af8c .wp-block-uagb-icon-list-child .uagb-icon-list__source-wrap svg{width: 16px;height: 16px;font-size: 16px;}.wp-block-uagb-icon-list.uagb-block-9758af8c .wp-block-uagb-icon-list-child .uagb-icon-list__source-wrap{padding: 0px;border-width: 0px;align-self: center;}.wp-block-uagb-icon-list.uagb-block-9758af8c .uagb-icon-list__wrap{display: flex;flex-direction: row;justify-content: center;-webkit-box-pack: center;-ms-flex-pack: center;-webkit-box-align: center;-ms-flex-align: center;align-items: center;}.wp-block-uagb-icon-list.uagb-block-9758af8c.wp-block-uagb-icon-list .wp-block-uagb-icon-list-child{margin-left: 10px;margin-right: 10px;display: inline-flex;}.wp-block-uagb-icon-list.uagb-block-9758af8c.wp-block-uagb-icon-list .wp-block-uagb-icon-list-child:first-child{margin-left: 0;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-b30185e1{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-b30185e1 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-b30185e1{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;flex-wrap: wrap;}.uagb-block-11a0a5ef.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 400px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-c15bdf8e{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-c15bdf8e > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-c15bdf8e{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;flex-wrap: wrap;}.uagb-block-a0382e85.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-a0382e85.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-a0382e85 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-a0382e85 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-a0382e85.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-a0382e85 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-a0382e85 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-a0382e85 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-a0382e85 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-a0382e85.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-a0382e85 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-a0382e85 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-a0382e85.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-icon-list.uagb-block-472091b1 .uagb-icon-list__source-image{width: 16px;}.wp-block-uagb-icon-list.uagb-block-472091b1 .wp-block-uagb-icon-list-child .uagb-icon-list__source-wrap svg{width: 16px;height: 16px;font-size: 16px;}.wp-block-uagb-icon-list.uagb-block-472091b1 .wp-block-uagb-icon-list-child .uagb-icon-list__source-wrap{padding: 0px;border-width: 0px;align-self: center;}.wp-block-uagb-icon-list.uagb-block-472091b1 .uagb-icon-list__wrap{display: flex;flex-direction: row;justify-content: center;-webkit-box-pack: center;-ms-flex-pack: center;-webkit-box-align: center;-ms-flex-align: center;align-items: center;}.wp-block-uagb-icon-list.uagb-block-472091b1.wp-block-uagb-icon-list .wp-block-uagb-icon-list-child{margin-left: 10px;margin-right: 10px;display: inline-flex;}.wp-block-uagb-icon-list.uagb-block-472091b1.wp-block-uagb-icon-list .wp-block-uagb-icon-list-child:first-child{margin-left: 0;}}";s:7:"content";s:14705:"
<div class="wp-block-uagb-container uagb-block-573dc06d alignfull uagb-is-root-container"><div class="uagb-container-inner-blocks-wrap">
<div class="wp-block-uagb-info-box uagb-block-7edef7ac uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h2 class="uagb-ifb-title">Meet Our Talented Team</h2></div><p class="uagb-ifb-desc">Our passionate and dedicated team brings together a diverse range of skills and expertise to deliver exceptional results. From creative visionaries to meticulous strategists, we work seamlessly together to meet and exceed our clients' expectations.</p></div></div>



<div class="wp-block-uagb-container uagb-block-13533f4b">
<div class="wp-block-uagb-container uagb-block-ae135cd8">
<div class="wp-block-uagb-image alignleft uagb-block-4ac021bb wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-left"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/09/team-skip-01.jpg ,https://websitedemos.net/wp-content/uploads/2023/09/team-skip-01.jpg 780w" sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/09/team-skip-01.jpg" alt="" class="uag-image-77912" width="368" height="460" title="" loading="lazy"/></figure></div>



<div class="wp-block-uagb-container uagb-block-bbf7b6e6">
<div class="wp-block-uagb-info-box uagb-block-82b9f747 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h5 class="uagb-ifb-title">Jane Cooper</h5></div><p class="uagb-ifb-desc">Share some details here. This is a flexible section where you can share anything you want. It could be details or some information.</p></div></div>



<div class="wp-block-uagb-icon-list uagb-block-90f378ae"><div class="uagb-icon-list__wrap">
<div class="wp-block-uagb-icon-list-child uagb-block-ed9967b6"><a target="_self" aria-label="List item" rel="noopener noreferrer" href="#"> </a><span class="uagb-icon-list__source-wrap"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 512 512"><path d="M504 256C504 119 393 8 256 8S8 119 8 256c0 123.8 90.69 226.4 209.3 245V327.7h-63V256h63v-54.64c0-62.15 37-96.48 93.67-96.48 27.14 0 55.52 4.84 55.52 4.84v61h-31.28c-30.8 0-40.41 19.12-40.41 38.73V256h68.78l-11 71.69h-57.78V501C413.3 482.4 504 379.8 504 256z"></path></svg></span></div>



<div class="wp-block-uagb-icon-list-child uagb-block-8968b5e9"><a target="_self" aria-label="" rel="noopener noreferrer" href="#"> </a><span class="uagb-icon-list__source-wrap"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 448 512"><path d="M224.1 141c-63.6 0-114.9 51.3-114.9 114.9s51.3 114.9 114.9 114.9S339 319.5 339 255.9 287.7 141 224.1 141zm0 189.6c-41.1 0-74.7-33.5-74.7-74.7s33.5-74.7 74.7-74.7 74.7 33.5 74.7 74.7-33.6 74.7-74.7 74.7zm146.4-194.3c0 14.9-12 26.8-26.8 26.8-14.9 0-26.8-12-26.8-26.8s12-26.8 26.8-26.8 26.8 12 26.8 26.8zm76.1 27.2c-1.7-35.9-9.9-67.7-36.2-93.9-26.2-26.2-58-34.4-93.9-36.2-37-2.1-147.9-2.1-184.9 0-35.8 1.7-67.6 9.9-93.9 36.1s-34.4 58-36.2 93.9c-2.1 37-2.1 147.9 0 184.9 1.7 35.9 9.9 67.7 36.2 93.9s58 34.4 93.9 36.2c37 2.1 147.9 2.1 184.9 0 35.9-1.7 67.7-9.9 93.9-36.2 26.2-26.2 34.4-58 36.2-93.9 2.1-37 2.1-147.8 0-184.8zM398.8 388c-7.8 19.6-22.9 34.7-42.6 42.6-29.5 11.7-99.5 9-132.1 9s-102.7 2.6-132.1-9c-19.6-7.8-34.7-22.9-42.6-42.6-11.7-29.5-9-99.5-9-132.1s-2.6-102.7 9-132.1c7.8-19.6 22.9-34.7 42.6-42.6 29.5-11.7 99.5-9 132.1-9s102.7-2.6 132.1 9c19.6 7.8 34.7 22.9 42.6 42.6 11.7 29.5 9 99.5 9 132.1s2.7 102.7-9 132.1z"></path></svg></span></div>



<div class="wp-block-uagb-icon-list-child uagb-block-0a51137b"><a target="_self" aria-label="List item" rel="noopener noreferrer" href="#"> </a><span class="uagb-icon-list__source-wrap"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 512 512"><path d="M459.4 151.7c.325 4.548 .325 9.097 .325 13.65 0 138.7-105.6 298.6-298.6 298.6-59.45 0-114.7-17.22-161.1-47.11 8.447 .974 16.57 1.299 25.34 1.299 49.06 0 94.21-16.57 130.3-44.83-46.13-.975-84.79-31.19-98.11-72.77 6.498 .974 12.99 1.624 19.82 1.624 9.421 0 18.84-1.3 27.61-3.573-48.08-9.747-84.14-51.98-84.14-102.1v-1.299c13.97 7.797 30.21 12.67 47.43 13.32-28.26-18.84-46.78-51.01-46.78-87.39 0-19.49 5.197-37.36 14.29-52.95 51.65 63.67 129.3 105.3 216.4 109.8-1.624-7.797-2.599-15.92-2.599-24.04 0-57.83 46.78-104.9 104.9-104.9 30.21 0 57.5 12.67 76.67 33.14 23.72-4.548 46.46-13.32 66.6-25.34-7.798 24.37-24.37 44.83-46.13 57.83 21.12-2.273 41.58-8.122 60.43-16.24-14.29 20.79-32.16 39.31-52.63 54.25z"></path></svg></span></div>



<div class="wp-block-uagb-icon-list-child uagb-block-106ef350"><a target="_self" aria-label="List item" rel="noopener noreferrer" href="#"> </a><span class="uagb-icon-list__source-wrap"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 576 512"><path d="M549.7 124.1c-6.281-23.65-24.79-42.28-48.28-48.6C458.8 64 288 64 288 64S117.2 64 74.63 75.49c-23.5 6.322-42 24.95-48.28 48.6-11.41 42.87-11.41 132.3-11.41 132.3s0 89.44 11.41 132.3c6.281 23.65 24.79 41.5 48.28 47.82C117.2 448 288 448 288 448s170.8 0 213.4-11.49c23.5-6.321 42-24.17 48.28-47.82 11.41-42.87 11.41-132.3 11.41-132.3s0-89.44-11.41-132.3zm-317.5 213.5V175.2l142.7 81.21-142.7 81.2z"></path></svg></span></div>
</div></div>
</div>
</div>



<div class="wp-block-uagb-container uagb-block-3bd77aa2">
<div class="wp-block-uagb-image alignleft uagb-block-1f0744c7 wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-left"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/09/team-skip-24.jpg " sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/09/team-skip-24.jpg" alt="" class="uag-image-78344" width="368" height="460" title="" loading="lazy"/></figure></div>



<div class="wp-block-uagb-container uagb-block-7ffa1f27">
<div class="wp-block-uagb-info-box uagb-block-e6dd03d4 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h5 class="uagb-ifb-title">Wade Warren</h5></div><p class="uagb-ifb-desc">Share some details here. This is a flexible section where you can share anything you want. It could be details or some information.</p></div></div>



<div class="wp-block-uagb-icon-list uagb-block-9758af8c"><div class="uagb-icon-list__wrap">
<div class="wp-block-uagb-icon-list-child uagb-block-12947505"><a target="_self" aria-label="List item" rel="noopener noreferrer" href="#"> </a><span class="uagb-icon-list__source-wrap"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 512 512"><path d="M504 256C504 119 393 8 256 8S8 119 8 256c0 123.8 90.69 226.4 209.3 245V327.7h-63V256h63v-54.64c0-62.15 37-96.48 93.67-96.48 27.14 0 55.52 4.84 55.52 4.84v61h-31.28c-30.8 0-40.41 19.12-40.41 38.73V256h68.78l-11 71.69h-57.78V501C413.3 482.4 504 379.8 504 256z"></path></svg></span></div>



<div class="wp-block-uagb-icon-list-child uagb-block-733db7aa"><a target="_self" aria-label="" rel="noopener noreferrer" href="#"> </a><span class="uagb-icon-list__source-wrap"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 448 512"><path d="M224.1 141c-63.6 0-114.9 51.3-114.9 114.9s51.3 114.9 114.9 114.9S339 319.5 339 255.9 287.7 141 224.1 141zm0 189.6c-41.1 0-74.7-33.5-74.7-74.7s33.5-74.7 74.7-74.7 74.7 33.5 74.7 74.7-33.6 74.7-74.7 74.7zm146.4-194.3c0 14.9-12 26.8-26.8 26.8-14.9 0-26.8-12-26.8-26.8s12-26.8 26.8-26.8 26.8 12 26.8 26.8zm76.1 27.2c-1.7-35.9-9.9-67.7-36.2-93.9-26.2-26.2-58-34.4-93.9-36.2-37-2.1-147.9-2.1-184.9 0-35.8 1.7-67.6 9.9-93.9 36.1s-34.4 58-36.2 93.9c-2.1 37-2.1 147.9 0 184.9 1.7 35.9 9.9 67.7 36.2 93.9s58 34.4 93.9 36.2c37 2.1 147.9 2.1 184.9 0 35.9-1.7 67.7-9.9 93.9-36.2 26.2-26.2 34.4-58 36.2-93.9 2.1-37 2.1-147.8 0-184.8zM398.8 388c-7.8 19.6-22.9 34.7-42.6 42.6-29.5 11.7-99.5 9-132.1 9s-102.7 2.6-132.1-9c-19.6-7.8-34.7-22.9-42.6-42.6-11.7-29.5-9-99.5-9-132.1s-2.6-102.7 9-132.1c7.8-19.6 22.9-34.7 42.6-42.6 29.5-11.7 99.5-9 132.1-9s102.7-2.6 132.1 9c19.6 7.8 34.7 22.9 42.6 42.6 11.7 29.5 9 99.5 9 132.1s2.7 102.7-9 132.1z"></path></svg></span></div>



<div class="wp-block-uagb-icon-list-child uagb-block-ef67e107"><a target="_self" aria-label="List item" rel="noopener noreferrer" href="#"> </a><span class="uagb-icon-list__source-wrap"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 512 512"><path d="M459.4 151.7c.325 4.548 .325 9.097 .325 13.65 0 138.7-105.6 298.6-298.6 298.6-59.45 0-114.7-17.22-161.1-47.11 8.447 .974 16.57 1.299 25.34 1.299 49.06 0 94.21-16.57 130.3-44.83-46.13-.975-84.79-31.19-98.11-72.77 6.498 .974 12.99 1.624 19.82 1.624 9.421 0 18.84-1.3 27.61-3.573-48.08-9.747-84.14-51.98-84.14-102.1v-1.299c13.97 7.797 30.21 12.67 47.43 13.32-28.26-18.84-46.78-51.01-46.78-87.39 0-19.49 5.197-37.36 14.29-52.95 51.65 63.67 129.3 105.3 216.4 109.8-1.624-7.797-2.599-15.92-2.599-24.04 0-57.83 46.78-104.9 104.9-104.9 30.21 0 57.5 12.67 76.67 33.14 23.72-4.548 46.46-13.32 66.6-25.34-7.798 24.37-24.37 44.83-46.13 57.83 21.12-2.273 41.58-8.122 60.43-16.24-14.29 20.79-32.16 39.31-52.63 54.25z"></path></svg></span></div>



<div class="wp-block-uagb-icon-list-child uagb-block-fa7ea295"><a target="_self" aria-label="List item" rel="noopener noreferrer" href="#"> </a><span class="uagb-icon-list__source-wrap"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 576 512"><path d="M549.7 124.1c-6.281-23.65-24.79-42.28-48.28-48.6C458.8 64 288 64 288 64S117.2 64 74.63 75.49c-23.5 6.322-42 24.95-48.28 48.6-11.41 42.87-11.41 132.3-11.41 132.3s0 89.44 11.41 132.3c6.281 23.65 24.79 41.5 48.28 47.82C117.2 448 288 448 288 448s170.8 0 213.4-11.49c23.5-6.321 42-24.17 48.28-47.82 11.41-42.87 11.41-132.3 11.41-132.3s0-89.44-11.41-132.3zm-317.5 213.5V175.2l142.7 81.21-142.7 81.2z"></path></svg></span></div>
</div></div>
</div>
</div>



<div class="wp-block-uagb-container uagb-block-b30185e1">
<div class="wp-block-uagb-image alignleft uagb-block-11a0a5ef wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-left"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/09/team-skip-03.jpg ,https://websitedemos.net/wp-content/uploads/2023/09/team-skip-01.jpg 780w" sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/09/team-skip-03.jpg" alt="" class="uag-image-77914" width="368" height="460" title="" loading="lazy"/></figure></div>



<div class="wp-block-uagb-container uagb-block-c15bdf8e">
<div class="wp-block-uagb-info-box uagb-block-a0382e85 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h5 class="uagb-ifb-title">Esther Howard</h5></div><p class="uagb-ifb-desc">Share some details here. This is a flexible section where you can share anything you want. It could be details or some information.</p></div></div>



<div class="wp-block-uagb-icon-list uagb-block-472091b1"><div class="uagb-icon-list__wrap">
<div class="wp-block-uagb-icon-list-child uagb-block-c759762c"><a target="_self" aria-label="List item" rel="noopener noreferrer" href="#"> </a><span class="uagb-icon-list__source-wrap"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 512 512"><path d="M504 256C504 119 393 8 256 8S8 119 8 256c0 123.8 90.69 226.4 209.3 245V327.7h-63V256h63v-54.64c0-62.15 37-96.48 93.67-96.48 27.14 0 55.52 4.84 55.52 4.84v61h-31.28c-30.8 0-40.41 19.12-40.41 38.73V256h68.78l-11 71.69h-57.78V501C413.3 482.4 504 379.8 504 256z"></path></svg></span></div>



<div class="wp-block-uagb-icon-list-child uagb-block-b4b004d8"><a target="_self" aria-label="" rel="noopener noreferrer" href="#"> </a><span class="uagb-icon-list__source-wrap"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 448 512"><path d="M224.1 141c-63.6 0-114.9 51.3-114.9 114.9s51.3 114.9 114.9 114.9S339 319.5 339 255.9 287.7 141 224.1 141zm0 189.6c-41.1 0-74.7-33.5-74.7-74.7s33.5-74.7 74.7-74.7 74.7 33.5 74.7 74.7-33.6 74.7-74.7 74.7zm146.4-194.3c0 14.9-12 26.8-26.8 26.8-14.9 0-26.8-12-26.8-26.8s12-26.8 26.8-26.8 26.8 12 26.8 26.8zm76.1 27.2c-1.7-35.9-9.9-67.7-36.2-93.9-26.2-26.2-58-34.4-93.9-36.2-37-2.1-147.9-2.1-184.9 0-35.8 1.7-67.6 9.9-93.9 36.1s-34.4 58-36.2 93.9c-2.1 37-2.1 147.9 0 184.9 1.7 35.9 9.9 67.7 36.2 93.9s58 34.4 93.9 36.2c37 2.1 147.9 2.1 184.9 0 35.9-1.7 67.7-9.9 93.9-36.2 26.2-26.2 34.4-58 36.2-93.9 2.1-37 2.1-147.8 0-184.8zM398.8 388c-7.8 19.6-22.9 34.7-42.6 42.6-29.5 11.7-99.5 9-132.1 9s-102.7 2.6-132.1-9c-19.6-7.8-34.7-22.9-42.6-42.6-11.7-29.5-9-99.5-9-132.1s-2.6-102.7 9-132.1c7.8-19.6 22.9-34.7 42.6-42.6 29.5-11.7 99.5-9 132.1-9s102.7-2.6 132.1 9c19.6 7.8 34.7 22.9 42.6 42.6 11.7 29.5 9 99.5 9 132.1s2.7 102.7-9 132.1z"></path></svg></span></div>



<div class="wp-block-uagb-icon-list-child uagb-block-ea9aac1d"><a target="_self" aria-label="List item" rel="noopener noreferrer" href="#"> </a><span class="uagb-icon-list__source-wrap"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 512 512"><path d="M459.4 151.7c.325 4.548 .325 9.097 .325 13.65 0 138.7-105.6 298.6-298.6 298.6-59.45 0-114.7-17.22-161.1-47.11 8.447 .974 16.57 1.299 25.34 1.299 49.06 0 94.21-16.57 130.3-44.83-46.13-.975-84.79-31.19-98.11-72.77 6.498 .974 12.99 1.624 19.82 1.624 9.421 0 18.84-1.3 27.61-3.573-48.08-9.747-84.14-51.98-84.14-102.1v-1.299c13.97 7.797 30.21 12.67 47.43 13.32-28.26-18.84-46.78-51.01-46.78-87.39 0-19.49 5.197-37.36 14.29-52.95 51.65 63.67 129.3 105.3 216.4 109.8-1.624-7.797-2.599-15.92-2.599-24.04 0-57.83 46.78-104.9 104.9-104.9 30.21 0 57.5 12.67 76.67 33.14 23.72-4.548 46.46-13.32 66.6-25.34-7.798 24.37-24.37 44.83-46.13 57.83 21.12-2.273 41.58-8.122 60.43-16.24-14.29 20.79-32.16 39.31-52.63 54.25z"></path></svg></span></div>



<div class="wp-block-uagb-icon-list-child uagb-block-1be5407c"><a target="_self" aria-label="List item" rel="noopener noreferrer" href="#"> </a><span class="uagb-icon-list__source-wrap"><svg xmlns="https://www.w3.org/2000/svg" viewBox="0 0 576 512"><path d="M549.7 124.1c-6.281-23.65-24.79-42.28-48.28-48.6C458.8 64 288 64 288 64S117.2 64 74.63 75.49c-23.5 6.322-42 24.95-48.28 48.6-11.41 42.87-11.41 132.3-11.41 132.3s0 89.44 11.41 132.3c6.281 23.65 24.79 41.5 48.28 47.82C117.2 448 288 448 288 448s170.8 0 213.4-11.49c23.5-6.321 42-24.17 48.28-47.82 11.41-42.87 11.41-132.3 11.41-132.3s0-89.44-11.41-132.3zm-317.5 213.5V175.2l142.7 81.21-142.7 81.2z"></path></svg></span></div>
</div></div>
</div>
</div>
</div>
</div></div>
";}s:8:"id-76404";a:10:{s:5:"title";s:7:"Team 07";s:3:"url";s:46:"https://websitedemos.net/astra-blocks/team-07/";s:3:"tag";a:0:{}s:8:"category";i:829;s:16:"primary-category";s:0:"";s:4:"type";s:5:"block";s:12:"page-builder";s:9:"gutenberg";s:16:"required-plugins";a:0:{}s:10:"stylesheet";s:67527:".wp-block-uagb-container{display:flex;position:relative;box-sizing:border-box;transition-property:box-shadow;transition-duration:0.2s;transition-timing-function:ease}.wp-block-uagb-container .spectra-container-link-overlay{bottom:0;left:0;position:absolute;right:0;top:0;z-index:10}.wp-block-uagb-container.uagb-is-root-container{margin-left:auto;margin-right:auto}.wp-block-uagb-container.alignfull.uagb-is-root-container .uagb-container-inner-blocks-wrap{display:flex;position:relative;box-sizing:border-box;margin-left:auto !important;margin-right:auto !important}.wp-block-uagb-container .uagb-container__video-wrap{height:100%;width:100%;top:0;left:0;position:absolute;overflow:hidden;-webkit-transition:opacity 1s;-o-transition:opacity 1s;transition:opacity 1s}.wp-block-uagb-container .uagb-container__video-wrap video{max-width:100%;width:100%;height:100%;margin:0;line-height:1;border:none;display:inline-block;vertical-align:baseline;-o-object-fit:cover;object-fit:cover;background-size:cover}.st-block-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap>*:not(.wp-block-uagb-container):not(.wp-block-uagb-column):not(.wp-block-uagb-container):not(.wp-block-uagb-section):not(.uagb-container__shape):not(.uagb-container__video-wrap):not(.wp-block-spectra-pro-register):not(.wp-block-spectra-pro-login):not(.uagb-slider-container):not(.spectra-image-gallery__control-lightbox),.st-block-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap,.st-block-container .wp-block-uagb-container>*:not(.wp-block-uagb-container):not(.wp-block-uagb-column):not(.wp-block-uagb-container):not(.wp-block-uagb-section):not(.uagb-container__shape):not(.uagb-container__video-wrap):not(.wp-block-uagb-image):not(.wp-block-spectra-pro-register):not(.wp-block-spectra-pro-login):not(.uagb-slider-container):not(.spectra-container-link-overlay):not(.spectra-image-gallery__control-lightbox):not(.wp-block-uagb-lottie):not(.uagb-faq__outer-wrap){min-width:unset !important;width:100%;position:relative}.st-block-container .ast-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap>.wp-block-uagb-container>ul,.st-block-container .ast-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap>.wp-block-uagb-container ol,.st-block-container .ast-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap>ul,.st-block-container .ast-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap ol{max-width:-webkit-fill-available;margin-block-start:0;margin-block-end:0;margin-left:20px}.ast-plain-container .editor-styles-wrapper .block-editor-block-list__layout.is-root-container .uagb-is-root-container.wp-block-uagb-container.alignwide{margin-left:auto;margin-right:auto}.uagb-container__shape{overflow:hidden;position:absolute;left:0;width:100%;line-height:0;direction:ltr}.uagb-container__shape-top{top:-3px}.uagb-container__shape-bottom{bottom:-3px}.uagb-container__shape.uagb-container__invert.uagb-container__shape-bottom,.uagb-container__shape.uagb-container__invert.uagb-container__shape-top{-webkit-transform:rotate(180deg);-ms-transform:rotate(180deg);transform:rotate(180deg)}.uagb-container__shape.uagb-container__shape-flip svg{transform:translateX(-50%) rotateY(180deg)}.uagb-container__shape svg{display:block;width:-webkit-calc(100% + 1.3px);width:calc(100% + 1.3px);position:relative;left:50%;-webkit-transform:translateX(-50%);-ms-transform:translateX(-50%);transform:translateX(-50%)}.uagb-container__shape .uagb-container__shape-fill{-webkit-transform-origin:center;-ms-transform-origin:center;transform-origin:center;-webkit-transform:rotateY(0deg);transform:rotateY(0deg)}.uagb-container__shape.uagb-container__shape-above-content{z-index:9;pointer-events:none}.nv-single-page-wrap .nv-content-wrap.entry-content .wp-block-uagb-container.alignfull{margin-left:calc(50% - 50vw);margin-right:calc(50% - 50vw)}@media only screen and (max-width: 767px){.wp-block-uagb-container .wp-block-uagb-advanced-heading{width:-webkit-fill-available !important}}
.uagb-ifb-content>svg *{-webkit-transition:all 0.2s;-o-transition:all 0.2s;transition:all 0.2s}.uagb-ifb-content>svg,.uagb-ifb-content{display:inline-block}.uagb-ifb-content>svg{vertical-align:middle;width:inherit;height:inherit;font-style:initial}.uagb-ifb-content .uagb-ifb-icon-wrap svg{box-sizing:content-box;width:inherit;height:inherit}.uagb-ifb-button-wrapper:empty{display:none}div.uagb-ifb-button-wrapper a.uagb-infobox-cta-link,div.uagb-ifb-cta a.uagb-infobox-cta-link,.entry .entry-content a.uagb-infobox-cta-link,a.uagb-infobox-link-wrap,.entry .entry-content a.uagb-infobox-link-wrap{text-decoration:none;align-items:center}.uagb-infobox-icon-left-title.uagb-infobox-image-valign-middle .uagb-ifb-title-wrap,.uagb-infobox-icon-right-title.uagb-infobox-image-valign-middle .uagb-ifb-title-wrap,.uagb-infobox-image-valign-middle .uagb-ifb-icon-wrap,.uagb-infobox-image-valign-middle .uagb-ifb-image-content,.uagb-infobox-icon-left.uagb-infobox-image-valign-middle .uagb-ifb-content,.uagb-infobox-icon-right.uagb-infobox-image-valign-middle .uagb-ifb-content{-ms-flex-item-align:center;-webkit-align-self:center;align-self:center}.uagb-infobox-icon-left-title.uagb-infobox-image-valign-top .uagb-ifb-title-wrap,.uagb-infobox-icon-right-title.uagb-infobox-image-valign-top .uagb-ifb-title-wrap,.uagb-infobox-image-valign-top .uagb-ifb-icon-wrap,.uagb-infobox-image-valign-top .uagb-ifb-image-content,.uagb-infobox-icon-left.uagb-infobox-image-valign-top .uagb-ifb-content,.uagb-infobox-icon-right.uagb-infobox-image-valign-top .uagb-ifb-content{-webkit-align-self:self-start;align-self:self-start}.uagb-infobox-left{justify-content:flex-start;text-align:left;-webkit-box-pack:start;-ms-flex-pack:start;-webkit-justify-content:flex-start;-moz-box-pack:start}.uagb-infobox-center{justify-content:center;text-align:center;-webkit-box-pack:center;-ms-flex-pack:center;-webkit-justify-content:center;-moz-box-pack:center}.uagb-infobox-right{justify-content:flex-end;text-align:right;-webkit-box-pack:end;-ms-flex-pack:end;-webkit-justify-content:flex-end;-moz-box-pack:end}.uagb-infobox-icon-above-title.uagb-infobox__content-wrap,.uagb-infobox-icon-below-title.uagb-infobox__content-wrap{display:block;width:100%}.uagb-infobox-icon-left-title .uagb-ifb-content>svg,.uagb-infobox-icon-left .uagb-ifb-content>svg{margin-right:10px}.uagb-infobox-icon-right-title .uagb-ifb-content>svg,.uagb-infobox-icon-right .uagb-ifb-content>svg{margin-left:10px}.uagb-infobox-icon-left.uagb-infobox__content-wrap,.uagb-infobox-icon-right.uagb-infobox__content-wrap,.uagb-infobox-icon-left-title .uagb-ifb-left-title-image,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image{display:-webkit-box;display:-ms-flexbox;display:-webkit-flex;display:-moz-box;display:flex;-js-display:flex}.uagb-infobox-icon-left-title .uagb-ifb-left-title-image .uagb-ifb-image-content,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image .uagb-ifb-image-content,.uagb-infobox-icon-left .uagb-ifb-image-content,.uagb-infobox-icon-right .uagb-ifb-image-content{flex-shrink:0;line-height:0}.uagb-infobox-icon-left-title .uagb-ifb-left-title-image .uagb-ifb-title-wrap,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image .uagb-ifb-title-wrap,.uagb-infobox-icon-left .uagb-ifb-content,.uagb-infobox-icon-right .uagb-ifb-content{flex-grow:1}.uagb-infobox-icon-right.uagb-infobox__content-wrap,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image{-webkit-box-pack:end;-ms-flex-pack:end;-webkit-justify-content:flex-end;-moz-box-pack:end;justify-content:flex-end}.uagb-ifb-content img{position:relative;display:inline-block;line-height:0;width:auto;height:auto !important;max-width:100%;border-radius:inherit;-webkit-box-sizing:content-box;-moz-box-sizing:content-box;-webkit-border-radius:inherit}.uagb-infobox-module-link{position:absolute;top:0;right:0;bottom:0;left:0;z-index:4;width:100%;height:100%}.uagb-edit-mode .uagb-infobox-module-link{z-index:2}.uagb-infobox-link-icon-after{margin-right:0;margin-left:5px}.uagb-infobox-link-icon-before{margin-right:5px;margin-left:0}.uagb-infobox-link-icon{-webkit-transition:all 200ms linear;transition:all 200ms linear}.uagb-infobox__content-wrap{box-sizing:border-box;position:relative;width:100%;word-break:break-word;z-index:1}.uagb-ifb-separator{display:inline-block;margin:0;border-top-color:#333;border-top-style:solid;border-top-width:2px;line-height:0}.uagb-ifb-button-wrapper{line-height:1}.uagb-ifb-button-wrapper.uagb-ifb-button-type-text .uagb-infobox-cta-link.wp-block-button__link{background-color:unset;border:none}.uagb-ifb-button-wrapper.uagb-ifb-button-type-text .uagb-infobox-cta-link.wp-block-button__link:hover{background-color:unset;border-color:unset}.uagb-ifb-button-wrapper .uagb-infobox-cta-link{cursor:pointer}.uagb-ifb-button-wrapper .wp-block-button__link svg{fill:currentColor}.uagb-infobox__content-wrap a{-webkit-box-shadow:none;box-shadow:none;text-decoration:none}.uagb-ifb-title-wrap{width:100%}.uagb-ifb-title{margin-block-start:0}.uagb-ifb-title-wrap .uagb-ifb-title-prefix{display:block;padding:0;margin:0}.uagb-infobox__content-wrap.uagb-infobox__content-wrap{position:relative}.uagb-ifb-content{width:100%}.uagb-infobox__content-wrap.uagb-infobox,.uagb-ifb-content,.uagb-ifb-title-wrap,.uagb-ifb-title-prefix *,svg.dashicon.dashicons-upload{z-index:1}a.uagb-infobox-link-wrap{color:inherit}.uagb-ifb-content p:empty{display:none}.uagb-infobox__content-wrap .uagb-ifb-content img{display:inline-block;max-width:100%}.uagb-infobox__content-wrap .uagb-ifb-content svg{display:inline-block}.uagb-infobox__content-wrap .uagb-ifb-icon-wrap,.uagb-infobox-icon-left .uagb-ifb-image-content,.uagb-infobox-icon-right .uagb-ifb-image-content{box-sizing:content-box}.uagb-infobox-cta-link>svg{vertical-align:middle;width:15px;height:15px;font-size:15px}.uagb-infobox-cta-link{display:inline-flex}.block-editor-page #wpwrap .uagb-infobox-cta-link svg,.uagb-infobox-cta-link svg{font-style:normal}.uagb-infobox-icon-left-title .uagb-ifb-icon-wrap,.uagb-infobox-icon-left .uagb-ifb-icon-wrap{margin-right:10px;line-height:0}.uagb-infobox-icon-right-title .uagb-ifb-icon-wrap,.uagb-infobox-icon-right .uagb-ifb-icon-wrap{margin-left:10px;line-height:0}.uagb-infobox-icon-left .uagb-ifb-left-right-wrap,.uagb-infobox-icon-right .uagb-ifb-left-right-wrap,.uagb-infobox-icon-left-title .uagb-ifb-left-title-image,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image{display:-webkit-box;display:-ms-flexbox;display:flex}.uagb-infobox-icon-right .uagb-ifb-left-right-wrap,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image{-webkit-box-pack:end;-ms-flex-pack:end;-webkit-justify-content:flex-end;-moz-box-pack:end;justify-content:flex-end}a.uagb-infbox__link-to-all{position:absolute;top:0;left:0;z-index:3;width:100%;height:100%;box-shadow:none;text-decoration:none;-webkit-box-shadow:none}@media only screen and (max-width: 976px){.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-image-content{padding:0;margin-bottom:20px}.uagb-infobox-stacked-tablet.uagb-reverse-order-tablet.uagb-infobox__content-wrap{display:-webkit-inline-box;display:-ms-inline-flexbox;display:-webkit-inline-flex;display:-moz-inline-box;display:inline-flex;flex-direction:column-reverse;-js-display:inline-flex;-webkit-box-orient:vertical;-webkit-box-direction:reverse;-ms-flex-direction:column-reverse;-webkit-flex-direction:column-reverse;-moz-box-orient:vertical;-moz-box-direction:reverse}.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-content,.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-icon-wrap,.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-image-content{display:block;width:100%;text-align:center}.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-icon-wrap,.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-image-content{margin-right:0;margin-left:0}.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap{display:inline-block}.uagb-infobox-icon-left-title.uagb-infobox-stacked-tablet .uagb-ifb-image-content,.uagb-infobox-icon-left-title.uagb-infobox-stacked-tablet .uagb-ifb-icon-wrap,.uagb-infobox-icon-left.uagb-infobox-stacked-tablet .uagb-ifb-image-content,.uagb-infobox-icon-left.uagb-infobox-stacked-tablet .uagb-ifb-icon-wrap{margin-right:0}.uagb-infobox-icon-right-title.uagb-infobox-stacked-tablet .uagb-ifb-image-content,.uagb-infobox-icon-right-title.uagb-infobox-stacked-tablet .uagb-ifb-icon-wrap,.uagb-infobox-icon-right.uagb-infobox-stacked-tablet .uagb-ifb-image-content,.uagb-infobox-icon-right.uagb-infobox-stacked-tablet .uagb-ifb-icon-wrap{margin-left:0}.uagb-infobox-icon-left-title .uagb-ifb-separator{margin:10px 0}}@media screen and (max-width: 767px){.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap{display:inline-block}.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-image-content,.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-icon-wrap{padding:0;margin-bottom:20px;margin-right:0;margin-left:0}.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap.uagb-reverse-order-mobile{display:-webkit-inline-box;display:-ms-inline-flexbox;display:-webkit-inline-flex;display:-moz-inline-box;display:inline-flex;flex-direction:column-reverse;-js-display:inline-flex;-webkit-box-orient:vertical;-webkit-box-direction:reverse;-ms-flex-direction:column-reverse;-webkit-flex-direction:column-reverse;-moz-box-orient:vertical;-moz-box-direction:reverse}.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-image-content,.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-icon-wrap,.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-content{display:block;width:100%;text-align:center}.uagb-infobox-icon-left-title.uagb-infobox-stacked-mobile .uagb-ifb-image-content,.uagb-infobox-icon-left-title.uagb-infobox-stacked-mobile .uagb-ifb-icon-wrap,.uagb-infobox-icon-left.uagb-infobox-stacked-mobile .uagb-ifb-image-content,.uagb-infobox-icon-left.uagb-infobox-stacked-mobile .uagb-ifb-icon-wrap{margin-right:0}.uagb-infobox-icon-right-title.uagb-infobox-stacked-mobile .uagb-ifb-image-content,.uagb-infobox-icon-right-title.uagb-infobox-stacked-mobile .uagb-ifb-icon-wrap,.uagb-infobox-icon-right.uagb-infobox-stacked-mobile .uagb-ifb-image-content,.uagb-infobox-icon-right.uagb-infobox-stacked-mobile .uagb-ifb-icon-wrap{margin-left:0}.uagb-infobox-icon-left-title .uagb-ifb-separator{margin:10px 0}}.uagb-ifb-icon svg{width:inherit;height:inherit;vertical-align:middle}.uagb-ifb-button-icon{height:15px;width:15px;font-size:15px;vertical-align:middle}.uagb-ifb-button-icon svg{height:inherit;width:inherit;display:inline-block}.uagb-ifb-button-icon.uagb-ifb-align-icon-after{float:right}.uagb-ifb-cta-button{display:inline-block}.uagb-disable-link{pointer-events:none}
.wp-block-uagb-image{display:flex}.wp-block-uagb-image__figure{position:relative;display:flex;flex-direction:column;max-width:100%;height:auto;margin:0}.wp-block-uagb-image__figure img{height:auto;display:flex;max-width:100%;transition:box-shadow 0.2s ease}.wp-block-uagb-image__figure>a{display:inline-block}.wp-block-uagb-image__figure figcaption{text-align:center;margin-top:0.5em;margin-bottom:1em}.wp-block-uagb-image--align-left{text-align:left}.wp-block-uagb-image--align-right{text-align:right}.wp-block-uagb-image--align-center{text-align:center}.wp-block-uagb-image--align-full .wp-block-uagb-image__figure{margin-left:calc(50% - 50vw);margin-right:calc(50% - 50vw);max-width:100vw;width:100vw;height:auto}.wp-block-uagb-image--align-full .wp-block-uagb-image__figure img{height:auto;width:100% !important}.wp-block-uagb-image--align-wide .wp-block-uagb-image__figure img{height:auto;width:100%}.wp-block-uagb-image--layout-overlay__color-wrapper{position:absolute;left:0;top:0;right:0;bottom:0;opacity:0.2;background:rgba(0,0,0,0.5);transition:opacity 0.35s ease-in-out}.wp-block-uagb-image--layout-overlay-link{position:absolute;left:0;right:0;bottom:0;top:0}.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity:1}.wp-block-uagb-image--layout-overlay__inner{position:absolute;left:15px;right:15px;bottom:15px;top:15px;display:flex;align-items:center;justify-content:center;flex-direction:column;border-color:#fff;transition:0.35s ease-in-out}.wp-block-uagb-image--layout-overlay__inner.top-left,.wp-block-uagb-image--layout-overlay__inner.top-center,.wp-block-uagb-image--layout-overlay__inner.top-right{justify-content:flex-start}.wp-block-uagb-image--layout-overlay__inner.bottom-left,.wp-block-uagb-image--layout-overlay__inner.bottom-center,.wp-block-uagb-image--layout-overlay__inner.bottom-right{justify-content:flex-end}.wp-block-uagb-image--layout-overlay__inner.top-left,.wp-block-uagb-image--layout-overlay__inner.center-left,.wp-block-uagb-image--layout-overlay__inner.bottom-left{align-items:flex-start}.wp-block-uagb-image--layout-overlay__inner.top-right,.wp-block-uagb-image--layout-overlay__inner.center-right,.wp-block-uagb-image--layout-overlay__inner.bottom-right{align-items:flex-end}.wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{color:#fff;transition:transform 0.35s, opacity 0.35s ease-in-out;transform:translate3d(0, 24px, 0)}.wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width:30%;border-top-width:2px;border-top-color:#fff;border-top-style:solid;margin-bottom:10px;opacity:0;transition:transform 0.4s, opacity 0.4s ease-in-out;transform:translate3d(0, 30px, 0)}.wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity:0;overflow:visible;color:#fff;transition:transform 0.45s, opacity 0.45s ease-in-out;transform:translate3d(0, 35px, 0)}.wp-block-uagb-image--layout-overlay__inner:hover .uagb-image-heading,.wp-block-uagb-image--layout-overlay__inner:hover .uagb-image-separator,.wp-block-uagb-image--layout-overlay__inner:hover .uagb-image-caption{opacity:1;transform:translate3d(0, 0, 0)}.wp-block-uagb-image--effect-zoomin .wp-block-uagb-image__figure img,.wp-block-uagb-image--effect-zoomin .wp-block-uagb-image__figure .wp-block-uagb-image--layout-overlay__color-wrapper{transform:scale(1);transition:transform 0.35s ease-in-out}.wp-block-uagb-image--effect-zoomin .wp-block-uagb-image__figure:hover img,.wp-block-uagb-image--effect-zoomin .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{transform:scale(1.05)}.wp-block-uagb-image--effect-slide .wp-block-uagb-image__figure img,.wp-block-uagb-image--effect-slide .wp-block-uagb-image__figure .wp-block-uagb-image--layout-overlay__color-wrapper{width:calc(100% + 40px) !important;max-width:none !important;transform:translate3d(-40px, 0, 0);transition:transform 0.35s ease-in-out}.wp-block-uagb-image--effect-slide .wp-block-uagb-image__figure:hover img,.wp-block-uagb-image--effect-slide .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{transform:translate3d(0, 0, 0)}.wp-block-uagb-image--effect-grayscale img{filter:grayscale(0%);transition:0.35s ease-in-out}.wp-block-uagb-image--effect-grayscale:hover img{filter:grayscale(100%)}.wp-block-uagb-image--effect-blur img{filter:blur(0);transition:0.35s ease-in-out}.wp-block-uagb-image--effect-blur:hover img{filter:blur(3px)}
.wp-block-uagb-container.uagb-is-root-container .uagb-block-573dc06d{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-573dc06d .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-573dc06d .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-573dc06d .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-573dc06d .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-573dc06d .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-573dc06d > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: center;flex-wrap: nowrap;row-gap: 48px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-573dc06d{box-shadow: 0px 0px   #00000070 ;padding-top: 112px;padding-bottom: 112px;padding-left: 40px;padding-right: 40px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 48px;column-gap: 0px;overflow: visible;border-color: inherit;background-color: var(--ast-global-color-4);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-624ff67b{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-624ff67b .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-624ff67b .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-624ff67b .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-624ff67b .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-624ff67b .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-624ff67b > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 72px;}.wp-block-uagb-container.uagb-block-624ff67b{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 0px;column-gap: 72px;overflow: visible;border-color: inherit;flex-direction: row;align-items: stretch;justify-content: center;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-02f53b00{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-block-02f53b00 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-02f53b00 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-02f53b00 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-02f53b00 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-02f53b00 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-02f53b00 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 20px;column-gap: 20px;}.wp-block-uagb-container.uagb-block-02f53b00{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 20px;column-gap: 20px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-1acbe4ce .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-1acbe4ce .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-1acbe4ce .uagb-ifb-icon svg{fill: #333;}.uagb-block-1acbe4ce.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-1acbe4ce .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-1acbe4ce .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-1acbe4ce.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-1acbe4ce.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-1acbe4ce .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-1acbe4ce .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-1acbe4ce .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-1acbe4ce .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-1acbe4ce.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-1acbe4ce.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-1acbe4ce.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-1acbe4ce.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-1acbe4ce .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-1acbe4ce.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-1acbe4ce.wp-block-uagb-info-box .uagb-ifb-desc{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-1acbe4ce .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-1acbe4ce .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-1acbe4ce .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-1acbe4ce .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-1acbe4ce.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-1acbe4ce.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-1acbe4ce .uagb-infobox__content-wrap{text-align: left;}.uagb-block-1acbe4ce.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-1acbe4ce.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-1acbe4ce .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-1acbe4ce.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-1acbe4ce .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-1acbe4ce .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-1acbe4ce.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-8a40d603{max-width: 50%;width: 100%;}.wp-block-uagb-container.uagb-block-8a40d603 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-8a40d603 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-8a40d603 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-8a40d603 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-8a40d603 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-8a40d603 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 20px;column-gap: 20px;}.wp-block-uagb-container.uagb-block-8a40d603{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 40px;margin-top:  !important;margin-bottom:  !important;row-gap: 20px;column-gap: 20px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-5202da1a .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-5202da1a .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-5202da1a .uagb-ifb-icon svg{fill: #333;}.uagb-block-5202da1a.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-5202da1a .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-5202da1a .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-5202da1a.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-5202da1a.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-5202da1a .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-5202da1a .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-5202da1a .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-5202da1a .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-5202da1a.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-5202da1a.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-5202da1a.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-5202da1a.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-5202da1a .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-5202da1a.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 24px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-5202da1a.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-5202da1a .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-5202da1a .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-5202da1a .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-5202da1a .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-5202da1a.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-5202da1a.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-5202da1a .uagb-infobox__content-wrap{text-align: left;}.uagb-block-5202da1a.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-5202da1a.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-5202da1a .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-5202da1a.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-5202da1a .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-5202da1a .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-5202da1a.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-13533f4b{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-13533f4b .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-13533f4b .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-13533f4b .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-13533f4b .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-13533f4b .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-13533f4b > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: flex-start;flex-wrap: nowrap;row-gap: 0px;column-gap: 24px;}.wp-block-uagb-container.uagb-block-13533f4b{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 0px;column-gap: 24px;overflow: visible;border-color: inherit;flex-direction: row;align-items: stretch;justify-content: flex-start;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-ae135cd8{max-width: 25%;width: 100%;}.wp-block-uagb-container.uagb-block-ae135cd8 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-ae135cd8 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-ae135cd8 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-ae135cd8 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-ae135cd8 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-ae135cd8 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 16px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-ae135cd8{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 16px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-a6a9fd5f.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-a6a9fd5f .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-a6a9fd5f.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-a6a9fd5f.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;text-align: center;}.uagb-block-a6a9fd5f.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-a6a9fd5f.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-a6a9fd5f.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-a6a9fd5f.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-a6a9fd5f.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-a6a9fd5f.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-a6a9fd5f.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-a6a9fd5f.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-a6a9fd5f.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 282px;height: 282px;}.uagb-block-a6a9fd5f.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-a6a9fd5f.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-a6a9fd5f.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-a6a9fd5f.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-b95678c4{max-width: 25%;width: 100%;}.wp-block-uagb-container.uagb-block-b95678c4 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-b95678c4 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-b95678c4 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-b95678c4 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-b95678c4 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-b95678c4 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 16px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-b95678c4{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 16px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-054607b6.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-054607b6 .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-054607b6.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-054607b6.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;text-align: center;}.uagb-block-054607b6.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-054607b6.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-054607b6.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-054607b6.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-054607b6.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-054607b6.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-054607b6.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-054607b6.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-054607b6.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 282px;height: 282px;}.uagb-block-054607b6.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-054607b6.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-054607b6.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-054607b6.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-3bd77aa2{max-width: 25%;width: 100%;}.wp-block-uagb-container.uagb-block-3bd77aa2 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-3bd77aa2 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-3bd77aa2 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-3bd77aa2 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-3bd77aa2 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-3bd77aa2 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 16px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-3bd77aa2{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 16px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-a0bdf96c.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;}.uagb-block-a0bdf96c.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-a0bdf96c.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;text-align: center;}.uagb-block-a0bdf96c.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-a0bdf96c.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-a0bdf96c.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-a0bdf96c.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-a0bdf96c.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-a0bdf96c.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-a0bdf96c.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-a0bdf96c.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-a0bdf96c.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 282px;height: 282px;}.uagb-block-a0bdf96c.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-a0bdf96c.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-a0bdf96c.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-a0bdf96c.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-b30185e1{max-width: 25%;width: 100%;}.wp-block-uagb-container.uagb-block-b30185e1 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-b30185e1 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-b30185e1 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-b30185e1 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-b30185e1 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-b30185e1 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 16px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-b30185e1{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 16px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-e5cab3ee.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-e5cab3ee .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-e5cab3ee.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-e5cab3ee.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;text-align: center;}.uagb-block-e5cab3ee.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-e5cab3ee.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-e5cab3ee.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-e5cab3ee.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-e5cab3ee.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-e5cab3ee.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-e5cab3ee.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-e5cab3ee.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-e5cab3ee.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 282px;height: 282px;}.uagb-block-e5cab3ee.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-e5cab3ee.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-e5cab3ee.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-e5cab3ee.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}@media only screen and (max-width: 976px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-573dc06d{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-573dc06d > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 40px;}.wp-block-uagb-container.uagb-block-573dc06d{padding-top: 80px;padding-bottom: 80px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 40px;background-color: var(--ast-global-color-4);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-624ff67b{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-624ff67b > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;column-gap: 40px;}.wp-block-uagb-container.uagb-block-624ff67b{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;column-gap: 40px;align-items: stretch;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-02f53b00{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-02f53b00 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-02f53b00{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;}.uagb-block-1acbe4ce.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-1acbe4ce.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-1acbe4ce.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-1acbe4ce .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-1acbe4ce .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-1acbe4ce .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-1acbe4ce .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-1acbe4ce .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-1acbe4ce .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-1acbe4ce.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-1acbe4ce .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-1acbe4ce .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-1acbe4ce.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-8a40d603{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-8a40d603 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-8a40d603{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;}.uagb-block-5202da1a.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-5202da1a.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-5202da1a.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-5202da1a .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-5202da1a .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-5202da1a .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-5202da1a .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-5202da1a .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-5202da1a .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-5202da1a.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-5202da1a .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-5202da1a .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-5202da1a.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-13533f4b{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-13533f4b > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;row-gap: 20px;column-gap: 20px;}.wp-block-uagb-container.uagb-block-13533f4b{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 20px;column-gap: 20px;align-items: stretch;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-ae135cd8{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-ae135cd8 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-ae135cd8{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;}.uagb-block-a6a9fd5f.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 165px;height: 165px;}.uagb-block-a6a9fd5f.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-b95678c4{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-b95678c4 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-b95678c4{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;}.uagb-block-054607b6.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 165px;height: 165px;}.uagb-block-054607b6.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-3bd77aa2{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-3bd77aa2 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-3bd77aa2{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;}.uagb-block-a0bdf96c.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 165px;height: 165px;}.uagb-block-a0bdf96c.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-b30185e1{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-b30185e1 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-b30185e1{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;}.uagb-block-e5cab3ee.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 165px;height: 165px;}.uagb-block-e5cab3ee.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;}}@media only screen and (max-width: 767px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-573dc06d{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-573dc06d > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 36px;}.wp-block-uagb-container.uagb-block-573dc06d{padding-top: 64px;padding-bottom: 64px;padding-left: 20px;padding-right: 20px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 36px;background-color: var(--ast-global-color-4);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-624ff67b{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-624ff67b > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;flex-wrap: wrap;row-gap: 20px;}.wp-block-uagb-container.uagb-block-624ff67b{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 20px;align-items: stretch;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-02f53b00{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-02f53b00 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-02f53b00{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;flex-wrap: wrap;}.uagb-block-1acbe4ce.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-1acbe4ce.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-1acbe4ce.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-1acbe4ce .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-1acbe4ce .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-1acbe4ce.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-1acbe4ce .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-1acbe4ce .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-1acbe4ce .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-1acbe4ce .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-1acbe4ce.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-1acbe4ce .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-1acbe4ce .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-1acbe4ce.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-8a40d603{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-8a40d603 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-8a40d603{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;flex-wrap: wrap;}.uagb-block-5202da1a.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-5202da1a.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-5202da1a .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-5202da1a .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-5202da1a.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-5202da1a .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-5202da1a .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-5202da1a .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-5202da1a .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-5202da1a.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-5202da1a .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-5202da1a .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-5202da1a.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-13533f4b{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-13533f4b > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;flex-wrap: wrap;row-gap: 24px;}.wp-block-uagb-container.uagb-block-13533f4b{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;align-items: stretch;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-ae135cd8{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-ae135cd8 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-ae135cd8{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;flex-wrap: wrap;}.uagb-block-a6a9fd5f.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 360px;}.uagb-block-a6a9fd5f.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-b95678c4{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-b95678c4 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-b95678c4{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;flex-wrap: wrap;}.uagb-block-054607b6.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 360px;}.uagb-block-054607b6.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-3bd77aa2{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-3bd77aa2 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-3bd77aa2{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;flex-wrap: wrap;}.uagb-block-a0bdf96c.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 360px;}.uagb-block-a0bdf96c.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-b30185e1{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-b30185e1 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-b30185e1{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;flex-wrap: wrap;}.uagb-block-e5cab3ee.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 360px;}.uagb-block-e5cab3ee.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;}}";s:7:"content";s:4051:"
<div class="wp-block-uagb-container uagb-block-573dc06d alignfull uagb-is-root-container"><div class="uagb-container-inner-blocks-wrap">
<div class="wp-block-uagb-container uagb-block-624ff67b">
<div class="wp-block-uagb-container uagb-block-02f53b00">
<div class="wp-block-uagb-info-box uagb-block-1acbe4ce uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h2 class="uagb-ifb-title">Meet Our Talented Team</h2></div></div></div>
</div>



<div class="wp-block-uagb-container uagb-block-8a40d603">
<div class="wp-block-uagb-info-box uagb-block-5202da1a uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"></div><p class="uagb-ifb-desc">Our passionate and dedicated team brings together a diverse range of skills and expertise to deliver exceptional results. From creative visionaries to meticulous strategists, we work seamlessly together to meet and exceed our clients' expectations.</p></div></div>
</div>
</div>



<div class="wp-block-uagb-container uagb-block-13533f4b">
<div class="wp-block-uagb-container uagb-block-ae135cd8">
<div class="wp-block-uagb-image alignleft uagb-block-a6a9fd5f wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-left"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/09/team-skip-11.jpg ,https://websitedemos.net/wp-content/uploads/2023/09/team-skip-11.jpg 780w, https://websitedemos.net/wp-content/uploads/2023/09/team-skip-11.jpg 360w" sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/09/team-skip-11.jpg" alt="" class="uag-image-77967" width="282" height="282" title="" loading="lazy"/></figure></div>
</div>



<div class="wp-block-uagb-container uagb-block-b95678c4">
<div class="wp-block-uagb-image alignleft uagb-block-054607b6 wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-left"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/09/team-skip-14.jpg ,https://websitedemos.net/wp-content/uploads/2023/09/team-skip-14.jpg 780w, https://websitedemos.net/wp-content/uploads/2023/09/team-skip-14.jpg 360w" sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/09/team-skip-14.jpg" alt="" class="uag-image-77970" width="282" height="282" title="" loading="lazy"/></figure></div>
</div>



<div class="wp-block-uagb-container uagb-block-3bd77aa2">
<div class="wp-block-uagb-image uagb-block-a0bdf96c wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-none"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/09/team-skip-13.jpg ,https://websitedemos.net/wp-content/uploads/2023/09/team-skip-13.jpg 780w, https://websitedemos.net/wp-content/uploads/2023/09/team-skip-13.jpg 360w" sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/09/team-skip-13.jpg" alt="" class="uag-image-77969" width="282" height="282" title="" loading="lazy"/></figure></div>
</div>



<div class="wp-block-uagb-container uagb-block-b30185e1">
<div class="wp-block-uagb-image alignleft uagb-block-e5cab3ee wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-left"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/09/team-skip-27.jpg ,https://websitedemos.net/wp-content/uploads/2023/09/team-skip-27.jpg 780w, https://websitedemos.net/wp-content/uploads/2023/09/team-skip-27.jpg 360w" sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/09/team-skip-27.jpg" alt="" class="uag-image-78358" width="282" height="282" title="" loading="lazy"/></figure></div>
</div>
</div>
</div></div>
";}s:8:"id-76357";a:10:{s:5:"title";s:7:"Team 06";s:3:"url";s:46:"https://websitedemos.net/astra-blocks/team-06/";s:3:"tag";a:0:{}s:8:"category";i:829;s:16:"primary-category";s:0:"";s:4:"type";s:5:"block";s:12:"page-builder";s:9:"gutenberg";s:16:"required-plugins";a:0:{}s:10:"stylesheet";s:108985:".wp-block-uagb-container{display:flex;position:relative;box-sizing:border-box;transition-property:box-shadow;transition-duration:0.2s;transition-timing-function:ease}.wp-block-uagb-container .spectra-container-link-overlay{bottom:0;left:0;position:absolute;right:0;top:0;z-index:10}.wp-block-uagb-container.uagb-is-root-container{margin-left:auto;margin-right:auto}.wp-block-uagb-container.alignfull.uagb-is-root-container .uagb-container-inner-blocks-wrap{display:flex;position:relative;box-sizing:border-box;margin-left:auto !important;margin-right:auto !important}.wp-block-uagb-container .uagb-container__video-wrap{height:100%;width:100%;top:0;left:0;position:absolute;overflow:hidden;-webkit-transition:opacity 1s;-o-transition:opacity 1s;transition:opacity 1s}.wp-block-uagb-container .uagb-container__video-wrap video{max-width:100%;width:100%;height:100%;margin:0;line-height:1;border:none;display:inline-block;vertical-align:baseline;-o-object-fit:cover;object-fit:cover;background-size:cover}.st-block-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap>*:not(.wp-block-uagb-container):not(.wp-block-uagb-column):not(.wp-block-uagb-container):not(.wp-block-uagb-section):not(.uagb-container__shape):not(.uagb-container__video-wrap):not(.wp-block-spectra-pro-register):not(.wp-block-spectra-pro-login):not(.uagb-slider-container):not(.spectra-image-gallery__control-lightbox),.st-block-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap,.st-block-container .wp-block-uagb-container>*:not(.wp-block-uagb-container):not(.wp-block-uagb-column):not(.wp-block-uagb-container):not(.wp-block-uagb-section):not(.uagb-container__shape):not(.uagb-container__video-wrap):not(.wp-block-uagb-image):not(.wp-block-spectra-pro-register):not(.wp-block-spectra-pro-login):not(.uagb-slider-container):not(.spectra-container-link-overlay):not(.spectra-image-gallery__control-lightbox):not(.wp-block-uagb-lottie):not(.uagb-faq__outer-wrap){min-width:unset !important;width:100%;position:relative}.st-block-container .ast-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap>.wp-block-uagb-container>ul,.st-block-container .ast-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap>.wp-block-uagb-container ol,.st-block-container .ast-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap>ul,.st-block-container .ast-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap ol{max-width:-webkit-fill-available;margin-block-start:0;margin-block-end:0;margin-left:20px}.ast-plain-container .editor-styles-wrapper .block-editor-block-list__layout.is-root-container .uagb-is-root-container.wp-block-uagb-container.alignwide{margin-left:auto;margin-right:auto}.uagb-container__shape{overflow:hidden;position:absolute;left:0;width:100%;line-height:0;direction:ltr}.uagb-container__shape-top{top:-3px}.uagb-container__shape-bottom{bottom:-3px}.uagb-container__shape.uagb-container__invert.uagb-container__shape-bottom,.uagb-container__shape.uagb-container__invert.uagb-container__shape-top{-webkit-transform:rotate(180deg);-ms-transform:rotate(180deg);transform:rotate(180deg)}.uagb-container__shape.uagb-container__shape-flip svg{transform:translateX(-50%) rotateY(180deg)}.uagb-container__shape svg{display:block;width:-webkit-calc(100% + 1.3px);width:calc(100% + 1.3px);position:relative;left:50%;-webkit-transform:translateX(-50%);-ms-transform:translateX(-50%);transform:translateX(-50%)}.uagb-container__shape .uagb-container__shape-fill{-webkit-transform-origin:center;-ms-transform-origin:center;transform-origin:center;-webkit-transform:rotateY(0deg);transform:rotateY(0deg)}.uagb-container__shape.uagb-container__shape-above-content{z-index:9;pointer-events:none}.nv-single-page-wrap .nv-content-wrap.entry-content .wp-block-uagb-container.alignfull{margin-left:calc(50% - 50vw);margin-right:calc(50% - 50vw)}@media only screen and (max-width: 767px){.wp-block-uagb-container .wp-block-uagb-advanced-heading{width:-webkit-fill-available !important}}
.uagb-ifb-content>svg *{-webkit-transition:all 0.2s;-o-transition:all 0.2s;transition:all 0.2s}.uagb-ifb-content>svg,.uagb-ifb-content{display:inline-block}.uagb-ifb-content>svg{vertical-align:middle;width:inherit;height:inherit;font-style:initial}.uagb-ifb-content .uagb-ifb-icon-wrap svg{box-sizing:content-box;width:inherit;height:inherit}.uagb-ifb-button-wrapper:empty{display:none}div.uagb-ifb-button-wrapper a.uagb-infobox-cta-link,div.uagb-ifb-cta a.uagb-infobox-cta-link,.entry .entry-content a.uagb-infobox-cta-link,a.uagb-infobox-link-wrap,.entry .entry-content a.uagb-infobox-link-wrap{text-decoration:none;align-items:center}.uagb-infobox-icon-left-title.uagb-infobox-image-valign-middle .uagb-ifb-title-wrap,.uagb-infobox-icon-right-title.uagb-infobox-image-valign-middle .uagb-ifb-title-wrap,.uagb-infobox-image-valign-middle .uagb-ifb-icon-wrap,.uagb-infobox-image-valign-middle .uagb-ifb-image-content,.uagb-infobox-icon-left.uagb-infobox-image-valign-middle .uagb-ifb-content,.uagb-infobox-icon-right.uagb-infobox-image-valign-middle .uagb-ifb-content{-ms-flex-item-align:center;-webkit-align-self:center;align-self:center}.uagb-infobox-icon-left-title.uagb-infobox-image-valign-top .uagb-ifb-title-wrap,.uagb-infobox-icon-right-title.uagb-infobox-image-valign-top .uagb-ifb-title-wrap,.uagb-infobox-image-valign-top .uagb-ifb-icon-wrap,.uagb-infobox-image-valign-top .uagb-ifb-image-content,.uagb-infobox-icon-left.uagb-infobox-image-valign-top .uagb-ifb-content,.uagb-infobox-icon-right.uagb-infobox-image-valign-top .uagb-ifb-content{-webkit-align-self:self-start;align-self:self-start}.uagb-infobox-left{justify-content:flex-start;text-align:left;-webkit-box-pack:start;-ms-flex-pack:start;-webkit-justify-content:flex-start;-moz-box-pack:start}.uagb-infobox-center{justify-content:center;text-align:center;-webkit-box-pack:center;-ms-flex-pack:center;-webkit-justify-content:center;-moz-box-pack:center}.uagb-infobox-right{justify-content:flex-end;text-align:right;-webkit-box-pack:end;-ms-flex-pack:end;-webkit-justify-content:flex-end;-moz-box-pack:end}.uagb-infobox-icon-above-title.uagb-infobox__content-wrap,.uagb-infobox-icon-below-title.uagb-infobox__content-wrap{display:block;width:100%}.uagb-infobox-icon-left-title .uagb-ifb-content>svg,.uagb-infobox-icon-left .uagb-ifb-content>svg{margin-right:10px}.uagb-infobox-icon-right-title .uagb-ifb-content>svg,.uagb-infobox-icon-right .uagb-ifb-content>svg{margin-left:10px}.uagb-infobox-icon-left.uagb-infobox__content-wrap,.uagb-infobox-icon-right.uagb-infobox__content-wrap,.uagb-infobox-icon-left-title .uagb-ifb-left-title-image,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image{display:-webkit-box;display:-ms-flexbox;display:-webkit-flex;display:-moz-box;display:flex;-js-display:flex}.uagb-infobox-icon-left-title .uagb-ifb-left-title-image .uagb-ifb-image-content,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image .uagb-ifb-image-content,.uagb-infobox-icon-left .uagb-ifb-image-content,.uagb-infobox-icon-right .uagb-ifb-image-content{flex-shrink:0;line-height:0}.uagb-infobox-icon-left-title .uagb-ifb-left-title-image .uagb-ifb-title-wrap,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image .uagb-ifb-title-wrap,.uagb-infobox-icon-left .uagb-ifb-content,.uagb-infobox-icon-right .uagb-ifb-content{flex-grow:1}.uagb-infobox-icon-right.uagb-infobox__content-wrap,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image{-webkit-box-pack:end;-ms-flex-pack:end;-webkit-justify-content:flex-end;-moz-box-pack:end;justify-content:flex-end}.uagb-ifb-content img{position:relative;display:inline-block;line-height:0;width:auto;height:auto !important;max-width:100%;border-radius:inherit;-webkit-box-sizing:content-box;-moz-box-sizing:content-box;-webkit-border-radius:inherit}.uagb-infobox-module-link{position:absolute;top:0;right:0;bottom:0;left:0;z-index:4;width:100%;height:100%}.uagb-edit-mode .uagb-infobox-module-link{z-index:2}.uagb-infobox-link-icon-after{margin-right:0;margin-left:5px}.uagb-infobox-link-icon-before{margin-right:5px;margin-left:0}.uagb-infobox-link-icon{-webkit-transition:all 200ms linear;transition:all 200ms linear}.uagb-infobox__content-wrap{box-sizing:border-box;position:relative;width:100%;word-break:break-word;z-index:1}.uagb-ifb-separator{display:inline-block;margin:0;border-top-color:#333;border-top-style:solid;border-top-width:2px;line-height:0}.uagb-ifb-button-wrapper{line-height:1}.uagb-ifb-button-wrapper.uagb-ifb-button-type-text .uagb-infobox-cta-link.wp-block-button__link{background-color:unset;border:none}.uagb-ifb-button-wrapper.uagb-ifb-button-type-text .uagb-infobox-cta-link.wp-block-button__link:hover{background-color:unset;border-color:unset}.uagb-ifb-button-wrapper .uagb-infobox-cta-link{cursor:pointer}.uagb-ifb-button-wrapper .wp-block-button__link svg{fill:currentColor}.uagb-infobox__content-wrap a{-webkit-box-shadow:none;box-shadow:none;text-decoration:none}.uagb-ifb-title-wrap{width:100%}.uagb-ifb-title{margin-block-start:0}.uagb-ifb-title-wrap .uagb-ifb-title-prefix{display:block;padding:0;margin:0}.uagb-infobox__content-wrap.uagb-infobox__content-wrap{position:relative}.uagb-ifb-content{width:100%}.uagb-infobox__content-wrap.uagb-infobox,.uagb-ifb-content,.uagb-ifb-title-wrap,.uagb-ifb-title-prefix *,svg.dashicon.dashicons-upload{z-index:1}a.uagb-infobox-link-wrap{color:inherit}.uagb-ifb-content p:empty{display:none}.uagb-infobox__content-wrap .uagb-ifb-content img{display:inline-block;max-width:100%}.uagb-infobox__content-wrap .uagb-ifb-content svg{display:inline-block}.uagb-infobox__content-wrap .uagb-ifb-icon-wrap,.uagb-infobox-icon-left .uagb-ifb-image-content,.uagb-infobox-icon-right .uagb-ifb-image-content{box-sizing:content-box}.uagb-infobox-cta-link>svg{vertical-align:middle;width:15px;height:15px;font-size:15px}.uagb-infobox-cta-link{display:inline-flex}.block-editor-page #wpwrap .uagb-infobox-cta-link svg,.uagb-infobox-cta-link svg{font-style:normal}.uagb-infobox-icon-left-title .uagb-ifb-icon-wrap,.uagb-infobox-icon-left .uagb-ifb-icon-wrap{margin-right:10px;line-height:0}.uagb-infobox-icon-right-title .uagb-ifb-icon-wrap,.uagb-infobox-icon-right .uagb-ifb-icon-wrap{margin-left:10px;line-height:0}.uagb-infobox-icon-left .uagb-ifb-left-right-wrap,.uagb-infobox-icon-right .uagb-ifb-left-right-wrap,.uagb-infobox-icon-left-title .uagb-ifb-left-title-image,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image{display:-webkit-box;display:-ms-flexbox;display:flex}.uagb-infobox-icon-right .uagb-ifb-left-right-wrap,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image{-webkit-box-pack:end;-ms-flex-pack:end;-webkit-justify-content:flex-end;-moz-box-pack:end;justify-content:flex-end}a.uagb-infbox__link-to-all{position:absolute;top:0;left:0;z-index:3;width:100%;height:100%;box-shadow:none;text-decoration:none;-webkit-box-shadow:none}@media only screen and (max-width: 976px){.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-image-content{padding:0;margin-bottom:20px}.uagb-infobox-stacked-tablet.uagb-reverse-order-tablet.uagb-infobox__content-wrap{display:-webkit-inline-box;display:-ms-inline-flexbox;display:-webkit-inline-flex;display:-moz-inline-box;display:inline-flex;flex-direction:column-reverse;-js-display:inline-flex;-webkit-box-orient:vertical;-webkit-box-direction:reverse;-ms-flex-direction:column-reverse;-webkit-flex-direction:column-reverse;-moz-box-orient:vertical;-moz-box-direction:reverse}.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-content,.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-icon-wrap,.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-image-content{display:block;width:100%;text-align:center}.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-icon-wrap,.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-image-content{margin-right:0;margin-left:0}.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap{display:inline-block}.uagb-infobox-icon-left-title.uagb-infobox-stacked-tablet .uagb-ifb-image-content,.uagb-infobox-icon-left-title.uagb-infobox-stacked-tablet .uagb-ifb-icon-wrap,.uagb-infobox-icon-left.uagb-infobox-stacked-tablet .uagb-ifb-image-content,.uagb-infobox-icon-left.uagb-infobox-stacked-tablet .uagb-ifb-icon-wrap{margin-right:0}.uagb-infobox-icon-right-title.uagb-infobox-stacked-tablet .uagb-ifb-image-content,.uagb-infobox-icon-right-title.uagb-infobox-stacked-tablet .uagb-ifb-icon-wrap,.uagb-infobox-icon-right.uagb-infobox-stacked-tablet .uagb-ifb-image-content,.uagb-infobox-icon-right.uagb-infobox-stacked-tablet .uagb-ifb-icon-wrap{margin-left:0}.uagb-infobox-icon-left-title .uagb-ifb-separator{margin:10px 0}}@media screen and (max-width: 767px){.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap{display:inline-block}.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-image-content,.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-icon-wrap{padding:0;margin-bottom:20px;margin-right:0;margin-left:0}.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap.uagb-reverse-order-mobile{display:-webkit-inline-box;display:-ms-inline-flexbox;display:-webkit-inline-flex;display:-moz-inline-box;display:inline-flex;flex-direction:column-reverse;-js-display:inline-flex;-webkit-box-orient:vertical;-webkit-box-direction:reverse;-ms-flex-direction:column-reverse;-webkit-flex-direction:column-reverse;-moz-box-orient:vertical;-moz-box-direction:reverse}.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-image-content,.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-icon-wrap,.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-content{display:block;width:100%;text-align:center}.uagb-infobox-icon-left-title.uagb-infobox-stacked-mobile .uagb-ifb-image-content,.uagb-infobox-icon-left-title.uagb-infobox-stacked-mobile .uagb-ifb-icon-wrap,.uagb-infobox-icon-left.uagb-infobox-stacked-mobile .uagb-ifb-image-content,.uagb-infobox-icon-left.uagb-infobox-stacked-mobile .uagb-ifb-icon-wrap{margin-right:0}.uagb-infobox-icon-right-title.uagb-infobox-stacked-mobile .uagb-ifb-image-content,.uagb-infobox-icon-right-title.uagb-infobox-stacked-mobile .uagb-ifb-icon-wrap,.uagb-infobox-icon-right.uagb-infobox-stacked-mobile .uagb-ifb-image-content,.uagb-infobox-icon-right.uagb-infobox-stacked-mobile .uagb-ifb-icon-wrap{margin-left:0}.uagb-infobox-icon-left-title .uagb-ifb-separator{margin:10px 0}}.uagb-ifb-icon svg{width:inherit;height:inherit;vertical-align:middle}.uagb-ifb-button-icon{height:15px;width:15px;font-size:15px;vertical-align:middle}.uagb-ifb-button-icon svg{height:inherit;width:inherit;display:inline-block}.uagb-ifb-button-icon.uagb-ifb-align-icon-after{float:right}.uagb-ifb-cta-button{display:inline-block}.uagb-disable-link{pointer-events:none}
.wp-block-uagb-image{display:flex}.wp-block-uagb-image__figure{position:relative;display:flex;flex-direction:column;max-width:100%;height:auto;margin:0}.wp-block-uagb-image__figure img{height:auto;display:flex;max-width:100%;transition:box-shadow 0.2s ease}.wp-block-uagb-image__figure>a{display:inline-block}.wp-block-uagb-image__figure figcaption{text-align:center;margin-top:0.5em;margin-bottom:1em}.wp-block-uagb-image--align-left{text-align:left}.wp-block-uagb-image--align-right{text-align:right}.wp-block-uagb-image--align-center{text-align:center}.wp-block-uagb-image--align-full .wp-block-uagb-image__figure{margin-left:calc(50% - 50vw);margin-right:calc(50% - 50vw);max-width:100vw;width:100vw;height:auto}.wp-block-uagb-image--align-full .wp-block-uagb-image__figure img{height:auto;width:100% !important}.wp-block-uagb-image--align-wide .wp-block-uagb-image__figure img{height:auto;width:100%}.wp-block-uagb-image--layout-overlay__color-wrapper{position:absolute;left:0;top:0;right:0;bottom:0;opacity:0.2;background:rgba(0,0,0,0.5);transition:opacity 0.35s ease-in-out}.wp-block-uagb-image--layout-overlay-link{position:absolute;left:0;right:0;bottom:0;top:0}.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity:1}.wp-block-uagb-image--layout-overlay__inner{position:absolute;left:15px;right:15px;bottom:15px;top:15px;display:flex;align-items:center;justify-content:center;flex-direction:column;border-color:#fff;transition:0.35s ease-in-out}.wp-block-uagb-image--layout-overlay__inner.top-left,.wp-block-uagb-image--layout-overlay__inner.top-center,.wp-block-uagb-image--layout-overlay__inner.top-right{justify-content:flex-start}.wp-block-uagb-image--layout-overlay__inner.bottom-left,.wp-block-uagb-image--layout-overlay__inner.bottom-center,.wp-block-uagb-image--layout-overlay__inner.bottom-right{justify-content:flex-end}.wp-block-uagb-image--layout-overlay__inner.top-left,.wp-block-uagb-image--layout-overlay__inner.center-left,.wp-block-uagb-image--layout-overlay__inner.bottom-left{align-items:flex-start}.wp-block-uagb-image--layout-overlay__inner.top-right,.wp-block-uagb-image--layout-overlay__inner.center-right,.wp-block-uagb-image--layout-overlay__inner.bottom-right{align-items:flex-end}.wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{color:#fff;transition:transform 0.35s, opacity 0.35s ease-in-out;transform:translate3d(0, 24px, 0)}.wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width:30%;border-top-width:2px;border-top-color:#fff;border-top-style:solid;margin-bottom:10px;opacity:0;transition:transform 0.4s, opacity 0.4s ease-in-out;transform:translate3d(0, 30px, 0)}.wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity:0;overflow:visible;color:#fff;transition:transform 0.45s, opacity 0.45s ease-in-out;transform:translate3d(0, 35px, 0)}.wp-block-uagb-image--layout-overlay__inner:hover .uagb-image-heading,.wp-block-uagb-image--layout-overlay__inner:hover .uagb-image-separator,.wp-block-uagb-image--layout-overlay__inner:hover .uagb-image-caption{opacity:1;transform:translate3d(0, 0, 0)}.wp-block-uagb-image--effect-zoomin .wp-block-uagb-image__figure img,.wp-block-uagb-image--effect-zoomin .wp-block-uagb-image__figure .wp-block-uagb-image--layout-overlay__color-wrapper{transform:scale(1);transition:transform 0.35s ease-in-out}.wp-block-uagb-image--effect-zoomin .wp-block-uagb-image__figure:hover img,.wp-block-uagb-image--effect-zoomin .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{transform:scale(1.05)}.wp-block-uagb-image--effect-slide .wp-block-uagb-image__figure img,.wp-block-uagb-image--effect-slide .wp-block-uagb-image__figure .wp-block-uagb-image--layout-overlay__color-wrapper{width:calc(100% + 40px) !important;max-width:none !important;transform:translate3d(-40px, 0, 0);transition:transform 0.35s ease-in-out}.wp-block-uagb-image--effect-slide .wp-block-uagb-image__figure:hover img,.wp-block-uagb-image--effect-slide .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{transform:translate3d(0, 0, 0)}.wp-block-uagb-image--effect-grayscale img{filter:grayscale(0%);transition:0.35s ease-in-out}.wp-block-uagb-image--effect-grayscale:hover img{filter:grayscale(100%)}.wp-block-uagb-image--effect-blur img{filter:blur(0);transition:0.35s ease-in-out}.wp-block-uagb-image--effect-blur:hover img{filter:blur(3px)}
.wp-block-uagb-container.uagb-is-root-container .uagb-block-573dc06d{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-573dc06d .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-573dc06d .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-573dc06d .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-573dc06d .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-573dc06d .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-573dc06d > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: flex-start;justify-content: center;flex-wrap: nowrap;row-gap: 48px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-573dc06d{box-shadow: 0px 0px   #00000070 ;padding-top: 112px;padding-bottom: 112px;padding-left: 40px;padding-right: 40px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 48px;column-gap: 0px;overflow: visible;border-color: inherit;background-color: var(--ast-global-color-4);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-624ff67b{max-width: 65%;width: 100%;}.wp-block-uagb-container.uagb-block-624ff67b .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-624ff67b .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-624ff67b .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-624ff67b .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-624ff67b .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-624ff67b > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: flex-start;justify-content: center;flex-wrap: nowrap;row-gap: 0px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-624ff67b{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;row-gap: 0px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: row;align-items: flex-start;justify-content: center;flex-wrap: nowrap;}.uagb-block-7edef7ac .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-7edef7ac .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-7edef7ac .uagb-ifb-icon svg{fill: #333;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-7edef7ac .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-7edef7ac .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-7edef7ac .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-7edef7ac .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-7edef7ac.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-7edef7ac.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-7edef7ac .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-7edef7ac .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-7edef7ac .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-7edef7ac .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-7edef7ac .uagb-infobox__content-wrap{text-align: left;}.uagb-block-7edef7ac.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-7edef7ac.uagb-infobox__content-wrap{padding-top: 0px;padding-right: 0px;padding-bottom: 0px;padding-left: 0px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-13533f4b{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-13533f4b .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-13533f4b .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-13533f4b .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-13533f4b .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-13533f4b .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-13533f4b > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: flex-start;flex-wrap: nowrap;row-gap: 48px;column-gap: 48px;}.wp-block-uagb-container.uagb-block-13533f4b{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 48px;column-gap: 48px;overflow: visible;border-color: inherit;flex-direction: row;align-items: stretch;justify-content: flex-start;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-ac5bb9d7{max-width: 33%;width: 100%;}.wp-block-uagb-container.uagb-block-ac5bb9d7 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-ac5bb9d7 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-ac5bb9d7 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-ac5bb9d7 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-ac5bb9d7 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-ac5bb9d7 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 16px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-ac5bb9d7{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 16px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-4ef0e025.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-4ef0e025 .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-4ef0e025.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-4ef0e025.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;text-align: center;}.uagb-block-4ef0e025.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-4ef0e025.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-4ef0e025.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-4ef0e025.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-4ef0e025.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-4ef0e025.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-4ef0e025.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-4ef0e025.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-4ef0e025.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: px;height: 368px;}.uagb-block-4ef0e025.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-4ef0e025.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-4ef0e025.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-4ef0e025.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-062d9584 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-062d9584 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-062d9584 .uagb-ifb-icon svg{fill: #333;}.uagb-block-062d9584.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-062d9584 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-062d9584 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-062d9584.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-062d9584.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-062d9584 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-062d9584 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-062d9584 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-062d9584 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-062d9584.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-062d9584.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-062d9584.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-062d9584.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-062d9584 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-062d9584.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 4px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-062d9584.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-062d9584 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-062d9584 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-062d9584 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-062d9584 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-062d9584.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-062d9584.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-062d9584 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-062d9584.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-062d9584 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-062d9584.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-062d9584 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-062d9584 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-062d9584.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-f0b36b2e{max-width: 33%;width: 100%;}.wp-block-uagb-container.uagb-block-f0b36b2e .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-f0b36b2e .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-f0b36b2e .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-f0b36b2e .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-f0b36b2e .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-f0b36b2e > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 16px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-f0b36b2e{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 16px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-26690864.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-26690864 .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-26690864.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-26690864.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;text-align: center;}.uagb-block-26690864.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-26690864.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-26690864.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-26690864.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-26690864.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-26690864.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-26690864.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-26690864.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-26690864.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: px;height: 368px;}.uagb-block-26690864.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-26690864.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-26690864.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-26690864.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-0aef4b77 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-0aef4b77 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-0aef4b77 .uagb-ifb-icon svg{fill: #333;}.uagb-block-0aef4b77.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-0aef4b77 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-0aef4b77 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-0aef4b77.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-0aef4b77.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-0aef4b77 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-0aef4b77 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-0aef4b77 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-0aef4b77 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-0aef4b77.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-0aef4b77.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-0aef4b77.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-0aef4b77.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-0aef4b77 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-0aef4b77.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 4px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-0aef4b77.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-0aef4b77 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-0aef4b77 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-0aef4b77 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-0aef4b77 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-0aef4b77.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-0aef4b77.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-0aef4b77 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-0aef4b77.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-0aef4b77 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-0aef4b77.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-0aef4b77 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-0aef4b77 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-0aef4b77.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-8bc79849{max-width: 33%;width: 100%;}.wp-block-uagb-container.uagb-block-8bc79849 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-8bc79849 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-8bc79849 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-8bc79849 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-8bc79849 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-8bc79849 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 16px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-8bc79849{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 16px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-7f610b7f.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-7f610b7f .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-7f610b7f.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-7f610b7f.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;text-align: center;}.uagb-block-7f610b7f.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-7f610b7f.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-7f610b7f.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-7f610b7f.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-7f610b7f.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-7f610b7f.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-7f610b7f.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-7f610b7f.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-7f610b7f.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 368px;height: 368px;}.uagb-block-7f610b7f.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-7f610b7f.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-7f610b7f.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-7f610b7f.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-45e1a757 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-45e1a757 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-45e1a757 .uagb-ifb-icon svg{fill: #333;}.uagb-block-45e1a757.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-45e1a757 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-45e1a757 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-45e1a757.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-45e1a757.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-45e1a757 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-45e1a757 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-45e1a757 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-45e1a757 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-45e1a757.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-45e1a757.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-45e1a757.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-45e1a757.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-45e1a757 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-45e1a757.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 4px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-45e1a757.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-45e1a757 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-45e1a757 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-45e1a757 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-45e1a757 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-45e1a757.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-45e1a757.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-45e1a757 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-45e1a757.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-45e1a757 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-45e1a757.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-45e1a757 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-45e1a757 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-45e1a757.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-ae2d60c2{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-block-ae2d60c2 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-ae2d60c2 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-ae2d60c2 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-ae2d60c2 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-ae2d60c2 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-ae2d60c2 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: row;align-items: stretch;justify-content: flex-start;flex-wrap: nowrap;row-gap: 48px;column-gap: 48px;}.wp-block-uagb-container.uagb-block-ae2d60c2{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 48px;column-gap: 48px;overflow: visible;border-color: inherit;flex-direction: row;align-items: stretch;justify-content: flex-start;flex-wrap: nowrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-2b49afdf{max-width: 33%;width: 100%;}.wp-block-uagb-container.uagb-block-2b49afdf .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-2b49afdf .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-2b49afdf .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-2b49afdf .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-2b49afdf .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-2b49afdf > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 16px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-2b49afdf{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 16px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-b9de53f3.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-b9de53f3 .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-b9de53f3.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-b9de53f3.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;text-align: center;}.uagb-block-b9de53f3.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-b9de53f3.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-b9de53f3.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-b9de53f3.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-b9de53f3.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-b9de53f3.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-b9de53f3.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-b9de53f3.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-b9de53f3.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 368px;height: 368px;}.uagb-block-b9de53f3.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-b9de53f3.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-b9de53f3.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-b9de53f3.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-3124bf25 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-3124bf25 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-3124bf25 .uagb-ifb-icon svg{fill: #333;}.uagb-block-3124bf25.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-3124bf25 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-3124bf25 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-3124bf25.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-3124bf25.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-3124bf25 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-3124bf25 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-3124bf25 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-3124bf25 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-3124bf25.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-3124bf25.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-3124bf25.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-3124bf25.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-3124bf25 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-3124bf25.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 4px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-3124bf25.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-3124bf25 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-3124bf25 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-3124bf25 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-3124bf25 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-3124bf25.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-3124bf25.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-3124bf25 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-3124bf25.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-3124bf25 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-3124bf25.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-3124bf25 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-3124bf25 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-3124bf25.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-a1eba3d5{max-width: 33%;width: 100%;}.wp-block-uagb-container.uagb-block-a1eba3d5 .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-a1eba3d5 .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-a1eba3d5 .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-a1eba3d5 .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-a1eba3d5 .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-a1eba3d5 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 16px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-a1eba3d5{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 16px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-3214db08.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-3214db08 .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-3214db08.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-3214db08.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;text-align: center;}.uagb-block-3214db08.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-3214db08.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-3214db08.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-3214db08.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-3214db08.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-3214db08.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-3214db08.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-3214db08.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-3214db08.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 368px;height: 368px;}.uagb-block-3214db08.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-3214db08.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-3214db08.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-3214db08.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-29ee3c78 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-29ee3c78 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-29ee3c78 .uagb-ifb-icon svg{fill: #333;}.uagb-block-29ee3c78.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-29ee3c78 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-29ee3c78 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-29ee3c78.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-29ee3c78.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-29ee3c78 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-29ee3c78 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-29ee3c78 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-29ee3c78 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-29ee3c78.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-29ee3c78.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-29ee3c78.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-29ee3c78.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-29ee3c78 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-29ee3c78.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 4px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-29ee3c78.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-29ee3c78 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-29ee3c78 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-29ee3c78 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-29ee3c78 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-29ee3c78.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-29ee3c78.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-29ee3c78 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-29ee3c78.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-29ee3c78 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-29ee3c78.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-29ee3c78 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-29ee3c78 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-29ee3c78.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-0abc14db{max-width: 33%;width: 100%;}.wp-block-uagb-container.uagb-block-0abc14db .uagb-container__shape-top svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-0abc14db .uagb-container__shape.uagb-container__shape-top .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-0abc14db .uagb-container__shape-bottom svg{width: calc( 100% + 1.3px );}.wp-block-uagb-container.uagb-block-0abc14db .uagb-container__shape.uagb-container__shape-bottom .uagb-container__shape-fill{fill: rgba(51,51,51,1);}.wp-block-uagb-container.uagb-block-0abc14db .uagb-container__video-wrap video{opacity: 1;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-0abc14db > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1200px);max-width: var(--inner-content-custom-width);width: 100%;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;row-gap: 16px;column-gap: 0px;}.wp-block-uagb-container.uagb-block-0abc14db{box-shadow: 0px 0px   #00000070 ;padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 16px;column-gap: 0px;overflow: visible;border-color: inherit;flex-direction: column;align-items: center;justify-content: flex-start;flex-wrap: nowrap;}.uagb-block-7a743f1f.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;text-align: left;justify-content: flex-start;align-self: flex-start;}.uagb-block-7a743f1f .wp-block-uagb-image__figure{align-items: flex-start;}.uagb-block-7a743f1f.wp-block-uagb-image--layout-default figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-7a743f1f.wp-block-uagb-image .wp-block-uagb-image__figure figcaption{font-style: normal;text-align: center;}.uagb-block-7a743f1f.wp-block-uagb-image--layout-overlay figure img{box-shadow: 0px 0px 0 #00000070;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-7a743f1f.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 0.2;border-top-left-radius: 6px;border-top-right-radius: 6px;border-bottom-left-radius: 6px;border-bottom-right-radius: 6px;}.uagb-block-7a743f1f.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner{left: 15px;right: 15px;top: 15px;bottom: 15px;}.uagb-block-7a743f1f.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading{font-style: normal;color: #fff;opacity: 1;}.uagb-block-7a743f1f.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-heading a{color: #fff;}.uagb-block-7a743f1f.wp-block-uagb-image--layout-overlay .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 0;}.uagb-block-7a743f1f.wp-block-uagb-image--layout-overlay .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__color-wrapper{opacity: 1;}.uagb-block-7a743f1f.wp-block-uagb-image .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{width: 30%;border-top-width: 2px;border-top-color: #fff;opacity: 0;}.uagb-block-7a743f1f.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: px;height: 368px;}.uagb-block-7a743f1f.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-caption{opacity: 1;}.uagb-block-7a743f1f.wp-block-uagb-image .wp-block-uagb-image__figure:hover .wp-block-uagb-image--layout-overlay__inner .uagb-image-separator{opacity: 1;}.uagb-block-7a743f1f.wp-block-uagb-image--layout-default figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-7a743f1f.wp-block-uagb-image--layout-overlay figure img:hover{box-shadow: 0px 0px 0 #00000070;}.uagb-block-0fe2af38 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-0fe2af38 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;color: #333;}.uagb-block-0fe2af38 .uagb-ifb-icon svg{fill: #333;}.uagb-block-0fe2af38.uagb-infobox__content-wrap .uagb-ifb-icon-wrap svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-0fe2af38 .uagb-ifb-content .uagb-ifb-icon-wrap svg{line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-0fe2af38 .uagb-iconbox-icon-wrap{margin: auto;display: inline-flex;align-items: center;justify-content: center;box-sizing: content-box;width: 30px;height: 30px;line-height: 30px;padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-0fe2af38.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-0fe2af38.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-0fe2af38 .uagb-ifb-content .uagb-ifb-left-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-0fe2af38 .uagb-ifb-content .uagb-ifb-right-title-image svg{width: 30px;line-height: 30px;font-size: 30px;color: #333;fill: #333;}.uagb-block-0fe2af38 .uagb-infobox__content-wrap .uagb-ifb-imgicon-wrap{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;}.uagb-block-0fe2af38 .uagb-infobox .uagb-ifb-image-content img{border-radius: 0px;}.uagb-block-0fe2af38.uagb-infobox__content-wrap img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-0fe2af38.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-right-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-0fe2af38.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-left-title-image > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-0fe2af38.uagb-infobox__content-wrap .uagb-ifb-content > img{padding-left: 0px;padding-right: 0px;padding-top: 0px;padding-bottom: 0px;border-radius: 0px;}.uagb-block-0fe2af38 .uagb-ifb-title-wrap .uagb-ifb-title-prefix{margin-bottom: 10px;margin-top: 5px;}.uagb-block-0fe2af38.wp-block-uagb-info-box .uagb-ifb-title{color: var(--ast-global-color-2);margin-bottom: 4px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-0fe2af38.wp-block-uagb-info-box .uagb-ifb-desc{color: var(--ast-global-color-3);margin-bottom: 0px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-0fe2af38 .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;margin-bottom: 0px;}.uagb-block-0fe2af38 .uagb-infobox__content-wrap .uagb-ifb-separator{width: 30%;border-top-width: 2px;border-top-color: #333;border-top-style: solid;}.uagb-block-0fe2af38 .uagb-ifb-align-icon-after{margin-left: 5px;}.uagb-block-0fe2af38 .uagb-ifb-align-icon-before{margin-right: 5px;}.uagb-block-0fe2af38.uagb-infobox__content-wrap .uagb-ifb-content svg{box-sizing: content-box;}.uagb-block-0fe2af38.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-0fe2af38 .uagb-infobox__content-wrap{text-align: left;}.uagb-block-0fe2af38.uagb-infobox-icon-above-title{text-align: left;}.uagb-block-0fe2af38 .uagb-ifb-content .uagb-ifb-image-content > img{width: 120px;}.uagb-block-0fe2af38.uagb-infobox__content-wrap .uagb-ifb-image-content > img{width: 120px;}.uagb-block-0fe2af38 .uagb-ifb-content .uagb-ifb-left-title-image > img{width: 120px;}.uagb-block-0fe2af38 .uagb-ifb-content .uagb-ifb-right-title-image > img{width: 120px;}.uagb-block-0fe2af38.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}@media only screen and (max-width: 976px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-573dc06d{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-573dc06d > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;row-gap: 40px;}.wp-block-uagb-container.uagb-block-573dc06d{padding-top: 80px;padding-bottom: 80px;padding-left: 24px;padding-right: 24px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 40px;background-color: var(--ast-global-color-4);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-624ff67b{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-624ff67b > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-624ff67b{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;}.uagb-block-7edef7ac.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-7edef7ac .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-7edef7ac .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-7edef7ac .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-13533f4b{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-13533f4b > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;row-gap: 24px;column-gap: 24px;}.wp-block-uagb-container.uagb-block-13533f4b{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 24px;column-gap: 24px;align-items: stretch;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-ac5bb9d7{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-ac5bb9d7 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-ac5bb9d7{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;}.uagb-block-4ef0e025.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 224px;height: 224px;}.uagb-block-4ef0e025.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;}.uagb-block-062d9584.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-062d9584.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-062d9584.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-062d9584 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-062d9584 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-062d9584 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-062d9584 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-062d9584 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-062d9584 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-062d9584.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-062d9584 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-062d9584 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-062d9584.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-f0b36b2e{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-f0b36b2e > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-f0b36b2e{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;}.uagb-block-26690864.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 224px;height: 224px;}.uagb-block-26690864.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;}.uagb-block-0aef4b77.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-0aef4b77.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-0aef4b77.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-0aef4b77 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-0aef4b77 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-0aef4b77 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-0aef4b77 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-0aef4b77 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-0aef4b77 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-0aef4b77.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-0aef4b77 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-0aef4b77 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-0aef4b77.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-8bc79849{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-8bc79849 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-8bc79849{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;}.uagb-block-7f610b7f.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 224px;height: 224px;}.uagb-block-7f610b7f.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;}.uagb-block-45e1a757.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-45e1a757.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-45e1a757.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-45e1a757 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-45e1a757 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-45e1a757 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-45e1a757 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-45e1a757 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-45e1a757 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-45e1a757.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-45e1a757 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-45e1a757 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-45e1a757.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-ae2d60c2{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-ae2d60c2 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;column-gap: 24px;}.wp-block-uagb-container.uagb-block-ae2d60c2{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;column-gap: 24px;align-items: stretch;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-2b49afdf{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-2b49afdf > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-2b49afdf{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;}.uagb-block-b9de53f3.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 224px;height: 224px;}.uagb-block-b9de53f3.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;}.uagb-block-3124bf25.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-3124bf25.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-3124bf25.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-3124bf25 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-3124bf25 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-3124bf25 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-3124bf25 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-3124bf25 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-3124bf25 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-3124bf25.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-3124bf25 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-3124bf25 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-3124bf25.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-a1eba3d5{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-a1eba3d5 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-a1eba3d5{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;}.uagb-block-3214db08.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 224px;height: 224px;}.uagb-block-3214db08.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;}.uagb-block-29ee3c78.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-29ee3c78.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-29ee3c78.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-29ee3c78 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-29ee3c78 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-29ee3c78 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-29ee3c78 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-29ee3c78 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-29ee3c78 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-29ee3c78.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-29ee3c78 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-29ee3c78 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-29ee3c78.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-0abc14db{width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-0abc14db > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 1024px);max-width: var(--inner-content-custom-width);width: 100%;}.wp-block-uagb-container.uagb-block-0abc14db{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;}.uagb-block-7a743f1f.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 224px;height: 224px;}.uagb-block-7a743f1f.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;}.uagb-block-0fe2af38.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-0fe2af38.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-0fe2af38.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-0fe2af38 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-0fe2af38 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-0fe2af38 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-0fe2af38 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-0fe2af38 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-0fe2af38 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-0fe2af38.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-0fe2af38 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-0fe2af38 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-0fe2af38.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}}@media only screen and (max-width: 767px) {.wp-block-uagb-container.uagb-is-root-container .uagb-block-573dc06d{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-573dc06d > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;row-gap: 40px;}.wp-block-uagb-container.uagb-block-573dc06d{padding-top: 64px;padding-bottom: 64px;padding-left: 20px;padding-right: 20px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 40px;background-color: var(--ast-global-color-4);;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-624ff67b{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-624ff67b > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-624ff67b{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top:  !important;margin-bottom:  !important;flex-wrap: wrap;}.uagb-block-7edef7ac.wp-block-uagb-info-box .uagb-ifb-title{margin-bottom: 20px;margin-top: 0px;margin-left: 0px;margin-right: 0px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-7edef7ac .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-7edef7ac .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-7edef7ac .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-7edef7ac .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-7edef7ac.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-13533f4b{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-13533f4b > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;flex-wrap: wrap;row-gap: 48px;}.wp-block-uagb-container.uagb-block-13533f4b{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 48px;align-items: stretch;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-ac5bb9d7{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-ac5bb9d7 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-ac5bb9d7{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;flex-wrap: wrap;}.uagb-block-4ef0e025.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 360px;}.uagb-block-4ef0e025.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;}.uagb-block-062d9584.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-062d9584.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-062d9584 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-062d9584 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-062d9584.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-062d9584 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-062d9584 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-062d9584 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-062d9584 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-062d9584.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-062d9584 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-062d9584 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-062d9584.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-f0b36b2e{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-f0b36b2e > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-f0b36b2e{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;flex-wrap: wrap;}.uagb-block-26690864.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 360px;}.uagb-block-26690864.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;}.uagb-block-0aef4b77.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-0aef4b77.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-0aef4b77 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-0aef4b77 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-0aef4b77.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-0aef4b77 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-0aef4b77 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-0aef4b77 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-0aef4b77 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-0aef4b77.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-0aef4b77 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-0aef4b77 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-0aef4b77.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-8bc79849{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-8bc79849 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-8bc79849{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;flex-wrap: wrap;}.uagb-block-7f610b7f.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 360px;}.uagb-block-7f610b7f.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;}.uagb-block-45e1a757.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-45e1a757.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-45e1a757 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-45e1a757 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-45e1a757.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-45e1a757 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-45e1a757 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-45e1a757 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-45e1a757 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-45e1a757.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-45e1a757 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-45e1a757 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-45e1a757.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-ae2d60c2{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-ae2d60c2 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;align-items: stretch;flex-wrap: wrap;row-gap: 48px;}.wp-block-uagb-container.uagb-block-ae2d60c2{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;row-gap: 48px;align-items: stretch;flex-wrap: wrap;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-2b49afdf{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-2b49afdf > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-2b49afdf{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;flex-wrap: wrap;}.uagb-block-b9de53f3.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 360px;}.uagb-block-b9de53f3.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;}.uagb-block-3124bf25.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-3124bf25.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-3124bf25 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-3124bf25 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-3124bf25.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-3124bf25 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-3124bf25 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-3124bf25 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-3124bf25 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-3124bf25.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-3124bf25 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-3124bf25 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-3124bf25.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-a1eba3d5{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-a1eba3d5 > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-a1eba3d5{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;flex-wrap: wrap;}.uagb-block-3214db08.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 360px;}.uagb-block-3214db08.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;}.uagb-block-29ee3c78.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-29ee3c78.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-29ee3c78 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-29ee3c78 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-29ee3c78.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-29ee3c78 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-29ee3c78 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-29ee3c78 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-29ee3c78 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-29ee3c78.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-29ee3c78 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-29ee3c78 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-29ee3c78.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}.wp-block-uagb-container.uagb-is-root-container .uagb-block-0abc14db{max-width: 100%;width: 100%;}.wp-block-uagb-container.uagb-is-root-container.alignfull.uagb-block-0abc14db > .uagb-container-inner-blocks-wrap{--inner-content-custom-width: min( 100%, 767px);max-width: var(--inner-content-custom-width);width: 100%;flex-wrap: wrap;}.wp-block-uagb-container.uagb-block-0abc14db{padding-top: 0px;padding-bottom: 0px;padding-left: 0px;padding-right: 0px;margin-top: 0px !important;margin-bottom: 0px !important;margin-left: 0px;margin-right: 0px;flex-wrap: wrap;}.uagb-block-7a743f1f.wp-block-uagb-image .wp-block-uagb-image__figure img{object-fit: cover;width: 600px;height: 360px;}.uagb-block-7a743f1f.wp-block-uagb-image{margin-top: 0px;margin-right: 0px;margin-bottom: 0px;margin-left: 0px;}.uagb-block-0fe2af38.uagb-infobox__content-wrap .uagb-ifb-icon-wrap > svg{width: 30px;height: 30px;line-height: 30px;font-size: 30px;}.uagb-block-0fe2af38.uagb-infobox__content-wrap .uagb-ifb-content .uagb-ifb-icon-wrap > svg{line-height: 30px;font-size: 30px;}.uagb-block-0fe2af38 .uagb-ifb-content .uagb-ifb-left-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-0fe2af38 .uagb-ifb-content .uagb-ifb-right-title-image > svg{width: 30px;line-height: 30px;font-size: 30px;}.uagb-block-0fe2af38.uagb-infobox__content-wrap .uagb-ifb-content img{box-sizing: content-box;}.uagb-block-0fe2af38 .uagb-ifb-icon{width: 30px;line-height: 30px;}.uagb-block-0fe2af38 .uagb-ifb-icon > span{font-size: 30px;width: 30px;line-height: 30px;}.uagb-block-0fe2af38 .uagb-iconbox-icon-wrap{width: 30px;height: 30px;line-height: 30px;}.uagb-block-0fe2af38 .uagb-ifb-content .uagb-ifb-image-content img{width: 120px;}.uagb-block-0fe2af38.uagb-infobox__content-wrap .uagb-ifb-image-content img{width: 120px;}.uagb-block-0fe2af38 .uagb-ifb-content .uagb-ifb-left-title-image img{width: 120px;}.uagb-block-0fe2af38 .uagb-ifb-content .uagb-ifb-right-title-image img{width: 120px;}.uagb-block-0fe2af38.uagb-infobox__content-wrap .uagb-infobox-cta-link > svg {margin-left: 5px;}}";s:7:"content";s:7084:"
<div class="wp-block-uagb-container uagb-block-573dc06d alignfull uagb-is-root-container"><div class="uagb-container-inner-blocks-wrap">
<div class="wp-block-uagb-container uagb-block-624ff67b">
<div class="wp-block-uagb-info-box uagb-block-7edef7ac uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h2 class="uagb-ifb-title">Meet Our Talented Team</h2></div><p class="uagb-ifb-desc">Our passionate and dedicated team brings together a diverse range of skills and expertise to deliver exceptional results. From creative visionaries to meticulous strategists, we work seamlessly together to meet and exceed our clients' expectations.</p></div></div>
</div>



<div class="wp-block-uagb-container uagb-block-13533f4b">
<div class="wp-block-uagb-container uagb-block-ac5bb9d7">
<div class="wp-block-uagb-image alignleft uagb-block-4ef0e025 wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-left"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/09/team-skip-11.jpg ,https://websitedemos.net/wp-content/uploads/2023/09/team-skip-11.jpg 780w, https://websitedemos.net/wp-content/uploads/2023/09/team-skip-11.jpg 360w" sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/09/team-skip-11.jpg" alt="" class="uag-image-77967" width="368" height="368" title="" loading="lazy"/></figure></div>



<div class="wp-block-uagb-info-box uagb-block-062d9584 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h5 class="uagb-ifb-title">Jane Cooper</h5></div><p class="uagb-ifb-desc">CEO</p></div></div>
</div>



<div class="wp-block-uagb-container uagb-block-f0b36b2e">
<div class="wp-block-uagb-image alignleft uagb-block-26690864 wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-left"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/09/team-skip-25.jpg ,https://websitedemos.net/wp-content/uploads/2023/09/team-skip-25.jpg 780w, https://websitedemos.net/wp-content/uploads/2023/09/team-skip-25.jpg 360w" sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/09/team-skip-25.jpg" alt="" class="uag-image-78349" width="368" height="368" title="" loading="lazy"/></figure></div>



<div class="wp-block-uagb-info-box uagb-block-0aef4b77 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h5 class="uagb-ifb-title">Wade Warren</h5></div><p class="uagb-ifb-desc">Director</p></div></div>
</div>



<div class="wp-block-uagb-container uagb-block-8bc79849">
<div class="wp-block-uagb-image alignleft uagb-block-7f610b7f wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-left"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/09/team-skip-13.jpg ,https://websitedemos.net/wp-content/uploads/2023/09/team-skip-13.jpg 780w, https://websitedemos.net/wp-content/uploads/2023/09/team-skip-13.jpg 360w" sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/09/team-skip-13.jpg" alt="" class="uag-image-77969" width="368" height="368" title="" loading="lazy"/></figure></div>



<div class="wp-block-uagb-info-box uagb-block-45e1a757 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h5 class="uagb-ifb-title">Esther Howard</h5></div><p class="uagb-ifb-desc">Manager</p></div></div>
</div>
</div>



<div class="wp-block-uagb-container uagb-block-ae2d60c2">
<div class="wp-block-uagb-container uagb-block-2b49afdf">
<div class="wp-block-uagb-image alignleft uagb-block-b9de53f3 wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-left"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/09/team-skip-27.jpg ,https://websitedemos.net/wp-content/uploads/2023/09/team-skip-27-300x300.jpg 780w, https://websitedemos.net/wp-content/uploads/2023/09/team-skip-27.jpg 360w" sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/09/team-skip-27.jpg" alt="" class="uag-image-78358" width="368" height="368" title="" loading="lazy"/></figure></div>



<div class="wp-block-uagb-info-box uagb-block-3124bf25 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h5 class="uagb-ifb-title">Cameron Williamson</h5></div><p class="uagb-ifb-desc">Lead of Operation</p></div></div>
</div>



<div class="wp-block-uagb-container uagb-block-a1eba3d5">
<div class="wp-block-uagb-image alignleft uagb-block-3214db08 wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-left"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/09/team-skip-15.jpg ,https://websitedemos.net/wp-content/uploads/2023/09/team-skip-15.jpg 780w, https://websitedemos.net/wp-content/uploads/2023/09/team-skip-15.jpg 360w" sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/09/team-skip-15.jpg" alt="" class="uag-image-77971" width="368" height="368" title="" loading="lazy"/></figure></div>



<div class="wp-block-uagb-info-box uagb-block-29ee3c78 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h5 class="uagb-ifb-title">Brooklyn Simmons</h5></div><p class="uagb-ifb-desc">Developer</p></div></div>
</div>



<div class="wp-block-uagb-container uagb-block-0abc14db">
<div class="wp-block-uagb-image alignleft uagb-block-7a743f1f wp-block-uagb-image--layout-default wp-block-uagb-image--effect-static wp-block-uagb-image--align-left"><figure class="wp-block-uagb-image__figure"><img srcset="https://websitedemos.net/wp-content/uploads/2023/09/team-skip-16.jpg ,https://websitedemos.net/wp-content/uploads/2023/09/team-skip-16.jpg 780w, https://websitedemos.net/wp-content/uploads/2023/09/team-skip-16.jpg 360w" sizes="(max-width: 480px) 150px" src="https://websitedemos.net/wp-content/uploads/2023/09/team-skip-16.jpg" alt="" class="uag-image-77972" width="368" height="368" title="" loading="lazy"/></figure></div>



<div class="wp-block-uagb-info-box uagb-block-0fe2af38 uagb-infobox__content-wrap  uagb-infobox-icon-above-title uagb-infobox-image-valign-top"><div class="uagb-ifb-content"><div class="uagb-ifb-title-wrap"><h5 class="uagb-ifb-title">Leslie Alexander</h5></div><p class="uagb-ifb-desc">Designer</p></div></div>
</div>
</div>
</div></div>
";}s:8:"id-76342";a:10:{s:5:"title";s:7:"Team 05";s:3:"url";s:46:"https://websitedemos.net/astra-blocks/team-05/";s:3:"tag";a:0:{}s:8:"category";i:829;s:16:"primary-category";s:0:"";s:4:"type";s:5:"block";s:12:"page-builder";s:9:"gutenberg";s:16:"required-plugins";a:0:{}s:10:"stylesheet";s:93844:".wp-block-uagb-container{display:flex;position:relative;box-sizing:border-box;transition-property:box-shadow;transition-duration:0.2s;transition-timing-function:ease}.wp-block-uagb-container .spectra-container-link-overlay{bottom:0;left:0;position:absolute;right:0;top:0;z-index:10}.wp-block-uagb-container.uagb-is-root-container{margin-left:auto;margin-right:auto}.wp-block-uagb-container.alignfull.uagb-is-root-container .uagb-container-inner-blocks-wrap{display:flex;position:relative;box-sizing:border-box;margin-left:auto !important;margin-right:auto !important}.wp-block-uagb-container .uagb-container__video-wrap{height:100%;width:100%;top:0;left:0;position:absolute;overflow:hidden;-webkit-transition:opacity 1s;-o-transition:opacity 1s;transition:opacity 1s}.wp-block-uagb-container .uagb-container__video-wrap video{max-width:100%;width:100%;height:100%;margin:0;line-height:1;border:none;display:inline-block;vertical-align:baseline;-o-object-fit:cover;object-fit:cover;background-size:cover}.st-block-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap>*:not(.wp-block-uagb-container):not(.wp-block-uagb-column):not(.wp-block-uagb-container):not(.wp-block-uagb-section):not(.uagb-container__shape):not(.uagb-container__video-wrap):not(.wp-block-spectra-pro-register):not(.wp-block-spectra-pro-login):not(.uagb-slider-container):not(.spectra-image-gallery__control-lightbox),.st-block-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap,.st-block-container .wp-block-uagb-container>*:not(.wp-block-uagb-container):not(.wp-block-uagb-column):not(.wp-block-uagb-container):not(.wp-block-uagb-section):not(.uagb-container__shape):not(.uagb-container__video-wrap):not(.wp-block-uagb-image):not(.wp-block-spectra-pro-register):not(.wp-block-spectra-pro-login):not(.uagb-slider-container):not(.spectra-container-link-overlay):not(.spectra-image-gallery__control-lightbox):not(.wp-block-uagb-lottie):not(.uagb-faq__outer-wrap){min-width:unset !important;width:100%;position:relative}.st-block-container .ast-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap>.wp-block-uagb-container>ul,.st-block-container .ast-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap>.wp-block-uagb-container ol,.st-block-container .ast-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap>ul,.st-block-container .ast-container .wp-block-uagb-container>.uagb-container-inner-blocks-wrap ol{max-width:-webkit-fill-available;margin-block-start:0;margin-block-end:0;margin-left:20px}.ast-plain-container .editor-styles-wrapper .block-editor-block-list__layout.is-root-container .uagb-is-root-container.wp-block-uagb-container.alignwide{margin-left:auto;margin-right:auto}.uagb-container__shape{overflow:hidden;position:absolute;left:0;width:100%;line-height:0;direction:ltr}.uagb-container__shape-top{top:-3px}.uagb-container__shape-bottom{bottom:-3px}.uagb-container__shape.uagb-container__invert.uagb-container__shape-bottom,.uagb-container__shape.uagb-container__invert.uagb-container__shape-top{-webkit-transform:rotate(180deg);-ms-transform:rotate(180deg);transform:rotate(180deg)}.uagb-container__shape.uagb-container__shape-flip svg{transform:translateX(-50%) rotateY(180deg)}.uagb-container__shape svg{display:block;width:-webkit-calc(100% + 1.3px);width:calc(100% + 1.3px);position:relative;left:50%;-webkit-transform:translateX(-50%);-ms-transform:translateX(-50%);transform:translateX(-50%)}.uagb-container__shape .uagb-container__shape-fill{-webkit-transform-origin:center;-ms-transform-origin:center;transform-origin:center;-webkit-transform:rotateY(0deg);transform:rotateY(0deg)}.uagb-container__shape.uagb-container__shape-above-content{z-index:9;pointer-events:none}.nv-single-page-wrap .nv-content-wrap.entry-content .wp-block-uagb-container.alignfull{margin-left:calc(50% - 50vw);margin-right:calc(50% - 50vw)}@media only screen and (max-width: 767px){.wp-block-uagb-container .wp-block-uagb-advanced-heading{width:-webkit-fill-available !important}}
.uagb-ifb-content>svg *{-webkit-transition:all 0.2s;-o-transition:all 0.2s;transition:all 0.2s}.uagb-ifb-content>svg,.uagb-ifb-content{display:inline-block}.uagb-ifb-content>svg{vertical-align:middle;width:inherit;height:inherit;font-style:initial}.uagb-ifb-content .uagb-ifb-icon-wrap svg{box-sizing:content-box;width:inherit;height:inherit}.uagb-ifb-button-wrapper:empty{display:none}div.uagb-ifb-button-wrapper a.uagb-infobox-cta-link,div.uagb-ifb-cta a.uagb-infobox-cta-link,.entry .entry-content a.uagb-infobox-cta-link,a.uagb-infobox-link-wrap,.entry .entry-content a.uagb-infobox-link-wrap{text-decoration:none;align-items:center}.uagb-infobox-icon-left-title.uagb-infobox-image-valign-middle .uagb-ifb-title-wrap,.uagb-infobox-icon-right-title.uagb-infobox-image-valign-middle .uagb-ifb-title-wrap,.uagb-infobox-image-valign-middle .uagb-ifb-icon-wrap,.uagb-infobox-image-valign-middle .uagb-ifb-image-content,.uagb-infobox-icon-left.uagb-infobox-image-valign-middle .uagb-ifb-content,.uagb-infobox-icon-right.uagb-infobox-image-valign-middle .uagb-ifb-content{-ms-flex-item-align:center;-webkit-align-self:center;align-self:center}.uagb-infobox-icon-left-title.uagb-infobox-image-valign-top .uagb-ifb-title-wrap,.uagb-infobox-icon-right-title.uagb-infobox-image-valign-top .uagb-ifb-title-wrap,.uagb-infobox-image-valign-top .uagb-ifb-icon-wrap,.uagb-infobox-image-valign-top .uagb-ifb-image-content,.uagb-infobox-icon-left.uagb-infobox-image-valign-top .uagb-ifb-content,.uagb-infobox-icon-right.uagb-infobox-image-valign-top .uagb-ifb-content{-webkit-align-self:self-start;align-self:self-start}.uagb-infobox-left{justify-content:flex-start;text-align:left;-webkit-box-pack:start;-ms-flex-pack:start;-webkit-justify-content:flex-start;-moz-box-pack:start}.uagb-infobox-center{justify-content:center;text-align:center;-webkit-box-pack:center;-ms-flex-pack:center;-webkit-justify-content:center;-moz-box-pack:center}.uagb-infobox-right{justify-content:flex-end;text-align:right;-webkit-box-pack:end;-ms-flex-pack:end;-webkit-justify-content:flex-end;-moz-box-pack:end}.uagb-infobox-icon-above-title.uagb-infobox__content-wrap,.uagb-infobox-icon-below-title.uagb-infobox__content-wrap{display:block;width:100%}.uagb-infobox-icon-left-title .uagb-ifb-content>svg,.uagb-infobox-icon-left .uagb-ifb-content>svg{margin-right:10px}.uagb-infobox-icon-right-title .uagb-ifb-content>svg,.uagb-infobox-icon-right .uagb-ifb-content>svg{margin-left:10px}.uagb-infobox-icon-left.uagb-infobox__content-wrap,.uagb-infobox-icon-right.uagb-infobox__content-wrap,.uagb-infobox-icon-left-title .uagb-ifb-left-title-image,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image{display:-webkit-box;display:-ms-flexbox;display:-webkit-flex;display:-moz-box;display:flex;-js-display:flex}.uagb-infobox-icon-left-title .uagb-ifb-left-title-image .uagb-ifb-image-content,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image .uagb-ifb-image-content,.uagb-infobox-icon-left .uagb-ifb-image-content,.uagb-infobox-icon-right .uagb-ifb-image-content{flex-shrink:0;line-height:0}.uagb-infobox-icon-left-title .uagb-ifb-left-title-image .uagb-ifb-title-wrap,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image .uagb-ifb-title-wrap,.uagb-infobox-icon-left .uagb-ifb-content,.uagb-infobox-icon-right .uagb-ifb-content{flex-grow:1}.uagb-infobox-icon-right.uagb-infobox__content-wrap,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image{-webkit-box-pack:end;-ms-flex-pack:end;-webkit-justify-content:flex-end;-moz-box-pack:end;justify-content:flex-end}.uagb-ifb-content img{position:relative;display:inline-block;line-height:0;width:auto;height:auto !important;max-width:100%;border-radius:inherit;-webkit-box-sizing:content-box;-moz-box-sizing:content-box;-webkit-border-radius:inherit}.uagb-infobox-module-link{position:absolute;top:0;right:0;bottom:0;left:0;z-index:4;width:100%;height:100%}.uagb-edit-mode .uagb-infobox-module-link{z-index:2}.uagb-infobox-link-icon-after{margin-right:0;margin-left:5px}.uagb-infobox-link-icon-before{margin-right:5px;margin-left:0}.uagb-infobox-link-icon{-webkit-transition:all 200ms linear;transition:all 200ms linear}.uagb-infobox__content-wrap{box-sizing:border-box;position:relative;width:100%;word-break:break-word;z-index:1}.uagb-ifb-separator{display:inline-block;margin:0;border-top-color:#333;border-top-style:solid;border-top-width:2px;line-height:0}.uagb-ifb-button-wrapper{line-height:1}.uagb-ifb-button-wrapper.uagb-ifb-button-type-text .uagb-infobox-cta-link.wp-block-button__link{background-color:unset;border:none}.uagb-ifb-button-wrapper.uagb-ifb-button-type-text .uagb-infobox-cta-link.wp-block-button__link:hover{background-color:unset;border-color:unset}.uagb-ifb-button-wrapper .uagb-infobox-cta-link{cursor:pointer}.uagb-ifb-button-wrapper .wp-block-button__link svg{fill:currentColor}.uagb-infobox__content-wrap a{-webkit-box-shadow:none;box-shadow:none;text-decoration:none}.uagb-ifb-title-wrap{width:100%}.uagb-ifb-title{margin-block-start:0}.uagb-ifb-title-wrap .uagb-ifb-title-prefix{display:block;padding:0;margin:0}.uagb-infobox__content-wrap.uagb-infobox__content-wrap{position:relative}.uagb-ifb-content{width:100%}.uagb-infobox__content-wrap.uagb-infobox,.uagb-ifb-content,.uagb-ifb-title-wrap,.uagb-ifb-title-prefix *,svg.dashicon.dashicons-upload{z-index:1}a.uagb-infobox-link-wrap{color:inherit}.uagb-ifb-content p:empty{display:none}.uagb-infobox__content-wrap .uagb-ifb-content img{display:inline-block;max-width:100%}.uagb-infobox__content-wrap .uagb-ifb-content svg{display:inline-block}.uagb-infobox__content-wrap .uagb-ifb-icon-wrap,.uagb-infobox-icon-left .uagb-ifb-image-content,.uagb-infobox-icon-right .uagb-ifb-image-content{box-sizing:content-box}.uagb-infobox-cta-link>svg{vertical-align:middle;width:15px;height:15px;font-size:15px}.uagb-infobox-cta-link{display:inline-flex}.block-editor-page #wpwrap .uagb-infobox-cta-link svg,.uagb-infobox-cta-link svg{font-style:normal}.uagb-infobox-icon-left-title .uagb-ifb-icon-wrap,.uagb-infobox-icon-left .uagb-ifb-icon-wrap{margin-right:10px;line-height:0}.uagb-infobox-icon-right-title .uagb-ifb-icon-wrap,.uagb-infobox-icon-right .uagb-ifb-icon-wrap{margin-left:10px;line-height:0}.uagb-infobox-icon-left .uagb-ifb-left-right-wrap,.uagb-infobox-icon-right .uagb-ifb-left-right-wrap,.uagb-infobox-icon-left-title .uagb-ifb-left-title-image,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image{display:-webkit-box;display:-ms-flexbox;display:flex}.uagb-infobox-icon-right .uagb-ifb-left-right-wrap,.uagb-infobox-icon-right-title .uagb-ifb-right-title-image{-webkit-box-pack:end;-ms-flex-pack:end;-webkit-justify-content:flex-end;-moz-box-pack:end;justify-content:flex-end}a.uagb-infbox__link-to-all{position:absolute;top:0;left:0;z-index:3;width:100%;height:100%;box-shadow:none;text-decoration:none;-webkit-box-shadow:none}@media only screen and (max-width: 976px){.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-image-content{padding:0;margin-bottom:20px}.uagb-infobox-stacked-tablet.uagb-reverse-order-tablet.uagb-infobox__content-wrap{display:-webkit-inline-box;display:-ms-inline-flexbox;display:-webkit-inline-flex;display:-moz-inline-box;display:inline-flex;flex-direction:column-reverse;-js-display:inline-flex;-webkit-box-orient:vertical;-webkit-box-direction:reverse;-ms-flex-direction:column-reverse;-webkit-flex-direction:column-reverse;-moz-box-orient:vertical;-moz-box-direction:reverse}.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-content,.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-icon-wrap,.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-image-content{display:block;width:100%;text-align:center}.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-icon-wrap,.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap .uagb-ifb-image-content{margin-right:0;margin-left:0}.uagb-infobox-stacked-tablet.uagb-infobox__content-wrap{display:inline-block}.uagb-infobox-icon-left-title.uagb-infobox-stacked-tablet .uagb-ifb-image-content,.uagb-infobox-icon-left-title.uagb-infobox-stacked-tablet .uagb-ifb-icon-wrap,.uagb-infobox-icon-left.uagb-infobox-stacked-tablet .uagb-ifb-image-content,.uagb-infobox-icon-left.uagb-infobox-stacked-tablet .uagb-ifb-icon-wrap{margin-right:0}.uagb-infobox-icon-right-title.uagb-infobox-stacked-tablet .uagb-ifb-image-content,.uagb-infobox-icon-right-title.uagb-infobox-stacked-tablet .uagb-ifb-icon-wrap,.uagb-infobox-icon-right.uagb-infobox-stacked-tablet .uagb-ifb-image-content,.uagb-infobox-icon-right.uagb-infobox-stacked-tablet .uagb-ifb-icon-wrap{margin-left:0}.uagb-infobox-icon-left-title .uagb-ifb-separator{margin:10px 0}}@media screen and (max-width: 767px){.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap{display:inline-block}.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-image-content,.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-icon-wrap{padding:0;margin-bottom:20px;margin-right:0;margin-left:0}.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap.uagb-reverse-order-mobile{display:-webkit-inline-box;display:-ms-inline-flexbox;display:-webkit-inline-flex;display:-moz-inline-box;display:inline-flex;flex-direction:column-reverse;-js-display:inline-flex;-webkit-box-orient:vertical;-webkit-box-direction:reverse;-ms-flex-direction:column-reverse;-webkit-flex-direction:column-reverse;-moz-box-orient:vertical;-moz-box-direction:reverse}.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-image-content,.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-icon-wrap,.uagb-infobox-stacked-mobile.uagb-infobox__content-wrap .uagb-ifb-content{display:block;width:100%;text-align:center}.uagb-infobox-icon-left-title.uagb-infobox-stacked-mobile .uagb-ifb-image-content,.uagb-infobox-icon-left-title.uagb-infobox-stacked-mobile .uagb-ifb-icon-wrap,.uagb-infobox-icon-left.uagb-infobox-stacked-mobile .uagb-ifb-image-content,.uagb-infobox-icon-left.uagb-infobox-stacked-mobile .uagb-ifb-icon-wrap{margin-right:0}.uagb-infobox-icon-right-title.uagb-infobox-stacked-mobile .uagb-ifb-image-content,.uagb-infobox-icon-right-title.uagb-infobox-stacked-mobile .uagb-ifb-icon-wrap,.uagb-infobox-icon-right.uagb-infobox-stacked-mobile .uagb-ifb-image-content,.uagb-infobox-icon-right.uagb-infobox-stacked-mobile .uagb-ifb-icon-wrap{margin-left:0}.uagb-infobox-icon-left-title .uagb-ifb-separator{margin:10px 0}}.uagb-ifb-icon svg{width:inherit;height:inherit;vertical-align:middle}.uagb-ifb-button-icon{height:15px;width:15px;font-size:15px;vertical-align:middle}.uagb-ifb-button-icon svg{height:inherit;width:inherit;display:inline-block}.uagb-ifb-button-icon.uagb-ifb-align-icon-after{float:right}.uagb-ifb-cta-button{display:inline-block}.uagb-disable-link{pointer-events:none}
